Chapter 1. Cisco Active Advisor for APIC-EM Release Notes

What's New in Cisco Active Advisor for APIC-EM

Installing Active Advisor for APIC-EM

Limitations and Restrictions

Troubleshooting and Opening a Service Request

Related Documentation

Trademarks

Chapter 1. Cisco Active Advisor for APIC-EM Release Notes

Cisco Active Advisor for APIC-EM Release Notes, Release 1.4.0.x

First Published: April 13, 2017

What's New in Cisco Active Advisor for APIC-EM

Active Advisor provides information about the devices in your Cisco APIC-EM inventory that have hardware End-of-Life warnings and vulnerabilities that have been identified by the Cisco Product Security Incident Response Team (PSIRT).

Installing Active Advisor for APIC-EM

From the Application Management Update page in APIC-EM, drag and drop the Active Advisor image (apic-em-caa-application-1.4.0.142.application file) to the appropriate spot. For a detailed explanation with screen shots, go here: Click Here

Limitations and Restrictions

Active Advisor has the following limitations and restrictions:

- Active Advisor requires an outbound connection to the internet and a DNS configuration that enables your APIC-EM controller to reach the following two sites:

- Click Here

- Click Here

You can test your controller internet connectivity using the procedure in the following article:

Click Here

- The APIC-EM Telemetry collection service must be enabled. See the following article for information about how to check that it's enabled:

Click Here

Troubleshooting and Opening a Service Request

For troubleshooting FAQs and procedures for Active Advisor, see our knowledge base at the following URL:

Click Here

If you can’t find what you are looking for, click New support ticket and open a ticket. One of our developers will get back to you.

Related Documentation

The Active Advisor application is one of a suite of applications that runs on the APIC-EM controller. For knowledge articles about Active Advisor, see the Active Advisor knowledge base at the following URL:

Click Here

For documentation about the APIC-EM controller and its additional applications, see the following URL:

Click Here

Trademarks

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: Click Here . Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)