Contents

Introduction

Prerequisites

Requirements

Components Used

Background Information

Configure

Verify

Troubleshoot

Introduction

This document describes how to configure an Adaptive Security Appliance (ASA) IPsec Virtual Tunnel Interface (VTI) connection to Azure.

Prerequisites

Requirements

Cisco recommends that you have knowledge of these topics:

- An ASA connected directly to the Internet with a public static IPv4 address that runs ASA 9.8.1 or later.

- An Azure account

Components Used

This document is not restricted to specific software and hardware versions.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, ensure that you understand the potential impact of any command.

Background Information

In ASA 9.8.1, the IPsec VTI feature was extended to utilize IKEv2, however, it is still limited to sVTI IPv4 over IPv4. This configuration guide was produced with the use of the ASA CLI interface and the Azure Portal. The configuration of the Azure portal can also be performed by PowerShell or API. For more information about the Azure configuration methods, refer to the Azure documentation.

Note: Currently, VTI is only supported in single-context, routed mode.

Configure

This guide assumes that the Azure cloud has not been configured. Some of these steps can be skipped if the resources are already established.

Step 1. Configure a network within Azure.

This is the network address space that lives in the Azure Cloud. This address space must be large enough in order to accommodate sub-networks within them as shown in the image.

Name

A Name for the IP Address Space Hosted in the Cloud

Address Space

The whole CIDR range hosted in Azure. In this example, 10.1.0.0/16 is used.

Subnet Name

The name for the first subnet created within the virtual network to which VMs are usually attached. A subnet called default is usually created.

Subnet Address range

A subnet created within the Virtual Network.

Step 2. Modify the Virtual Network in order to create a Gateway Subnet.

Navigate to the Virtual network and add a gateway subnet. In this example, 10.1.1.0/24 is used.

Step 3. Create a Virtual Network Gateway.

This is the VPN endpoint that is hosted in the cloud. This is the device that the ASA builds the IPsec tunnel with. This step also creates a public IP which is assigned to the Virtual network gateway.  This step can take 15 - 20 minutes to complete.

Name

Name for the Virtual Network Gateway

Gateway Type

Select VPN as this is an IPsec VPN.

VPN Type

Select Route-based because this is a VTI. Policy-based is used when a crypto map VPN is done.

SKU

Need to select VpnGw1 or greater based on the amount of traffic needed. Basic does not support

Border Gateway Protocol (BGP).

Enabled active/active mode

Do not enable. At the time of posting, the ASA does not have the capability to source the BGP session from a loopback

or inside the interface. Azure only allows 1 IP address for the BGP peering.

Public IP address

Create a new IP address and assign a name to the resource.

Configure BGP ASN

Check this box to enable BGP on the link.

ASN

Leave this as the default 65515. This is the ASN Azure that presents itself.

Step 4. Create a Local Network Gateway.

A Local network gateway is the resource that represents the ASA.

Name

A Name for the ASA

IP Address

The public IP address of the ASA's outside interface.

Address Space

The subnet is configured on the VTI later.

Configure BGP Settings

Check this to enable BGP.

ASN

This ASN is configured on the ASA.

BGP peer IP address

The IP address is configured on the ASA VTI interface.

Step 5. Create a new connection between the Virtual network gateway and the Local network gateway as shown in the image.

Step 6. Configure the ASA.

First, enable IKEv2 on the outside interface and configure the IKEv2 policies.

crypto ikev2 policy 10

encryption aes-gcm-256 aes-gcm-192 aes-gcm

integrity null

group 14 5 2

prf sha512 sha384 sha256 sha

lifetime seconds 86400

crypto ikev2 policy 20

encryption aes-256 aes-192 aes

integrity sha512 sha384 sha256 sha

group 14 5 2

prf sha512 sha384 sha256 sha

lifetime seconds 86400

crypto ikev2 enable outside

Step 6. Configure an IPsec transform set and an IPsec profile.

crypto ipsec ikev2 ipsec-proposal AZURE-PROPOSAL

protocol esp encryption aes-256

protocol esp integrity sha-256

crypto ipsec profile AZURE-PROPOSAL

set ikev2 ipsec-proposal AZURE-PROPOSAL

Step 8. Configure the tunnel-group.

Retrieve the Public IPv4 address of the Virtual Network Gateway created in Step 3, as shown in the image.

Then, configure on the ASA, a group-policy and tunnel-group with the pre-shared-key defined in Step 3.

group-policy AZURE internal

group-policy AZURE attributes

vpn-tunnel-protocol ikev2

tunnel-group A.A.A.A type ipsec-l2l

tunnel-group A.A.A.A general-attributes

default-group-policy AZURE

tunnel-group A.A.A.A ipsec-attributes

ikev2 remote-authentication pre-shared-key *****

ikev2 local-authentication pre-shared-key *****

Step 9. Configure the tunnel interface.

In Step 4, (configure the Local Network Gateway) a network address and an IP address for the BGP connection was configured. That is the IP address and network to configure on the VTI.

interface Tunnel1

nameif AZURE

ip address 192.168.100.1 255.255.255.252

tunnel source interface outside

tunnel destination A.A.A.A

tunnel mode ipsec ipv4

tunnel protection ipsec profile AZURE-PROPOSAL

no shutdown

Step 10.

Option 1. Configure dynamic routing. Exchange routes with Azure with the use of BGP.

Locate the IP address of the BGP router in Azure to view the configuration of the virtual network gateway created in step 3.  In this example, it is 10.1.2.254.

On the ASA, configure a static route that points to 10.1.2.254 out the VTI Tunnel. In this example, 192.168.100.2 is within the same subnet as the VTI. Even though no device has that IP address, the ASA installs the route that points out the VTI interface.

route AZURE 10.1.2.254 255.255.255.255 192.168.100.2 1

Then,  configure BGP on the ASA. The network 192.168.2.0/24 is the ASA's inside interface and a route that is propagated into the cloud. In addition, the networks configured in Azure are advertised to the ASA.

router bgp 65000

bgp log-neighbor-changes

bgp graceful-restart

address-family ipv4 unicast

neighbor 10.1.2.254 remote-as 65515

neighbor 10.1.2.254 ebgp-multihop 255

neighbor 10.1.2.254 activate

network 192.168.2.0

network 192.168.100.0 mask 255.255.255.252

no auto-summary

no synchronization

exit-address-family

Option 2. Configure static routing - statically configure routes on both the ASA and Azure. Configure the ASA to send traffic to the Azure networks over the VTI tunnel.

route AZURE 10.1.0.0 255.255.0.0 192.168.100.2 1

Modify the Local Network Gateway created in Step 4 with networks that exist behind the ASA and the subnet on the tunnel interface, and add the prefixes under the Add Additional Network Spaces section.

Verify

Use this section in order to confirm that your configuration works properly.

Step 1. Verify that an IKEv2 session is established with command show crypto ikev2 sa.

ciscoasa# show crypto ikev2 sa

IKEv2 SAs:

Session-id:6, Status:UP-ACTIVE, IKE count:1, CHILD count:1

Tunnel-id Local                                               Remote                                                  Status         Role

2006974029 B.B.B.B.    /500                                   A.A.A.A/500                                             READY          INITIATOR

Encr: AES-CBC, keysize: 256, Hash: SHA96, DH Grp:2, Auth sign: PSK, Auth verify: PSK

Life/Active Time: 86400/4640 sec

Child sa: local selector  0.0.0.0/0 - 255.255.255.255/65535

remote selector 0.0.0.0/0 - 255.255.255.255/65535

ESP spi in/out: 0x74e90416/0xba17723a

Step 2. Verify that an IPsec SA is also negotiated with the use of the show crypto ipsec sa command.

ciscoasa# show crypto ipsec sa

interface: AZURE

Crypto map tag: __vti-crypto-map-3-0-1, seq num: 65280, local addr: B.B.B.B

local ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

remote ident (addr/mask/prot/port): (0.0.0.0/0.0.0.0/0/0)

current_peer: A.A.A.A

#pkts encaps: 240, #pkts encrypt: 240, #pkts digest: 240

#pkts decaps: 377, #pkts decrypt: 377, #pkts verify: 377

#pkts compressed: 0, #pkts decompressed: 0

#pkts not compressed: 240, #pkts comp failed: 0, #pkts decomp failed: 0

#pre-frag successes: 0, #pre-frag failures: 0, #fragments created: 0

#PMTUs sent: 0, #PMTUs rcvd: 0, #decapsulated frgs needing reassembly: 0

#TFC rcvd: 0, #TFC sent: 0

#Valid ICMP Errors rcvd: 0, #Invalid ICMP Errors rcvd: 0

#send errors: 0, #recv errors: 0

local crypto endpt.: B.B.B.B/500, remote crypto endpt.: A.A.A.A/500

path mtu 1500, ipsec overhead 78(44), media mtu 1500

PMTU time remaining (sec): 0, DF policy: copy-df

ICMP error validation: disabled, TFC packets: disabled

current outbound spi: BA17723A

current inbound spi : 74E90416

inbound esp sas:

spi: 0x74E90416 (1961427990)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, IKEv2, VTI, }

slot: 0, conn_id: 1722, crypto-map: __vti-crypto-map-3-0-1

sa timing: remaining key lifetime (kB/sec): (3962863/24100)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0xFFFFFFFF 0xFFFFFFFF

outbound esp sas:

spi: 0xBA17723A (3122098746)

SA State: active

transform: esp-aes-256 esp-sha-256-hmac no compression

in use settings ={L2L, Tunnel, IKEv2, VTI, }

slot: 0, conn_id: 1722, crypto-map: __vti-crypto-map-3-0-1

sa timing: remaining key lifetime (kB/sec): (4008947/24100)

IV size: 16 bytes

replay detection support: Y

Anti replay bitmap:

0x00000000 0x00000001

ciscoasa#

Step 3. Verify connectivity over the tunnel to the BGP remote router with the use of ping and ping tcp in order to validate layer 3 routing and layer 4 connectivity for BGP or the endpoint resources if you use static routing.

ciscoasa# ping 10.1.2.254

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.2.254, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 40/42/50 ms

ciscoasa# ping tcp 10.1.2.254 179

Type escape sequence to abort.

No source specified. Pinging from identity interface.

Sending 5 TCP SYN requests to 10.1.2.254 port 179

from 192.168.100.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 41/42/42 ms

ciscoasa#

Step 4. When you use BGP, verify BGP connectivity routes received and advertised to Azure and the routing table of the ASA.

ciscoasa# show bgp summary

BGP router identifier 192.168.100.1, local AS number 65000

BGP table version is 6, main routing table version 6

4 network entries using 800 bytes of memory

5 path entries using 400 bytes of memory

2/2 BGP path/bestpath attribute entries using 416 bytes of memory

1 BGP AS-PATH entries using 24 bytes of memory

0 BGP route-map cache entries using 0 bytes of memory

0 BGP filter-list cache entries using 0 bytes of memory

BGP using 1640 total bytes of memory

BGP activity 14/10 prefixes, 17/12 paths, scan interval 60 secs

Neighbor        V           AS MsgRcvd MsgSent   TblVer  InQ OutQ Up/Down  State/PfxRcd

10.1.2.254      4        65515 73      60             6    0    0 01:02:26  3

ciscoasa# show bgp neighbors 10.1.2.254 routes

BGP table version is 6, local router ID is 192.168.100.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop        Metric LocPrf Weight  Path

*> 10.1.0.0/16      10.1.2.254                         0  65515 i   <<< This is the virtual network defined in Azure

*  192.168.100.0/30 10.1.2.254                         0  65515 i

r> 192.168.100.1/32 10.1.2.254                         0  65515 i

Total number of prefixes 3

ciscoasa# show bgp neighbors 10.1.2.254 advertised-routes

BGP table version is 6, local router ID is 192.168.100.1

Status codes: s suppressed, d damped, h history, * valid, > best, i - internal,

r RIB-failure, S Stale, m multipath

Origin codes: i - IGP, e - EGP, ? - incomplete

Network          Next Hop        Metric LocPrf Weight  Path

*> 192.168.2.0      0.0.0.0              0         32768  i        <<< These are the routes being advertised to Azure

*> 192.168.100.0/30 0.0.0.0              0         32768  i        <<<

Total number of prefixes 2

ciscoasa#

ciscoasa# show route

Codes: L - local, C - connected, S - static, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, V - VPN

i - IS-IS, su - IS-IS summary, L1 - IS-IS level-1, L2 - IS-IS level-2

ia - IS-IS inter area, * - candidate default, U - per-user static route

o - ODR, P - periodic downloaded static route, + - replicated route

Gateway of last resort is 10.1.251.33 to network 0.0.0.0

S*       0.0.0.0 0.0.0.0 [1/0] via B.B.B.C, outside

B        10.1.0.0 255.255.0.0 [20/0] via 10.1.1.254, 01:03:33

S        10.1.2.254 255.255.255.255 [1/0] via 192.168.100.2, AZURE

C        B.B.B.A 255.255.255.224 is directly connected, outside

L        B.B.B.B 255.255.255.255 is directly connected, outside

C        192.168.2.0 255.255.255.0 is directly connected, inside

L        192.168.2.2 255.255.255.255 is directly connected, inside

C        192.168.100.0 255.255.255.252 is directly connected, AZURE

L        192.168.100.1 255.255.255.255 is directly connected, AZURE

Step 5. Ping a device over the tunnel. In this example, it is an Ubuntu VM that runs in Azure.

ciscoasa# ping 10.1.0.4

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.1.0.4, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 40/42/50 ms

View the effective routes on the remote VM now. They must show the routes the ASA advertised to the cloud as shown in the image.

Troubleshoot

There is currently no specific information available to troubleshoot this configuration.