Table of Contents

n1khyperv_verified_scalability.fm

Cisco Nexus 1000V for Microsoft Hyper-V Verified Scalability Guide, Release 5.2(1)SM3(2.1)

Release Date: December 21, 2018

This document describes verified configuration limits for Cisco Nexus 1000V for Microsoft Hyper-V.

Contents

This document includes the following sections:

- Introduction

- Configuration Limits for Nexus 1000V for Microsoft Hyper-V

Introduction

Cisco Nexus 1000V for Microsoft Hyper-V extends the Nexus 1000V virtual networking capabilities to the Windows Server 2016 virtualization platform from Microsoft. The management component of the Microsoft virtualization solution is known as SCVMM (System Center Virtual Machine Manager).

Configuration Limits for Nexus 1000V for Microsoft Hyper-V

Table 1 Configuration Limits for Nexus 1000V for Microsoft Hyper-V

Component

Supported Limits for Cisco Nexus 1000V for Microsoft Hyper-V

Per Logical Switch

Per VEM

Maximum Modules

66

Virtual Ethernet Module (VEM)

64

Virtual Supervisor Module (VSM)

2 VSMs in an HA Pair

SCVMM Server Datacenters per VSM

1

Hosts

64

MACs per VEM

32000

MACs per VLAN per VEM

4000

Max Fabric Network

2000

Active VLANs across Nexus 1000V logical switch

2000

Max network segment pool

2000

Max network segment

2000

Max system network segment

32

vEthernet interfaces per port profile

1024

Port profiles

2048

System port profiles

32

Max IP pool template

2000

PVLAN

512

vEthernet interfaces

2048

216

Port channel

256

8

Physical NICs

512

32

ACL

128

ACEs per ACL

128

ACL interfaces

2048

216

NetFlow policies

32

8

NetFlow interfaces

2048

216

NetFlow monitors

64

Port security interfaces

2048

216

MultiCast groups

512

512

SPAN/ERSPAN sessions

64

4

QoS policy map

128

128

QoS class map

1024

1024

QoS interfaces

2048

216

QoS match criteria per class-map

32

QoS class-maps per policy map

64