Chapter 1. Cisco Nexus 1000V and VMware Compatibility Information, Release 5.2(1)SV3(1.4)

Information About Upgrading and Software Compatibility

Information About Server Compatibility

Cisco Nexus 1000V Software Release Compatibility

Host Software Version Compatibility

VMware Version Compatibility

Documentation Feedback

Reference

Obtaining Documentation and Submitting a Service Request

Chapter 1. Cisco Nexus 1000V and VMware Compatibility Information, Release 5.2(1)SV3(1.4)

This document provides compatibility information for the Cisco Nexus 1000V and VMware software.

- Information About Upgrading and Software Compatibility

- Information About Server Compatibility

- Cisco Nexus 1000V Software Release Compatibility

- Host Software Version Compatibility

- VMware Version Compatibility

- Documentation Feedback

- Reference

- Obtaining Documentation and Submitting a Service Request

Information About Upgrading and Software Compatibility

Important Customer Update

In order to improve customer support for the Cisco Nexus 1000V, Cisco now only updates the support matrix for major and minor releases from VMware. All VMware patch and update releases are automatically supported at the time of their release. VMware guarantees compatibility with all patches and updates, and customers are not required to check the matrix for VMware patch or update support.

Interactive Upgrade Utility Tool

An easy-to-use Cisco Nexus 1000V and VMware ESX/ESXi Upgrade Utility provides you with steps to follow for your specific upgrade. It is available at this URL: Click Here .

Note

See also Understanding Cisco Nexus 1000V and VMware Software Version Compatibility.

If you are not using VMware Update Manager (VUM), to ensure compatibility with the existing Virtual Supervisor Module (VSM) software version, you can install the compatible Virtual Ethernet Module (VEM) software version by using the following command:

esxcli software vib install -d [path to VEM offline bundle]

Example:

esxcli software vib install -d "/../VEM500-201504173101-BG-release.zip (offline)"

Note

The esxupdate command is only available on ESX, not ESXi. The vihostupdate command is available on both ESX and ESXi.

Starting with ESX/ESXi 4.1 GA, and ESXi 5.0, binary compatibility was introduced. With the introduction of binary compatibility, it is no longer necessary to add the Cisco VIB when upgrading from one patch level to another.

With binary compatibility, if you are patching from ESXi500-201207001 to ESXi500-201501001, you run the following command:

esxcli software vib update -d ESXi500-201209001.zip (offline)

Note

For more information about installing or upgrading VEM software, see the appropriate Cisco Nexus 1000V Installation and Upgrade Guide.

Information About Server Compatibility

The servers running the Cisco Nexus 1000V VSM and VEM must be in the VMware Hardware Compatibility List (HCL). The Cisco Nexus 1000V is compatible with any upstream physical access layer switch that is Ethernet-standard compliant, including Catalyst 6500 series switches, Cisco Nexus switches, and switches from other network vendors..

Cisco Nexus 1000V Software Release Compatibility

Note

- Do not install VMware vSphere 5.5 Patch 2702864 with Cisco Nexus 1000V. The VMware vSphere 5.5 Patch 2702864 is not supported on Cisco Nexus 1000V.

- Cisco Nexus 1000V Release 5.2(1)SV3(1.2) and later does not support VMware ESX/ESXi 4.1, 4.0, or any earlier ESX/ESXi releases.

The following table shows the software compatibility for Cisco Nexus 1000V Release 5.2(1)SV3(1.4) and VMware releases.

VMware and Cisco Nexus 1000V Software Compatibility for Release 5.2(1)SV3(1.4)

VMware Software Release Supported

Cisco Nexus 1000V Release[1]

5.2(1)SV3(1.2)

5.2(1)SV3(1.3)

5.2(1)SV3(1.4)

ESXi 6.0 and later

Not supported

Not supported

Compatible

ESXi 5.5 and later [2]
Note:
Upgrade the ESX host to ESXi 5.5 update 1 and later before upgrading to Cisco Nexus 1000V 5.2(1)SV3(1.4)

Compatible

Compatible

Compatible

ESXi 5.1 and later
Note:
Upgrade the ESX host to ESXi 5.1 update 2 and later before upgrading to Cisco Nexus 1000V 5.2(1)SV3(1.4)

Compatible

Compatible

Compatible

ESXi 5.0 and later
Note:
Upgrade the ESX host to ESXi 5.0 update 3 and later before upgrading to Cisco Nexus 1000V 5.2(1)SV3(1.4)

Compatible

Compatible

Compatible

[1] The Cisco Nexus 1000V VIB is available in the VSM home page: http://<vsm_ip>.

[2] Do not install the VMware vSphere 5.5 Patch 2702864. The VMware vSphere 5.5 Patch 2702864 is not supported on Cisco Nexus 1000V.

Important Customer Update

In order to improve customer support for the Cisco Nexus 1000V, Cisco now only updates the support matrix for major and minor releases from VMware. All VMware patch and update releases are automatically supported at the time of their release. VMware guarantees compatibility with all patches and updates, and customers are not required to check the matrix for VMware patch or update support.

Host Software Version Compatibility

The following table lists the compatible host software versions for VMware ESXi 6.0, ESXi 5.5, ESXi 5.1, ESXi 5.0 and the Cisco Nexus 1000V VEM for Release 5.2(1)SV3(1.4).

Note

- Do not install VMware vSphere 5.5 Patch 2702864 with Cisco Nexus 1000V. The VMware vSphere 5.5 Patch 2702864 is not supported on Cisco Nexus 1000V.

- If you are upgrading VEMs using a Cisco Nexus 1000V software bundle, see Information About Upgrading and Software Compatibility.

Host Software Version Compatibility for ESXi 6.0, 5.5, 5.1, and 5.0

VIB Version

(VIB files are available at Click Here .)

VEM Bundle

(VMware bundled software updates require placing the host in maintenance mode.)

Minimum Supported Version

Windows VC Installer

Linux vCenter Server Appliance

vSphere CLI

Power Shell CLI

VMware software version: ESXi 6.0 (includes patches and updates)

cross_cisco-vem- v173-5.2.1.3.1.4.0-6.0.1.vib

VEM600-201504173119-BG- release.zip (Offline)

VEM600-201504173119-BG (Online)

6.0

6.0

6.0

6.0

VMware software version: ESXi 5.5 (includes patches and updates)[1]

cross_cisco-vem- v173-5.2.1.3.1.4.0-3.2.1.vib

VEM550-201504173113-BG- release.zip (Offline)

VEM550-201504173113-BG (Online)

5.5

5.5

5.5

5.5

VMware software version: ESXi 5.1 (includes patches and updates)

cross_cisco-vem- v173-5.2.1.3.1.4.0-3.1.1.vib

VEM510-201504173107-BG- release.zip (Offline)

VEM510-201504173107-BG(Online)

5.1

5.1

5.1

5.1

VMware software version: ESXi 5.0 (includes patches and updates)

cross_cisco-vem- v173-5.2.1.3.1.4.0-3.0.1.vib

VEM500-201504173101-BG- release.zip (Offline)

VEM500-201504173101-BG (Online)

5.0

5.0

5.0

5.0

[1] Do not install the VMware vSphere 5.5 Patch 2702864. The VMware vSphere 5.5 Patch 2702864 is not supported on Cisco Nexus 1000V.

VMware Version Compatibility

The following table lists the vShield Manager /VCNS version compatibility for the Cisco Nexus 1000V.

vShield Manager/VCNS Version Compatibility for Cisco Nexus 1000V

VMware Software Version

Cisco Nexus 1000V Release 5.2(1)SV3(1.4)

VCNS 5.5

Compatible

VCNS 5.1

Compatible

Note:
VCNS 5.1.3 upgrade is not supported. However, VCNS 5.1.3 fresh install using an ova package is supported. See the KB article—KB 2073502

vShield Manager 5.0.2

Compatible

The following table lists the vCloud Director version compatibility for the Cisco Nexus 1000V.

vCloud Director Version Compatibility for Cisco Nexus 1000V

VMware Software Version

Cisco Nexus 1000V Release 5.2(1)SV3(1.4)

vCD 5.5

Compatible

vCD 5.1

Compatible

vCD 1.5.2

Compatible

Note

Cisco Nexus 1000V Release 5.2(1)SV3(1.4) does not support any earlier version of the VMware components listed in the preceding table.

Note

For vCloud Director and VCNS compatibility, see the VMware Product Interoperability Matrixes.

The following table lists the supported network pool in vCD with the Cisco Nexus 1000V.

Network Pool in vCD

Description

Cisco Nexus 1000V Version

5.2(1)SV3(1.4)

5.2(1)SV3(1.3)

5.2(1)SV3(1.2)

5.2(1)SV3(1.1)

VMware software version: vCD 1.5.1 and vShield Manager 5.0.1

Port Group Backed

Export group is a network

Compatible

Compatible

Compatible

Compatible

VLAN Backed

Can specify a range of VLANs in a vCD

Compatible

Compatible

Compatible

Compatible

Network Isolation Backed

Cisco Nexus 1000V uses VXLAN for isolation-backed networks

Compatible

Compatible

Compatible

Compatible

VMware software version: vCD 5.1 and vShield Manager 5.1

Port Group Backed

Export group is a network

Compatible

Compatible

Compatible

Compatible

VLAN Backed

Can specify a range of VLANs in a vCD

Compatible

Compatible

Compatible

Compatible

Network Isolation Backed

Cisco Nexus 1000V uses VCNI for isolation-backed networks

Not supported

Not supported

Not supported

Not supported

VXLAN

Cisco Nexus 1000V uses VXLAN for isolation-backed networks

Compatible

Compatible

Compatible

Compatible

VMware software version: vCD 5.5 and vShield Manager 5.5

Port Group Backed

Export group is a network

Compatible

Compatible

Compatible

Compatible

VLAN Backed

Can specify a range of VLANs in a vCD

Compatible

Compatible

Compatible

Compatible

Network Isolation Backed

Cisco Nexus 1000V uses VCNI for isolation-backed networks

Not supported

Not supported

Not supported

Not supported

VXLAN

Cisco Nexus 1000V uses VXLAN for isolation-backed networks

Compatible

Compatible

Compatible

Compatible

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, please send your comments to: nexus1k-docfeedback@cisco.com.

We appreciate your feedback.

Reference

This section lists the documents used with the Cisco Nexus 1000V and available on Cisco.com at the following URL:

Click Here

General Information

Cisco Nexus 1000V Documentation Roadmap

Cisco Nexus 1000V Release Notes

Cisco Nexus 1000V and VMware Compatibility Information

Install and Upgrade

Cisco Nexus 1000V Installation and Upgrade Guide

Configuration Guides

Cisco Nexus 1000V High Availability and Redundancy Configuration Guide

Cisco Nexus 1000V Interface Configuration Guide

Cisco Nexus 1000V Layer 2 Switching Configuration Guide

Cisco Nexus 1000V License Configuration Guide

Cisco Nexus 1000V Network Segmentation Manager Configuration Guide

Cisco Nexus 1000V Port Profile Configuration Guide

Cisco Nexus 1000V Quality of Service Configuration Guide

Cisco Nexus 1000V REST API Plug-In Configuration Guide

Cisco Nexus 1000V Security Configuration Guide

Cisco Nexus 1000V System Management Configuration Guide

Cisco Nexus 1000V VXLAN Configuration Guide

Cisco Nexus 1000V VDP Configuration Guide

Cisco Nexus 1000V DFA Configuration Guide

Programming Guide

Cisco Nexus 1000V XML API Configuration Guide

Reference Guides

Cisco Nexus 1000V Command Reference

Cisco Nexus 1000V Resource Availability Reference

Troubleshooting and Alerts

Cisco Nexus 1000V Troubleshooting Guide

Cisco Nexus 1000V Password Recovery Procedure

Cisco NX-OS System Messages Reference

Cloud Services Platform Documentation

The Cisco Cloud Services Platform documentation is available at Click Here .

Virtual Security Gateway Documentation

The Cisco Virtual Security Gateway for Nexus 1000V Series Switch documentation is available at Click Here .

Virtual Wide Area Application Services (vWAAS) Documentation

The Virtual Wide Area Application Services documentation is available at Click Here .

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, using the Cisco Bug Search Tool (BST), submitting a service request, and gathering additional information, see What's New in Cisco Product Documentation, at: Click Here .

Subscribe to What's New in Cisco Product Documentation, which lists all new and revised Cisco technical documentation as an RSS feed and delivers content directly to your desktop using a reader application. The RSS feeds are a free service.