Objective

By default, a 200/300 Series Managed Switch can be configured via the configuration utility through a web browser. Connectivity between the administrator and the switch is unencrypted. You can enable Hyper Text Transfer Protocol Secure (HTTPS) service which works with Secure Socket Layer (SSL) protocol to offer to the administrator a more secure web browser connection with the configuration utility of the switch. This article explain how to enable HTTPS service on the 200/300 Series Managed Switches.

Applicable Devices

• SF/SG 200 and SF/SG 300 Series Managed Switches

Software Version

• 1.3.0.62

Enable HTTPS Service

Step 1.Log in to the web configuration utility and choose choose Security > TCP/UDP Services. The TCP/UDP Services page opens:

Step 2. Check the HTTPS Service check box to enable access of the graphical user interface through SSL.

Step 3. Click Apply to immediately enable the HTTPS Service.