Cisco NX-OS Release 11.3(2) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches

This document describes the features, caveats, and limitations for Cisco NX-OS software that runs on Cisco Nexus 9000 Series Application Centric Infrastructure (ACI) switches. Use this document in combination with the Cisco Application Policy Infrastructure Controller, Release 1.3(2), Release Notes, which you can view at the following location:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Additional product documentation is listed in the “Related Documentation” section.

Release notes are sometimes updated with new information about restrictions and caveats. See the following website for the most recent version of the Cisco NX-OS Release 11.3(2) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches:

https://www.cisco.com/c/en/us/support/switches/nexus-9000-series-switches/products-release-notes-list.html

Note: The 11.3(2) release is a continuation of the 11.3(1) release, and so the 11.3(1) documentation also contains information that is relevant to the 11.3(2) release.

Table 1 shows the online change history for this document.

Table 1. Online History Change

Date

Description

June 7, 2016

Created the release notes for release 11.3(2f).

June 30, 2016

11.3(2f): Removed bug CSCuz42791 from the Open Caveats in the 11.3(2f) Release table. This bug was resolved in this release and was erroneously included in the table.

July 11, 2016

11.3(2h): Added the content for release 11.3(2h).

August 8, 2016

11.3(2i): Added the content for release 11.3(2i).

September 2, 2016

Added pointers to the release notes for release 11.3(1).

October 28, 2016

In the Supported FEX Models section, added N2K-B22HP-P.

December 6, 2016

In the “Usage Guidelines” section, removed the bullet that began with, “GARP flooding is enabled by default for the Cisco Nexus 93180YC-EX switch…” GARP flooding is now disabled by default for 93180YC-EX switches.

April 13, 2017

12.3(2k): Release 12.3(2k) became available. Added the resolved caveats for this release.

January 17, 2018

In the Compatibility Information section, changed “You cannot connect the APIC directly to the N9332PQ ACI spine” to “You cannot connect the APIC directly to the N9332PQ ACI leaf switch.”

Contents

This document includes the following sections:

■  Cisco Nexus 9000 Series ACI-Mode

■  Supported Hardware

■  Supported FEX Models

■  New and Changed Information

■  Installation Notes

■  Compatibility Information

■  Usage Guidelines

■  Caveats

■  Related Documentation

Cisco Nexus 9000 Series ACI-Mode

Cisco NX-OS Software for the Cisco Nexus 9000 Series is a data center, purpose-built, operating system designed with performance, resiliency, scalability, manageability, and programmability at its foundation. It provides a robust and comprehensive feature set that meets the requirements of virtualization and automation in data centers

Cisco NX-OS Release 11.3 works only on Cisco Nexus 9000 Series switches in ACI Mode.

See Table 2 for a list of modules that are supported on Cisco Nexus 9000 Series switches in ACI Mode.

Supported Hardware

Table 2 lists the hardware that the Cisco Nexus 9000 Series ACI Mode switches support.

Table 2. Cisco Nexus 9000 Series Hardware.

Hardware Type

Product ID

Description

Chassis

N9K-C9504

Cisco Nexus 9504 chassis with 4 I/O slots

Chassis

N9K-C9508

Cisco Nexus 9508 chassis with 8 I/O slots

Chassis component

N9K-C9508-FAN

Fan tray

Chassis component

N9k-PAC-3000W-B

Cisco Nexus 9500 3000W AC power supply, port side intake

Pluggable module (GEM)

N9K-M6PQ

6-port

Pluggable module (GEM)

N9K-M6PQ-E

6-port, 40 Gigabit Ethernet expansion module

Pluggable module (GEM)

N9K-M12PQ

12-port or 8-port

Spine switch

N9K-C9336PQ

Cisco Nexus 9336PQ switch, 36-port 40 Gigabit Ethernet QSFP

Spine switch

N9K-C9508-B1

Cisco Nexus 9508 chassis bundle with 1 supervisor module, 3 power supplies, 2 system controllers, 3 fan trays, and 3 fabric modules

Spine switch

N9K-C9508-B2

Cisco Nexus 9508 chassis bundle with 1 supervisor module, 3 power supplies, 2 system controllers, 3 fan trays, and 6 fabric modules

Spine switch

N9K-C9516

Cisco Nexus 9516 switch with 16 linecard slots

Note: This switch supports up to 10 I/O modules.

Spine switch fan

N9K-C9300-FAN3

Port side intake fan

Spine switch fan

N9K-C9300-FAN3-B

Port side exhaust fan

Spine switch module

N9K-C9504-FM

Cisco Nexus 9504 fabric module supporting 40 Gigabit I/O modules

Spine switch module

N9K-C9504-FM-E

Cisco Nexus 9504 fabric module supporting 100 Gigabit I/O modules

Spine switch module

N9K-C9508-FM

Cisco Nexus 9508 fabric module supporting 40 Gigabit I/O modules

Spine switch module

N9K-C9508-FM-E

Cisco Nexus 9508 Fabric module supporting 100 Gigabit I/O modules

Spine switch module

N9K-X9732C-EX

Cisco Nexus 9500 32-port, 40/100 Gigabit Ethernet QSFP28 aggregation module

Spine switch module

N9K-X9736PQ

Cisco Nexus 9500 36-port, 40 Gigabit Ethernet QSFP aggregation module

Switch module

N9K-SC-A

Cisco Nexus 9500 Series system controller

Switch module

N9K-SUP-A

Cisco Nexus 9500 Series supervisor module

Switch module

N9K-SUP-B

Cisco Nexus 9500 Series supervisor module

Top-of-rack (ToR) leaf switch

N9K-C93120TX

Cisco Nexus 9300 with 96-port 1/10 Gigabit-T and 6-port 40 Gigabit Ethernet QSFP

Top-of-rack (ToR) leaf switch

N9K-C93128TX

Cisco Nexus 9300 96-port, 1-/10-Gbps BASE-T and 6-port or 8-port, 40 Gigabit Ethernet QSFP switch

Top-of-rack (ToR) leaf switch

N9K-C93180YC-EX

Cisco Nexus 9300 Fixed with 48-port 10/25 Gigabit and 6-port 40/100 Gigabit QSFP28

N9K-C93180YC-EX 48-port 10/25 Gigabit and 6-port 40/100 Gigabit QSFP28

Top-of-rack (ToR) leaf switch

N9K-C9332PQ

Cisco Nexus 9332PQ 32-port 40 Gigabit Ethernet QSFP+ Top-of-rack (ToR) Layer 3 switch

Top-of-rack (ToR) leaf switch

N9K-C9372PX

Cisco Nexus 9372PX 48-port, 10 Gigabit Ethernet SFP+ and 6-port 40 Gigabit Ethernet QSFP+ Top-of-rack (ToR) Layer 3 switch

Note: Only the downlink ports 1-16 and 33-48 are capable of supporting SFP1-10G-ZR SFP+.

Top-of-rack (ToR) leaf switch

N9K-C9372PX-E

Cisco Nexus 9372PX-E 48-port, 10 Gigabit Ethernet SFP+ and 6-port 40 Gigabit Ethernet QSFP+ Top-of-rack (ToR) Layer 3 switch

Note: Only the downlink ports 1-16 and 33-48 are capable of supporting SFP1-10G-ZR SFP+.

Top-of-rack (ToR) leaf switch

N9K-C9372TX

Cisco Nexus 9372TX 48-port, 1/10 Gbps Base-T and 6-port, 40 Gigabit Ethernet QSFP Top-of-rack (ToR) Layer 3 switch

Top-of-rack (ToR) leaf switch

N9K-C9372TX-E

Cisco Nexus 9372TX-E 48-port 1/10 Gbps Base-T and 6-port 40 Gbps Ethernet QSFP+ Top-of-rack (ToR) Layer 3 switch

Top-of-rack (ToR) leaf switch

N9K-C9396PX

Cisco Nexus 9300 48-port, 1/10 Gigabit Ethernet SFP+ and 6-port or 12-port, 40 Gigabit Ethernet QSFP switch

Top-of-rack (ToR) leaf switch

N9K-C9396TX

Cisco Nexus 9300 48-port, 1/10 Gbps Base-T and 6-port or 12-port, 40 Gigabit Ethernet QSFP switch

Top-of-rack (ToR) leaf switch power supply unit

N9K-PAC-650W-B

650W AC Power supply, port side exhaust pluggable

Top-of-rack (ToR) leaf switch power supply unit

N9K-PAC-650W

650W AC Power supply, port side intake pluggable

Top-of-rack (ToR) leaf switch power supply unit

N9K-PAC-1200W-B

1200W AC Power supply, port side exhaust pluggable

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches

Top-of-rack (ToR) leaf switch power supply unit

N9K-PAC-1200W

1200W AC Power supply, port side intake pluggable

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches

Top-of-rack (ToR) leaf switch power supply unit

N9K-PUV-1200W

1200W HVAC/HVDC dual-direction airflow power supply

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches

Top-of-rack (ToR) leaf switch power supply unit

N9K-PUV-3000W-B

3000W AC Power supply, port side exhaust pluggable

Top-of-rack (ToR) leaf switch power supply unit

NXA-PAC-1200W-PE

1200W AC Power supply, port side exhaust pluggable, with higher fan speeds for NEBS compliance

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches.

Top-of-rack (ToR) leaf switch power supply unit

NXA-PAC-1200W-PI

1200W AC Power supply, port side intake pluggable, with higher fan speeds for NEBS compliance

Note: This power supply is supported only by the Cisco Nexus 93120TX, 93128TX, and 9336PQ ACI-mode switches.

Top-of-rack (ToR) leaf switch power supply unit

UCS-PSU-6332-DC

930W DC power supply, reversed airflow (port side exhaust)

Top-of-rack (ToR) leaf switch power supply unit

UCSC-PSU-930WDC V01

Port side exhaust DC power supply compatible with all ToR leaf switches

Top-of-rack (ToR) leaf switch fan

NXA-FAN-30CFM-F

Port side exhaust fan

Top-of-rack (ToR) leaf switch fan

NXA-FAN-30CFM-B

Port side intake fan

Supported FEX Models

Table 3 lists the FEX models that the Cisco Nexus 9000 Series ACI Mode switches support. For more information on the FEX models, see the Cisco Nexus 2000 Series Fabric Extenders Data Sheet at the following location:

https://www.cisco.com/c/en/us/products/switches/nexus-2000-series-fabric-extenders/datasheet-listing.html

Table 3. Supported FEX Models.

Product ID

Description

N2K-B22DELL-P

B22 FEX for Dell

N2K-B22HP-P

B22 FEX for HP

N2K-B22IBM-P

B22 FEX for IBM

N2K-C2248PQ-10GE

Cisco Nexus 2248PQ 10GE Fabric Extender, 2PS, 4 Fan Module, 48x1/10GE (req SFP/SFP+) + 4x40G QSFP+(req QSFP+), choice of airflow and power supply

N2K-C2248TP-1GE

Cisco Nexus 2248TP Series 1GE Fabric Extender, 2 AC PS, 1 Fan Module (Standard Airflow/port side exhaust), 48x100/1000Base-T + 4x10GE (req SFP+), same as N2K-C2248TP

N2K-C2248TP-E-1GE

Cisco Nexus 2248TP-E Series 1GE Fabric Extender, 2PS, 1 Fan Module, 48x100/1000Base-T + 4x10GE (req SFP+), 32MB buffer, choice of airflow and power supply

N2K-C2332TQ

Cisco Nexus 2332TQ 10G BASE T Fabric Extender, 2PS, 3 Fan Module, 48x100M/1/10GE + 4x40G QSFP+(req QSFP+), choice of airflow and power supply

N2K-C2348TQ

Cisco Nexus 2348TQ 10G BASE T Fabric Extender, 2PS, 3 Fan Module, 48x100M/1/10GE + 6x40G QSFP+(req QSFP+), choice of airflow and power supply

N2K-C2348UPQ

48 100Mῖ/1/10 Gigabit Ethernet and Unified Port host interfaces (SFP+) and up to 6ῖ QSFP+ 10/40 Gigabit Ethernet fabric interfaces

N2K-C2232PP-10GE

Cisco Nexus 2232PP Series 10GE Fabric Extender, 2 AC PS, 1 Fan Module (Standard Airflow/port side exhaust), 32x1/10GE (req SFP/SFP+) + 8x10GE (req SFP+), same as N2K-C2232PP

N2K-C2232TM-E-10GE

Cisco Nexus 2232TM-E Series 10GBASE-T Fabric Extender, 2PS, 1 Fan Module, 32x1/10GBase-T + 8x10GE Module (req SFP+), choice of airflow and power supply

New and Changed Information

This section lists the new and changed features in this release.

■       New Hardware Features

■       New Software Features

New Hardware Features

For new hardware features, see the Cisco NX-OS Release 11.3(1) Release Notes for Cisco Nexus 9000 Series ACI-Mode Switches at the following location:

https://www.cisco.com/c/en/us/support/switches/nexus-9000-series-switches/products-release-notes-list.html

Note: The 11.3(2) release is a continuation of the 11.3(1) release, and so the 11.3(1) documentation contains information that is relevant to the 11.3(2) release.

New Software Features

For new software features, see the Cisco APIC 1.3(2) Release Notes at the following location:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Installation Notes

The following procedure installs a Gigabit Ethernet module (GEM) in a top-of-rack switch:

1.        Clear the switch’s current configuration by using the setup-clean-config command.

2.        Power off the switch by disconnecting the power.

3.        Replace the current GEM card with the new GEM card.

4.        Power on the switch.

For other installation instructions, see the Cisco ACI Fabric Hardware Installation Guide at the following location:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Compatibility Information

■  This release supports the hardware and software listed on the ACI Ecosystem Compatibility List and the Cisco AVS, Release 4.2(1)SV2(2.3).

■  The breakout of 40G ports to 4x10G on the N9332PQ switch is not supported in ACI-Mode.

■  To connect the N2348UPQ to ACI leaf switches, the following options are available:

—      Directly connect the 40G FEX ports on the N2348UPQ to the 40G switch ports on the ACI leaf switches

—      Break out the 40G FEX ports on the N2348UPQ to 4x10G ports and connect to the N9396PX, N9372PX, or N9372PX-E switches

■  To connect the APIC (the controller cluster) to the ACI fabric, it is required to have a 10G interface on the ACI leaf. You cannot connect the APIC directly to the N9332PQ ACI leaf switch.

Usage Guidelines

■  The current list of protocols that are allowed (and cannot be blocked through contracts) include the following. Some of the protocols have SrcPort/DstPort distinction.

Note: See the APIC release notes for policy information: https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

—      UDP DestPort 161: SNMP. These cannot be blocked through contracts. Creating an SNMP ClientGroup with a list of Client-IP Addresses restricts SNMP access to only those configured Client-IP Addresses. If no Client-IP address is configured, SNMP packets are allowed from anywhere.

—      TCP SrcPort 179: BGP

—      TCP DstPort 179: BGP

—      OSPF

—      UDP DstPort 67: BOOTP/DHCP

—      UDP DstPort 68: BOOTP/DHCP

—      IGMP

—      PIM

—      UDP SrcPort 53: DNS replies

—      TCP SrcPort 25: SMTP replies

—      TCP DstPort 443: HTTPS

—      UDP SrcPort 123: NTP

—      UDP DstPort 123: NTP

■  Leafs and spines from two different fabrics cannot be connected regardless of whether the links are administratively kept down.

Caveats

This section contains lists of open and resolved caveats and known behaviors.

■  Known Limitations

■  Open Caveats

■  Resolved Caveats

■  Known Behaviors

Known Limitations

The following list describes IpEpg (IpCkt) known limitations in this release:

■  An IP/MAC Ckt endpoint configuration is not supported in combination with static endpoint configurations.

■  An IP/MAC Ckt endpoint configuration is not supported with Layer 2-only bridge domains. Such a configuration will not be blocked, but the configuration will not take effect as there is no Layer 3 learning in these bridge domains.

■  An IP/MAC Ckt endpoint configuration is not supported with external and Infra bridge domains because there is no Layer 3 learning in these bridge domains.

■  An IP/MAC Ckt endpoint configuration is not supported with a shared services provider configuration. The same or overlapping prefix cannot be used for a shared services provider and IP Ckt endpoint. However, this configuration can be applied in bridge domains having shared services consumer endpoint groups.

■  An IP/MAC Ckt endpoint configuration is not supported with dynamic endpoint groups. Only static endpoint groups are supported.

■  No fault will be raised if the IP/MAC Ckt endpoint prefix configured is outside of the bridge domain subnet range. This is because a user can configure bridge domain subnet and IP/MAC Ckt endpoint in any order and so this is not error condition. If the final configuration is such that a configured IP/MAC Ckt endpoint prefix is outside all bridge domain subnets, the configuration has no impact and is not an error condition.

■  Dynamic deployment of contracts based on instrImmedcy set to onDemand/lazy not supported; only immediate mode is supported.

The following list describes direct server return (DSR) known limitations in this release:

■  When a server and load balancer are on the same endpoint group, make sure that the Server does not generate ARP/GARP/ND request/response/solicits. This will lead to learning of LB virtual IP (VIP) towards the Server and defeat the purpose of DSR support

■  Load balancers and servers must be Layer 2 adjacent. Layer 3 direct server return is not supported. If a load balancer and servers are Layer 3 adjacent, then they have to be placed behind the Layer 3 out, which works without a specific direct server return virtual IP address configuration.

■  Direct server return is not supported for shared services. Direct server return endpoints cannot be spread around different virtual routing and forwarding (VRF) contexts.

■  Configurations for a virtual IP address can only be /32 or /128 prefix.

■  Client to virtual IP address (load balancer) traffic always will go through proxy-spine because fabric data-path learning of a virtual IP address does not occur.

■  GARP learning of a virtual IP address must be explicitly enabled. A load balancer can send GARP when it switches over from active-to-standby (MAC changes).

■  Learning through GARP will work only in ARP Flood Mode.

Open Caveats

This section lists the open caveats. Click the bug ID to access the Bug Search tool and see additional information about the bug. If a caveat is fixed in a patch of this release, the “Fixed In” column of the tables specifies the release.

Open Caveats in the 11.3(2f) Release

Table 4 lists the open caveats in the 11.3(2f) release.

Table 4. Open Caveats in the 11.3(2f) Release

Bug ID

Description

Fixed In

CSCun35596

FEX logs are missing in the output of the show fex detail command.

CSCun96495

The events and faults for interfaces are not updated under Ports in the GUI.

CSCup05629

The output of some CLI commands display very slowly.

CSCup86130

Because ibash is implemented on top of bash, when using ibash for the CLI, the bash behavior is inherited. For example, the sh mod command works in traditional Cisco switches. But when executed on N9K switches in ibash, because bash interprets  sh differently, sh mod will not work. Similarly, if there is a clash in the next available options, the TAB key must be pressed twice to get the options rather than once as in other Cisco switches.

In short, the CLI infra for ibash is not exactly the same as the CLI infra for the traditional Cisco switches because N9K ibash is built on top of bash.

CSCur32247

FEX-related diagnostic results are missing.

CSCux25207

After upgrading TORs from the 1.1(4e) release to the 1.2(1k) release, when the maint-grp-1 set of the TORs are rebooted, there is traffic loss on the virtual machines.

CSCuy40089

Shared L3out and spine L3out in-band management do not work together.

CSCuy56975

OSPF does not come up between the external router and one of the leaf switches. This happens when L3out is deployed with SVI over port-channels/physical-ports, with STP.

Workaround: Always use VPC when an L3out is deployed with SVI with STP.

Open Caveats in the 11.3(2h) Release

There are no new open caveats in the 1.3(2h) release.

Open Caveats in the 11.3(2i) Release

There are no new open caveats in the 1.3(2i) release.

Open Caveats in the 11.3(2k) Release

There are no new open caveats in the 1.3(2k) release.

Resolved Caveats

This section lists the resolved caveats. Click the bug ID to access the Bug Search tool and see additional information about the bug.

Resolved Caveats in the 11.3(2f) Release

Table 5 lists the resolved caveats in the 11.3(2f) release.

Table 5. Resolved Caveats in the 11.3(2f) Release

Bug ID

Description

CSCuz23676

The following log message is seen within eventmgr logs or sent through the syslog from a switch:

%LOG_LOCAL7-3-SYSTEM_MSG [E4204936][transition][major][sys] Feb  4 12:00:00 %LOG_AUTH-3-SYSTEM_MSG: error: Could not load host key: /etc/ssh/ssh_host_ed25519_key

CSCuz42791

QosmEgrPkts15min managed objects do not get exported to the interfaces for southbound TORs, but the managed objects do get exported for NS-based TORs.

CSCuz47394

The interface behavior will be uncertain when configuring tagged and dot1p on same interface on different endpoint groups. Traffic that goes out of the fabric to the endpoint group that is configured as untagged will be tagged as VLAN 0 or will not be tagged at all.

CSCuz53006

Policy drops are seen in the provider VRF when using a shared service contract with a vzAny consumer.

CSCuz55258

A user can no longer SSH to the leaf nodes from the APIC (Infra-Band) or externally from another device to the OOB or In-Band management addresses.

CSCuz59143

There is a large amount of opflexIDEp movement/updates in the fabric due to a port flapping issue, which slows the GUI when using the Operational Members tab under an endpoint group.

CSCuz59377

The active SUP's STS LED is light on (amber) when the spine is booted up. This issue happens randomly. Sometimes, the LED status is ok even when the spine is booted up.

CSCuz59404

IGMP v1/v2 member ports are not getting aged if there is a v3 member port in the same bridge domain.

CSCuz88813

UDP traffic is dropped when bridged through the fabric.  This can cause UDP-based protocols to fail.  For example, PXE boot clients relying on using TFTP to connect to a server in the same bridge domain can fail.

Resolved Caveats in the 11.3(2h) Release

Table 5 lists the resolved caveats in the 11.3(2h) release.

Table 5. Resolved Caveats in the 11.3(2h) Release

Bug ID

Description

CSCuz95179

UDP packets with a destination port of 65123 and a source port between 40456 to 49151 are dropped by the fabric.  Additionally, UDP fragmented frames with first four bytes between 0xb000fe63 and 0xbffffe63 might also be dropped.

CSCva00949

isan/bin/routing-sw/arp dumps a core in the 1.3(2f) release.

Resolved Caveats in the 11.3(2i) Release

Table 5 lists the resolved caveats in the 11.3(2i) release.

Table 5. Resolved Caveats in the 11.3(2i) Release

Bug ID

Description

CSCva48518

100G transceivers are not establishing links on ports 49 to 50 in an N9K-93180YC-EX switch.

Resolved Caveats in the 11.3(2k) Release

Table 5 lists the resolved caveats in the 11.3(2k) release.

Table 5. Resolved Caveats in the 11.3(2i) Release

Bug ID

Description

CSCvc38285

Cisco ACI partial mesh fabric may have slow mcast convergence during upgrade.

Known Behaviors

This section lists caveats that describe known behaviors. Click the Bug ID to access the Bug Search Tool and see additional information about the bug.

Known Behaviors in the 11.3(2f) Release

Table 6 lists caveats that describe known behaviors in the 11.3(2f) release.

Table 6. Known Behaviors in the 11.3(2f) Release

Bug ID

Description

CSCuo37016

When configuring the output span on a FEX Hif interface, all the layer 3 switched packets going out of that FEX Hif interface are not spanned. Only layer 2 switched packets going out of that FEX Hif are spanned.

CSCuo50533

When output span is enabled on a port where the filter is VLAN, multicast traffic in the VLAN that goes out of that port is not spanned.

CSCup65586

The show interface command shows the tunnel's Rx/Tx counters as 0.

CSCup82908

The show vpc brief command displays the wire-encap VLAN Ids and the show interface .. trunk command displays the internal/hardware VLAN IDs. Both VLAN IDs are allocated and used differently, so there is no correlation between them.

CSCup92534

Continuous “threshold exceeded” messages are generated from the fabric.

CSCuq39829

Switch rescue user ("admin") can log into fabric switches even when TACACS is selected as the default login realm.

CSCuq46369

An extra 4 bytes is added to the untagged packet with Egress local and remote SPAN.

CSCuq77095

When the command show ip ospf vrf <vrf_name> is run from bash on the border leaf, the checksum field in the output always shows a zero value.

CSCuq83910

When an IP address moves from one MAC behind one ToR to another MAC behind another ToR, even though the VM sends a GARP packet, in ARP unicast mode, this GARP packet is not flooded. As a result, any other host with the original MAC to IP binding sending an L2 packet will send to the original ToR where the IP was in the beginning (based on MAC lookup), and the packet will be sent out on the old port (location). Without flooding the GARP packet in the network, all hosts will not update the MAC-to-IP binding.

CSCuq92447

When modifying the L2Unknown Unicast parameter on a Bridge Domain (BD), interfaces on externally connected devices may bounce. Additionally, the endpoint cache for the BD is flushed and all endpoints will have to be re-learned.

CSCuq93389

If an endpoint has multiple IPs, the endpoint will not be aged until all IPs go silent. If one of the IP addresses is reassigned to another server/host, the fabric detects it as an IP address move and forwarding will work as expected.

CSCur01336

The PSU does not get detected after an OIR device with power input is connected.

CSCur81822

The access-port operational status is always “trunk”.

CSCus18541

An MSTP topology change notification (TCN) on a flood domain (FD) VLAN may not flush endpoints learned as remote where the FD is not deployed.

CSCus29623

The transceiver type for some Cisco AOC (active optical) cables is displayed as ACU (active copper).

CSCus43167

Any TCAM that is full, or nearly full, will raise the usage threshold fault. Because the faults for all TCAMs on leaf switches are grouped together, the fault will appear even on those with low usage.

Workaround:  Review the leaf switch scale and reduce the TCAM usage. Contact TAC to isolate further which TCAM is full.

CSCus54135

The default route is not leaked by BGP when the scope is set to context. The scope should be set to Outside for default route leaking.

CSCus61748

If the TOR 1RU system is configured with the RED fan (the reverse airflow), the air will flow from back to front. The temperature sensor in the back will be defined as an Inlet temperature sensor, and the temperature sensor in the front will be defined as an outlet temperature sensor.

If the TOR 1RU system is configured with the BLUE fan (normal airflow), the air will flow from front to back. The temperature sensor in the front will be defined as an Inlet temperature sensor, and the temperature sensor in the back will be defined as outlet temperature sensor.

From the airflow perspective, the Inlet sensor reading should always be less than the outlet sensor reading. However, in the TOR 1RU family, the front panel temperature sensor has some inaccurate readings due to the front panel utilization and configuration, which causes the Inlet temperature sensor reading to be very close, equal, or even greater than the outlet temperature reading.

CSCut59020

If Backbone and NSSA areas are on the same leaf, and default route leak is enabled, Type-5 LSAs cannot be redistributed to the Backbone area.

CSCuu11347

Traffic from the orphan port to the vPC pair is not recorded against the tunnel stats.  Traffic from the vPC pair to the orphan port is recorded against the tunnel stats.

CSCuu11351

Traffic from the orphan port to the vPC pair is only updated on the destination node, so the traffic count shows as excess.

CSCuu66310

If a bridge domain "Multi Destination Flood" mode is configured as "Drop", the ISIS PDU from the tenant space will get dropped in the fabric.

CSCuv57302

Atomic counters on the border leaf do not increment for traffic from an endpoint group going to the Layer 3 out interface.

CSCuv57315

Atomic counters on the border leaf do not increment for traffic from the Layer 3 out interface to an internal remote endpoint group.

CSCuv57316

TEP counters from the border leaf to remote leaf nodes do not increment.

CSCuw09389

For direct server return operations, if the client is behind the Layer 3 out, the server-to-client response will not be forwarded through the fabric.

CSCux97329

With the common pervasive gateway, only the packet destination to the virtual MAC is being properly Layer 3 forwarded. The packet destination to the bridge domain custom MAC fails to be forwarded. This is causing issues with certain appliances that rely on the incoming packets’ source MAC to set the return packet destination MAC.

CSCuy00084

BCM does not have a stats option for yellow packets/bytes, and so BCM does not show in the switch or APIC GUI stats/observer.

CSCuy02543

Bidirectional Forwarding Detection (BFD) echo mode is not supported on IPv6 BFD sessions carrying link-local as the source and destination IP address. BFD echo mode also is not supported on IPv4 BFD sessions over multihop or VPC peer links.

CSCuy06749

Traffic is dropped between two isolated EPGs.

CSCuy22288

The iping command’s replies get dropped by the QOS ingress policer.

CSCuy25780

An overlapping or duplicate prefix/subnet could cause the valid prefixes not to be installed because of batching behavior on a switch. This can happen during an upgrade to the 1.2(2) release.

CSCuy47634

EPG statistics only count total bytes and packets. The breakdown of statistics into multicast/unicast/broadcast is not available on new hardware.

CSCuy61018

The default minimum bandwidth is used if the BW parameter is set to "0", and so traffic will still flow.

CSCuy96912

The debounce timer is not supported on 25G links.

CSCuz13529

With the N9K-C93180YC-EX switch, drop packets, such as MTU or storm control drops, are not accounted for in the input rate calculation.

CSCuz13614

For traffic coming out of an L3out to an internal EPG, stats for the actrlRule will not increment.

CSCuz13810

When subnet check is enabled, a ToR does not learn IP addresses locally that are outside of the bridge domain subnets. However, the packet itself is not dropped and will be forwarded to the fabric. This will result in such IP addresses getting learned as remote endpoints on other ToRs.

■  The following properties within a QoS class under  “Global QoS Class policies,” should not be changed from its default value and is only used for debugging purposes:

—      MTU (default – 9216 bytes)

—      Queue Control Method (default – Dynamic)

—      Queue Limit (default – 1522 bytes)

—      Minimum Buffers (default – 0)

■  The Cisco Nexus 9508 ACI-mode switch supports warm (stateless) standby where the state is not synched between the active and the standby supervisor modules. For an online insertion and removal (OIR) or reload of the active supervisor module, the standby supervisor module becomes active, but all modules in the switch are reset because the switchover is stateless. In the output of the show system redundancy status command, warm standby indicates stateless mode.

■  When a recommissioned APIC controller rejoins the cluster, GUI and CLI commands can time out while the cluster expands to include the recommissioned APIC controller.

■  If connectivity to the APIC cluster is lost while a switch is being decommissioned, the decommissioned switch may not complete a clean reboot. In this case, the fabric administrator should manually complete a clean reboot of the decommissioned switch.

■  Before expanding the APIC cluster with a recommissioned controller, remove any decommissioned switches from the fabric by powering down and disconnecting them. Doing so will ensure that the recommissioned APIC controller will not attempt to discover and recommission the switch.

IGMP Snooping Known Behaviors:

■  Multicast router functionality is not supported when IGMP queries are received with VxLAN encapsulation.

■  IGMP Querier election across multiple Endpoint Groups (EPGs) or Layer 2 outsides (External Bridged Network) in a given Bridge Domain (BD) is not supported. Only one EPG or Layer 2 outside for a given BD should be extended to multiple multicast routers if any.

■  The rate of the number of IGMP reports sent to a leaf switch should be limited to 1000 reports per second.

■  Unknown IP multicast packets are flooded on ingress leaf switches and border leaf switches, unless “unknown multicast flooding” is set to “Optimized Flood” in a BD. This knob can be set to “Optimized Flood” only for a maximum of 50 BDs per leaf.

If “Optimized Flood” is enabled for more than the supported number of BDs on a leaf, follow these configuration steps to recover:

—      Set “unknown multicast flooding” to “Flood” for all BDs mapped to a leaf.

—      Set “unknown multicast flooding” to “Optimized Flood” on needed BDs.

Known Behaviors in the 11.3(2h) Release

There are no new known behaviors in the 11.3(2h) release.

Known Behaviors in the 11.3(2i) Release

There are no new known behaviors in the 11.3(2i) release.

Known Behaviors in the 11.3(2k) Release

There are no new known behaviors in the 11.3(2k) release.

Related Documentation

The Cisco Application Policy Infrastructure Controller (APIC) documentation can be accessed from the following website:

https://www.cisco.com/c/en/us/support/cloud-systems-management/application-policy-infrastructure-controller-apic/tsd-products-support-series-home.html

Cisco and the Cisco logo are trademarks or registered trademarks of Cisco and/or its affiliates in the U.S. and other countries. To view a list of Cisco trademarks, go to this URL: www.cisco.com/go/trademarks. Third-party trademarks mentioned are the property of their respective owners. The use of the word partner does not imply a partnership relationship between Cisco and any other company. (1110R)

Any Internet Protocol (IP) addresses and phone numbers used in this document are not intended to be actual addresses and phone numbers. Any examples, command display output, network topology diagrams, and other figures included in the document are shown for illustrative purposes only. Any use of actual IP addresses or phone numbers in illustrative content is unintentional and coincidental.

© 2016-2018 Cisco Systems, Inc. All rights reserved.