المحتويات

المقدمة

المتطلبات الأساسية

المتطلبات

المكونات المستخدمة

معلومات أساسية

خيارات الاستخدام

بوكلي

أمر OCI-P

مخطط XML

مثال معملي

مثال BWCLI

مثال على السجل

معلومات ذات صلة

المقدمة

يصف هذا المستند إستخدام ميزة BroadWorks switchDeviceType.

المتطلبات الأساسية

المتطلبات

لا توجد متطلبات خاصة لهذا المستند.

المكونات المستخدمة

لا يقتصر هذا المستند على إصدارات برامج ومكونات مادية معينة.

تم إنشاء المعلومات الواردة في هذا المستند من الأجهزة الموجودة في بيئة معملية خاصة. بدأت جميع الأجهزة المُستخدمة في هذا المستند بتكوين ممسوح (افتراضي). إذا كانت شبكتك قيد التشغيل، فتأكد من فهمك للتأثير المحتمل لأي أمر.

معلومات أساسية

من BroadWorks، الإصدار 23.0 وفيما بعد، تم إدخال آلية لتحويل نوع ملف تعريف الجهاز من واحد إلى آخر.

خيارات الاستخدام

يعرض الأمر switchDeviceType   يمكن التنفيذ إما من أمر BWCLI أو أمر OCI-p،  SystemDeviceManagementSwitchDeviceTypeDeviceRequest.

بوكلي

AS_CLI/System/Device/IpDeviceMgmt> help switchDeviceType

This command is used to switch device profiles from one device type to another.

Parameters description:

attribute : The name of the attribute that scopes the command.

system : This parameter specifies the switch command is issued at the system level.

fromDeviceType : This parameter specifies the original device type.

toDeviceType : This parameter specifies the destination device type.

serviceProvider : This parameter specifies the switch command is issued at the service provider level.

svcProviderId : This parameter specifies the ID of the service provider.

group : This parameter specifies the switch command is issued at the group level.

groupId : This parameter specifies the valid group within the service provider.

systemDeviceProfile : This parameter specifies the switch command is issued for a single device profile at the system level.

deviceName : This parameter specifies the name of the device profile.

svcProvDeviceProfile: This parameter specifies the switch command is issued for a single device profile at the service provider level.

groupDeviceProfile : This parameter specifies the switch command is issued for a single device profile at the group level.

======================================================================

switchDeviceType

<attribute>, Choice = {system, serviceProvider, group, systemDeviceProfile, svcProvDeviceProfile, groupDeviceProfile}

system:

<fromDeviceType>, String {1 to 40 characters}

<toDeviceType>, String {1 to 40 characters}

serviceProvider:

<svcProviderId>, String {1 to 30 characters}

<fromDeviceType>, String {1 to 40 characters}

<toDeviceType>, String {1 to 40 characters}

group:

<svcProviderId>, String {1 to 30 characters}

<groupId>, String {1 to 30 characters}

<fromDeviceType>, String {1 to 40 characters}

<toDeviceType>, String {1 to 40 characters}

systemDeviceProfile:

<deviceName>, String {1 to 40 characters}

<toDeviceType>, String {1 to 40 characters}

svcProvDeviceProfile:

<svcProviderId>, String {1 to 30 characters}

<deviceName>, String {1 to 40 characters}

<toDeviceType>, String {1 to 40 characters}

groupDeviceProfile:

<svcProviderId>, String {1 to 30 characters}

<groupId>, String {1 to 30 characters}

<deviceName>, String {1 to 40 characters}

<toDeviceType>, String {1 to 40 characters}

أمر OCI-P

<?xml version="1.0" encoding="ISO-8859-1"?>

<BroadsoftDocument protocol="OCI" xmlns="C" xmlns:xsi="http://www.w3.org/2001/XMLSchema-instance">

<sessionId xmlns="">SESSIONID</sessionId>

<command xsi:type="SystemDeviceManagementSwitchDeviceTypeDeviceRequest" xmlns="">

<svcProviderId>YOUR ENT/SP</svcProviderId>

<groupId>YOUR GROUP</groupId>

<deviceName>ORIGINAL DEVICE TYPE</deviceName>

<toDeviceType>NEW DEVICE TYPE</toDeviceType>

</command>

</BroadsoftDocument>

مخطط XML

<xs:complexType name="SystemDeviceManagementSwitchDeviceTypeDeviceRequest">

<xs:annotation>

<xs:appinfo>

<bwAppInfo bwtag="_1843b06e76464254bf146a91622df7b4"/>

<asDataModeSupported>true</asDataModeSupported>

<amplifyDataModeSupported>true</amplifyDataModeSupported>

<xsDataModeSupported>true</xsDataModeSupported>

</xs:appinfo>

<xs:documentation>

Switch the device type for a specified device.

To switch a system level device profile, serviceProviderId and groupId should not be present.

To switch a service provider level device profile, only serviceProviderId should be specified.

To switch a group level device profile, serviceProviderId and groupId should specified.

The response is either a SuccessResponse or an ErrorResponse.

</xs:documentation>

</xs:annotation>

<xs:complexContent>

<xs:extension base="core:OCIRequest">

<xs:sequence>

<xs:choice minOccurs="0">

<xs:element name="serviceProviderId" type="ServiceProviderId"/>

<xs:sequence>

<xs:element name="svcProviderId" type="ServiceProviderId"/>

<xs:element name="groupId" type="GroupId"/>

</xs:sequence>

</xs:choice>

<xs:element name="deviceName" type="AccessDeviceName"/>

<xs:element name="toDeviceType" type="AccessDeviceType"/>

</xs:sequence>

</xs:extension>

</xs:complexContent>

</xs:complexType>

مثال معملي

مثال BWCLI

ل هذا مثال، يحول أنت مجموعة DeviceProfile من Poly_VVX_D230 أداة نوع إلى ال cisco-CP-78xx-88xx-68xx-3PCC أداة نوع.

- إضافة ملف تعريف جهاز مجموعة Poly_VVX_D230_Switch وتعيين Poly_VVX_D230 للجهاز:

AS_CLI/System/Device/IpDeviceMgmt> add pws_ent pws_grp Poly_VVX_D230_Switch Poly_VVX_D230 macAddress 678678678678

- أنجزت المفتاح من التوصيف Poly_VVX_D230_Switch إلى Cisco-CP-78xx-88xx-68xx-3PCC:

AS_CLI/System/Device/IpDeviceMgmt> switchDeviceType groupDeviceProfile pws_ent pws_grp

Poly_VVX_D230_Switch Cisco-CP-78xx-88xx-68xx-3PCC

...Done

[Request for switch is being processed; Rebuild triggered for device type: Cisco-CP-78xx-88xx-68xx-3PCC,

please refer to DMEventQueues for completion status.]

مثال على السجل

هذا مثال لسجل نوع الطلب هذا الذي تم مشاهدته من PSLog.

2022.05.26 09:34:57:686 EDT | Info | OCI-P | BCCT Worker #0

Received the following request from: 127.0.0.1:56212

<?xml version="1.0" encoding="ISO-8859-1"?>

<BroadsoftDocument protocol="OCI" xmlns="C" xmlns:xsi="http://www.w3.org/2001/XMLSchema-instance">

<sessionId xmlns="">16535720065220.14787900206648874</sessionId>

<command xsi:type="SystemDeviceManagementSwitchDeviceTypeDeviceRequest" xmlns="">

<svcProviderId>pws_ent</svcProviderId>

<groupId>pws_grp</groupId>

<deviceName>Poly_VVX_D230_Switch</deviceName>

<toDeviceType>Cisco-CP-78xx-88xx-68xx-3PCC</toDeviceType>

</command>

</BroadsoftDocument>

2022.05.26 09:34:57:711 EDT | FieldDebug | Generic | BCCT Worker #0

OCI Transaction com.broadsoft.oci.transactions.system.SystemDeviceManagementSwitchDeviceTypeDeviceTransaction write5193 executed.

User: Default Administrator (admin) Authorization Level: System

Start Time: 2022.05.26 09:34:57:687 EDT

End Time: 2022.05.26 09:34:57:711 EDT

Duration: 24 ms

2022.05.26 09:34:57:711 EDT | Info | OCI-P | BCCT Worker #0 | admin

TO 127.0.0.1:56212

<?xml version="1.0" encoding="ISO-8859-1"?>

<BroadsoftDocument protocol="OCI" xmlns="C" xmlns:xsi="http://www.w3.org/2001/XMLSchema-instance">

<sessionId xmlns="">16535720065220.14787900206648874</sessionId>

<command echo="" xsi:type="c:SuccessResponse" xmlns:c="C" xmlns=""/>

</BroadsoftDocument>

معلومات ذات صلة

- DeviceProfileTypeCustomizationEnhanced-AS-FD

- الدعم التقني والتنزيلات من Cisco