Contents

Introduction

Windows support forSecure Endpoint Windows Connector Version 8.x (64-bit only)

Legacy Windows support forSecure Endpoint Windows Connector 7.x (64-bit or 32-bit)

See Also

Introduction

This document describes the operating system compatibility for supported versions of the Secure Endpoint Windows Connector.

Note: Private Cloud supports Windows Connector versions up to 8.2.3.

Windows support for Secure Endpoint Windows Connector Version 8.x (64-bit only)

Beginning in 8.0.1, Cisco Secure Endpoint Windows Connector only supports installation on 64-bit versions of the operating system.

Installation on 32-bit versions of the operating system need to use the Cisco Secure Endpoint for Windows 7.x versions.

ARM-based Windows is not supported at the moment.

Windows Name

Version

8.4.0

8.2.4

8.2.3

8.2.1

8.1.7^1

Release Date

2024-05-14

2024-03-18

2024-02-12

2023-09-11

2023-07-04

Windows 11

All

Windows 10

22H2

21H2

21H1

20H2

2004

1909

1903 or ealier

IoT^2

Windows 10 LTSC

2021

2019

Windows 10 LTSB

2016

2015

Windows Server^3

2022

2019

2016

1 As of connector version 8.1.3, installation requires OS patches with Azure Code Signed as required by Microsoft.  See Windows Support-for-Azure code signing.

2 The connector on Windows 10 IoT Enterprise does not support HORM, UWF, and the Kenna Risk Score. See Incompatible Software and Configurations.

3 Support includes both Desktop UI and Core editions.

Legacy Windows support for Secure Endpoint Windows Connector 7.x (64-bit or 32-bit)

Installation on 32-bit versions of the operating system need to use the Cisco Secure Endpoint Windows Conenctor 7.x versions. This version of the connector also supports 64-bit versions of the operating systems.

Updates for legacy operating systems only provide critical fixes and technical support until official end-of-support is announced by Cisco for the operating system and the connector version.

Windows Name

Version

7.5.17

7.5.15

7.5.13^1

Release Date

2023-11-27

2023-09-11

2023-08-15

Windows 11

All

Windows 10

22H2

21H2

21H1

20H2

2004

1909

1903 or earlier

IoT^2

Windows 10 LTSC

2021

2019

Windows 10 LTSB

2016

2015

Windows 8

8.1

Windows 7

SP1, ESU

Windows Server^3

2022

2019

2016

2012 R2

2012

2008 R2, ESU

1 As of 7.5.7, installation requires OS patches with Azure Code Signed as required by Microsoft.  See Windows Support-for-Azure code signing.

2 The connector on Windows 10 IoT Enterprise does not support HORM, UWF, and the Kenna Risk Score. See Incompatible Software and Configurations.

3 Support includes both Desktop UI and Core editions.

See Also

- Secure Endpoint Mac Connector OS Compatibility

- Cisco Security Connector Apple iOS Compatibility

- Cisco Secure Endpoint Linux Connector OS Compatibility

- Cisco Secure Endpoint Linux Connector Update Reboot Requirements

- Cisco Orbital System Requirements

Legend

Supported OS and Version

Compatible; OS release after connector release

Compatible; Connector is functional but OS or Connector is out of support

Not supported

For more information about software support for Secure Endpoint connector, see Secure Endpoint Connector Support Policy.