Objective

This article explains how to revert back to factory default settings on SPA302D mobility enhanced handset.

Caution: Factory reset removes all the data in the handset such as contacts, speed dials and call records. The handset is restored to the original factory software state. However, the handset registration with the base remains unaltered.

Applicable Device

• SPA302D Handset

Software Version

• v2.31

Perform Factory Reset

Step 1. On the home screen, press the Select button to choose the Settings icon. The selection will be highlighted with a black outline as shown in the above image.

Step 2. On the Settings menu, choose Factory Reset with the use of up and down navigation buttons and press the Select button.

Step 3. On the Factory Reset menu, press the Confirm softkey to confirm factory reset.

The handset is reverted to its original factory software and returns to the home screen.