Table of Contents

DocOverview

Cisco Prime NAM Documentation Overview 6.0

January 22, 2014

This document roadmap describes the Cisco Prime Network Analysis Module (NAM) documentation and provides links to access it and other related documentation online.

Suggest ways Cisco technical documentation can be improved and better serve your needs. Click here to participate in the Technical Documentation Ideas forum.

Contents

- Device Support

- Hardware Information

- Software Documentation

- Cisco NAM NetFlow-Related Documentation

- Other Useful Documentation

- Regulatory Compliance and Safety Information

- Cisco Open Source Licensing Information

To navigate from the Cisco.com home page, click Support > All Products > Cloud and Systems Management > Network Analysis Modules (NAM) Products > Cisco Prime Network Analysis Module Software or click here .

Note We sometimes update the documentation after original publication. Therefore, you should review the documentation on Cisco.com for any updates.

Device Support

To view device support information including which Cisco software versions can be used with a particular Cisco NAM hardware product or module, as well as interoperable device information, see the NAM Compatibility Matrix on Cisco.com.

Hardware Information

The following hardware installation guides are available for the Cisco Prime Network Analysis Module (NAM) product.

- Cisco Nexus 7000 Series Network Analysis Module (NAM-NX1) Quick Start Guide

- Cisco Prime Network Analysis Module (NAM) 2300 Series Appliances Installation and Configuration Guides

- Cisco Prime Network Analysis Module (NAM-3) Catalyst 6500 Series Switch Installation and Configuration Note

- Cisco Prime Network Analysis Module (NAM) for ISR G2 SM-SRE Installation and Configuration Guide

- Cisco Prime Network Analysis Module (NAM) for Nexus 1110/1010 Installation and Configuration Guide

- Cisco NAM Appliances Installation and Configuration Note 2204

- Cisco NAM Appliances Installation and Configuration Note 2220

Software Documentation

The following software documentation is available.

Documentation Title

What Is Included

Cisco Prime Network Analysis Module (NAM) Release Notes

Known problems and workarounds.

Upgrading the Cisco Prime Network Analysis Module Software to 6.0(2)

Upgrading with the CLI and helper utility, supported upgrade paths, and other important details.

Cisco Prime Network Analysis Module (NAM) User Guide

Getting started and user reference information.

Cisco Prime Network Analysis Module (NAM) Command Reference Guide

Command-line interface (CLI) details to configure and maintain Prime NAM.

Cisco Prime Virtual Network Analysis Module (vNAM) Installation and Configuration Guide

Installing the virtual appliance.

Open Source Used in Cisco Prime Network Analysis Module (NAM)

License information for open-source software.

Cisco Prime Network Analysis Module (NAM) Compatibility Matrix

Software compatibility matrix information for various NAM platforms.

Cisco Prime Network Analysis Module (NAM) Software API Guide

Contact your Cisco support representative for information on accessing this document.

FPGA/EPLD Upgrade Note for Cisco Prime NAM-NX1, 6.0

Upgrading the FPGA image in your Cisco Nexus 7000 Series NAM-NX1.

All Cisco Prime NAM end-user documentation is available on Cisco.com at http://www.cisco.com/en/US/products/sw/cscowork/ps5401/tsd_products_support_series_home.html .

Cisco NAM NetFlow-Related Documentation

Click the link to see a list of:

- NetFlow Technology Configuration Guides

- Cisco NetFlow Technical Reference Guides

Other Useful Documentation

To open a document, click the link provided:

- Cisco Nexus 7000 Series FPGA/EPLD Upgrade Release Notes, Release 6.2

- Cisco Nexus 7000 Series Hardware Installation and Reference Guide

- Installing Cisco Network Modules and Service Modules in Cisco Access Routers

- Cisco Catalyst 6500 Series Switches Interfaces and Modules

- Cisco UCS C-Series Servers Documentation Roadmap

Regulatory Compliance and Safety Information

Click the link to open the document:

- Regulatory Compliance and Safety Information for the Cisco NAM 2300 Series Appliances

- Regulatory Compliance and Safety Information for the Cisco NAM 2200 Series Appliances

Cisco Open Source Licensing Information

Cisco Prime Network Analysis Module (NAM) , Copyright (c) 2005-2014 by Cisco Systems, Inc.

For detailed information, go to: Cisco Prime Network Analysis Module Third Party and Open Source Copyright Notices .

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, submitting a service request, and gathering additional information, see the monthly What’s New in Cisco Product Documentation , which also lists all new and revised Cisco technical documentation, at:

http://www.cisco.com/en/US/docs/general/whatsnew/whatsnew.html

Subscribe to the What’s New in Cisco Product Documentation as a Really Simple Syndication (RSS) feed and set content to be delivered directly to your desktop using a reader application. The RSS feeds are a free service and Cisco currently supports RSS Version 2.0.

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2014 Cisco Systems, Inc. All rights reserved.