Table of Contents

Messages and Recovery Procedures

AAA Messages

AAA-1

AAA-3

AAA-6

ACLLOG Messages

ACLLOG-4

ACLLOG-6

ACLMGR Messages

ACLMGR-2

ACLMGR-3

ACLQOS Messages

ACLQOS-SLOT#-4

ACLTCAM Messages

ACLTCAM-6

ACL Messages

ACL-6

ASCII-CFG Messages

ASCII-CFG-2

ASCII-CFG-3

ASCII-CFG-6

ASSOC_MGR Messages

ASSOC_MGR-0

ASSOC_MGR-1

ASSOC_MGR-2

ASSOC_MGR-3

ASSOC_MGR-4

ASSOC_MGR-5

ASSOC_MGR-6

ASSOC_MGR-7

BFD Messages

BFD-5

BLOGGERD Messages

BLOGGERD-2

BLOGGERD-3

BLOGGERD-4

BLOGGERD-6

CALLHOME Messages

CALLHOME-3

CALLHOME-6

CARDCLIENT Messages

CARDCLIENT-2

CARDCLIENT-3

CARDCLIENT-SLOT#-2

CDP Messages

CDP-2

CDP-3

CDP-5

CDP-6

CERT_ENROLL Messages

CERT_ENROLL-3

CERT_ENROLL-6

CFS Messages

CFS-2

CFS-3

CFS-4

CFS-6

CLK_MGR Messages

CLK_MGR-2

CLK_MGR-5

CLK_MGR-6

CLOUD Messages

CLOUD-3

CLOUD-6

CMOND Messages

CMOND-2

COPP Messages

COPP-5

CRDCFG Messages

CRDCFG-2

CRDCFG-3

CRDCFG-SLOT#-2

DCEFIB Messages

DCEFIB-SLOT#-2

DCEFIB-SLOT#-6

DEVICE-ALIAS Messages

DEVICE-ALIAS-2

DEVICE-ALIAS-3

DEVICE-ALIAS-6

DEV_LOG_SUP Messages

DEV_LOG_SUP-3

DEV_LOG Messages

DEV_LOG-3

DEV_LOG-SLOT#-4

DHCLIENT Messages

DHCLIENT-2

DHCLIENT-4

DHCLIENT-5

DHCLIENT-6

DHCLIENT-7

DHCP_SNOOP Messages

DHCP_SNOOP-2

DHCP_SNOOP-3

DHCP_SNOOP-5

DHCP_SNOOP-6

DIAG_PORT_LB Messages

DIAG_PORT_LB-5

DOT1X Messages

DOT1X-5

DPVM Messages

DPVM-2

DPVM-3

DPVM-4

DPVM-6

DSTATS Messages

DSTATS-3

ECHAT Messages

ECHAT-2

EOU Messages

EOU-5

EPP Messages

EPP-5

ETH-PORT-SEC Messages

ETH-PORT-SEC-2

ETH-PORT-SEC-3

ETH-PORT-SEC-5

ETH_PORT_CHANNEL Messages

ETH_PORT_CHANNEL-3

ETH_PORT_CHANNEL-4

ETH_PORT_CHANNEL-5

EVMED Messages

EVMED-5

EXAMPLE_TEST Messages

EXAMPLE_TEST-5

EX_SYSLOG Messages

EX_SYSLOG-0

EX_SYSLOG-1

EX_SYSLOG-2

EX_SYSLOG-3

EX_SYSLOG-4

EX_SYSLOG-5

EX_SYSLOG-6

EX_SYSLOG-7

FABRICPATH Messages

FABRICPATH-2

FC-TUNNEL Messages

FC-TUNNEL-3

FCFWD Messages

FCFWD-3

FCFWD-4

FCFWD-6

FCFWD-SLOT#-2

FCNS Messages

FCNS-2

FCNS-3

FCNS-4

FCNS-6

FCOE_MGR Messages

FCOE_MGR-2

FCOE_MGR-5

FCS Messages

FCS-2

FCS-3

FCS-5

FCS-6

FEATURE-MGR Messages

FEATURE-MGR-2

FEX Messages

FEX-2

FEX-4

FEX-5

FIB Messages

FIB-SLOT#-0

FIB-SLOT#-1

FIB-SLOT#-2

FIB-SLOT#-3

FIB-SLOT#-4

FIB-SLOT#-6

FIPS Messages

FIPS-0

FIPS-6

FS-DAEMON Messages

FS-DAEMON-6

GLBP Messages

GLBP-2

GLBP-3

HSRP_ENGINE Messages

HSRP_ENGINE-3

IKE Messages

IKE-3

ILC-SPAN Messages

ILC-SPAN-3

IMP Messages

IMP-5

IOA_LC Messages

IOA_LC-5

IPSEC Messages

IPSEC-5

IPS Messages

IPS-3

IPS-5

LACP Messages

LACP-3

LACP-5

LC-SPAN Messages

LC-SPAN-3

LDAP Messages

LDAP-3

LDAP-5

LDAP-6

LDP Messages

LDP-5

LICMGR Messages

LICMGR-3

LICMGR-6

LLDP Messages

LLDP-5

MCAST Messages

MCAST-2

MCAST-4

MCAST-5

MCECTEST Messages

MCECTEST-3

MCECTEST-5

MCECTEST-6

MCM Messages

MCM-2

MCM-5

MONITORC Messages

MONITORC-SLOT#-3

MPLS_OAM Messages

MPLS_OAM-5

MPLS_STATIC Messages

MPLS_STATIC-5

NAT Messages

NAT-2

NAT-5

NEUTRON_USD Messages

NEUTRON_USD-0

NEUTRON_USD-2

NEUTRON_USD-3

NEUTRON_USD-6

NFP Messages

NFP-SLOT#-2

NFP-SLOT#-5

NGOAM Messages

NGOAM-4

NPV Messages

NPV-3

NPV-5

NPV-6

NPV-7

NSUSD Messages

NSUSD-6

NTP Messages

NTP-2

NTP-3

NTP-6

OBFL Messages

OBFL-3

ONEP Messages

ONEP-6

OTM Messages

OTM-2

OTM-3

OTM-5

OTM-6

PATCH-INSTALLER Messages

PATCH-INSTALLER-3

PIXM Messages

PIXM-2

PIXM-3

PIXM-4

PIXM-7

PLATFORM Messages

PLATFORM-0

PLATFORM-1

PLATFORM-2

PLATFORM-3

PLATFORM-4

PLATFORM-5

PLATFORM-6

PLATFORM-7

PLOG_SUP Messages

PLOG_SUP-4

PLOG Messages

PLOG-4

POAP Messages

POAP-2

POAP-5

PONG Messages

PONG-5

PORT-CHANNEL Messages

PORT-CHANNEL-3

PORT-CHANNEL-4

PORT-CHANNEL-5

PORT-SECURITY Messages

PORT-SECURITY-2

PORT-SECURITY-3

PORT-SECURITY-4

PORT-SECURITY-6

PORT Messages

PORT-3

PORT-4

PRIVATE_VLAN Messages

PRIVATE_VLAN-2

PRIVATE_VLAN-3

PRIVATE_VLAN-5

PROFILER Messages

PROFILER-0

PROFILER-1

PROFILER-2

PROFILER-3

PROFILER-4

PROFILER-5

PROFILER-6

PROFILER-7

PSS Messages

PSS-2

PSS-4

PSS-5

PTPLC Messages

PTPLC-3

PTP Messages

PTP-2

PTP-5

PTP-6

PULSE Messages

PULSE-0

PULSE-1

PULSE-2

PULSE-3

PULSE-4

PULSE-5

PULSE-6

PULSE-7

QOS Messages

QOS-2

QOS-3

QOS-4

QOS-6

QUACK_SMC Messages

QUACK_SMC-6

RADIUS Messages

RADIUS-3

RADIUS-4

RADIUS-5

RADIUS-6

RES_MGR Messages

RES_MGR-2

RES_MGR-5

RIB Messages

RIB-0

RIB-1

RIB-2

RIB-3

RIB-4

RIB-5

RIB-6

SAL Messages

SAL-5

SCHEDULER Messages

SCHEDULER-3

SCHEDULER-4

SCHEDULER-6

SECURITYD Messages

SECURITYD-2

SECURITYD-3

SECURITYD-6

SENSOR Messages

SENSOR-0

SENSOR-3

SFLOW Messages

SFLOW-5

SKSD Messages

SKSD-2

SKSD-3

SKSD-4

SKSD-5

SKSD-6

SME_CPP Messages

SME_CPP-3

SME_CPP-5

SNMPD Messages

SNMPD-1

SNMPD-2

SNMPD-3

SNMPD-4

SNMPD-5

SNMPD-6

SNMPD-7

STATSCLIENT Messages

STATSCLIENT-2

STATSCLIENT-3

STATSCLIENT-6

STATSINFRA Messages

STATSINFRA-3

STP Messages

STP-2

TACACS Messages

TACACS-3

TACACS-4

TACACS-5

TACACS-6

TAHUSD Messages

TAHUSD-2

TAHUSD-3

TAHUSD-6

TBIRD_CMN_USD Messages

TBIRD_CMN_USD-6

TELEMETRY Messages

TELEMETRY-1

TELEMETRY-2

TELEMETRY-3

TELEMETRY-4

TELEMETRY-5

TELEMETRY-6

TELEMETRY-7

TUNNEL Messages

TUNNEL-2

TUNNEL-3

TUNNEL-5

TUNNEL-7

U2RIB Messages

U2RIB-5

UDLD Messages

UDLD-5

UFDM Messages

UFDM-5

USDBA Messages

USDBA-6

VLAN_MGR Messages

VLAN_MGR-2

VLAN_MGR-3

VLAN_MGR-4

VLAN_MGR-5

VLAN_MGR-6

VMTRACKER Messages

VMTRACKER-2

VMTRACKER-3

VMTRACKER-4

VMTRACKER-5

VNSEGMENT_MGR Messages

VNSEGMENT_MGR-2

VNTAGC Messages

VNTAGC-5

VNTAG_MGR Messages

VNTAG_MGR-2

VNTAG_MGR-5

VPC Messages

VPC-2

VPC-3

VPC-4

VPC-5

VPC-6

VSAN Messages

VSAN-6

VTP Messages

VTP-0

VTP-1

VTP-2

VTP-3

VTP-4

VTP-5

VTP-6

VTP-7

WWN Messages

WWN-2

WWN-3

WWN-5

WWN-6

XMLSA Messages

XMLSA-2

XMLSA-5

ZONE Messages

ZONE-2

ZONE-3

ZONE-4

ZONE-6

Messages and Recovery Procedures

This chapter lists the system messages by facility. Within each facility, the messages are listed by severity levels 0 to 7: 0 is the highest severity level, and 7 is the lowest severity level. Each message is followed by an explanation and a recommended action.

AAA Messages

This section contains the AAA messages.

AAA-1

Error Message  AAA-1-AAA_SESSION_LIMIT_REJECT: aaa request rejected as maximum aaa sessions are in progress

Explanation  Aaa request rejected as the limit for maximum concurrent aaa sessions is reached

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-3

Error Message  AAA-3-AAA_NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-6

Error Message  AAA-6-AAA_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

ACLLOG Messages

This section contains the ACLLOG messages.

ACLLOG-4

Error Message  ACLLOG-4-ACLLOG_MAXFLOW_REACHED: [chars]

Explanation  Max flow reached in current interval: [chars]

Recommended Action  No action is required.

Error Message  ACLLOG-4-ACLLOG_THRESHOLD: [chars]

Explanation  Threshold Reached for Flow: [chars]

Recommended Action  No action is required.

ACLLOG-6

Error Message  ACLLOG-6-ACLLOG_FLOW_INTERVAL: [chars]

Explanation  Flow info in current alert interval: [chars]

Recommended Action  No action is required.

Error Message  ACLLOG-6-ACLLOG_NEW_FLOW: [chars]

Explanation  New Acllog Flow: [chars]

Recommended Action  No action is required.

ACLMGR Messages

This section contains the ACLMGR messages.

ACLMGR-2

Error Message  ACLMGR-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The ACLMGR service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

ACLMGR-3

Error Message  ACLMGR-3-MTSERROR: [chars]

Explanation  ACLMGR Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

ACLQOS Messages

This section contains the ACLQOS messages.

ACLQOS-SLOT#-4

Error Message  ACLQOS-SLOT#-4-ACLQOS_ATOMIC_ERR: [chars]

Explanation  Tcam will be overused, please turn off atomic update

Recommended Action  No DDTS.

ACLTCAM Messages

This section contains the ACLTCAM messages.

ACLTCAM-6

Error Message  ACLTCAM-6-ACL_TCAM_STATUS: Status: [chars].

Explanation  ACLTCAM status is reported as: [chars].

Recommended Action  No action is required.

ACL Messages

This section contains the ACL messages.

ACL-6

Error Message  ACL-6-ACL_DIAG_EVENT_STATUS: [chars] [hex].

Explanation  ACL system health management event status is reported as [chars] [hex].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_DEST_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN destination config event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_SRC_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN source config event status is reported as [chars] [chars].

Recommended Action  No action is required.

ASCII-CFG Messages

This section contains the ASCII-CFG messages.

ASCII-CFG-2

Error Message  ASCII-CFG-2-CONFIG_REPLAY_STATUS: [chars] Replay [chars].

Explanation  Bootstrap or Ascii Configuration Replay Status info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CONF_CONTROL: [chars]

Explanation  Configuration restore control info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-SYSERR_ACFG_NO_STARTUP_CFG_FILE: [chars]

Explanation  Startup configuration file is empty

Recommended Action  No action is required.

ASCII-CFG-3

Error Message  ASCII-CFG-3-ACFG_MTSERROR: [chars]

Explanation  Ascii-cfg-server (rollback process) encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

ASCII-CFG-6

Error Message  ASCII-CFG-6-INFORMATION: [chars]

Explanation  An event happend that affects Acfg-Rollback. [chars] indicates the event

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-PSS_ERR: [chars]

Explanation  An error occurred during an Acfg PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ASSOC_MGR Messages

This section contains the ASSOC_MGR messages.

ASSOC_MGR-0

Error Message  ASSOC_MGR-0-EMERGENCY_MSG: [chars]

Explanation  Association Manager Emergency Message

Recommended Action  Please file the bug for Association Manager Component thro' CDETS

ASSOC_MGR-1

Error Message  ASSOC_MGR-1-ALERT_MSG: [chars]

Explanation  Association Manager Alert Message

Recommended Action  Association Manager Internal Operation Alert

ASSOC_MGR-2

Error Message  ASSOC_MGR-2-CRITICAL_MSG: [chars]

Explanation  Association Manager Critical Message

Recommended Action  No action is required.

ASSOC_MGR-3

Error Message  ASSOC_MGR-3-ERROR_MSG: [chars]

Explanation  Association Manager Error Message

Recommended Action  No action is required.

ASSOC_MGR-4

Error Message  ASSOC_MGR-4-WARN_MSG: [chars]

Explanation  Association Manager Warning Message

Recommended Action  No action is required.

ASSOC_MGR-5

Error Message  ASSOC_MGR-5-NOTIF_MSG: [chars]

Explanation  Association Manager Notification Message

Recommended Action  No action is required.

ASSOC_MGR-6

Error Message  ASSOC_MGR-6-ASSOC_ACTIVATED: Association Activated for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Activated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_CREATED: Association Created for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Created

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DEACTIVATED: Association Deactivated for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deactivated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DELETED: Association Deleted for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deleted

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATEFULL_RESTART: Association Manager Statefull Restart

Explanation  Association Manager Stateful Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATELESS_RESTART: Association Manager Stateless Restart

Explanation  Association Manager Stateless Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_OPER_STATUS_CHG: Association status for vlan id: [dec] <--> vsan id: [dec] changed from [chars] to [chars]

Explanation  Association Operational State Change

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-INFO_MSG: [chars]

Explanation  ASSOC Manager Informational Message

Recommended Action  No action is required.

ASSOC_MGR-7

Error Message  ASSOC_MGR-7-DEBUG_MSG: [chars]

Explanation  Association Manager Debug Message

Recommended Action  No action is required.

BFD Messages

This section contains the BFD messages.

BFD-5

Error Message  BFD-5-BFD_DISABLED: BFD Disabled

Explanation  BFD Service Disabled

Recommended Action  No action is required.

Error Message  BFD-5-BFD_ENABLED: BFD Enabled

Explanation  BFD Service enabled

Recommended Action  No action is required.

BLOGGERD Messages

This section contains the BLOGGERD messages.

BLOGGERD-2

Error Message  BLOGGERD-2-BLOGGERD_SYSLOG_TRANSFER_ERROR_DISABLED: [chars]

Explanation  Blogger Log Transfer has been error disabled

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BLOGGERD-3

Error Message  BLOGGERD-3-BLOGGERD_INVALID_VDC: At [chars]([dec]) Invalid VDC [dec]

Explanation  Invalid VDC ID

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_LOG_DUMP_THROTTLED: VDC [dec] Comp: [chars] Buf_uuid: [dec] Buf_inst: [dec] sap: [chars]. Please collect 'show system internal sdwrap buffers sap [dec] detailed' from module [dec] Wiki: https://and-sw-web.cisco.com/twiki/bin/view/Sw/LogDumpThrottle

Explanation  Log Dump Throttled

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_MOVE_LOGS_SCRIPT_NOT_FOUND: At [chars]([dec]) Move Logs Script Not Found at [chars]

Explanation  Move Log Script Not Found

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_PATH_NOT_FOUND: At [chars]([dec]) Path [chars] NOT found

Explanation  Required Path Not Found

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_CONFIG_PULL_FAILED: At [chars]([dec]) Config Pull Failed. Returned [hex]([chars])

Explanation  Blogger Config Pull Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_MTS_BIND_FAILED: MTS Bind Failed

Explanation  MTS Bind Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_MTS_UNDROP: MTS is not dropped by Node [hex] SAP [dec]

Explanation  MTS not dropped

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_PSS_FAILURE: At [chars]([dec]) Internal PSS Error. Returned: [hex]([chars])

Explanation  PSS Operation Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_SDWRAP_INIT_FAILED: At [chars]([dec]) sdwrap initialization failed. Returned: [hex]([chars])

Explanation  SDWrap Debug Init failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_THREAD_CREATE_FAILED: At [chars]([dec]) Thread Creation Failed [hex] errno: [dec]([chars])

Explanation  Thread Creation Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BLOGGERD-4

Error Message  BLOGGERD-4-BLOGGERD_FLOW_CONTROL_ENABLED: Temporarily suspending BloggerD Log Transfer from Modules due to lack of space (available: %ld MB) on Active SUP

Explanation  Flow Control Enabled. Transfer from Modules temporarily suspended

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-4-BLOGGERD_FLOW_CONTROL_RESET: Revoking temporary Log Transfer Suspension from Modules. Space available now: %ld MB

Explanation  Flow Control Reset. Transfer from Modules re-enabled

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BLOGGERD-6

Error Message  BLOGGERD-6-BLOGGERD_INFO: [chars]

Explanation  Info

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

CALLHOME Messages

This section contains the CALLHOME messages.

CALLHOME-3

Error Message  CALLHOME-3-CALLHOME_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_MAX_ALERT_MSG: [chars]

Explanation  [chars]

Recommended Action  Please check the reason for the generation of the callhome messages and rectify the problem

CALLHOME-6

Error Message  CALLHOME-6-NONCRIT_EVENT: [chars]

Explanation  Non-critical Callhome event [chars] occurred.

Recommended Action  If you have configured your email address to receive callhome notifications, please check your email for more details about this callhome event. If callhome was not enabled, please execute CLI commands relevant to the callhome event to get more information about the error

CARDCLIENT Messages

This section contains the CARDCLIENT messages.

CARDCLIENT-2

Error Message  CARDCLIENT-2-CARDCL_CRIT: [chars]

Explanation  CardClient Critical Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-2-FPGA_BOOT_GOLDEN: [chars] booted from Golden

Explanation  CardClient fpga boot status

Recommended Action  No action is required.

Error Message  CARDCLIENT-2-FPGA_BOOT_PRIMARY: [chars] booted from Primary

Explanation  CardClient fpga boot status

Recommended Action  No action is required.

Error Message  CARDCLIENT-2-FPGA_BOOT_STATUS: Unable to retrieve [chars] boot status

Explanation  CardClient fpga boot status

Recommended Action  No action is required.

Error Message  CARDCLIENT-2-ONL: [chars]

Explanation  Online Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-2-REG: [chars]

Explanation  CardClient Console Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-2-SSE: [chars]

Explanation  CardClient Console Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CARDCLIENT-3

Error Message  CARDCLIENT-3-CARDCL_ERR: [chars]

Explanation  CardClient Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-3-CARDCL_INFO: [chars]

Explanation  CardClient Flow Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CARDCLIENT-SLOT#-2

Error Message  CARDCLIENT-SLOT#-2-ERR: [chars]

Explanation  CardClient Remote Syslog msg

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-SLOT#-2-IMG_ERR: [chars]

Explanation  CardClient Remote Syslog msg

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CDP Messages

This section contains the CDP messages.

CDP-2

Error Message  CDP-2-INITFAIL: CDP Daemon Initialization failed: [chars]

Explanation  CDP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

CDP-3

Error Message  CDP-3-GENERROR: [chars]

Explanation  CDP Daemon encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CDP-3-MTSERROR: [chars]

Explanation  CDP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  CDP-3-PSSERROR: [chars]

Explanation  CDP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

CDP-5

Error Message  CDP-5-DISABLED: CDP is disabled

Explanation  CDP is disabled on the device.

Recommended Action  No action is required.

Error Message  CDP-5-ENABLED: CDP is enabled

Explanation  CDP is enabled on the device.

Recommended Action  No action is required.

CDP-6

Error Message  CDP-6-CDPDUP: CDP Daemon Up.

Explanation  CDP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDISABLE: CDP disabled on port [chars]

Explanation  CDP was disabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDOWN: A CDP enabled port [chars] went down.

Explanation  A CDP enabled port became un-operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTENABLE: CDP enabled on port [chars]

Explanation  CDP was enabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTUP: A CDP enabled port [chars] came up.

Explanation  A CDP enabled port became operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

CERT_ENROLL Messages

This section contains the CERT_ENROLL messages.

CERT_ENROLL-3

Error Message  CERT_ENROLL-3-CERT_EN_ERROR_MESSAGE: [chars]

Explanation  CERT_ENROLL Error Message

Recommended Action  No action is required.

Error Message  CERT_ENROLL-3-CERT_EN_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

CERT_ENROLL-6

Error Message  CERT_ENROLL-6-CERT_EN_MESSAGE: [chars]

Explanation  CERT_ENROLL Message

Recommended Action  No action is required.

CFS Messages

This section contains the CFS messages.

CFS-2

Error Message  CFS-2-GENERAL_ERROR: [chars]

Explanation  The CFS service has encountered an critical error. The description of error is [str.]

Recommended Action  No action is required.

Error Message  CFS-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The CFS service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

CFS-3

Error Message  CFS-3-DBERROR: [chars]

Explanation  CFS Service encountered a database error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-FAILURE_RESPONSE: [chars] [hex]

Explanation  CFS Service failed to get response [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-GENERROR: [chars]

Explanation  CFS Service encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CFS-3-LICERR: [chars]

Explanation  CFS Service failed to get license.

Recommended Action  No action is required.

Error Message  CFS-3-MTSERROR: [chars]

Explanation  CFS Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

Error Message  CFS-3-PSSERROR: [chars]

Explanation  CFS Service encountered a PSS error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-TIMEOUT_ERROR: [chars] [hex]

Explanation  CFS Service encountered a timeout [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

CFS-4

Error Message  CFS-4-LICEXP: [chars]

Explanation  CFS Service license is going to expire. [chars] gives the expected time of expiry

Recommended Action  No action is required.

CFS-6

Error Message  CFS-6-SRVCREATED: CFS Service created

Explanation  CFS Service was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

CLK_MGR Messages

This section contains the CLK_MGR messages.

CLK_MGR-2

Error Message  CLK_MGR-2-CLK_MGR_FC2_CRIT: CLK_MGR critical error: [chars]

Explanation  CLK_MGR fc2 clock synchronization critical error

Recommended Action  No action is required.

CLK_MGR-5

Error Message  CLK_MGR-5-CLK_MGR_CLI_CONFIG: CLK_MGR clock is synchronized by [chars] from VDC [dec]

Explanation  CLK_MGR clock is synchronized by [chars] from VDC

Recommended Action  No action is required.

CLK_MGR-6

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_DISABLED: CLK_MGR timestamp checks disabled: [chars]

Explanation  CLK_MGR timestamp checks disabled

Recommended Action  No action is required.

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_ENABLED: CLK_MGR timestamp checks enabled

Explanation  CLK_MGR timestamp checks enabled

Recommended Action  No action is required.

CLOUD Messages

This section contains the CLOUD messages.

CLOUD-3

Error Message  CLOUD-3-CLOUD_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_FEATURE_MANAGER_ERROR: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for error using feature manager and rectify the problem

Error Message  CLOUD-3-CLOUD_PSS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the pss operation and rectify the problem

CLOUD-6

Error Message  CLOUD-6-CLOUD_DISCOVERY_DONE: discovery over

Explanation  Cloud-discovery started

Recommended Action  Check cloud membership

CMOND Messages

This section contains the CMOND messages.

CMOND-2

Error Message  CMOND-2-CMOND_ALERT_MSG: [chars]

Explanation  Alert message

Recommended Action  No action is required.

Error Message  CMOND-2-CMOND_ERROR_MSG: [chars]

Explanation  Error message

Recommended Action  No action is required.

COPP Messages

This section contains the COPP messages.

COPP-5

Error Message  COPP-5-COPP_DISABLED: COPP Disabled

Explanation  COPP Service Disabled

Recommended Action  No action is required.

Error Message  COPP-5-COPP_ENABLED: COPP Enabled

Explanation  COPP Service nabled

Recommended Action  No action is required.

Error Message  COPP-5-COPP_INIT: COPP initialized

Explanation  COPP Service Initialized

Recommended Action  No action is required.

CRDCFG Messages

This section contains the CRDCFG messages.

CRDCFG-2

Error Message  CRDCFG-2-CRDCFG_SRV_CRIT: [chars]

Explanation  CardConfig CRITICAL ERROR

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CRDCFG-3

Error Message  CRDCFG-3-CRDCFG_ERR: [chars]

Explanation  CardConfig error mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CRDCFG-3-CRDCFG_MSG: [chars]

Explanation  CardConfig log mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CRDCFG-3-CRDCFG_SRV_ERR: [chars]

Explanation  CardConfigServer error mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CRDCFG-3-CRDCFG_SRV_MSG: [chars]

Explanation  CardConfigServer log mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CRDCFG-SLOT#-2

Error Message  CRDCFG-SLOT#-2-CONFIG_ERR: [chars]

Explanation  CardConfig Failed to find matching cardid, pnum in database

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DCEFIB Messages

This section contains the DCEFIB messages.

DCEFIB-SLOT#-2

Error Message  DCEFIB-SLOT#-2-U2FIB_ERR: [chars]

Explanation  L2mp unicast fib encountered an error:

Recommended Action  No action is required.

DCEFIB-SLOT#-6

Error Message  DCEFIB-SLOT#-6-U2FIB_INFO: [chars]

Explanation  L2mp unicast fib notice:

Recommended Action  No action is required.

DEVICE-ALIAS Messages

This section contains the DEVICE-ALIAS messages.

DEVICE-ALIAS-2

Error Message  DEVICE-ALIAS-2-INIT_FAILED: [chars]

Explanation  An error occurred during initialization. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DEVICE-ALIAS-3

Error Message  DEVICE-ALIAS-3-CFS_OPER_FAILED: [chars]

Explanation  An error occurred while performing a CFS operation. [chars] indicates the CFS operation and the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the session. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-COMMIT_FAILED: [chars]

Explanation  An error occurred while committing the database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-COMMIT_REJECTED: [chars]

Explanation  Commit request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the lock. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-LOCK_REJECTED: [chars]

Explanation  Lock request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_ACTIVATION_FAILED: [chars]

Explanation  An error occurred while activating the merged database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_ACTIVATION_REJECTED: [chars]

Explanation  Merge activation request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_FAILED: [chars]

Explanation  An error occurred during merge operation. [chars] indicates the reason for failure.

Recommended Action  Compare device-alias configuration with the other switches in the fabric, resolve the conflicts if any and commit the changes.

Error Message  DEVICE-ALIAS-3-MERGE_MREQ_REJECTED: [chars]

Explanation  MREQ received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_MRESP_REJECTED: [chars]

Explanation  MRESP received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_VALIDATION_FAILED: [chars]

Explanation  An error occurred while validating the merged database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_VALIDATION_REJECTED: [chars]

Explanation  Merge validation request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MTS_OPER_FAILED: [chars]

Explanation  An error occurred during MTS operation. [chars] indicates the MTS operation and the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-PSS_OPER_FAILED: [chars]

Explanation  An error occurred during PSS operation. [chars] indicates the PSS operation and the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the lock. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-UNLOCK_REJECTED: [chars]

Explanation  Unlock request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-VALIDATION_FAILED: [chars]

Explanation  An error occurred while validating the database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-VALIDATION_REJECTED: [chars]

Explanation  Validation request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DEVICE-ALIAS-6

Error Message  DEVICE-ALIAS-6-CLEAR_FAILED_INFO: [chars]

Explanation  An error occurred while clearing the session. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-COMMIT_FAILED_INFO: [chars]

Explanation  An error occurred while committing the database. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-LOCK_FAILED_INFO: [chars]

Explanation  An error occurred while acquiring the lock. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-MERGE_ACTIVATION_FAILED_INFO: [chars]

Explanation  An error occurred while activating the merged database. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-MERGE_VALIDATION_FAILED_BUSY: [chars]

Explanation  Merged database could not be validated as some of the applications returned busy. [chars] indicates information about the application returned busy. There is no user intervention necessary. The validation would be automatically retried after some time.

Recommended Action  No DDTS.

Error Message  DEVICE-ALIAS-6-MERGE_VALIDATION_REJECTED_BUSY: [chars]

Explanation  Merged database received from the remote switch could not be validated as some of the applications returned busy. [chars] indicates information about the application returned busy. There is no user intervention necessary. The validation would be automatically retried after some time.

Recommended Action  No DDTS.

Error Message  DEVICE-ALIAS-6-UNLOCK_FAILED_INFO: [chars]

Explanation  An error occurred while releasing the lock. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-VALIDATION_ABORTED: [chars]

Explanation  Local validation is aborted. [chars] indicates the reason why validation is aborted.

Recommended Action  No DDTS.

DEV_LOG_SUP Messages

This section contains the DEV_LOG_SUP messages.

DEV_LOG_SUP-3

Error Message  DEV_LOG_SUP-3-ERROR: [chars]

Explanation  Dev_log_sup encountered an error

Recommended Action  No action is required.

DEV_LOG Messages

This section contains the DEV_LOG messages.

DEV_LOG-3

Error Message  DEV_LOG-3-ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DEV_LOG-SLOT#-4

Error Message  DEV_LOG-SLOT#-4-DEV_LOG_LC_ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DHCLIENT Messages

This section contains the DHCLIENT messages.

DHCLIENT-2

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_RECVD_NAK: [chars] - Received DHCP NAK

Explanation  Received DHCP NAK

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_START: [chars] - DHCLIENT DHCP Discover phase started

Explanation  DHCLIENT DHCP Discover phase started

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FAILURE: [chars]

Explanation  DHCLIENT Failure

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FLASH_FULL: DHCLIENT bootflash doesn't have enough space (85% FULL)

Explanation  DHCLIENT bootflash doesn't have enough space (85% FULL)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_INITED: [chars] - DHCLIENT process initialized

Explanation  DHCLIENT process initialized

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded DHCLIENT script file

Explanation  Successfully downloaded DHCLIENT script file

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - DHCLIENT script execution started(MD5 not validated)

Explanation  DHCLIENT script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATED: [chars] - DHCLIENT script execution started(MD5 validated)

Explanation  DHCLIENT script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - DHCLIENT boot file validation failed

Explanation  DHCLIENT boot file validation failed.

Recommended Action  No action is required.

DHCLIENT-4

Error Message  DHCLIENT-4-DHCLIENT_WARNING: [chars]

Explanation  DHCLIENT Warning

Recommended Action  No action is required.

DHCLIENT-5

Error Message  DHCLIENT-5-DHCLIENT_DISABLED: [chars] - DHCLIENT Disabled

Explanation  DHCLIENT Service Disabled

Recommended Action  No action is required.

Error Message  DHCLIENT-5-DHCLIENT_ENABLED: [chars] - DHCLIENT Enabled

Explanation  DHCLIENT Service nabled

Recommended Action  No action is required.

DHCLIENT-6

Error Message  DHCLIENT-6-DHCLIENT_INFO: [chars]

Explanation  DHCLIENT Info

Recommended Action  No action is required.

DHCLIENT-7

Error Message  DHCLIENT-7-DHCLIENT_DEBUG: [chars]

Explanation  DHCLIENT Debug

Recommended Action  No action is required.

DHCP_SNOOP Messages

This section contains the DHCP_SNOOP messages.

DHCP_SNOOP-2

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_PROGRAM_EXIT: [chars]

Explanation  DHCP snoop process did an abnormal exit

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-INITFAIL: DHCP Daemon Initialization failed: [chars]

Explanation  DHCP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-PSSERROR: [chars]

Explanation  DHCP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

DHCP_SNOOP-3

Error Message  DHCP_SNOOP-3-ASSERTION_FAILED: [chars]:[dec]

Explanation  DHCP Snoop process has hit an assert condition at file [chars] line number [dec]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6APIINIT_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_api_init [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6REGISTER_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_register [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-MTSERROR: [chars]

Explanation  DHCP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

DHCP_SNOOP-5

Error Message  DHCP_SNOOP-5-VLANENABLE: DHCP Snooping enabled on vlan [dec]

Explanation  DHCP Snooping was enabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

DHCP_SNOOP-6

Error Message  DHCP_SNOOP-6-DHCPUP: DHCP Daemon Up.

Explanation  DHCP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFDISABLE: IP Src Guard disabled on intf [chars]

Explanation  IP Src Guard was disabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFENABLE: IP Src Guard enabled on intf [chars]

Explanation  IP Src Guard was enabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-OPT82INSTFAIL: [chars] [chars]

Explanation  Insertion of Option82 suboptions failed. [chars] tells the failure. [chars] explains the reason for failure. This is an informational message.

Recommended Action  No action is required.

DIAG_PORT_LB Messages

This section contains the DIAG_PORT_LB messages.

DIAG_PORT_LB-5

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_DISABLED: DIAG_PORT_LB Disabled

Explanation  DIAG_PORT_LB Service Disabled

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_ENABLED: DIAG_PORT_LB Enabled

Explanation  DIAG_PORT_LB Service nabled

Recommended Action  No action is required.

DOT1X Messages

This section contains the DOT1X messages.

DOT1X-5

Error Message  DOT1X-5-DOT1X_DISABLED: dot1x Disabled

Explanation  Dot1x Service Disabled

Recommended Action  No action is required.

Error Message  DOT1X-5-DOT1X_ENABLED: dot1x Enabled

Explanation  Dot1x Service Enabled

Recommended Action  No action is required.

Error Message  DOT1X-5-DOT1X_NOTIF: [chars]

Explanation  Dot1x Notification

Recommended Action  No action is required.

DPVM Messages

This section contains the DPVM messages.

DPVM-2

Error Message  DPVM-2-DPVM_DUPL_REJECT: [chars]

Explanation  Rejected duplicate pwwn query

Recommended Action  Dpvm overwrite-duplicate-pwwn

DPVM-3

Error Message  DPVM-3-DB_ERR: [chars]

Explanation  An error occured during an DPVM database operation. [chars] indicates the reason for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-3-DDAS_MODE_INVALID: [chars]

Explanation  DDAS mode Invalid. [chars]

Recommended Action  Flip DDAS mode

Error Message  DPVM-3-INIT_FAIL: [chars]

Explanation  An error happened during DPVM Initialization. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-3-MTS_ERR: [chars]

Explanation  An error occured in processing of an MTS message. [chars] indicates the error that occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-3-PSS_ERR: [chars]

Explanation  An error occured during an DPVM PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DPVM-4

Error Message  DPVM-4-ACTIVATION_FAIL: [chars]

Explanation  Activation of DPVM device mappings failed due to [chars]

Recommended Action  Correct the error and reactivate database again

Error Message  DPVM-4-FEATURE_DISABLED: [chars]

Explanation  DPVM is unavailable and disabled now

Recommended Action  No action is required.

DPVM-6

Error Message  DPVM-6-FEATURE_ENABLED: [chars]

Explanation  DPVM is available and enabled now

Recommended Action  No action is required.

Error Message  DPVM-6-INFO: [chars]

Explanation  An event happened that affects DPVM. [chars] indicates the event

Recommended Action  No action is required.

DSTATS Messages

This section contains the DSTATS messages.

DSTATS-3

Error Message  DSTATS-3-PSS_CREATE_FAIL: pss create runtime database failed due to error: [hex]

Explanation  Dstats process pss create runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_DELETE_FAIL: pss delete runtime entry key:[hex] failed due to error: [hex]

Explanation  Dstats process pss delete runtime entry key [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_KEY_FAIL: pss set runtime max key failed due to error: [hex]

Explanation  Dstats process pss set runtime max key failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_VALUE_FAIL: pss set runtime max value failed due to error: [hex]

Explanation  Dstats process pss set runtime max value failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_OPEN_FAIL: pss open runtime database failed due to error: [hex]

Explanation  Dstats process pss open runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_RELOAD_FAIL: pss reload runtime database failed due to error: [hex]

Explanation  Dstats process pss reload runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_DEBUG_FAIL: pss snapshot runtime debug to uri:[chars] failed due to error: [hex]

Explanation  Dstats process pss snapshot of runtime debug to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_FAIL: pss snapshot runtime to uri:[chars] failed due to error: [hex]

Explanation  Dstats process pss snapshot of runtime to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_STORE_FAIL: pss store runtime entry key:[hex] val:[hex] failed due to error: [hex]

Explanation  Dstats process pss store runtime entry key [hex] value [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

ECHAT Messages

This section contains the ECHAT messages.

ECHAT-2

Error Message  ECHAT-2-ECHAT_STATUS: TEST: [chars].

Explanation  ECHAT status is reported as [chars].

Recommended Action  No action is required.

EOU Messages

This section contains the EOU messages.

EOU-5

Error Message  EOU-5-L2NAC_DISABLED: EOU Disabled

Explanation  Service EOU Disabled

Recommended Action  No action is required.

Error Message  EOU-5-L2NAC_ENABLED: EOU Enabled

Explanation  Service EOU enabled

Recommended Action  No action is required.

EPP Messages

This section contains the EPP messages.

EPP-5

Error Message  EPP-5-EPP_FAILURE: Interface [chars] EPP Failure

Explanation  Trunk protocol failed

Recommended Action  'show epp internal event-history err' will indicate the errors encountered

ETH-PORT-SEC Messages

This section contains the ETH-PORT-SEC messages.

ETH-PORT-SEC-2

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_ADDR_SEEN: MAC address already secured on peer-switch. Please re-configure after VPC comes up, if this interface is supposed to be a VPC PO

Explanation  Mac already secured on peer

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_MISCONFIG: MAC Addresses present exceed the allowed number of MAC addresses on Port [chars]. Fix the inconsistency on this port.

Explanation  MAC Addresses present exceed the allowed number of MAC addresses.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_REGMAC_ADD_FAIL: Unable to add regmac [chars] for <[chars], vlan [dec]> since it is already registered for <[chars], vlan [dec]>

Explanation  Duplicate regmac detected

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_SECURITY_VIOLATION: Triggered violation [chars] on Port [chars]

Explanation  Violation action triggered on port due to security violation.

Recommended Action  No action is required.

ETH-PORT-SEC-3

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_CONFIG_MAC_FAILED: Failed to configure MACs

Explanation  Failed to configure MACs

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_INVALID_VLAN: Invalid VLAN configuration

Explanation  Invalid VLAN configuration

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_PKTSENDFAIL: Failed to send packet, - [chars]

Explanation  Failed to send packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_ANOTHER_PORT: Host [chars] bound to Port [chars] in Vlan [dec] is trying to access Port [chars] in Vlan [dec]

Explanation  Moved the port to violation state due to a mac address seen on one port being seen on another

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_MAX_MAC_VLAN: Port [chars] moved to [chars] state as host [chars] is trying to access the port in vlan [dec]

Explanation  Moved the port to violation state due to exceeding address count

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_DISABLE: Unable to disable eth_port_sec [chars].

Explanation  Unable to disable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_ENABLE: Unable to enable eth_port_sec [chars].

Explanation  Unable to enable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_VIOL_UPDATE_FAILED: Failed to update violation mode

Explanation  Failed to update violation mode

Recommended Action  No action is required.

ETH-PORT-SEC-5

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_AGE_TIME_EXPIRY: Age Time expired for host [chars] in VLAN [dec] in port [chars]

Explanation  Age time expired for host

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DISABLED: eth_port_sec Disabled on if_index:[hex]

Explanation  Eth_port_sec Service Disabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DYNAMIC_MAC_ADDRESS_CLEARED: Dynamic MAC addresses for port [chars] cleared

Explanation  Dynamic MAC address for port cleared

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_ENABLED: eth_port_sec Enabled on if_index:[hex]

Explanation  Eth_port_sec Service Enabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_ADDITION: A new Host [chars] learnt on Port [chars] in Vlan [dec]

Explanation  A new host is learnt on a port

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_DELETION: Host [chars] bound to secure port [chars] in Vlan [dec] has been removed

Explanation  A host has been removed

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_INITFAIL: Eth Port Security Initialization failed: [chars]

Explanation  Eth Port Security Initialization failed.[chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_MAX_LIMIT_EXCEED: Max Addr per port config cannot be accepted as it will violate the System Max limit. [chars]

Explanation  System wide Max Limit Exceeds

Recommended Action  No action is required.

ETH_PORT_CHANNEL Messages

This section contains the ETH_PORT_CHANNEL messages.

ETH_PORT_CHANNEL-3

Error Message  ETH_PORT_CHANNEL-3-ADD_REM_MEMBERS_FAILURE: [chars]

Explanation  Some service(s) failed to add or remove ports to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-CLEAR_PORT_CLIENT_STATS_FAILURE: [chars]

Explanation  Failed to clear stats for port [chars] err: [hex] ([chars])

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-RESOURCE_ALLOC_FAILED_PORT_CHANNEL_DELETED: [chars] deleted

Explanation  Port-channel deleted from running config

Recommended Action  May need to re-configure the port-channel and its members

Error Message  ETH_PORT_CHANNEL-3-SHADOW_MBR_CHANGE_FAILURE: [chars]

Explanation  Some service failed shadow member change to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_CREATE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel create

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_DELETE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel delete

Recommended Action  None

ETH_PORT_CHANNEL-4

Error Message  ETH_PORT_CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars] (different module inserted)

Explanation  Port is removed from a port-channel because a different module was inserted to the same slot

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  ETH_PORT_CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

ETH_PORT_CHANNEL-5

Error Message  ETH_PORT_CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_WAIT_BFD: [chars] waiting for BFD session to get established

Explanation  Port waiting for BFD session establishment

Recommended Action  None

EVMED Messages

This section contains the EVMED messages.

EVMED-5

Error Message  EVMED-5-EVMED_DISABLED: Event Detectors Disabled

Explanation  Event manager event detector service disabled

Recommended Action  No action is required.

Error Message  EVMED-5-EVMED_ENABLED: Event Detectors Enabled

Explanation  Event manager event detector service enabled

Recommended Action  No action is required.

EXAMPLE_TEST Messages

This section contains the EXAMPLE_TEST messages.

EXAMPLE_TEST-5

Error Message  EXAMPLE_TEST-5-EXAMPLE_TEST_DISABLED: EXAMPLE_TEST Disabled

Explanation  EXAMPLE_TEST Service Disabled

Recommended Action  No action is required.

Error Message  EXAMPLE_TEST-5-EXAMPLE_TEST_ENABLED: EXAMPLE_TEST Enabled

Explanation  EXAMPLE_TEST Service nabled

Recommended Action  No action is required.

EX_SYSLOG Messages

This section contains the EX_SYSLOG messages.

EX_SYSLOG-0

Error Message  EX_SYSLOG-0-EMER_MSG: Emergency Message - [dec]

Explanation  A Dummy emergency message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-1

Error Message  EX_SYSLOG-1-ALERT_MSG: Alert Message - [chars] [dec]

Explanation  A Dummy alert message to test syslogd from ex_syslog. [chars] is the a dummy text. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-2

Error Message  EX_SYSLOG-2-CRIT_MSG: Critical Message - [dec]

Explanation  A Dummy critical message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-3

Error Message  EX_SYSLOG-3-ERR_MSG: Error Message - [dec]

Explanation  A Dummy error message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-4

Error Message  EX_SYSLOG-4-WARNING_MSG: Warning Message - [dec]

Explanation  A Dummy warning message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-5

Error Message  EX_SYSLOG-5-NOTICE_MSG: Notice Message - [dec]

Explanation  A Dummy notice message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-6

Error Message  EX_SYSLOG-6-INFO_MSG: Info Message - [dec]

Explanation  A Dummy info message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-7

Error Message  EX_SYSLOG-7-DEBUG_MSG: Debug Message - [dec]

Explanation  A Dummy debug message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

FABRICPATH Messages

This section contains the FABRICPATH messages.

FABRICPATH-2

Error Message  FABRICPATH-2-FABRICPATH_LINK_BRINGUP_STALLED_STATIC: Link bringup stalled due to conflicts: [chars]

Explanation  Interface is disabled due to conflicts

Recommended Action  No action is required.

FC-TUNNEL Messages

This section contains the FC-TUNNEL messages.

FC-TUNNEL-3

Error Message  FC-TUNNEL-3-INTERNAL_ERROR: Internal error: [chars]

Explanation  FCMPLS tunnel process encountered a general error, one that does not fall in any of the categories. [chars] describes the error and its context.

Recommended Action  No action is required.

FCFWD Messages

This section contains the FCFWD messages.

FCFWD-3

Error Message  FCFWD-3-ERROR: [chars]

Explanation  Fcfwd encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FCFWD-4

Error Message  FCFWD-4-WARNING: [chars]

Explanation  Fcfwd is generating a relevant notification

Recommended Action  No action is required.

FCFWD-6

Error Message  FCFWD-6-INFO: [chars]

Explanation  An fcfwd event occurred

Recommended Action  No action is required.

FCFWD-SLOT#-2

Error Message  FCFWD-SLOT#-2-FIB_MCAST_LIMIT_REACHD: Multicast Route Limit Exceeded.

Explanation  The Multicast Route Limit in the host table has reached.

Recommended Action  No action is required.

FCNS Messages

This section contains the FCNS messages.

FCNS-2

Error Message  FCNS-2-DB_HARD_LIMIT: : [chars]

Explanation  Name server database is full. The max number of entries, [dec], of ports is already present in the database

Recommended Action  No action is required.

Error Message  FCNS-2-DB_SOFT_LIMIT: : [chars]

Explanation  Number of FCNS DB entries should not exceed scale soft limit.

Recommended Action  No action is required.

Error Message  FCNS-2-INIT_FAILURE: : [chars]

Explanation  Fcns initialisation has failed due to [chars].

Recommended Action  No action is required.

Error Message  FCNS-2-NO_RESPONSE: for query [chars] from domain [dec]

Explanation  No response for query [chars] from domain [dec].

Recommended Action  No action is required.

Error Message  FCNS-2-PSS_VERSION_MISMATCH: : for [chars]

Explanation  Version mismatch for pss of type [chars].

Recommended Action  No action is required.

Error Message  FCNS-2-RELOAD_FAILURE: : [chars]

Explanation  Failed to reload information from PSS: [chars].

Recommended Action  No action is required.

FCNS-3

Error Message  FCNS-3-BAD_FRAME: : [chars]

Explanation  Received a bad frame from the network: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-CFG_FAILURE: : [chars]

Explanation  A failure related to fcns configuration: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-CHUNK_FAILURE: : [chars]

Explanation  Chunk memory failure: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-DB_FAILURE: : [chars]

Explanation  A failure occured in fcns database: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-MALLOC_FAILURE: : [chars]

Explanation  Malloc failed: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-MGMT_SEC_SDB_ERR: [chars] : [chars]

Explanation  Mgmt-security shared-db [chars] : [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCNS-3-MTS_FAILURE: : [chars] [chars]

Explanation  Failure occured trying to do an MTS operation: [chars] [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-PSS_FAILURE: : [chars]

Explanation  Pss failure: [chars].

Recommended Action  No action is required.

FCNS-4

Error Message  FCNS-4-QUERY_NO_RESPONSE: for query [chars] from domain [dec]

Explanation  No response for query [chars] from domain [dec].

Recommended Action  No action is required.

FCNS-6

Error Message  FCNS-6-DB_INFO: : [chars] [hex]

Explanation  Database modification:[chars] for entry [hex].

Recommended Action  No action is required.

Error Message  FCNS-6-PORT_NAME_MODIFY: FCID: [chars] Modifying pwwn from [chars] to [chars]. Collect fcns/fcr tech-support and logs

Explanation  Port Name for an existing NS entry is being changed

Recommended Action  No action is required.

Error Message  FCNS-6-STATUS_INFO: : [chars]

Explanation  A change in fcns status: [chars].

Recommended Action  No action is required.

FCOE_MGR Messages

This section contains the FCOE_MGR messages.

FCOE_MGR-2

Error Message  FCOE_MGR-2-FCOE_MGR_MODULE_NOT_LICENSED: FCoE Manager Module:[dec] not licensed

Explanation  FCOE_MGR Line Card not licensed

Recommended Action  No action is required.

FCOE_MGR-5

Error Message  FCOE_MGR-5-FCOE_MGR_DISABLED: FCOE_MGR Disabled

Explanation  FCOE_MGR Service Disabled

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_ENABLED: FCOE_MGR Enabled

Explanation  FCOE_MGR Service Enabled

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_MODULE_LICENSE_CHECKIN: FCoE Manager License Checkin:[dec]

Explanation  FCOE_MGR Line Card license checked in

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_MODULE_LICENSE_CHECKOUT: FCoE Manager License Checkout:[dec]

Explanation  FCOE_MGR Line Card license checked out

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_SOLICITATION_FROM_SAME_MAC: FCoE Manager received Mulicast Solication from same MAC: [chars]

Explanation  FCoE Manager received Mulicast Solication from same MAC

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_VE_DUPLICATE_PEER_MAC: FCoE Manager has already received unicast advertisement from MAC [chars] on a different VE link. Bringing down this link

Explanation  FCoE Manager has already received unicast advertisement from same MAC on a different VE link

Recommended Action  No action is required.

FCS Messages

This section contains the FCS messages.

FCS-2

Error Message  FCS-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

FCS-3

Error Message  FCS-3-DB_ERR: [chars]

Explanation  An error occurred during an FCS database operation. [chars] indicates the reason for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-FCS_MGMT_SEC_SDB_ERR: [chars] : [chars]

Explanation  FC CT Mgmt Security shared db operation : [chars] : [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-INIT_FAIL: [chars]

Explanation  An error happened during FCS Initialization. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-MTS_API_ERR: [chars] : [chars]

Explanation  An error occurred in send or receive of an MTS message. [chars] indicates the error that occurred and [chars] indicates the error number

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-MTS_ERR: [chars]

Explanation  An error occurred in processing of an MTS message. [chars] indicates the error that occurred

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-NO_MTS_RESP: [chars]

Explanation  There was no response to an MTS request. [chars] indicates details of the MTS message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-OTHER_ERR: [chars]

Explanation  An FCS generic error occurred. [chars] indicates the description of the error

Recommended Action  No action is required.

Error Message  FCS-3-PSS_ERR: [chars]

Explanation  An error occurred during an FCS PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-SOCK_ERR: sd: [dec], [chars]

Explanation  An FC-2 Socket error occurred on socket-ID [dec]. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FCS-5

Error Message  FCS-5-API_FAIL: [chars]: [chars]

Explanation  An API called by FCS failed. [chars] indicates the API name failed and [chars] the reason for failure

Recommended Action  If this message is seen during a cold boot, it means that the queried module came up after FCS and this case can be ignored

Error Message  FCS-5-DB_NOTICE: [chars]

Explanation  An error occurred during an FCS database operation. [chars] indicates the reason for the error

Recommended Action  No action is required.

FCS-6

Error Message  FCS-6-INFORMATION: [chars]

Explanation  An event happend that affects FCS. [chars] indicates the event

Recommended Action  No action is required.

FEATURE-MGR Messages

This section contains the FEATURE-MGR messages.

FEATURE-MGR-2

Error Message  FEATURE-MGR-2-FM_FSET_VMM_OP_ERROR: [chars]

Explanation  The error seen at FM and VMM interaction

Recommended Action  Please contact FM/VMM team

FEX Messages

This section contains the FEX messages.

FEX-2

Error Message  FEX-2-FEXCONFIG_ON_VPC: A green start is a must after ISSU for VPC config on FPC([hex]) for AA-FEX bringup. Please ignore if you already reloaded the switch after upgrading to version >= 7.0.3(I5)2

Explanation  Green start (post ISSU) is a must to ensure programming correctness before configuring AA-FEXes

Recommended Action  No action is required.

Error Message  FEX-2-FEX_NOT_ONLINE_SUP_ISSU: FEX [dec] did not come online after SUP ISSU

Explanation  FEX did not come online after sup ISSU

Recommended Action  No action is required.

Error Message  FEX-2-FEX_OFFLINE: FEX [dec] has gone OFFLINE

Explanation  FEX has gone OFFLINE

Recommended Action  No action is required.

Error Message  FEX-2-FEX_ONLINE: FEX [dec] has come ONLINE

Explanation  FEX has come ONLINE

Recommended Action  No action is required.

Error Message  FEX-2-NOHMS_ENV_FEX_OFFLINE: [chars]

Explanation  Fex off-line

Recommended Action  Show inventory

Error Message  FEX-2-NOHMS_ENV_FEX_ONLINE: [chars]

Explanation  Fex on-line

Recommended Action  Show inventory

FEX-4

Error Message  FEX-4-FEX_SCALING_LIMITS_REACHED: You have exceeded the advisable FEX scaling limits.

Explanation  More FEX/FEX ports in the system than recommended by Cisco.

Recommended Action  No action is required.

FEX-5

Error Message  FEX-5-FEX_DISABLED: FEX Disabled

Explanation  FEX Service Disabled

Recommended Action  No action is required.

Error Message  FEX-5-FEX_ENABLED: FEX Enabled

Explanation  FEX Service Enabled

Recommended Action  No action is required.

Error Message  FEX-5-SATMGR_DISABLE_FAILED: Disabling of feature FEX failed. Please remove FEX related configs from interfaces

Explanation  Disabling of FEX feature failed

Recommended Action  No action is required.

FIB Messages

This section contains the FIB messages.

FIB-SLOT#-0

Error Message  FIB-SLOT#-0-EMERG: [chars]

Explanation  Fib caused a system failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-1

Error Message  FIB-SLOT#-1-ALERT: [chars]

Explanation  Fib caused failures in other services

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-1-HW_RESOURCE: [chars]

Explanation  Hardware resources are approaching limit.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-1-HW_RESOURCE: [chars]

Explanation  Hardware resources are approaching limit.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-2

Error Message  FIB-SLOT#-2-CRIT: [chars]

Explanation  Fib encountered a catastrophic error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-3

Error Message  FIB-SLOT#-3-ERR: [chars]

Explanation  Fib encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-3-HW_FAIL: [chars]

Explanation  Failed to program route into the hardware.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-3-NO_MEM: Out of memory

Explanation  Fib does not have enough memory to continue proper operation.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-4

Error Message  FIB-SLOT#-4-WARN: [chars]

Explanation  Fib encountered a possible error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-6

Error Message  FIB-SLOT#-6-FIB_INFO: [chars]

Explanation  Information that a corrective action was taken by FIB

Recommended Action  Message is informational only

FIPS Messages

This section contains the FIPS messages.

FIPS-0

Error Message  FIPS-0-FIPS_POST_CLEANUP_FAILED: Error cleaning up keys in FIPS mode : [chars]

Explanation  FIPS cleanup failed [chars]

Recommended Action  No action is required.

Error Message  FIPS-0-SET_FIPS_MODE_FAILED: Error when setting FIPS mode : [chars]

Explanation  FIPS mode failed [chars]

Recommended Action  No action is required.

FIPS-6

Error Message  FIPS-6-SET_FIPS_MODE: FIPS mode is [chars] for service [chars]

Explanation  FIPS mode is changed [chars] [chars]

Recommended Action  No action is required.

FS-DAEMON Messages

This section contains the FS-DAEMON messages.

FS-DAEMON-6

Error Message  FS-DAEMON-6-FSD_ENOSPC_LOGFLASH: System logflash usage has reached [dec]%. You may delete some old files on logflash to free up space

Explanation  System logflash space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on logflash

Error Message  FS-DAEMON-6-FSD_ENOSPC_ROOT: System root usage has reached [dec]%. You may delete some old files from root or /var/log to free up space

Explanation  System root space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on root dir or /var/log

Error Message  FS-DAEMON-6-FSD_ENOSPC_TMP: System temporary directory usage has reached [dec]%.

Explanation  System /tmp space usage.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FS-DAEMON-6-FSD_REEXPORT_NFS: Re-exported NFS mounts

Explanation  Exported NFS mounts are not visible in kernel and had to be reexported

Recommended Action  Please use 'show system internal flash' to make sure there are no Stale NFS handles

GLBP Messages

This section contains the GLBP messages.

GLBP-2

Error Message  GLBP-2-GLBP_URIB_INIT_ERROR: [chars]

Explanation  Unicast routing initialization failed and the GLBP process terminated

Recommended Action  Please check syslog messages for URIB failures and rectify the problem

GLBP-3

Error Message  GLBP-3-GLBP_FEATURE_MANAGER_ERROR: [chars]: [chars]

Explanation  There was a problem in GLBP interaction with feature manager.

Recommended Action  Please check the reason for error using feature manager and rectify the problem

HSRP_ENGINE Messages

This section contains the HSRP_ENGINE messages.

HSRP_ENGINE-3

Error Message  HSRP_ENGINE-3-NOSOCKET: Unable to open socket

Explanation  The system was unable to initialize an IP connection for the Hot Standby protocol.

Recommended Action  Make sure that there is at least one interface configured to run IP.

IKE Messages

This section contains the IKE messages.

IKE-3

Error Message  IKE-3-IKE_PROGRAM_EXIT: [chars]

Explanation  IKE process did an abnormal exit

Recommended Action  No action is required.

ILC-SPAN Messages

This section contains the ILC-SPAN messages.

ILC-SPAN-3

Error Message  ILC-SPAN-3-ERROR: [chars]

Explanation  Ilc_span_mgr encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

IMP Messages

This section contains the IMP messages.

IMP-5

Error Message  IMP-5-IMP_DISABLED: IMP Disabled

Explanation  IMP Service Disabled

Recommended Action  No action is required.

Error Message  IMP-5-IMP_ENABLED: IMP Enabled

Explanation  IMP Service nabled

Recommended Action  No action is required.

IOA_LC Messages

This section contains the IOA_LC messages.

IOA_LC-5

Error Message  IOA_LC-5-IOA_DISABLED: IOA Disabled

Explanation  IOA Service Disabled

Recommended Action  No action is required.

Error Message  IOA_LC-5-IOA_ENABLED: IOA Enabled

Explanation  IOA Service nabled

Recommended Action  No action is required.

IPSEC Messages

This section contains the IPSEC messages.

IPSEC-5

Error Message  IPSEC-5-IPSEC_DISABLED: IPSec Disabled

Explanation  IPSec Disabled

Recommended Action  No action is required.

Error Message  IPSEC-5-IPSEC_ENABLED: IPSec Enabled

Explanation  IPSec Enabled

Recommended Action  No action is required.

IPS Messages

This section contains the IPS messages.

IPS-3

Error Message  IPS-3-ISLB_CFS_CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the CFS lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_COMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while commiting the cfs config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_CONFIG_FAILED: [chars]; [chars]

Explanation  An error occurred while distributing the CFS config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the CFS lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_ACTIVATION_FAILED: [chars]; [chars]

Explanation  An error occurred while activating merged configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_CLEARED: [chars]

Explanation  Merge cleared, reason: [chars]

Recommended Action  No action is required.

Error Message  IPS-3-ISLB_CFS_MERGE_COMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while commiting the cfs merge config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_CONFIG_FAILED: [chars]; [chars]

Explanation  An error occurred while distributing the CFS merge config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_FAILED: [chars]; [chars]

Explanation  An error occurred while merging the iSLB CFS fabrics. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_PRECOMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while precommiting merge data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_REQ_REJECTED: [chars]

Explanation  Merge requested rejected, reason: [chars]

Recommended Action  No action is required.

Error Message  IPS-3-ISLB_CFS_MERGING_CONFIG_DB_FAILED: [chars]; [chars]

Explanation  An error occurred while merging the config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_PRECOMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while precommiting data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_PWWN_RESV_CLAIM_FAILED: [chars]

Explanation  PWWN reservation claim failed. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_PWWN_RESV_RELEASE_FAILED: [chars]

Explanation  PWWN reservation release failed. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the CFS lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_VRRP_DIST_FAILED: [chars]

Explanation  An error occurred while distributing the VRRP CFS runtime data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

IPS-5

Error Message  IPS-5-IPS_IPACL_LOG_MSG: [chars]

Explanation  Details of the packet dropped due to ACLs

Recommended Action  No action is required.

LACP Messages

This section contains the LACP messages.

LACP-3

Error Message  LACP-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

LACP-5

Error Message  LACP-5-LACP_DISABLED: LACP Disabled

Explanation  LACP Service Disabled

Recommended Action  No action is required.

Error Message  LACP-5-LACP_ENABLED: LACP Enabled

Explanation  LACP Service Enabled

Recommended Action  No action is required.

LC-SPAN Messages

This section contains the LC-SPAN messages.

LC-SPAN-3

Error Message  LC-SPAN-3-ERROR: [chars]

Explanation  Lc_span_mgr encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LDAP Messages

This section contains the LDAP messages.

LDAP-3

Error Message  LDAP-3-LDAP_ERROR_MESSAGE: [chars]

Explanation  LDAP Error Message

Recommended Action  No action is required.

LDAP-5

Error Message  LDAP-5-LDAP_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Ldap server monitor status change

Recommended Action  No action is required.

Error Message  LDAP-5-LDAP_SERVER_STATUS: [chars] server [chars] with port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Ldap server status change

Recommended Action  No action is required.

LDAP-6

Error Message  LDAP-6-LDAP_MESSAGE: [chars]

Explanation  LDAP Message

Recommended Action  No action is required.

LDP Messages

This section contains the LDP messages.

LDP-5

Error Message  LDP-5-LDP_DISABLED: LDP Disabled

Explanation  MPLS_LDP Service Disabled

Recommended Action  No action is required.

Error Message  LDP-5-LDP_ENABLED: LDP Enabled

Explanation  MPLS_LDP Service nabled

Recommended Action  No action is required.

LICMGR Messages

This section contains the LICMGR messages.

LICMGR-3

Error Message  LICMGR-3-LOG_LIC_SERVER_DOWN: License Server Down [dec]

Explanation  A connection to the license server was lost.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LICMGR-6

Error Message  LICMGR-6-LOG_LIC_FEATURE_CLEARED: Cleared [dec] license(s) for feature [chars].

Explanation  Uninstalled [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature removal.

Error Message  LICMGR-6-LOG_LIC_FEATURE_INSTALLED: Installed [dec] license(s) for feature [chars].

Explanation  Installed [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature installation.

Error Message  LICMGR-6-LOG_LIC_LICENSE_CLEARED: Cleared license file [chars].

Explanation  Uninstalled the named license file.

Recommended Action  Use the 'show license' command to verify this license removal.

Error Message  LICMGR-6-LOG_LIC_LICENSE_INSTALLED: Installed license file [chars].

Explanation  Installed the named license file.

Recommended Action  Use the 'show license' command to verify this license installation.

LLDP Messages

This section contains the LLDP messages.

LLDP-5

Error Message  LLDP-5-LLDP_DISABLED: LLDP Disabled

Explanation  LLDP Service Disabled

Recommended Action  No action is required.

Error Message  LLDP-5-LLDP_ENABLED: LLDP Enabled

Explanation  LLDP Service Enabled

Recommended Action  No action is required.

MCAST Messages

This section contains the MCAST messages.

MCAST-2

Error Message  MCAST-2-SHUTDOWN: Process shutting down: [chars]

Explanation  Mcast is shutting down

Recommended Action  The action depends on the situation. The multicast process can shut down gracefully because of a system restart (in which case no action needs to take place) or because of a failure. The message associated with the syslog should be self explanatory to understand the reason for the shutdown. If the process is able to restart properly, there is no immediate harm for the system stability and the suggested action is to report the syslog event together with an explanation of the operations most recently performed on the system.

MCAST-4

Error Message  MCAST-4-ERROR: [chars]

Explanation  Mcast encountered a generic error

Recommended Action  No action is required.

MCAST-5

Error Message  MCAST-5-START: Process has been started

Explanation  Mcast has been started

Recommended Action  No action is required.

MCECTEST Messages

This section contains the MCECTEST messages.

MCECTEST-3

Error Message  MCECTEST-3-ASSERTION_FAILED: [chars]

Explanation  MCECTEST has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INIT_FAIL: [chars]

Explanation  MCECTEST Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INTERNAL_ERR: [chars]

Explanation  MCECTEST encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-MTS_ERR: [chars]

Explanation  MCECTEST encountered an MTS error due to [chars]

Recommended Action  No action is required.

MCECTEST-5

Error Message  MCECTEST-5-MCECTEST_DISABLED: MCECTEST Disabled

Explanation  MCECTEST Service Disabled

Recommended Action  No action is required.

Error Message  MCECTEST-5-MCECTEST_ENABLED: MCECTEST Enabled

Explanation  MCECTEST Service enabled

Recommended Action  No action is required.

MCECTEST-6

Error Message  MCECTEST-6-INTERNAL_INFO: [chars]

Explanation  MCECTEST got an internal info [chars]

Recommended Action  No action is required.

MCM Messages

This section contains the MCM messages.

MCM-2

Error Message  MCM-2-MCM_CRITICAL_ERROR: Internal Critical Error

Explanation  Some critical error

Recommended Action  No action is required.

MCM-5

Error Message  MCM-5-MCM_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for MCM

Recommended Action  No action is required.

MONITORC Messages

This section contains the MONITORC messages.

MONITORC-SLOT#-3

Error Message  MONITORC-SLOT#-3-MONITORC_FAILED: MONITORC failure: [chars]

Explanation  Span session programming failed with no H/W resource

Recommended Action  No DDTS.

MPLS_OAM Messages

This section contains the MPLS_OAM messages.

MPLS_OAM-5

Error Message  MPLS_OAM-5-LSPV_DISABLED: LSPV Disabled

Explanation  MPLS_LSPV Service Disabled

Recommended Action  No action is required.

Error Message  MPLS_OAM-5-LSPV_ENABLED: LSPV Enabled

Explanation  MPLS_LSPV Service nabled

Recommended Action  No action is required.

MPLS_STATIC Messages

This section contains the MPLS_STATIC messages.

MPLS_STATIC-5

Error Message  MPLS_STATIC-5-MPLS_STATIC_DISABLED: MPLS_STATIC Disabled

Explanation  MPLS_STATIC Service Disabled

Recommended Action  No action is required.

Error Message  MPLS_STATIC-5-MPLS_STATIC_ENABLED: MPLS_STATIC Enabled

Explanation  MPLS_STATIC Service enabled

Recommended Action  No action is required.

NAT Messages

This section contains the NAT messages.

NAT-2

Error Message  NAT-2-HW_PROG_FAILED: Hardware programming for NAT failed:[chars]([dec])

Explanation  NAT software encountered an error while programming the hardware to do NAT translation

Recommended Action  No action is required.

NAT-5

Error Message  NAT-5-NAT_LOG_DISABLED: [chars] license not installed or expired

Explanation  NAT needs license to run

Recommended Action  No action is required.

Error Message  NAT-5-NAT_LOG_ENABLED: [chars] license installed

Explanation  NAT needs license to run

Recommended Action  No action is required.

NEUTRON_USD Messages

This section contains the NEUTRON_USD messages.

NEUTRON_USD-0

Error Message  NEUTRON_USD-0-I2C_DEV_INIT_FAIL: [chars]

Explanation  I2C device initialaisation failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-RETIMER_INIT_FAIL_SFP: [chars]

Explanation  Retimer initialisation failure for SFP

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-RETIMER_INIT_FAIL_TRIDENT: [chars]

Explanation  Retimer initialisation failure for Trident

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-RETIMER_INIT_FAIL: [chars]

Explanation  Retimer initialisation failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-USD_DRV_INIT_FAIL: [chars]

Explanation  USD driver init failure

Recommended Action  No action is required.

NEUTRON_USD-2

Error Message  NEUTRON_USD-2-WRONG_MICROCODE: [chars]

Explanation  Wrong Neutron microcode version

Recommended Action  No action is required.

NEUTRON_USD-3

Error Message  NEUTRON_USD-3-NULL_PORT_PTR: [chars]

Explanation  Null port pointer

Recommended Action  No action is required.

NEUTRON_USD-6

Error Message  NEUTRON_USD-6-BYPASS_NEUTRON: [chars]

Explanation  Bypassing Neutron

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-NEUTRON_CLN: [chars]

Explanation  Set neutron chip for CLN

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-NEUTRON_QI: [chars]

Explanation  Set neutron chip for QI

Recommended Action  No action is required.

NFP Messages

This section contains the NFP messages.

NFP-SLOT#-2

Error Message  NFP-SLOT#-2-NF_ACL_ERR: [chars]([dec]): acl error. [chars]

Explanation  Acl error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_DDB_ERR: [chars]([dec]): ddb error.[chars] [hex]

Explanation  Ddb error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_ERR: [chars]([dec]): nfp error. [chars]

Explanation  Nfp error occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_FIB_ERR: [chars]([dec]): fib error. [chars]

Explanation  Fib error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NDE_ERR: [chars]([dec]): nde error. [chars]

Explanation  Nde error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NFM_ERR: [chars]([dec]): nfm error. [chars]

Explanation  Nfm error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_QOS_ERR: [chars]([dec]): qos error. [chars]

Explanation  Qos error

Recommended Action  No DDTS.

NFP-SLOT#-5

Error Message  NFP-SLOT#-5-NF_INFO: [chars]

Explanation  Info

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NGOAM Messages

This section contains the NGOAM messages.

NGOAM-4

Error Message  NGOAM-4-ENTER_SESSION: [chars]

Explanation  Notification of Looback response received for a session.

Recommended Action  No action is required.

Error Message  NGOAM-4-EXIT_SESSION: [chars]

Explanation  Notification of connectivity loss for a Looback session.

Recommended Action  No action is required.

Error Message  NGOAM-4-SESSION_ERROR: [chars]

Explanation  Notification of connectiviy issue for oam packet

Recommended Action  No action is required.

NPV Messages

This section contains the NPV messages.

NPV-3

Error Message  NPV-3-ACL_UPDATE_FAILED: [chars]

Explanation  ACL update request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_FAILED: [chars]

Explanation  An error occurred while committing configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_PARTIALLY_FAILED: [chars]

Explanation  An error occurred while committing configuration. Configuration could not be committed on some switches. The reason for the failure : [chars]. Configuration can be inconsistent in the fabric.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_REJECTED: [chars]

Explanation  Commit request received from remote switch is rejected. The reason for the failure: [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-FC2_SEND_FAILED: [chars]

Explanation  NPV process could send an FC2 message.

Recommended Action  No action is required.

Error Message  NPV-3-F_RJT_SENT: [chars]

Explanation  NPV process sent an F_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-INTERNAL_ERROR: Internal error: [chars]

Explanation  NPV process encountered a general error, one that does not fall in any of the categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  NPV-3-LCP_PROGRAMMING_FAILED: [chars]

Explanation  LCP programming request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-LS_RJT_RCVD: [chars]

Explanation  NPV process received an LS_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-LS_RJT_SENT: [chars]

Explanation  NPV process sent an LS_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-MALLOC_FAILED: [chars]

Explanation  NPV process could not allocate memory

Recommended Action  No action is required.

Error Message  NPV-3-MERGE_ACTIVATION_FAILED: [chars]

Explanation  An error occurred while activating merged configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-MERGE_FAILED: [chars]

Explanation  An error occurred while merging configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-MTS_SEND_FAILED: [chars]

Explanation  NPV process could not send an MTS message.

Recommended Action  No action is required.

Error Message  NPV-3-NPIV_DISABLE_FAILED: [chars]

Explanation  NPIV feature could not be disabled.

Recommended Action  No action is required.

Error Message  NPV-3-NPIV_NOT_SUPPORTED: [chars]

Explanation  Nexus 9000 platform supports FCOE-NPV only. So, NPIV feature has no meaning in this platform

Recommended Action  No action is required.

Error Message  NPV-3-NPV_UPLINK_UNSTABLE: [chars]

Explanation  Atleast one of the external interface is unstable. Loadbalancing across uplink requires stable links

Recommended Action  No action is required.

Error Message  NPV-3-PORT_BRINGUP_FAILED: [chars]

Explanation  NPV process has failed to bringup the port

Recommended Action  No action is required.

Error Message  NPV-3-PORT_REINIT_FAILED: [chars]

Explanation  Port reinit request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NPV-5

Error Message  NPV-5-FRAME_DISCARDED: [chars]

Explanation  NPV process discarded an FC2 frame.

Recommended Action  No action is required.

Error Message  NPV-5-UNEXPECTED_EVENT: [chars]

Explanation  NPV process has received an unexpected event in the current state.

Recommended Action  No action is required.

NPV-6

Error Message  NPV-6-ABTS_SENT: [chars]

Explanation  NPV process sent an ABTS frame.

Recommended Action  No action is required.

Error Message  NPV-6-ELS_CMD_SENT_TO_CORE: [chars]

Explanation  NPV process sent an ELS frame to the core switch.

Recommended Action  No action is required.

Error Message  NPV-6-ELS_CMD_SENT_TO_SRV: [chars]

Explanation  NPV process sent an ELS frame to the server.

Recommended Action  No action is required.

Error Message  NPV-6-EXT_IF_SELECTED: [chars]

Explanation  NPV process has selected an external interface to forward either all frames received on a server interface or frames received from a specific port WWN.

Recommended Action  No action is required.

Error Message  NPV-6-FABRIC_PROXY_LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame to the device as the corresponding external interface went down.

Recommended Action  No action is required.

Error Message  NPV-6-FDISC_RCVD: [chars]

Explanation  NPV process received an FDISC frame.

Recommended Action  No action is required.

Error Message  NPV-6-FDISC_SENT: [chars]

Explanation  NPV process sent an FDISC frame to the core switch.

Recommended Action  No action is required.

Error Message  NPV-6-FLOGI_RCVD: [chars]

Explanation  NPV process received an FLOGI frame.

Recommended Action  No action is required.

Error Message  NPV-6-INTERNAL_FLOGI_SENT: [chars]

Explanation  NPV process sent an internal FLOGI frame to the core switch on an external interface.

Recommended Action  No action is required.

Error Message  NPV-6-LOGO_RCVD: [chars]

Explanation  NPV process received a LOGO frame.

Recommended Action  No action is required.

Error Message  NPV-6-LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame.

Recommended Action  No action is required.

Error Message  NPV-6-LS_ACC_RCVD: [chars]

Explanation  NPV process received an LS_ACC frame.

Recommended Action  No action is required.

Error Message  NPV-6-LS_ACC_SENT: [chars]

Explanation  NPV process sent an LS_ACC frame.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_NOTIF_RCVD: [chars]

Explanation  NPV process received an MTS notification.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_NOTIF_SENT: [chars]

Explanation  NPV process sent an MTS notification.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_REQ_RCVD: [chars]

Explanation  NPV process received an MTS request.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_REQ_SENT: [chars]

Explanation  NPV process sent an MTS request.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_RESP_RCVD: [chars]

Explanation  NPV process received an MTS response.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_RESP_SENT: [chars]

Explanation  NPV process sent an MTS response.

Recommended Action  No action is required.

Error Message  NPV-6-NPIV_DISABLED: [chars]

Explanation  NPIV feature has been disabled.

Recommended Action  No action is required.

Error Message  NPV-6-NPIV_ENABLED: [chars]

Explanation  NPIV feature has been enabled.

Recommended Action  No action is required.

Error Message  NPV-6-NPV_ENABLE_DISABLE_IN_PROGRESS: [chars]

Explanation  NPV feature enable/disable is in progress. This syslog is printed at the beginning of various significant phases.

Recommended Action  No action is required.

Error Message  NPV-6-SERVER_PROXY_LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame to the core switch as the server interface went down.

Recommended Action  No action is required.

NPV-7

Error Message  NPV-7-CFS_REQ_RCVD: [chars]

Explanation  CFS request is received. The WWN of the switch originated this request and the rr-token of the request are provided in the syslog message.

Recommended Action  No action is required.

Error Message  NPV-7-CFS_RESP_SENT: [chars]

Explanation  CFS response is sent. The rr-token of the corresponding request and the status are provided in the syslog message

Recommended Action  No action is required.

NSUSD Messages

This section contains the NSUSD messages.

NSUSD-6

Error Message  NSUSD-6-NSAUSD_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

NTP Messages

This section contains the NTP messages.

NTP-2

Error Message  NTP-2-NTP_SYSLOG_CRIT_ERR: : [chars]

Explanation  NTP syslog Critial Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_INIT_FAIL: : [chars] [chars]

Explanation  NTP Initialization Failed: [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_NO_RESP_FROM_LC: from LC[dec] for [chars]

Explanation  NTP did not receive response from the linecard for the request sent.

Recommended Action  No action is required.

NTP-3

Error Message  NTP-3-NTP_SYSLOG_ALLOC_FAIL: : [chars]

Explanation  NTP syslog allocation failed : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR_EXT: : [chars] [chars]

Explanation  NTP syslog Error Exit : [chars] [dec].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR: : [chars]

Explanation  NTP syslog Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_MTS_ERR: : [chars]

Explanation  NTP MTS Error : [chars].

Recommended Action  No action is required.

NTP-6

Error Message  NTP-6-NTP_SYSLOG_CREATED: : [chars]; Slot No: [dec]

Explanation  NTP syslog created : [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_EXIT: : [chars]

Explanation  NTP syslog Exit : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_LOGGING: : [chars]

Explanation  NTP logging : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_WARN: : [chars]

Explanation  NTP syslog Warning : [chars].

Recommended Action  No action is required.

OBFL Messages

This section contains the OBFL messages.

OBFL-3

Error Message  OBFL-3-ERROR: [chars]

Explanation  Obfl_encountered an error

Recommended Action  No action is required.

ONEP Messages

This section contains the ONEP messages.

ONEP-6

Error Message  ONEP-6-HISTORY: [chars]

Explanation  This syslog message is used to display onePK history messages when the 'history syslog' onep command is enabled.

Recommended Action  LOG_STD_SH_CMD_ACTION( No action is required. Use 'no history syslog' at the onep configuration prompt to turn off this logging if desired.)

OTM Messages

This section contains the OTM messages.

OTM-2

Error Message  OTM-2-OTM_EEM_FAIL: OTM failed to register with EEM

Explanation  OTM process failed to register with eem, exiting now

Recommended Action  No action is required.

OTM-3

Error Message  OTM-3-OTM_ERROR: [chars] [chars]

Explanation  [chars1][chars2]

Recommended Action  No action is required.

OTM-5

Error Message  OTM-5-OTM_OBJ_ADD: : Tracking object [dec] configured, status of the object [chars]

Explanation  Tracking Object [dec] configured, status of the object [chars]

Recommended Action  No action is required.

OTM-6

Error Message  OTM-6-OTM_EXITED: OTM process exited

Explanation  OTM process is terminated

Recommended Action  No action is required.

Error Message  OTM-6-OTM_OBJ_REM: : Tracking object [dec] removed

Explanation  Tracking Object [dec] removed

Recommended Action  No action is required.

Error Message  OTM-6-OTM_STARTED: OTM process started

Explanation  OTM process is up and running

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_START: Client started tracking object [dec]

Explanation  Client has started tracking object [dec]

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_STOP: Client stopped tracking object [dec]

Explanation  Client has stopped tracking object [dec]

Recommended Action  No action is required.

PATCH-INSTALLER Messages

This section contains the PATCH-INSTALLER messages.

PATCH-INSTALLER-3

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_OP_FAILED: Package Install operation: [chars] , operation ID: [dec], failed with error: [dec] ([chars]) at: [chars]

Explanation  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Recommended Action  Patch_installer

PIXM Messages

This section contains the PIXM messages.

PIXM-2

Error Message  PIXM-2-PIXM_SYSLOG_MESSAGE_TYPE_CRIT: [chars]

Explanation  PIXM has encountered a critical error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-3

Error Message  PIXM-3-PIXM_SYSLOG_MESSAGE_TYPE_ERR: [chars]

Explanation  PIXM has encountered a error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-4

Error Message  PIXM-4-PIXM_SYSLOG_MESSAGE_TYPE_WARNING: [chars]

Explanation  PIXM has encountered a warning-level error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-7

Error Message  PIXM-7-PIXM_SYSLOG_MESSAGE_TYPE_DEBUG: [chars]

Explanation  This is a debug output from PIXM

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PLATFORM Messages

This section contains the PLATFORM messages.

PLATFORM-0

Error Message  PLATFORM-0-FAIL_REMOVED: Fan module removed. Fan[dec] has been absent for [dec] seconds

Explanation  Fan module is removed. This could lead to temperature alarms.

Recommended Action  Replace the fan module ASAP.

Error Message  PLATFORM-0-PFM_EMERGENCY: [chars]

Explanation  Platform Emergency

Recommended Action  No action is required.

Error Message  PLATFORM-0-SYS_RESET: [chars] System shutdown in [dec] seconds

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

PLATFORM-1

Error Message  PLATFORM-1-FABRIC_SWITCH_FAN_FAIL: Less than 4 required fans operating.

Explanation  Fan module has failed leaving less than 4 total fans operating. Fan needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-FAN_FAIL: Fan module Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-PFM_ALERT: [chars]

Explanation  Platform Alert

Recommended Action  No action is required.

Error Message  PLATFORM-1-PS_SINGLE_INPUT: Both power inputs are connected for Power supplies, remove single-input configuration for optimal power usage

Explanation  Current power supply redundancy mode may not be optimal

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

PLATFORM-2

Error Message  PLATFORM-2-9134_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-9134_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-CASA_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-CASA_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FANLET_FAN_FAIL: Failed Fanlets for Fan [dec] ([chars] fan) : [chars]

Explanation  The specified fanlets have failed. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_FAIL: Fan module [dec] ([chars] fan) Failed/Removed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_OK: Fan module [dec] ([chars] fan) ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_OK: Fan module ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_REMOVED: Fan module [dec] (Serial number [chars]) [chars] removed

Explanation  Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_CRITICAL: [chars]

Explanation  Platform Critical

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_PREP_DEEP_SLEEP: Supervisor module in slot [dec] preparing to enter deep sleep mode

Explanation  Deep sleep mode initiated by the Connectivity Management Processor (CMP) for this supervisor

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_CAPACITY_CHANGE: Power supply PS[dec] changed its capacity. possibly due to On/Off or power cable removal/insertion (Serial number [chars])

Explanation  Detected power supply capacity change.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_CAPACITY_DIFFER: Detected power supplies with differing capacity. It is recommended to have same capacity for both powersupplies otherwise it may cause service disruptions

Explanation  Detected a power supply that has differing capacity than an the otherpower supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FAIL: Power supply [dec] failed or shut down (Serial number [chars])

Explanation  Power Supply has failed or has been shutdown

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information. Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_FANFAIL: Fan in Power supply [dec] failed

Explanation  Fan module in the Power Supply has failed

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FANOK: Fan in Power supply [dec] ok

Explanation  Fan module in the Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_MISMATCH: Detected power supply [chars]. This reduces the redundant power available to the system and can cause service disruptions (Serial number [chars])

Explanation  Detected a new power supply that has reduced capacity than an existing power supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_OK: Power supply [dec] ok (Serial number [chars])

Explanation  Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_RED_MODE_CHG: Power supply operational redundancy mode changed to [chars]

Explanation  Power supply redundancy mode changed notification

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_REMOVE_LAST: Unexpected removal of last power supply [dec]. (Serial number [chars])

Explanation  Unexpected removal the only power supply in the system.

Recommended Action  Power supply unit may be faulty. Contact CISCO to replace the unit.

Error Message  PLATFORM-2-PS_UNKNOWN: Detected an unknown power supply [dec] for CISCO Multilayer Switch (Serial number [chars])

Explanation  Unable to determine power supply type. Default power supply types will be assumed.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_UNSUPPORTED: Detected an unsupported power supply [dec] [chars] for CISCO Multilayer Switch (Serial number [chars])

Explanation  This power supply is not supported for the CISCO Multilayer Switches.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

PLATFORM-3

Error Message  PLATFORM-3-PFM_ERROR: [chars]

Explanation  Platform Error

Recommended Action  No action is required.

PLATFORM-4

Error Message  PLATFORM-4-PFM_WARNING: [chars]

Explanation  Platform Warning

Recommended Action  No action is required.

PLATFORM-5

Error Message  PLATFORM-5-FAN_DETECT: Fan module [dec] (Serial number [chars]) [chars] detected

Explanation  Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FAN_STATUS: Fan module [dec] (Serial number [chars]) [chars] current-status is [chars]

Explanation  Fan module changed status

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_DETECT: Fex [dec] Fan Module [dec] detected

Explanation  Fex Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_REMOVE: Fex [dec] Fan Module [dec] removed

Explanation  Fex Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_FOUND: Fex [dec] Power Supply [dec] found (Serial number [chars])

Explanation  Fex power supply is found

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_REMOVE: Fex [dec] Power Supply [dec] removed (Serial number [chars])

Explanation  Fex power supply is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-PFM_NOTICE: [chars]

Explanation  Platform Notice

Recommended Action  No action is required.

PLATFORM-6

Error Message  PLATFORM-6-PFM_INFO: [chars]

Explanation  Platform Info

Recommended Action  No action is required.

PLATFORM-7

Error Message  PLATFORM-7-PFM_CLOCK_UPD_FAIL: Clock update failed due to context-switch delay of [dec] msec

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

PLOG_SUP Messages

This section contains the PLOG_SUP messages.

PLOG_SUP-4

Error Message  PLOG_SUP-4-PLOG_SUP_EXIT: Persistent Logger encountered an error [dec].

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

PLOG Messages

This section contains the PLOG messages.

PLOG-4

Error Message  PLOG-4-PLOG_LC_EXIT: Persistent Logger encountered an error [dec]

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

POAP Messages

This section contains the POAP messages.

POAP-2

Error Message  POAP-2-POAP_DHCP_DISCOVER_START: [chars] - POAP DHCP Discover phase started

Explanation  POAP DHCP Discover phase started

Recommended Action  No action is required.

Error Message  POAP-2-POAP_FAILURE_READ_MODINFO: [chars] - Failure to read module info

Explanation  POAP failure to read module info

Recommended Action  No action is required.

Error Message  POAP-2-POAP_FAILURE: [chars] - [chars]

Explanation  POAP failure

Recommended Action  No action is required.

Error Message  POAP-2-POAP_INFO: [chars] - [chars]

Explanation  POAP Info

Recommended Action  No action is required.

Error Message  POAP-2-POAP_INITED: [chars] - POAP process initialized

Explanation  POAP process initialized

Recommended Action  No action is required.

Error Message  POAP-2-POAP_RELOAD_DEVICE: [chars] - Reload device

Explanation  POAP reload device.

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded POAP script file

Explanation  Successfully downloaded POAP script file

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - POAP script execution started(MD5 not validated)

Explanation  POAP script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_VALIDATED: [chars] - POAP script execution started(MD5 validated)

Explanation  POAP script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - POAP boot file validation failed

Explanation  POAP boot file validation failed.

Recommended Action  No action is required.

POAP-5

Error Message  POAP-5-POAP_DISABLED: [chars] - POAP Disabled

Explanation  POAP Service Disabled

Recommended Action  No action is required.

Error Message  POAP-5-POAP_ENABLED: [chars] - POAP Enabled

Explanation  POAP Service nabled

Recommended Action  No action is required.

PONG Messages

This section contains the PONG messages.

PONG-5

Error Message  PONG-5-PONG_DISABLED: Pong Manager disabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_ENABLED: Pong Manager enabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_INJECTED: Pong packet injected

Explanation  Pong packet injected

Recommended Action  No action is required.

PORT-CHANNEL Messages

This section contains the PORT-CHANNEL messages.

PORT-CHANNEL-3

Error Message  PORT-CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

PORT-CHANNEL-4

Error Message  PORT-CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars]

Explanation  Port is removed from a port-channel because different module was inserted or module config purged

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  PORT-CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

PORT-CHANNEL-5

Error Message  PORT-CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

PORT-SECURITY Messages

This section contains the PORT-SECURITY messages.

PORT-SECURITY-2

Error Message  PORT-SECURITY-2-INIT_FAILURE: : [chars]

Explanation  FC Management initialisation has failed due to [chars].

Recommended Action  No action is required.

PORT-SECURITY-3

Error Message  PORT-SECURITY-3-BINDING_CONFLICT: [chars]

Explanation  An already logged in device is in conflict with the PSM active binding configurations. [chars] indicates the WWN of the login entity, interface

Recommended Action  For port-security, the auto-learn feature can be used with activation to prevent this. This violating device or switch will be logged out

Error Message  PORT-SECURITY-3-BINDING_VIOLATION: [chars]

Explanation  A login happend that violates PSM binding configurations [chars] indicates the WWN of the login entity

Recommended Action  Only entries in the activated database of PSM can login. Change the config and activate it again

Error Message  PORT-SECURITY-3-CFS_NOTIF_ERR: [chars]

Explanation  An error occurred during the processing of a CFS notification. [chars] indicates the actual cause for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-DB_ERR: [chars]

Explanation  An error occurred during an PSM database operation. [chars] indicates the reason for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-EFMD_FC2_OPER_FAILED: [chars]

Explanation  EFMD fc2 operation failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-EFMD_INIT_FAILED: [chars]

Explanation  EFMD init failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-EFMD_MERGE_UNKNOWN_FORMAT: [chars]

Explanation  Received a corrupted EFMD Request Packet

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-FCID_CONV_ERR: : [chars]

Explanation  FC Management pwwn to fcid conversion has failed due to [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-INIT_FAIL: [chars]

Explanation  An error happened during PSM Initialization. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-LEARNT_BINDING_CONFLICT: [chars]

Explanation  An already logged in device that is learnt during activation is in conflict with the PSM active binding configurations. [chars] indicates the WWN of the login entity, interface

Recommended Action  Copy the active-db to config-db and reactivate. Not doing so could result in unexpected login rejects later on that interface.

Error Message  PORT-SECURITY-3-MAX_LIMIT_CROSSED: [chars]

Explanation  MGMT_SEC: Max Limit for the config has exceeded.[chars]

Recommended Action  No action is required.

Error Message  PORT-SECURITY-3-MS_DB_ERR: : [chars]

Explanation  FC Management db operation has failed due to [chars].

Recommended Action  No action is required.

Error Message  PORT-SECURITY-3-MS_DISABLE_ERR: [chars]

Explanation  An error occurred during an FC Management disable operation. [chars] indicates the operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-MS_ENABLE_ERR: [chars]

Explanation  An error occurred during an FC Management enable operation. [chars] indicates the operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-MTS_ERR: [chars]

Explanation  An error occurred in processing of an MTS message. [chars] indicates the error that occurred

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-PSS_ERR: [chars]

Explanation  An error occurred during an PSM PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-SDB_ERR: [chars]

Explanation  An error occurred during an FC Management sdb operation. [chars] indicates the operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-SDB_UPDATE_ERR: : [chars]

Explanation  FC Management update has failed due to [chars].

Recommended Action  No action is required.

PORT-SECURITY-4

Error Message  PORT-SECURITY-4-ACTIVATION_FAIL: [chars]

Explanation  Activation of bindings failed due to [chars]

Recommended Action  Correct the error and reactivate it again

Error Message  PORT-SECURITY-4-MAX_LIMIT_REACHED: [chars]

Explanation  MGMT_SEC: Max Limit for the config has reached.[chars]

Recommended Action  No action is required.

Error Message  PORT-SECURITY-4-PSS_WARN: [chars]

Explanation  A failure occurred during a PSM PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  No action is required.

PORT-SECURITY-6

Error Message  PORT-SECURITY-6-INFO: [chars]

Explanation  An event happend that affects PSM. [chars] indicates the event

Recommended Action  No action is required.

Error Message  PORT-SECURITY-6-MGMT_SEC_INFO: [chars]

Explanation  An event happend that affects FC Management. [chars] indicates the event

Recommended Action  No action is required.

PORT Messages

This section contains the PORT messages.

PORT-3

Error Message  PORT-3-IF_SFP_ALARM: Interface [chars], [chars] [chars] [chars]

Explanation  There was an alarm on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

PORT-4

Error Message  PORT-4-IF_SFP_WARNING: Interface [chars], [chars] [chars] [chars]

Explanation  There was an warning on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

PRIVATE_VLAN Messages

This section contains the PRIVATE_VLAN messages.

PRIVATE_VLAN-2

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_DOWN_FAILED: Failed to bring down the association between [dec] & [dec]

Explanation  Association bringdown failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_UP_FAILED: Failed to bring up the association between [dec] & [dec]

Explanation  Association bringup failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_MTS_SEND_FAILED: MTS send failed while communicating with ELTM.

Explanation  ELTM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_TIMED_OUT: ELTM timed out while configuring hardware.

Explanation  ELTM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ETHPM_TIMED_OUT: ETHPM timed out while configuring/unconfiguring hardware

Explanation  ETHPM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_ASSOCIATE_PRIMARY_WITH_SECONDARY_VLAN: Failed to bring up the association between [dec] & [dec]

Explanation  Association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_REMOVE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring down the association between [dec] & [dec]

Explanation  Fail to remove association between primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring up the association between [dec] & [dec]

Explanation  Failed to associate primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_REMOVE_ASSOCIATION_BETWEEN_PRIMARY_AND_SECONDARY_VLAN: Failed to bring down the association between [dec] & [dec]

Explanation  Removing association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_HW_ERROR: Error [hex] occurred for ifindex [hex] while programming hardware: [chars]

Explanation  Hardware Configuration Error

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_MTS_SEND_FAILED: MTS send failed while communicating with PIXM

Explanation  PIXM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_TIMED_OUT: PIXM timed out while configuring hardware.

Explanation  PIXM timed out

Recommended Action  No action is required.

PRIVATE_VLAN-3

Error Message  PRIVATE_VLAN-3-PVLAN_ASSOC_SDB_UPDATE_FAILED: Failed to update SDB while [chars] association for vlan [dec]

Explanation  SDB Update failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_IN_USE: PVLAN [dec] in use by interface [chars], please do "no switchport access vlan" or "no switchport private-vlan host-association"

Explanation  PVLAN in use

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_VLANMGR_FAILURE: Cannot restore association operational state. Failed to communicate with VLAN manager

Explanation  Restoring association operational status failed

Recommended Action  No action is required.

PRIVATE_VLAN-5

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLED: PVLAN Disabled

Explanation  PVLAN Service Disabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLE_FAILED: Disabling of private-vlan failed. Either shutdown these ports or remove the ports that are in switchport mode private-vlan: [chars]

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_ENABLED: PVLAN Enabled

Explanation  PVLAN Service Enabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_VTP_DISABLE_FAILED: Either remove all private-vlans from VTP domain or change VTP to transparent mode

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

PROFILER Messages

This section contains the PROFILER messages.

PROFILER-0

Error Message  PROFILER-0-EMERGENCY_MSG: [chars]

Explanation  Profiler Emergency Message

Recommended Action  Please file the bug for Profiler Library Component thro' CDETS

PROFILER-1

Error Message  PROFILER-1-ALERT_MSG: [chars]

Explanation  Profiler Alert Message

Recommended Action  Profiler Internal Operation Alert

PROFILER-2

Error Message  PROFILER-2-CRITICAL_MSG: [chars]

Explanation  Profiler Critical Message

Recommended Action  No action is required.

PROFILER-3

Error Message  PROFILER-3-ERROR_MSG: [chars]

Explanation  Profiler Error Message

Recommended Action  No action is required.

PROFILER-4

Error Message  PROFILER-4-WARN_MSG: [chars]

Explanation  Profiler Warning Message

Recommended Action  No action is required.

PROFILER-5

Error Message  PROFILER-5-NOTIF_MSG: [chars]

Explanation  Profiler Notification Message

Recommended Action  No action is required.

PROFILER-6

Error Message  PROFILER-6-INFO_MSG: [chars]

Explanation  Profiler Informational Message

Recommended Action  No action is required.

PROFILER-7

Error Message  PROFILER-7-DEBUG_MSG: [chars]

Explanation  Profiler Debug Message

Recommended Action  No action is required.

PSS Messages

This section contains the PSS messages.

PSS-2

Error Message  PSS-2-PSS_ERROR: [chars]

Explanation  PSS error log

Recommended Action  No action is required.

Error Message  PSS-2-PSS_INFRACONVERT: [chars]

Explanation  Error in libinfraconvert during pss conversion

Recommended Action  No action is required.

PSS-4

Error Message  PSS-4-PSS_CLEANUP: [chars]: cleaning up [chars]

Explanation  PSS removed a leftover or corrupted file

Recommended Action  No action is required.

PSS-5

Error Message  PSS-5-PSS_CONVERT_FORMAT: [chars]: converting pss format: [chars]

Explanation  PSS format is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_CONVERT_LAYOUT: [chars]: converting pss layout: [chars] (params [dec]/[dec]/[dec] -> [dec]/[dec]/[dec])

Explanation  PSS layout is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_SHRINK: [chars]: shrinking pss: [chars]

Explanation  PSS is being shrunk to remove free space

Recommended Action  No action is required.

Error Message  PSS-5-SDB_CLOSED_AT_COMMIT: [chars]: sdb [chars] is closed: token [dec] is not committed

Explanation  Publisher received SDB commit but sdb was already closed

Recommended Action  No action is required.

PTPLC Messages

This section contains the PTPLC messages.

PTPLC-3

Error Message  PTPLC-3-PTPLC_PORT_CFG_FAILED: Configuration failed on port [hex], [chars]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

Error Message  PTPLC-3-PTPLC_PTP_INTF_CONFIG_ERROR: Failed to configure PTP/PONG on port [dec]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

PTP Messages

This section contains the PTP messages.

PTP-2

Error Message  PTP-2-PTP_GM_CHANGE_TOLOCAL: Grandmaster clock has changed to local clock [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed to local Clock ID

Recommended Action  No action is required.

Error Message  PTP-2-PTP_GM_CHANGE: Grandmaster clock has changed from [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] to [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_STATE_CHANGE: PTP state of interface [chars] is changing from '[chars]' to '[chars]'

Explanation  PTP Port state change

Recommended Action  No action is required.

Error Message  PTP-2-PTP_TIMESYNC_LOST: Loss of synchronization with master clock

Explanation  PTP loses synchronization with master clock

Recommended Action  No action is required.

PTP-5

Error Message  PTP-5-PTP_DISABLED: PTP disabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

Error Message  PTP-5-PTP_DOMAIN_CHANGE: PTP domain changed to [dec]

Explanation  PTP domain changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ENABLED: PTP enabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

PTP-6

Error Message  PTP-6-PTP_ANNOUNCE_INTERVAL_CHANGE: PTP announce interval for [hex] changed to [dec]

Explanation  PTP announce interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_ANNOUNCE_TIMEOUT_CHANGE: PTP announce timeout interval for [hex] changed to [dec]

Explanation  PTP announce timeout interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_DELAY_REQ_INTERVAL_CHANGE: PTP delay-req interval for [hex] changed to [dec]

Explanation  PTP delay-req interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY1_CHANGE: PTP priority1 changed to [dec]

Explanation  PTP priority1 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY2_CHANGE: PTP priority2 changed to [dec]

Explanation  PTP priority2 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_SYNC_INTERVAL_CHANGE: PTP sync interval for [hex] changed to [dec]

Explanation  PTP sync interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_TIMESYNC_REG_CHANGE: PTP time-sync register changed

Explanation  PTP time-sync reg change

Recommended Action  No action is required.

Error Message  PTP-6-PTP_VLAN_CHANGE: PTP vlan for [hex] changed to [dec]

Explanation  PTP vlan for [chars] changed

Recommended Action  No action is required.

PULSE Messages

This section contains the PULSE messages.

PULSE-0

Error Message  PULSE-0-EMERGENCY_MSG: [chars]

Explanation  Pulse Emergency Message

Recommended Action  Please file the bug for Pulse Library Component thro' CDETS

PULSE-1

Error Message  PULSE-1-ALERT_MSG: [chars]

Explanation  Pulse Alert Message

Recommended Action  Pulse Internal Operation Alert

PULSE-2

Error Message  PULSE-2-CRITICAL_MSG: [chars]

Explanation  Pulse Critical Message

Recommended Action  No action is required.

PULSE-3

Error Message  PULSE-3-ERROR_MSG: [chars]

Explanation  Pulse Error Message

Recommended Action  No action is required.

PULSE-4

Error Message  PULSE-4-WARN_MSG: [chars]

Explanation  Pulse Warning Message

Recommended Action  No action is required.

PULSE-5

Error Message  PULSE-5-NOTIF_MSG: [chars]

Explanation  Pulse Notification Message

Recommended Action  No action is required.

PULSE-6

Error Message  PULSE-6-INFO_MSG: [chars]

Explanation  Pulse Informational Message

Recommended Action  No action is required.

PULSE-7

Error Message  PULSE-7-DEBUG_MSG: [chars]

Explanation  Pulse Debug Message

Recommended Action  No action is required.

QOS Messages

This section contains the QOS messages.

QOS-2

Error Message  QOS-2-GENERAL_ERROR: [chars]

Explanation  The QOS Manager has encountered an critical error. The description of error is [str.].

Recommended Action  No action is required.

Error Message  QOS-2-PSS_ERROR: [chars]: PSS returned value=[dec]

Explanation  The QOS Manager encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

QOS-3

Error Message  QOS-3-DBERROR: [chars]

Explanation  QoS Manager encountered a database error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-FAILURE_RESPONSE: [chars] [hex]

Explanation  QoS Manager failed to get response [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-GENERROR: [chars]

Explanation  QoS Manager encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  QOS-3-LICERR: [chars]

Explanation  QoS Manager failed to get license.

Recommended Action  No action is required.

Error Message  QOS-3-MTSERROR: [chars]

Explanation  QoS Manager encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  QOS-3-PSSERROR: [chars]

Explanation  QoS Manager encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-TIMEOUT_ERROR: [chars] [hex]

Explanation  QoS Manager encountered a timeout [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

QOS-4

Error Message  QOS-4-LICEXP: [chars]

Explanation  QoS Manager license is going to expire. [chars] gives the expected time of expiry.

Recommended Action  No action is required.

QOS-6

Error Message  QOS-6-DISABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has disabled marking of time-critical control traffic as high-priority traffic. Priority of such traffic is now not altered by QoS Manager.

Recommended Action  No action is required.

Error Message  QOS-6-ENABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has enabled marking of time-critical control traffic as high-priority traffic.

Recommended Action  No action is required.

Error Message  QOS-6-MGRCREATED: QoS Manager created

Explanation  QoS Manager was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

QUACK_SMC Messages

This section contains the QUACK_SMC messages.

QUACK_SMC-6

Error Message  QUACK_SMC-6-QUACK_LIB_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

RADIUS Messages

This section contains the RADIUS messages.

RADIUS-3

Error Message  RADIUS-3-RADIUS_ERROR_MESSAGE: [chars]

Explanation  RADIUS Error Message

Recommended Action  No action is required.

RADIUS-4

Error Message  RADIUS-4-RADIUS_WARNING: [chars]

Explanation  RADIUS Warning

Recommended Action  No action is required.

RADIUS-5

Error Message  RADIUS-5-RADIUS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Radius server monitor status change

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_NOTIFICATION: [chars]

Explanation  RADIUS Notification

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Radius server status change

Recommended Action  No action is required.

RADIUS-6

Error Message  RADIUS-6-RADIUS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  RADIUS-6-RADIUS_MESSAGE: [chars]

Explanation  RADIUS Message

Recommended Action  No action is required.

RES_MGR Messages

This section contains the RES_MGR messages.

RES_MGR-2

Error Message  RES_MGR-2-RES_MGR_CRIT: RES_MGR Critical: [chars]

Explanation  RES_MGR generic critical condition

Recommended Action  No action is required.

RES_MGR-5

Error Message  RES_MGR-5-RES_MGR_DISABLED: RES_MGR Disabled

Explanation  RES_MGR Service Disabled

Recommended Action  No action is required.

Error Message  RES_MGR-5-RES_MGR_ENABLED: RES_MGR Enabled

Explanation  RES_MGR Service Enabled

Recommended Action  No action is required.

RIB Messages

This section contains the RIB messages.

RIB-0

Error Message  RIB-0-EMERG: [chars]

Explanation  Rib caused a system failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RIB-1

Error Message  RIB-1-ALERT: [chars]

Explanation  Rib caused failures in other services

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-1-LCM_FIB_ERR: RIB failed LC insertion

Explanation  RIB stopped linecard from coming online due to error received from FIB during merge operation

Recommended Action  Check RIB error logs to see error received from FIB

RIB-2

Error Message  RIB-2-CRIT: [chars]

Explanation  Rib encountered a catastrophic error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RIB-3

Error Message  RIB-3-ERR: [chars]

Explanation  Rib encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-FIB_EXIT: fib exited

Explanation  Fib had exited and may not continue operation

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-MISS_APPS: Missing response from service

Explanation  Service not responding to rib

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-3-NO_MEM: Out of memory

Explanation  Rib does not have enough memory to continue proper operation.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-SEND_FIB: Cannot talk to fib

Explanation  Rib to fib IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-SEND_SNMP: Cannot respond to snmp

Explanation  Rib to snmp IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-SEND_STANDBY: Cannot talk to standby rib

Explanation  Lost a rib-fib transaction log due to IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RIB-4

Error Message  RIB-4-CPU_HOG: Inactive or busy

Explanation  Either rib was not scheduled to run, or rib was busy, and rib did not service the message or timer queue for an extended period.

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-4-DUP_FIB: Duplicate response from fib

Explanation  Rib ignored duplicate response from fib

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-4-LATE_FIB: Late response from fib

Explanation  Rib ignored late response from fib

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-4-PC_LIMIT: PC number greater than 128 (ignored by RIB)

Explanation  Rib ignored pc > 128 for multicast

Recommended Action  Please use PC number < 128

Error Message  RIB-4-WARN: [chars]

Explanation  Rib ignored the unexpected condition

Recommended Action  Please perform 'debug rib all', then recreate the operation scenario, to find out more details.

RIB-5

Error Message  RIB-5-NOTE: [chars]

Explanation  Rib does not support this operation

Recommended Action  Please perform 'debug rib all', then recreate the operation scenario, to find out more details.

RIB-6

Error Message  RIB-6-INFO: [chars]

Explanation  Rib event occurred

Recommended Action  No action is required.

SAL Messages

This section contains the SAL messages.

SAL-5

Error Message  SAL-5-SAL_DISABLED: SAL Disabled

Explanation  SAL Service Disabled

Recommended Action  No action is required.

Error Message  SAL-5-SAL_ENABLED: SAL Enabled

Explanation  SAL Service nabled

Recommended Action  No action is required.

SCHEDULER Messages

This section contains the SCHEDULER messages.

SCHEDULER-3

Error Message  SCHEDULER-3-SCH_ERR: [chars]

Explanation  Scheduler error

Recommended Action  No action is required.

SCHEDULER-4

Error Message  SCHEDULER-4-SCH_WARN: [chars]

Explanation  Scheduler warning

Recommended Action  No action is required.

SCHEDULER-6

Error Message  SCHEDULER-6-SCH_MSG: [chars]

Explanation  Scheduler Message

Recommended Action  No action is required.

SECURITYD Messages

This section contains the SECURITYD messages.

SECURITYD-2

Error Message  SECURITYD-2-FIPS_BYPASS_SELF_TEST_STATUS: FIPS Bypass self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRNG_SELF_TEST_STATUS: FIPS CRNG self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRYPTO_SELF_TEST_STATUS: FIPS [chars] Crypto self-test status : [chars]

Explanation  Status of FIPS [chars] self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_ERROR_MSG: [chars]

Explanation  Fips post Error Message

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_MAINTENANCE: FIPS Test failed. Moving to maintenance mode

Explanation  FIPS Test failed. Moving to maintenance mode

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_TEST_FAILED: FIPS crypto-test failure : [dec]

Explanation  FIPS crytpo-test failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TESTS_STATUS: FIPS power-up self-test status: [chars]

Explanation  Status FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TEST_STATUS: FIPS [chars] power-up self-test status : [chars]

Explanation  Status of FIPS [chars] power-up self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_SELF_TEST_FAILED: FIPS self-test failure : [chars] : [chars]

Explanation  FIPS self-test failed [chars] for service [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-INVALID_ADMIN_PASSWD: User admin has NULL password. Copy r s aborted

Explanation  User admin has NULL password. Copy r s aborted

Recommended Action  No action is required.

SECURITYD-3

Error Message  SECURITYD-3-NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SECURITYD-6

Error Message  SECURITYD-6-ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  SECURITYD-6-CHANGE_PASSWD: changing passwd for [chars]

Explanation  Changing passwd for [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-DELETE_STALE_USER_ACCOUNT: deleting expired user account:[chars]

Explanation  Deleting expired user account of [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET_FAILED: Error when setting FIPS mode : [chars]

Explanation  FIPS mode failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET: FIPS mode is [chars] for service [chars]

Explanation  FIPS mode is changed [chars] [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_POST_INFO_MSG: [chars]

Explanation  Fips post Information Message

Recommended Action  No action is required.

SENSOR Messages

This section contains the SENSOR messages.

SENSOR-0

Error Message  SENSOR-0-DC3_SENSOR_MSG: [chars]

Explanation  SENSOR log emergency message

Recommended Action  No action is required.

SENSOR-3

Error Message  SENSOR-3-DC3_SENSOR_MSG1: [chars]

Explanation  SENSOR log message

Recommended Action  No action is required.

SFLOW Messages

This section contains the SFLOW messages.

SFLOW-5

Error Message  SFLOW-5-SFLOW_DISABLED: SFLOW Disabled

Explanation  SFLOW Service Disabled

Recommended Action  No action is required.

Error Message  SFLOW-5-SFLOW_ENABLED: SFLOW Enabled

Explanation  SFLOW Service nabled

Recommended Action  No action is required.

SKSD Messages

This section contains the SKSD messages.

SKSD-2

Error Message  SKSD-2-SKSD_CRYPT_SERVICE_CRIT: Encryption-Service: [chars]

Explanation  Encryption Service critical errors.

Recommended Action  No action is required.

SKSD-3

Error Message  SKSD-3-SKSD_CRYPT_SERVICE_ERR: Encryption-Service: [chars]

Explanation  Encryption Service errors.

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_SELFTEST: FIPS POST for [chars] [chars]

Explanation  FIPS Selftest Result

Recommended Action  No action is required.

SKSD-4

Error Message  SKSD-4-SKSD_CRYPT_SERVICE_WARN: Encryption-Service: [chars]

Explanation  Encryption Service warnings.

Recommended Action  No action is required.

SKSD-5

Error Message  SKSD-5-SKSD_CRYPT_SERVICE_NOTICE: Encryption Service: [chars]

Explanation  Encryption Service updates.

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_EXIT: Keystore Application Exiting: [chars]

Explanation  Keystore Program exiting

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_FUNC: Keystore Operation: [chars]

Explanation  Keystore Event upon a receiving a request

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_INIT: Hardware Keystore Init done

Explanation  Hardware Keystore Init completed

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_RESET: Hardware Reset :[chars]

Explanation  Hardware Reset

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW: Smartcard :[chars]

Explanation  Smartcard Presence

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_INIT: Keystore Application Init: [chars]

Explanation  Keystore Program Init

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_ADD: Key added

Explanation  Key added to keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_DELETE: Key deleted

Explanation  Key deleted from keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SUP_STATE: Supervisor card new state: [dec]

Explanation  Supervisor state change

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SW_INIT: Software Keystore Init done

Explanation  Software Keystore Init completed

Recommended Action  No action is required.

SKSD-6

Error Message  SKSD-6-SKSD_CRYPT_SERVICE_INFO: Encryption Service: [chars]

Explanation  Encryption Service informational updates.

Recommended Action  No action is required.

SME_CPP Messages

This section contains the SME_CPP messages.

SME_CPP-3

Error Message  SME_CPP-3-LOG_SME_DISK_ASL_FAILED: [chars]

Explanation  SME KMC disk asl token generation failed for the given device discovery info

Recommended Action  No action is required.

SME_CPP-5

Error Message  SME_CPP-5-SME_DISABLED: SME Disabled

Explanation  SME Service Disabled

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_ENABLED: SME Enabled

Explanation  SME Service nabled

Recommended Action  No action is required.

SNMPD Messages

This section contains the SNMPD messages.

SNMPD-1

Error Message  SNMPD-1-ALERT: SNMP log alert : [chars]

Explanation  SNMP log alert message.

Recommended Action  No action is required.

SNMPD-2

Error Message  SNMPD-2-CRITICAL: SNMP log critical : [chars]

Explanation  SNMP log critical message.

Recommended Action  No action is required.

SNMPD-3

Error Message  SNMPD-3-ERROR: SNMP log error : [chars]

Explanation  SNMP log error message.

Recommended Action  No action is required.

SNMPD-4

Error Message  SNMPD-4-WARNING: SNMP log warning : [chars]

Explanation  SNMP log warning message.

Recommended Action  No action is required.

SNMPD-5

Error Message  SNMPD-5-NOTIFICATION: SNMP log notification : [chars]

Explanation  SNMP log notification message.

Recommended Action  No action is required.

SNMPD-6

Error Message  SNMPD-6-INFO: SNMP log informational : [chars]

Explanation  SNMP log info message.

Recommended Action  No action is required.

SNMPD-7

Error Message  SNMPD-7-DEBUG: SNMP log debugging : [chars]

Explanation  SNMP log debug message.

Recommended Action  No action is required.

STATSCLIENT Messages

This section contains the STATSCLIENT messages.

STATSCLIENT-2

Error Message  STATSCLIENT-2-STATSCL_CRIT: [chars]

Explanation  StatsClient Critical Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STATSCLIENT-3

Error Message  STATSCLIENT-3-STATSCL_ERR2: [chars] [dec] [dec]

Explanation  StatsClient Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STATSCLIENT-3-STATSCL_ERR: [chars] [dec]

Explanation  StatsClient Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STATSCLIENT-6

Error Message  STATSCLIENT-6-STATSCL_INFO: [chars]

Explanation  StatsClient Flow Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STATSINFRA Messages

This section contains the STATSINFRA messages.

STATSINFRA-3

Error Message  STATSINFRA-3-STATS_INFRA_CRIT: [chars]

Explanation  StatsInfra Critical Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STATSINFRA-3-STATS_INFRA_ERR: [chars]

Explanation  StatsInfra Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STATSINFRA-3-STATS_INFRA_INFO: [chars]

Explanation  StatsInfra Flow Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STP Messages

This section contains the STP messages.

STP-2

Error Message  STP-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

TACACS Messages

This section contains the TACACS messages.

TACACS-3

Error Message  TACACS-3-TACACS_ERROR_MESSAGE: [chars]

Explanation  TACACS+ Error Message

Recommended Action  No action is required.

TACACS-4

Error Message  TACACS-4-TACACS_WARNING: [chars]

Explanation  TACACS+ warning

Recommended Action  No action is required.

TACACS-5

Error Message  TACACS-5-TACACS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Tacacs+ server monitor status change

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_NOTIFICATION: [chars]

Explanation  TACACS+ notification

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Tacacs+ server status change

Recommended Action  No action is required.

TACACS-6

Error Message  TACACS-6-TACACS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  TACACS-6-TACACS_MESSAGE: [chars]

Explanation  TACACS+ Message

Recommended Action  No action is required.

TAHUSD Messages

This section contains the TAHUSD messages.

TAHUSD-2

Error Message  TAHUSD-2-TAHUSD_SYSLOG_PFCWD_QUEUE_RESTORED: [chars]

Explanation  NO DROP Queue Restored due to PFC WatchDog timer expiring message

Recommended Action  No action is required.

Error Message  TAHUSD-2-TAHUSD_SYSLOG_PFCWD_QUEUE_SHUTDOWN: [chars]

Explanation  Queue Shutdown due to PFC WatchDog timer expiring as a result of NO DROP Queue stuck message

Recommended Action  No action is required.

TAHUSD-3

Error Message  TAHUSD-3-TAHUSD_SPEED_MSG: [chars]

Explanation  TAHUSD Error: same port speed must be set within a 4-port group

Recommended Action  No action is required.

TAHUSD-6

Error Message  TAHUSD-6-TAHUSD_SYSLOG_INFO: [chars]

Explanation  Tahoe log message

Recommended Action  No action is required.

TBIRD_CMN_USD Messages

This section contains the TBIRD_CMN_USD messages.

TBIRD_CMN_USD-6

Error Message  TBIRD_CMN_USD-6-TBIRD_CMN_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

TELEMETRY Messages

This section contains the TELEMETRY messages.

TELEMETRY-1

Error Message  TELEMETRY-1-ALERT: [chars]

Explanation  Alert message

Recommended Action  ACTION_NONE

TELEMETRY-2

Error Message  TELEMETRY-2-CRITICAL: [chars]

Explanation  Critical message

Recommended Action  ACTION_NONE

TELEMETRY-3

Error Message  TELEMETRY-3-ERROR: [chars]

Explanation  Error message

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-INITERR: TM initialized [chars] failed

Explanation  Initialization failures condition

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-TRANSPORT_SEND_ERROR: [chars] send to [chars] failed. ([chars])

Explanation  Telemetry transport send failure.

Recommended Action  Make sure receiver is up and running.

TELEMETRY-4

Error Message  TELEMETRY-4-DISABLE_DONE: [chars]

Explanation  Telemetry is now disabled. You can re-enable the feature if needed.

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-4-DISABLING_FEATURE: [chars]

Explanation  Telemetry is being disabled. Please wait until process terminates.

Recommended Action  Don't re-enable telemetry until the process exits.

Error Message  TELEMETRY-4-TRANSPORT_RECONFIGURE: [chars]

Explanation  A configuration change requires reconfiguring destination groups to take effect.

Recommended Action  Reconfigure telemetry destination groups.

Error Message  TELEMETRY-4-WARNING: [chars]

Explanation  Warning message

Recommended Action  ACTION_NONE

TELEMETRY-5

Error Message  TELEMETRY-5-NOTICE: [chars]

Explanation  Normal bug significant condition

Recommended Action  ACTION_NONE

TELEMETRY-6

Error Message  TELEMETRY-6-INFO: [chars]

Explanation  Informational message

Recommended Action  ACTION_NONE

TELEMETRY-7

Error Message  TELEMETRY-7-DEBUG: [chars]

Explanation  Debug message

Recommended Action  ACTION_NONE

TUNNEL Messages

This section contains the TUNNEL messages.

TUNNEL-2

Error Message  TUNNEL-2-FEATURE_ENABLE_FAILED: failed to enable feature tunnel, reason [chars] ([hex])

Explanation  Failed to enable feature tunnel, reason [char] ([int])

Recommended Action  Check the failure reason and take appropriate action to fix the failure. if unable to fix, please capture "show tech-support tunnel"

Error Message  TUNNEL-2-TUNNEL_INTF_STATE_UPDATE: Interface [chars] is down reason ([chars])

Explanation  Interface [char] is down reason [char]

Recommended Action  No action is required.

Error Message  TUNNEL-2-UNSUPPORTED_TUNNEL_TYPE: Failed to create interface [chars] due to unsupported-tunnel type

Explanation  Current tunnel type is not supported in this release

Recommended Action  No action is required.

TUNNEL-3

Error Message  TUNNEL-3-HW_PROGRAMMING_FAILED: for [chars], reason [chars]

Explanation  Hardware programming failed for tunnel [num] interface

Recommended Action  Try 'shutdown' and 'no shutdown' under tunnel interface submode after sometime. if still tunnel interface doesn't come up capture show tech-support tunnel to identify the issue

TUNNEL-5

Error Message  TUNNEL-5-IF_CLEAR_COUNTER: Interface [chars] counters is cleared

Explanation  Interface [char] counters is cleared

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_CREATED: Interface [chars] is created

Explanation  Interface [char] is created

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_CREATE_FAILED: Interface [chars] creation failed due to [[hex]] [chars]

Explanation  Interface [char] is creation failed due to [int] [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_DELETED: Interface [chars] is deleted

Explanation  Interface [char] is deleted

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_STATE_UPDATE: Interface [chars] is [chars] reason [chars]

Explanation  Interface [char] is [char] reason [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-PPF_SESSION_FAILED: session id %llx type [chars] for [chars] failed error [hex] [chars]

Explanation  Session id [int] type [char] for [char] failed error [int] [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-TM_DISABLED: Tunnel Disabled

Explanation  Tunnel Service Disabled

Recommended Action  No action is required.

Error Message  TUNNEL-5-TM_ENABLED: Tunnel Enabled

Explanation  Tunnel Service Enabled

Recommended Action  No action is required.

TUNNEL-7

Error Message  TUNNEL-7-TM_INFO: [chars]

Explanation  Tunnel Service info

Recommended Action  No action is required.

U2RIB Messages

This section contains the U2RIB messages.

U2RIB-5

Error Message  U2RIB-5-U2RIB_DISABLED: U2RIB Disabled

Explanation  U2RIB Service Disabled

Recommended Action  No action is required.

Error Message  U2RIB-5-U2RIB_ENABLED: U2RIB Enabled

Explanation  U2RIB Service enabled

Recommended Action  No action is required.

UDLD Messages

This section contains the UDLD messages.

UDLD-5

Error Message  UDLD-5-UDLD_AGGRESSIVE: UDLD Aggressive

Explanation  UDLD Service Aggressive

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_DISABLED: UDLD Disabled

Explanation  UDLD Service Disabled

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_ENABLED: UDLD Enabled

Explanation  UDLD Service Enabled

Recommended Action  No action is required.

UFDM Messages

This section contains the UFDM messages.

UFDM-5

Error Message  UFDM-5-DNLD_TIMEDOUT: Download timer expired: [chars]

Explanation  UFDM download timer expired. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

USDBA Messages

This section contains the USDBA messages.

USDBA-6

Error Message  USDBA-6-USDBA_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

VLAN_MGR Messages

This section contains the VLAN_MGR messages.

VLAN_MGR-2

Error Message  VLAN_MGR-2-CRITICAL_MSG: [chars]

Explanation  VLAN Manager Critical Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-FABRIC_DYNAMIC_CORE_VLAN_RANGE_REMOVED: Fabric dynamic and core VLAN ranges removed. Please delete VLANs [chars] in the ranges

Explanation  VLAN Manager Core VLAN Range Removal Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_DELETE_FAILED_RSN_BD_EXIST: VTP request to delete VLAN(s) [chars] could not be processed. Bridge Domains exist for VLANs [chars]

Explanation  VLAN delete failed since Bridge Domains Exist

Recommended Action  No action is required.

VLAN_MGR-3

Error Message  VLAN_MGR-3-ERROR_MSG: [chars]

Explanation  VLAN manager error

Recommended Action  No action is required.

VLAN_MGR-4

Error Message  VLAN_MGR-4-WARN_MSG: [chars]

Explanation  VLAN manager warning

Recommended Action  No action is required.

VLAN_MGR-5

Error Message  VLAN_MGR-5-NOTIF_MSG: [chars]

Explanation  VLAN Manager Notification Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-RESERVED_VLAN_RANGE_CHANGED: New Reserved VLAN Range Configured From VLAN [dec] to VLAN [dec]

Explanation  VLAN Manager Reserved VLAN Reconfiguration Message

Recommended Action  No action is required.

VLAN_MGR-6

Error Message  VLAN_MGR-6-INFO_MSG: [chars]

Explanation  VLAN manager info

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_CREATED: VLAN [dec], created

Explanation  VLAN created

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATEFULL_RESTART: VLAN Manager statefull restart

Explanation  VLAN Manager statefull restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATELESS_RESTART: VLAN Manager stateless restart

Explanation  VLAN Manager stateless restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_OPER_STATUS_CHG: VLAN [dec], status changed to [chars]

Explanation  VLAN operational state change

Recommended Action  No action is required.

VMTRACKER Messages

This section contains the VMTRACKER messages.

VMTRACKER-2

Error Message  VMTRACKER-2-VMTRACKER_CONNECTION_ISSUE: Problem with connection: [chars]

Explanation  Connection problem

Recommended Action  Problem with connection. Try "no connect"; "connect"

Error Message  VMTRACKER-2-VMTRACKER_HMM_REGISTRATION_FAIL: [chars]

Explanation  HMM Registration error

Recommended Action  No action is required.

Error Message  VMTRACKER-2-VMTRACKER_TRUNK_MODE_WARN: Interface [chars] is used by VMTracker. Changing it back to TRUNK mode.

Explanation  Port trunk mode warning message

Recommended Action  Do not change port mode when it is used by VMTracker. To change the mode, disable VMTracker on the interface first.

VMTRACKER-3

Error Message  VMTRACKER-3-VMTRACKER_SOAP_ERR: Soap Err:[chars]

Explanation  Soap Call failure message

Recommended Action  No action is required.

VMTRACKER-4

Error Message  VMTRACKER-4-VMTRACKER_HMM_TRIGGER_FAIL: auto-config trigger failure, vlan [dec] [chars]

Explanation  HMM Request error

Recommended Action  No action is required.

Error Message  VMTRACKER-4-VMTRACKER_SOAP_WARN: Soap Warn:[chars]

Explanation  Soap Call warning message

Recommended Action  No action is required.

VMTRACKER-5

Error Message  VMTRACKER-5-VMTRACKER_CONFIG_VLAN: [chars]

Explanation  Vlan configuration message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_CREATE_VLAN: Vlan Created: [chars]

Explanation  Vlan addition message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_DISABLED: Service Disabled

Explanation  Service Disabled

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_ENABLED: Service Enabled

Explanation  Service enabled

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_MESSAGE: [chars]

Explanation  Generic message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_REMOVE_VLAN: Vlan Removed: [chars]

Explanation  Vlan deletion message

Recommended Action  No action is required.

VNSEGMENT_MGR Messages

This section contains the VNSEGMENT_MGR messages.

VNSEGMENT_MGR-2

Error Message  VNSEGMENT_MGR-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

VNTAGC Messages

This section contains the VNTAGC messages.

VNTAGC-5

Error Message  VNTAGC-5-VNTAGC_GENERIC_SYSLOG: [chars]

Explanation  VNTag Manager Client Generic Syslog

Recommended Action  No action is required.

VNTAG_MGR Messages

This section contains the VNTAG_MGR messages.

VNTAG_MGR-2

Error Message  VNTAG_MGR-2-VLAN_DVIF_ALLOC_FAILURE: DVIF allocation failure for VLANs [chars]. Reason: [chars].

Explanation  Flood DVIF allocation failure for VLANs.

Recommended Action  No action is required.

VNTAG_MGR-5

Error Message  VNTAG_MGR-5-VNTAG_MGR_DISABLED: VNTag Manager Disabled

Explanation  VNTag Manager Service Disabled

Recommended Action  No action is required.

Error Message  VNTAG_MGR-5-VNTAG_MGR_ENABLED: VNTag Manager Enabled

Explanation  VNTag Manager Service Enabled

Recommended Action  No action is required.

Error Message  VNTAG_MGR-5-VNTAG_MGR_GENERIC_SYSLOG: [chars]

Explanation  VNTag Manager Generic Syslog

Recommended Action  No action is required.

VPC Messages

This section contains the VPC messages.

VPC-2

Error Message  VPC-2-L3_VPC_UNEQUAL_WEIGHT: Layer3 peer-router is enabled. Please make sure both vPC peers have the same L3 routing configuration

Explanation  Unequal weight routing is not supported when layer3 peer-router is enabled

Recommended Action  No action is required.

Error Message  VPC-2-PCINFO_MISMATCH: PCINFO mismatching on if_index [hex]

Explanation  PCINFO mismatching

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain [dec], VPC peer keep-alive receive has failed

Explanation  Peer keep-alive receive failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_SEND_FAIL: In domain [dec], VPC peer keep-alive send has failed

Explanation  Peer keep-alive send failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_VPC_RESP_TIMEDOUT: Failed to receive response from peer for vPC: [dec]

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-2-PHY_PORT_VPC_CFG_WARNING: phy-port vPC: [dec] is not suggested to be configured with M-series peer-link

Explanation  Peer-link on M-series LC is not supported for phy-port vPC

Recommended Action  No action is required.

Error Message  VPC-2-RECV_ES_CONFLICT: Received conflict for ES: [dec] with system-id: [chars]

Explanation  Received conflict for ES. Bring down all vpcs.

Recommended Action  No action is required.

Error Message  VPC-2-TRACK_INTFS_DOWN: In domain [dec], vPC tracked interfaces down, suspending all vPCs and keep-alive

Explanation  VPC tracked object down

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ADD_L3_BKUP_BD_TO_PEER_GW_EXCLUDE_LIST: Exclude L3 backup routing bridge-domain from vpc peer-gateway config.

Explanation  Triggered when peer-link is F1 and peer-gateway is configured without exclude-bridge-domain list.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ADD_L3_BKUP_VLAN_TO_PEER_GW_EXCLUDE_LIST: Exclude L3 backup routing VLAN from vpc peer-gateway config.

Explanation  Triggered when peer-link is F1 and peer-gateway is configured without exclude-vlan / exclude-bridge-domain list.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_BDI_EXCLUDE: vPC [dec] has up bridge-domain [chars] which are excluded from suspension on dual-active

Explanation  VPC track object BDI deconfigured

Recommended Action  No action is required.

Error Message  VPC-2-VPC_CORE_PORT_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] in Fabric Path Port Mode - vPC+ Fabric Path switch ID not configured

Explanation  VPC+ Failed to bringup peer-link - switch-ID not configured

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_LID_ALLOC: Failed to negotiate common LID between vPC peers.

Explanation  Failed to find common lid.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_PEERLINK_DOWN: Peer-link bringup event sequence failed. Bringing down peer-link.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_PEER_LINK_OPERATION_FAILED: Peer-link operation failed due to SAP [dec].

Explanation  Triggered in mcecm_cfg_es_failed when peer-link bringup fails.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_GRACEFUL_SUSP_ALL_VPC: Operational graceful type-1 check state changed, reinitiating all vPCs

Explanation  Graceful state change,reinit vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_END: Peer vPC switch ISSU end, unlocking configuration

Explanation  Peer vPC switch issu end

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_INCOMPAT_APP_PARAM: ISSU operation resulted in incompatible parameters

Explanation  Incompatible parameters were not handled for some apps across vPC peers

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_START: Peer vPC switch ISSU start, locking configuration

Explanation  Peer vPC switch issu start

Recommended Action  No action is required.

Error Message  VPC-2-VPC_LC_FAIL: LC [dec] does not support required hardware for vPC; run 'show vdc membership status' for port status

Explanation  Lc insertion failed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_NON_DEF_LID: vPC+ negotiated non-default local id. Flapping orphan edge ports recommended.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PEER_LINK_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] - port [chars] is not configured as a Fabric Path port

Explanation  VPC+ Failed to bringup Peer-link - not in Fabric Path mode

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PSS_ERROR: [chars], 0x([hex]) present in VPC DB but not is IM DB

Explanation  Triggered when vpc DB and IM SDB are inconsistent

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_CLEANUP_FAILURE_NEED_REINIT_MCT: vPC role change cleanup has encountered a failure. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_FAILURE_NEED_REINIT_MCT: vPC role change has encountered a failure, can not clean up. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_MCT_CMPT_FAIL: Can't perform role change since there are type-1 check failures on peer-link at peer side.

Explanation  VPC RC failure, due to cmpt failed on peer-link at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_PEER_CMPT_FAIL: Can't perform role change since there are vpc legs with type-1 check failure at peer side.

Explanation  VPC RC failure, due to cmpt failed vpcs at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_UNFINISHED_RC: Can't perform role change since there is another unfinished role change request on either local or peer side. Please wait until it is finished.

Explanation  VPC RC failure, due to an unfinished RC

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SDB_UPD_FAIL: Failed to update shared database. De-config and config vPC [dec] to be consistent.

Explanation  SDB update failed while updating

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SHUTDOWN: vPC shutdown status is [chars]

Explanation  VPC shutdown status change

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SUSP_ALL_VPC: Peer-link going down, suspending all vPCs on secondary

Explanation  Peer link down suspend vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SVI_EXCLUDE: vPC [dec] has up vlans [chars] which are excluded from suspension on dual-active

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

VPC-3

Error Message  VPC-3-FEX_AA_NO_SUPPPORT: FEX AA not supported

Explanation  FEX AA not supported

Recommended Action  No action is required.

Error Message  VPC-3-GLOBAL_CONSISTENCY_FAILED: In domain [dec], global configuration is not consistent ([chars])

Explanation  Global compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-INTF_CONSISTENCY_FAILED: In domain [dec], VPC [dec] configuration is not TYPE-1 consistent ([chars])

Explanation  MCEC compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-PEER_UNREACHABLE: Remote Switch Unreachable

Explanation  Peer unreachable

Recommended Action  No action is required.

Error Message  VPC-3-PEER_VPC_BRINGUP_FAILED: Peer vPC [dec] bringup failed ([chars])

Explanation  Peer vPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VDC_MISMATCH: VDC type mismatch on the vpc peer

Explanation  VDC type mismatch on the vpc peer

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_ASSERTION_FAILED: [chars]

Explanation  VPCM has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INIT_FAIL: vPC Manager Initialization Failed ([chars])

Explanation  VPCM Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INTERNAL_ERR: [chars]

Explanation  VPCM encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_MTS_ERR: [chars]

Explanation  VPCM encountered an MTS error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPC_BRINGUP_FAILED: vPC [dec] bringup failed ([chars])

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_BRINGUP_FAILED: vPC peer-link bringup failed ([chars])

Explanation  VPC Peer-link bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_DOWN: VPC Peer-link is down

Explanation  VPC Peer link is down

Recommended Action  No action is required.

Error Message  VPC-3-VPC_RC_FAILURE_NO_NEED_REINIT_MCT: vPC role change has encountered a failure, will clean up, error: [chars]

Explanation  VPC RC failure, no need to reinit peer-link

Recommended Action  No action is required.

VPC-4

Error Message  VPC-4-FTAG_UPD_PORT_DWN: Warning: receive FTAG update while port is going down

Explanation  Receive FTAG update while port is going down

Recommended Action  No action is required.

Error Message  VPC-4-OOB_DWN_BUT_WAS_ALIVE: Warning: Bring up peer-link when peer keep-alive is down

Explanation  Try to bring up MCT when OOB fails.

Recommended Action  No action is required.

Error Message  VPC-4-PEER_VPC_DELETED: Peer vPC [dec] deleted

Explanation  Peer vPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CONSISTENCY_NEW_VLAN_FAIL: Global Consistency check for vPC failed for new vlans

Explanation  Global Consistency check for vPC failed for new vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DELETED: vPC [dec] is deleted

Explanation  VPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_LC_UPG_OVER_DELIVERY_FAIL: Failed to deliver LC upgrade to vPC peer

Explanation  Failed to deliver LC upgrade to peer

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_LINK_DELETED: vPC Peer-link deleted. This will bringdown all vPC interfaces

Explanation  VPC Peer-link configuration removed

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_ROLE_CHANGE: In domain [dec], VPC peer role status has changed to [chars]

Explanation  VPC Peer role status changed to (Primary/Secondary

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PER_VLAN_CONSISTENCY_FAILED: Global consistency check for vPC failed for few vlans

Explanation  Global Consistency check for vPC failed for few vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_REINITIALIZED: Reinitializing vpcs assuming peer dead

Explanation  Initializing vpcs assuming peer dead

Recommended Action  No action is required.

Error Message  VPC-4-VPC_ROLE_CHANGE: In domain [dec], VPC role status has changed to [chars]

Explanation  VPC role status changed to (Primary/Secondary

Recommended Action  No action is required.

VPC-5

Error Message  VPC-5-GLOBAL_CONSISTENCY_SUCCESS: In domain [dec], global configuration is consistent

Explanation  Global compat-check passed

Recommended Action  No action is required.

Error Message  VPC-5-INTF_CONSISTENCY_SUCCESS: In domain [dec], vPC [dec] configuration is TYPE-1 consistent

Explanation  VPC configuration is consistent

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_RESUME: Orphan-port [chars] is removed from suspended

Explanation  Orphan-port is removed from suspended due to peer-link up or VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_SUSPEND: Orphan-port [chars] is suspended

Explanation  Orphan-port is suspended due to peer-link down or no VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_INT_LATEST: In domain [dec], VPC peer-keepalive received on interface [chars]

Explanation  VPC peer-keepalive receive interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_SUCCESS: In domain [dec], vPC peer keep-alive receive is successful

Explanation  Peer keep-alive receive successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_INT_LATEST: In domain [dec], VPC peer-keepalive sent on interface [chars]

Explanation  VPC peer-keepalive send interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_SUCCESS: In domain [dec], vPC peer keep-alive send is successful

Explanation  Peer keep-alive send successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_STATUS: In domain [dec], peer keep-alive status changed to [chars]

Explanation  Peer keep-alive (oob) status is changed to

Recommended Action  Peer-not-alive

Error Message  VPC-5-ROLE_PRIORITY_CFGD: In domain [dec], vPC role priority changed to [dec]

Explanation  Role priority configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_MAC_CFGD: In domain [dec], vPC system-mac changed to [chars]

Explanation  System mac configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_PRIO_CFGD: In domain [dec], vPC system priority changed to [dec]

Explanation  System priority changed

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_DISABLED: vPC Manager disabled

Explanation  VPCM Service Disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_ENABLED: vPC Manager enabled

Explanation  VPCM Service Enabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_START: vPC restore, delay interface-vlan bringup timer started

Explanation  VPC delay interface-vlan restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DOWN: vPC [dec] is down ([chars])

Explanation  VPC is down (reason)

Recommended Action  No action is required.

Error Message  VPC-5-VPC_OPERATIONAL_L3_ROUTING: VPC operational layer3 peer-router is [chars]

Explanation  VPC operational layer3 peer-router enabled or disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_PEER_LINK_UP: vPC Peer-link is up

Explanation  VPC Peer-link is up

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_EXPIRED: vPC restore timer expired, reinitiating vPCs

Explanation  VPC restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_START: vPC restore timer started to reinit vPCs

Explanation  VPC restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_ROLE_PREMPT: In domain [dec], vPC role pre-emption triggered

Explanation  VPC preemption triggered

Recommended Action  No action is required.

Error Message  VPC-5-VPC_SCALE_LIMIT: No port-channel limit configuration is [chars]

Explanation  No port-channel limit configuration is changed

Recommended Action  No action is required.

Error Message  VPC-5-VPC_UP: vPC [dec] is up

Explanation  MCEC is UP

Recommended Action  No action is required.

VPC-6

Error Message  VPC-6-ADD_SRC_INDX_ADD_FAILED: Adding src index [hex] to VDC failed

Explanation  Add src index failed

Recommended Action  No action is required.

Error Message  VPC-6-CFS_APP_SEQ_PL_UP_SENT: Sent CFS sync trigger on peer-link coming up to SAP [dec].

Explanation  Sent trigger to SAP to begin sync

Recommended Action  No action is required.

Error Message  VPC-6-DELETE_SRC_INDX_ADD_FAILED: Deleting src index [hex] to VDC failed

Explanation  Delete src index failed

Recommended Action  No action is required.

Error Message  VPC-6-PEER_LOCK_FAILED: Locking failed on peer switch - Aborting upgrade!!

Explanation  Locking failed on peer switch

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD_VLANS_CHANGED: Peer vPC [dec] configured vlans changed

Explanation  Remote MCEC configured vlans changed

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD: peer vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_DOWN: Peer vPC [dec] is down ([chars])

Explanation  Peer vPC is down

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_UP: Peer vPC [dec] is up

Explanation  Peer vPC is up

Recommended Action  No action is required.

Error Message  VPC-6-STATS_CLEARED: vPC Statistics Cleared

Explanation  VPC statistics cleared

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_CONFIGURED: In domain [dec], track object configured [dec]

Explanation  VPC track object configured

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_DELETED: In domain [dec], track object deleted

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

Error Message  VPC-6-TYPE1_PARAM_CHANGED: TYPE-1 parameters changed: [chars]

Explanation  Type-1 Parameters Changed

Recommended Action  No action is required.

Error Message  VPC-6-VPCM_INTERNAL_INFO: [chars]

Explanation  VPCM got an internal info [chars]

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ALLOWED_VLAN_CHANGED: vPC [dec] operational vlans changed

Explanation  Operational vlans changed on vPC

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CFGD: vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_CHECK_BYPASS: Bypassing consistency check for vPC: [dec]

Explanation  Bypassing consistency check for vpcs

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_NEW_VLAN_PASS: Global Consistency check for vPC passed for new vlans

Explanation  Global Consistency check for vPC passed for new vlans

Recommended Action  No action is required.

Error Message  VPC-6-VPC_DOMAIN_ID_CFGD: vPC domain-id configured to [dec]

Explanation  VPC domain-id configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_EGRESS_DF_STATE_CHANGED: Egress designated forwarder state changed from [chars] to [chars] for vPC [dec].

Explanation  DF state changed for some vPC.

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_CFGD: Fabricpath switch ID [dec] configured

Explanation  Fabricpath switch ID configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_REMOVED: Fabricpath switch ID [dec] removed

Explanation  Fabricpath switch ID removed

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PEER_LINK_CFGD: vPC peer-link is configured

Explanation  VPC Peer-link is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PER_VLAN_CONSISTENCY_PASSED: Global Consistency check for vPC passed for all vlans

Explanation  Global Consistency check for vPC passed for all vlans

Recommended Action  No action is required.

VSAN Messages

This section contains the VSAN messages.

VSAN-6

Error Message  VSAN-6-REMOVED: Removed VSAN:[dec]

Explanation  Removed VSAN with ID [dec].

Recommended Action  No action is required.

VTP Messages

This section contains the VTP messages.

VTP-0

Error Message  VTP-0-EMERGENCY_MSG: [chars]

Explanation  VTP Emergency Message

Recommended Action  Capture show tech-support vtp

VTP-1

Error Message  VTP-1-ALERT_MSG: [chars]

Explanation  VTP Alert Message

Recommended Action  Capture show tech-support vtp

VTP-2

Error Message  VTP-2-CRITICAL_MSG: [chars]

Explanation  VTP Critical Message

Recommended Action  No action is required.

Error Message  VTP-2-VTP_MODE_OFF_LONG_VLAN_NAME_EXIST: VTP Mode changed to off as long vlan name configuration is enabled

Explanation  By default, VTP feature comes up in Server mode. long vlan name can only be enabled in VTP transparent/off mode As long vlan name is already enabled, VTP mode is changed to off.

Recommended Action  No action is required.

Error Message  VTP-2-VTP_MODE_OFF_PVLAN_EXIST: VTP Mode changed to off as Private VLAN configuration exists

Explanation  By default, VTP feature comes up in Server mode. Private Vlans can only operate in VTP transparent/off mode As Private Vlan configuration already exist, VTP mode is changed to off.

Recommended Action  No action is required.

Error Message  VTP-2-VTP_MODE_OFF_RESERVED_VLAN_EXIST: VTP Mode changed to off as reserved vlan configuration exists

Explanation  By default, VTP feature comes up in Server mode. reserved vlans can only operate in VTP transparent/off mode As Reserved Vlan configuration already exist, VTP mode is changed to off.

Recommended Action  No action is required.

VTP-3

Error Message  VTP-3-ERROR_MSG: [chars]

Explanation  VTP Error Message

Recommended Action  No action is required.

VTP-4

Error Message  VTP-4-VLAN_CREATE_FAIL: Failed to create VLANs [chars]: [chars]

Explanation  The VLANs specified in the error message could not be created. The VLAN manager called an VLAN database routine to create one or more VLANs, but the Vlan Manager failed the VLAN creation requests.

Recommended Action  Collect show tech-support

Error Message  VTP-4-VTP_BAD_VLAN_CONFIGURATION_FILE_VERSION: VLAN configuration file contained unknown file version: [dec]

Explanation  The VLAN configuration file read by the VLAN manager contained an unrecognized file version number. (This may indicate an attempt to regress to an older version of the VLAN manager software.)

Recommended Action  LOG_STD_ACTION

Error Message  VTP-4-VTP_BAD_VLAN_CONFIGURATION_FILE: Vlan configuration file contained incorrect verification word: [hex]

Explanation  The VLAN configuration file read by the VLAN manager did not begin with correct value which would indicate a valid VLAN configuration file. Thus, it has been rejected.

Recommended Action  Collect show tech-support

Error Message  VTP-4-VTP_BAD_VLAN_DOMAIN_NAME_LENGTH: VLAN configuration file contained incorrect domain name length: [dec]

Explanation  The VLAN configuration file read by the VLAN manager did not contain a valid domain name length. Thus, it has been rejected.

Recommended Action  Please provision VTP domain name again

Error Message  VTP-4-VTP_BAD_VLAN_PASSWORD_LENGTH: VLAN configuration file contained incorrect VTP password length: [dec]

Explanation  The VLAN configuration file read by the VLAN manager did not contain a valid VTP password length. Thus, it has been rejected.

Recommended Action  Please provision VTP password again

Error Message  VTP-4-VTP_INVALID_DATABASE_DATA: VTP received bad data

Explanation  Invalid data was received by VTP process

Recommended Action  Collect show tech-support

Error Message  VTP-4-VTP_PROTOCOL_ERROR: VTP protocol code internal error: [chars]

Explanation  VTP protocol code encountered an unexpected error will processing configuration request, packet, or timer expiration.

Recommended Action  Collect show tech-support

Error Message  VTP-4-WARN_MSG: [chars]

Explanation  VTP Warning Message

Recommended Action  No action is required.

VTP-5

Error Message  VTP-5-NOTIF_MSG: [chars]

Explanation  VTP Notification Message

Recommended Action  No action is required.

VTP-6

Error Message  VTP-6-INFO_MSG: [chars]

Explanation  VTP Informational Message

Recommended Action  No action is required.

Error Message  VTP-6-VTP_DOMAIN_NAME_CHG: VTP domain name changed to [chars].

Explanation  The VTP domain name was changed through configuration to the name specified in the message. A management domain is the naming scope of a VLAN name. Each VLAN has a name that is unique within the management domain.

Recommended Action  No action is required.

Error Message  VTP-6-VTP_MODE_CHANGE: VLAN manager changing device mode from [chars] to [chars].

Explanation  Some switch devices must automatically change VTP device modes upon receipt of a VLAN configuration database containing more than a set number of VLANs, depending on the device. This message indicates that such a spontaneous conversion has occurred, what the previous mode was, and what the current mode is.

Recommended Action  No action is required.

Error Message  VTP-6-VTP_PRUNING_CHANGE: VTP Operational Pruning [chars].

Explanation  VTP operational pruning changed. This can happen due to admin pruning change, VTP mode changes or VTP config propagation. 'show vtp status' output can be looked up to find the reason for this change.

Recommended Action  Check 'show vtp status' output to find the reason for this change. No action is required.

VTP-7

Error Message  VTP-7-DEBUG_MSG: [chars]

Explanation  Association Manager Debug Message

Recommended Action  No action is required.

WWN Messages

This section contains the WWN messages.

WWN-2

Error Message  WWN-2-GENERAL_ERROR: [chars]

Explanation  The WWN Manager has encountered an critical error. The description of error is [str.].

Recommended Action  No action is required.

Error Message  WWN-2-PSS_ERROR: [chars]

Explanation  The WWN Manager encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

WWN-3

Error Message  WWN-3-STARTUP_COPY_TO_RUNNING_FAILED: [chars]

Explanation  Could not snapshot Startup-Config PSS to Running-Config. The description of error is [str.].

Recommended Action  No action is required.

WWN-5

Error Message  WWN-5-VSAN_WWN_CHANGE: [chars]

Explanation  VSAN-WWN created or deleted. The description of error is [str.].

Recommended Action  No action is required.

WWN-6

Error Message  WWN-6-SEC_MAC_UPDATED: MAC=[chars] Range=[dec]

Explanation  The WWN Manager had updated the Secondary MAC address with MAC address [char] and range [dec]. This update was initiated from a management entity.

Recommended Action  No action is required.

XMLSA Messages

This section contains the XMLSA messages.

XMLSA-2

Error Message  XMLSA-2-CANDIDATE_WRITE_FAIL: Netconf session id:[dec],candidate config has no space left

Explanation  No space left in candidate configuration of the netconf session.

Recommended Action  Please send the commit or discard request for the outstanding config.

Error Message  XMLSA-2-VSH_ERR: XML sub agent vsh cmd error...: [chars]

Explanation  XML sub agent vsh cmd error.

Recommended Action  No action is required.

XMLSA-5

Error Message  XMLSA-5-RPC_ERROR: Netconf session id:[dec], operation:[chars], status:FAILED, reason:[chars]

Explanation  Netconf operation has failed.

Recommended Action  No action is required.

Error Message  XMLSA-5-RPC_OK: Netconf session id:[dec], operation:[chars], status:SUCCESS

Explanation  Netconf operation is successful.

Recommended Action  No action is required.

ZONE Messages

This section contains the ZONE messages.

ZONE-2

Error Message  ZONE-2-ZS_INIT_FAILED: [chars]

Explanation  Zone Server initialization failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_MTS_OPER_FAILED: MTS [chars] operation failed : [chars]

Explanation  Zone Server MTS [chars] operation failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_SHARED_DB_INIT_FAILED: [chars]

Explanation  Zone Server shared DB initialization failed : [chars].

Recommended Action  No action is required.

ZONE-3

Error Message  ZONE-3-ZS_MGMT_SEC_SDB_ERR: [chars] : [chars]

Explanation  FC CT Mgmt Security shared db operation : [chars] : [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ZONE-4

Error Message  ZONE-4-ZS_DB_WARNING: [chars]

Explanation  Database operation warning: [chars].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_FC2_OPER_FAILED: FC2 [chars] operation failed : [chars]

Explanation  Zone Server FC2 [chars] operation failed : [chars].

Recommended Action  No action is required.

ZONE-6

Error Message  ZONE-6-ZS_FC2_OPER_INFO: FC2 [chars] operation failed : [chars]

Explanation  Zone Server FC2 [chars] operation failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-6-ZS_INIT_WARNING: [chars]

Explanation  Warning during Zone Server Initialization: [chars].

Recommended Action  No action is required.

Error Message  ZONE-6-ZS_UNKNOWN_LIC_FEATURE: [chars]

Explanation  Zone Server received an event for an known licensing feature: [chars].

Recommended Action  No action is required.