Supported Platforms for Application Policy Infrastructure Controller Enterprise Module, Release 1.2.0.x

Supported Platforms and Software Requirements

Supported Switches

Supported Routers

Supported Wireless LAN Controllers

Supported Service Modules

Industrial Ethernet Switches

Required Platform Configurations

NETCONF Configuration

Cisco NetFlow Configuration

SNMP Trap Configuration

IP Device Tracking Configuration

Wireless LAN Controller Configuration

Performance Monitoring Support by Platform

Performance Monitoring Support for Cisco Switches

Performance Monitoring Support for Cisco Routers

Performance Monitoring Support for Cisco Wireless LAN Controllers

EasyQoS Support and Limitations

EasyQoS Feature Support by Platform

EasyQoS Supported Line Cards

EasyQoS Supported Queues and Line Cards

EasyQoS Limitations

Path Trace Support and Limitations

Protocol Support by Platform

Path Trace VRF Support

Path Trace ACL Support

Wireless AP Support by Platform

Wireless Mode Support by Platform

Path Trace Supported Scenarios

Troubleshooting

Related Documentation

Cisco APIC-EM Documentation

Cisco IWAN Documentation

Cisco Network Plug and Play Documentation

APIC-EM Developer Documentation

Obtaining Documentation and Submitting a Service Request

Trademarks

Supported Platforms for the Cisco Application Policy Infrastructure Controller Enterprise Module, Release 1.2.0.x

First Published: May 25, 2016

Last Updated: August 03, 2016

Supported Platforms for Application Policy Infrastructure Controller Enterprise Module, Release 1.2.0.x

This document describes the supported platforms for the Application Policy Infrastructure Controller Enterprise Module, Release 1.2.0.x.

Supported Platforms and Software Requirements

The following tables list the supported devices and modules, with their software requirements for the Cisco APIC-EM.

Note

For information about the supported platforms and software requirements for the Cisco IWAN and Cisco Network PnP applications, refer to the Release Notes for Cisco IWAN and the Release Notes for Cisco Network Plug and Play.

For information about application-specific platform limitations, see:

- Path Trace: Path Trace Support and Limitations

- EasyQoS: EasyQoS Support and Limitations

Supported Switches

The following tables lists the supported switches for this Cisco APIC-EM release.

Supported Switches

Supported Switches

Minimum Software Version

[1]

Recommended Software Version

Base Apps

Support

Path Trace

Support

EasyQoS

Support

Path Stats Interface

Path Stats QoS

Catalyst 2960-S Series switches, including stacks

>=12.1

Cisco IOS 15.2(1)E1, 12.2(58)SE2

Yes

Yes

Yes

Yes

No

Catalyst 2960-X/XR Series switches

>=12.1

Cisco IOS 15.2.3E, 15.0.2-EX5

Yes

Yes

Yes

Yes

No

Catalyst 3560CG Series switches

>=12.2

Cisco IOS

15.0(2)SE5

Yes

Yes

Yes

Yes

No

Catalyst 3560CX Series switches

15.2(3)E1

Cisco IOS

15.2(3)E1

Yes

Yes

Yes

Yes

No

Catalyst 3560-X Series switches

>=12.2

Cisco IOS 15.2(4)E, 12.2(58)SE2

Yes

Yes

Yes

Yes

No

Catalyst 3650 Series switches

All versions

[2]

Cisco IOS 3.6.2aE

Yes

Yes

Yes

Yes

No

Catalyst 3750-X Series switches, including stacks

>=12.2

Cisco IOS 15.2(4)E, 12.2(55)SE8

Yes

Yes

Yes

Yes

No

Catalyst 3850 Series switches, including stacks

[3]

All versions

[4]

Cisco IOS 3.6.2aE

Yes

Yes

Yes

Yes

No

Catalyst

4500(Sup7E)

Series switches

All versions

Cisco IOS 3.5(2)E, 3.2(8)SG

Yes

Yes

Yes

Yes

No

Catalyst

4500E

(Sup8E)

Series switches

All versions

Cisco 3.3.2XO, 3.6.1E

Yes

Yes

Yes

Yes

No

Catalyst 6500 (Supervisor Engine 720-3C/B) Series switches

[5]

>=12.2

Cisco 15.1(2)SY2

Yes

Yes

Yes

Yes

No

Catalyst 6500(Sup-2T) Series switches

>=12.2

Cisco IOS 15.1(2)SY4a, 15.0(1)SY6

Yes

Yes

Yes

Yes

No

Catalyst 6800 Series switches

>=12.2

Cisco IOS 15.1(2)SY4a

Yes

Yes

Yes

Yes

No

Cisco Nexus 5000 Series switches

All versions

NX-OS version 7.2(0)N1(1)

Yes

Yes

No

Yes

No

Cisco Nexus 7000 Series switches

[6]

All versions

NX-OS version 6.2(2a) and NX-OS version 6.2(6

Yes

Yes

Yes

Yes

No

[1] The minimum software version is applicable only for Discovery and Inventory. For Path Trace and EasyQoS, be sure to use the recommended software version.

[2]
Any version 16.x or higher is not supported.

[3]
EasyQoS requires IOS XE 3.6.2 and higher. In versions below IOS XE 3.6.2, class-maps with empty actions cannot be configured, and therefore EasyQoS will generate an error.

[4]
Any version 16.x or higher is not supported.

[5]
EasyQoS only supports the Catalyst 6500 Supervisor Engine 720-10GE-3C/3CXL. EasyQoS does not support the Supervisor Engine 720-3B/3BXL.

[6]
Current minimum version supported by EasyQoS is NX -OS version 6.2.2 and higher. EasyQoS uses ingress DSCP-to-queue mapping which is supported from NX-OS version 6.2.2 and higher.

Supported Routers

The following tables lists the supported routers for this Cisco APIC-EM release.

Supported Routers

Supported Routers

Minimum Software Version

Recommended Software Version

Base Apps

Support

Path Trace

Support

EasyQoS

Support

Path Stats Interface

Path Stats QoS

Cisco Integrated Services Routers (ISR) G2

>=15.0(1)M, >=15.2(4)M2

Cisco IOS XE 15.2(4)M9, 15.1(4)M7

Yes

Yes

Yes

Yes

Yes

Cisco Integrated Service Router (ISR) 800 Series

>=15.2(4)M

Cisco IOS 15.2(4)M

Yes

Yes

Yes

Yes

Yes

Cisco Integrated Service Router (ISR) 4000 Series

>=15.3(2)S

Cisco IOS XE 3.12.0S

Yes

Yes

Yes

Yes

Yes

Cisco ASR 1000 Series Aggregation Services Router

>=15.2(2)S, >=15.3(1)S1

Cisco IOS XE 3.16(2)S

Yes

Yes

Yes

Yes

No

Cisco ASR 9000 Series Aggregation Services Router

[1]

>=3.9

Cisco IOS XR 5.1.3

Yes

Yes

No

Yes

No

[1]
You must enable NETCONF for the Cisco ASR 9000 router or for any other Cisco device that requires NETCONF support in their device pack. See NETCONF Configuration for additional information about this requirement.

Supported Wireless LAN Controllers

The following tables lists the supported wireless LAN controllers for this Cisco APIC-EM release.

Supported Wireless LAN Controllers

Supported Wireless LAN Controllers[1]

Minimum Software Version

Recommended Software Version [2]

Base Apps

Support

Path Trace

Support

EasyQoS

Support

Path Stats Interface

Path Stats QoS

Cisco 2500 Series Wireless Controller

All versions

Cisco AireOS 8.1.131.0

Yes

Yes

Yes

Yes

No

Cisco 5500 Series Wireless Controller

All versions

Cisco AireOS 8.1.131.0

Yes

Yes

Yes

Yes

No

Cisco 5520 Series Wireless Controller

All versions

Cisco AireOS 8.1.131.0

Yes

Yes

Yes

Yes

No

Cisco 5760 Series Wireless LAN Controller

All versions

Cisco IOS XE 3.3.3SE

Yes

Yes

No

Yes

No

Cisco 8500 Series Wireless Controller

All versions

Cisco AireOS 8.1.131.0

Yes

Yes

Yes

Yes

No

Cisco 8540 Series Wireless Controller

All versions

Cisco AireOS 8.1.131.0

Yes

Yes

Yes

Yes

No

Cisco Wireless Services Module 2 (WiSM2)

8.1.131.0

Cisco AireOS 8.1.131.0

Yes

No

No

No

No

[1]
On certain WLCs, you need to configure SNMP traps. See the Cisco Application Policy Infrastructure Controller Enterprise Module Configuration Guide, Appendix A, "Required Device Configuration" for additional information about this configuration requirement.

[2]
AireOS controllers (2500, 5500, 5520, 8500, 8540, and WiSM2) require AireOS 8.2.100 and higher for the DSCP-to-UP mapping used by EasyQoS.

Supported Service Modules

The following tables lists the supported service modules for this Cisco APIC-EM release.

Supported Service Modules in Cisco ISR G2

Supported Service Modules in Cisco ISR G2

Minimum Software Version

Recommended Software Version

Base Apps

Support

Path Trace

Support

EasyQoS

Support

Path Stats Interface

Path Stats QoS

Cisco 2900

(SM-ES2-16-P, SM-ES2-24-P, SM-D-ES2-48)

>=12.1

Cisco IOS 15.0(2)SE8, 12.2(55)SE10

Yes

Yes

Yes

Yes

No

Cisco 3900

(SM-ES3-16-P, SM-ES3-24-P, SM-D-ES3-48-P)

>=12.1

Cisco IOS 15.0(2)SE8, 12.2(55)SE10

Yes

Yes

No

Yes

No

Industrial Ethernet Switches

The following tables lists the supported industrial Ethernet switches for this Cisco APIC-EM release.

Industrial Ethernet Switches

Supported Industrial Ethernet Switches

Minimum Software Version

Recommended Software Version

Base Apps

Path Trace

EasyQoS

Cisco Industrial Ethernet 2000 Series Switches

>=12.2

15.0.2-EA1

Yes

Yes

No

Cisco Industrial Ethernet 3000 Series Switches

>=12.2

15.0.2-EA1

Yes

Yes

No

Required Platform Configurations

You must make the following configuration changes on these platforms for the corresponding Cisco APIC-EM features to properly work.

Required Platform Configurations

Feature

Platform

Required Configuration

Discovery (device inventory collection)

Cisco ASR 9000 router or any other Cisco device that requires NETCONF support for their device pack.

Configure NETCONF on these platforms.

For information, see NETCONF Configuration.

Discovery (host inventory collection)

Devices connected to hosts using SNMP.

Configure SNMP traps on these devices.

For information, see SNMP Trap Configuration.

Devices connected to hosts using IPDT.

Enable IPDT for these devices.

For information, see IP Device Tracking Configuration.

- Cisco Series 2504 WLC

- Cisco Series 5508/5520 WLC

- Cisco Series 8510/8540 WLC

Configure SNMP traps and object identifiers on these wireless LAN controllers.

For information, see Wireless LAN Controller Configuration.

Path Trace

- Cisco ASR 1000

- Cisco ASR 9000

- Cisco ISR-G2

- Cisco ISR-4451 -X

Configure NetFlow on these routers.

For information, see Cisco NetFlow Configuration.

Devices connected to a voice or video endpoint (for example, Cisco IP phones).

Enable IPDT for these devices to discover voice/data VLAN information about the endpoints.

For information, see IP Device Tracking Configuration.

NETCONF Configuration

You must enable the NETCONF protocol for the Cisco ASR 9000 router or for any other Cisco device that requires NETCONF support for their device pack. If NETCONF is not enabled, then the controller's inventory collection process will be incomplete for that device.

Note

Though NETCONF typically runs over SSH or on its own port, with the Cisco APIC-EM and for the Cisco ASR 9000 router NETCONF is run over a CLI session.

For specific information about enabling NETCONF for your own Cisco device, refer to that device’s documentation. As an example, a typical configuration sequence on a terminal to enable NETCONF on a Cisco device is as follows:

#ssh server v2
#netconf agent tty
#!
#xml agent tty
#!
#commit
#end
#crypto key generate rsa

Note

The rsa key needs to be generated to succeed with SSH. For this reason, the crypto key generate rsa command needs to be executed in exec mode at the end of the configuration sequence if it has not already been done.

Cisco NetFlow Configuration

Cisco NetFlow needs to be enabled on the following devices to support the Cisco APIC-EM path trace functionality:

- Cisco ASR 1000

- Cisco ASR 9000

- Cisco ISR-G2

- Cisco ISR-4451 -X

The controller pulls cached NetFlow records from the device for path trace. To enable NetFlow on your devices, refer to your specific device documentation. For general information about Cisco NetFlow technology, see Cisco IOS Flexible NetFlow Technology Q&A.

SNMP Trap Configuration

To ensure that Cisco APIC-EM captures data about the hosts connected to your network devices, you must set up SNMP traps or notifications. Enter the following SNMP commands to set up SNMP traps on the devices that connect to hosts within your network:

1. snmp-server enable traps snmp linkdown linkup

2. snmp-server host IP address version 2c public

Note

For Cisco Nexus devices, enter the following SNMP commands instead of the commands listed above:

1. snmp-server enable traps snmp linkdown linkup

2. snmp-server host IP address use-vrf default

After configuring SNMP traps on the network devices, the following data is captured and made available in the controller's GUI:

- Host data including the MAC address, IP address, and type

- Device interface status

IP Device Tracking Configuration

The Cisco APIC-EM discovery function uses several protocols and methods to retrieve network information, such as hosts IP addresses, MAC addresses, and network attachment points. To use IP Device Tracking (IPDT) for discovery, you must manually enable IPDT on the devices and interfaces for this protocol to be used to collect host information. To enable IPDT on your devices, refer to your specific device documentation. For general information about IPDT, see IP Device Tracking (IPDT) Overview.

Wireless LAN Controller Configuration

The Cisco APIC-EM accepts SNMP traps from several Cisco Wireless LAN Controllers (WLCs). The SNMP traps are used to update the host inventory database. You need to configure the WLCs so that the Cisco APIC-EM is the trap receiver, and the WLCs send the enhanced traps to the Cisco APIC-EM.

The following WLCs require SNMP traps to be enabled:

- Cisco Series 2504 Wireless LAN Controller

- Cisco Series 5508/5520 Wireless LAN Controller

- Cisco Series 8510/8540 Wireless LAN Controller

The following table specifies the SNMP traps and object identifiers that must be set on the WLCs.

Trap Name

OID

ciscoLwappDot11ClientAssocTrap

1.3.6.1.4.1.9.9.599.0.9

ciscoLwappDot11ClientDeAuthenticatedTrap

1.3.6.1.4.1.9.9.599.0.10

ciscoLwappDot11ClientMovedToRunStateNewTrap

1.3.6.1.4.1.9.9.599.0.11

ciscoLwappDot11ClientMobilityTrap

1.3.6.1.4.1.9.9.599.0.12

The following configurations must be set to enable the above SNMP traps:

- config trapflags client enhanced-802.11-associate enable

- config trapflags client enhanced-802.11-deauthenticate enable

- config trapflags client enhanced-authentication enable

- config trapflags client enhanced-802.11-stats enable

Note

When setting the SNMP traps on the WLCs, ensure you configure the IP address of the Cisco APIC-EM as the SNMP trap destination IP address. You set the Cisco APIC-EM IP address using the configuration wizard during the deployment process. For information about this process and the controller IP address, see the Cisco Application Policy Infrastructure Controller Enterprise Module Deployment Guide for additional information.

Performance Monitoring Support by Platform

The following tables describe Cisco APIC-EM performance monitoring (PerfMon) support by platform.

Note

For additional information about supported images and versions, use the Cisco Feature Navigator tool by clicking: Click Here .

Performance Monitoring Support for Cisco Switches

The following table describes Cisco APIC-EM performance monitoring (PerfMon) support for Cisco switches.

Cisco Switch

Minimum Operating System

Cisco Catalyst 2960S

Not Supported

Cisco Catalyst 2960S-Stack

Not Supported

Cisco Catalyst 2960XR

Not Supported

Cisco Catalyst 2900 (SM-ES2-16-P, SM-ES2-24-P, SM-D-ES2-48)

Not Supported

Cisco Catalyst 3750

Cisco IOS 12.2(58)SE, 15.0(1)SE2

Cisco Catalyst 3750-Stack

Cisco IOS 12.2(58)SE, 15.0(1)SE2

Cisco Catalyst 3850

Cisco IOS 03.06.0 E

Cisco Catalyst 3850-Stack

Cisco IOS 03.06.0 E

Cisco Catalyst 3650

Cisco IOS 03.06.0 E

Cisco Catalyst 3650-Stack

Cisco IOS 03.06.0 E

Cisco Catalyst 3560CG

Cisco IOS 15.0(1)SE2

Cisco Catalyst Cisco 3900 (SM-ES3-16-P, SM-ES3-24-P, SM-D-ES3-48-P)

Cisco IOS 12.2(58)SE, 15.0(1)SE

Cisco Catalyst 3560-X

Cisco IOS 12.2(58)SE, 15.0(1)SE2

Cisco Catalyst 4507R+E

Cisco IOS 03.06.0E

Cisco Catalyst 4500-X

Cisco IOS 03.06.0E

Cisco Catalyst 6880-X

Cisco IOS 15.1(2)SY1

Cisco Catalyst 6500 (Sup-2T)

Cisco IOS 15.0(1)SY1

Cisco Catalyst 6500 (Sup720)

Cisco IOS 15.1(2)SY

Cisco Nexus 7000 and 7700

Not Supported

Cisco Nexus 5000

Not Supported

Performance Monitoring Support for Cisco Routers

The following table describes Cisco APIC-EM performance monitoring (PerfMon) support for Cisco routers.

Cisco Routers

Minimum Operating System

Cisco ASR1000 Series

Cisco IOS XE 3.5.0S

Cisco ASR1002-X Router

Cisco IOS XE3.7.0S

Cisco ASR1001-X Router

Cisco IOS XE 3.13.0S

Cisco 43xx Series Integrated Services Routers

Cisco IOS XE 3.13.0S

Cisco 44xx Series Integrated Services Routers

Cisco IOS XE 3.8.0S

Cisco Integrated Services Routers G2 Series

Cisco IOS XE 15.1(4)M3

Cisco 800 Series Integrated Services Routers

Cisco IOS 15.2(4)M2

Cisco Cloud Services Router 1000V Series

3.13.0S

Performance Monitoring Support for Cisco Wireless LAN Controllers

The following table describes Cisco APIC-EM performance monitoring (PerfMon) support for Cisco wireless LAN controllers.

Cisco WLC

Minimum Operating System

Cisco 2500 Series Wireless LAN Controller

Not Supported

Cisco 5500 Series Wireless LAN Controller

Not Supported

Cisco 8500 Series Wireless LAN Controller

Not Supported

EasyQoS Support and Limitations

EasyQoS Feature Support by Platform

The Cisco APIC-EM EasyQoS features are supported on the following platforms.

Cisco Catalyst Switches

The following switches support the EasyQoS functionality listed directly below:

- Cisco Catalyst 2960-S Series

- Cisco Catalyst 2960-S Series (stack)

- Cisco Catalyst 2960-X Series

- Cisco Catalyst 3560CG Series

- Cisco Catalyst 3560-CX Series

- Cisco Catalyst 3560-X Series

- Cisco Catalyst 3650 Series

- Cisco Catalyst 3750-X Series

- Cisco Catalyst 3750-X Series (stack)

- Cisco Catalyst 3850 Series

- Cisco Catalyst 3850 Series (stack)

- Cisco Catalyst 4500 Sup7E Series

- Cisco Catalyst 4500 Sup8E Series

- Cisco Catalyst 4500-X Series

- Cisco Catalyst 6500 (Sup-2T) Series

- Cisco Catalyst 6500-E (Sup-720) Series

- Cisco Catalyst 6807-XL (Sup-2T) Series

- Cisco Catalyst 6840 Series

- Cisco Catalyst 6880 Series

- Cisco Nexus 7000 Series

- Cisco Nexus 7700 Series

The following EasyQoS functionality is supported by the above switches:

- Marking (reading and writing to the device configuration)

- Queuing (reading and writing to the device configuration)

- Dynamic QoS

Note

Whether queuing and marking or just queuing policies are written to a particular switch platform by the controller depends upon the following:

- The role the device plays in the network (access-layer, distribution-layer, or core-layer).

- Whether queuing and marking or just queuing policies is supported in the network.

Cisco Routers

The following routers support the EasyQoS functionality listed directly below:

- Cisco 2900 Series ISR

- Cisco 3900 Series ISR

- Cisco 800 Series ISR ([866VAE-K9, 867VAE with PP1.0], [881-K9, 881V-K9,897-VAW, 891-24X-K9 with PP14.0)

- Cisco 4000 Series ISR

- Cisco ASR 1000 Series

The following EasyQoS functionality is supported by the above routers:

- Marking (reading and writing to the device configuration)

- Queuing (reading and writing to the device configuration)

- Shaping (reading and writing to the device configuration)

Dynamic QoS is not supported.

Cisco Wireless LAN Controllers

The following wireless LAN controllers support the EasyQoS functionality listed directly below:

- Cisco 2500 Series Wireless LAN Controller

- Cisco 5500 Series Wireless LAN Controller

- Cisco 8500 Series Wireless LAN Controller

The following EasyQoS functionality is supported by the above wireless LAN controllers:

- Marking (reading and writing to the device configuration)

- WLAN

Dynamic QoS is not supported.

Cisco Enhanced Ethernet Modules

The following Cisco enhanced Ethernet modules support the EasyQoS functionality listed directly below:

- Cisco 2900(SM-ES2-16-P, SM-ES2-24-P, SM-D-ES2-48)

The following EasyQoS functionality is supported by the above enhance Ethernet modules:

- Marking (reading and writing to the device configuration)

- Queuing (reading and writing to the device configuration)

- Dynamic QoS

EasyQoS Supported Line Cards

The following table lists the Catalyst 6000 Series line cards that support EasyQoS.

Catalyst 6500 and 6807-XL Series Switch Line Cards

Catalyst 6880-X Series Switch Line Cards

VS-2T-10G-XL and VS-2T-10G with Gigabit Ethernet ports disabled

C6816-X-LE

WS-X6748-GE-TX with CFC

C6832-X-LE

WS-X6748-GE-TX with a DFC4 or DFC4XL upgrade

(WS-F6k-DFC4-A, WS-F6k-DFC4-AXL)

C6824-X-LE-40G

WS-X6748-SFP with CFC

C6840-X-LE-40G

WS-X6724-SFP with CFC

C6880-X-LE-16P10G

WS-X6724-SFP with DFC4/DFC4XL upgrade

(WS-F6k-DFC4-A, WS-F6k-DFC4-AXL)

C6880-X-16P10G

WS-X6824-SFP-2T

WS-X6824-SFP-2TXL

WS-X6848-SFP-2T

WS-X6848-SFP-2TXL

WS-X6848-TX-2T

WS-X6848-TX-2TXL

WS-X6908-10G-2T

WS-X6908-10G-2TXL

WS-X6704-10GE with CFC

WS-X6704-10GE with a DFC4/DFC4XL upgrade

(WS-F6k-DFC4-A, WS-F6k-DFC4-AXL)

WS-X6904-40G-2T

WS-X6904-40G-2TXL

WS-X6824-SFP-2T

WS-X6824-SFP-2TXL

C6800-8P10G

C6800-8P10G-XL

C6800-16P10G

C6800-16P10G-XL

C6800-32P10G

C6800-32P10G-XL

C6800-48P-SFP

C6800-48P-SFP-XL

C6800-48P-TX

C6800-48P-TX-XL

EasyQoS Supported Queues and Line Cards

The following tables lists queues and line cards that are supported by the controller for queuing policies in the Catalyst 6500-E Series and Catalyst 6807-XL with Sup-2T switches.

EasyQoS Supported Queues and Line Cards

Queues

Line Cards

1Q8T (One standard queue with eight configurable tail-drop thresholds)

- WS-X6724-SFP with CFC

- WS-X6748-SFP with CFC

- WS-X6748-GE-TX with CFC

- WS-X6704-10GE with CFC

2Q4T (Two standard queues with four configurable tail-drop thresholds)

- VS-S2T-10G with Gigabit Ethernet ports enabled

- VS-S2T-10G-XL with Gigabit Ethernet ports enabled

2Q8T ingress queuing (Two standard queues, each with eight configurable tail-drop thresholds)

- WS-X6824-SFP-2T

- WS-X6824-SFP-2TXL

- WS-X6848-SFP-2T

- WS-X6848-SFP-2TXL

- WS-X6848-TX-2T

- WS-X6848-TX-2TXL

- C6800-48P-SFP

- C6800-48P-SFP-XL

- C6800-48P-TX

- C6800-48P-TX-XL

- WS-X6724-SFP

- WS-X6748-SFP

- WS-X6748-GE-TX

Note:
The WS-X6724-SFP, WS-X6848-SFP, and WS-X6748-GE-TX line cards are only supported with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-A or WS-F6k-DFC4-AXL).

8Q4T ingress queuing (Eight standard queues, each with four thresholds, each configurable as either WRED-drop or tail-drop)

- VS-S2T-10G, VS-S2T-10G-XL with Gigabit Ethernet ports disabled

- WS-X6908-10G-2T, WS-X6908-10G-2TXL

- WS-X6816-10T-2T, WS-X6816-10T-2TXL, WS-X6816-10G-2T, WS-X6816-10G-2TXL in performance mode

- WS-X6716-10G-3C, WS-X6716-10G-3CXL, WS-X6716-10T-3C, WS-X6716-10T-3CXL also supported with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-E, WS-F6k-DFC4-EXL) in performance mode

8Q8T ingress queuing (Eight standard queues, each with eight thresholds, each configurable as either WRED-drop or tail-drop)

- WS-X6704-10GE

Note:
The WS-X6704-10GE line cards are only supported with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-A, WS-F6k-DFC4-AXL).

1P3Q4T (One strict-priority queue, three standard queues, four thresholds, each configurable as either WRED-drop or tail-drop)

- VS-S2T-10G with Gigabit Ethernet ports enabled

- VS-S2T-10G-XL with Gigabit Ethernet ports enabled

1P3Q8T egress queuing (One strict-priority queue, three standard queues, eight thresholds, each configurable as either WRED-drop or tail-drop)

- WS-X6724-SFP

- WS-X6748-SFP

- WS-X6748-GE-TX

- WS-X6824-SFP-2T

- WS-X6824-SFP-2TXL

- WS-X6848-SFP-2TXL

- WS-X6848-SFP-2T

- WS-X6848-TX-2T

- WS-X6848-TX-2TXL

- C6800-48P-SFP

- C6800-48P-SFP-XL

- C6800-48P-TX

- C6800-48P-TX-XL

Note:
The above line cards are only supported under the following conditions:

- Line card WS-X6724-SFP with CFC, or with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-A, WS-F6k-DFC4-AXL).

- Line card WS-X6748-SFP with CFC, or with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-A, WS-F6k-DFC4-AXL).

- Line card WS-X6748GE-TX with CFC, or with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-A, WS-F6k-DFC4-AXL).

1P7Q2T (One strict-priority queue, seven standard queues, two thresholds, each configurable as either WRED-drop or tail-drop)

- WS-X6816-10T-2T, WS-X6816-10T-2TXL, WS-X6816-10G-2T, WS-X6816-10G-2TXL in oversubscription mode

- WS-X6716-10G-3C, WS-X6716-10G-3CXL, WS-X6716-10T-3C, WS-X6716-10T-3CXL also supported with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-E, WS-F6k-DFC4-EXL) in oversubscription mode

1P7Q4T egress queuing (One strict-priority queue, seven standard queues, four thresholds, each configurable as either WRED-drop or tail-drop)

- WS-X6908-10G-2T, WS-X6908-10G-2TXL, WS-X6816-10T-2T, WS-X6816-10T-2TXL, WS-X6816-10G-2T, WS-X6816-10G-2TXL in performance or oversubscription mode

- WS-X6716-10G-3C, WS-X6716-10G-3CXL, WS-X6716-10T-3C, WS-X6716-10T-3CXL also supported with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-E, WS-F6k-DFC4-EXL)in performance or oversubscription mode

1P7Q8T (One strict-priority queue, seven standard queues, eight thresholds, each configurable as either WRED-drop or tail-drop)

- WS-X6704-10GE

Note:
Line card WS-X6704-10GE is only supported with CFC, or with a DFC4 or DFC4XL upgrade (WS-F6k-DFC4-A, WS-F6k-DFC4-AXL).

2P6Q4T ingress and egress queuing (Two strict-priority queues, six standard queues, four thresholds, each configurable as either WRED-drop or tail-drop)

- WS-X6904-40G-2T

- WS-X6904-40G-2TXL

- C6800-32P10G

- C6800-32P10G-XL

- C6800-16P10G

- C6800-16P10G-XL

- C6800-8P10G

- C6800-8P10G-XL

EasyQoS Limitations

The following table describes the EasyQoS limitations for this release.

Cisco APIC-EM EasyQoS Release Limitations

Platform

Description

Affected Software Versions

Catalyst 2960-S Series Switches

Catalyst 2960S-24TS-S and 2960S-48TS-S switch models are not supported. These switches only support the LAN Lite feature set which does not support class and policy maps.

All IOS software versions for these models.

Catalyst 2960-SF Series Switches

Catalyst 2960S-F24TS-S and 2960S-F48TS-S switch models are not supported. These switches only support the LAN Lite feature set which does not support class and policy maps.

All IOS software versions for these models.

The following switches:

- Catalyst 2960-S Series Switches

- Catalyst 2960-X Series Switches

- Catalyst 2960-XR Series Switches

- Catalyst 3560-C Series Switches

- Catalyst 3560-X Series Switches

- Catalyst 3750-X Series Switches

Catalyst 2960-S Series, Catalyst 2960-X Series, Catalyst 2960-XR Series, Catalyst 3560-C Series Switches, Catalyst 3560-X Series, and Catalyst 3750-X Series switches are supported in the role of access switches. These switch platforms will not be supported in the role of distribution or core switches.

All IOS software versions for these models.

Catalyst 3850 and 3650 Series Switches

A policy-map which contains a class-map which consists of an empty action cannot be applied to an interface prior to IOS XE release 3.6.2.

Catalyst 3850 and 3650 IOS XE software releases prior to 3.6.2.

Catalyst 6000 Series Switches with Sup-720 or Sup-2T Supervisors

Catalyst 6000 Series switches with the Sup-720 or the Sup-2T support two Ten Gigabit Ethernet and three Gigabit Ethernet interfaces on the supervisor line card. The three Gigabit Ethernet interfaces can be disabled / enabled via the “mls qos 10g-only / no mls qos 10g-only” (Sup-720) or "platform qos 10g-only / no platform qos 10g-only" (Sup-2T) global configuration commands. The default is for the Gigabit Ethernet interfaces to be active.

EasyQoS does not configure this command currently, since the decision as to whether the Gigabit Ethernet interfaces are active or inactive is generally based on the need for these interfaces, and outside the scope of QoS configuration. The network administrator should ensure this command is configured appropriately for the requirements of the network before deploying an EasyQoS policy to Catalyst 6000 switches with Sup-720 or Sup-2T supervisors.

The ingress and egress queuing model supported by the Supervisor interfaces is dependent upon whether the Gigabit Ethernet interfaces are active or inactive. When the Gigabit Ethernet interfaces are active, all interfaces on the Supervisor support a 2Q4T ingress queuing model and a 1P3Q4T egress queuing model, both with CoS-to-queue mapping and CoS-based tail-drop for congestion avoidance. When the Gigabit Ethernet interfaces are inactive, all interfaces on the Supervisor support an 8Q4T ingress queuing model and a 1P7Q4T egress queuing model, both with DSCP-to-queue mapping and DSCP-based WRED for congestion avoidance

If the network administrator changes the setting of the “mls qos 10g-only” (Sup-720) or "platform qos 10g-only" (Sup-2T)command on a Catalyst 6000 switch after deploying an EasyQoS policy, the network administrator should re-deploy the policy to the switch after Cisco APIC-EM has re-inventoried the switch and updated its internal database regarding the manual change.

All supported software versions for these platforms.

Catalyst 6500 Series Switches with Sup2T

CSCup61257 - Error message not printing if unsupported QoS is applied via SSH/Telnet. The Cisco APIC-EM may have trouble identifying when a QoS policy it has applied has failed due to this bug.

- 15.1(02)SY03,

s2t54-adventerprisek9-mz.SPA

- 151-2.SY3.bin,

s2t54-adventerprisek9-mz.SPA

- 150-1.SY6.bin,

s2t54-adventerprisek9-mz.SPA

- 150-1.SY6.bin listed in the DDTS

Note:
This issue may affect other software versions.

Catalyst 6500 Series Switches with Sup2T with the following line cards:

- WS-X6716 Series

- WS-X6816 Series

- WS-X6708 Series

Cisco APIC-EM is currently unable to determine if certain line cards are operating in Performance Mode or Oversubscription Mode. Ingress queuing on these line cards differs between the two modes of operation. Hence, when Cisco APIC-EM pushes ingress marking policies to these ports, the policy may fail.

All Catalyst 6500 software versions which support the Sup2T - 12.2(50)SY and higher.

Catalyst 6500 Series Switches with Sup2T

Cisco APIC-EM is currently unable to determine if 1 Gigabit Ethernet ports on the Sup2T are enabled or disabled. Ingress queuing of all ports on the Sup2T differs when the Gigabit Ethernet interfaces are enabled or disabled. Hence, when Cisco APIC-EM pushes ingress marking policies to ports on the Sup2T, the policy may fail.

All Catalyst 6500 software versions which support the Sup2T - 12.2(50)SY and higher.

The following switches:

- Catalyst 6500 Series with Sup2T

- Catalyst 6880 Series

- Catalyst 4000 Series

- Catalyst 3850 Series

- Catalyst 3650 Series

The Catalyst 6500 Series with Sup2T, Catalyst 6880 Series, Catalyst 4000 Series, Catalyst 3850 Series, and Catalyst 3650 Series switches will only be supported as an access-layer switch or as a distribution-layer switch. Support of a single switch as both a distribution-layer switch and an access-layer switch simultaneously is not supported. Multiple switch platforms of the same model can of course individually be either distribution layer switches or access-layer switches within a single deployment.

All supported software versions of the Catalyst 6500 Series with Sup2T, Catalyst 6880 Series, Catalyst 4000 Series, Catalyst 3850 Series, and Catalyst 3650 Series switches.

Cisco ASR 1000 Router Platforms

Cisco APIC-EM EasyQoS supports ASR 1000 platforms with IOS XE 3.8.0(S) / IOS 15.3(1)S and higher. However, the ingress marking policy pushed by EasyQoS varies based upon the IOS XE version as well as the NBAR2 protocol pack version. EasyQoS will push an ingress marking policy to ASR 1000 platforms based on the following criteria:

1. If the device is running IOS XE 3.16.1S / IOS 15.3(1)S or later and has Advanced Protocol Pack 14.0.0 or later, EasyQoS will push a policy-map which includes the business-relevance attribute for marking. This is because the business-relevant attribute requires a minimum version of IOS XE 3.16.1S and Advanced Protocol Pack 14.0.0. ASR 1000 platforms require an Advanced Enterprise Services (AES) or Advanced IP Services (AIS) license for NBAR2 Advanced Protocol Pack.

2. Otherwise, if the device is running IOS XE3.16, 3.15 and 3.14, or has a Standard Protocol Pack installed, or runs a older protocol pack which does not support metadata information, EasyQoS will not push any ingress marking policy.

3. Otherwise, EasyQoS will push a policy-map which includes “match protocol” commands, with the subset of the protocols that exist on the protocol pack on that device.

Cisco APIC-EM EasyQoS will always push a queuing policy to the device.

Software versions noted within the Description.

Cisco ISR 4000 Series Router Platforms

Cisco APIC-EM EasyQoS supports the ISR 4321, 4331, 4351, and 4431 platforms with IOS XE 3.13.2(S) / IOS 15.4(3)S and higher (minimum releases supported by the platforms). Cisco APIC-EM EasyQoS supports the ISR 4451-X platforms with IOS XE 3.10.0(S) / IOS 15.3(3)S and higher (minimum releases supported by the platforms).

However, the ingress marking policy pushed by EasyQoS varies based upon the IOS XE version as well as the NBAR2 protocol pack version. EasyQoS will push an ingress marking policy to ISR 4000 Series platforms based on the following criteria:

1. If the device is running IOS XE 3.16.1S or later and has Advanced Protocol Pack 14.0.0 or later, EasyQoS will push a policy-map which includes the business-relevance attribute for marking. This is because the business-relevant attribute requires a minimum version of IOS XE 3.16.1S and Advanced Protocol Pack 14.0.0. ISR 4000 Series platforms require an Application Experience (AppX) license for NBAR2 Advanced Protocol Pack.

2. Otherwise, if the device is running IOS XE3.16, 3.15 and 3.14, or has a Standard Protocol Pack installed, or runs a older protocol pack which does not support metadata information, EasyQoS will not push any ingress marking policy.

3. Otherwise, EasyQoS will push a policy-map which includes “match protocol” commands, with the subset of the protocols that exist on the protocol pack on that device.

Cisco APIC-EM EasyQoS will always push a queuing policy to the device.

Software versions noted within the Description .

Cisco ISR G2 Series Router Platforms

Cisco APIC-EM EasyQoS supports the ISR G2 platforms with IOS 15.2(4)M and NBAR2 Protocol Pack 2.1.0 and higher.

However the ingress marking policy pushed by EasyQoS varies based upon the IOS version as well as the NBAR2 protocol pack version. EasyQoS will push an ingress marking policy to ISR G2 Series platforms based on the following criteria:

1. If the device is running IOS 15.5(3)M1 or later and has Advanced Protocol Pack 14.0.0 or later, EasyQoS will push a policy-map which includes the business-relevance attribute for marking. This is because the business-relevant attribute requires a minimum version of IOS 15.5(3)M1 and Advanced Protocol Pack 14.0.0. ISR G2 Series platforms require a Data license for NBAR2 Advanced Protocol Pack.

2. Otherwise, if the device has a Standard Protocol Pack installed, or runs a older protocol pack which does not support metadata information, EasyQoS will not push any ingress marking policy.

3. Otherwise, EasyQoS will push a policy-map which includes “match protocol” commands, with the subset of the protocols that exist on the protocol pack on that device.

Cisco APIC-EM EasyQoS will always push a queuing policy to the device.

Software versions noted within the Description.

Cisco Nexus 7000 Series Platforms

EasyQoS for the APIC-EM 1.2 release (GA+2) supports the Nexus 7000 Series switches in the role of a campus core switch. Nexus 7000 Series switches with F2 and F2e modules, or Nexus 7000 Series switches with M2 modules are supported. For the APIC-EM 1.2 release EasyQoS will push a 8Q2T ingress queuing policy and a 1P7Q4T egress queuing policy to M2 modules.

Cisco best-practice recommendations for these modules have changed to a 4 ingress and 4 egress queue model. In some scenarios, undeterministic queuing behavior may result from the 8 ingress and 8 egress model, due to the internal switch fabric supporting 4 queues, resulting in bandwidth allocations not being accurately reflected in actual traffic output. The new queuing best practices are designed to provide more deterministic queuing behavior.

The new queuing best practices are targeted to be implemented in the APIC-EM 1.3 release. Customers who implement EasyQoS with the APIC-EM 1.2 release should be aware that the queuing structures deployed to these modules will change, and will need to be re-deployed with the next release. For the APIC-EM 1.2 release, EasyQoS will push a 4Q1T ingress queuing policy and a 1P3Q1T egress queuing policy to F2 and F2e modules. Since this policy is already a 4 ingress and 4 egress queuing policy, in alignment with the new best practice recommendations, no changes to the queuing policy will occur for these modules with the APIC-EM 1.3 release.

All supported software versions for these modules.

Cisco Nexus 7700 Series Platforms

EasyQoS for the APIC-EM 1.2 release (GA+2) will support the Nexus 7700 Series switches in the role of a campus core switch. Nexus 7700 Series switches with F2e and F3 modules, or Nexus 7700 Series switches with M3 modules are supported. For the APIC-EM 1.2 release, EasyQoS will push a 4Q1T ingress queuing policy and a 1P7Q1T egress queuing policy to F2e, F3, and M3 modules.

Cisco best-practice recommendations for these modules have changed to a 4 ingress and 4 egress queue model. In some scenarios, undeterministic queuing behavior may result from transitioning from 4 ingress queues to 8 egress queues, resulting in bandwidth allocations not being accurately reflected in actual traffic output. The new queuing best practices are designed to provide more deterministic queuing behavior.

The new queuing best practices are targeted to be implemented in the APIC-EM 1.3 release. Customers who implement EasyQoS with the APIC-EM 1.2 release should be aware that the queuing structures deployed to these modules will change, and will need to be re-deployed with the next release

All supported software versions for these modules.

Cisco Nexus 7000 and 7700 Series Platforms

EasyQoS for APIC-EM 1.2 only supports Nexus 7000 and 7700 Series platforms with a single default VDC, and with no admin VDC. The names of the class-maps for ingress and egress queues are system defined and cannot be modified. Changing the mapping of CoS and/or DSCP values per class-map (queue) are system wide, meaning the mapping applies to all VDCs. Modification of these values requires Cisco APIC-EM to be logged into the default VDC. Policy-map definitions, however, are VDC specific. APIC-EM 1.2 only logs into a single default VDC to modify CoS and/or DSCP mappings within the system-defined class-maps, and to create and apply policy-map definitions.

All supported software versions for these platforms.

Cisco ISR 800 Series Routers

EasyQos for the APIC-EM 1.2 release pushes AVC/NBAR-based ingress classification and marking policies to all Ethernet interfaces on Cisco ISR 800 Series routers - including Layer 2 switch ports built into the platform. Although the policy is applied to the switch-port interfaces, the policy has no function.

All supported software versions for these platforms.

Catalyst 4000 Series Switches

EasyQoS for the APIC-EM 1.2 release does not support Catalyst 4000 Series switches in a VSS configuration.

All supported software versions for these platforms.

All Catalyst Switch platforms

EasyQoS for the APIC-EM 1.2 release does not remove the AutoQoS command/configuration from switch platforms. EasyQoS does not make use of conditional trust, which is the basis of the current AutoQoS implementation. Deployment of EasyQoS when AutoQoS is configured is not supported, and may not function properly. It is recommended to manually remove all AutoQoS configurations from switches before implementing EasyQoS policy to switches, or to deploy EasyQoS in environments where AutoQoS is not deployed.

All supported software versions for these platforms.

Catalyst 6000 Series Switches with Sup-2T and Sup-720 Supervisors

EasyQoS for the APIC-EM 1.2 release does not support Catalyst 6500 Series or Catalyst 6800 Series switches in a VSS configuration.

All supported software versions for these platforms.

Path Trace Support and Limitations

The following tables describe the Cisco APIC-EM Path Trace support and limitations.

Protocol Support by Platform

The following table describes protocol support by platform for a path trace.

Platform

HSRP[1]

Physical Interface

Sub-

Interface

SVI[2]

PVST[3]

Ether

Channel

(L2)

ECMP[4]

Ether

Channel

(L3)

Routing Protocols (L3)[5]

Net[6]

Flow

Perf[7]

Mon

Trace Route

2960-S

Yes

N/A

N/A

N/A

Yes

Yes

No

No

Yes

N/A

Yes

N/A

2960-S (stack)

Yes

N/A

N/A

N/A

N/A

Yes

No

No

Yes

N/A

Yes

N/A

3560-X

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

3560CG

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

N/A

3560CX

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

N/A

3650

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

3750-X

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

3750-X (stack)

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

3850

Yes

Yes

N/A

Yes

Yes

Yes

No

No

Yes

N/A

Yes

Yes

3850 (stack)

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

4500E (Sup7E)

Yes

Yes

N/A

Yes

Yes

Yes

No

No

Yes

N/A

Yes

Yes

6500 (Sup720-

3C/B)

Yes

Yes

Yes

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

6500(2T)

Yes

Yes

Yes

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

6800

Yes

Yes

N/A

Yes

Yes

Yes

Yes

No

Yes

N/A

Yes

Yes

WLC 2504

N/A

N/A

N/A

N/A

N/A

Yes

N/A

N/A

N/A

N/A

N/A

N/A

WLC 5500

N/A

N/A

N/A

N/A

N/A

Yes

N/A

N/A

Yes

N/A

N/A

N/A

WLC 5760

N/A

N/A

N/A

N/A

N/A

Yes

N/A

N/A

N/A

N/A

N/A

N/A

WLC 8500

N/A

N/A

N/A

N/A

N/A

Yes

N/A

N/A

N/A

N/A

N/A

N/A

ASR 1K

Yes

Yes

Yes

Yes

N/A

No

Yes

No

Yes

Yes

Yes

Yes

ASR 9K

Yes

Yes

Yes

Yes

N/A

No

Yes

No

Yes

Yes

No

Yes

ISR-G2

Yes

Yes

Yes

Yes

N/A

No

Yes

No

Yes

Yes

Yes

Yes

ISR-4451

-X

Yes

Yes

Yes

Yes

N/A

No

Yes

No

Yes

Yes

Yes

Yes

Nexus 5000

Yes

Yes

N/A

Yes

Yes

Yes

No

No

Yes

N/A

No

Yes

Nexus 7000

Yes

Yes

Yes

Yes

Yes

Yes

Yes

No

Yes

N/A

No

Yes

[1] Hot Standby Router Protocol (HSRP).

[2] Switch Virtual Interface (SVI)

[3] Per VLAN Spanning Tree Protocol (PVST)

[4] Equal Cost Multipath (ECMP)

[5] Supported Layer 3 routing protocols include: static, OSPF, EIGRP, IS-IS, and BGP. The following Layer 3 protocol is not supported: PBR.

[6] NetFlow needs to be enabled on the supported device. The controller pulls cached NetFlow records from the device.

[7] Automatic Configuration

Path Trace VRF Support

The following table describes VRF support by platform for a path trace.

Path Trace VRF (VRf Lite) Support

Platform

SVI

Physical

Port Channel

Cisco Catalyst 2960-S Series

Yes

Yes

No

Cisco Catalyst 2960-S Series (stack)

Yes

Yes

No

Cisco Catalyst 3560-X Series

Yes

Yes

No

Cisco Catalyst 3560CG Series

Yes

Yes

No

Cisco Catalyst 3560-CX Series

Yes

Yes

No

Cisco Catalyst 3650 Series

Yes

Yes

No

Cisco Catalyst 3750-X Series

Yes

Yes

No

Cisco Catalyst 3750-X Series (stack)

Yes

Yes

No

Cisco Catalyst 3850 Series

Yes

Yes

No

Cisco Catalyst 3850 Series (stack)

Yes

Yes

No

Cisco Catalyst 4500 Sup7E Series

Yes

Yes

No

Cisco Catalyst 6500 (Sup720- 3C/B) Series

Yes

Yes

No

Cisco Catalyst 6500(Sup-2T) Series

Yes

Yes

No

Cisco Catalyst 6800 Series

Yes

Yes

No

Cisco 2504 Series Wireless LAN Controller

Not Applicable

Not Applicable

Not Applicable

Cisco 5500 Series Wireless LAN Controller

Not Applicable

Not Applicable

Not Applicable

Cisco 5760 Series Wireless LAN Controller

Not Applicable

Not Applicable

Not Applicable

Cisco 8500 Series Wireless LAN Controller

Not Applicable

Not Applicable

Not Applicable

Cisco ASR 1000 Series

Yes

Yes

No

Cisco ASR 9000 Series

Yes

Yes

No

Cisco ISR-G2 Series

Yes

Yes

No

Cisco ISR-4451 -X Series

Yes

Yes

No

Cisco Nexus 5000

Yes

Yes

No

Cisco Nexus 7000

Yes

Yes

No

Path Trace ACL Support

The following table describes ACL trace support by platform for a path trace.

Path Trace ACL Support

Platform

Standard ACLs

Extended ACLs

IP Name ACLs

Cisco Catalyst 2960-S Series

Yes

Yes

Yes

Cisco Catalyst 2960-S Series (stack)

Yes

Yes

Yes

Cisco Catalyst 3560-X Series

Yes

Yes

Yes

Cisco Catalyst 3560CG Series

Yes

Yes

Yes

Cisco Catalyst 3560-CX Series

Yes

Yes

Yes

Cisco Catalyst 3650 Series

Yes

Yes

Yes

Cisco Catalyst 3750-X Series

Yes

Yes

Yes

Cisco Catalyst 3750-X Series (stack)

Yes

Yes

Yes

Cisco Catalyst 3850 Series

Yes

Yes

Yes

Cisco Catalyst 3850 Series (stack)

Yes

Yes

Yes

Cisco Catalyst 4500 Sup7E Series

Yes

Yes

Yes

Cisco Catalyst 6500 (Sup720- 3C/B) Series

Yes

Yes

Yes

Cisco Catalyst 6500(Sup-2T) Series

Yes

Yes

Yes

Cisco Catalyst 6800 Series

Yes

Yes

Yes

Cisco 2504 Series Wireless LAN Controller

Not Applicable

Not Applicable

Cisco 5500 Series Wireless LAN Controller

Not Applicable

Not Applicable

Yes

Cisco 5760 Series Wireless LAN Controller

Not Applicable

Not Applicable

Yes

Cisco 8500 Series Wireless LAN Controller

Not Applicable

Not Applicable

Yes

Cisco ASR 1000 Series

Yes

Yes

Yes

Cisco ASR 9000 Series

No

No

Yes

Cisco ISR-G2 Series

Yes

Yes

Yes

Cisco ISR-4451 -X Series

Yes

Yes

Yes

Cisco Nexus 5000

Yes

Yes

Yes

Cisco Nexus 7000

Yes

Yes

Yes

Wireless AP Support by Platform

The following table describes wireless application point (AP) support by platform for a path trace.

Wireless AP Support by Platform

Platform

AP Manager

LAG[1]

Physical

Cisco 2504 Series Wireless LAN Controller

Yes

Yes

Cisco 5500 Series Wireless LAN Controller

Yes

Yes

Cisco 5540 Series Wireless LAN Controller

Yes

Yes

Cisco 5760 Series Wireless LAN Controller

Yes

Yes

Cisco 8500 Series Wireless LAN Controller

Yes

Yes

Cisco 8540 Series Wireless LAN Controller

Yes

Yes

[1] Link Aggregation Group (LAG)

Wireless Mode Support by Platform

The following table describes wireless mode support (deployment and mobility) by platform for a path trace.

Platform[1]

Wireless Deployment Mode

Wireless Mobility Mode

Centralized[2]

Flex

Converged

Centralized

Converged

Hybrid[3]

Cisco 2504 Series Wireless LAN Controller

Yes

No

No

Yes

No

No

Cisco 5500 Series Wireless LAN Controller

Yes

No

No

Yes

No

No

Cisco 5760 Series Wireless LAN Controller

Yes

No

No

Yes

No

No

Cisco 8500 Series Wireless LAN Controller

Yes

No

No

Yes

No

No

[1] WLC redundancy and high availability is not supported.

[2] Catalyst 3850 switch and stack do not support converged wireless deployment mode for a path trace.

[3] Catalyst 3850 switch and stack do not support hybrid wireless mobility mode for a path trace.

Path Trace Supported Scenarios

The following table describes the supported scenarios for a path trace.

Scenario

Protocol

Feature List

Configuration

Suported

Gateway Load Balancing

HSRP

Interface and Media Support

Physical Interface

Yes

SVI

Yes

BVI

No

Sub Interface

No

Load sharing on same link

Same interface part of more than one HSRP group

No

Load sharing across links

—

Yes

Wireless Deployment Modes

Centralized

Interface support

Management Interface

Yes

AP Mgr Interface

Yes

Dynamic Interface

No

AP Load Balancing

AP load balance across single port channel

Yes

Single AP Manager Interface Configuration

Yes

Multiple AP Manager Interface Configuration and load balance it on different physical interface

Yes

Interface Group

Yes

WLAN

Dynamic Interfaces per WLAN mapped to physical interface

Yes

Dynamic Interfaces per WLAN Over LAG

Yes

Management Interface configuration

Untagged

No

Tagged with a VLAN

Yes

Wireless Mobility Modes

Centralized

Auto-Anchor Mobility

—

Yes

Symmetric Mobility Tunneling

—

Yes

Asymmetric Mobility Tunneling

—

No

Layer 2 and Layer 3 Roaming

—

Yes

Layer 2 Load Balancing

STP

PVST

—

Yes

EtherChannel

Port channel

Spanning Tree on PO

Yes

Display Member Link derived after load balancing

No

Static port channels

Mode On

Yes

Dynamic port channels

LACP

Yes

Multi Chassis redundancy

M-LACP

No

ECMP

Only Layer 3 data forwarding interfaces.

—

—

No management interfaces

—

—

Layer 3 Load Balancing

ECMP

Routing Recursive Lookup Levels

Five Levels

Yes

ECMP over Physical interface

—

Yes

ECMP over SVI

Load balance within SVIs or SVI + port channel

No

OSPF / BGP / EIGRP / ISIS / Static Route

—

Yes

ECMP over Sub-Interface

—

Yes

EtherChannel

Port channel

IPV4 address

No

Display Member Link derived after load balancing

No

Static port channels

Mode on

No

Dynamic port channels

LACP / PAGP

No

Multi Chassis redundancy

M-LACP

No

Troubleshooting

See the Cisco Application Policy Infrastructure Controller Enterprise Module Troubleshooting Guide, for troubleshooting procedures.

Related Documentation

The following publications are available for the Cisco APIC-EM:

Cisco APIC-EM Documentation

For this type of information...

See this document...

- Learning about the latest features.

- Learning about the controller system requirements.

- Reviewing open and resolved caveats about the controller.

Cisco Application Policy Infrastructure Controller Enterprise Module Release Notes

- Learning about supported platforms.

- Learning about required configurations on certain specific platforms.

- Learning about application-specific limitations on certain specific platforms.

Supported Platforms for the Cisco Application Policy Infrastructure Controller Enterprise Module, Release 1.2.0.x.

- Installing and deploying the controller.

- Configuring credentials for device discovery.

- Importing a certificate or trustpool.

- Using service logs.

- Configuring authentication timeout and password policies.

- Monitoring and managing Cisco APIC-EM services.

- Backing up and restoring the controller.

Cisco Application Policy Infrastructure Controller Enterprise Module Deployment Guide

- Navigating the Cisco APIC-EM GUI.

- Getting familiar with the Cisco APIC-EM features.

Cisco Application Policy Infrastructure Controller Enterprise Module Quick Start Guide

- Creating user accounts.

- Discovering devices in your network and populating your inventory.

- Displaying discovered devices in various topological views.

- Configuring quality of service on the devices in your network.

- Performing path traces.

- Using the topology map.

- Accessing the Cisco APIC-EM APIs.

Cisco Application Policy Infrastructure Controller Enterprise Module Configuration Guide

- Troubleshooting the controller.

- Troubleshooting services.

- Troubleshooting passwords.

- Working with the developer console.

- Contacting the Cisco Technical Assistance Center (TAC).

Cisco Application Infrastructure Controller Enterprise Module Troubleshooting Guide

- Tasks to perform before beginning an update.

- Updating the controller to the latest version.

- Tasks to perform after an update.

Cisco Application Infrastructure Controller Enterprise Module Upgrade Guide

Cisco IWAN Documentation

For this type of information...

See this document...

Configuring the Cisco IWAN network.

Software Configuration Guide for Cisco IWAN on APIC-EM

Reviewing open and resolved caveats about the Cisco IWAN application.

Release Notes for Cisco Intelligent Wide Area Network (Cisco IWAN)

Cisco Network Plug and Play Documentation

For this type of information...

See this document...

- Reviewing open and resolved caveats about Cisco Network Plug and Play.

- Viewing the list of supported Cisco devices for Cisco Network Plug and Play.

Release Notes for Cisco Network Plug and Play

- Configuring Cisco Network Plug and Play.

Configuration Guide for Cisco Network Plug and Play on Cisco APIC-EM

Cisco Open Plug-n-Play Agent Configuration Guide

- Learning about the Cisco Network Plug and Play solution.

- Understanding the main workflows used with the Cisco Network Plug and Play solution.

- Deploying the Cisco Network Plug and Play solution.

- Using proxies with the Cisco Network Plug and Play solution.

- Configuring a DHCP server for APIC-EM controller auto-discovery.

- Troubleshooting the Cisco Network Plug and Play solution.

Solution Guide for Cisco Network Plug and Play

Using the Cisco Plug and Play Mobile App

Mobile Application User Guide for Cisco Network Plug and Play (also accessible in the app through Help)

APIC-EM Developer Documentation

For this type of information...

See this document...

API functions, parameters, and responses.

APIC-EM API Reference Guide on Cisco DevNet

Tutorial introduction to controller GUI, DevNet sandboxes and APIC-EM NB REST API.

Getting Started with Cisco Application Policy Infrastructure Controller Enterprise Module (APIC-EM) on Cisco DevNet

Hands-on coding experience calling APIC-EM NB REST API from Python.

APIC-EM Learning Labs on Cisco DevNet

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, using the Cisco Bug Search Tool (BST), submitting a service request, and gathering additional information, see What’s New in Cisco Product Documentation at:

Click Here

Subscribe to What’s New in Cisco Product Documentation, which lists all new and revised Cisco technical documentation as an RSS feed and delivers content directly to your desktop using a reader application. The RSS feeds are a free service.

Trademarks

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: Click Here . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)