Inhalt

Einführung

Voraussetzungen

Anforderungen

Verwendete Komponenten

Schrittweise Vorgehensweise

Ähnliche Diskussionen in der Cisco Support Community

Einführung

In diesem Dokument wird beschrieben, wie das Network Convergence System 6000 (NCS6K) nach einem fehlgeschlagenen Upgrade ohne Verwendung eines USB-Laufwerks wiederhergestellt werden kann. Die Wiederherstellung mit USB-Laufwerken erfordert physischen Zugriff auf das Gerät, was in den meisten Fällen eine Herausforderung und zeitaufwendig sein kann.

Das in diesem Dokument beschriebene Verfahren würde einen Linux-Rechner verwenden, der als TFTP- und DHCP-Server fungiert, um das NCS6K über den RP-Management-Ethernet-Port wiederherzustellen.

Voraussetzungen

Anforderungen

Cisco empfiehlt, grundlegende Kenntnisse über Linux, TFTP, DHCP und Cisco XR CLI zu erwerben.

Verwendete Komponenten

Dieses Dokument ist auf die NCS6K-Plattform beschränkt.

Die Informationen in diesem Dokument wurden von den Geräten in einer bestimmten Laborumgebung erstellt. Alle in diesem Dokument verwendeten Geräte haben mit einer leeren (Standard-)Konfiguration begonnen. Wenn Ihr Netzwerk in Betrieb ist, stellen Sie sicher, dass Sie die potenziellen Auswirkungen eines Befehls verstehen.

Schrittweise Vorgehensweise

1. Laden Sie die erforderliche XR USB-Boot-Datei von der Cisco Website herunter.

2. Laden Sie die heruntergeladene ZIP-Datei auf den Linux-Server hoch und entpacken Sie sie in /tftpboot:
root@xxxr:/tftpboot# unzip ncs6k-usb-boot-5.2.3.zip

Archive:  ncs6k-usb-boot-5.2.3.zip

inflating: EFI/boot/bootx64.efi

inflating: EFI/boot/grub.cfg

inflating: boot/install-image.iso

3. Ermitteln Sie die MAC-Adresse des Ethernet-Port für das Management des NCS6K Routingprozessors (RP). Sie finden sie in den Konsolenprotokollen:

Press F12 to go to Boot Manager..

Booting System Host OS..

Verifying Image for Secure Boot failed with status 15

System Host OS boot failed.

Booting Int Network 0 for IPv4 (4C-4E-35-B6-63-33)..

>>Start PXE over IPv4.

PXE-E18: Server response timeout.

Int Network 0 for IPv4 (4C-4E-35-B6-63-33) boot failed.

Booting Ext Network 0 for IPv4 (4C-4E-35-B6-63-33)..

4. Fügen Sie der Datei dhcpd.conf Folgendes hinzu. Dadurch wird dem RP-Management-Ethernet-Port beim Booten (z. B.: 10.48.32.160)

root@xxxr:/tftpboot/0A3020A0# cat /etc/dhcp/dhcpd.conf

allow bootp;

allow booting;

subnet 10.48.32.0 netmask 255.255.255.0 {

option routers 10.48.32.1;

next-server 10.48.32.93;

host pani0-rp {

hardware ethernet  4c:4e:35:b6:63:33;

fixed-address 10.48.32.160;

filename "EFI/boot/bootx64.efi" ;

}

}

Hinweis: 10.48.32.93 ist die TFTP- und DHCP-Serveradresse.

5. Erstellen Sie eine Kopie von grub.cfg (Datei generiert in Schritt 2). Nennen Sie die Datei, nachdem die IP-Adresse NCS6K von DHCP empfangen wird:

root@xxxr:/tftpboot# cp /tftpboot/EFI/boot/grub.cfg  /tftpboot/10.48.32.160.cfg

6. Bearbeiten Sie die oben generierte Datei, um sicherzustellen, dass die ISO-Datei aus dem Netzwerk ausgewählt wird (entfernen Sie die führende Datei /):

root@xxxr:/tftpboot# diff /tftpboot/EFI/boot/grub.cfg  /tftpboot/10.48.32.160.cfg

11,12c11,12

<         echo "Booting from USB.."

<         loopback loop /boot/install-image.iso

---

>         echo "Booting from network.."

>         loopback loop boot/install-image.iso

Für 5.2.3 würde es etwa wie folgt aussehen:

root@xxxr:/tftpboot# cat /tftpboot/10.48.32.160.cfg

set default=0

serial --unit=0 --speed=115200

terminal_input console

terminal_output serial

set timeout=2

menuentry "System Install OS" {

echo "Booting from network..."

loopback loop boot/install-image.iso

root=loop

echo "Loading Kernel.."

linux (loop)/boot/bzImage root=/dev/ram install=/dev/sda console=ttyS0,115200 prod=1 crashkernel=192M@0 bigphysarea=10M quiet pci=assign-busses noissu aer=off pci=hpmemsize=0M,hpiosize=0M

echo "Loading initrd.."

initrd (loop)/boot/initrd.img signfile=/boot/signature.initrd.img

}

7. Die Konfiguration auf dem Linux-Server ist abgeschlossen. Beim nächsten PXE-Bootversuch weist DHCP dem NCS6K RP 10.48.32.160 zu. Anschließend werden die grub .efi und .cfg über TFTP abgerufen. Danach startet GRUB automatisch und lädt die ISO-Datei mit TFTP.

Hinweis: Die ISO-Datei liegt normalerweise bei etwa 700 MB. Nach dem Bootvorgang vom Netzwerk dauert es etwas länger (bis zu 10 Minuten). wird angezeigt.

Vollständige Protokolle der Aktivität:

Cisco BIOS version : SB.Panini.0014.00

BIOS Build Date : 07/10/2014 by lchinnad

System Memory Speed : 1600 MHz

Processor Type : Intel(R) Xeon(R) CPU E5-2448L @ 1.80GHz

Press F12 to goto Boot Manager..

Booting System Host OS..

Verifying Image for Secure Boot failed with status 15

System Host OS boot failed.

Booting Int Network 0 for IPv4 (4C-4E-35-B6-63-33)..

Start PXE over IPv4.

PXE-E18: Server response timeout.

Int Network 0 for IPv4 (4C-4E-35-B6-63-33) boot failed.

Booting Ext Network 0 for IPv4 (4C-4E-35-B6-63-33)..

Start PXE over IPv4.

Station IP address is 10.48.32.160

Server IP address is 10.48.32.93

NBP filename is bootx64.efi

Downloading NBP file...

Succeed to download NBP file.

GNU GRUB version 2.00

Press F2 to goto grub Menu..

Booting from network..

[    6.338259] i8042: No controller found

Starting udev: [  OK  ]

Actual changes:

large-receive-offload: off [requested on]

ntuple-filters: on

Setting hostname host:  [  OK  ]

Checking filesystems:[  OK  ]

Remounting root filesystem in read-write mode:  [  OK  ]

Entering non-interactive startup

Bringing up loopback interface:  [  OK  ]

Starting system logger: [  OK  ]

Starting kernel logger: [  OK  ]

Starting kdump:[  OK  ]

Starting system message bus: [  OK  ]

Starting smartd: [  OK  ]

Generating SSH1 RSA host key: [  OK  ]

Generating SSH2 RSA host key: [  OK  ]

Generating SSH2 DSA host key: [  OK  ]

Starting sshd: [  OK  ]

Starting xinetd: [  OK  ]

Checking PCI block device /dev/sdb disk space

Thu Jun 25 14:07:13 UTC 2015: Detected /iso/host.iso

mount: block device /iso/host.iso is write-protected, mounting read-only

Thu Jun 25 14:07:13 UTC 2015: Mounted /iso/host.iso to /tmp/isomnt.iV1833

Thu Jun 25 14:07:13 UTC 2015: Found /tmp/isomnt.iV1833/rpm/ncs6k-sysadmin-hostos.all-5.2.3-Default.x86_64.rpm in host.iso

Thu Jun 25 14:07:13 UTC 2015: Installing /tmp/isomnt.iV1833/rpm/ncs6k-sysadmin-hostos.all-5.2.3-Default.x86_64.rpm

Preparing packages for installation...

ncs6k-sysadmin-hostos.all-5.2.3-Default.x86_64

hushd_static: no process killed

hushd restarted

Thu Jun 25 14:07:13 UTC 2015: Did not detect new pxe install script, keep going with old xrnginstall

Thu Jun 25 14:07:13 UTC 2015: Running in  Data LV support model

/etc/rc3.d/S60xrnginstall: line 239: SIMULATION: readonly variable

Thu Jun 25 14:07:13 UTC 2015: Prepping System with calvados.iso

Thu Jun 25 14:07:13 UTC 2015: Installer will install image on sda

Thu Jun 25 14:07:13 UTC 2015: Running in LVM support model

Thu Jun 25 14:07:15 UTC 2015: Partition creation on /dev/sda took 1 seconds

Thu Jun 25 14:07:15 UTC 2015: File system creation on /dev/sda1 took 0 seconds

Thu Jun 25 14:07:15 UTC 2015: Install host image on /dev/sda1

Thu Jun 25 14:07:23 UTC 2015: Installing host image size of 183M took 8 seconds

Thu Jun 25 14:07:33 UTC 2015: File system creation on /dev/sda2 took 4 seconds

Thu Jun 25 14:08:38 UTC 2015: Copying XR iso to repository took 65 seconds

Partitioning PCI block device /dev/sdb

Added VLAN with VID == 513 to IF -:eth-pf1:-

Thu Jun 25 14:08:40 UTC 2015: Copying boot/install-image.iso from tftpserver 10.48.32.93

Thu Jun 25 14:16:58 UTC 2015: Copying Pxeboot files from tftpserver 10.48.32.93 took 498 seconds

Thu Jun 25 14:17:28 UTC 2015: File system creation on /dev/panini_vol_grp/calvados_lv0 took 5 seconds

Thu Jun 25 14:17:28 UTC 2015: Install sysadmin-vm image on /dev/panini_vol_grp/calvados_lv0

mount: block device /iso/ncs6k-sysadmin.iso is write-protected, mounting read-only

Thu Jun 25 14:17:35 UTC 2015: sysadmin-vm: RP based installation

Thu Jun 25 14:18:22 UTC 2015: Installing sysadmin-vm image size of 444M took 54 seconds

Install EFI on /dev/sda4

Thu Jun 25 14:18:24 UTC 2015: Install finished on sda

Resetting BIOS Boot Mode register ...

Automatic rebooting system after installation ...

Cisco BIOS version : SB.Panini.0014.00

BIOS Build Date : 07/10/2014 by lchinnad

System Memory Speed : 1600 MHz

Processor Type : Intel(R) Xeon(R) CPU E5-2448L @ 1.80GHz

Press F12 to goto Boot Manager..

Booting System Host OS..

GNU GRUB version 2.00

Press F2 to goto grub Menu..

Booting from Disk..

Loading Kernel..

Loading initrd..

Starting udev: [  OK  ]

Setting hostname sysadmin-vm:  [  OK  ]

Checking filesystems:[  OK  ]

Mount /dev/vdd at /misc/disk1

Entering non-interactive startup

Bringing up loopback interface:  [  OK  ]

Starting system logger: [  OK  ]

Starting kernel logger: [  OK  ]

Starting system message bus: [  OK  ]

Starting smartd: [FAILED]

Generating SSH1 RSA host key: [  OK  ]

Generating SSH2 RSA host key: [  OK  ]

Generating SSH2 DSA host key: [  OK  ]

Starting sshd: [  OK  ]

Starting xinetd: [  OK  ]

Starting crond: [  OK  ]

Starting libvirtd daemon: [  OK  ]

Starting NCS6k programs for RP on sysadmin-vm: [  OK  ]

starting pm

sysadmin_startup: Starting Cisco Login Program on ttyS0

sysadmin initialized

sysadmin_startup: Starting Cisco Login Program on ttys1

sysadmin initialized

0_0_0Jun 25 14:19:32 : Send To Helper Failed - Msg : aaad[2600]: %MGBL-AAAD-7-DEBUG : AAA Init successful

0_0_0Jun 25 14:19:33 : Send To Helper Failed - Msg : vm_manager[2628]: %INFRA-VM_MANAGER-4-INFO : Info: VM Manager started. arguments  -W

0_0_0Jun 25 14:19:34 : Send To Helper Failed - Msg : sdr_mgr[2619]: %SM-SDR_MANAGER-4-INFO : Info: SDR Manager started.

SYSTEM IS NOT READY FOR LOGIN

!!!NO root-system username is configured. Need to configure root-system username!!!

--- Administrative User Dialog ---

Enter root-system Username: 0_0_0Jun 25 14:20:58 : Send To Helper Failed - Msg : plx_fpd[2616]: %INFRA-FPD_Driver-1-UPGRADE_ALERT : Driver missing fpd obfl log function for fpd PLX-8748, FPD init continues but debugability impacted

0/RP0/ADMIN0:Jun 25 14:20:58.410 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT0-PM0:

0/RP0/ADMIN0:Jun 25 14:20:58.417 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT0-PM1:

0/RP0/ADMIN0:Jun 25 14:20:58.418 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT0-PM2:

0/RP0/ADMIN0:Jun 25 14:20:58.434 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT3-PM0:

0/RP0/ADMIN0:Jun 25 14:20:58.445 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT3-PM1:

0/RP0/ADMIN0:Jun 25 14:20:58.451 : envmon[2609]: %PKT_INFRA-FM-4-FAULT_MINOR : ALARM_MINOR :Unsupported power module detected :DECLARE :0/PT3-PM2:

0/RP0/ADMIN0:Jun 25 14:20:58.517 : zen[2630]: %INFRA-FPD_Driver-1-UPGRADE_ALERT : Driver missing fpd obfl log function for fpd CPU Complex FPGA, FPD init continues but debugability impacted

Enter root-system Username: root

Enter secret:

Enter secret again:

Successfully created root-system user

System Admin Username: root

Password:

root connected from 127.0.0.1 using console on sysadmin-vm:0_RP0

sysadmin-vm:0_RP0# show platform

Thu Jun  25 14:21:33.150 UTC

Location  Card Type               HW State      SW State      Config State

----------------------------------------------------------------------------

0/1       NC6-60X10GE-M-S         POWERED_ON    SW_INACTIVE   NSHUT

0/7       NC6-10X100G-M-P         POWERED_ON    SW_INACTIVE   NSHUT

0/RP0     NC6-RP                  OPERATIONAL   OPERATIONAL   NSHUT

0/RP1     NC6-RP                  POWERED_ON    SW_INACTIVE   NSHUT

0/FC0     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC1     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC2     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC3     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC4     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/FC5     P-L-FC-S                POWERED_ON    N/A           NSHUT

0/CI0     NCS-CRFT=               OPERATIONAL   N/A           NSHUT

0/FT0     NC6-FANTRAY             OPERATIONAL   N/A           NSHUT

0/FT1     NC6-FANTRAY             OPERATIONAL   N/A           NSHUT

0/PT0     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT1     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT2     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT3     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT4     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

0/PT5     NCS-AC-PWRTRAY          OPERATIONAL   N/A           NSHUT

Nach einiger Zeit werden auch andere RP und Line Cards starten.