Chapter 1. READ ME FIRST

Chapter 2. A Show Commands

show (eigrp)

show aaa accounting

show aaa authentication

show aaa authentication login

show aaa authentication login ascii-authentication

show aaa authentication login error-enable

show aaa authentication login password-aging

show aaa authorization

show aaa groups

show aaa user default-role

show access-lists

show accounting log

show accounting log all

show accounting log last-index

show accounting log nvram

show accounting log nvram last-index

show accounting log nvram start-seqnum

show accounting log start-seqnum

show acl status

show arp access-lists

Chapter 3. B Show Commands

show background

show banner motd

show bash-shell

show bfd-app session status

show bfd addrmap

show bfd discrmap

show bfd intfipmap

show bfd neighbors

show bfd scalar

show bfd session

show bgp (bgp)

show bgp (bgp)

show bgp (bgp)

show bgp (bgp)

show bgp (bgp)

show bgp (bgp)

show bgp (bgp)

show bgp (bgp)

show bgp community

show bgp convergence

show bgp convergence private

show bgp dampening

show bgp default-info

show bgp extcommunity

show bgp l3vpn

show bgp neighbors (bgp)

show bgp neighbors (bgp)

show bgp neighbors commands

show bgp neighbors flap-statistics

show bgp neighbors paths

show bgp paths

show bgp peer-template

show bgp prefix-list

show bgp private

show bgp private attr

show bgp private damp

show bgp process

show bgp received-paths

show bgp regexp

show bgp self-originated

show bgp sessions

show bgp statistics

show bgp summary (bgp)

show bgp summary (bgp)

show boot

show boot auto-copy

show boot auto-copy list

show boot current

show boot module

show boot sup-1

show boot sup-2

show boot variables

show bootmode

show buffers ip

Chapter 4. C Show Commands

show callhome

show callhome destination-profile

show callhome destination-profile profile

show callhome destination-profile profile CiscoTAC-1

show callhome destination-profile profile full-txt-destination

show callhome destination-profile profile short-txt-destination

show callhome transport

show callhome transport-email

show callhome user-def-cmds

show cdp (cdpd)

show cdp (cdpd)

show cdp global

show cdp neighbors

show cdp neighbors detail

show cdp traffic interface2

show cfs application

show cfs lock

show cfs merge status

show cfs peers

show cfs regions

show cfs remote-app vsan domain

show cfs remote-switches vsan

show cfs static peers

show cfs status

show checkpoint (cfg_rollback)

show checkpoint (cfg_rollback)

show checkpoint summary

show class-map

show class-map type control-plane

show class-map type network-qos

show cli alias

show cli dynamic integers

show cli dynamic strings

show cli history

show cli interface table

show cli list

show cli registry

show cli syntax

show cli variables

show clock

show clock utc

show configuration session (ssnmgr)

show configuration session (ssnmgr)

show configuration session global-info

show configuration session status

show configuration session summary

show consistency-checker forwarding ipv6show forwarding ipv6 inconsistency

show consistency-checker forwardingshow forwarding inconsistency

show consistency-checker racl port-channels

show copp diff profile profile2

show copp profile

show copp status

show copyright

show cores

show crypto ca certificates (certen_tree)

show crypto ca certificates (certen_tree)

show crypto ca certstore

show crypto ca crl

show crypto ca remote-certstore

show crypto ca trustpoints

show crypto certificatemap

show crypto key mypubkey rsa

show crypto ssh-auth-map

show current

Chapter 5. D Show Commands

show default-interface log

show diagnostic bootup level

show diagnostic content module

show diagnostic events

show diagnostic ondemand setting

show diagnostic result module all

show diagnostic simulation module

show diagnostic status module

show diff rollback-patch

show dot1q-tunnel

show dot1q-tunnel interface

Chapter 6. E Show Commands

show eigrp

show eigrp accounting

show eigrp event

show eigrp interfaces

show eigrp metric

show eigrp sia-event

show eigrp sia-statistics

show eigrp timers

show eigrp traffic

show email

show encryption service stat

show environment

show environment fex

show eol status

show errdisable

show errdisable flap

show event-history

show event-history xbar

show event manager environment

show event manager event-types

show event manager events action-log

show event manager history events

show event manager policy-state

show event manager script system

show event manager system-policy

Chapter 7. F Show Commands

show fabricpath counters dropped

show fabricpath load-balance

show fabricpath load-balance multicast ftag-selected flow-type

show fabricpath load-balance unicast forwarding-path ftag switchid flow-type

show fabricpath topology

show fabricpath topology interface

show fabricpath topology interface vlan

show fabricpath topology vlan

show feature

show feature-set

show feature-set services

show fex (satmgr)

show fex (satmgr)

show fex detail

show fex transceiver

show fex version

show file

show fips status

show forwarding

show forwarding adjacency

show forwarding bypass-hardware

show forwarding capture

show forwarding distribution

show forwarding distribution capture

show forwarding distribution clients

show forwarding distribution fib-state

show forwarding distribution ip igmp snooping

show forwarding distribution ipv6 multicast route

show forwarding distribution l2 multicast

show forwarding distribution lisp counters

show forwarding distribution lisp vrf enabled

show forwarding distribution logging

show forwarding distribution multicast (mfdm)

show forwarding distribution multicast (mfdm)

show forwarding distribution multicast client-ack-db

show forwarding distribution multicast client

show forwarding distribution multicast outgoing-interface-list

show forwarding distribution multicast resp-ack-timer-msgs

show forwarding distribution multicast route

show forwarding distribution otv multicast route

show forwarding distribution peer-id

show forwarding distribution trace

show forwarding ecmp

show forwarding ecmp recursive

show forwarding file-log disable

show forwarding file-log enable

show forwarding interfaces

show forwarding ipv6

show forwarding ipv6 adjacency

show forwarding ipv6 multicast route

show forwarding ipv6 pss route

show forwarding l2 multicast

show forwarding l2vpn ipv6 multicast route

show forwarding l2vpn label vpls

show forwarding l2vpn label xconnect

show forwarding l2vpn multicast outgoing-interface-list

show forwarding l2vpn multicast route

show forwarding l2vpn service vpls

show forwarding l2vpn service xconnect

show forwarding l2vpn vlan

show forwarding mpls

show forwarding mpls aggregate

show forwarding mpls cbts

show forwarding mpls ecmp

show forwarding mpls summary

show forwarding mpls te

show forwarding multicast outgoing-interface-list

show forwarding multicast route

show forwarding otv

show forwarding otv ipv6 multicast route

show forwarding otv multicast outgoing-interface-list

show forwarding otv multicast route

show forwarding otv vlan

show forwarding pss route

show forwarding restart

show forwarding security group-tag

show forwarding security mac

show forwarding trace

show forwarding trace profile

show forwarding trace profile funcstats

Chapter 8. G Show Commands

show glbp

show glbp brief

show glbp capability

Chapter 9. H Show Commands

show hardware

show hardware access-list lou resource threshold

show hardware access-list resource pooling

show hardware access-list tcam region

show hardware capacity

show hardware capacity eobc

show hardware capacity forwarding

show hardware capacity interface

show hardware capacity module

show hardware capacity power

show hardware fabricpath mac-learning module

show hardware feature-capability

show hardware forwarding interface statistics mode

show hardware forwarding multicast fabric-path ingress

show hardware ip verify

show hardware mac address-table

show hardware qos eoq stats-class

show hardware qos ns-buffer-profile

show hardware qos ns-mcq3-alias

show hardware rate-limiter

show hardware rl snmp class-id

show hardware rl snmp global class-id

show hardware rl snmp local snmp-index class-id

show hosts

show hsrp

show hsrp bfd-sessions

show hsrp delay

show hsrp ext-mib sec-addr

show hsrp ext-mib use-bia

show hsrp summary

Chapter 10. I Show Commands

show inactive-if-config log

show incompatibility-all nxos

show incompatibility nxos

show install active

show install all failed-standby

show install all failure-reason

show install all impact

show install all impact epld

show install all status

show install committed

show install epld status

show install impact (sysmgr_upgradecli)

show install impact (sysmgr_upgradecli)

show install impact detail

show install inactive

show install log

show install packages

show install pkg-info

show install request

show interface (if_manager)

show interface (if_manager)

show interface (if_manager)

show interface (if_manager)

show interface (if_manager)

show interface (if_manager)

show_interface

show interface brief (if_manager)

show interface brief (if_manager)

show interface brief (if_manager)

show interface brief (if_manager)

show interface brief (if_manager)

show interface brief (if_manager)

show interface cable-diagnostics-tdr

show interface capabilities (if_manager)

show interface capabilities (if_manager)

show interface counters (if_manager)

show interface counters (if_manager)

show interface counters (if_manager)

show interface counters (if_manager)

show interface counters (if_manager)

show interface counters brief

show interface counters detailed (if_manager)

show interface counters detailed (if_manager)

show interface counters detailed (if_manager)

show interface counters detailed (if_manager)

show interface counters detailed all (if_manager)

show interface counters detailed all (if_manager)

show interface counters detailed all (if_manager)

show interface counters detailed all (if_manager)

show interface counters detailed all (if_manager)

show interface counters detailed all (if_manager)

show interface counters errors (if_manager)

show interface counters errors (if_manager)

show interface counters errors (if_manager)

show interface counters errors fex

show interface counters fex

show interface counters snmp

show interface counters snmp fex

show interface counters trunk

show interface debounce (if_manager)

show interface debounce (if_manager)

show interface description (if_manager)

show interface description (if_manager)

show interface description (if_manager)

show interface description (if_manager)

show interface description (if_manager)

show interface description (svi)

show interface fcoe

show interface fex-conf

show interface fex-fabric

show interface fex-intf

show interface flowcontrol (if_manager)

show interface flowcontrol (if_manager)

show interface flowcontrol fex

show interface mac-address (if_manager)

show interface mac-address (if_manager)

show interface priority-flow-control

show interface private-vlan mapping

show interface pruning

show interface snmp-ifindex

show interface status (if_manager)

show interface status (if_manager)

show interface status (if_manager)

show interface status (if_manager)

show interface status (if_manager)

show interface status (svi)

show interface status err-disabled (if_manager)

show interface status err-disabled (if_manager)

show interface status err-vlans (if_manager)

show interface status err-vlans (if_manager)

show interface status fex

show interface switchport (if_manager)

show interface switchport (if_manager)

show interface transceiver (if_manager)

show interface transceiver (if_manager)

show interface transceiver fex-fabric (if_manager)

show interface transceiver fex-fabric (if_manager)

show interface trunk (if_manager)

show interface trunk (if_manager)

show inventory

show inventory fex

show ip (bgp)

show ip (bgp)

show ip adjacency

show ip arp

show ip arp cache

show ip arp client

show ip arp inspection

show ip arp inspection interfaces

show ip arp inspection log

show ip arp inspection statistics

show ip arp inspection vlan

show ip arp off-list

show ip arp snmp pttree

show ip arp statistics

show ip arp tunnel-statistics

show ip arp vaddr

show ip arp vpc-statistics

show ip as-path-access-list

show ip cache

show ip client

show ip community

show ip community-list

show ip dampening

show ip dhcp global statistics

show ip dhcp relay

show ip dhcp relay address

show ip dhcp relay statistics

show ip dhcp snooping

show ip dhcp snooping binding

show ip dhcp snooping statistics

show ip dns source-interface

show ip dns source-interface vrf all

show ip eigrp route-map statistics redistribute

show ip extcommunity

show ip extcommunity-list

show ip fib adjacency

show ip fib distribution

show ip fib distribution capture

show ip fib distribution clients

show ip fib distribution mroute

show ip fib distribution multicast

show ip fib distribution multicast outgoing-interface-list

show ip fib distribution state

show ip fib interfaces

show ip fib mroute

show ip fib mroute txlist

show ip fib route

show ip flap-statistics

show ip ftm statistics

show ip igmp

show ip igmp interfaceshow ip igmp interface

show ip igmp local-groups

show ip igmp policy statistics reports

show ip igmp snooping

show ip igmp snooping explicit-tracking

show ip igmp snooping groups

show ip igmp snooping lookup-mode

show ip igmp snooping mac-oif

show ip igmp snooping mrouter

show ip igmp snooping otv vlan brief

show ip igmp snooping pw vlan brief

show ip igmp snooping querier

show ip igmp snooping snmp mib adminMode

show ip igmp snooping snmp mib aliasingMode

show ip igmp snooping snmp mib cisV3ProcessEnableOperStatus

show ip igmp snooping snmp mib explicitTrackingTable

show ip igmp snooping snmp mib fallBackTime

show ip igmp snooping snmp mib fastBlockEnabled

show ip igmp snooping snmp mib fastleaveenabled

show ip igmp snooping snmp mib filterStatsTable

show ip igmp snooping snmp mib ifAccessGroupTable

show ip igmp snooping snmp mib ifConfigTable

show ip igmp snooping snmp mib ifLimitTable

show ip igmp snooping snmp mib ifLimitTotalTable

show ip igmp snooping snmp mib igmpsnoopingenabled

show ip igmp snooping snmp mib iterfaceStatsTable

show ip igmp snooping snmp mib lastMemeberQueryCount

show ip igmp snooping snmp mib lastMemeberQueryInterval

show ip igmp snooping snmp mib leaveQueryType

show ip igmp snooping snmp mib mcastGroupTable

show ip igmp snooping snmp mib mcastRouterCfgTable

show ip igmp snooping snmp mib mcastRouterConfigTable

show ip igmp snooping snmp mib multicastGroupConfigTable

show ip igmp snooping snmp mib multicastGroupPortListTable

show ip igmp snooping snmp mib multicastGroupTable

show ip igmp snooping snmp mib operMode

show ip igmp snooping snmp mib querierTable

show ip igmp snooping snmp mib reportsuppressionenabled

show ip igmp snooping snmp mib robustnessVariable

show ip igmp snooping snmp mib routerAlertCheckEnabled

show ip igmp snooping snmp mib sourceOnlyEntryAgingTime

show ip igmp snooping snmp mib sourceOnlyLearningEnabled

show ip igmp snooping snmp mib tcnFloodQueryCount

show ip igmp snooping snmp mib timeToLiveCheckEnabled

show ip igmp snooping snmp mib topoChanageQuerySolicitEnabled

show ip igmp snooping snmp mib v3ProcessEnabledAdminStatus

show ip igmp snooping snmp mib v3SnoopingSupport

show ip igmp snooping snmp mib vlanconfigtable

show ip igmp snooping snmp mib vlanFilterConfigTable

show ip igmp snooping statistics (igmp)

show ip igmp snooping statistics (igmp)

show ip igmp vrf all

show ip interface

show ip lisp data-cache

show ip load-sharing

show ip local-pt

show ip local policy

show ip logging

show ip msdp

show ip msdp count

show ip msdp mesh-group

show ip msdp peer

show ip msdp policy statistics sa-policy

show ip msdp rpf

show ip msdp sources

show ip msdp statistics

show ip msdp summary

show ip multicast vrf

show ip neighbors

show ip nexthop

show ip nexthop-database

show ip ospf

show ip ospf border-routers

show ip ospf database

show ip ospf database database-summary

show ip ospf database detail

show ip ospf ha

show ip ospf interface

show ip ospf interface brief

show ip ospf lsa-content-changed-list

show ip ospf memory

show ip ospf mpls ldp interface

show ip ospf neighbors

show ip ospf neighbors detail

show ip ospf neighbors summary

show ip ospf policy statistics

show ip ospf request-list

show ip ospf retransmission-list

show ip ospf route

show ip ospf route summary

show ip ospf sham-links

show ip ospf statistics

show ip ospf summary-address

show ip ospf traffic

show ip ospf traps-queue

show ip ospf virtual-links

show ip ospf virtual-links brief

show ip pim bitfield

show ip pim config-sanity

show ip pim group-range

show ip pim lisp encap

show ip pim mdt

show ip pim mdt bgp

show ip pim mdt history interval

show ip pim mdt receive

show ip pim mdt send

show ip pim oif-list

show ip pim policy statistics (pim)

show ip pim policy statistics (pim)

show ip pim route

show ip pim rp-hash

show ip pim rp

show ip pim statistics

show ip policy

show ip prefix-list (bgp)

show ip prefix-list (rpm)

show ip process

show ip received-paths

show ip rip policy statistics redistribute

show ip router-id

show ip rsvp

show ip rsvp authentication

show ip rsvp counters

show ip rsvp fast-reroute

show ip rsvp hello client lsp

show ip rsvp hello client neighbor

show ip rsvp hello graceful-restart

show ip rsvp hello instance

show ip rsvp interface

show ip rsvp session

show ip rsvp signalling rate-limit

show ip rsvp signalling refresh interval

show ip rsvp signalling refresh misses

show ip rsvp signalling refresh reduction

show ip stats

show ip telnet source-interface

show ip telnet source-interface vrf all

show ip tftp source-interface

show ip tftp source-interface vrf all

show ip traffic

show ip txlist

show ip verify source

show ip vrf

show ipv6 (bgp)

show ipv6 (bgp)

show ipv6 (am)

show ipv6 (bgp)

show ipv6 cache

show ipv6 client

show ipv6 community

show ipv6 dampening

show ipv6 dhcp relay

show ipv6 dhcp relay statistics

show ipv6 eigrp route-map statistics redistribute

show ipv6 extcommunity

show ipv6 flap-statistics

show ipv6 fragments

show ipv6 global traffic

show ipv6 icmp

show ipv6 icmp ndp

show ipv6 icmp off-list

show ipv6 icmp process sdb

show ipv6 icmp snmp pttree

show ipv6 icmp vaddr

show ipv6 icmp vpc-statistics

show ipv6 icmp vrf

show ipv6 interface

show ipv6 interface global

show ipv6 lisp data-cache

show ipv6 local-pt

show ipv6 local policy

show ipv6 mld groups

show ipv6 mld local-groups

show ipv6 mld vrf all

show ipv6 mtu

show ipv6 ndp

show ipv6 neighbor static

show ipv6 neighbors

show ipv6 nexthop

show ipv6 nexthop-database

show ipv6 pim bitfield

show ipv6 pim df

show ipv6 pim embed-rp

show ipv6 pim group-range

show ipv6 pim interfaceshow ipv6 pim interface

show ipv6 pim neighbor

show ipv6 pim oif-list

show ipv6 pim policy statistics

show ipv6 pim route

show ipv6 pim rp-hash

show ipv6 pim rp

show ipv6 pim statistics

show ipv6 pim vrf

show ipv6 policy

show ipv6 prefix-list

show ipv6 process

show ipv6 process sdb

show ipv6 received-paths

show ipv6 regexp

show ipv6 rip policy statistics redistribute

show ipv6 routers

show ipv6 static-route

show ipv6 statistics

show ipv6 summary

show ipv6 traffic

show isis (isis)

show isis (isis)

show isis adjacency

show isis csnp

show isis database

show isis ipv6 redistribute route

show isis ipv6 route-map statistics

show isis lsp free-list

show isis mesh-group

show isis redistribute route

show isis route-map statistics

show isis routeshow isis ipv6 routeshow isis route is

show isis rrm

show isis spf-adjacency

show isis spf-log

show isis srm

show isis ssn

show isis statistics

show isis summary-addressshow isis ipv6 summary-address

show isis tlv overflow-list

show isis topology

show isis traffic

Chapter 11. K Show Commands

show key chain (rpm)

show key chain (rpm)

show keystore

Chapter 12. L Show Commands

show l2protocol tunnel

show lacp counters

show lacp interface

show lacp issu-impact

show lacp neighbor

show lacp port-channel

show lacp system-identifier

show ldap-search-map

show ldap-server

show ldap-server groups

show ldap-server statistics

show license

show license brief

show license file

show license host-id

show license reserved

show license usage

show line

show line console

show line console connected

show line console user-input-string

show lisp stats-cache

show lldp dcbx interface

show lldp entry

show lldp interface

show lldp neighbors

show lldp neighbors detail

show lldp portid-subtype

show lldp timers

show lldp tlv-select

show lldp traffic

show lldp traffic interface

show locator-led status (pfm)

show locator-led status (satmgr)

show logging

show logging console

show logging info

show logging ip access-list cache

show logging ip access-list status

show logging last

show logging level (licmgr)

show logging level (sksd)

show logging level (syslog)

show logging level aaa

show logging level acllog

show logging level aclmgr

show logging level adjmgr

show logging level arp

show logging level ascii-cfg

show logging level bfd

show logging level bgp

show logging level bloggerd

show logging level bootvar

show logging level callhome

show logging level capability

show logging level cdp

show logging level cert-enroll

show logging level cert_enroll

show logging level cfs

show logging level clis

show logging level clk_mgr

show logging level confcheck

show logging level copp

show logging level core

show logging level dhcp_snoop

show logging level diagnostic device_test

show logging level diagnostic diagclient

show logging level diagnostic diagmgr

show logging level eigrp

show logging level ethdstats

show logging level ethpm

show logging level evmc

show logging level evmed

show logging level evms

show logging level feature-mgr

show logging level fex

show logging level fs-daemon

show logging level glbp

show logging level gpixm

show logging level hsrp

show logging level im

show logging level interface-vlan

show logging level ip igmp

show logging level ip msdp

show logging level ip pim

show logging level ipconf

show logging level ipqos

show logging level ipv6 icmp

show logging level ipv6 pim

show logging level isis

show logging level l2fm

show logging level l2pt

show logging level l3vm

show logging level lacp

show logging level ldap

show logging level lldp

show logging level m2rib

show logging level mfdm

show logging level mfwd

show logging level module

show logging level mpls switching

show logging level mvsh

show logging level netstack

show logging level ntp

show logging level nve

show logging level oim

show logging level onep

show logging level orib

show logging level ospf

show logging level ospfv3

show logging level patch-installer

show logging level pfstat

show logging level pixm

show logging level platform

show logging level pltfm_config

show logging level plugin

show logging level poap

show logging level pong

show logging level port-channel

show logging level port-security

show logging level private-vlan

show logging level radius

show logging level res_mgr

show logging level rip

show logging level routing multicast

show logging level rpm

show logging level rsvp

show logging level sal

show logging level scheduler

show logging level security

show logging level session-mgr

show logging level smm

show logging level snmpd

show logging level spanning-tree

show logging level spm

show logging level sysmgr

show logging level tacacs

show logging level track

show logging level tunnel

show logging level u2rib

show logging level u6rib

show logging level udld

show logging level ufdm

show logging level urib

show logging level vdc_mgr

show logging level virtual-service

show logging level vlan_mgr

show logging level vmm

show logging level vntag

show logging level vpc

show logging level vrrp-cfg

show logging level vrrp-eng

show logging level vshd

show logging level vtp

show logging level xbar

show logging logfile

show logging logfile duration

show logging logfile last-index

show logging logfile start-seqn

show logging logfile start-time

show logging loopback

show logging module

show logging monitor

show logging nvram

show logging onboard

show logging server

show logging source-interface

show logging timestamp

Chapter 13. M Show Commands

show mac-list

show mac address-table (l2fm)

show mac address-table (l2fm)

show mac address-table aging-time

show mac address-table count

show mac address-table learning-mode

show mac address-table multicast

show mac address-table notification mac-move

show mac vdc

show mcectest

show mcectest mcec interface

show mgmt-policy

show module

show module bandwidth-fairness

show module fex

show module supported

show module uptime

show monitor

show monitor session

show mpls label range

show mpls label statistics

show mpls switching

show mpls switching clients

show mroute

show mroute flood vlan

show mroute summary

show multicast ftag

show multicast trees

show mvpn bgp

show mvpn mdt encap

show mvpn mdt route

show mvpn snmp mib genericTable

show mvpn snmp mib mvpnBgpMdtUpdateTable

show mvpn snmp mib mvpnMdtDataTable

show mvpn snmp mib mvpnMdtDefaultTable

show mvpn snmp mib mvpnMdtJnRcvTable

show mvpn snmp mib mvpnMdtJnSendTable

show mvpn snmp mib mvpnMrouteMdtTable

show mvpn snmp mib mvpnMvrfNumber

show mvpn snmp mib mvpnNotificationEnable

show mvpn snmp mib mvpnTunnelTable

Chapter 14. N Show Commands

show ntp access-groups

show ntp authentication-keys

show ntp authentication-status

show ntp logging-status

show ntp peer-status

show ntp peers

show ntp rts-update

show ntp session status

show ntp source-interface

show ntp source

show ntp statistics

show ntp status

show ntp trusted-keys

show nve interface

show nve peers

show nve vni

show nve vxlan-params

show nxapi

Chapter 15. O Show Commands

show object-group

show onep

show onep cli-extensions applications

show onep error

show onep history

show onep statistics

show onep status

show onep trace

show ospfv3

show ospfv3 border-routers

show ospfv3 database

show ospfv3 database database-summary

show ospfv3 database detail

show ospfv3 ha

show ospfv3 interface

show ospfv3 interface brief

show ospfv3 lsa-content-changed-list

show ospfv3 memory

show ospfv3 neighbors

show ospfv3 neighbors detail

show ospfv3 neighbors summary

show ospfv3 policy statistics

show ospfv3 request-list

show ospfv3 retransmission-list

show ospfv3 route

show ospfv3 route summary

show ospfv3 statistics

show ospfv3 summary-address

show ospfv3 traffic

show ospfv3 virtual-links

show ospfv3 virtual-links brief

show otv mroute

show otv route

Chapter 16. P Show Commands

show password secure-mode

show password strength-check

show pmap-int-br interface br

show pmap-int

show policy-map

show policy-map interface control-plane

show policy-map system

show policy-map type control-plane

show policy-map type network-qos

show port-channel capacity

show port-channel compatibility-parameters

show port-channel database

show port-channel load-balance

show port-channel load-balance forwarding-path

show port-channel rbh-distribution

show port-channel summary

show port-channel traffic

show port-channel usage

show port-security

show port-security address

show port-security address blocked

show port-security address interface

show port-security address nvram

show port-security detail interface

show port-security interface

show port-security multivlan address

show port-security secure address

show port-security state

show port-security traps enable

show privilege

show processes (launcher)

show processes (process)

show processes cpu

show processes cpu history

show processes cpu module

show processes log

show processes log details

show processes log pid

show processes log vdc-all

show processes memory

show processes memory clis

show processes memory shared

show processes vdc

show processes vdc cpu

show processes vdc log

show processes vdc log details

show processes vdc log pid

show processes vdc memory

Chapter 17. Q Show Commands

show qos dcbxp incompatibility interface

show qos dcbxp info

show qos shared-policer

show queuing

Chapter 18. R Show Commands

show radius-server (radius_tree)

show radius-server (radius_tree)

show radius-server directed-request

show radius-server groups

show radius-server sorted

show radius-server statistics

show redundancy status

show regexp

show resource

show rip

show rip interface

show rip memory

show rip neighbor

show rip route

show rip statistics

show rmon

show role

show role feature-group

show role feature

show rollback log

show rollback status

show route-map

show route-map pbr-statistics

show route

show routing-context

show routing-privilege

show routing clients

show routing hash

show routing hidden-nh

show routing ip ipv4 multicast lisp encap __readonly__

show routing ipv6 clients

show routing ipv6 hash

show routing ipv6 hidden-nh

show routing ipv6 memory estimate

show routing ipv6 memory statistics

show routing ipv6 nexthop info

show routing ipv6 nhlfe

show routing ipv6 recursive-next-hop

show routing memory estimate

show routing memory statistics

show routing multicast

show routing multicast clients

show routing multicast mdt encapsulation

show routing multicast memory estimate

show routing nhlfe

show routing recursive-next-hop

show routing unresolved-next-hop

show running-config

show running-config aaa

show running-config acllog

show running-config aclmgr (aclmgr)

show running-config aclmgr (aclmgr)

show running-config adjmgr

show running-config all

show running-config arp

show running-config bfd

show running-config bgp

show running-config bloggerd

show running-config callhome

show running-config cdp

show running-config cert-enroll

show running-config cfs

show running-config clock_manager

show running-config copp

show running-config dhcp

show running-config diagnostic

show running-config diff

show running-config eem

show running-config eigrp

show running-config eltm

show running-config exclude

show running-config exclude fabricpath

show running-config exclude fex

show running-config explicit

show running-config fabricpath

show running-config fabricpath topology

show running-config fex

show running-config glbp

show running-config hsrp

show running-config icmpv6

show running-config igmp

show running-config interface (clic)

show running-config interface (clic)

show running-config interface defaults

show running-config interface explicit

show running-config ip

show running-config ipqos (qosmgr)

show running-config ipqos (qosmgr)

show running-config ipv6

show running-config isis

show running-config l2pt

show running-config l3vm

show running-config ldap

show running-config license

show running-config lldp

show running-config monitor

show running-config msdp

show running-config ntp

show running-config nv overlay

show running-config ospf

show running-config ospfv3

show running-config pim

show running-config pim6

show running-config port-security

show running-config radius

show running-config res_mgr

show running-config rip

show running-config routing multicast

show running-config rpm

show running-config rsvp

show running-config section

show running-config security

show running-config snmp

show running-config spanning-tree

show running-config tacacs+

show running-config track

show running-config udld

show running-config vdc-all

show running-config vdc

show running-config virtual-service

show running-config vlan (clis)

show running-config vlan (clis)

show running-config vlan (vlan_mgr_cli)

show running-config vlan_mgr

show running-config vpc

show running-config vrf

show running-config vrf default

show running-config vrrp

show running-config vshd

show running-config vtp

Chapter 19. S Show Commands

show scheduler config

show scheduler job

show scheduler logfile

show scheduler schedule

show snmp

show snmp community

show snmp context

show snmp engineID

show snmp group

show snmp host

show snmp mib igmpCacheTable

show snmp mib igmpInterfaceTable

show snmp mib pimCandidateRPTable

show snmp mib pimComponentTable

show snmp mib pimInterfaceTable

show snmp mib pimIpMRouteNextHopTable

show snmp mib pimIpMRouteTable

show snmp mib pimJoinPruneInterval

show snmp mib pimNeighborTable

show snmp mib pimRPSetTable

show snmp pss

show snmp roledebug

show snmp sessions

show snmp snmpv3stats

show snmp source-interface

show snmp trap

show snmp user

show sockets buffers

show sockets client

show sockets connection

show sockets keychain-dump

show sockets performance

show sockets statistics

show sockets tcp keychain binding

show spanning-tree (stp)

show spanning-tree (stp)

show spanning-tree interface (stp)

show spanning-tree interface (stp)

show spanning-tree mst

show spanning-tree mst configuration __readonly__

show spanning-tree mst configuration digest __readonly__

show spanning-tree mst detail

show spanning-tree mst interface

show spanning-tree mst interface detail

show spanning-tree pathcost method

show spanning-tree summary

show spanning-tree summary totals

show spanning-tree vlan (stp)

show spanning-tree vlan (stp)

show spanning-tree vlan (stp)

show spanning-tree vlan (stp)

show spanning-tree vlan (stp)

show sprom

show sprom fex

show sprom fex all

show ssh key

show ssh server

show startup-config

show startup-config aaa

show startup-config acllog

show startup-config aclmgr

show startup-config adjmgr

show startup-config arp

show startup-config bfd

show startup-config bgp

show startup-config bloggerd

show startup-config callhome

show startup-config cdp

show startup-config cert-enroll

show startup-config cfs

show startup-config copp

show startup-config dhcp

show startup-config diagnostic

show startup-config eem

show startup-config eigrp

show startup-config eltm

show startup-config exclude

show startup-config fabricpath

show startup-config fabricpath topology

show startup-config fex

show startup-config glbp

show startup-config hsrp

show startup-config icmpv6

show startup-config igmp

show startup-config interface (clic)

show startup-config interface (clic)

show startup-config ip

show startup-config ipqos

show startup-config ipv6

show startup-config isis

show startup-config l2pt

show startup-config l3vm

show startup-config ldap

show startup-config license

show startup-config lldp

show startup-config log

show startup-config monitor

show startup-config msdp

show startup-config ntp

show startup-config nv overlay

show startup-config ospf

show startup-config ospfv3

show startup-config pim

show startup-config pim6

show startup-config port-security

show startup-config radius

show startup-config rip

show startup-config routing multicast

show startup-config rpm

show startup-config rsvp

show startup-config security

show startup-config snmp

show startup-config tacacs+

show startup-config track

show startup-config udld

show startup-config vdc-all

show startup-config vdc

show startup-config virtual-service

show startup-config vlan (clis)

show startup-config vlan (clis)

show startup-config vpc

show startup-config vrf

show startup-config vrf default

show startup-config vrrp

show startup-config vshd

show startup-config vtp

show summary

show system auto-collect tech-support

show system cores

show system error-id

show system exception-info

show system inband queuing

show system kgdb

show system pss shrink status

show system redundancy ha status

show system redundancy status

show system reset-reason (lcmcli)

show system reset-reason (lcmcli)

show system reset-reason fex

show system reset-reason module

show system resources (process)

show system resources (process)

show system resources module

show system resources module all

show system routing mode

show system srg

show system standby manual-boot

show system switchover impact

show system uptime

show system verify bios

show system vlan reserved

Chapter 20. T Show Commands

show table-map

show tacacs-server (tacacs_dynamic_tree)

show tacacs-server (tacacs_dynamic_tree)

show tacacs-server directed-request

show tacacs-server groups

show tacacs-server sorted

show tacacs-server statistics

show tech-support

show tech-support aaa

show tech-support aclmgr

show tech-support aclqos

show tech-support aclqos compressed

show tech-support adjmgr

show tech-support all-binary

show tech-support all

show tech-support all binary

show tech-support arp

show tech-support ascii-cfg

show tech-support bfd

show tech-support bgp

show tech-support biosd

show tech-support bloggerd-all

show tech-support bloggerd

show tech-support bootvar

show tech-support brief

show tech-support callhome

show tech-support cdp

show tech-support cert-enroll

show tech-support cfs

show tech-support cli

show tech-support clis

show tech-support clock_manager

show tech-support commands

show tech-support copp

show tech-support details

show tech-support dhcp

show tech-support eem

show tech-support eigrp

show tech-support eltm

show tech-support ethpm

show tech-support fabricpath topology

show tech-support fips

show tech-support forwarding l2 unicast

show tech-support forwarding l3 unicast

show tech-support forwarding l3 unicast detail

show tech-support forwarding l3 unicast detail vdc-all

show tech-support forwarding l3 unicast vdc-all

show tech-support forwarding multicast

show tech-support glbp

show tech-support glbp brief

show tech-support gold

show tech-support gpixm

show tech-support ha

show tech-support ha standby

show tech-support hsrp

show tech-support hsrp brief

show tech-support icmpv6

show tech-support im

show tech-support inband counters

show tech-support include-time

show tech-support interface-vlan

show tech-support ip

show tech-support ip igmp

show tech-support ip igmp snooping

show tech-support ip msdp

show tech-support ip pim

show tech-support ip rsvp

show tech-support ipqos

show tech-support ipv6

show tech-support ipv6 pim

show tech-support isis

show tech-support issu

show tech-support l2

show tech-support l2fm

show tech-support l2fm clients

show tech-support l2fm detail

show tech-support l2fm l2dbg (syscli)

show tech-support l2fm l2dbg (syscli)

show tech-support l2pt

show tech-support l3vm

show tech-support l3vpn

show tech-support lacp

show tech-support ldap

show tech-support license

show tech-support lldp

show tech-support logging

show tech-support mfwd

show tech-support module

show tech-support module all

show tech-support monitor

show tech-support monitor erspan

show tech-support monitorc-all

show tech-support multicast

show tech-support mvpn

show tech-support netstack

show tech-support netstack detail

show tech-support npacl

show tech-support ntp

show tech-support nve

show tech-support oim

show tech-support onep

show tech-support ospf

show tech-support ospfv3

show tech-support page

show tech-support patch

show tech-support pfstat

show tech-support pixm-all

show tech-support pixm

show tech-support pixmc-all

show tech-support pktmgr

show tech-support platform

show tech-support pltfm-config

show tech-support port-channel

show tech-support port-client-all

show tech-support port

show tech-support private-vlan

show tech-support radius

show tech-support rip

show tech-support routing ip unicast

show tech-support routing ipv6

show tech-support routing multicast

show tech-support rpm

show tech-support sal

show tech-support security

show tech-support session-mgr

show tech-support sksd

show tech-support smm

show tech-support snmp

show tech-support sockets

show tech-support spm

show tech-support statsclient

show tech-support stp

show tech-support sup-filesys

show tech-support sysmgr

show tech-support tacacs+

show tech-support track

show tech-support udld

show tech-support usd-all

show tech-support vdc

show tech-support virtual-service

show tech-support vlan

show tech-support vpc

show tech-support vrrp

show tech-support vrrp brief

show tech-support vxlan

show tech-support xbar

show tech-support xml

show telnet server

show terminal

show time-range

show track

show track brief

show tunnel iftable

show tunnel inetconfigtable

Chapter 21. U Show Commands

show udld

show udld global

show udld neighbors

show ulib process

show user-account

show username keypair

show users

Chapter 22. V Show Commands

show vdc

show vdc current-vdc

show vdc fcoe-vlan-range

show vdc resource (res_mgr)

show vdc resource (res_mgr)

show vdc resource template

show version

show version compatibility

show version fex

show version image

show version module

show version module epld

show virtual-service

show virtual-service storage pool list

show virtual-service tech-support

show virtual-service utilization name

show virtual-service version

show vlan-mgr errors

show vlan-mgr event-history

show vlan

show vlan access-list

show vlan access-map

show vlan all-ports

show vlan counters

show vlan dot1Q tag native

show vlan filter

show vlan id

show vlan id counters

show vlan id vn-segment

show vlan mib private-vlan type

show vlan name

show vlan private-vlan

show vlan private-vlan interface host

show vlan private-vlan interface mapping

show vlan private-vlan interface mode

show vlan private-vlan interface trunk

show vlan private-vlan mapping

show vlan private-vlan type

show vlan reserved

show vlan xbrief

show vlan xsummary

show vpc (mcecm)

show vpc (mcecm)

show vpc consistency-parameters

show vpc consistency-parameters vlans

show vpc orphan-ports

show vpc peer-keepalive

show vpc role

show vpc statistics

show vpc statistics peer-keepalive

show vrf

show vrf interface

show vrf topology

show vrrp

show vrrp bfd-sessions

show vtp counters

show vtp datafile

show vtp domain id

show vtp interface

show vtp mibstats

show vtp password

show vtp status

show vtp trunk interface

show vtp vlan

Chapter 23. X Show Commands

show xml server logging configuration

show xml server status

Preface

Audience

Documentation Conventions

Documentation Feedback

Obtaining Documentation and Submitting a Service Request

Chapter 1. READ ME FIRST

This document contains some commands that are not supported in Cisco NX-OS Release 6.1(2)I2(2). For example, this release does not support FabricPath, FCoE, FEX, GLBP, MPLS, OTV, and PIM6. Commands related to these features are not currently supported and are disabled in the software.

Chapter 2. A Show Commands

- show (eigrp)

- show aaa accounting

- show aaa authentication

- show aaa authentication login

- show aaa authentication login ascii-authentication

- show aaa authentication login error-enable

- show aaa authentication login password-aging

- show aaa authorization

- show aaa groups

- show aaa user default-role

- show access-lists

- show accounting log

- show accounting log all

- show accounting log last-index

- show accounting log nvram

- show accounting log nvram last-index

- show accounting log nvram start-seqnum

- show accounting log start-seqnum

- show acl status

- show arp access-lists

show (eigrp)

show { ip eigrp [eigrp-ptag] neighbors [ detail | state ] { [interface] | [address] [ vrf { vrf-name | vrf-known-name | all } ] } | ipv6 eigrp [eigrp-ptag] neighbors [ detail | state ] { [interface] | [ipv6-addr] [ vrf { vrf-name | vrf-known-name | all } ] } } [ __readonly__ TABLE_asn asn TABLE_vrf vrf [ TABLE_peer peer_handle peer_ipaddr peer_ipv6addr peer_ifname peer_holdtime peer_uptime peer_srtt peer_rto peer_xmitq_count peer_last_seqno peer_static peer_nsf_restart_time peer_last_startup_serno peer_ios_major_ver peer_ios_minor_ver peer_eigrp_major_rev peer_eigrp_minor_rev peer_retrans_count peer_retry_count peer_wait_for_init peer_wait_for_init_ack peer_reinit_start_time peer_prefix_count peer_info_stubbed peer_info_receive_only [ peer_info_allow_connected peer_info_allow_statics peer_info_allow_summaries peer_info_allow_redist peer_info_allow_leaking ] [ peer_state_cr_mode peer_state_need_init peer_state_need_init_ack peer_state_going_down peer_state_coming_up peer_state_peer_deleted peer_state_nsf_in_progress peer_state_need_eot peer_state_use_nsf_startup_mode peer_state_await_nsf_convergence peer_state_initiated_gr peer_state_cr_sequence peer_state_rcv_probe_sequence peer_state_send_probe_sequence ] peer_suppress_queries [ TABLE_xmitq_pkts pkt_qtype pkt_index pkt_opcode pkt_ack_seqno pkt_start_seqno pkt_end_seqno pkt_len pkt_time_sent pkt_init_flag pkt_sequenced ] ] [ TABLE_suspended_peer susp_peer_ipaddr susp_peer_ipv6addr susp_peer_ifname susp_peer_restart_reqd susp_peer_restart_time ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

neighbors

IP-EIGRP neighbors

detail

Show detailed peer information

state

Show detailed peer and state information

interface

Type: interface

Interface

address

Type: ipaddr

IP-EIGRP neighbor address

ipv6-addr

Type: ipv6addr

IPv6 neighbor address

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

TABLE_peer

peer_handle

Type: uinteger

peer_ipaddr

Type: ipaddr

peer_ipv6addr

Type: ipv6addr

peer_ifname

Type: interface

peer_holdtime

Type: uinteger

peer_uptime

Type: duration

peer_srtt

Type: uinteger

peer_rto

Type: uinteger

peer_xmitq_count

Type: uinteger

peer_last_seqno

Type: uinteger

peer_static

Type: bool

peer_nsf_restart_time

Type: duration

peer_last_startup_serno

Type: uinteger

peer_ios_major_ver

Type: uinteger

peer_ios_minor_ver

Type: uinteger

peer_eigrp_major_rev

Type: uinteger

peer_eigrp_minor_rev

Type: uinteger

peer_retrans_count

Type: uinteger

peer_retry_count

Type: uinteger

peer_wait_for_init

Type: bool

peer_wait_for_init_ack

Type: bool

peer_reinit_start_time

Type: duration

peer_prefix_count

Type: uinteger

peer_info_stubbed

Type: bool

peer_info_receive_only

Type: bool

peer_info_allow_connected

Type: bool

peer_info_allow_statics

Type: bool

peer_info_allow_summaries

Type: bool

peer_info_allow_redist

Type: bool

peer_info_allow_leaking

Type: bool

peer_state_cr_mode

Type: bool

peer_state_need_init

Type: bool

peer_state_need_init_ack

Type: bool

peer_state_going_down

Type: bool

peer_state_coming_up

Type: bool

peer_state_peer_deleted

Type: bool

peer_state_nsf_in_progress

Type: bool

peer_state_need_eot

Type: bool

peer_state_use_nsf_startup_mode

Type: bool

peer_state_await_nsf_convergence

Type: bool

peer_state_initiated_gr

Type: bool

peer_state_cr_sequence

Type: uinteger

peer_state_rcv_probe_sequence

Type: uinteger

peer_state_send_probe_sequence

Type: uinteger

peer_suppress_queries

Type: bool

TABLE_xmitq_pkts

pkt_qtype

Type: uinteger

pkt_index

Type: uinteger

pkt_opcode

UPDATE  value: 1

REQUEST  value: 2

QUERY  value: 3

REPLY  value: 4

HELLO  value: 5

IPXSAP  value: 6

PROBE  value: 7

ACK  value: 8

STUB  value: 9

SIAQUERY  value: 10

SIAREPLY  value: 11

pkt_ack_seqno

Type: uinteger

pkt_start_seqno

Type: uinteger

pkt_end_seqno

Type: uinteger

pkt_len

Type: uinteger

pkt_time_sent

Type: duration

pkt_init_flag

Type: bool

pkt_sequenced

Type: bool

TABLE_suspended_peer

susp_peer_ipaddr

Type: ipaddr

susp_peer_ipv6addr

Type: ipv6addr

susp_peer_ifname

Type: interface

susp_peer_restart_reqd

Type: bool

susp_peer_restart_time

Type: uinteger

Command Modes

- /exec

show aaa accounting

show aaa accounting [ __readonly__ [ TABLE_acctMethods service methods ] ]

Syntax Description

show

Show running system information

aaa

Show aaa information

accounting

Show accounting configuration

__readonly__

TABLE_acctMethods

service

Type: string

service type

methods

Type: string

Accounting methods configured for the application

Command Modes

- /exec

show aaa authentication

show aaa authentication [ __readonly__ [ TABLE_AuthenMethods service method ] ]

Syntax Description

show

Show running system information

aaa

Show aaa information

authentication

Show authentication configuration

__readonly__

TABLE_AuthenMethods

service

Type: string

Service for which authentication is needed

method

Type: string

Authentication method used for the service

Command Modes

- /exec

show aaa authentication login

show aaa authentication login { mschap | mschapv2 | chap }

Syntax Description

show

Show running system information

aaa

Show aaa information

authentication

Show authentication configuration

login

Show authentication login error message configuration

mschap

Show authentication login MSCHAP enable configuration

mschapv2

Show authentication login MSCHAP V2 enable configuration

chap

Show authentication login CHAP enable configuration

Command Modes

- /exec

show aaa authentication login ascii-authentication

show aaa authentication login ascii-authentication [ __readonly__ ascii_authen_status ]

Syntax Description

show

Show running system information

aaa

Show aaa information

authentication

Show authentication configuration

login

Show authentication login message configuration

ascii-authentication

Show ascii-authentication configuration

__readonly__

ascii_authen_status

ascii authentication status

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show aaa authentication login error-enable

show aaa authentication login error-enable [ __readonly__ [status] ]

Syntax Description

show

Show running system information

aaa

Show aaa information

authentication

Show authentication configuration

login

Show authentication login error message configuration

error-enable

Show authentication login error message enable configuration

__readonly__

status

login error-enable enabled or disabled

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show aaa authentication login password-aging

show aaa authentication login password-aging [ __readonly__ passwordAging_status ]

Syntax Description

show

Show running system information

aaa

Show aaa information

authentication

Show authentication configuration

login

Show authentication login error message configuration

password-aging

Show password-aging enable configuration

__readonly__

passwordAging_status

login password-aging

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show aaa authorization

show aaa authorization [all] [ __readonly__ [ pki_ssh_cert_author pki_ssh_pubkey_author ] [ TABLE_cmd_methods appl_subtype cmd_type methods ] [ TABLE_app_methods appl methods ] ]

Syntax Description

show

Show running system information

aaa

Show aaa information

authorization

Show authorization configuration

all

Show all(include defaults configurations) authorization info

__readonly__

pki_ssh_cert_author

Type: string

pki_ssh_pubkey_author

Type: string

TABLE_cmd_methods

table containing command authorization methods

appl_subtype

Type: string

cmd_type

Type: string

methods

Type: string

TABLE_app_methods

table containing application authorization methods

appl

Type: string

methods

Type: string

Command Modes

- /exec

show aaa groups

show aaa groups [ __readonly__ TABLE_groups group ]

Syntax Description

show

Show running system information

aaa

Show aaa information

groups

Show configured groups

__readonly__

TABLE_groups

Table showing aaa groups

group

Type: string

Name of the group

Command Modes

- /exec

show aaa user default-role

show aaa user default-role [ __readonly__ default_role_status udr_status ]

Syntax Description

show

Show running system information

aaa

Show aaa information

user

Remotely authenticated user

default-role

Default role assigned by aaa-admin for remote authentication

__readonly__

default_role_status

user default role status

udr_status

Status of user default role

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show access-lists

show [ip_ipv6_mac] access-lists [name] [ capture session capture_session ] [ expanded | summary | private | brief ] [ __readonly__ TABLE_ip_ipv6_mac op_ip_ipv6_mac acl_name [statistics] [frag_opt_permit_deny] [global_capture_session] [ TABLE_seqno seqno { permitdeny [ proto_str | proto | ip | ipv6 ] { src_any | src_ip_prefix | src_ip_addr src_ip_mask | src_ipv6_prefix | src_ipv6_addr src_ipv6_mask | mac_src mac_src_wild | src_addrgrp } [ src_port_op [src_port1_str] src_port1_num [ src_port2_str | src_port2_num ] | src_portgrp ] { dest_any | dest_ip_prefix | dest_ip_addr dest_ip_mask | dest_ipv6_prefix | dest_ipv6_addr dest_ipv6_mask | mac_dest mac_dest_wild | dest_addrgrp } [ dest_port_op [dest_port1_str] dest_port1_num [ dest_port2_str | dest_port2_num ] | dest_portgrp ] [ { icmp_type [icmp_code] | icmp_str } | { icmpv6_type [icmpv6_code] | icmpv6_str } ] [ igmp_type | igmp_type_str ] [ [ precedence | precedence_str ] [ tos | tos_str ] | [ dscp | dscp_str ] ] [log] [capture_session] [fragments] [ plen_op plen1 [plen2] ] [urg] [ack] [psh] [rst] [syn] [fin] [established] [flow_label] [timerange] [ eth_proto | eth_proto_str ] [vlan] [cos] [match_count] | remark } ] ]

Syntax Description

show

Show running system information

name

Type: string

length: 64

List name

ip_ipv6_mac

IP/IPv6/MAC

ip  value: 9

Display IP information
ipv6  value: 10

Display IPv6 information
mac  value: 11

MAC configuration commands

capture

capture Not available in this release.

session

session

capture_session

Type: uinteger

min: 1  max: 48

session id

op_ip_ipv6_mac

IP/IPv6/MAC

ip  value: 9

Display IP information
ipv6  value: 10

Display IPv6 information
mac  value: 11

MAC configuration commands

access-lists

List access lists

acl_name

Type: string

length: 64

List name

__readonly__

TABLE_ip_ipv6_mac

frag_opt_permit_deny

frag_op_type

deny-all  value: 3

Drop all fragments
permit-all  value: 2

Alllow all fragments

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

permitdeny

Permit/deny

permit  value: 2

Specify packets to forward
deny  value: 3

Specify packets to reject

proto

Type: uinteger

min: 0  max: 255

A protocol number

TABLE_seqno

proto_str

Type: string

Protocol name

ip

IP

ip  value: 1

IP Protocol

ipv6

IPV6

ipv6  value: 1

IPv6 Protocol

src_any

SRCAny

any  value: 1

Any IP address

dest_any

DESTAny

any  value: 1

Any IP address

src_ip_prefix

Type: ipprefix

Source IP prefix

src_ip_addr

Type: ipaddr

Source IP address

src_ip_mask

Type: ipaddr

Source IP mask

src_ipv6_prefix

Type: ipv6prefix

Source IPv6 prefix

src_ipv6_addr

Type: ipv6addr

Source IP address

src_ipv6_mask

Type: ipv6addr

Source IP mask

mac_src

Type: ethernet

Source MAC address

mac_src_wild

Type: ethernet

Source MAC mask

dest_ip_prefix

Type: ipprefix

Destination IP prefix

dest_ip_addr

Type: ipaddr

Destination IP address

dest_ip_mask

Type: ipaddr

Destination IP mask

dest_ipv6_prefix

Type: ipv6prefix

Destination IPv6 prefix

dest_ipv6_addr

Type: ipv6addr

Destination IP address

dest_ipv6_mask

Type: ipv6addr

Destination IP mask

mac_dest

Type: ethernet

Destination MAC address

mac_dest_wild

Type: ethernet

Destination MAC mask

src_port_op

Source Port operator

lt  value: 4

Match only packets with a lower port number
gt  value: 5

Match only packets with a greater port number
eq  value: 6

Match only packets on a given port number
neq  value: 7

Match only packets not on a given port number
range  value: 8

Match only packets in the range of port numbers

dest_port_op

Destination Port operator

lt  value: 4

Match only packets with a lower port number
gt  value: 5

Match only packets with a greater port number
eq  value: 6

Match only packets on a given port number
neq  value: 7

Match only packets not on a given port number
range  value: 8

Match only packets in the range of port numbers

src_port1_str

Type: string

Source port name

src_port1_num

Type: uinteger

Source port number

src_port2_str

Type: string

Source port name

src_port2_num

Type: uinteger

Source port number

dest_port1_str

Type: string

Destination port name

dest_port1_num

Type: uinteger

Destination port number

dest_port2_str

Type: string

Destination port name

dest_port2_num

Type: uinteger

Destination port number

icmp_type

Type: uinteger

ICMP type

icmp_code

Type: uinteger

ICMP code

icmp_str

Type: string

ICMP message

icmpv6_type

Type: uinteger

ICMP type

icmpv6_code

Type: uinteger

ICMP code

icmpv6_str

Type: string

ICMP message

igmp_type

Type: uinteger

IGMP type

igmp_type_str

Type: string

IGMP type String

precedence

Type: uinteger

precedence

precedence_str

Type: string

precedence string

tos

Type: uinteger

tos

tos_str

Type: string

tos string

dscp

Type: uinteger

dscp

dscp_str

Type: string

dscp string

capture_session

Type: uinteger

min: 1  max: 48

capture session

global_capture_session

Type: uinteger

min: 1  max: 48

capture session

log

Log

enable  value: 1

Log the packet
disable  value: 2

Packet loging disabled

fragments

Fragments

enable  value: 1

Match on fragments
disable  value: 2

No fragment match

urg

URG

enable  value: 1

TCP urg flag set
disable  value: 2

TCP urg flag clear

ack

ACK

enable  value: 1

TCP ack flag set
disable  value: 2

TCP ack flag clear

psh

PSH

enable  value: 1

TCP psh flag set
disable  value: 2

TCP psh flag clear

rst

RST

enable  value: 1

TCP rst flag set
disable  value: 2

TCP rst flag clear

syn

SYN

enable  value: 1

TCP syn flag set
disable  value: 2

TCP syn flag clear

fin

FIN

enable  value: 1

TCP fin flag set
disable  value: 2

TCP fin flag clear

established

ESTABLISHED

enable  value: 1

TCP established connection
disable  value: 2

TCP not established connection

flow_label

Type: uinteger

IPv6 flow label

timerange

Type: string

Time-range

eth_proto

Type: hex

MAC protocol number

eth_proto_str

Type: string

MAC protocol name

vlan

Type: integer

min: 0  max: 4095

VLAN number

cos

Type: integer

min: 0  max: 7

CoS value

match_count

Type: longlong

Number of packets matching the ACL

remark

Type: string

Remark String

statistics

STATISTICS

enable  value: 1

Statistics enabled for ACL
disable  value: 2

Statistics not enabled for ACL

src_addrgrp

Type: string

Source address group

dest_addrgrp

Type: string

Destination address group

src_portgrp

Type: string

Source port group

dest_portgrp

Type: string

Destination port group

plen_op

Source Port operator

lt  value: 4

Match only packets with a lower packet length
gt  value: 5

Match only packets with a greater packet length
eq  value: 6

Match only packets on a given packet length
neq  value: 7

Match only packets not on a given packet length
range  value: 8

Match only packets in the range of packet lengths

plen1

Type: uinteger

Packet length minimum

plen2

Type: uinteger

packet length maximum

expanded

EXPANDED

expanded  value: 1

Expand groups

summary

SUMMARY

summary  value: 1

access list summary

private

PRIVATE

dynamic  value: 1

Dynamic ACLs

brief

BRIEF

brief  value: 1

print only aclnames with given capture session

Command Modes

- /exec

show accounting log

show accounting log [ i0 | start-time SYYYY SMonth SDate STime [ end-time EYYYY EMonth EDate ETime ] ]

Syntax Description

show

Show running system information

accounting

Show Accounting Information

log

Show Accounting Log

i0

Type: integer

min: 0  max: 500000

Log Size(in bytes)

start-time

Show messages from a given start-time

SYYYY

Type: integer

min: 1970  max: 2030

Enter year in YYYY format

SMonth

Type: string

length: 3

Enter Month as Jan, Feb, Mar, ..., Oct, Nov, or Dec

SDate

Type: integer

min: 1  max: 31

Enter day of month in dd format

STime

Type: string

length: 8

Enter hour, minutes, seconds as HH:MM:SS

end-time

Show messages from a given end-time

EYYYY

Type: integer

min: 1970  max: 2030

Enter year in YYYY format

EMonth

Type: string

length: 3

Enter Month as Jan, Feb, Mar, ..., Oct, Nov, or Dec

EDate

Type: integer

min: 1  max: 31

Enter day of month in dd format

ETime

Type: string

length: 8

Enter hour, minutes, seconds as HH:MM:SS

Command Modes

- /exec

show accounting log all

show accounting log all

Syntax Description

show

Show running system information

accounting

Show accounting configuration

log

Show Accounting Log

all

Display accounting log including show commands (Use <terminal log-all> to enable show command accounting)

Command Modes

- /exec

show accounting log last-index

show accounting log last-index [ __readonly__ last_index ]

Syntax Description

show

Show running system information

accounting

Show accounting configuration

log

Show Accounting Log

last-index

Show accounting log last index information

__readonly__

last_index

Type: integer

accounting log last index

Command Modes

- /exec

show accounting log nvram

show accounting log nvram [ i0 | start-time SYYYY SMonth SDate STime [ end-time EYYYY EMonth EDate ETime ] ]

Syntax Description

show

Show running system information

accounting

Show Accounting Information

log

Show Accounting Log

nvram

present in nvram

i0

Type: integer

min: 0  max: 500000

Log Size(in bytes)

start-time

Show messages from a given start-time

SYYYY

Type: integer

min: 1970  max: 2030

Enter year in YYYY format

SMonth

Type: string

length: 3

Enter Month as Jan, Feb, Mar, ..., Oct, Nov, or Dec

SDate

Type: integer

min: 1  max: 31

Enter day of month in dd format

STime

Type: string

length: 8

Enter hour, minutes, seconds as HH:MM:SS

end-time

Show messages from a given end-time

EYYYY

Type: integer

min: 1970  max: 2030

Enter year in YYYY format

EMonth

Type: string

length: 3

Enter Month as Jan, Feb, Mar, ..., Oct, Nov, or Dec

EDate

Type: integer

min: 1  max: 31

Enter day of month in dd format

ETime

Type: string

length: 8

Enter hour, minutes, seconds as HH:MM:SS

Command Modes

- /exec

show accounting log nvram last-index

show accounting log nvram last-index

Syntax Description

show

Show running system information

accounting

Show accounting configuration

log

Show Accounting Log

nvram

present in nvram

last-index

Show accounting log last index information

Command Modes

- /exec

show accounting log nvram start-seqnum

show accounting log nvram start-seqnum SSEQNUM [ end-seqnum ESEQNUM ]

Syntax Description

show

Show running system information

accounting

Show Accounting Information

log

Show Accounting Log

nvram

present in nvram

start-seqnum

Show messages starting from a given sequence number

end-seqnum

Show messages ending with a given sequence number

SSEQNUM

Type: integer

min: 1  max: 2000000000

Enter Starting Sequence Number

ESEQNUM

Type: integer

min: 1  max: 2000000000

Enter Starting Sequence Number

Command Modes

- /exec

show accounting log start-seqnum

show accounting log start-seqnum SSEQNUM [ end-seqnum ESEQNUM ]

Syntax Description

show

Show running system information

accounting

Show Accounting Information

log

Show Accounting Log

start-seqnum

Show messages starting from a given sequence number

end-seqnum

Show messages ending with a given sequence number

SSEQNUM

Type: integer

min: 1  max: 2000000000

Enter Starting Sequence Number

ESEQNUM

Type: integer

min: 1  max: 2000000000

Enter Starting Sequence Number

Command Modes

- /exec

show acl status

show acl status [ __readonly__ [status_log_string] ]

Syntax Description

show

Show running system information

acl

Show information about acl

status

Shows the status of last acl operation

__readonly__

status_log_string

Type: string

ppf entry string

Command Modes

- /exec

show arp access-lists

show arp access-lists [name] [ __readonly__ TABLE_arp arp_name [ TABLE_seqno seqno permitdeny reqresp ip { sender_ip_any | { sender_host sender_ip | sender_net_ip sender_ip_mask } } [ target_ip_any | { target_host target_ip | target_net_ip target_ip_mask } ] mac { sender_mac_any | { sender_mac_host sender_mac | sender_net_mac sender_mac_mask } } [ target_mac_any | { target_mac_host target_mac | target_net_mac target_mac_mask } ] [arp_log] | remark ] ] [ capture session session-id ]

Syntax Description

show

Show running system information

arp

ARP access-lists Not available in this release.

access-lists

List access lists

name

Type: string

length: 64

List name

__readonly__

arp_name

Type: string

Name of the ARP ACL

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

permitdeny

Permit/deny

permit  value: 2

Specify packets to forward
deny  value: 3

Specify packets to reject

ip

Any IP protocol

TABLE_arp

TABLE_seqno

reqresp

ARP_Request

request  value: 1

response  value: 2

sender_ip_any

Any

any  value: 1

Any IP address

sender_host

Host

host  value: 1

host IP address

sender_ip

Type: ipaddr

IP address <a.b.c.d>

sender_net_ip

Type: ipaddr

IP address <a.b.c.d>

sender_ip_mask

Type: ipaddr

IP mask <a.b.c.d>

target_ip_any

Any

any  value: 1

Any IP address

target_host

Host

host  value: 1

host IP address

target_ip

Type: ipaddr

IP address <a.b.c.d>

target_net_ip

Type: ipaddr

IP address <a.b.c.d>

target_ip_mask

Type: ipaddr

IP mask <a.b.c.d>

mac

MAC configuration commands

sender_mac_any

Any

any  value: 1

Any MAC address

sender_mac_host

Host

host  value: 1

host MAC address

sender_mac

Type: ethernet

MAC address EEEE.EEEE.EEEE

sender_net_mac

Type: ethernet

MAC address EEEE.EEEE.EEEE

sender_mac_mask

Type: ethernet

MAC mask EEEE.EEEE.EEEE

target_mac_any

Any

any  value: 1

Any MAC address

target_mac_host

Host

host  value: 1

host MAC address

target_mac

Type: ethernet

MAC address EEEE.EEEE.EEEE

target_net_mac

Type: ethernet

MAC address EEEE.EEEE.EEEE

target_mac_mask

Type: ethernet

MAC mask EEEE.EEEE.EEEE

remark

Type: string

Remark String

arp_log

Log

log  value: 1

capture

Enable packet capture on this filter for session Not available in this release.

session

Session ID <1-48> for this session

session-id

Type: uinteger

min: 1  max: 48

Session ID <1-48> for this session

Command Modes

- /exec

Chapter 3. B Show Commands

- show background

- show banner motd

- show bash-shell

- show bfd-app session status

- show bfd addrmap

- show bfd discrmap

- show bfd intfipmap

- show bfd neighbors

- show bfd scalar

- show bfd session

- show bgp (bgp)

- show bgp (bgp)

- show bgp (bgp)

- show bgp (bgp)

- show bgp (bgp)

- show bgp (bgp)

- show bgp (bgp)

- show bgp (bgp)

- show bgp community

- show bgp convergence

- show bgp convergence private

- show bgp dampening

- show bgp default-info

- show bgp extcommunity

- show bgp l3vpn

- show bgp neighbors (bgp)

- show bgp neighbors (bgp)

- show bgp neighbors commands

- show bgp neighbors flap-statistics

- show bgp neighbors paths

- show bgp paths

- show bgp peer-template

- show bgp prefix-list

- show bgp private

- show bgp private attr

- show bgp private damp

- show bgp process

- show bgp received-paths

- show bgp regexp

- show bgp self-originated

- show bgp sessions

- show bgp statistics

- show bgp summary (bgp)

- show bgp summary (bgp)

- show boot

- show boot auto-copy

- show boot auto-copy list

- show boot current

- show boot module

- show boot sup-1

- show boot sup-2

- show boot variables

- show bootmode

- show buffers ip

show background

show background

Syntax Description

show

Show running system information

background

show background processes (started with 'source background <file>' command)

Command Modes

- /exec

show banner motd

show banner motd [ __readonly__ banner_msg b_msg ]

Syntax Description

show

Show running system information

banner

Show current motd banner message

motd

Show current motd banner message

__readonly__

banner_msg

The banner message

b_msg

Type: string

The banner message

Command Modes

- /exec

show bash-shell

show bash-shell [ __readonly__ operation_status o_status ]

Syntax Description

show

Show running system information

bash-shell

Show bash shell status

__readonly__

operation_status

Bash shell status

o_status

operational status of bash shell

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show bfd-app session status

show bfd-app session status { src-ip { src_ip dest-ip dest_ip | src_ipv6 dest-ip dest_ipv6 } { iod iod_id | intf intf_id } | all }

Syntax Description

show

Show running system information

bfd-app

BFD application commands

session

session operation

src-ip

Source ip

src_ip

Type: ipaddr

Source ip value

src_ipv6

Type: ipv6addr

Source ipv6 value

dest-ip

Destination ip

dest_ip

Type: ipaddr

Destination ip value

dest_ipv6

Type: ipv6addr

Destination ipv6 value

iod

interface iod

iod_id

Type: hex

Interface iod in hex

intf

interface

intf_id

Type: interface

Interface Id

status

status of sessions

all

All sessions

all  value: 1

Get session status for all sessions

Command Modes

- /exec

show bfd addrmap

show bfd addrmap [ application appid discriminator discr address-type addrtype address addr ] [ __readonly__ TABLE_bfdSessMapTable ciscoBfdSessApplicationId ciscoBfdSessDiscriminator ciscoBfdSessAddrType ciscoBfdSessAddr ciscoBfdSessMapBfdIndex ]

Syntax Description

show

Show running system information

bfd

BFD commands

addrmap

Session

application

discriminator

address-type

address

appid

Type: uinteger

discr

Type: uinteger

addrtype

Type: uinteger

addr

Type: ipaddr

__readonly__

TABLE_bfdSessMapTable

Address Map table

ciscoBfdSessApplicationId

Type: uinteger

ciscoBfdSessDiscriminator

Type: uinteger

ciscoBfdSessAddrType

Type: uinteger

ciscoBfdSessAddr

Type: ipaddr

ciscoBfdSessMapBfdIndex

Type: uinteger

Command Modes

- /exec

show bfd discrmap

show bfd discrmap [discr] [ __readonly__ TABLE_bfdDiscMapTable ciscoBfdSessDiscMapIndex ]

Syntax Description

show

Show running system information

bfd

BFD commands

discrmap

Session

discr

Type: uinteger

__readonly__

TABLE_bfdDiscMapTable

Discriminator map table

ciscoBfdSessDiscMapIndex

Type: uinteger

Command Modes

- /exec

show bfd intfipmap

show bfd intfipmap [ interface intf address-type addrtype address addr ] [ __readonly__ TABLE_ipMapTable ciscoBfdSessInterface ciscoBfdSessAddrType ciscoBfdSessAddr ciscoBfdSessIpMapIndex ]

Syntax Description

show

Show running system information

bfd

BFD commands

intfipmap

Session

interface

address-type

address

intf

Type: uinteger

addrtype

Type: uinteger

addr

Type: ipaddr

__readonly__

TABLE_ipMapTable

ip map table

ciscoBfdSessInterface

Type: uinteger

ciscoBfdSessAddrType

Type: uinteger

ciscoBfdSessAddr

Type: ipaddr

ciscoBfdSessIpMapIndex

Type: uinteger

Command Modes

- /exec

show bfd neighbors

show bfd neighbors { [ module module_no ] | [ interface intf_id ] | [ application bfd_cli_client_names ] | [ src-ip { src_ip | src_ipv6 } ] | [ dest-ip { dest_ip | dest_ipv6 } ] | [ vrf { vrf-name | vrf-known-name | all } ] } + [details] [ __readonly__ TABLE_bfdNeighbor local_disc [header] [vrf_name] [src_ip_addr] [dest_ip_addr] [remote_disc] [local_state] [remote_state] [holddown] [cur_detect_mult] [intf] [echo] [echo_tx] [local_diag] [demand] [poll] [min_tx] [min_rx] [local_multi] [dectect_timer] [down_count] [tx_interval] [rx_count] [rx_avg] [rx_min] [rx_max] [last_rx] [tx_count] [tx_avg] [tx_min] [tx_max] [last_tx] [app] [up_time] [version] [diag] [state_bit] [demand_bit] [poll_bit] [final_bit] [multiplier] [length] [my_disc] [your_disc] [min_tx_interval] [req_min_rx] [min_echo_interval] [out_str] [host_lc] [down_reason] [no_host_reason] [parent] [per_link_str] [auth] [auth_bit] [print_details] ]

Syntax Description

show

Show running system information

bfd

BFD commands

neighbors

neighbors

module

module

module_no

Type: uinteger

min: 0  max: 32

module number

interface

interface

intf_id

Type: interface

show bfd sessions based on interface id

application

application

bfd_cli_client_names

Type: string

length: 255

__nil__ Clients need to register with bfd for this list

src-ip

Source ip

src_ip

Type: ipaddr

Source ip value

src_ipv6

Type: ipv6addr

Source ipv6 value

dest-ip

Destination ip

dest_ip

Type: ipaddr

Destination ip value

dest_ipv6

Type: ipv6addr

Destination ipv6 value

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

details

details

__readonly__

TABLE_bfdNeighbor

BFD Neighbor table

header

Type: uinteger

Header

vrf_name

Type: string

vrf name

src_ip_addr

Type: ipaddr

Source IP address

dest_ip_addr

Type: ipaddr

Destination IP address

local_disc

Type: uinteger

Local Discriminator

remote_disc

Type: uinteger

Remote Discriminator

local_state

Type: string

Local State

remote_state

Type: string

Remote State

holddown

Type: uinteger

Hold Down Time

cur_detect_mult

Type: uinteger

Current Detection Multiplier

intf

Type: interface

Interface

echo

Type: uinteger

Echo enabled

echo_tx

Type: uinteger

Echo Tx Interval

local_diag

Type: uinteger

Local Diag

demand

Type: uinteger

Demand Mode

poll

Type: uinteger

Poll Bit

min_tx

Type: uinteger

Local Min Tx Interval

min_rx

Type: uinteger

Local Min Rx Interval

local_multi

Type: uinteger

Local Detection Multiplier

dectect_timer

Type: uinteger

Current Detection Timer

down_count

Type: uinteger

Session Down Count

tx_interval

Type: uinteger

Tx Interval

rx_count

Type: uinteger

Tx Count

rx_avg

Type: uinteger

Rx Interval Avg

rx_min

Type: uinteger

Rx Interval Min

rx_max

Type: uinteger

Rx Interval Max

last_rx

Type: uinteger

Last Rx time

tx_count

Type: uinteger

Tx Count

tx_avg

Type: uinteger

Tx Interval Avg

tx_min

Type: uinteger

Tx Interval Min

tx_max

Type: uinteger

Tx Interval Max

last_tx

Type: uinteger

Last Tx time

app

Type: string

App name

up_time

Type: longlong

Up time

version

Type: uinteger

Version in Last Packet

diag

Type: uinteger

diag in Last Packet

state_bit

Type: string

State Bit in Last Packet

demand_bit

Type: uinteger

Demand Bit in Last Packet

poll_bit

Type: uinteger

Poll Bit in Last Packet

final_bit

Type: uinteger

Final Bit in Last Packet

multiplier

Type: uinteger

Detection Multiplier in Last Packet

length

Type: uinteger

Length in Last Packet

my_disc

Type: uinteger

My Discriminator in Last Packet

your_disc

Type: uinteger

Your Discriminator in Last Packet

min_tx_interval

Type: uinteger

Min Tx Interval in Last Packet

req_min_rx

Type: uinteger

Required Rx Interval in Last Packet

min_echo_interval

Type: uinteger

Min Echo Interval in Last Packet

out_str

Type: string

No Host LC string

parent

Type: uinteger

Parent Session

per_link_str

Type: string

Per Link string

host_lc

Type: uinteger

Host LC

down_reason

Type: string

Session Down Reason

no_host_reason

Type: string

Not Hosted Reason

auth

Type: string

Authentication Mode

auth_bit

Type: uinteger

Auth Bit in Last Packet

print_details

Type: uinteger

print details

Command Modes

- /exec

show bfd scalar

show bfd scalar [ __readonly__ adminStatus version notifEnable ]

Syntax Description

show

Show running system information

bfd

BFD commands

scalar

bfd mib scalars

__readonly__

adminStatus

bfd admin status

enabled  value: 1

BFD enabled
disabled  value: 2

BFD disabled

version

Type: uinteger

bfd version number

notifEnable

Type: uinteger

Enable bfd traps

Command Modes

- /exec

show bfd session

show bfd session { [ discriminator sessionIndex ] | [ interface intf_id ] | [ application app_name ] | [ src-ip { src_ip | src_ipv6 } ] | [ dest-ip { dest_ip | dest_ipv6 } ] | [ vrf { vrf-name | vrf-known-name | all } ] } + [ __readonly__ vrf_name_header TABLE_bfdSessTable ciscoBfdSessIndex isMember ciscoBfdSessApplicationId ciscoBfdSessDiscriminator ciscoBfdSessRemoteDiscr ciscoBfdSessUdpPort ciscoBfdSessState remoteBfdSessState ciscoBfdSessRemoteHeardFlag ciscoBfdSessDiag remoteBfdSessDiag ciscoBfdSessOperMode ciscoBfdSessDemandModeDesiredFlag ciscoBfdSessEchoFuncModeDesiredFlag ciscoBfdSessControlPlanIndepFlag ciscoBfdSessAddrType ciscoBfdSessAddr localBfdSessAddr ciscoBfdSessDesiredMinTxInterval ciscoBfdSessReqMinRxInterval ciscoBfdSessReqMinEchoRxInterval ciscoBfdSessDetectMult remoteBfdSessDesiredMinTxInterval remoteBfdSessReqMinRxInterval remoteBfdSessReqMinEchoRxInterval remoteBfdSessDetectMult ciscoBfdSessStorType ciscoBfdSessRowStatus ciscoBfdSessAuthPresFlag ciscoBfdSessAuthenticationType ciscoBfdSessVersionNumber ciscoBfdSessType ciscoBfdSessInterface ciscoBfdSessPerfPktIn ciscoBfdSessPerfPktOut ciscoBfdSessUpTime ciscoBfdSessPerfLastSessDownTime ciscoBfdSessPerfLastCommLostDiag ciscoBfdSessPerfSessUpCount ciscoBfdSessPerfDiscTime ciscoBfdSessPerfPktInHC ciscoBfdSessPerfPktOutHC effasyncdt effechodt ]

Syntax Description

show

Show running system information

bfd

BFD commands

session

Session

discriminator

Session local discriminator

sessionIndex

Type: uinteger

interface

interface

intf_id

Type: interface

show bfd sessions based on interface id

application

application

app_name

Type: string

show bfd session based on application name

src-ip

Source ip

src_ip

Type: ipaddr

Source ip value

src_ipv6

Type: ipv6addr

Source ipv6 value

dest-ip

Destination ip

dest_ip

Type: ipaddr

Destination ip value

dest_ipv6

Type: ipv6addr

Destination ipv6 value

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

vrf_name_header

Type: string

TABLE_bfdSessTable

BFD Session table

ciscoBfdSessIndex

Type: uinteger

isMember

Type: uinteger

ciscoBfdSessApplicationId

Type: uinteger

ciscoBfdSessDiscriminator

Type: uinteger

ciscoBfdSessRemoteDiscr

Type: uinteger

ciscoBfdSessUdpPort

Type: uinteger

ciscoBfdSessState

Session state

adminDown  value: 1

adminDown
down  value: 2

down
init  value: 3

init
up  value: 4

up
failing  value: 5

failing

remoteBfdSessState

Session state

adminDown  value: 1

adminDown
down  value: 2

down
init  value: 3

init
up  value: 4

up
failing  value: 5

failing

ciscoBfdSessRemoteHeardFlag

Type: uinteger

ciscoBfdSessDiag

Session diagnostic code

noDiagnostic  value: 1

noDiagnostic
controlDetectionTimeExpired  value: 2

controlDetectionTimeExpired
echoFunctionFailed  value: 3

echoFunctionFailed
neighborSignaledSessionDown  value: 4

neighborSignaledSessionDown
forwardingPlaneReset  value: 5

forwardingPlaneReset
pathDown  value: 6

pathDown
concatenatedPathDown  value: 7

concatenatedPathDown
administrativelyDown  value: 8

administrativelyDown
reverseConcatenatedPathDown  value: 9

reverseConcatenatedPathDown

remoteBfdSessDiag

Session diagnostic code

noDiagnostic  value: 1

noDiagnostic
controlDetectionTimeExpired  value: 2

controlDetectionTimeExpired
echoFunctionFailed  value: 3

echoFunctionFailed
neighborSignaledSessionDown  value: 4

neighborSignaledSessionDown
forwardingPlaneReset  value: 5

forwardingPlaneReset
pathDown  value: 6

pathDown
concatenatedPathDown  value: 7

concatenatedPathDown
administrativelyDown  value: 8

administrativelyDown
reverseConcatenatedPathDown  value: 9

reverseConcatenatedPathDown

ciscoBfdSessOperMode

ciscoBfdSessOperMode

asyncModeWEchoFun  value: 1

asyncModeWEchoFun
asynchModeWOEchoFun  value: 2

asynchModeWOEchoFun
demandModeWEchoFunction  value: 3

demandModeWEchoFunction
demandModeWOEchoFunction  value: 4

demandModeWOEchoFunction

ciscoBfdSessDemandModeDesiredFlag

Type: uinteger

ciscoBfdSessEchoFuncModeDesiredFlag

Type: uinteger

ciscoBfdSessControlPlanIndepFlag

Type: uinteger

ciscoBfdSessAddrType

ciscoBfdSessAddrType

unknown  value: 0

unknown
ipv4  value: 1

ipv4
ipv6  value: 2

ipv6

localBfdSessAddr

Type: ipaddr

ciscoBfdSessAddr

Type: ipaddr

ciscoBfdSessDesiredMinTxInterval

Type: uinteger

ciscoBfdSessReqMinRxInterval

Type: uinteger

ciscoBfdSessReqMinEchoRxInterval

Type: uinteger

ciscoBfdSessDetectMult

Type: uinteger

remoteBfdSessDesiredMinTxInterval

Type: uinteger

remoteBfdSessReqMinRxInterval

Type: uinteger

remoteBfdSessReqMinEchoRxInterval

Type: uinteger

remoteBfdSessDetectMult

Type: uinteger

ciscoBfdSessStorType

ciscoBfdSessStorType

other  value: 1

other
volatile  value: 2

volatile
nonVolatile  value: 3

nonVolatile
permanent  value: 4

permanent
readOnly  value: 5

readOnly

ciscoBfdSessRowStatus

Type: integer

ciscoBfdSessAuthPresFlag

Type: uinteger

ciscoBfdSessAuthenticationType

ciscoBfdSessAuthenticationType

None  value: 0

None
simplePassword  value: 1

simplePassword
keyedMD5  value: 2

keyedMD5
meticulousKeyedMD5  value: 3

meticulousKeyedMD5
keyedSHA1  value: 4

keyedSHA1
meticulousKeyedSHA1  value: 5

meticulousKeyedSHA1

ciscoBfdSessVersionNumber

Type: uinteger

ciscoBfdSessType

ciscoBfdSessType

singleHop  value: 1

singleHop
multiHop  value: 2

multiHop

ciscoBfdSessInterface

Type: uinteger

ciscoBfdSessPerfPktIn

Type: uinteger

ciscoBfdSessPerfPktOut

Type: uinteger

ciscoBfdSessUpTime

Type: uinteger

ciscoBfdSessPerfLastSessDownTime

Type: uinteger

ciscoBfdSessPerfLastCommLostDiag

Type: uinteger

ciscoBfdSessPerfSessUpCount

Type: uinteger

ciscoBfdSessPerfDiscTime

Type: time

ciscoBfdSessPerfPktInHC

Type: longlong

ciscoBfdSessPerfPktOutHC

Type: longlong

effasyncdt

Type: uinteger

effechodt

Type: uinteger

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { { ip | ipv4 } { unicast | multicast } | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] } [ ip-addr [ ip-mask [longer-prefixes] ] | ip-prefix [longer-prefixes] | labels | exported | imported ] | { ipv6 { unicast | multicast } | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast } [ ipv6-prefix [longer-prefixes] | labels | exported | imported ] | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] [ ip-addr [ip-mask] | ip-prefix | labels | mdt-group mdt-group ] | { ipv4 | ipv6 } unicast [injected-routes] | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } [ { ip-addr [ip-mask] | ip-prefix } | ve-id ve-id block-offset ve-bs ] ] | all } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_rd [ rd_val rd_vrf ] TABLE_prefix { ipprefix | ipv6prefix } totalpaths bestpathnr advertisedto scheduledto flags mpath [prefixversion] on-newlist on-xmitlist suppressed needsresync locked TABLE_path pathnr best status type { ipnexthop | ipv6nexthop } { neighbor | ipv6neighbor } neighborid metric localpref weight [ existpath aspath origin policyincomplete pathvalid pathbest pathdeleted pathstaled pathhistory pathmultipath pathovermaxaslimit pathnolabeledrnh nexthopmetric aggregator aggregatoras TABLE_community community TABLE_extcommunity extcommunity originatorid TABLE_clusterlist clusterlist flappenalty dampenedtime flaps flaptime flapflags flapindex flaphalflife flapreuse flapsuppress flapmax con_type con_len con_rd con_ip mdt_grp_addr inlabel vpn hold_down outlabel ] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip-addr

Type: ipaddr

Display one particular network from the BRIB in detail

ip-mask

Type: ipaddr

Mask for one particular prefix in the BRIB

ip-prefix

Type: ipprefix

Display one particular prefix from the BRIB in detail

ipv6-prefix

Type: ipv6prefix

Display one particular IPv6 prefix from the BRIB in detail

longer-prefixes

Display route and more specific routes

labels

Display BGP labels for prefixes

exported

Display only exported prefixes

imported

Display only imported prefixes

injected-routes

Display only injected prefixes

mdt-group

Display prefixes with MDT group address Not available in this release.

mdt-group

Type: ipaddr

MDT group address

rd

Display information for a route distinguisher

ve-id

VPLS VE ID Not available in this release.

ve-id

Type: uinteger

min: 0  max: 65535

VPLS VE ID

block-offset

VPLS VE Block offset Not available in this release.

ve-bs

Type: uinteger

min: 0  max: 65535

VPLS VE Block offset

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

ipv4

Display BGP information for IPv4 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

ip

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

all

Display BGP information for all address families

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_rd

rd_val

Type: string

rd_vrf

Type: string

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

mpath

Type: string

advertisedto

Type: string

scheduledto

Type: string

prefixversion

Type: integer

on-newlist

Type: bool

on-xmitlist

Type: bool

suppressed

Type: bool

needsresync

Type: bool

locked

Type: bool

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

existpath

Type: string

aspath

Type: string

origin

Type: string

policyincomplete

Type: bool

pathvalid

Type: bool

pathbest

Type: bool

pathdeleted

Type: bool

pathstaled

Type: bool

pathhistory

Type: bool

pathmultipath

Type: bool

pathovermaxaslimit

Type: bool

pathnolabeledrnh

Type: bool

nexthopmetric

Type: integer

aggregator

Type: ipaddr

aggregatoras

Type: integer

inlabel

Type: string

vpn

Type: string

hold_down

Type: string

outlabel

Type: string

flappenalty

Type: integer

dampenedtime

Type: string

flaps

Type: integer

flaptime

Type: string

flapflags

Type: integer

flapindex

Type: integer

flaphalflife

Type: integer

flapreuse

Type: integer

flapsuppress

Type: integer

flapmax

Type: integer

con_type

Type: uinteger

con_len

Type: uinteger

con_rd

Type: string

con_ip

Type: ipaddr

mdt_grp_addr

Type: ipaddr

TABLE_community

community

Type: string

TABLE_extcommunity

extcommunity

Type: string

originatorid

Type: ipaddr

TABLE_clusterlist

clusterlist

Type: ipaddr

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | all } { route-map { rmap-name | rmap-name } | filter-list { fltrlist-name | test_pol_name } | { community-list { commlist-name | test_pol_name } | extcommunity-list { extcommlist-name | test_pol_name } } [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags rd_val rd_vrf TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

route-map

Display routes matching the route-map

rmap-name

Type: string

pattern: [!-~]*

length: 63

Route-map name

rmap-name

Type: string

Known route-map name

filter-list

Display routes matching the filter-list

fltrlist-name

Type: string

length: 63

Name of filter-list

community-list

Display routes matching the community-list

commlist-name

Type: string

length: 63

Name of community-list

extcommunity-list

Display routes matching the extcommunity-list

extcommlist-name

Type: string

length: 63

Name of extcommunity-list

test_pol_name

Type: string

An existing test-list policy

rd

Display information for a route distinguisher

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

all

Display BGP information for all address families

exact-match

Exact match of the communities

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

rd_val

Type: string

rd_vrf

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } { rib-install | rib-uninstall | rib-pending } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

rib-install

Routes installed in RIB

rib-uninstall

Routes not installed in RIB

rib-pending

Routes not acknowledged by RIB

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { { ip | ipv4 } { unicast | multicast } | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] } nexthop ipnexthop | { ipv6 { unicast | multicast } | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast } nexthop ipv6nexthop } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags rd_val rd_vrf TABLE_path pathnr best status type ipnexthop-out ipv6nexthop-out neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

rd

Display information for a route distinguisher

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

nexthop

Display routes matching the nexthop

ipnexthop

Type: ipaddr

Nexthop address

ipv6nexthop

Type: ipv6addr

Nexthop address

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

rd_val

Type: string

rd_vrf

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop-out

Type: ipaddr

ipv6nexthop-out

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { { ip | ipv4 } { unicast | multicast } | vpnv4 unicast | ipv4 mdt | l2vpn vpls } nexthop-database [ipnexthop] | { ipv6 { unicast | multicast } | vpnv6 unicast } nexthop-database [ipv6nexthop] | all nexthop-database } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_nhvrf nhvrf-name-out TABLE_nhafi nhafi TABLE_nhsafi nhsafi TABLE_nhtriggerdelay nhcriticaldelay nhnoncriticaldelay [ TABLE_nexthop { ipnexthop-out | ipv6nexthop-out } refcount igpmetric igptype igppref TABLE_attachedhops { attachedhop | ipv6attachedhop } interface [ TABLE_labels index label ] attached local reachable labeled filtered resolvetime { ribroute | ipv6ribroute } { pendingupdate | pendingtime } nextadvertise ] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

nexthop-database

Display nexthop database

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

mdt

Display BGP information for multicast distribution tree Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

ipnexthop

Type: ipaddr

Nexthop address

ipv6nexthop

Type: ipv6addr

Nexthop address

__readonly__

TABLE_nhvrf

nhvrf-name-out

Type: string

TABLE_nhafi

nhafi

Type: integer

TABLE_nhsafi

nhsafi

Type: integer

TABLE_nhtriggerdelay

nhcriticaldelay

Type: uinteger

nhnoncriticaldelay

Type: uinteger

TABLE_nexthop

ipnexthop-out

Type: ipaddr

ipv6nexthop-out

Type: ipv6addr

refcount

Type: integer

igpmetric

Type: integer

igptype

Type: integer

igppref

Type: integer

TABLE_attachedhops

attachedhop

Type: ipaddr

ipv6attachedhop

Type: ipv6addr

interface

Type: string

TABLE_labels

index

Type: integer

label

Type: integer

attached

Type: bool

local

Type: bool

reachable

Type: bool

labeled

Type: bool

filtered

Type: bool

resolvetime

Type: string

pendingupdate

Type: bool

pendingtime

Type: string

ribroute

Type: ipprefix

ipv6ribroute

Type: ipv6prefix

nextadvertise

Type: string

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } flap-statistics [ ip-prefix | ip-addr [ip-mask] ] | ipv6 { unicast | multicast } flap-statistics [ipv6-prefix] | all flap-statistics } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi dampeningenabled historypaths dampenedpaths TABLE_prefix ipprefix ipv6prefix status best pathtype peer ipv6peer flapcount duration reuse penalty suppresslimit reuselimit ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

flap-statistics

Display route flap statistics

ip-prefix

Type: ipprefix

Display flap statistics for one prefix

ipv6-prefix

Type: ipv6prefix

Display flap statistics for one prefix

ip-addr

Type: ipaddr

Display flap statistics for one network

ip-mask

Type: ipaddr

Network mask

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

Type: integer

TABLE_safi

safi

Type: integer

dampeningenabled

Type: bool

historypaths

Type: integer

dampenedpaths

Type: integer

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

status

Type: string

best

Type: bool

pathtype

Type: string

peer

Type: ipaddr

ipv6peer

Type: ipv6addr

flapcount

Type: integer

duration

Type: string

reuse

Type: string

penalty

Type: integer

suppresslimit

Type: integer

reuselimit

Type: integer

Command Modes

- /exec

show bgp (bgp)

show [ip] bgp { peer-session [session-template-name] | peer-policy [policy-template-name] } [ __readonly__ present [ TABLE_command command polarity ] [ TABLE_vrf vrf-name TABLE_peer inheritingpeer ] ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

peer-session

Display information about a peer-session

peer-policy

Display information about a peer-policy

session-template-name

Type: string

length: 80

Peer-session name

policy-template-name

Type: string

length: 80

Peer-policy name

__readonly__

present

Type: bool

TABLE_command

command

Type: string

polarity

Type: bool

TABLE_vrf

vrf-name

Type: string

TABLE_peer

inheritingpeer

Type: string

Command Modes

- /exec

show bgp (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } policy statistics { redistribute [ { eigrp | isis | ospf | rip } tag | static | direct | amt | lisp ] | neighbor neighbor-id [ default-originate | { route-map | filter-list | prefix-list } { in | out } ] | dampening | network { ip-addr mask ip-mask | ip-prefix } | aggregate-address { ip-addr ip-mask | ip-prefix } { suppress-map | advertise-map } } | vpnv4 unicast policy statistics neighbor neighbor-id [ { route-map | filter-list | prefix-list } { in | out } ] | ipv6 { unicast | multicast } policy statistics { redistribute [ { eigrp | isis | ospfv3 | rip } tag | static | direct | amt | lisp ] | neighbor { neighbor-id | ipv6-neighbor-id } [ default-originate | { route-map | filter-list | prefix-list } { in | out } ] | dampening | network ipv6-prefix | aggregate-address ipv6-prefix { suppress-map | advertise-map } } } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-polstats [rpm-handle-count] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

policy

Display policy related information

statistics

Display Route Filter statistics

redistribute

Statistics for redistribution

isis

ISO IS-IS

ospf

Open Shortest Path First

ospfv3

Open Shortest Path First v3

rip

Routing Information Protocol

eigrp

Enhanced Interior Gateway Protocol

static

Static routes

direct

Directly connected

amt

AMT anycast prefix

lisp

LISP EID-prefixes

tag

Type: string

Source protocol tag

neighbor

Show neighbor specific counters

neighbor-id

Type: ipaddr

Neighbor IPv4 address

ipv6-neighbor-id

Type: ipv6addr

Neighbor IPv6 address

route-map

Neighbor route-map

prefix-list

Neighbor prefix-list

filter-list

Neighbor filter-list

out

Outbound policy

in

Inbound policy

default-originate

Default-originate policy

dampening

Show dampening info

network

Configured IP prefix to advertise

mask

Configured mask of the IP prefix advertised

aggregate-address

Configured BGP aggregate prefixes

suppress-map

Statistics of suppress policy

advertise-map

Statistics of advertise policy

ip-addr

Type: ipaddr

IP network advertised

ip-mask

Type: ipaddr

Dotted 4-octet mask

ip-prefix

Type: ipprefix

IP prefix in CIDR format

ipv6-prefix

Type: ipv6prefix

IPv6 prefix format: xxxx:xxxx/ml, xxxx:xxxx::/ml, xxxx::xx/128

__readonly__

TABLE_vrf

vrf-name-polstats

Type: string

rpm-handle-count

Type: integer

Command Modes

- /exec

show bgp community

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | all } community { regexp-str | { comm-id | wellknown-id } + [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags rd_val rd_vrf TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

rd

Display information for a route distinguisher

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

all

Display BGP information for all address families

community

Display routes matching the BGP communities

regexp-str

Type: string

Regular expression to match the communities

comm-id

Type: community

BGP community value

wellknown-id

BGP wellknown community

no-export  value: 1

Do not export to next AS (well-known community)
no-advertise  value: 2

Do not advertise to any peer (well-known community)
no-export-subconfed  value: 3

Do not send outside local AS (well known community)

exact-match

Exact match of the communities

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

rd_val

Type: string

rd_vrf

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp convergence

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] convergence [detail] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out bestpathtimeout updatedelay firstpeerup configuredtimeout timerrunning timerexpires starttime configdonetime juststarted initwaittime ldpconverged ulibconvergencesent TABLE_afi afi TABLE_safi safi signalledtime firstbestpathdone riblibconvergencesent importtimerrunning importtimerexpires TABLE_rcvdpeers peer ipv6peer peerstarttime TABLE_notrcvdpeers notpeer notipv6peer nokeepalive ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

convergence

Display information about convergence

detail

Display detailed information about convergence

__readonly__

TABLE_vrf

vrf-name-out

Type: string

bestpathtimeout

Type: integer

updatedelay

Type: bool

firstpeerup

Type: string

configuredtimeout

Type: integer

timerrunning

Type: bool

timerexpires

Type: string

starttime

Type: string

configdonetime

Type: string

juststarted

Type: bool

initwaittime

Type: string

ldpconverged

Type: string

ulibconvergencesent

Type: string

TABLE_afi

afi

Type: integer

TABLE_safi

safi

Type: integer

signalledtime

Type: string

firstbestpathdone

Type: bool

riblibconvergencesent

Type: string

importtimerrunning

Type: bool

importtimerexpires

Type: string

TABLE_rcvdpeers

peer

Type: ipaddr

ipv6peer

Type: ipv6addr

peerstarttime

Type: string

TABLE_notrcvdpeers

notpeer

Type: ipaddr

notipv6peer

Type: ipv6addr

nokeepalive

Type: bool

Command Modes

- /exec

show bgp convergence private

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] convergence private [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

convergence

Display information about convergence

private

Display private information about convergence

Command Modes

- /exec

show bgp dampening

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | all } dampening { dampened-paths [ regexp regexp-str ] | flap-statistics | parameters | history-paths [ regexp regexp-str ] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags rd_val rd_vrf TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

dampened-paths

Display all dampened paths

history-paths

Display all history paths

dampening

Display dampening info

flap-statistics

Display flap statistics for routes

parameters

Display dampening parameters

rd

Display information for a route distinguisher

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

all

Display BGP information for all address families

regexp

Display routes matching the AS path regular expression

regexp-str

Type: string

Regular expression to match the AS paths

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

rd_val

Type: string

rd_vrf

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp default-info

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } default-info [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

default-info

Display information about default routes

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

Command Modes

- /exec

show bgp extcommunity

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | all } extcommunity { regexp-str | 4byteas-generic { transitive ext-comm-gen-trans | non-transitive ext-comm-gen-nontrans } + [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags rd_val rd_vrf TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

rd

Display information for a route distinguisher

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

all

Display BGP information for all address families

extcommunity

Display routes matching the BGP extcommunities

4byteas-generic

Generic extended community

regexp-str

Type: string

Regular expression to match the extcommunities

transitive

Transitive extcommunity

non-transitive

Non-Transitive extcommunity

ext-comm-gen-trans

Type: community

Extcommunity number aa4:nn format

ext-comm-gen-nontrans

Type: community

Extcommunity number aa4:nn format

exact-match

Exact match of the extcommunities

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

rd_val

Type: string

rd_vrf

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp l3vpn

show bgp l3vpn [detail] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out [vrf-id] [vrf-state] [vrf-state-rsn] [vrf-router-id] [vrf-cfgd-id] [vrf-local-as] [vrf-confed-id] [vrf-cluster-id] [vrf-peers] [vrf-pending-peers] [vrf-est-peers] [vrf-rd] [vrf-cfgd-max-as-limit] [vrf-max-as-limit] [vrf-pending-rd] TABLE_af af-id [af-name] [af-state] [af-state-rsn] [af-num-peers] [af-num-active-peers] [af-peer-routes] [af-peer-paths] [af-peer-networks] [af-peer-aggregates] [af-export-rmap] [af-import-rmap] [af-retain-rt] [af-label-mode] [af-aggregate-label] [af-rr] [ TABLE_export_rt export-rt ] [ TABLE_import_rt import-rt ] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

l3vpn

BGP l3vpn information Not available in this release.

vrf

Virtual Router Context

detail

Detailed information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

__readonly__

Read Only

TABLE_vrf

vrf-name-out

Type: string

VRF name

vrf-id

Type: uinteger

VRF ID

vrf-state

Type: string

VRF State

vrf-state-rsn

Type: string

VRF State Reason

vrf-router-id

Type: string

Router ID

vrf-cfgd-id

Type: string

Configured Router-ID

vrf-local-as

Type: string

Local AS

vrf-confed-id

Type: string

Cluster-ID

vrf-cluster-id

Type: string

Cluster-ID

vrf-peers

Type: uinteger

No. of configured peers

vrf-pending-peers

Type: uinteger

No. of pending peers

vrf-est-peers

Type: uinteger

No. of established peers

vrf-rd

Type: string

VRF RD

vrf-cfgd-max-as-limit

Type: uinteger

Configured maxas-limit

vrf-max-as-limit

Type: uinteger

Active maxas-limit

vrf-pending-rd

Type: string

VRF pending RD

TABLE_af

af-id

Type: uinteger

AF table ID

af-name

Type: string

AF table name

af-state

Type: string

AF table state

af-state-rsn

Type: string

AF table state reason

af-num-peers

Type: uinteger

No. of peers

af-num-active-peers

Type: uinteger

No. of active peers

af-peer-routes

Type: uinteger

No. of peer routes

af-peer-paths

Type: uinteger

No. of peer paths

af-peer-networks

Type: uinteger

No. of peer networks

af-peer-aggregates

Type: uinteger

No. of aggregates

af-export-rmap

Type: string

Export route-map

af-import-rmap

Type: string

Import route-map

af-retain-rt

Type: string

Retain RT

af-label-mode

Type: string

Label allocation mode

af-aggregate-label

Type: uinteger

Aggregate Label

af-rr

Type: bool

Is a Route-reflector

TABLE_export_rt

export-rt

Type: string

Export route target

TABLE_import_rt

import-rt

Type: string

Import route target

Command Modes

- /exec

show bgp neighbors (bgp)

show bgp { [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } | vpnv4 unicast | vpnv6 unicast | ipv6 labeled-unicast } neighbors { neighbor-id | ipv6-neighbor-id } { routes [ advertised | received | dampened ] | advertised-routes | received-routes } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbors

Display all configured BGP neighbors

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

ipv6-neighbor-id

Type: ipv6addr

Display one particular IPv6 BGP neighbor

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

routes

Display all routes advertised/received to/from peer

advertised

Display all routes advertised to this peer

received

Display all routes received from this peer

advertised-routes

Display all the routes advertised to this peer

received-routes

Display all the routes received from this peer

dampened

Display all dampened routes received from this peer

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp neighbors (bgp)

show bgp { [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } | vpnv4 unicast | vpnv6 unicast | ipv6 labeled-unicast | l2vpn vpls } neighbors [ neighbor-id | ipv6-neighbor-id | neighbor-prefix-id | ipv6-neighbor-prefix-id ] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_neighbor { neighbor | ipv6neighbor | templatepeer } [remoteas] [localas] link [index] configpeer [inherit-template] [inherit-session-template] [ prefix-parent | ipv6prefix-parent ] [description] version remote-id state up elapsedtime [restarttime] [sourceif] [connectedif] [connectedcheck] [lowmemexempt] [bfd] [ttlsecurity] [ttllimit] [localas-inactive] [passiveonly] [password] [remove-privateas] [ lastread holdtime keepalivetime lastwrite keepalive notificationsrcvd recvbufbytes notificationssent sentbytesoutstanding connsestablished connsdropped connattempts peerresettime peerresetreason resettime resetreason ] configholdtime configkeepalivetime [ grstate grexpiry ] firstkeepalive openssent opensrecvd notifssent notifsrecvd updatessent updatesrecvd keepalivesent keepaliverecvd rtrefreshsent rtrefreshrecvd capabilitiessent capabilitiesrecvd msgsent msgrecvd bytessent bytesrecvd threadid fd passivethreadid passivefd localaddr ipv6localaddr localport { remoteaddr | ipv6remoteaddr } remoteport capsnegotiated capmpadvertised capgradvertised capaddpathsadvertised caprefreshadvertised capmprecvd capgrrecvd capaddpathsrecvd caprefreshrecvd capolddynamicadvertised capolddynamicrecvd caprradvertised caprrrecvd capoldrradvertised capoldrrrecvd capas4advertised capas4recvd grrestarttime grstaletime grrecvdrestarttime [ TABLE_af af-afi TABLE_saf af-safi af-advertised af-recvd ] [ TABLE_graf gr-afi TABLE_grsaf gr-safi gr-adv gr-recv gr-fwd ] [ TABLE_addpathscapaf addpathscap-afi TABLE_addpathscapsaf addpathscap-safi addpathssendcap-adv addpathsrecvcap-adv addpathssendcap-recv addpathsrecvcap-recv ] [ TABLE_peraf per-afi TABLE_persaf per-safi tableversion neighbortableversion pfxrecvd pfxbytes pfxsent [srpermitted] [sendcommunity] [sendextcommunity] maxpfx maxpfx_threshold { localnexthop | ipv6localnexthop } [thirdpartynexthop] [rrconfigured] [defaultoriginate] [defaultoriginatermap] defaultsent grpathssaved grEoRrecvd grEoRtime [soo] [unsuppress-map] [weight] [signaling-proto] [ TABLE_policy_template preference inherit-policy-template ] ] [ TABLE_inpolicy inpolicynr inpolicytype inpolicyname inpolicyhandle ] [ TABLE_outpolicy outpolicynr outpolicytype outpolicyname outpolicyhandle ] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbors

Display all configured BGP neighbors

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

ipv6-neighbor-id

Type: ipv6addr

Display one particular IPv6 BGP neighbor

neighbor-prefix-id

Type: ipprefix

Display details for a prefix peering

ipv6-neighbor-prefix-id

Type: ipv6prefix

Display details for an IPv6 prefix peering

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

all

Display BGP information for all address families

__readonly__

TABLE_neighbor

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

templatepeer

Type: string

remoteas

Type: integer

localas

Type: integer

link

ebgp  value: 1

ibgp  value: 2

confed-ebgp  value: 3

index

Type: integer

configpeer

Type: bool

inherit-template

Type: string

inherit-session-template

Type: string

prefix-parent

Type: ipprefix

ipv6prefix-parent

Type: ipv6prefix

description

Type: string

version

Type: integer

remote-id

Type: ipaddr

state

Idle  value: 1

Connect  value: 2

Active  value: 3

OpenSent  value: 4

OpenConfirm  value: 5

Established  value: 6

Closing  value: 7

Shut (Admin)  value: 8

Shut (PfxCt)  value: 9

Shut (NoMem)  value: 10

Shut (Error)  value: 11

up

Type: bool

elapsedtime

Type: string

restarttime

Type: string

sourceif

Type: interface

connectedif

Type: interface

connectedcheck

Type: bool

lowmemexempt

Type: bool

bfd

Type: bool

ttlsecurity

Type: bool

ttllimit

Type: integer

localas-inactive

Type: bool

passiveonly

Type: bool

password

Type: bool

remove-privateas

Type: bool

lastread

Type: string

holdtime

Type: integer

keepalivetime

Type: integer

lastwrite

Type: string

keepalive

Type: string

msgrecvd

Type: integer

notificationsrcvd

Type: integer

recvbufbytes

Type: integer

msgsent

Type: integer

notificationssent

Type: integer

sentbytesoutstanding

Type: integer

connsestablished

Type: integer

connsdropped

Type: integer

connattempts

Type: integer

peerresettime

Type: string

peerresetreason

Type: string

resettime

Type: string

resetreason

Type: string

configholdtime

Type: integer

configkeepalivetime

Type: integer

grstate

Restart  value: 1

Stale  value: 2

grexpiry

Type: string

firstkeepalive

Type: bool

openssent

Type: integer

opensrecvd

Type: integer

notifssent

Type: integer

notifsrecvd

Type: integer

updatessent

Type: integer

updatesrecvd

Type: integer

keepalivesent

Type: integer

keepaliverecvd

Type: integer

rtrefreshsent

Type: integer

rtrefreshrecvd

Type: integer

capabilitiessent

Type: integer

capabilitiesrecvd

Type: integer

bytessent

Type: integer

bytesrecvd

Type: integer

threadid

Type: integer

fd

Type: integer

passivethreadid

Type: integer

passivefd

Type: integer

localaddr

Type: ipaddr

ipv6localaddr

Type: ipv6addr

localport

Type: integer

remoteaddr

Type: ipaddr

ipv6remoteaddr

Type: ipv6addr

remoteport

Type: integer

capsnegotiated

Type: bool

capmpadvertised

Type: bool

capgradvertised

Type: bool

capaddpathsadvertised

Type: bool

caprefreshadvertised

Type: bool

capmprecvd

Type: bool

capgrrecvd

Type: bool

capaddpathsrecvd

Type: bool

caprefreshrecvd

Type: bool

capolddynamicadvertised

Type: bool

capolddynamicrecvd

Type: bool

caprradvertised

Type: bool

caprrrecvd

Type: bool

capoldrradvertised

Type: bool

capoldrrrecvd

Type: bool

capas4advertised

Type: bool

capas4recvd

Type: bool

TABLE_af

af-afi

Type: integer

TABLE_saf

af-safi

Type: integer

af-advertised

Type: bool

af-recvd

Type: bool

TABLE_graf

gr-afi

Type: integer

TABLE_grsaf

gr-safi

Type: integer

gr-adv

Type: bool

gr-recv

Type: bool

gr-fwd

Type: bool

grrestarttime

Type: integer

grstaletime

Type: integer

grrecvdrestarttime

Type: integer

TABLE_addpathscapaf

addpathscap-afi

Type: integer

TABLE_addpathscapsaf

addpathscap-safi

Type: integer

addpathssendcap-adv

Type: bool

addpathsrecvcap-adv

Type: bool

addpathssendcap-recv

Type: bool

addpathsrecvcap-recv

Type: bool

TABLE_peraf

per-afi

Type: integer

TABLE_persaf

per-safi

Type: integer

tableversion

Type: integer

neighbortableversion

Type: integer

pfxrecvd

Type: integer

pfxbytes

Type: integer

pfxsent

Type: integer

srpermitted

Type: bool

sendcommunity

Type: bool

sendextcommunity

Type: bool

maxpfx

Type: integer

maxpfx_threshold

Type: integer

localnexthop

Type: ipaddr

ipv6localnexthop

Type: ipv6addr

rrconfigured

Type: bool

defaultoriginate

Type: bool

defaultoriginatermap

Type: string

defaultsent

Type: bool

grpathssaved

Type: integer

grEoRrecvd

Type: bool

grEoRtime

Type: string

soo

Type: string

weight

Type: uinteger

signaling-proto

Type: string

thirdpartynexthop

Type: bool

unsuppress-map

Type: string

TABLE_policy_template

preference

Type: integer

inherit-policy-template

Type: string

TABLE_inpolicy

inpolicynr

Type: integer

inpolicytype

Type: string

inpolicyname

Type: string

inpolicyhandle

Type: bool

TABLE_outpolicy

outpolicynr

Type: integer

outpolicytype

Type: string

outpolicyname

Type: string

outpolicyhandle

Type: bool

Command Modes

- /exec

show bgp neighbors commands

show bgp { [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } | vpnv4 unicast | vpnv6 unicast } neighbors { neighbor-id | ipv6-neighbor-id } commands [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ [ TABLE_sesscmd sessioncmd sessioncmdstatus [sessioncmdtemplate] ] [ TABLE_af af-afi TABLE_saf af-safi [ TABLE_polcmd policycmd policycmdstatus [policycmdtemplate] ] ] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

ipv6-neighbor-id

Type: ipv6addr

Display one particular IPv6 BGP neighbor

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

neighbors

Display all configured BGP neighbors

commands

Display details on commands

__readonly__

TABLE_sesscmd

sessioncmd

Type: string

sessioncmdstatus

Type: string

sessioncmdtemplate

Type: string

TABLE_af

af-afi

Type: integer

TABLE_saf

af-safi

Type: integer

TABLE_polcmd

policycmd

Type: string

policycmdstatus

Type: string

policycmdtemplate

Type: string

Command Modes

- /exec

show bgp neighbors flap-statistics

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } neighbors { neighbor-id | ipv6-neighbor-id } flap-statistics [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi dampeningenabled historypaths dampenedpaths TABLE_prefix ipprefix ipv6prefix status best pathtype peer ipv6peer flapcount duration reuse penalty suppresslimit reuselimit ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbors

Display all configured BGP neighbors

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

ipv6-neighbor-id

Type: ipv6addr

Display one particular IPv6 BGP neighbor

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

flap-statistics

Display flap statistics for routes received from this peer

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

Type: integer

TABLE_safi

safi

Type: integer

dampeningenabled

Type: bool

historypaths

Type: integer

dampenedpaths

Type: integer

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

status

Type: string

best

Type: bool

pathtype

Type: string

peer

Type: ipaddr

ipv6peer

Type: ipv6addr

flapcount

Type: integer

duration

Type: string

reuse

Type: string

penalty

Type: integer

suppresslimit

Type: integer

reuselimit

Type: integer

Command Modes

- /exec

show bgp neighbors paths

show bgp { [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } | vpnv4 unicast | vpnv6 unicast | ipv6 labeled-unicast } neighbors { neighbor-id | ipv6-neighbor-id } paths [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi hashvalue refcount metric aspath ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbors

Display all configured BGP neighbors

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

ipv6-neighbor-id

Type: ipv6addr

Display one particular IPv6 BGP neighbor

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

all

Display BGP information for all address families

paths

Display AS paths learned from this peer

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

Type: integer

TABLE_safi

safi

Type: integer

hashvalue

Type: integer

refcount

Type: integer

metric

Type: integer

aspath

Type: string

Command Modes

- /exec

show bgp paths

show [ip] bgp paths [ __readonly__ TABLE_id id hashvalue refcount metric aspath origin ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

paths

Display Path information

__readonly__

TABLE_id

id

Type: integer

hashvalue

Type: integer

refcount

Type: integer

metric

Type: uinteger

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp peer-template

show [ip] bgp peer-template [peer-template-name] [ __readonly__ TABLE_neighbor templatepeer [remoteas] [inherit-template] [inherit-session-template] [ prefix-parent | ipv6prefix-parent ] [description] [sourceif] [connectedcheck] [lowmemexempt] [bfd] [ttlsecurity] [ttllimit] [passiveonly] [password] [remove-privateas] [ configholdtime configkeepalivetime ] [ TABLE_peraf per-afi TABLE_persaf per-safi [srpermitted] [sendcommunity] [sendextcommunity] [maxpfx] [maxpfx_threshold] [ localnexthop | ipv6localnexthop ] [thirdpartynexthop] [rrconfigured] [defaultoriginate] [defaultoriginatermap] [grpathssaved] [grEoRrecvd] [grEoRtime] [ TABLE_policy_template preference inherit-policy-template ] [ TABLE_inpolicy inpolicynr inpolicytype inpolicyname inpolicyhandle ] [ TABLE_outpolicy outpolicynr outpolicytype outpolicyname outpolicyhandle ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

peer-template

Display information about a peer-template

peer-template-name

Type: string

length: 80

Peer-template name

__readonly__

TABLE_neighbor

templatepeer

Type: string

remoteas

Type: integer

inherit-template

Type: string

inherit-session-template

Type: string

prefix-parent

Type: ipprefix

ipv6prefix-parent

Type: ipv6prefix

description

Type: string

sourceif

Type: interface

connectedcheck

Type: bool

lowmemexempt

Type: bool

bfd

Type: bool

ttlsecurity

Type: bool

ttllimit

Type: uinteger

passiveonly

Type: bool

password

Type: bool

remove-privateas

Type: bool

configholdtime

Type: integer

configkeepalivetime

Type: integer

TABLE_peraf

TABLE_persaf

per-afi

Type: integer

per-safi

Type: integer

srpermitted

Type: bool

sendcommunity

Type: bool

sendextcommunity

Type: bool

maxpfx

Type: integer

maxpfx_threshold

Type: integer

localnexthop

Type: ipaddr

ipv6localnexthop

Type: ipv6addr

inpolicynr

Type: integer

inpolicytype

Type: string

inpolicyname

Type: string

inpolicyhandle

Type: bool

outpolicynr

Type: integer

outpolicytype

Type: string

outpolicyname

Type: string

outpolicyhandle

Type: bool

rrconfigured

Type: bool

defaultoriginate

Type: bool

defaultoriginatermap

Type: string

grpathssaved

Type: integer

grEoRrecvd

Type: bool

grEoRtime

Type: string

thirdpartynexthop

Type: bool

TABLE_policy_template

preference

Type: integer

inherit-policy-template

Type: string

TABLE_inpolicy

TABLE_outpolicy

Command Modes

- /exec

show bgp prefix-list

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } } prefix-list { prfxlist-name | test_pol_name } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

prefix-list

Display routes matching the prefix-list

prfxlist-name

Type: string

length: 63

Name of prefix-list

test_pol_name

Type: string

An existing test-list policy

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp private

show bgp private [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { all_private | session | ipc | rnh | lists | rpm-info [ route-map rpm-name { ip-prefix | ipv6-prefix } ] | attr [ ip-prefix ] | rpm-attribute-cache | rpm-comm-attr-cache | virtual [summary] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

private

Show BGP information intended for developer eyes only

all_private

Show all info

session

Show session info

lists

Show BGP internal lists

route-map

Show information for route-map

rpm-info

Show BGP policy outbound info

ip-prefix

Type: ipprefix

Show attribute for a prefix

ipv6-prefix

Type: ipv6prefix

Show attribute for an IPv6 prefix

rpm-name

Type: string

pattern: [!-~]*

length: 63

Route-map name

attr

Show attribute information

ipc

Show ipc information

rnh

Show recursive next hops

rpm-attribute-cache

Show rpm attribute cache statistics

rpm-comm-attr-cache

Show rpm community attribute cache statistics

summary

Summary only

virtual

Virtualization related

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

Command Modes

- /exec

show bgp private attr

show bgp private attr [ [ [ ipv4 { unicast | multicast } ip-prefix ] | [ ipv6 { unicast | multicast } ipv6-prefix ] ] [detail] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

private

Show BGP information intended for developer eyes only

attr

Show BGP attributes

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

detail

Show detailed info

ip-prefix

Type: ipprefix

Show attribute for a prefix

ipv6-prefix

Type: ipv6prefix

Show attribute for an IPv6 prefix

Command Modes

- /exec

show bgp private damp

show bgp private [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } damp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

private

Show BGP information intended for developer eyes only

vrf

Virtual Router Context

vrf-name

Type: string

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

damp

Show dampening info

Command Modes

- /exec

show bgp process

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] process [detail] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out [vrf-id] [vrf-state] [vrf-state-rsn] [vrf-router-id] [vrf-cfgd-id] [vrf-local-as] [vrf-confed-id] [vrf-cluster-id] [vrf-peers] [vrf-pending-peers] [vrf-est-peers] [vrf-rd] [vrf-cfgd-max-as-limit] [vrf-max-as-limit] [vrf-pending-rd] TABLE_af af-id [af-name] [af-state] [af-state-rsn] [af-num-peers] [af-num-active-peers] [af-peer-routes] [af-peer-paths] [af-peer-networks] [af-peer-aggregates] [af-export-rmap] [af-import-rmap] [af-retain-rt] [af-label-mode] [af-aggregate-label] [af-rr] [ TABLE_redist protocol route-map ] TABLE_add_paths_selection route-map TABLE_export_rt export-rt TABLE_import_rt import-rt ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

process

BGP global information

detail

Detailed information

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

__readonly__

Read Only

TABLE_vrf

vrf-name-out

Type: string

VRF name

vrf-id

Type: uinteger

VRF ID

vrf-state

Type: string

VRF State

vrf-state-rsn

Type: string

VRF State Reason

vrf-router-id

Type: string

Router ID

vrf-cfgd-id

Type: string

Configured Router-ID

vrf-local-as

Type: string

Local AS

vrf-confed-id

Type: string

Cluster-ID

vrf-cluster-id

Type: string

Cluster-ID

vrf-peers

Type: uinteger

No. of configured peers

vrf-pending-peers

Type: uinteger

No. of pending peers

vrf-est-peers

Type: uinteger

No. of established peers

vrf-rd

Type: string

VRF RD

vrf-cfgd-max-as-limit

Type: uinteger

Configured maxas-limit

vrf-max-as-limit

Type: uinteger

Active maxas-limit

vrf-pending-rd

Type: string

VRF pending RD

TABLE_af

af-id

Type: uinteger

AF table ID

af-name

Type: string

AF table name

af-state

Type: string

AF table state

af-state-rsn

Type: string

AF table state reason

af-num-peers

Type: uinteger

No. of peers

af-num-active-peers

Type: uinteger

No. of active peers

af-peer-routes

Type: uinteger

No. of peer routes

af-peer-paths

Type: uinteger

No. of peer paths

af-peer-networks

Type: uinteger

No. of peer networks

af-peer-aggregates

Type: uinteger

No. of aggregates

af-export-rmap

Type: string

Export route-map

af-import-rmap

Type: string

Import route-map

af-retain-rt

Type: string

Retain RT

af-label-mode

Type: string

Label allocation mode

af-aggregate-label

Type: uinteger

Aggregate Label

af-rr

Type: bool

Is a Route-reflector

TABLE_redist

protocol

Type: string

Protocol

route-map

Type: string

Route Map

TABLE_add_paths_selection

route-map

Type: string

Route Map

TABLE_export_rt

export-rt

Type: string

Export route target

TABLE_import_rt

import-rt

Type: string

Import route target

Command Modes

- /exec

show bgp received-paths

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | ipv4 mdt [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv4 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | vpnv6 unicast [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | ipv6 labeled-unicast | l2vpn vpls [ rd { ext-comm-rd-aa2nn4 | ext-comm-rd-aa4nn2 } ] | all } received-paths [private] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix ipprefix ipv6prefix totalpaths bestpathnr advertisedto scheduledto flags rd_val rd_vrf TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

received-paths

Display paths stored for soft-reconfig

rd

Display information for a route distinguisher

ext-comm-rd-aa4nn2

Type: community

VPN route distinguisher in aa4:nn or ip:nn format

ext-comm-rd-aa2nn4

Type: community

VPN route distinguisher in aa:nn format

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree Not available in this release.

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

all

Display BGP information for all address families

private

private

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

rd_val

Type: string

rd_vrf

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp regexp

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } regexp regexp-str [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix [ ipprefix | ipv6prefix ] totalpaths bestpathnr advertisedto scheduledto flags TABLE_path pathnr best status type { ipnexthop | ipv6nexthop } { neighbor | ipv6neighbor } neighborid metric localpref weight aspath origin prefixversion on-newlist on-xmitlist suppressed needsresync locked policyincomplete pathvalid pathbest pathdeleted pathstaled pathhistory pathmultipath pathovermaxaslimit nexthopmetric [ aggregator aggregatoras ] [ TABLE_community community ] [ TABLE_extcommunity extcommunity ] [ originatorid [ TABLE_clusterlist clusterlist ] ] [ flappenalty dampenedtime flaps flaptime flapflags flapindex flaphalflife flapreuse flapsuppress flapmax ] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

regexp

Display routes matching the AS path regular expression

regexp-str

Type: string

Regular expression to match the AS paths

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

prefixversion

Type: integer

on-newlist

Type: bool

on-xmitlist

Type: bool

suppressed

Type: bool

needsresync

Type: bool

locked

Type: bool

policyincomplete

Type: bool

pathvalid

Type: bool

pathbest

Type: bool

pathdeleted

Type: bool

pathstaled

Type: bool

pathhistory

Type: bool

pathmultipath

Type: bool

pathovermaxaslimit

Type: bool

nexthopmetric

Type: integer

aggregator

Type: ipaddr

aggregatoras

Type: integer

TABLE_community

community

Type: string

TABLE_extcommunity

extcommunity

Type: string

originatorid

Type: ipaddr

TABLE_clusterlist

clusterlist

Type: ipaddr

flappenalty

Type: integer

dampenedtime

Type: string

flaps

Type: integer

flaptime

Type: string

flapflags

Type: integer

flapindex

Type: integer

flaphalflife

Type: integer

flapreuse

Type: integer

flapsuppress

Type: integer

flapmax

Type: integer

Command Modes

- /exec

show bgp self-originated

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } self-originated [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_safi safi table-version router-id TABLE_prefix { ipprefix | ipv6prefix } totalpaths bestpathnr advertisedto scheduledto flags TABLE_path pathnr best status type ipnexthop ipv6nexthop neighbor ipv6neighbor neighborid metric localpref weight aspath origin ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

self-originated

Self originated routes

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

TABLE_safi

safi

unicast  value: 1

multicast  value: 2

table-version

Type: integer

router-id

Type: ipaddr

TABLE_prefix

ipprefix

Type: ipprefix

ipv6prefix

Type: ipv6prefix

totalpaths

Type: integer

bestpathnr

Type: integer

flags

Type: string

advertisedto

Type: string

scheduledto

Type: string

TABLE_path

pathnr

Type: integer

best

Type: string

status

Type: string

type

Type: string

ipnexthop

Type: ipaddr

ipv6nexthop

Type: ipv6addr

neighbor

Type: ipaddr

ipv6neighbor

Type: ipv6addr

neighborid

Type: ipaddr

metric

Type: uinteger

localpref

Type: integer

weight

Type: integer

aspath

Type: string

origin

Type: string

Command Modes

- /exec

show bgp sessions

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] sessions [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ totalpeers totalestablishedpeers localas TABLE_vrf vrf-name-out local-as vrfpeers vrfestablishedpeers router-id TABLE_neighbor neighbor-id remoteas connectionsdropped lastflap lastread lastwrite state localport remoteport notificationssent notificationsreceived ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

sessions

Display session information for all peers

__readonly__

TABLE_vrf

vrf-name-out

Type: string

local-as

Type: integer

totalpeers

Type: integer

totalestablishedpeers

Type: integer

router-id

Type: ipaddr

localas

Type: integer

vrfpeers

Type: integer

vrfestablishedpeers

Type: integer

TABLE_neighbor

neighbor-id

Type: string

remoteas

Type: integer

connectionsdropped

Type: integer

lastflap

Type: duration

lastread

Type: duration

lastwrite

Type: duration

state

Idle  value: 1

Connect  value: 2

Active  value: 3

OpenSent  value: 4

OpenConfirm  value: 5

Established  value: 6

Closing  value: 7

Shut (Admin)  value: 8

Shut (PfxCt)  value: 9

Shut (NoMem)  value: 10

Shut (Error)  value: 11

localport

Type: string

remoteport

Type: string

notificationssent

Type: integer

notificationsreceived

Type: integer

Command Modes

- /exec

show bgp statistics

show bgp statistics [ __readonly__ msgsent msgrecvd bytesent byterecvd opensent openrecvd updatesent updaterecvd kasent karecvd notifsent notifrecvd rrefreshsent rrefreshrecvd capsent caprecvd ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

statistics

BGP global statistics

__readonly__

msgsent

Type: integer

msgrecvd

Type: integer

bytesent

Type: integer

byterecvd

Type: integer

opensent

Type: integer

openrecvd

Type: integer

updatesent

Type: integer

updaterecvd

Type: integer

kasent

Type: integer

karecvd

Type: integer

notifsent

Type: integer

notifrecvd

Type: integer

rrefreshsent

Type: integer

rrefreshrecvd

Type: integer

capsent

Type: integer

caprecvd

Type: integer

Command Modes

- /exec

show bgp summary (bgp)

show bgp { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | ipv4 mdt | vpnv4 unicast | vpnv6 unicast | ipv6 labeled-unicast | l2vpn vpls | all } summary [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ __readonly__ TABLE_vrf vrf-name-out [vrf-id] [vrf-state] [vrf-state-rsn] [vrf-router-id] [vrf-cfgd-id] [vrf-local-as] [vrf-confed-id] [vrf-cluster-id] [vrf-peers] [vrf-pending-peers] [vrf-est-peers] [vrf-rd] [vrf-cfgd-max-as-limit] [vrf-max-as-limit] [vrf-pending-rd] TABLE_af af-id [af-name] [af-state] [af-state-rsn] [af-num-peers] [af-num-active-peers] [af-peer-routes] [af-peer-paths] [af-peer-networks] [af-peer-aggregates] [af-export-rmap] [af-import-rmap] [af-retain-rt] [af-label-mode] [af-aggregate-label] [af-rr] TABLE_saf safi [tableversion] [configuredpeers] [capablepeers] [totalnetworks] [totalpaths] [memoryused] [numberattrs] [bytesattrs] [numberpaths] [bytespaths] [numbercommunities] [bytescommunities] [numberclusterlist] [bytesclusterlist] [dampening] [historypaths] [dampenedpaths] [softreconfigrecvdpaths] [softreconfigidenticalpaths] [softreconfigcombopaths] [softreconfigfilteredrecvd] [softreconfigbytes] TABLE_neighbor neighborid [neighborversion] [neighboras] [msgrecvd] [msgsent] [neighbortableversion] [inq] [outq] [time] [prefixreceived] [state] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

summary

Display summarized information of BGP state

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

vpnv4

Display BGP information for VPNv4 address family Not available in this release.

vpnv6

Display BGP information for VPNv6 address family Not available in this release.

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

labeled-unicast

Display BGP information for labeled-unicast address family Not available in this release.

mdt

Display BGP information for multicast distribution tree Not available in this release.

l2vpn

Display BGP information for L2VPN address family Not available in this release.

vpls

Display BGP information for L2VPN VPLS address family Not available in this release.

all

Display BGP information for all address families

__readonly__

TABLE_vrf

vrf-name-out

Type: string

VRF name

vrf-id

Type: uinteger

VRF ID

vrf-state

Type: string

VRF State

vrf-state-rsn

Type: string

VRF State Reason

vrf-router-id

Type: string

Router ID

vrf-cfgd-id

Type: string

Configured Router-ID

vrf-local-as

Type: string

Local AS

vrf-confed-id

Type: string

Cluster-ID

vrf-cluster-id

Type: string

Cluster-ID

vrf-peers

Type: uinteger

No. of configured peers

vrf-pending-peers

Type: uinteger

No. of pending peers

vrf-est-peers

Type: uinteger

No. of established peers

vrf-rd

Type: string

VRF RD

vrf-cfgd-max-as-limit

Type: uinteger

Configured maxas-limit

vrf-max-as-limit

Type: uinteger

Active maxas-limit

vrf-pending-rd

Type: string

VRF pending RD

TABLE_af

af-id

Type: uinteger

AF table ID

af-name

Type: string

AF table name

af-state

Type: string

AF table state

af-state-rsn

Type: string

AF table state reason

af-num-peers

Type: uinteger

No. of peers

af-num-active-peers

Type: uinteger

No. of active peers

af-peer-routes

Type: uinteger

No. of peer routes

af-peer-paths

Type: uinteger

No. of peer paths

af-peer-networks

Type: uinteger

No. of peer networks

af-peer-aggregates

Type: uinteger

No. of aggregates

af-export-rmap

Type: string

Export route-map

af-import-rmap

Type: string

Import route-map

af-retain-rt

Type: string

Retain RT

af-label-mode

Type: string

Label allocation mode

af-aggregate-label

Type: uinteger

Aggregate Label

af-rr

Type: bool

Is a Route-reflector

TABLE_saf

safi

unicast  value: 1

multicast  value: 2

tableversion

Type: integer

configuredpeers

Type: integer

capablepeers

Type: integer

totalnetworks

Type: integer

totalpaths

Type: integer

memoryused

Type: integer

numberattrs

Type: integer

bytesattrs

Type: integer

numberpaths

Type: integer

bytespaths

Type: integer

numbercommunities

Type: integer

bytescommunities

Type: integer

numberclusterlist

Type: integer

bytesclusterlist

Type: integer

dampening

Type: string

historypaths

Type: integer

dampenedpaths

Type: integer

softreconfigrecvdpaths

Type: integer

softreconfigidenticalpaths

Type: integer

softreconfigcombopaths

Type: integer

softreconfigfilteredrecvd

Type: integer

softreconfigbytes

Type: integer

TABLE_neighbor

neighborid

Type: string

neighborversion

Type: integer

neighboras

Type: string

msgrecvd

Type: integer

msgsent

Type: integer

neighbortableversion

Type: integer

inq

Type: integer

outq

Type: integer

time

Type: string

prefixreceived

Type: integer

state

Idle  value: 1

Connect  value: 2

Active  value: 3

OpenSent  value: 4

OpenConfirm  value: 5

Established  value: 6

Closing  value: 7

Shut (Admin)  value: 8

Shut (PfxCt)  value: 9

Shut (NoMem)  value: 10

Shut (Error)  value: 11

Command Modes

- /exec

show bgp summary (bgp)

show bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { { ip | ipv4 } { unicast | multicast } | ipv6 { unicast | multicast } | all } summary [ __readonly__ TABLE_vrf vrf-name-out [vrf-id] [vrf-state] [vrf-state-rsn] [vrf-router-id] [vrf-cfgd-id] [vrf-local-as] [vrf-confed-id] [vrf-cluster-id] [vrf-peers] [vrf-pending-peers] [vrf-est-peers] [vrf-rd] [vrf-cfgd-max-as-limit] [vrf-max-as-limit] [vrf-pending-rd] TABLE_af af-id [af-name] [af-state] [af-state-rsn] [af-num-peers] [af-num-active-peers] [af-peer-routes] [af-peer-paths] [af-peer-networks] [af-peer-aggregates] [af-export-rmap] [af-import-rmap] [af-retain-rt] [af-label-mode] [af-aggregate-label] [af-rr] TABLE_saf safi [tableversion] [configuredpeers] [capablepeers] [totalnetworks] [totalpaths] [memoryused] [numberattrs] [bytesattrs] [numberpaths] [bytespaths] [numbercommunities] [bytescommunities] [numberclusterlist] [bytesclusterlist] [dampening] [historypaths] [dampenedpaths] [softreconfigrecvdpaths] [softreconfigidenticalpaths] [softreconfigcombopaths] [softreconfigfilteredrecvd] [softreconfigbytes] TABLE_neighbor neighborid [neighborversion] [neighboras] [msgrecvd] [msgsent] [neighbortableversion] [inq] [outq] [time] [prefixreceived] [state] ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

summary

Display summarized information of BGP state

ip

Display BGP information for IPv4 address family

ipv4

Display BGP information for IPv4 address family

ipv6

Display BGP information for IPv6 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

__readonly__

TABLE_vrf

vrf-name-out

Type: string

VRF name

vrf-id

Type: uinteger

VRF ID

vrf-state

Type: string

VRF State

vrf-state-rsn

Type: string

VRF State Reason

vrf-router-id

Type: string

Router ID

vrf-cfgd-id

Type: string

Configured Router-ID

vrf-local-as

Type: string

Local AS

vrf-confed-id

Type: string

Cluster-ID

vrf-cluster-id

Type: string

Cluster-ID

vrf-peers

Type: uinteger

No. of configured peers

vrf-pending-peers

Type: uinteger

No. of pending peers

vrf-est-peers

Type: uinteger

No. of established peers

vrf-rd

Type: string

VRF RD

vrf-cfgd-max-as-limit

Type: uinteger

Configured maxas-limit

vrf-max-as-limit

Type: uinteger

Active maxas-limit

vrf-pending-rd

Type: string

VRF pending RD

TABLE_af

af-id

Type: uinteger

AF table ID

af-name

Type: string

AF table name

af-state

Type: string

AF table state

af-state-rsn

Type: string

AF table state reason

af-num-peers

Type: uinteger

No. of peers

af-num-active-peers

Type: uinteger

No. of active peers

af-peer-routes

Type: uinteger

No. of peer routes

af-peer-paths

Type: uinteger

No. of peer paths

af-peer-networks

Type: uinteger

No. of peer networks

af-peer-aggregates

Type: uinteger

No. of aggregates

af-export-rmap

Type: string

Export route-map

af-import-rmap

Type: string

Import route-map

af-retain-rt

Type: string

Retain RT

af-label-mode

Type: string

Label allocation mode

af-aggregate-label

Type: uinteger

Aggregate Label

af-rr

Type: bool

Is a Route-reflector

TABLE_saf

safi

unicast  value: 1

multicast  value: 2

tableversion

Type: integer

configuredpeers

Type: integer

capablepeers

Type: integer

totalnetworks

Type: integer

totalpaths

Type: integer

memoryused

Type: integer

numberattrs

Type: integer

bytesattrs

Type: integer

numberpaths

Type: integer

bytespaths

Type: integer

numbercommunities

Type: integer

bytescommunities

Type: integer

numberclusterlist

Type: integer

bytesclusterlist

Type: integer

dampening

Type: string

historypaths

Type: integer

dampenedpaths

Type: integer

softreconfigrecvdpaths

Type: integer

softreconfigidenticalpaths

Type: integer

softreconfigcombopaths

Type: integer

softreconfigfilteredrecvd

Type: integer

softreconfigbytes

Type: integer

TABLE_neighbor

neighborid

Type: string

neighborversion

Type: integer

neighboras

Type: string

msgrecvd

Type: integer

msgsent

Type: integer

neighbortableversion

Type: integer

inq

Type: integer

outq

Type: integer

time

Type: string

prefixreceived

Type: integer

state

Idle  value: 1

Connect  value: 2

Active  value: 3

OpenSent  value: 4

OpenConfirm  value: 5

Established  value: 6

Closing  value: 7

Shut (Admin)  value: 8

Shut (PfxCt)  value: 9

Shut (NoMem)  value: 10

Shut (Error)  value: 11

Command Modes

- /exec

show boot

show boot [ __readonly__ [ TABLE_bootvar_show Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

__readonly__

TABLE_bootvar_show

Bootvar table

Str1

Type: string

Command Modes

- /exec

show boot auto-copy

show boot auto-copy [ __readonly__ [ TABLE_auto_copy Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

auto-copy

See if autocopy is turned on

__readonly__

TABLE_auto_copy

Auto copy table

Str1

Type: string

Command Modes

- /exec

show boot auto-copy list

show boot auto-copy list [ __readonly__ [ TABLE_auto_copy_list Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

auto-copy

See if autocopy is turned on

list

Show the list of files to be auto-copied

__readonly__

TABLE_auto_copy_list

Auto copy table

Str1

Type: string

Command Modes

- /exec

show boot current

show boot current [ __readonly__ [ TABLE_bootvar_current Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

current

Show Current Bootvar Variables

__readonly__

TABLE_bootvar_current

Bootvar current table

Str1

Type: string

Command Modes

- /exec

show boot module

show boot module [ [module] [s0] [ __readonly__ [ TABLE_show_mod Str1 ] ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

module

Enter module to show config of all modules

module

Type: integer

Enter module number to show config

s0

Type: string

Enter module keyword to show config

__readonly__

TABLE_show_mod

Show Module table

Str1

Type: string

Command Modes

- /exec

show boot sup-1

show boot sup-1 [ __readonly__ [ TABLE_show_sup1 Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

sup-1

Enter sup-1 to show the 1st sup config

__readonly__

TABLE_show_sup1

Show Sup-1 bootvar table

Str1

Type: string

Command Modes

- /exec

show boot sup-2

show boot sup-2 [ __readonly__ [ TABLE_show_sup2 Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

sup-2

Enter sup-2 to show the 2nd sup config

__readonly__

TABLE_show_sup2

Show Sup-22 bootvar table

Str1

Type: string

Command Modes

- /exec

show boot variables

show boot variables [ __readonly__ [ TABLE_boot_vars Str1 ] ]

Syntax Description

show

Show running system information

boot

Show Bootvar Variables

variables

Display the list of boot variables

__readonly__

TABLE_boot_vars

Show boot variables table

Str1

Type: string

Command Modes

- /exec

show bootmode

show bootmode [ module module ] [ __readonly__ TABLE_bootmode_info mod_num bootmode ]

Syntax Description

show

Show running system information

bootmode

show bootmode of the all linecard modules

module

show bootmode of a specific linecard module

module

Type: integer

please enter module number

__readonly__

TABLE_bootmode_info

mod_num

Type: uinteger

bootmode

Type: string

Command Modes

- /exec

show buffers ip

show buffers ip

Syntax Description

show

Show running system information

buffers

Display detailed buffer statistics

ip

Display IP buffer information

Command Modes

- /exec

Chapter 4. C Show Commands

- show callhome

- show callhome destination-profile

- show callhome destination-profile profile

- show callhome destination-profile profile CiscoTAC-1

- show callhome destination-profile profile full-txt-destination

- show callhome destination-profile profile short-txt-destination

- show callhome transport

- show callhome transport-email

- show callhome user-def-cmds

- show cdp (cdpd)

- show cdp (cdpd)

- show cdp global

- show cdp neighbors

- show cdp neighbors detail

- show cdp traffic interface2

- show cfs application

- show cfs lock

- show cfs merge status

- show cfs peers

- show cfs regions

- show cfs remote-app vsan domain

- show cfs remote-switches vsan

- show cfs static peers

- show cfs status

- show checkpoint (cfg_rollback)

- show checkpoint (cfg_rollback)

- show checkpoint summary

- show class-map

- show class-map type control-plane

- show class-map type network-qos

- show cli alias

- show cli dynamic integers

- show cli dynamic strings

- show cli history

- show cli interface table

- show cli list

- show cli registry

- show cli syntax

- show cli variables

- show clock

- show clock utc

- show configuration session (ssnmgr)

- show configuration session (ssnmgr)

- show configuration session global-info

- show configuration session status

- show configuration session summary

- show consistency-checker forwarding ipv6show forwarding ipv6 inconsistency

- show consistency-checker forwardingshow forwarding inconsistency

- show consistency-checker racl port-channels

- show copp diff profile profile2

- show copp profile

- show copp status

- show copyright

- show cores

- show crypto ca certificates (certen_tree)

- show crypto ca certificates (certen_tree)

- show crypto ca certstore

- show crypto ca crl

- show crypto ca remote-certstore

- show crypto ca trustpoints

- show crypto certificatemap

- show crypto key mypubkey rsa

- show crypto ssh-auth-map

- show current

show callhome

show callhome [ __readonly__ output_state info per_name [name] email_info [email_conf] ph_info [ph_conf] str_addr [str_conf] site_id [site_id_conf] cust_id [cus_id_conf] contr_id [contr_id_conf] swi_pri [swi_pri_value] dup_mess per_inv per_time per_timeofday dist ]

Syntax Description

show

Show running system information

callhome

Show callhome information

__readonly__

output_state

Type: string

info

Type: string

per_name

Type: string

name

Type: string

email_info

Type: string

email_conf

Type: string

ph_info

Type: string

ph_conf

Type: string

str_addr

Type: string

str_conf

Type: string

site_id

Type: string

site_id_conf

Type: string

cust_id

Type: string

cus_id_conf

Type: string

contr_id

Type: string

contr_id_conf

Type: string

swi_pri

Type: string

swi_pri_value

Type: string

dup_mess

Type: string

per_inv

Type: string

per_time

Type: string

per_timeofday

Type: string

dist

Type: string

Command Modes

- /exec

show callhome destination-profile

show callhome destination-profile [ __readonly__ TABLE_call_info [dest_full_info] [dest_short_info] [dest_xml_info] [dest_def_info] max_mess_size mess_format mess_level trans_method email_info [email_conf] url_info [url_conf] alert_groups [alert_conf] ]

Syntax Description

show

Show running system information

callhome

Show callhome information

destination-profile

Show callhome destination profile information

__readonly__

TABLE_call_info

dest_full_info

Type: string

dest_short_info

Type: string

dest_xml_info

Type: string

dest_def_info

Type: string

max_mess_size

Type: string

mess_format

Type: string

mess_level

Type: string

trans_method

Type: string

email_info

Type: string

email_conf

Type: string

url_info

Type: string

url_conf

Type: string

alert_groups

Type: string

alert_conf

Type: string

Command Modes

- /exec

show callhome destination-profile profile

show callhome destination-profile profile s0 [ __readonly__ user_txt_info max_mess_size mess_format mess_level trans_method email_info [ TABLE_email [email_conf] ] url_info [ TABLE_url [url_conf] ] alert_groups [ TABLE_alert [alert_conf] ] ]

Syntax Description

show

Show running system information

callhome

Show callhome information

destination-profile

Show callhome destination profile information

profile

Specify the destination profile

s0

Type: string

length: 32

Show information for user defined destination profile

__readonly__

user_txt_info

Type: string

max_mess_size

Type: string

mess_format

Type: string

mess_level

Type: string

trans_method

Type: string

email_info

Type: string

TABLE_email

email_conf

Type: string

url_info

Type: string

TABLE_url

url_conf

Type: string

alert_groups

Type: string

TABLE_alert

alert_conf

Type: string

Command Modes

- /exec

show callhome destination-profile profile CiscoTAC-1

show callhome destination-profile profile CiscoTAC-1 [ __readonly__ tac_xml_info max_mess_size mess_level trans_method email_info [email_conf] url_info [url_conf] alert_groups [alert_conf] ]

Syntax Description

show

Show running system information

callhome

Show callhome information

destination-profile

Show callhome destination profile information

profile

Specify the destination profile

CiscoTAC-1

Show information for CiscoTAC-1 destination profile

__readonly__

tac_xml_info

Type: string

max_mess_size

Type: string

mess_level

Type: string

trans_method

Type: string

email_info

Type: string

email_conf

Type: string

url_info

Type: string

url_conf

Type: string

alert_groups

Type: string

alert_conf

Type: string

Command Modes

- /exec

show callhome destination-profile profile full-txt-destination

show callhome destination-profile profile full-txt-destination [ __readonly__ full_txt_info max_mess_size mess_level trans_method email_info [email_conf] url_info [url_conf] alert_groups [alert_conf] ]

Syntax Description

show

Show running system information

callhome

Show callhome information

destination-profile

Show callhome destination profile information

profile

Specify the destination profile

full-txt-destination

Show information for full-txt-destination destination profile

__readonly__

full_txt_info

Type: string

max_mess_size

Type: string

mess_level

Type: string

trans_method

Type: string

email_info

Type: string

email_conf

Type: string

url_info

Type: string

url_conf

Type: string

alert_groups

Type: string

alert_conf

Type: string

Command Modes

- /exec

show callhome destination-profile profile short-txt-destination

show callhome destination-profile profile short-txt-destination [ __readonly__ shrt_txt_info max_mess_size mess_level trans_method email_info [email_conf] url_info [url_conf] alert_groups [alert_conf] ]

Syntax Description

show

Show running system information

callhome

Show callhome information

destination-profile

Show callhome destination profile information

profile

Specify the destination profile

short-txt-destination

Show information for short-txt-destination destination profile

__readonly__

shrt_txt_info

Type: string

max_mess_size

Type: string

mess_level

Type: string

trans_method

Type: string

email_info

Type: string

email_conf

Type: string

url_info

Type: string

url_conf

Type: string

alert_groups

Type: string

alert_conf

Type: string

Command Modes

- /exec

show callhome transport

show callhome transport [ __readonly__ vrf from_email [rep_email] [ret_email] [smtp_ser] [smtp_ser_port] [smtp_ser_vrf] [smtp_ser_prior] [smtp_ser_do] [smtp_ser_port_do] [smtp_ser_vrf_do] [smtp_ser_prior_do] [smtp_ser_got] [smtp_ser_port_got] [smtp_ser_vrf_got] [smtp_ser_prior_got] http_prox http_port http_state ]

Syntax Description

show

Show running system information

callhome

Show callhome information

transport

Show callhome transport configuration (email and http)

__readonly__

vrf

Type: string

from_email

Type: string

rep_email

Type: string

ret_email

Type: string

smtp_ser

Type: string

smtp_ser_port

Type: string

smtp_ser_vrf

Type: string

smtp_ser_prior

Type: string

smtp_ser_do

Type: string

smtp_ser_port_do

Type: string

smtp_ser_vrf_do

Type: string

smtp_ser_prior_do

Type: string

smtp_ser_got

Type: string

smtp_ser_port_got

Type: string

smtp_ser_vrf_got

Type: string

smtp_ser_prior_got

Type: string

http_prox

Type: string

http_port

Type: string

http_state

Type: string

Command Modes

- /exec

show callhome transport-email

show callhome transport-email

Syntax Description

show

Show running system information

callhome

Show callhome information

transport-email

Show callhome email transport configuration

Command Modes

- /exec

show callhome user-def-cmds

show callhome user-def-cmds

Syntax Description

show

Show running system information

callhome

Show callhome information

user-def-cmds

Show the cli commands configured for each alert group

Command Modes

- /exec

show cdp (cdpd)

show cdp { all | interface if0 } [ __readonly__ TABLE_cdp_all intf_id port_up [cdp_global_enabled] cdp_intf_enabled [oper_mode] refresh_time ttl ]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

all

Show all interfaces in CDP database

interface

Show CDP parameters for an interface

if0

Type: interface

__readonly__

Read only

TABLE_cdp_all

output of show cdp all

intf_id

Type: string

Interface Id

port_up

Type: string

Port status

cdp_global_enabled

Type: string

CDP global status

cdp_intf_enabled

Type: string

CDP interface status

oper_mode

Type: string

CDP operation mode

refresh_time

Type: string

Refresh Time

ttl

Type: string

Hold Time

Command Modes

- /exec

show cdp (cdpd)

show cdp entry { all1 | name s0 } [ __readonly__ TABLE_cdp_entry_all [ifindex] device_id [sysname] { v4addr | v6addr } + platform_id capability+ intf_id port_id ttl version version_no [nativevlan] [vtpname] [duplexmode] [syslocation] { v4mgmtaddr | v6mgmtaddr } + ]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

entry

Show CDP entries in database

all1

Show all CDP entries in database

name

Show a specific CDP entry matching a name

s0

Type: string

length: 256

__readonly__

Read only

TABLE_cdp_entry_all

output of show cdp entry all

ifindex

Type: string

Interface Index

device_id

Type: string

Device Identifier

sysname

Type: string

System Name

v4addr

Type: string

Interface IP V4 Address

v6addr

Type: string

Interface IP V6 Address

platform_id

Type: string

Platform Id

capability

Type: string

Capability

intf_id

Type: string

Interface Id

port_id

Type: string

Port Identifier

ttl

Type: string

Hold Time

version

Type: string

Software Version

version_no

Type: string

CDP version number

nativevlan

Type: string

NativeVLAN

vtpname

Type: string

Vtp Management Domain Name

duplexmode

Type: string

Duplex Mode

syslocation

Type: string

System Location

v4mgmtaddr

Type: string

IP V4 Mgmt Address

v6mgmtaddr

Type: string

IP V6 Mgmt Address

Command Modes

- /exec

show cdp global

show cdp global [ __readonly__ cdp_global_enabled refresh_time ttl v2_advertisement deviceid_format ]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

global

Show CDP global parameters

__readonly__

Read only

cdp_global_enabled

Type: string

CDP global status

refresh_time

Type: string

Refresh Time

ttl

Type: string

Hold Time

v2_advertisement

Type: string

Show v2 advertisement

deviceid_format

Type: string

Show deviceId Format

Command Modes

- /exec

show cdp neighbors

show cdp neighbors [ interface if ] [ __readonly__ TABLE_cdp_neighbor_brief_info ifindex device_id intf_id ttl capability+ platform_id port_id ]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

neighbors

Show CDP neighbors

interface

Show CDP neighbors on an interface

if

Type: interface-mrange

__readonly__

Read only

TABLE_cdp_neighbor_brief_info

output of show cdp neighbor - in breif

ifindex

Type: uinteger

Interface index

device_id

Type: string

System Name (or) Device Identifier

intf_id

Type: string

Interface Id

port_id

Type: string

Port Identifier

platform_id

Type: string

Platform Id

ttl

Type: uinteger

Hold Time

capability

Capability

router  value: 1

performing level-3 routing
tb-bridge  value: 2

performing level-2 transparent bridging
sr-bridge  value: 3

performing level-2 source route bridging
switch  value: 4

Provides layer-2 and/or layer-3 switching
host  value: 5

Host
IGMP_cnd_filtering  value: 6

IGMP conditional filtering
Repeater  value: 7

Provides level-1 functionality
VoIP_Phone  value: 8

Provides voice or data telephony capability
Remotely_managed-device  value: 9

Remotely-Managed Device
Supports-STP-Dispute  value: 10

Supports-STP-Dispute

Command Modes

- /exec

show cdp neighbors detail

show cdp neighbors [ interface if ] detail [ __readonly__ TABLE_cdp_neighbor_detail_info ifindex device_id [sysname] [vtpname] numaddr { v4addr | v6addr } + platform_id capability+ intf_id port_id ttl version version_no [nativevlan] [duplexmode] [mtu] [syslocation] [ num_mgmtaddr { v4mgmtaddr | v6mgmtaddr } + ] ]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

neighbors

Show CDP neighbors

detail

Show CDP neighbors detailed

interface

Show CDP neighbors on an interface

if

Type: interface-mrange

__readonly__

Read only

TABLE_cdp_neighbor_detail_info

output of show cdp neighbor detail

ifindex

Type: uinteger

Interface index

device_id

Type: string

Device Identifier

sysname

Type: string

System Name

vtpname

Type: string

Vtp Management Domain Name

numaddr

Type: uinteger

No of IP Address configured

v4addr

Type: ipaddr

Interface IP V4 Address

v6addr

Type: ipv6addr

Interface IP V6 Address

platform_id

Type: string

Platform Id

capability

Capability

router  value: 1

performing level-3 routing
tb-bridge  value: 2

performing level-2 transparent bridging
sr-bridge  value: 3

performing level-2 source route bridging
switch  value: 4

Provides layer-2 and/or layer-3 switching
host  value: 5

Host
IGMP_cnd_filtering  value: 6

IGMP conditional filtering
Repeater  value: 7

Provides level-1 functionality
VoIP_Phone  value: 8

Provides voice or data telephony capability
Remotely_managed-device  value: 9

Remotely-Managed Device
Supports-STP-Dispute  value: 10

Supports-STP-Dispute

intf_id

Type: string

Interface Id

port_id

Type: string

Port Identifier

ttl

Type: uinteger

Hold Time

version

Type: string

Software Version

version_no

CDP version number

v1  value: 1

CDP version 1
v2  value: 2

CDP version 2

nativevlan

Type: uinteger

NativeVLAN

duplexmode

Duplex Mode

half  value: 1

half duplex mode
full  value: 2

full duplex mode

mtu

Type: uinteger

MTU

syslocation

Type: string

System Location

num_mgmtaddr

Type: uinteger

No of Mgmt Address configured

v4mgmtaddr

Type: ipaddr

IP V4 Mgmt Address

v6mgmtaddr

Type: ipv6addr

IP V6 Mgmt Address

Command Modes

- /exec

show cdp traffic interface2

show cdp traffic interface2 if2 [ __readonly__ intf_id total_input_packets valid_cdp_packets input_v1_packets input_v2_packets invalid_cdp_packets unsupported_version checksum_errors malformed_packets total_output_packets output_v1_packets output_v2_packets send_errors ]

Syntax Description

show

Show running system information

cdp

Show Cisco Discovery Protocol information

traffic

Show CDP traffic statistics

interface2

Show CDP traffic statistics on an interface

if2

Type: interface

__readonly__

Read only

TABLE_cdp_traffic

output of show cdp traffic

intf_id

Type: string

Interface Id

total_input_packets

Type: string

Total input cdp packets

valid_cdp_packets

Type: string

Total valid cdp packets

input_v1_packets

Type: string

Input vesrion1 packets

input_v2_packets

Type: string

Input vesrion2 packets

invalid_cdp_packets

Type: string

Invalid cdp packets

unsupported_version

Type: string

Packets having unsupported version

checksum_errors

Type: string

Packets having checksum errors

malformed_packets

Type: string

Total malformed packets

total_output_packets

Type: string

Total output packets

output_v1_packets

Type: string

Output vesrion1 packets

output_v2_packets

Type: string

Output vesrion2 packets

send_errors

Type: string

Number of send errors

Command Modes

- /exec

show cfs application

show cfs application [ name cfs-dyn-app-name | sap i0 ] [ __readonly__ [ enabled enabled timeout timeout merge_capable merge_capable scope scope region region ] [ TABLE_apps app_name app_enabled app_scope ] ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

application

Show locally registered applications

name

Show local application information by name

cfs-dyn-app-name

Type: string

length: 60

Registered name of the local application

sap

Show local application information by sap

i0

Type: integer

Registered sap of the local application

__readonly__

enabled

whether application is CFS enabled

enabled

Type: string

whether application is CFS enabled

timeout

timeout

timeout

Type: string

timeout

merge_capable

merge_capable

merge_capable

Type: string

merge_capable

scope

scope

scope

Type: string

scope

region

region

region

Type: string

region

TABLE_apps

all cfs applications

app_name

Type: string

name of cfs application

app_enabled

Type: string

whether application is cfs enabled

app_scope

Type: string

distribution scope of cfs application

Command Modes

- /exec

show cfs lock

show cfs lock [ name cfs-dyn-app-name | sap i1 ] [ __readonly__ [ TABLE_locks [app_name] app_scope [vsan] [domain] [wwn] ip_addr u_name u_type [hostname] ] ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

lock

Show state of application's logical/physical locks

name

Application name for which the lock status is required

cfs-dyn-app-name

Type: string

length: 60

Registered name of the local application

sap

Application sap for which the lock status is required

i1

Type: integer

Application SAP

__readonly__

TABLE_locks

table of all CFS locks

app_name

Type: string

name of CFS application

app_scope

Type: string

scope of CFS application

vsan

Type: string

vsan

domain

Type: string

domain

wwn

Type: string

wwn of switch holding CFS lock

ip_addr

Type: string

ip address of switch holding CFS lock

u_name

Type: string

user name

u_type

Type: string

user type

hostname

Type: string

hostname

Command Modes

- /exec

show cfs merge status

show cfs merge status [ name cfs-dyn-app-name [detail] | sap i1 [detail2] ] [ __readonly__ [ scope scope ] [ merge_status status ] [ failure_reason reason ] [ TABLE_all_merge app_name scope vsan status ] [ TABLE_local_fabric [domain] wwn ip_addr app_scope [master] [hostname] ] [ TABLE_remote_fabric [domain] wwn ip_addr app_scope [master] [hostname] ] [ TABLE_remaining_fabric [domain] wwn ip_addr [hostname] ] ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

merge

Show cfs merge information

status

Show status of merge

name

Show merge status by name

cfs-dyn-app-name

Type: string

length: 60

Registered name of the local application

detail

Show merge status by name in detail

sap

Show merge status by sap

i1

Type: integer

Application sap

detail2

Show merge status by sap in detail

__readonly__

scope

distribution scope of application

scope

Type: string

scope

merge_status

status

status

Type: string

status

failure_reason

reason

reason

Type: string

reason

TABLE_all_merge

all

app_name

Type: string

name

scope

Type: string

scope

vsan

Type: string

vsan

status

Type: string

status

TABLE_local_fabric

local fabric

domain

Type: string

domain

wwn

Type: string

wwn

ip_addr

Type: string

ip_addr

app_scope

Type: string

scope

master

Type: string

master

hostname

Type: string

hname

TABLE_remote_fabric

remote fabric

domain

Type: string

domain

wwn

Type: string

wwn

ip_addr

Type: string

ip_addr

app_scope

Type: string

scope

master

Type: string

master

hostname

Type: string

hname

TABLE_remaining_fabric

remote fabric

domain

Type: string

domain

wwn

Type: string

wwn

ip_addr

Type: string

ip_addr

hostname

Type: string

hname

Command Modes

- /exec

show cfs peers

show cfs peers [ name cfs-dyn-app-name | sap i1 ] [ __readonly__ [ scope scope ] [ TABLE_peers wwn ip_addr local [hostname] [domain] ] ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

peers

Show all the peers in the physical fabric

name

Show peers for given application name

cfs-dyn-app-name

Type: string

length: 60

Registered name of the local application

sap

Show peers for given application sap

i1

Type: integer

Application sap

__readonly__

scope

scope

scope

Type: string

scope

TABLE_peers

all peers

wwn

Type: string

wwn

ip_addr

Type: string

ip_addr

local

Type: string

local

hostname

Type: string

hname

domain

Type: string

domain

Command Modes

- /exec

show cfs regions

show cfs regions [ brief [ region i0 ] | name cfs-dyn-app-name | region1 i1 ] [ __readonly__ [ region id ] [ application name ] [ scope scope ] [ TABLE_PEERS wwn ip_addr local [hostname] [domain] ] [ TABLE_switches [wwn] [ip_addr] region app_name enabled [scope] ] ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

regions

Show all the applications with peers and region information

brief

Show all configured regions and applications(no peers)

region

Show all configured applications(no peers)

i0

Type: integer

min: 1  max: 200

Region Id

name

Show peers and region information for a given application

cfs-dyn-app-name

Type: string

length: 60

Registered name of the local application

region1

Show all configured applications with peers

i1

Type: integer

min: 1  max: 200

Region Id

__readonly__

region

region

id

Type: string

id

application

app

name

Type: string

name

scope

scope

scope

Type: string

scope

TABLE_PEERS

all region peers

wwn

Type: string

wwn

ip_addr

Type: string

ip_address

local

Type: string

local

hostname

Type: string

hname

domain

Type: string

domain

TABLE_switches

all switches in region

wwn

Type: string

wwn

ip_addr

Type: string

ip_addr

region

Type: string

region

app_name

Type: string

name

enabled

Type: string

enabled

scope

Type: string

scope

Command Modes

- /exec

show cfs remote-app vsan domain

show cfs remote-app vsan i0 domain i1

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

remote-app

Show remote cfs registered applications

vsan

Show remote applications given a vsan

i0

Type: integer

min: 1  max: 4093

VSAN id

domain

Show remote applications

i1

Type: integer

min: 0  max: 255

Enter the domain id

Command Modes

- /exec

show cfs remote-switches vsan

show cfs remote-switches vsan i0 [ __readonly__ local domain [ TABLE_switches remote_domain wwn ] ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

remote-switches

Show remote switches on a given vsan

vsan

Show remote switches on a given vsan

i0

Type: integer

min: 1  max: 4093

VSAN id

__readonly__

local

local

domain

Type: string

domain

TABLE_switches

all remote switches

remote_domain

Type: string

rdomain

wwn

Type: string

wwn

Command Modes

- /exec

show cfs static peers

show cfs static peers

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

static

Show all static peers with status

peers

Show all configured static peers with status

Command Modes

- /exec

show cfs status

show cfs status [ __readonly__ distribution distribution distribution_over_ip dist_over_ip ipv4_multicast_address ipv4_mcast_addr ipv6_multicast_address ipv6_mcast_addr distribution_over_ethernet dist_over_eth ]

Syntax Description

show

Show running system information

cfs

CFS Show Command handler

status

Show current status of CFS

__readonly__

distribution

runtime status of CFS distribution

distribution

Type: string

operational status of CFS distribution

distribution_over_ip

runtime information of CFSoIP

dist_over_ip

Type: string

operational status of CFS overIP

ipv4_multicast_address

ipv4 multicast address

ipv4_mcast_addr

Type: string

ipv4 multicast address

ipv6_multicast_address

ipv6 multicast address

ipv6_mcast_addr

Type: string

ipv6 multicast address

distribution_over_ethernet

runtime status if CFSoE

dist_over_eth

Type: string

operations status of CFSoE

Command Modes

- /exec

show checkpoint (cfg_rollback)

show checkpoint chkpoint_name [all] [ __readonly__ TABLE_checkpoint_details name1 checkpoint_config+ ]

Syntax Description

show

Show running system information

checkpoint

Show configuration rollback checkpoint contents

chkpoint_name

Type: string

length: 80

Checkpoint name

all

Show default config

__readonly__

Read only

TABLE_checkpoint_details

Checkpoint details

name1

Type: string

length: 80

Checkpoint name

checkpoint_config

Type: string

length: 255

Configuration entry from checkpoint

Command Modes

- /exec

show checkpoint (cfg_rollback)

show checkpoint [all] [ user | system ] [ __readonly__ TABLE_checkpoint_details name checkpoint_config+ ]

Syntax Description

show

Show running system information

checkpoint

Show configuration rollback checkpoints

all

Show default config

user

Show only user configuration rollback checkpoints

system

Show only system configuration rollback checkpoints

__readonly__

Read only

TABLE_checkpoint_details

checkpoint details

name

Type: string

length: 80

Checkpoint name

checkpoint_config

Type: string

length: 255

Configuration entry from checkpoint

Command Modes

- /exec

show checkpoint summary

show checkpoint summary [ user | system ] [ __readonly__ TABLE_checkpoint_header_info name user_name timestamp file_path chkpt_type description ]

Syntax Description

show

Show running system information

checkpoint

Show configuration rollback checkpoints

summary

Show configuration rollback checkpoints summary

user

Show only user configuration rollback checkpoints summary

system

Show only system configuration rollback checkpoints summary

__readonly__

Read only

TABLE_checkpoint_header_info

Checkpoint header info

user_name

Type: string

length: 31

Username

name

Type: string

length: 80

Checkpoint name

file_path

Type: string

length: 128

Checkpoint name

timestamp

Type: integer

Timestamp of checkpoint creation

chkpt_type

Type: integer

Type of checkpoint either user or system

description

Type: remainder

Checkpoint description

Command Modes

- /exec

show class-map

show class-map [ [ type qos ] [ cmap-name | xxx color-map-enum-name ] | type queuing [ yyy cmap-enum-name | zzz default-cmap-enum-name | cmap-dce-name | cmap-name-hque ] ] [ __readonly__ [display-all] [ TABLE_cmap cmap-key [id] xqos-or-q [any_or_all] cmap-name-out [desc] [ TABLE_match match-key [not] [dscp-list] [precedence-list] [cos-list] [qos-group-list] [discard-class-list] [vlan-list] [match-cmap-name] [match-acl-name] [note-string] [pkt-len-list] [rtp-port-list] [prot] [input-iface-list] [exp-list] ] ] ]

Syntax Description

xxx

xxx Not available in this release.

yyy

yyy Not available in this release.

zzz

zzz Not available in this release.

show

Show running system information

class-map

Show class maps

type

Type of the class-map

qos

type qos

queuing

type queuing

cmap-name

Type: string

antipattern: type | typ | ty | t | class-default | class | default

length: 40

class map name

cmap-enum-name

2q4t-in-q1  value: 1

Ingress queue 1 of 2q4t type
2q4t-in-q-default  value: 2

Ingress default queue of 2q4t type
8q2t-in-q1  value: 3

Ingress queue 1 of 8q2t type
8q2t-in-q2  value: 4

Ingress queue 2 of 8q2t type
8q2t-in-q3  value: 5

Ingress queue 3 of 8q2t type
8q2t-in-q4  value: 6

Ingress queue 4 of 8q2t type
8q2t-in-q5  value: 7

Ingress queue 5 of 8q2t type
8q2t-in-q6  value: 8

Ingress queue 6 of 8q2t type
8q2t-in-q7  value: 9

Ingress queue 7 of 8q2t type
8q2t-in-q-default  value: 10

Ingress default queue of 8q2t type
1p3q4t-out-pq1  value: 11

Egress priority queue of 1p3q4t type
1p3q4t-out-q2  value: 12

Egress queue 2 of 1p3q4t type
1p3q4t-out-q3  value: 13

Egress queue 3 of 1p3q4t type
1p3q4t-out-q-default  value: 14

Egress default queue of 1p3q4t type
1p7q4t-out-pq1  value: 15

Egress priority queue of 1p7q4t type
1p7q4t-out-q2  value: 16

Egress queue 2 of 1p7q4t type
1p7q4t-out-q3  value: 17

Egress queue 3 of 1p7q4t type
1p7q4t-out-q4  value: 18

Egress queue 4 of 1p7q4t type
1p7q4t-out-q5  value: 19

Egress queue 5 of 1p7q4t type
1p7q4t-out-q6  value: 20

Egress queue 6 of 1p7q4t type
1p7q4t-out-q7  value: 21

Egress queue 7 of 1p7q4t type
1p7q4t-out-q-default  value: 22

Egress default queue of 1p7q4t type

default-cmap-enum-name

in-q1  value: 1

Ingress queue 1 for default policy
in-q-default  value: 2

Ingress default queue for default policy
out-pq1  value: 3

Egress priority queue for default policy
out-q2  value: 4

Egress queue 2 for default policy
out-q3  value: 5

Egress queue 3 for default policy
out-q-default  value: 6

Egress default queue for default policy

cmap-dce-name

Type: string

antipattern: type | typ | ty | t | class-default | class | default

length: 40

Queuing class-map name

cmap-name-hque

Type: string

antipattern: type | typ | ty | t | class-default | class | default

length: 40

Hierarchical class-map name

color-map-enum-name

__readonly__

display-all

Type: integer

Display all kinds of class-maps

TABLE_cmap

all cmap xml sessions

cmap-key

Type: string

Class-map name: xml key

TABLE_match

all match xml sessions

match-key

Type: uinteger

match count: xml key

cmap-name-out

Type: string

Class-map name

xqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

any_or_all

Enter match-any or match-all

match-any  value: 1

Logical-OR all match statements under this classmap
match-all  value: 2

Logical-AND all match statements under this classmap

id

Type: uinteger

Class-map ID

desc

Type: string

length: 200

Description string

not

Type: uinteger

Negate this match result

dscp-list

Type: integer-mrange

List of DSCP values

precedence-list

Type: integer-mrange

List of precedence values

cos-list

Type: integer-mrange

List of class-of-service values

qos-group-list

Type: integer-mrange

List of qos-group values

discard-class-list

Type: integer-mrange

List of discard-class values

vlan-list

Type: vlan-mrange

List of vlan-ids

match-cmap-name

Type: string

class-map name

match-acl-name

Type: string

Match class-map name

note-string

Type: string

length: 300

Placeholder string param to display any info in string format

pkt-len-list

Type: integer-mrange

Packet length multi-range

rtp-port-list

Type: integer-mrange

IP RTP UDP port multi-range

prot

Type: integer

Protocol

input-iface-list

Type: interface-mrange

Input Interface multi-range

exp-list

Type: integer-mrange

List of MPLS exp values

Command Modes

- /exec

show class-map type control-plane

show class-map type control-plane [cmap-name] [ __readonly__ [ TABLE_cmap cmap-key cmap-name-out opt_any_or_all [ TABLE_match match-key [ access_grp acc_grp_name ] [ redirect opt_match_redirect ] [ exception opt_match_excpt ] [ protocol opt_match_protocol ] ] ] ]

Syntax Description

show

Show running system information

class-map

Show class maps

type

Type of the class-map

control-plane

This is for copp policy

cmap-name

Type: string

length: 64

Name of the class-map

__readonly__

TABLE_cmap

all cmap xml sessions

cmap-name-out

Type: string

Name of the class-map

cmap-key

Type: string

Class-map name: xml key

opt_any_or_all

Enter match-any or match-all

match-any  value: 1

Logical-OR all match statements under this classmap
match-all  value: 2

Logical-AND all match statements under this classmap

TABLE_match

all match xml sessions

match-key

Type: uinteger

match count: xml key

access_grp

acc_grp_name

Type: string

redirect

opt_match_redirect

Match criteria for redirected packets

dhcp-snoop  value: 3

Match redirected packets for dhcp
arp-inspect  value: 6

Match redirected packets for arp-inspect

exception

opt_match_excpt

Match criteria for exception packets

ip-option  value: 1

Match exception packets for ip-options
ip-icmp-redirect  value: 2

Match exception packets for ip-icmp-redirect
ip-icmp-unreachable  value: 3

Match exception packets for ip-icmp-unreachable
urpf-failure  value: 4

Match exception packets for urpf-failure
second-mrpf-failure  value: 5

Match exception packets for second-mrpf-failure
ttl-failure  value: 6

Match exception packets for ttl-failure
glean  value: 7

Match exception packets for glean
ipv6-option  value: 8

Match exception packets for ipv6-options
ipv6-icmp-redirect  value: 9

Match exception packets for ipv6-icmp-redirect
ipv6-icmp-unreachable  value: 10

Match exception packets for ipv6-icmp-unreachable
mtu-failure  value: 11

Match exception packets for mtu-failure
multicast-rpf-failure  value: 12

Match exception packets for multicast rpf-failure
multicast-directly-connected-sources  value: 13

Match exception packets for multicast directly-connected-sources
ip-municast  value: 14

Match exception packets for ip-municast
ipv6-municast  value: 15

Match exception packets for ipv6-municast
fcoe-fib-miss  value: 16

Match Exception Packets for FCoE FIB Miss
multicast-dest-miss  value: 17

Match Exception Packets for IP Multicast Destination Lookup Miss
multicast-sg-rpf-failure  value: 18

Match exception packets for multicast sg rpf check failure

protocol

opt_match_protocol

Match criteria for protocol packets

arp  value: 1

IP ARP
mpls  value: 13

Multi-protocol Label Switching
otv  value: 17

OTV Overlay IS-IS frames
mpls_exp6  value: 18

MPLS Exp 6

Command Modes

- /exec

show class-map type network-qos

show class-map type network-qos [cmap-name-nq] [ __readonly__ display-all desc xcmap-name cos-list qos-group-list protocol ]

Syntax Description

show

Show running system information

class-map

Show class maps

type

Type of the class-map

cmap-name-nq

Type: string

antipattern: type | typ | ty | t | class-default | class | default

length: 40

Class-map name

network-qos

type network-qos

__readonly__

display-all

Type: integer

Display all network-qos class-maps

desc

Type: string

length: 200

Description string

xcmap-name

Type: string

Class-map name

protocol

Type: integer

protocol

cos-list

Type: integer-mrange

List of class-of-service values

qos-group-list

Type: integer-mrange

List of qos-group values

Command Modes

- /exec

show cli alias

show cli alias [ name s0 ]

Syntax Description

show

Show running system information

cli

Show CLI information

alias

Display the alias configuration

name

Display a specific alias

s0

Type: string

length: 30

Specify the alias

Command Modes

- /exec

show cli dynamic integers

show cli dynamic integers [name] [ __readonly__ TABLE_dynamic_integers name-o min max ]

Syntax Description

show

Show running system information

cli

CLI commands

dynamic

Display current range of dynamic parameters

integers

Display current range of dynamic integer parameters

name

Type: string

name of the dynamic parameter

__readonly__

TABLE_dynamic_integers

name-o

Type: string

min

Type: integer

max

Type: integer

Command Modes

- /exec

show cli dynamic strings

show cli dynamic strings [name] [ __readonly__ TABLE_dynamic_strings name-o value+ ]

Syntax Description

show

Show running system information

cli

CLI commands

dynamic

Display current range of dynamic parameters

strings

Display current range of dynamic string parameters

name

Type: string

name of the dynamic parameter

__readonly__

TABLE_dynamic_strings

name-o

Type: string

value

Type: string

Command Modes

- /exec

show cli history

show cli history [ this-mode-only | exec-mode | config-mode ] [ count | unformatted ] +

Syntax Description

show

Show running system information

cli

debug cli

history

history of cli commands

count

Type: integer

number of lines to display (from end)

unformatted

display just the commands

this-mode-only

display history from current mode only

exec-mode

display history of exec commands only

config-mode

display history of config commands only

Command Modes

- /exec

show cli interface table

show cli interface table

Syntax Description

show

show

cli

cli

interface

interface

table

table

Command Modes

- /exec

show cli list

show cli list [ detail | recurse | component | max-per-cmd ] +

Syntax Description

show

Show running system information

cli

Show CLI information

Command Modes

- /exec

show cli registry

show cli registry [ ctags | tags | modes | session | inherit ]

Syntax Description

show

Show running system information

Command Modes

- /exec

show cli syntax

show cli syntax [ long | recurse | has-xml-out | has-no-xml-out ] + [ roles [ network-admin | network-operator | roles-mask ] ] [ has-xml-out | has-no-xml-out ]

Syntax Description

show

Show running system information

cli

Show CLI information

Command Modes

- /exec

show cli variables

show cli variables

Syntax Description

show

Show running system information

cli

Show CLI information

variables

Show CLI variables

Command Modes

- /exec

show clock

show clock [detail] [ __readonly__ simple_time [ daylight_zone daylight_start_week daylight_start_weekday daylight_start_month daylight_start_time daylight_end_week daylight_end_weekday daylight_end_month daylight_end_time daylight_utc_min_offset ] ]

Syntax Description

show

Show running system information

clock

Display current Date

detail

Display current date and summertime configuration

__readonly__

simple_time

Type: string

simple clock format

daylight_zone

Type: string

summer-time daylight zone

daylight_start_week

Type: integer

daylight start week

daylight_start_weekday

Type: string

daylight start weekday

daylight_start_month

Type: string

daylight start month

daylight_start_time

Type: string

daylight start time

daylight_end_week

Type: integer

daylight end week

daylight_end_weekday

Type: string

daylight end weekday

daylight_end_month

Type: string

daylight end month

daylight_end_time

Type: string

daylight end time

daylight_utc_min_offset

Type: integer

daylight utc offset

Command Modes

- /exec

show clock utc

show clock utc

Syntax Description

show

Show running system information

clock

Display current Date

utc

Display current time in UTC

Command Modes

- /exec

show configuration session (ssnmgr)

show configuration session [ __readonly__ ssn-name ssn-cmd-num command + trlr ]

Syntax Description

show

Show running system information

configuration

Show information about configuration sessions

session

Show active configuration sessions

__readonly__

Read only

ssn-name

Type: string

ssn-cmd-num

Type: uinteger

command

Type: string

trlr

Type: string

Command Modes

- /exec

show configuration session (ssnmgr)

show configuration session s3 [ __readonly__ ssn-name ssn-cmd-num command + ]

Syntax Description

show

Show running system information

configuration

Show information about configuration sessions

session

Show active configuration sessions

s3

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

length: 64

Shows configuration session given a name

__readonly__

Read only

ssn-name

Type: string

ssn-cmd-num

Type: uinteger

command

Type: string

Command Modes

- /exec

show configuration session global-info

show configuration session global-info [ __readonly__ max-ssns max-cmds curr-num-ssns curr-num-cmds ]

Syntax Description

show

Show running system information

configuration

Show information about configuration sessions

session

Show active configuration sessions

global-info

Show configuration sessions global-info

__readonly__

Read only

max-ssns

Type: uinteger

max-cmds

Type: uinteger

curr-num-ssns

Type: uinteger

curr-num-cmds

Type: uinteger

Command Modes

- /exec

show configuration session status

show configuration session status [s3] [ __readonly__ ssn-name last-action ac-tstamp ac-status ac-reason failed-cmd-num+ failed-cmd + last-vfy-cmd-num last-vfy-cmd last-vfy-tstamp + rollback-status+ trlr ]

Syntax Description

show

Show running system information

configuration

Show information about configuration sessions

session

Show active configuration sessions

status

Show configuration session-mgr status

s3

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

length: 64

Shows configuration session status given a name

__readonly__

Read only

ssn-name

Type: string

last-action

Type: string

ac-tstamp

Type: string

ac-status

Type: string

ac-reason

Type: integer

failed-cmd-num

Type: integer

failed-cmd

Type: string

last-vfy-cmd-num

Type: integer

last-vfy-cmd

Type: string

last-vfy-tstamp

Type: string

rollback-status

Type: integer

trlr

Type: string

Command Modes

- /exec

show configuration session summary

show configuration session summary [ __readonly__ hdr ssn-name username tstamp + trlr ]

Syntax Description

show

Show running system information

configuration

Show information about configuration sessions

session

Show active configuration sessions

summary

Show summary of the active configuration sessions

__readonly__

Read only

hdr

Type: string

ssn-name

Type: string

username

Type: string

tstamp

Type: string

trlr

Type: string

Command Modes

- /exec

show consistency-checker forwarding ipv6show forwarding ipv6 inconsistency

show consistency-checker forwarding ipv6 [unicast] [ vrf { vrf-name | all_vrfs } ] [ module { module | all_modules } ] | show forwarding ipv6 [unicast] inconsistency [ vrf { vrf-name | all_vrfs } ] [ module { module | all_modules } ] [ __readonly__ TABLE_inconsistency idipv6 slotipv6 [unitipv6] vrfipv6 [ipv6addr] [ipv6prefix] [interfaceipv6] reasonipv6 ]

Syntax Description

show

show

consistency-checker

Consistency Checker

forwarding

Display Forwarding Information

inconsistency

route inconsistency check

ipv6

ipv6

unicast

unicast

vrf

check routes for a specific VRF

vrf-name

Type: string

VRF name

module

check routes for a specific module

module

Type: integer

module number

all_modules

all module's

all_vrfs

all vrf's

__readonly__

TABLE_inconsistency

idipv6

Type: integer

slotipv6

Type: integer

unitipv6

Type: integer

vrfipv6

Type: vrf

ipv6addr

Type: ipv6addr

ipv6prefix

Type: ipv6prefix

interfaceipv6

Type: interface

reasonipv6

Type: string

Command Modes

- /exec

show consistency-checker forwardingshow forwarding inconsistency

show consistency-checker forwarding [ ip | ipv4 ] [unicast] [ vrf { vrf-name | all_vrfs } ] [ module { module | all_modules } ] | show forwarding [ ip | ipv4 ] [unicast] inconsistency [ vrf { vrf-name | all_vrfs } ] [ module { module | all_modules } ] [ __readonly__ TABLE_inconsistency id slot [unit] vrf [ipaddr] [ipprefix] [interface] reason ]

Syntax Description

show

show

consistency-checker

Consistency Checker

forwarding

Display Forwarding Information

inconsistency

route inconsistency check

ip

ipv4

ipv4

ipv4

unicast

unicast

vrf

check routes for a specific VRF

vrf-name

Type: string

VRF name

module

check routes for a specific module

module

Type: integer

module number

all_modules

all module's

all_vrfs

all vrf's

__readonly__

TABLE_inconsistency

id

Type: integer

slot

Type: integer

unit

Type: integer

vrf

Type: vrf

ipaddr

Type: ipaddr

ipprefix

Type: ipprefix

interface

Type: interface

reason

Type: string

Command Modes

- /exec

show consistency-checker racl port-channels

show consistency-checker racl port-channels [ interface ch-id ]

Syntax Description

show

Show running system information

consistency-checker

Consistency Checker

racl

Verify racl programming in the hardware

port-channels

Verifies port channel racl programming in the hardware

interface

Port-channel number

ch-id

Type: interface

Port-Channel name

Command Modes

- /exec

show copp diff profile profile2

show copp diff profile profile_type [prior-ver] profile2 profile_type2

Syntax Description

show

Show running system information

copp

Control-Plane Policing

diff

Difference between CoPP Profiles

profile

CoPP Profile

profile_type

CoPP Profile Types

strict  value: 1

The Strict Profile
moderate  value: 2

The Moderate Profile
lenient  value: 3

The Lenient Profile
dense  value: 4

The Dense Profile

prior-ver

Previous Configured Version

profile2

CoPP Profile

profile_type2

CoPP Profile Types

strict  value: 1

The Strict Profile
moderate  value: 2

The Moderate Profile
lenient  value: 3

The Lenient Profile
dense  value: 4

The Dense Profile

Command Modes

- /exec

show copp profile

show copp profile { strict | moderate | lenient | dense } [ __readonly__ acl-type acl-grp-name permitdeny { proto_str | proto | ip | ipv6 } { src_any | src_ip_prefix | src_ip_addr src_ip_mask | src_ipv6_prefix | src_addrgrp | src_mac_any | src_mac_addr src_mac_mask } [ src_port_op { src_port1_str | src_port1_num } [ src_port2_str | src_port2_num ] | src_portgrp ] { dest_any | dest_ip_prefix | dest_ip_addr dest_ip_mask | dest_ipv6_prefix | dest_addrgrp | dest_mac_any | dest_mac_addr dest_mac_mask } [ dest_port_op { dest_port1_str | dest_port1_num } [ dest_port2_str | dest_port2_num ] | dest_portgrp ] [ { icmp_type [icmp_code] | icmp_str } | { icmpv6_type [icmpv6_code] | icmpv6_str } ] eth_proto newline cmap_name opt_any_or_all { access_grp acc_grp_name | redirect opt_match_redirect | exception opt_match_excpt protocol opt_match_protocol } + pmap_name class-name cir opt_kbps_mbps_gbps_pps_cir percent cir-perc pir opt_kbps_mbps_gbps_pps_pir percent1 pir-perc bc opt_kbytes_mbytes_gbytes_bc be opt_kbytes_mbytes_gbytes_be { opt_drop_transmit_conform | set-cos-transmit set-cos-val | set-dscp-transmit set-dscp-val | set-prec-transmit set-prec-val } { opt_drop_transmit_exceed | set dscp1 dscp2 table cir-markdown-map } { opt_drop_transmit_violate | set1 dscp3 dscp4 table1 pir-markdown-map } { cos [inner] cos-val | dscp [tunnel] dscp-val | precedence [tunnel1] prec-val policer_show_flags set_vld_flg } + ]

Syntax Description

show

Show running system information

copp

Control-Plane Policing

profile

CoPP Profile

strict

display strict profile

moderate

display moderate profile

lenient

display lenient profile

dense

display dense profile

__readonly__

Read Only

acl-type

Type: uinteger

access-list type

acl-grp-name

Type: string

name of the access-list

permitdeny

permit/deny

deny  value: 1

acl rule deny
permit  value: 2

acl rule permit

proto

Type: uinteger

min: 0  max: 255

A protocol number

proto_str

Type: string

Protocol name

ip

IP

ip  value: 1

IP Protocol

ipv6

IPV6

ipv6  value: 1

IPv6 Protocol

src_any

SRCAny

any  value: 1

Any IP address

dest_any

DESTAny

any  value: 1

Any IP address

src_ip_prefix

Type: ipprefix

Source IP prefix

src_ip_addr

Type: ipaddr

Source IP address

src_ip_mask

Type: ipaddr

Source IP mask

src_ipv6_prefix

Type: ipv6prefix

Source IPv6 prefix

src_mac_addr

Type: ethernet

Source MAC address

src_mac_mask

Type: ethernet

Source MAC mask

src_mac_any

SRCMACAny

any  value: 1

ANY MAC address

dest_ip_prefix

Type: ipprefix

Destination IP prefix

dest_ip_addr

Type: ipaddr

Destination IP address

dest_ip_mask

Type: ipaddr

Destination IP mask

dest_ipv6_prefix

Type: ipv6prefix

Destination IPv6 prefix

dest_mac_addr

Type: ethernet

Destination MAC address

dest_mac_mask

Type: ethernet

Destination MAC mask

dest_mac_any

DESTMACAny

any  value: 1

ANY MAC address

src_port_op

Source Port operator

lt  value: 4

Match only packets with a lower port number
gt  value: 5

Match only packets with a higher port number
eq  value: 6

Match only packets with a equal port number
neq  value: 7

Match only packets with a diff port number
range  value: 8

Match only packets in range

dest_port_op

Destination Port operator

lt  value: 4

Match only packets with a lower port number
gt  value: 5

Match only packets with a higher port number
eq  value: 6

Match only packets with a equal port number
neq  value: 7

Match only packets with a diff port number
range  value: 8

Match only packets in range

src_port1_str

Type: string

Source port name

src_port1_num

Type: uinteger

Source port number

src_port2_str

Type: string

Source port name

src_port2_num

Type: uinteger

Source port number

dest_port1_str

Type: string

Destination port name

dest_port1_num

Type: uinteger

Destination port number

dest_port2_str

Type: string

Destination port name

dest_port2_num

Type: uinteger

Destination port number

icmp_type

Type: uinteger

ICMP type

icmp_code

Type: uinteger

ICMP code

icmp_str

Type: string

ICMP message

icmpv6_type

Type: uinteger

ICMP type

icmpv6_code

Type: uinteger

ICMP code

icmpv6_str

Type: string

ICMP message

src_addrgrp

Type: string

Source address group

dest_addrgrp

Type: string

Destination address group

src_portgrp

Type: string

Source port group

dest_portgrp

Type: string

Destination port group

eth_proto

Type: hex

MAC protocol number

newline

Type: string

newline between access-list and cmaps

cmap_name

Type: string

Name of the class-map

opt_any_or_all

Enter match-any or match-all

match-any  value: 1

Logical-OR all match statements under this classmap
match-all  value: 2

Logical-AND all match statements under this classmap

access_grp

acc_grp_name

Type: string

redirect

opt_match_redirect

Match criteria for redirected packets

dhcp-snoop  value: 3

Match redirected packets for dhcp
arp-inspect  value: 6

Match redirected packets for arp-inspect

exception

opt_match_excpt

Match criteria for exception packets

ip-option  value: 1

Match exception packets for ip-options
ip-icmp-redirect  value: 2

Match exception packets for ip-icmp-redirect
ip-icmp-unreachable  value: 3

Match exception packets for ip-icmp-unreachable
urpf-failure  value: 4

Match exception packets for urpf-failure
second-mrpf-failure  value: 5

Match exception packets for second-mrpf-failure
ttl-failure  value: 6

Match exception packets for ttl-failure
glean  value: 7

Match exception packets for glean
ipv6-option  value: 8

Match exception packets for ipv6-options
ipv6-icmp-redirect  value: 9

Match exception packets for ipv6-icmp-redirect
ipv6-icmp-unreachable  value: 10

Match exception packets for ipv6-icmp-unreachable
mtu-failure  value: 11

Match exception packets for mtu-failure
multicast-rpf-failure  value: 12

Match exception packets for multicast rpf-failure
multicast-directly-connected-sources  value: 13

Match exception packets for multicast directly-connected-sources
ip-municast  value: 14

Match exception packets for ip-municast
ipv6-municast  value: 15

Match exception packets for ipv6-municast
fcoe-fib-miss  value: 16

Match Exception Packets for FCoE FIB Miss
multicast-dest-miss  value: 17

Match Exception Packets for IP Multicast Destination Lookup Miss
multicast-sg-rpf-failure  value: 18

Match exception packets for multicast sg rpf check failure

protocol

opt_match_protocol

Match criteria for protocol packets

arp  value: 1

IP ARP
mpls  value: 13

Multi-protocol Label Switching
otv  value: 17

OTV Overlay IS-IS frames
mpls_exp6  value: 18

MPLS Exp 6

pmap_name

Type: string

Name of the Policy-map

class-name

Type: string

Name if the policy member

cir

Type: long

Committed Information Rate in bps/kbps/mbps/gbps

opt_kbps_mbps_gbps_pps_cir

Units

pps  value: 8

Packets per second

percent

cir-perc

Type: long

Percent specification for cir

pir

Type: long

Peak Information Rate in bps/kbps/mbps/gbps

opt_kbps_mbps_gbps_pps_pir

Units

bps  value: 1

Bits per second
kbps  value: 2

Kilo Bits per second
mbps  value: 3

Mega Bits per second
gbps  value: 4

Giga Bits per second
pps  value: 8

Packets per second

percent1

pir-perc

Type: long

Percent specification for pir

bc

Type: long

Committed Information size in bytes/kbytes/mbytes/packets/ms/us

opt_kbytes_mbytes_gbytes_bc

Units

packets  value: 8

Packets

be

Type: long

Peak Information size in bytes/kbytes/mbytes/packets/ms/us

opt_kbytes_mbytes_gbytes_be

Units

bytes  value: 1

Bytes
kbytes  value: 2

Kilo Bytes
mbytes  value: 3

Mega Bytes
packets  value: 8

Packets
ms  value: 5

Milli seconds
us  value: 6

Micro seconds

opt_drop_transmit_conform

Set the action

transmit  value: 1

Transmit the packet

set-cos-transmit

set-cos-val

Type: uinteger

Conform action cos val

set-dscp-transmit

set-dscp-val

Type: uinteger

Conform action dscp val

set-prec-transmit

set-prec-val

Type: uinteger

Conform action prec val

opt_drop_transmit_exceed

Set the action

drop  value: 2

Drop the packet
transmit  value: 1

Transmit the packet

set

dscp1

dscp2

table

cir-markdown-map

opt_drop_transmit_violate

Set the action

drop  value: 2

Drop the packet

set1

dscp3

dscp4

table1

pir-markdown-map

cos

inner

cos-val

Type: uinteger

Set cos val

dscp

tunnel

dscp-val

Type: uinteger

Set dscp val

precedence

tunnel1

prec-val

Type: uinteger

Set prec val

policer_show_flags

Type: uinteger

Policer show flags

set_vld_flg

Type: uinteger

Set valid flag

Command Modes

- /exec

show copp status

show copp status [ __readonly__ last_config_operation last_cfg_oper last_config_operation_time last_cfg_oper_time last_config_operation_status last_cfg_oper_status [ last_config_operation_error_time last_cfg_oper_error_time ] [ last_config_operation_error last_cfg_oper_error ] service_policy srv_policy ]

Syntax Description

show

Show running system information

copp

Control-Plane Policing

status

Show the internal status of CoPP

__readonly__

last_config_operation

last config operation

last_cfg_oper

Type: string

last config operation

last_config_operation_time

timestamp of last config operation

last_cfg_oper_time

Type: string

timestamp of last config operation

last_config_operation_status

status of last config operation

last_cfg_oper_status

Type: string

status of last config operation

last_config_operation_error_time

timestamp of last config operation's error

last_cfg_oper_error_time

Type: string

timestamp of last config operation's error

last_config_operation_error

last config operation's error

last_cfg_oper_error

Type: string

last config operation's error

service_policy

policy-map attached to control-plane

srv_policy

Type: string

policy-map attached to control-plane

Command Modes

- /exec

show copyright

show copyright [ __readonly__ content ]

Syntax Description

show

Show running system information

copyright

Copyright information

__readonly__

content

Type: string

Copyrigh information

Command Modes

- /exec

show cores

show cores [ vdc-all | vdc [ e-vdc2 | vdc-id ] ] [ __readonly__ [ TABLE_cores vdc_id module_id instance process_name pid sys_time ] ]

Syntax Description

show

Show running system information

cores

show all core dumps for the current vdc

vdc-all

show core dumps from all vdcs

vdc

show all core dumps for the vdc

__readonly__

TABLE_cores

vdc_id

Type: integer

vdc id

module_id

Type: integer

module id

instance

Type: integer

instance number

process_name

Type: string

name of the process

pid

Type: string

process id

sys_time

Type: string

core generate time

e-vdc2

Type: userdef

Enter VDC <vdc-id>

vdc-id

Type: integer

min: 1  max: 17

vdc number

Command Modes

- /exec

show crypto ca certificates (certen_tree)

show crypto ca certificates s0 [ __readonly__ Trustpoint trustpoint [ Certificate certificate ] [ TABLE_ca_cert_chains index ca_certificate ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

ca

show trustpoint configuration

certificates

show various certificates

s0

Type: string

length: 64

trustpoint label

__readonly__

Trustpoint

Trustpoint

trustpoint

Type: string

Trustpoint

Certificate

Certificate

certificate

Type: string

Certificate

TABLE_ca_cert_chains

Table of CA certificates in chain

index

Type: string

CA Certificate Index

ca_certificate

Type: string

CA certificate

Command Modes

- /exec

show crypto ca certificates (certen_tree)

show crypto ca certificates [ __readonly__ [ TABLE_ca_certificates trustpoint [certificate] [ TABLE_ca_cert_chains index ca_certificate ] ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

ca

show trustpoint configuration

certificates

show various certificates

__readonly__

TABLE_ca_certificates

Table of CA certificates

trustpoint

Type: string

Trustpoint name

certificate

Type: string

Certificate

TABLE_ca_cert_chains

Table of CA certificates in chain

index

Type: string

CA Certificate Index

ca_certificate

Type: string

CA certificate

Command Modes

- /exec

show crypto ca certstore

show crypto ca certstore [ __readonly__ certstore_lookup lookup_type ]

Syntax Description

show

Show running system information

crypto

Show crypto configuration

ca

show crypto ca configuration

certstore

Show the configured certstore

__readonly__

certstore_lookup

Certificate strore lookup

lookup_type

Type: string

Lookup type

Command Modes

- /exec

show crypto ca crl

show crypto ca crl s0 [ __readonly__ Trustpoint trustpoint [ CRL crl ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

ca

show trustpoint configuration

crl

show CRL

s0

Type: string

length: 64

trustpoint label

__readonly__

Trustpoint

Trustpoint

trustpoint

Type: string

Trustpoint

CRL

Certificate Revocation List

crl

Type: string

Certificate Revocation List

Command Modes

- /exec

show crypto ca remote-certstore

show crypto ca remote-certstore [ __readonly__ remote_cert_store rem_cert_store [ crl_timer crltimer ldap_server_group ldap_server_grp ] ]

Syntax Description

show

Show running system information

crypto

Show crypto configuration

ca

show crypto ca configuration

remote-certstore

Show remote certstore configuration

__readonly__

remote_cert_store

Remote cert store

rem_cert_store

Type: string

Remote certificate store

crl_timer

CRL timer

crltimer

Type: string

CRL timer

ldap_server_group

LDAP Server Group

ldap_server_grp

Type: string

LDAP Server Group

Command Modes

- /exec

show crypto ca trustpoints

show crypto ca trustpoints [ __readonly__ [ TABLE_ca_truspoints trustpoint key-pair [ TABLE_revocation_methods revocation-method ] [ocsp-url] ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

ca

show trustpoint configuration

trustpoints

show trustpoint configuration

__readonly__

trustpoint

Type: string

Trustpoint

key-pair

Type: string

Key pair

TABLE_revocation_methods

Table of revocation methods

revocation-method

Type: string

Revocation mehtod

ocsp-url

Type: string

OCSP URL

TABLE_ca_truspoints

Table of CA trustpoints

Command Modes

- /exec

show crypto certificatemap

show crypto certificatemap [ __readonly__ [ TABLE_certmap map_name subject_name alternate_email alternate_upn ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

certificatemap

show certificatemap filters

__readonly__

TABLE_certmap

Table of Certificate Map

map_name

Type: string

Map name

subject_name

Type: string

Subject name

alternate_email

Type: string

Alternate Email

alternate_upn

Type: string

Alternate UPN

Command Modes

- /exec

show crypto key mypubkey rsa

show crypto key mypubkey rsa [ __readonly__ [ TABLE_rsa_keys key_label key_size exportable err_string ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

key

show key configuration

mypubkey

show my public keys configuration

rsa

show my rsa public keys configuration

__readonly__

TABLE_rsa_keys

Table of RSA keys

key_label

Type: string

Key Lable

key_size

Type: string

Key size

exportable

Type: string

Exportable

err_string

Type: string

Error String

Command Modes

- /exec

show crypto ssh-auth-map

show crypto ssh-auth-map [ __readonly__ [ TABLE_ssh_auth_map issuer_name map1 [map2] ] ]

Syntax Description

show

Show running system information

crypto

show crypto configuration

ssh-auth-map

show mapping filters applied for ssh authentication

__readonly__

TABLE_ssh_auth_map

Table of SSH Auth MAP

issuer_name

Type: string

Issuer Name

map1

Type: string

Map 1

map2

Type: string

Map 2

Command Modes

- /exec

show current

show current

Syntax Description

show

Display region configurations

current

Display mst configuration currently used

Command Modes

- /exec/configure/spanning-tree/mst/configuration

Chapter 5. D Show Commands

- show default-interface log

- show diagnostic bootup level

- show diagnostic content module

- show diagnostic events

- show diagnostic ondemand setting

- show diagnostic result module all

- show diagnostic simulation module

- show diagnostic status module

- show diff rollback-patch

- show dot1q-tunnel

- show dot1q-tunnel interface

show default-interface log

show default-interface log

Syntax Description

show

Show running system information

default-interface

Current default-interface configuration

log

Displays execution log of last default-interface command

Command Modes

- /exec

show diagnostic bootup level

show diagnostic bootup level [ __readonly__ bootup_level ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

bootup

Show diagnostic bootup information

level

Show diagnostic bootup level information

__readonly__

bootup_level

Type: string

Bootup level

Command Modes

- /exec

show diagnostic content module

show diagnostic content module { all | module } [ __readonly__ attr_descr TABLE_module module_id module_type TABLE_test test_id testname test_attr test_interval ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

content

Show diagnostic test content

module

Module Keyword

all

Select all module ID

module

Type: integer-mrange

Module number

__readonly__

attr_descr

Type: string

Attribute description

TABLE_module

All modules table

module_id

Type: integer

Module Number

module_type

Type: string

module type description

TABLE_test

All tests table

test_id

Type: integer

Test id

testname

Type: string

Test name

test_attr

Type: string

Test Attribute

test_interval

Type: string

HM test interval

Command Modes

- /exec

show diagnostic events

show diagnostic events [ error | info ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

events

Diagnostic events

error

Error event-type

info

Information event-type

Command Modes

- /exec

show diagnostic ondemand setting

show diagnostic ondemand setting [ __readonly__ test_iteration_count action_on_failure ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

ondemand

Show diagnostic on demand information

setting

Show diagnostic on demand settings

__readonly__

test_iteration_count

Type: integer

Iteration Count

action_on_failure

Type: string

Action on failure

Command Modes

- /exec

show diagnostic result module all

show diagnostic result module all [detail] [ __readonly__ TABLE_Module module_id curr_diag_level module_name [bootup_diag_level] TABLE_Test test_id testname [testresult] [ passed_ports failed_ports incomplete_ports untested_ports aborted_ports err_disabled_ports ] [ err_code total_run_count last_execution_time first_failure_time last_failure_time last_pass_time total_fail_count consequtive_fail_count last_fail_reason next_execution_time ] ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

result

Show diagnostic test result

module

Module keyword

all

Select all test ID

detail

Detailed result

__readonly__

TABLE_Module

Table of modules

module_id

Type: integer

Module ID

curr_diag_level

Type: string

Current diag level

module_name

Type: string

Module name

bootup_diag_level

Type: string

Diagnostic level at bootup

TABLE_Test

Table of tests in module

test_id

Type: integer

Test id of tests

testname

Type: string

Test name

testresult

Type: string

Test Results

passed_ports

Type: string

List passed ports

failed_ports

Type: string

List failed ports

incomplete_ports

Type: string

List of Imcompletly tested ports

untested_ports

Type: string

List of untested ports

aborted_ports

Type: string

List of aborted ports

err_disabled_ports

Type: string

List error disabled ports

err_code

Type: string

Error code

total_run_count

Type: integer

Total run count

last_execution_time

Type: string

Last execution time

first_failure_time

Type: string

First test failure time

last_failure_time

Type: string

Last test failure time

last_pass_time

Type: string

Last test pass time

total_fail_count

Type: integer

Total fail count

consequtive_fail_count

Type: integer

Consequetive failure count

last_fail_reason

Type: string

Last failure reason

next_execution_time

Type: string

Next test execution time

Command Modes

- /exec

show diagnostic simulation module

show diagnostic simulation module module [ __readonly__ module_id module_name [ TABLE_detail serial_no testid [portid] mode ] ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

simulation

Simulating Diagnostic result

module

Module keyword

module

Type: integer

min: 0  max: 30

Module Number

__readonly__

module_id

Type: integer

Module ID

module_name

Type: string

Module Name

TABLE_detail

Table of simulation details

serial_no

Type: integer

serial no

testid

Type: integer

Test id

portid

Type: integer

Port id

mode

Type: string

Simulation mode

Command Modes

- /exec

show diagnostic status module

show diagnostic status module module [ __readonly__ test_runby_mapping module_id module_name TABLE_current cur_test_name cur_run_by TABLE_enqued enq_test_name enq_run_by ]

Syntax Description

show

Show running system information

diagnostic

Diagnostic commands

status

Show test status(running/enqueued)

module

Module keyword

module

Type: integer

min: 0  max: 30

Module number

__readonly__

test_runby_mapping

Type: string

Test type expansion

module_id

Type: integer

Module Id

module_name

Type: string

Module name

TABLE_current

Table of currently running test

cur_test_name

Type: string

Currently running test

cur_run_by

Type: string

Test Run By

TABLE_enqued

Table of enqueued tests

enq_test_name

Type: string

Enqueued test name

enq_run_by

Type: string

Test enqueued by

Command Modes

- /exec

show diff rollback-patch

show diff rollback-patch { src-checkpoint chkpoint_name | src-running-cfg | src-startup-cfg | src-file srcfile_uri } { dst-checkpoint chkpoint_name | dst-running-cfg | dst-startup-cfg | dst-file dstfile_uri } [ __readonly__ [patch_entry] + ]

Syntax Description

show

Show running system information

diff

Show diff between configuration files or checkpoints

rollback-patch

Show rollback patch between configuration files or checkpoints

src-checkpoint

Use checkpoint as source configuration

chkpoint_name

Type: string

length: 80

Checkpoint name

src-running-cfg

Use running configuration as source

src-startup-cfg

Use startup configuration as source

src-file

Src Checkpoint file

srcfile_uri

Type: uri

Src Checkpoint file path

dst-checkpoint

Use checkpoint as destination configuration

chkpoint_name

Type: string

length: 80

Checkpoint name

dst-running-cfg

Use running configuration as destination

dst-startup-cfg

Use startup configuration as destination

dst-file

Dst Checkpoint file

dstfile_uri

Type: uri

Src Checkpoint file path

__readonly__

Read only

patch_entry

Type: string

length: 256

rollback patch entry

Command Modes

- /exec

show dot1q-tunnel

show dot1q-tunnel [ __readonly__ TABLE_interface interface ]

Syntax Description

show

Show running system information

dot1q-tunnel

Show if port mode is dot1q-tunnel

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

Command Modes

- /exec

show dot1q-tunnel interface

show dot1q-tunnel interface ifid_eth_dot1q_tunnel [ __readonly__ TABLE_interface interface ]

Syntax Description

show

Show running system information

dot1q-tunnel

Show if port mode is dot1q-tunnel

interface

Show interface status and information

ifid_eth_dot1q_tunnel

Type: interface-mrange

Enter interface type and number in module/slot format

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

Command Modes

- /exec

Chapter 6. E Show Commands

- show eigrp

- show eigrp accounting

- show eigrp event

- show eigrp interfaces

- show eigrp metric

- show eigrp sia-event

- show eigrp sia-statistics

- show eigrp timers

- show eigrp traffic

- show email

- show encryption service stat

- show environment

- show environment fex

- show eol status

- show errdisable

- show errdisable flap

- show event-history

- show event-history xbar

- show event manager environment

- show event manager event-types

- show event manager events action-log

- show event manager history events

- show event manager policy-state

- show event manager script system

- show event manager system-policy

show eigrp

show { ip | ipv6 } eigrp [eigrp-ptag] [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_asn asn TABLE_vrf vrf router_id shutdown authen_md5 authen_keychain metric_weight_k1 metric_weight_k2 metric_weight_k3 metric_weight_k4 metric_weight_k5 metric_weight_k6 metric_ribscale metric_delayacc metric_version eigrp_proto multicast_group multicast_groupv6 int_distance ext_distance max_paths num_interfaces num_lo_interfaces num_pass_interfaces num_peers [ TABLE_redist redist_srcproto redist_routemap ] graceful_restart stub_configured stub_option_connected stub_option_summary stub_option_redist stub_option_leak_map stub_option_receive_only ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

detail

Show detailed EIGRP process stats

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

router_id

Type: ipaddr

shutdown

Type: bool

authen_md5

Type: bool

authen_keychain

Type: string

metric_weight_k1

Type: uinteger

metric_weight_k2

Type: uinteger

metric_weight_k3

Type: uinteger

metric_weight_k4

Type: uinteger

metric_weight_k5

Type: uinteger

metric_weight_k6

Type: uinteger

metric_ribscale

Type: uinteger

metric_delayacc

Type: uinteger

metric_version

Type: string

eigrp_proto

Type: uinteger

multicast_group

Type: ipaddr

multicast_groupv6

Type: ipv6addr

int_distance

Type: uinteger

ext_distance

Type: uinteger

max_paths

Type: uinteger

num_interfaces

Type: uinteger

num_lo_interfaces

Type: uinteger

num_pass_interfaces

Type: uinteger

num_peers

Type: uinteger

TABLE_redist

redist_srcproto

Type: string

redist_routemap

Type: string

graceful_restart

Type: bool

stub_configured

Type: bool

stub_option_connected

Type: bool

stub_option_summary

Type: bool

stub_option_redist

Type: bool

stub_option_leak_map

Type: bool

stub_option_receive_only

Type: bool

Command Modes

- /exec

show eigrp accounting

show { ip | ipv6 } eigrp [eigrp-ptag] accounting [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_asn asn TABLE_vrf vrf router_id total_prefix redist_state redist_count restart_count acct_timer [ TABLE_peer p_ipaddr p_ipv6addr p_state p_ifname p_prefix_count p_restart_count p_acct_timer ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

accounting

IP-EIGRP Accounting

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

router_id

Type: ipaddr

total_prefix

Type: uinteger

redist_state

adjacency  value: 1

pending  value: 2

down  value: 3

redist_count

Type: uinteger

restart_count

Type: uinteger

acct_timer

Type: uinteger

TABLE_peer

p_ipaddr

Type: ipaddr

p_ipv6addr

Type: ipv6addr

p_state

adjacency  value: 1

pending  value: 2

down  value: 3

p_ifname

Type: interface

p_prefix_count

Type: uinteger

p_restart_count

Type: uinteger

p_acct_timer

Type: uinteger

Command Modes

- /exec

show eigrp event

show { ip | ipv6 } eigrp [eigrp-ptag] event [ start-num end-num ] [type] [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

event

IP-EIGRP Events

start-num

Type: uinteger

min: 1  max: 0

Starting event number

end-num

Type: uinteger

min: 1  max: 0

Ending event number

type

Show Events being logged

Command Modes

- /exec

show eigrp interfaces

show { ip | ipv6 } eigrp [eigrp-ptag] interfaces [detail] [interface] [brief] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_asn asn TABLE_vrf vrf [ TABLE_if ifname peer_count xmitq_unrel xmitq_rel mean_srtt send_intvl_unrel send_intvl_rel mcast_flow_delay pending_routes [ hello_intvl holdtime_intvl next_xmit_serno packetize_pending mcasts_sent_unrel mcasts_sent_rel ucasts_sent_unrel ucasts_sent_rel mcast_exceptions cr_packets acks_suppressed retrans_sent out_of_seq_rcvd stub_interface nexthop_self auth_mode_md5 auth_key_chain ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

interfaces

IP-EIGRP interfaces

detail

Show detailed interface information

interface

Type: interface

Interface

brief

Show summary information only

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

TABLE_if

ifname

Type: interface

peer_count

Type: uinteger

xmitq_unrel

Type: uinteger

xmitq_rel

Type: uinteger

mean_srtt

Type: uinteger

send_intvl_unrel

Type: uinteger

send_intvl_rel

Type: uinteger

mcast_flow_delay

Type: uinteger

pending_routes

Type: uinteger

hello_intvl

Type: uinteger

holdtime_intvl

Type: uinteger

next_xmit_serno

Type: uinteger

packetize_pending

Type: bool

mcasts_sent_unrel

Type: uinteger

mcasts_sent_rel

Type: uinteger

ucasts_sent_unrel

Type: uinteger

ucasts_sent_rel

Type: uinteger

mcast_exceptions

Type: uinteger

cr_packets

Type: uinteger

acks_suppressed

Type: uinteger

retrans_sent

Type: uinteger

out_of_seq_rcvd

Type: uinteger

stub_interface

Type: bool

nexthop_self

Type: bool

auth_mode_md5

Type: bool

auth_key_chain

Type: string

Command Modes

- /exec

show eigrp metric

show { ip | ipv6 } eigrp [eigrp-ptag] metric bw delay [rel] [load] [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

metric

Compute composite metric from vector metric

bw

Type: uinteger

min: 1  max: 0

Bandwidth in Kbits per second

delay

Type: uinteger

min: 0  max: 0

Delay metric

rel

Type: uinteger

min: 0  max: 255

Reliability metric where 255 is 100% reliable

load

Type: uinteger

min: 1  max: 255

Effective bandwidth metric (Loading) where 255 is 100% loaded

Command Modes

- /exec

show eigrp sia-event

show { ip | ipv6 } eigrp [eigrp-ptag] sia-event [ start-num end-num ] [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

sia-event

IP-EIGRP SIA event

start-num

Type: uinteger

min: 1  max: 0

Starting event number

end-num

Type: uinteger

min: 1  max: 0

Ending event number

Command Modes

- /exec

show eigrp sia-statistics

show { ip | ipv6 } eigrp [eigrp-ptag] sia-statistics [peer] [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

sia-statistics

IP-EIGRP SIA Statistics

peer

Type: ipaddr

Peer ID to display information about

Command Modes

- /exec

show eigrp timers

show { ip | ipv6 } eigrp [eigrp-ptag] timers [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

timers

IP-EIGRP Timers

Command Modes

- /exec

show eigrp traffic

show { ip | ipv6 } eigrp [eigrp-ptag] traffic [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_asn asn TABLE_vrf vrf hellos_sent hellos_rcvd updates_sent updates_rcvd queries_sent queries_rcvd replies_sent replies_rcvd acks_sent acks_rcvd max_inqueue_depth inqueue_drops sia_queries_sent sia_queries_rcvd sia_replies_sent sia_replies_rcvd ]

Syntax Description

show

Show running system information

ip

Display IP information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

traffic

IP-EIGRP Traffic Statistics

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

hellos_sent

Type: uinteger

hellos_rcvd

Type: uinteger

updates_sent

Type: uinteger

updates_rcvd

Type: uinteger

queries_sent

Type: uinteger

queries_rcvd

Type: uinteger

replies_sent

Type: uinteger

replies_rcvd

Type: uinteger

acks_sent

Type: uinteger

acks_rcvd

Type: uinteger

max_inqueue_depth

Type: uinteger

inqueue_drops

Type: uinteger

sia_queries_sent

Type: uinteger

sia_queries_rcvd

Type: uinteger

sia_replies_sent

Type: uinteger

sia_replies_rcvd

Type: uinteger

Command Modes

- /exec

show email

show email [ __readonly__ [ipv4] [ipv6] [host] [port] [reply] [from] [vrfname] ]

Syntax Description

show

Show running system information

email

Pipe email configuration

__readonly__

ipv4

Type: ipaddr

ipv6

Type: ipv6addr

host

Type: string

port

Type: uinteger

reply

Type: string

from

Type: string

vrfname

Type: vrf

Command Modes

- /exec

show encryption service stat

show encryption service stat [ __readonly__ [ encryptionService MasterKeyEncryption Type6Encryption ] ]

Syntax Description

show

Show running system information

encryption

Encryption service

service

Encryption service

stat

Encrytpin service status

__readonly__

encryptionService

Encryption service status

enabled  value: 0

disabled  value: 1

MasterKeyEncryption

Master key status

not configured  value: 0

configured  value: 1

Type6Encryption

Is type 6 encryption used?

not being used  value: 0

being used  value: 1

Command Modes

- /exec

show environment

show environment [ clock | fan [detail] | power [detail] [ampere] | temperature [ module module | s0 santa-cruz-range ] ] [ __readonly__ TABLE_clockinfo clockname clkmodel clkhwver clkstatus act_standby fandetails fan_filter_status TABLE_faninfo fanname fanmodel fanhwver fandir fanstatus failfanlet TABLE_fan_zone_speed zone speed TABLE_fantray fanname fannum fandir fanperc fanrpm powersup voltage_level TABLE_psinfo psnum psmodel actual_out actual_input tot_capa ps_status TABLE_mod_pow_info modnum mod_model actual_draw allocated modstatus power_summary ps_redun_mode ps_oper_mode tot_pow_capacity tot_gridA_capacity tot_gridB_capacity cumulative_power tot_pow_out_actual_draw tot_pow_input_actual_draw tot_pow_alloc_budgeted available_pow powersup_detail reserve_sup reserve_xbar reserve_fan reserve_supxbarfan pow_used_by_mods TABLE_tempinfo tempmod sensor majthres minthres curtemp alarmstatus ]

Syntax Description

show

Show running system information

environment

system environment information

clock

Chassis Clock information

fan

Fan information

power

Power capacity and power distribution information

detail

Detail Fan-tray information when used with Fan. Detail Power capacity and power distribution information when used with Power

ampere

Ampere Power capacity and power distribution information

temperature

temperature sensor information

module

enter a module number

module

Type: integer

please enter the module number

s0

Type: xbar-str

xbar

santa-cruz-range

Type: integer

please enter the xbar number

__readonly__

TABLE_clockinfo

Environment Clock

clockname

Type: string

Clock Instance (A or B)

clkmodel

Type: string

Model number of clock

clkhwver

Type: string

Hardware version of the clock

clkstatus

Present/Absent Status of the clock

None  value: 0

Ok  value: 1

Failure  value: 2

Absent  value: 3

NotSupported  value: 4

act_standby

Active/Standby Status of clock

Active  value: 0

Standby  value: 1

None  value: 2

fandetails

Environment Fan

fan_filter_status

Present/Absent Status of fan filter

Absent  value: 0

Present  value: 1

NotSupported  value: 2

TABLE_faninfo

Fan Info

fanname

Type: string

Fan Instance

fanmodel

Type: string

Model number of fan

fanhwver

Type: string

Hardware version of the fan

fandir

Air-flow direction of the fan-tray

back-to-front  value: 1

front-to-back  value: 0

none  value: 2

fanstatus

Present/Absent Status of the fan

None  value: 0

Ok  value: 1

Failure  value: 2

Absent  value: 3

Shutdown  value: 4

TABLE_fan_zone_speed

Fan Zone Speeds

zone

Type: string

Zone Number

speed

Type: string

Zone Speed

failfanlet

Type: string

failed fanlet number

TABLE_fantray

Fan Tray Details table

fanname

Type: string

Fan Tray Instance

fannum

Type: string

Fan number in the tray

fandir

Air-flow direction of the fan-tray

back-to-front  value: 1

front-to-back  value: 0

none  value: 2

fanperc

Type: string

FAN Speed percentage

fanrpm

Type: string

FAN Speed RPM

powersup

Environment Power

voltage_level

Type: uinteger

Voltage Level

TABLE_psinfo

Power Supply Info

psnum

Type: uinteger

Power Supply Number

psmodel

Type: string

Power Supply Model

actual_out

Type: string

Actual Output

actual_input

Type: string

Actual Input

tot_capa

Type: string

Total Capacity

ps_status

Power Supply Status

None  value: 0

Ok  value: 1

Fail/Shut  value: 2

Absent  value: 3

Shutdown  value: 4

TABLE_mod_pow_info

Module Power Info

modnum

Type: string

Module number

mod_model

Type: string

Model ProductID number

actual_draw

Type: string

Actual Draw

allocated

Type: string

Power allocated

modstatus

Module Status

Powered-Up  value: 1

Powered-Dn  value: 2

Pwr-Denied  value: 3

Err-Pwd-Dn  value: 4

Absent  value: 5

Present  value: 6

Failure  value: 10

Pwr-Cycld  value: 8

power_summary

Power Usage Summary

ps_redun_mode

Mode: Redundant or Non-redundant

Non-Redundant(combined)  value: 0

Redundant  value: 1

Combined(obsolete)  value: 2

Non-Redundant  value: 3

InSrc-Redundant  value: 4

PS-Redundant  value: 5

ps_oper_mode

Operational Mode

Non-Redundant(combined)  value: 0

Redundant  value: 1

Combined(obsolete)  value: 2

Non-Redundant  value: 3

InSrc-Redundant  value: 4

PS-Redundant  value: 5

tot_pow_capacity

Type: string

Total Power Capacity

tot_gridA_capacity

Type: string

Total Grid-A Capacity

tot_gridB_capacity

Type: string

Total Grid-B Capacity

cumulative_power

Type: string

Total Power of all Inputs

tot_pow_out_actual_draw

Type: string

Total Power Output, Actuals

tot_pow_input_actual_draw

Type: string

Total Power Input, Actuals

tot_pow_alloc_budgeted

Type: string

Total Power Allocated/budgeted

available_pow

Type: string

Remaining Power Available

powersup_detail

PowerSupply Details

reserve_sup

Type: string

Power reserved for Supervisors

reserve_xbar

Type: string

Power reserved for Xbars

reserve_fan

Type: string

Power reserved for Fans

reserve_supxbarfan

Type: string

Total Power reserved for Sups,Xbars,Fans

pow_used_by_mods

Type: string

Power currently used by Modules

TABLE_tempinfo

Environment Temperature

tempmod

Type: string

Module

sensor

Type: string

Sensor name

majthres

Type: string

Major Threshold

minthres

Type: string

Minor Threshold

curtemp

Type: string

Current temperature

alarmstatus

Alarm Status

Failure  value: 0

AccessFailure  value: 18

Ok  value: 1

MinorAlarm  value: 2

MajorAlarm  value: 3

MinorAlarm  value: 4

Ok  value: 5

MajorAlarm  value: 6

MinorAlarm  value: 7

MajorAlarm  value: 8

Ok  value: 9

NotPresent  value: 10

Command Modes

- /exec

show environment fex

show environment fex { all | i } [ temperature | power | fan ] [ __readonly__ fandetails fan_filter_status TABLE_faninfo fanfex fanname fanmodel fanhwver fanstatus powersup voltage_level TABLE_psinfo psfex psnum psmodel watts amps ps_status TABLE_mod_pow_info modfex modnum mod_model watts_requested amps_requested watts_alloced amps_alloced modstatus power_summary powfex ps_redun_mode tot_pow_capacity reserve_sup pow_used_by_mods available_pow TABLE_tempinfo tempfex tempmod sensor majthres minthres curtemp alarmstatus ]

Syntax Description

show

Show running system information

environment

system environment information

fex

Show fex environment information

all

Show information for all FEX

i

Type: integer

min: 100  max: 199

Enter FEX identifier

temperature

temperature sensor information

power

power capacity and power distribution information

fan

Fan information

__readonly__

fandetails

Environment Fan

fan_filter_status

Present/Absent Status of fan filter

Absent  value: 0

Present  value: 1

NotSupported  value: 2

TABLE_faninfo

Fan Info

fanfex

Type: uinteger

Fex

fanname

Type: string

Fan Instance

fanmodel

Type: string

Model number of fan

fanhwver

Type: string

Hardware version of the fan

fanstatus

Type: string

Present/Absent Status of the fan

powersup

Environment Power

voltage_level

Type: uinteger

Voltage Level

TABLE_psinfo

Power Supply Info

psfex

Type: uinteger

Fex

psnum

Type: uinteger

Power Supply Number

psmodel

Type: string

Power Supply Model

watts

Type: string

Power in Watts

amps

Type: string

Power in Amps

ps_status

Type: string

Power Supply Status

TABLE_mod_pow_info

Module Power Info

modfex

Type: uinteger

Fex

modnum

Type: string

Module number

mod_model

Type: string

Model ProductID number

watts_requested

Type: string

Power requested in Watts

amps_requested

Type: string

Power requested in Amps

watts_alloced

Type: string

Power allocated in Watts

amps_alloced

Type: string

Power allocated in Amps

modstatus

Type: string

Module Status

power_summary

Power Usage Summary

powfex

Type: uinteger

Fex

ps_redun_mode

Type: string

Mode: Redundant or Non-redundant

tot_pow_capacity

Type: string

Total Power Capacity

reserve_sup

Type: string

Power reserved for Supervisors

pow_used_by_mods

Type: string

Power currently used by Modules

available_pow

Type: string

Total Power Available

TABLE_tempinfo

Environment Temperature

tempfex

Type: uinteger

Fex

tempmod

Type: string

Module

sensor

Type: string

Sensor name

majthres

Type: string

Major Threshold

minthres

Type: string

Minor Threshold

curtemp

Type: string

Current temperature

alarmstatus

Type: string

Alarm Status

Command Modes

- /exec

show eol status

show eol status

Syntax Description

show

Show running system information

Command Modes

- /exec

show errdisable

show errdisable { detect | recovery } [ __readonly__ TABLE_errdisable cause state [time_interval] ]

Syntax Description

show

Show running system information

errdisable

Error disable

detect

Show errdisable detect

recovery

Show errdisable recovery

__readonly__

Read Only

TABLE_errdisable

show errdisable

cause

errdisable cause

link-flap  value: 0

link-flap
udld  value: 1

udld
bpduguard  value: 2

bpduguard
loopback  value: 3

loopback
storm-ctrl  value: 4

storm-ctrl
dhcp-rate-lim  value: 5

dhcp-rate-lim
arp-inspection  value: 6

arp-inspection
sec-violation  value: 7

sec-violation
psec-violation  value: 8

psec-violation
vpc-peerlink  value: 9

vpc-peerlink
port-state-failed  value: 10

port-state-failed
event-debug  value: 11

event-debug
event-debug1  value: 12

event-debug1
event-debug2  value: 13

event-debug2
event-debug3  value: 14

event-debug3
event-debug4  value: 15

event-debug4
ip-addr-conflict  value: 16

ip-addr-conflict
ipqos-mgr-error  value: 17

ipqos-mgr-error
ethpm  value: 18

ethpm
ipqos-compat-failure  value: 19

ipqos-compat-failure
syserr based  value: 20

syserr based
CMM miscabling  value: 21

CMM miscabling

state

Type: string

Interface state

time_interval

Type: integer

err revovery time interval

Command Modes

- /exec

show errdisable flap

show errdisable flap

Syntax Description

show

Show running system information

errdisable

Error disable

flap

linkstate flapping

Command Modes

- /exec

show event-history

show event-history

Syntax Description

show

Show running system information

event-history

show switch wide event history configuration

Command Modes

- /exec

show event-history xbar

show event-history xbar

Syntax Description

show

Show running system information

event-history

show switch wide event history configuration

xbar

Show all event-history debugging flags of xbar

Command Modes

- /exec

show event manager environment

show event manager environment { all | varname } [ __readonly__ environment-details ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

environment

Show information about environment variables

all

Show information about all the configured environment variables

varname

Type: string

length: 029

The environment variable name on which information is required

__readonly__

environment-details

Type: string

Command Modes

- /exec

show event manager event-types

show event manager event-types [ all | event-type-name ] [ module module-id ] [ __readonly__ event-types ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

event-types

Show information about registered event types

all

Show information about advanced event types as well

event-type-name

Type: string

Show information about the specified event type

module

Show information about event types on other modules

module-id

Type: integer

__readonly__

event-types

Type: string

Command Modes

- /exec

show event manager events action-log

show event manager events action-log [ policy policy-name | event-type event-type-name ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

events

Show information about the history of past events

action-log

Show policy action logs

policy

Name of policy

policy-name

Type: string

length: 029

Enter policy name

event-type

Name of event

event-type-name

Type: string

length: 029

Enter event type

Command Modes

- /exec

show event manager history events

show event manager history events [detail] [ maximum n-events ] [ severity sev ] [ __readonly__ history-events ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

history

Show information about the history of past activity

events

Show information about the history of past events

detail

Show information about the event parameters as well

maximum

Specify an upper limit on the number of events to be shown

n-events

Type: uinteger

min: 1  max: 500

Specify the maximum number of events to be shown

severity

Show only those events whose severity is >= specified severity

sev

Enter the severity threshold

minor  value: 1

moderate  value: 2

severe  value: 3

catastrophic  value: 4

__readonly__

history-events

Type: string

Command Modes

- /exec

show event manager policy-state

show event manager policy-state name [ module module-id ] [ __readonly__ policy-state ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

policy-state

Show information about the state of a policy

name

Type: string

length: 029

Name of the policy

module

Get the information from a module

module-id

Type: integer

__readonly__

policy-state

Type: string

Command Modes

- /exec

show event manager script system

show event manager script system { all | script-name } [ __readonly__ script_system_details ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

script

Show information about a script policy

system

Show information about a system script policy

all

Show all the available system script policies

script-name

Type: string

Name of the system script policy

__readonly__

script_system_details

Type: string

Command Modes

- /exec

show event manager system-policy

show event manager system-policy [ all | policy-name ] [ __readonly__ sys-pol-details ]

Syntax Description

show

Show running system information

event

Event Manager commands

manager

Event Manager commands

system-policy

Show information about default system policies

all

Show all policies (including advanced and non-overridable ones)

policy-name

Type: string

Show detailed information about the specified policy

__readonly__

sys-pol-details

Type: string

Command Modes

- /exec

Chapter 7. F Show Commands

- show fabricpath counters dropped

- show fabricpath load-balance

- show fabricpath load-balance multicast ftag-selected flow-type

- show fabricpath load-balance unicast forwarding-path ftag switchid flow-type

- show fabricpath topology

- show fabricpath topology interface

- show fabricpath topology interface vlan

- show fabricpath topology vlan

- show feature

- show feature-set

- show feature-set services

- show fex (satmgr)

- show fex (satmgr)

- show fex detail

- show fex transceiver

- show fex version

- show file

- show fips status

- show forwarding

- show forwarding adjacency

- show forwarding bypass-hardware

- show forwarding capture

- show forwarding distribution

- show forwarding distribution capture

- show forwarding distribution clients

- show forwarding distribution fib-state

- show forwarding distribution ip igmp snooping

- show forwarding distribution ipv6 multicast route

- show forwarding distribution l2 multicast

- show forwarding distribution lisp counters

- show forwarding distribution lisp vrf enabled

- show forwarding distribution logging

- show forwarding distribution multicast (mfdm)

- show forwarding distribution multicast (mfdm)

- show forwarding distribution multicast client-ack-db

- show forwarding distribution multicast client

- show forwarding distribution multicast outgoing-interface-list

- show forwarding distribution multicast resp-ack-timer-msgs

- show forwarding distribution multicast route

- show forwarding distribution otv multicast route

- show forwarding distribution peer-id

- show forwarding distribution trace

- show forwarding ecmp

- show forwarding ecmp recursive

- show forwarding file-log disable

- show forwarding file-log enable

- show forwarding interfaces

- show forwarding ipv6

- show forwarding ipv6 adjacency

- show forwarding ipv6 multicast route

- show forwarding ipv6 pss route

- show forwarding l2 multicast

- show forwarding l2vpn ipv6 multicast route

- show forwarding l2vpn label vpls

- show forwarding l2vpn label xconnect

- show forwarding l2vpn multicast outgoing-interface-list

- show forwarding l2vpn multicast route

- show forwarding l2vpn service vpls

- show forwarding l2vpn service xconnect

- show forwarding l2vpn vlan

- show forwarding mpls

- show forwarding mpls aggregate

- show forwarding mpls cbts

- show forwarding mpls ecmp

- show forwarding mpls summary

- show forwarding mpls te

- show forwarding multicast outgoing-interface-list

- show forwarding multicast route

- show forwarding otv

- show forwarding otv ipv6 multicast route

- show forwarding otv multicast outgoing-interface-list

- show forwarding otv multicast route

- show forwarding otv vlan

- show forwarding pss route

- show forwarding restart

- show forwarding security group-tag

- show forwarding security mac

- show forwarding trace

- show forwarding trace profile

- show forwarding trace profile funcstats

show fabricpath counters dropped

show fabricpath counters dropped [ module module ] [ __readonly__ mod_bmp vdc_id msg is_brief ]

Syntax Description

show

Show running system information

fabricpath

fabricpath information

counters

Show fabricpath counters

dropped

Packets dropped due to various vlan errors

module

Specify one module

module

Type: integer

Module number

__readonly__

Read Only

mod_bmp

Type: uinteger

Bitmap of valid modules

vdc_id

Type: integer

Current VDC id

msg

Type: string

Message to give details about command execution

is_brief

Type: bool

Show summary for all modules or show counter for each module instance

Command Modes

- /exec

show fabricpath load-balance

show fabricpath load-balance [ __readonly__ is_mcast algo [pref] rotate_amount use_vlan xor_warn ]

Syntax Description

show

Show running system information

fabricpath

fabricpath information

load-balance

Show FabricPath load-balance information

__readonly__

Read Only

is_mcast

Type: uinteger

Is mcast config

algo

Type: uinteger

Hash type used

pref

Type: uinteger

Layer preference

rotate_amount

Type: uinteger

Rotate ammount

use_vlan

Type: uinteger

Use VLAN in hash

xor_warn

Type: string

XOR Warning

Command Modes

- /exec

show fabricpath load-balance multicast ftag-selected flow-type

show fabricpath load-balance multicast ftag-selected flow-type { l2 { dst-mac dst-mac | src-mac src-mac } + ether-type ether-type | l3 { dst-ip dst-ip | src-ip src-ip | dst-ipv6 dst-ipv6 | src-ipv6 src-ipv6 } + | l4 { l4-src-port l4-src-port | l4-dst-port l4-dst-port } + [ dst-ip dst-ip | src-ip src-ip | dst-ipv6 dst-ipv6 | src-ipv6 src-ipv6 | l4-src-port l4-src-port | l4-dst-port l4-dst-port ] + } vlan vlan module mod-no [ __readonly__ cmd_string is_dce_module ]

Syntax Description

show

Show running system information

fabricpath

fabricpath information

load-balance

Show FabricPath load-balance information

multicast

Show FabricPath multicast load-balance infomation

ftag-selected

ftag information

module

Ingress module at Fabricpath edge

mod-no

Type: uinteger

module number

flow-type

indicate flow type as L2 or L3 or L4

l4

indicate Layer 4 flow

l3

indicate Layer 3 flow

l2

indicate Layer 2 flow

dst-mac

Destination MAC Address

dst-mac

Type: ethernet

Mac Address

src-mac

Source MAC Address

src-mac

Type: ethernet

Mac Address

vlan

Virtual LAN

vlan

Type: uinteger

VLAN id

ether-type

Ether Type

ether-type

Type: uinteger

Ether Type id

dst-ip

Destination IPv4 address

dst-ip

Type: ipaddr

Destination IP address in format i.i.i.i

src-ip

Source IPv4 address

src-ip

Type: ipaddr

Source IP address in format i.i.i.i

dst-ipv6

Destination IPv6 address

dst-ipv6

Type: ipv6addr

Destination IPv6 address in format i:i:i:i:i:i

src-ipv6

Source IPv6 address

src-ipv6

Type: ipv6addr

Source IPv6 address in format i:i:i:i:i:i

l4-src-port

Source L4 port

l4-src-port

Type: integer

min: 0  max: 65535

L4 port number

l4-dst-port

Destination l4 port

l4-dst-port

Type: integer

min: 0  max: 65535

L4 port number

__readonly__

Read Only

cmd_string

Type: string

Command String

is_dce_module

Type: bool

Whether Module is DCE

Command Modes

- /exec

- /exec

show fabricpath load-balance unicast forwarding-path ftag switchid flow-type

show fabricpath load-balance unicast forwarding-path ftag ftag switchid swid flow-type { l2 { dst-mac dst-mac | src-mac src-mac } + ether-type ether-type | l3 { dst-ip dst-ip | src-ip src-ip | dst-ipv6 dst-ipv6 | src-ipv6 src-ipv6 } + | l4 { l4-src-port l4-src-port | l4-dst-port l4-dst-port } + [ dst-ip dst-ip | src-ip src-ip | dst-ipv6 dst-ipv6 | src-ipv6 src-ipv6 | l4-src-port l4-src-port | l4-dst-port l4-dst-port ] + } [ vlan vlan ] module mod-no [ __readonly__ cmd_string is_dce_module ]

Syntax Description

show

Show running system information

fabricpath

fabricpath information

load-balance

Show FabricPath load-balance information

unicast

Show FabricPath unicast load-balance information

forwarding-path

forwarding-path

module

Ingress module

mod-no

Type: uinteger

module number

ftag

ftag

ftag

Type: uinteger

min: 0  max: 1023

ftag

switchid

switchid

swid

Type: uinteger

min: 0  max: 16383

switch id

flow-type

indicate flow type as L2 or L3 or L4

l4

indicate Layer 4 flow

l3

indicate Layer 3 flow

l2

indicate Layer 2 flow

src-mac

Source MAC Address

src-mac

Type: ethernet

Mac Address

dst-mac

Destination MAC Address

dst-mac

Type: ethernet

Mac Address

vlan

Virtual LAN

vlan

Type: uinteger

VLAN id

ether-type

Ether Type

ether-type

Type: uinteger

Ether Type id

src-ip

Source IPv4 address

src-ip

Type: ipaddr

Source IP address in format i.i.i.i

dst-ip

Destination IPv4 address

dst-ip

Type: ipaddr

Destination IP address in format i.i.i.i

src-ipv6

Source IPv6 address

src-ipv6

Type: ipv6addr

Source IPv6 address in format i:i:i:i:i:i

dst-ipv6

Destination IPv6 address

dst-ipv6

Type: ipv6addr

Destination IPv6 address in format i:i:i:i:i:i

l4-src-port

Source L4 port

l4-src-port

Type: integer

min: 0  max: 65535

L4 port number

l4-dst-port

Destination l4 port

l4-dst-port

Type: integer

min: 0  max: 65535

L4 port number

__readonly__

Read Only

cmd_string

Type: string

Command String

is_dce_module

Type: bool

Whether Module is DCE

Command Modes

- /exec

- /exec

show fabricpath topology

show fabricpath topology [detail] [passive] [ __readonly__ TABLE_tpg name id state [ reason pend ] ]

Syntax Description

show

Show running system information

fabricpath

Configure fabricpath topology

topology

Configure fabricpath topology

detail

Detailed information

passive

Detailed passive topology information

__readonly__

TABLE_tpg

name

Type: string

id

Type: uinteger

state

Type: string

reason

Type: string

pend

Type: bool

Command Modes

- /exec

show fabricpath topology interface

show fabricpath topology [tpg-id] interface [ interface | all ] [ __readonly__ TABLE_tpg_if if_name tpg_name tpg_id tpg_if_state ]

Syntax Description

show

Show running system information

fabricpath

Configure fabricpath topology

topology

Configure fabricpath topology

tpg-id

Type: integer

min: 0  max: 63

Fabricpath Topology ID 0-63

interface

Display interface topology information

interface

Type: interface

Display interface topology information

all

Display all DCE and non-DCE interfaces

__readonly__

TABLE_tpg_if

if_name

Type: string

tpg_name

Type: string

tpg_id

Type: uinteger

tpg_if_state

Type: string

Command Modes

- /exec

show fabricpath topology interface vlan

show fabricpath topology interface [ interface | all ] vlan [active] [ __readonly__ TABLE_if_vlan if_name tpg_name tpg_id vlan_range ]

Syntax Description

show

Show running system information

fabricpath

Configure fabricpath topology

topology

Configure fabricpath topology

interface

Display interface topology information

interface

Type: interface

Display interface topology information

all

Display all DCE and non-DCE interfaces

vlan

Show vlans configured on the interface

active

Show active vlans

__readonly__

TABLE_if_vlan

if_name

Type: string

tpg_name

Type: string

tpg_id

Type: uinteger

vlan_range

Type: vlan-mrange

Command Modes

- /exec

show fabricpath topology vlan

show fabricpath topology [tpg-id] vlan [active] [ __readonly__ TABLE_tpg_vlan tpg_name tpg_id vlan_range ]

Syntax Description

show

Show running system information

fabricpath

Configure fabricpath topology

topology

Configure fabricpath topology

tpg-id

Type: integer

min: 0  max: 63

Fabricpath Topology ID 0-63

vlan

VLANS in a L2 topology

active

Shows all active VLANs of the L2 topology

__readonly__

TABLE_tpg_vlan

tpg_name

Type: string

tpg_id

Type: uinteger

vlan_range

Type: vlan-mrange

Command Modes

- /exec

show feature

show feature [ __readonly__ [ TABLE_cfcFeatureCtrlTable cfcFeatureCtrlName2 cfcFeatureCtrlInstanceNum2 cfcFeatureCtrlOpStatus2 ] ]

Syntax Description

show

Show running system information

feature

Show feature status

__readonly__

TABLE_cfcFeatureCtrlTable

feature table

cfcFeatureCtrlName2

Type: string

feature

cfcFeatureCtrlInstanceNum2

Type: integer

instance number

cfcFeatureCtrlOpStatus2

Type: string

operation status

Command Modes

- /exec

show feature-set

show feature-set [ name | id ] [ __readonly__ TABLE-cfcFeatureSetTable name-out id-out cfcFeatureSetName cfcFeatureSetAction cfcFeatureSetLastAction cfcFeatureSetLastActionResult cfcFeatureSetLastFailureReason cfcFeatureSetOpStatus cfcFeatureSetOpStatusReason ]

Syntax Description

show

Show running system information

feature-set

Show feature set status

name

Type: string

feature-set name

name-out

Type: string

feature-set name

id

Type: integer

feature-set id

__readonly__

TABLE-cfcFeatureSetTable

feature-set table

id-out

Type: integer

feature-set table index

cfcFeatureSetName

Type: string

feature-set name

cfcFeatureSetAction

Type: integer

action

cfcFeatureSetLastAction

Type: integer

last action

cfcFeatureSetLastActionResult

Type: integer

last action result

cfcFeatureSetLastFailureReason

Type: string

last failure reason

cfcFeatureSetOpStatus

operation status

unknown  value: 1

enabled  value: 2

disabled  value: 3

installed  value: 4

uninstalled  value: 5

cfcFeatureSetOpStatusReason

Type: string

operation status

Command Modes

- /exec

show feature-set services

show feature-set services s0 [ __readonly__ TABLE_services service_name count feature_set ]

Syntax Description

show

Show running system information

feature-set

Show feature set status

services

Show services in feature set

__readonly__

TABLE_services

all service names in feature set

service_name

Type: string

name of the service

count

Type: integer

number of services in the feature set

feature_set

Type: string

feature set name

s0

Type: string

Name of feature set

Command Modes

- /exec

show fex (satmgr)

show fex chas_no [ detail | ports | event-history ] [ __readonly__ TABLE_fex_info chas_id descr fex_state fex_ver sw_ver fex_interim_ver sw_interim_ver model serial part_no card_id mac num_macs bay rack enclosure enclosure_ser rack_id fex_sw_gen sw_sw_gen pin_mode max_link post_level fbr_port_control TABLE_fbr_state fbr_index fbr_oper_state fsm_state TABLE_fex_port fex_port fex_port_oper_state fbr_port primary_fabric TABLE_logs log ]

Syntax Description

show

Show running system information

fex

Show FEX information

chas_no

Type: uinteger

min: 101  max: 199

FEX number

detail

Detailed information

ports

all FEX port information

event-history

FEX event history

__readonly__

TABLE_fex_info

FEX information

chas_id

Type: uinteger

Configured FEX number

descr

Type: string

Description

fex_state

Type: string

FEX State

fex_ver

Type: string

FEX version

sw_ver

Type: string

Switch version

fex_interim_ver

Type: string

FEX interim version

sw_interim_ver

Type: string

Switch interim version

model

Type: string

FEX model

serial

Type: string

FEX serial

part_no

Type: string

Part number

card_id

Type: uinteger

Card id

mac

Type: string

Mac address

num_macs

Type: uinteger

Number of macs

bay

Type: uinteger

Bay Number

rack

Type: string

Rack Name

enclosure

Type: string

Enclosure Name

enclosure_ser

Type: string

Enclosure serial

rack_id

Type: string

Rack id

fex_sw_gen

Type: uinteger

Fex software gen

sw_sw_gen

Type: uinteger

Switch software gen

pin_mode

Type: string

Pinning mode

max_link

Type: uinteger

Maximum links

post_level

Type: string

Post level

fbr_port_control

Type: string

Fabric port for control traffic

TABLE_fbr_state

Fabric port state

fbr_index

Type: string

Fabric port interface

fbr_oper_state

Type: string

Fabric port operational state

fsm_state

Type: string

Fabric FSM state

TABLE_fex_port

FEX port

fex_port

Type: string

FEX port

fex_port_oper_state

Type: string

Operational state

fbr_port

Type: string

Fabric port

primary_fabric

Type: string

Primary fabric port

TABLE_logs

FEX logs

log

Type: string

FEX log

Command Modes

- /exec

show fex (satmgr)

show fex [ __readonly__ TABLE_fex fex_number chas_vendor fex_model chas_ser mod_model fex_ser module_no mod_partno fex_descr fex_state ]

Syntax Description

show

Show running system information

fex

Show FEX information

__readonly__

TABLE_fex

Fex table

fex_number

Type: string

Configured FEX number

chas_vendor

Type: string

Chassis Vendor

fex_model

Type: string

Fex Model

chas_ser

Type: string

Chassis Serial number

mod_model

Type: string

IO Module model

fex_ser

Type: string

IO Module serial

module_no

Type: uinteger

Module number

mod_partno

Type: string

Module Part Number

fex_descr

Type: string

FEX description

fex_state

Module State

Unknown  value: 0

fex in state unknown
Init  value: 3

fex in state init
Discovered  value: 4

fex in state discovered
Connected  value: 5

fex in state connected
Registration  value: 6

fex in state registration
Registered  value: 7

fex in state registered
Ready  value: 8

fex in state ready
Online_sequence  value: 9

fex in state online sequence
Online  value: 10

fex in state online
Offline_request  value: 11

fex in state offline request
Offline_sequence  value: 12

fex in state offline sequence
Offline  value: 13

fex in state offline
Image_Download  value: 14

fex in state image download
Failed  value: 15

fex in state failed
Removed  value: 16

fex in state removed
Hl_Upgrade_seq  value: 17

fex in state hitless upgrade seq
Chk_Upg_Rdy_seq  value: 18

fex in state check upgrade ready seq
Save_States  value: 19

fex in state save states
Hl_Upg_Idle  value: 20

fex in state hitless upgrade idle
Chk_Insert_seq  value: 21

fex in state check insert seq
Hl_Upg_fail  value: 22

fex in state hitless upgrade fail
AA_Upg_Ready  value: 23

fex in state aa upgrade ready
AA_Upg_Idle  value: 24

fex in state aa upgrade idle
AA_Upg_Over  value: 25

fex in state aa upgrade over
AA_Upg_Fail  value: 26

fex in state aa upgrade fail
AA_Version_Mismatch  value: 27

fex in state aa version mismatch
Fex_Type_Mismatch  value: 28

fex is state Fex Type Mismatch

Command Modes

- /exec

show fex detail

show fex detail [ __readonly__ TABLE_fex_info chas_id descr fex_state fex_ver sw_ver fex_interim_ver sw_interim_ver model serial part_no card_id mac num_macs bay rack enclosure enclosure_ser rack_id fex_sw_gen sw_sw_gen pin_mode max_link post_level fbr_port_control TABLE_fbr_state fbr_index fbr_oper_state fsm_state TABLE_fex_port fex_port fex_port_oper_state fbr_port primary_fabric TABLE_logs log ]

Syntax Description

show

Show running system information

fex

Show FEX information

detail

Detailed information

__readonly__

TABLE_fex_info

FEX information

chas_id

Type: uinteger

Configured FEX number

descr

Type: string

Description

fex_state

Type: string

FEX State

fex_ver

Type: string

FEX version

sw_ver

Type: string

Switch version

fex_interim_ver

Type: string

FEX interim version

sw_interim_ver

Type: string

Switch interim version

model

Type: string

FEX model

serial

Type: string

FEX serial

part_no

Type: string

Part number

card_id

Type: uinteger

Card id

mac

Type: string

Mac address

num_macs

Type: uinteger

Number of macs

bay

Type: uinteger

Bay Number

rack

Type: string

Rack Name

enclosure

Type: string

Enclosure Name

enclosure_ser

Type: string

Enclosure serial

rack_id

Type: string

Rack id

fex_sw_gen

Type: uinteger

Fex software gen

sw_sw_gen

Type: uinteger

Switch software gen

pin_mode

Type: string

Pinning mode

max_link

Type: uinteger

Maximum links

post_level

Type: string

Post level

fbr_port_control

Type: string

Fabric port for control traffic

TABLE_fbr_state

Fabric port state

fbr_index

Type: string

Fabric port interface

fbr_oper_state

Type: string

Fabric port operational state

fsm_state

Type: string

Fabric FSM state

TABLE_fex_port

FEX port

fex_port

Type: string

FEX port

fex_port_oper_state

Type: string

Operational state

fbr_port

Type: string

Fabric port

primary_fabric

Type: string

Primary fabric port

TABLE_logs

FEX logs

log

Type: string

FEX log

Command Modes

- /exec

show fex transceiver

show fex chas_no transceiver [ calibration | detail ]

Syntax Description

show

Show running system information

fex

Show FEX information

chas_no

Type: uinteger

min: 101  max: 199

FEX number

transceiver

Show FEX

calibration

Show FEX transceiver calibration information

detail

show FEX transceiver detail information

Command Modes

- /exec

show fex version

show fex i version

Syntax Description

show

Show running system information

version

Show the software version

fex

Show fex software version

i

Type: uinteger

min: 101  max: 199

FEX number

Command Modes

- /exec

show file

show file uri0 [ cksum | md5sum ] [ __readonly__ [file_content] + [file_content_cksum] [file_content_md5sum] ]

Syntax Description

show

Show running system information

file

Displays content of files

uri0

Type: uri

Filename to be displayed

cksum

Displays CRC checksum for a file

md5sum

Displays MD5 checksum for a file

__readonly__

Read only

file_content

Type: string

uri file content buffer string

file_content_cksum

Type: string

uri file content checksum

file_content_md5sum

Type: string

uri file content md5sum

Command Modes

- /exec

show fips status

show fips status [ __readonly__ operation_status o_status ]

Syntax Description

show

Show running system information

fips

Show if FIPS mode is enabled or disabled Not available in this release.

status

Whether FIPS mode is enabled or disabled

__readonly__

operation_status

run-time information about fips

o_status

operational status of fips

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show forwarding

show forwarding [ vrf { vrf-name | vrf-known-name | all } | table table_id ] [ ip | ipv4 ] { route | rnhdb } [recursive] [ summary | detail | platform | prefix [longer-prefixes] [ detail | platform ] | address [ detail | platform ] | interface interface [ detail | platform ] | next-hop nh [ detail | platform ] | attached | unresolved | adjacency { aif anh | drop | glean | punt } ] [ max-display-count display_count ] [ module module | vrf { vrf-name | vrf-known-name | all } ] + [ __readonly__ TABLE_vrf vrf_name_out table_name prefix_count TABLE_prefix ip_prefix TABLE_path [ ip_nexthop | special ] ifname route_count path_count mask_length routes_per_mask packet_cnt byte_cnt dmac src_rloc dst_rloc lisp_header ]

Syntax Description

show

forwarding

display fib information

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

table

display info per vpn-id

table_id

Type: hex

table id in hex

ip

ipv4

ipv4

ipv4

route

display IP routing table

rnhdb

rnh-db

recursive

display routes with recursive next hops

summary

display route counts

prefix

Type: ipprefix

display single exact match route

longer-prefixes

display longer prefixes

address

Type: ipaddr

display single longest match route

interface

display routes with this output i/f only

interface

Type: interface

output interface

next-hop

display routes with this next-hop only

nh

Type: ipaddr

next hop address

attached

display directly connected routes

unresolved

display unresolved routes

adjacency

display routes via specified adjacency

aif

Type: interface

adjacency output interface

anh

Type: ipaddr

adjacency next-hop address

drop

display routes via drop adjacency

glean

display routes via glean adjacency

punt

display routes via punt adjacency

detail

show detailed information about the routes

platform

one command to show pi and pd info together

module

slot Available only in the 9500 series.

module

Type: integer

slot number

max-display-count

displays max # of routes

display_count

Type: integer

count

__readonly__

TABLE_vrf

vrf table

vrf_name_out

Type: string

VRF name

table_name

Type: string

table name

prefix_count

Type: integer

total number of prefix in VRF

TABLE_prefix

all xml prefix entries

ip_prefix

Type: ipprefix

ipv4 prefix

TABLE_path

path table

ip_nexthop

Type: ipaddr

next hop address

special

special adjacencies

Attached  value: 1

Receive  value: 2

Drop  value: 3

ifname

Type: interface

output interface

route_count

Type: integer

total number of routes in VRF

path_count

Type: integer

total number of paths in VRF

mask_length

Type: integer

length of mask

routes_per_mask

Type: integer

packet_cnt

Type: integer

Packet count

byte_cnt

Type: integer

Byte count

dmac

Type: ethernet

Destination MAC address

src_rloc

Type: ipaddr

LISP Source RLOC

dst_rloc

Type: ipaddr

LISP Dest RLOC

lisp_header

Type: string

LISP header string

Command Modes

- /exec

show forwarding adjacency

show forwarding [ vrf { vrf-name | vrf-known-name | all } ] [ ip | ipv4 ] adjacency [mpls] [lisp] [aif] [anh] [ detail | stats | platform ] [ module module ] [ __readonly__ adj-count nexthop rewinfo interface bgp_rnh bgp_orig_as bgp_peer_as pkts bytes exp src_addr dest_addr lisp_flags lisp_inst_id pltfm_key refcount ]

Syntax Description

show

forwarding

display fib information

ip

ipv4

ipv4

ipv4

adjacency

display adjacency information

platform

one command to show pi and pd info together

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

mpls

mpls adjacency information

lisp

LISP adjacency information

aif

Type: interface

adjacency output interface

anh

Type: ipaddr

adjacency next hop

detail

detail

stats

adjacency statistics

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

adj-count

Type: integer

total adj count

nexthop

Type: ipaddr

next hop address

rewinfo

Type: string

rewrite information

interface

Type: interface

output interface

bgp_rnh

Type: string

next hop address

bgp_orig_as

Type: integer

bgp orig as

bgp_peer_as

Type: integer

bgp peer as

exp

Type: integer

exp mapping

pkts

Type: longlong

packet stats

bytes

Type: longlong

bytes stats

src_addr

Type: ipaddr

src address

dest_addr

Type: ipaddr

dest address

lisp_flags

Type: integer

lisp flags

lisp_inst_id

Type: integer

lisp instance id

pltfm_key

Type: integer

platform key

refcount

Type: integer

reference count

Command Modes

- /exec

show forwarding bypass-hardware

show forwarding bypass-hardware [ module module ]

Syntax Description

show

forwarding

fib information

bypass-hardware

bypass hardware

module

slot

module

Type: integer

slot number

Command Modes

- /exec

show forwarding capture

show forwarding capture [ module module ] [ __readonly__ type len data ]

Syntax Description

show

forwarding

display fib information

capture

display capture buffer

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

type

Type: integer

type

len

Type: integer

length

data

Type: string

raw data

Command Modes

- /exec

show forwarding distribution

show forwarding distribution { pauz | rezum }

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution information

pauz

start black-holing routes

rezum

stop black-holing routes

Command Modes

- /exec

show forwarding distribution capture

show forwarding distribution capture [ __readonly__ type len data ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution info

capture

unicast capture buffer

__readonly__

type

Type: integer

type

len

Type: integer

length

data

Type: string

raw data

Command Modes

- /exec

show forwarding distribution clients

show forwarding distribution clients [ __readonly__ id pid name shms shme shmn ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution info

clients

unicast client information

__readonly__

id

Type: integer

client identifier

pid

Type: integer

client pid

name

Type: string

client name

shms

Type: hex

shmem start

shme

Type: hex

shmem end

shmn

Type: string

shmem name

Command Modes

- /exec

show forwarding distribution fib-state

show forwarding distribution fib-state [ __readonly__ slot state ttc tprc tv4ac tv6ac TABLE_fib_state tid tafi prc pc tname ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution info

fib-state

unicast fib state info

__readonly__

slot

Type: integer

slot number

state

Type: string

fib state

ttc

Type: integer

total table count

tprc

Type: integer

total prefix count

tv4ac

Type: integer

total v4 adj count

tv6ac

Type: integer

total v6 adj count

TABLE_fib_state

fib-state table

tid

Type: hex

table identifier

tafi

Type: string

table afi

prc

Type: integer

table prefix count

pc

Type: integer

table path count

tname

Type: string

table name

Command Modes

- /exec

show forwarding distribution ip igmp snooping

show forwarding distribution ip igmp snooping [ vlan vlan-id [ group [ grpaddr | mac-grpaddr ] [ source srcaddr ] ] ] [detail] [ __readonly__ refcount oiflist_id last_oiflist_id ftag-id ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

ip

IPV4 information

igmp

MFDM IGMP information

snooping

L2 mcast snooping related information

vlan

Info specific to a vlan

vlan-id

Type: vlan

Vlan id value

group

Group specific information

grpaddr

Type: ipaddr

Group address

mac-grpaddr

Type: ethernet

Group MAC address

source

(G,S) specific information

srcaddr

Type: ipaddr

Source address

detail

Detailed display

__readonly__

refcount

Type: integer

Reference Count

oiflist_id

Type: integer

OIF list Identifier

last_oiflist_id

Type: integer

Last OIF list Identifier

ftag-id

Type: integer

ftag Id

Command Modes

- /exec

show forwarding distribution ipv6 multicast route

show forwarding distribution ipv6 multicast route [ table table_id | vrf vrf-name ] [ group [source] | summary ] [ __readonly__ table_type num_routes num_starg_routes num_sg_routes num_gprefix_routes num_groups num_sources src_len grp_len df_ordinal rpfif address flag route_pkts route_bytes mti_src_if mti_grp_ip mti_src_ip ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

display fib distribution information

ipv6

IPV6 related information

multicast

display IPv6 multicast information

route

display routing table

vrf

display routes for a specific VRF

vrf-name

Type: string

VRF name

table

table

table_id

Type: hex

table number

group

Type: ipv6prefix

Multicast IPv6 Group Address

source

Type: ipv6prefix

Multicast IPv6 Source Address

summary

display route counts

__readonly__

table_type

Type: string

Table Type

num_routes

Type: integer

Number of routes

num_starg_routes

Type: integer

Number of (*,G) routes

num_sg_routes

Type: integer

Number of (S,G) routes

num_gprefix_routes

Type: integer

Number of (*,G-prefix) routes

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

address

Type: string

Ipv6 address string

src_len

Type: integer

Source Address Mask

grp_len

Type: integer

Group address Mask

df_ordinal

Type: string

DF ordinal

rpfif

Type: string

RPF interface

flag

Type: string

Route type flag

route_pkts

Type: longlong

Route packet count

route_bytes

Type: longlong

Route bytes

mti_src_if

Type: hex

MTI Source Ifindex

mti_grp_ip

Type: ipaddr

MTI Group IP Address

mti_src_ip

Type: ipaddr

MTI Source IP Address

Command Modes

- /exec

show forwarding distribution l2 multicast

show forwarding distribution l2 multicast [ ip-based | mac-based ] [ vlan vlan-id [ group grpaddr [ source srcaddr ] | destination-mac dmac ] ] [summary] [ __readonly__ refcount oiflist_id last_oiflist_id ftag-id src_str grp_str vlan num_routes num_starg_routes num_sg_routes num_gprefix_routes ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

l2

L2 information

multicast

L2 multicast information

ip-based

IPv4 based

mac-based

MAC based

vlan

Info specific to a vlan

vlan-id

Type: vlan

Vlan id value

group

Group specific information

grpaddr

Type: ipaddr

Group address

source

(G,S) specific information

srcaddr

Type: ipaddr

Source address

destination-mac

Destination MAC specific information

dmac

Type: ethernet

Destination MAC address

summary

display route counts

__readonly__

refcount

Type: integer

Reference Count

oiflist_id

Type: integer

OIF list Identifier

last_oiflist_id

Type: integer

Last OIF list Identifier

ftag-id

Type: integer

ftag Id

src_str

Type: string

Source

grp_str

Type: string

Group

vlan

Type: integer

vlan_id

num_routes

Type: integer

Number of routes

num_starg_routes

Type: integer

Number of (*,G) routes

num_sg_routes

Type: integer

Number of (S,G) routes

num_gprefix_routes

Type: integer

Number of (*,G-prefix) routes

Command Modes

- /exec

show forwarding distribution lisp counters

show forwarding distribution lisp counters [ __readonly__ count ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution information

lisp

for lisp application

counters

counters

__readonly__

count

Type: integer

count

Command Modes

- /exec

show forwarding distribution lisp vrf enabled

show forwarding distribution lisp vrf enabled [ __readonly__ TABLE_lisp_vrf_enabled vrf lisp_enabled req_id operation ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution information

lisp

for lisp application

vrf

vrf

enabled

enabled

__readonly__

TABLE_lisp_vrf_enabled

vrf

Type: integer

vrf key

lisp_enabled

Type: string

lisp enabled status

req_id

Type: integer

req id

operation

Type: string

operation

Command Modes

- /exec

show forwarding distribution logging

show forwarding distribution logging [ enable | disable ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution information

logging

enable/disable file logging

enable

start file logging

disable

stop file logging

Command Modes

- /exec

show forwarding distribution multicast (mfdm)

show forwarding distribution multicast [messages] [ __readonly__ fibstate slot accepting_routes num_accepting_routes ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

multicast

Multicast FIB distribution information

messages

Outstanding Message Information

__readonly__

fibstate

Type: string

IP Multicast FIB process state

slot

Type: integer

Slot

accepting_routes

Type: string

Indicates whether FIB is accepting routes

num_accepting_routes

Type: integer

Number of fibs accepting routes

Command Modes

- /exec

show forwarding distribution multicast (mfdm)

show forwarding distribution multicast { mfib-txlist [ vrf vrf-name ] | mfib-buffers }

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

multicast

Multicast information

mfib-txlist

Show MFIB transmission-list information

vrf

Specify VRF

vrf-name

Type: string

Specify VRF name

mfib-buffers

Show MFIB route buffer information

Command Modes

- /exec

show forwarding distribution multicast client-ack-db

show forwarding distribution multicast client-ack-db [ __readonly__ xid num_recepients num_responses ]

Syntax Description

show

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

multicast

Multicast

client-ack-db

Displays the client ack db

__readonly__

xid

Type: integer

XID

num_recepients

Type: integer

Number of recepients

num_responses

Type: integer

Number of responses

Command Modes

- /exec

show forwarding distribution multicast client

show forwarding distribution multicast client [ __readonly__ num-clients client-name client-id shmem-name ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

multicast

Multicast information

client

Show multicast distribution client information

__readonly__

num-clients

Type: integer

Number of Clients registered

client-name

Type: string

Client Name

client-id

Type: integer

Client-id

shmem-name

Type: string

Shared Memory Segment Name

Command Modes

- /exec

show forwarding distribution multicast outgoing-interface-list

show forwarding distribution multicast outgoing-interface-list { L2 | L3 | OTV } [index] [ __readonly__ platform_index ref_count num_oif oif ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

multicast

Multicast FIB distribution information

outgoing-interface-list

Outgoing interface list

L2

Layer 2 oiflist

L3

Layer 3 oiflist

OTV

OTV oiflist

index

Type: integer

min: 1  max: 65535

Outgoing Interface List index

__readonly__

platform_index

Type: hex

Platform index

ref_count

Type: integer

Reference count

num_oif

Type: integer

Number of outgoing interfaces

oif

Type: string

OIF name

next_hop

Type: string

Next hops

vlan_id

Type: integer

Vlan ID

Command Modes

- /exec

show forwarding distribution multicast resp-ack-timer-msgs

show forwarding distribution multicast resp-ack-timer-msgs

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

multicast

Multicast information

resp-ack-timer-msgs

show response ack timers for MFDM

Command Modes

- /exec

show forwarding distribution multicast route

show forwarding distribution [ip] multicast route [ table id | vrf { vrf_name | all } ] [ [ group { gaddr [mask] | gprefix } ] [ source { saddr [smask] | sprefix } ] | summary ] [ __readonly__ table_name num_routes num_starg_routes num_sg_routes num_gprefix_routes src_len grp_len df_ordinal rpfif rpf_ifname flag flag_value num_groups num_sources refcount oiflist_id oif_count oif_name oif_ifindex bytecnt pktcnt mti_src_if mti_grp_ip mti_src_ip ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

ip

IPV4 information

multicast

Multicast information

vrf

Specify VRF

vrf_name

Type: string

Specify VRF name

all

Display information for all VRFs

table

Specify Multicast Routing Table

id

Type: integer

Multicast Routing Table Identifier

group

IPv4 Multicast Group specific

gaddr

Type: ipaddr

IPv4 Multicast Group Address

mask

Type: ipaddr

mask for group ip address

gprefix

Type: ipprefix

IPv4 Multicast Group Prefix

source

IPv4 Multicast Source specific

saddr

Type: ipaddr

IPv4 Source Address

smask

Type: ipaddr

mask for group ip address

sprefix

Type: ipprefix

IPv4 Multicast Source Prefix

summary

display route counts

__readonly__

table_name

Type: string

Table name

num_routes

Type: integer

Number of routes

num_starg_routes

Type: integer

Number of (*,G) routes

num_sg_routes

Type: integer

Number of (S,G) routes

num_gprefix_routes

Type: integer

Number of (*,G-prefix) routes

src_len

Type: integer

Source Address Mask

grp_len

Type: integer

Group address Mask

df_ordinal

Type: integer

DF ordinal

rpfif

Type: string

RPF interface

rpf_ifname

Type: string

RPF Interface ifName

flag

Type: string

Route type flag

flag_value

Type: hex

hex value of route flag

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

refcount

Type: integer

Reference Count

oiflist_id

Type: integer

OIF list Identifier

oif_count

Type: integer

Number of OIFs

oif_name

Type: string

OIF Name

oif_ifindex

Type: hex

OIF ifIndex

bytecnt

Type: longlong

Current Byte counter

pktcnt

Type: longlong

Current Packet counter

mti_src_if

Type: hex

MTI Source Ifindex

mti_grp_ip

Type: ipaddr

MTI Group IP Address

mti_src_ip

Type: ipaddr

MTI Source IP Address

Command Modes

- /exec

show forwarding distribution otv multicast route

show forwarding distribution otv multicast route [ vlan vlan-id ] [ __readonly__ refcount oiflist_id src_ip grp_ip address grp_length external_intf ds dg if_index ]

Syntax Description

show

forwarding

Display Forwarding Information

distribution

FIB distribution information

otv

OTV information

multicast

Multicast information

route

Multicast route information

vlan

Info specific to a vlan

vlan-id

Type: vlan

Vlan id value

__readonly__

refcount

Type: integer

Reference Count

oiflist_id

Type: integer

OIF list Identifier

src_ip

Type: ipaddr

Source IP

grp_ip

Type: ipaddr

Group IP

address

Type: string

IPv6 address string

grp_length

Type: integer

Group length

external_intf

Type: string

External interface

ds

Type: ipaddr

Delivery source IP

dg

Type: ipaddr

Delivery group IP

if_index

Type: string

Interface Index

Command Modes

- /exec

show forwarding distribution peer-id

show forwarding distribution peer-id [ vpls | otv ] [ __readonly__ str ]

Syntax Description

show

Show running system information

forwarding

forwarding information

distribution

fib distribution info

peer-id

HW Peer-id allocation info

vpls

VPLS

otv

OTV

__readonly__

str

Type: string

Command Modes

- /exec

show forwarding distribution trace

show forwarding distribution trace

Syntax Description

show

forwarding

Display Forwarding Information

distribution

fib distribution info

trace

unicast trace information

Command Modes

- /exec

show forwarding ecmp

show forwarding ecmp [ [ vrf { vrf-name | vrf-known-name } ] lisp ] [platform] [ module module ] [ __readonly__ header ecmp_hash intf nh v6nh hw_index num_mpls holder refcount num_paths sw_ptr ]

Syntax Description

show

forwarding

Display fib information

ecmp

Show information about ECMPs

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

lisp

Show information about LISP ECMPs

platform

one command to show pi and pd info together

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

header

Type: string

o/p header

ecmp_hash

Type: hex

ecmp hash

intf

Type: interface

interface

nh

Type: ipaddr

next hop

v6nh

Type: string

V6 next hop

hw_index

Type: hex

Hw index

num_mpls

Type: integer

No of MPLS ecmp

holder

Type: hex

holder bitmap

refcount

Type: integer

refcount

sw_ptr

Type: hex

Software pointer

num_paths

Type: integer

No of paths

Command Modes

- /exec

show forwarding ecmp recursive

show forwarding ecmp recursive [platform] [ max-display-count display_count ] [ module module ] [ __readonly__ header num_pfxs rnh_table_id nh rnh_len v6nh hw_instance nh_vpn_label cnh_intf ]

Syntax Description

show

forwarding

Display fib information

ecmp

Show information about ECMPs

recursive

Show information about recursive ECMPs

platform

one command to show pi and pd info together

module

slot Available only in the 9500 series.

module

Type: integer

slot number

max-display-count

displays max # of routes

display_count

Type: integer

count

__readonly__

header

Type: string

o/p header

num_pfxs

Type: integer

Number of prefixes using this virtual object

rnh_table_id

Type: hex

The table id where the RNHs are present

nh

Type: ipaddr

Next hop info

rnh_len

Type: integer

Next hop mask length

v6nh

Type: string

V6 Next hop info

hw_instance

Type: integer

Hardware instance info

nh_vpn_label

Type: integer

NH VPN label

cnh_intf

Type: interface

cnh output interface

Command Modes

- /exec

show forwarding file-log disable

show forwarding file-log disable

Syntax Description

show

show

forwarding

forwarding

file-log

logging to tmp file

disable

disable

Command Modes

- /exec

show forwarding file-log enable

show forwarding file-log enable

Syntax Description

show

show

forwarding

forwarding

file-log

logging to tmp file

enable

enable

Command Modes

- /exec

show forwarding interfaces

show forwarding interfaces [ module module ] [ __readonly__ intf v4adjcnt v6adjcnt rpfmode mac ]

Syntax Description

show

forwarding

fib information

interfaces

show fib interface info

__readonly__

intf

Type: interface

interface name

module

slot Available only in the 9500 series.

module

Type: integer

slot number

v4adjcnt

Type: integer

count of v4 adjacencies

v6adjcnt

Type: integer

count of v6 adjacencies

mac

Type: string

mac address

rpfmode

uRPF mode

none  value: 1

loose(def)  value: 2

loose  value: 3

strict  value: 4

Command Modes

- /exec

show forwarding ipv6

show forwarding [ vrf { vrf-name | vrf-known-name | all } | table table_id ] ipv6 { route | rnhdb } [recursive] [ detail | summary | platform | prefix [longer-prefixes] [ detail | platform ] | address [ detail | platform ] | interface interface | next-hop nh | attached | unresolved | adjacency { aif anh | drop | glean | punt } ] [ max-display-count display_count ] [ module module | vrf { vrf-name | vrf-known-name | all } ] + [ __readonly__ header vrfname tblname prefix-count pfx { nexthop | special } intf route-count path-count mask-length routes-per-mask ]

Syntax Description

show

forwarding

display fib information

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

table

display info per vpn-id

table_id

Type: hex

table id in hex

ipv6

ipv6

route

display IP routing table

platform

one command to show pi and pd info together

rnhdb

rnhdb

recursive

display routes with recursive next hops

detail

show detailed information about the routes

summary

display route counts

prefix

Type: ipv6prefix

display single exact match route

longer-prefixes

display longer prefixes

address

Type: ipv6addr

display single longest match route

interface

display routes with this output i/f only

interface

Type: interface

output interface

next-hop

display routes with this next-hop only

nh

Type: ipv6addr

next hop address

attached

display directly connected routes

unresolved

display unresolved routes

adjacency

display routes via specified adjacency

aif

Type: interface

adjacency output interface

anh

Type: ipv6addr

adjacency next-hop address

drop

display routes via drop adjacency

glean

display routes via glean adjacency

punt

display routes via punt adjacency

module

slot Available only in the 9500 series.

module

Type: integer

slot number

max-display-count

displays max # of routes

display_count

Type: integer

count

__readonly__

header

Type: string

header string

vrfname

Type: string

VRF name

tblname

Type: string

table name

prefix-count

Type: integer

total number of prefix in VRF

pfx

Type: ipv6prefix

ipv6 prefix

nexthop

Type: ipv6addr

next hop address

special

special adjacencies

Attached  value: 1

Receive  value: 2

Drop  value: 3

intf

Type: interface

output interface

route-count

Type: integer

total number of routes in VRF

path-count

Type: integer

total number of paths in VRF

mask-length

Type: integer

length of mask

routes-per-mask

Type: integer

Command Modes

- /exec

show forwarding ipv6 adjacency

show forwarding [ vrf { vrf-name | vrf-known-name | all } ] ipv6 adjacency [mpls] [aif] [anh] [ detail | stats | platform ] [ module module ] [ __readonly__ adj-count nexthop rewinfo interface bgp_rnh bgp_orig_as bgp_peer_as ]

Syntax Description

show

forwarding

display fib information

ipv6

ipv6

adjacency

display adjacency information

platform

one command to show pi and pd info together

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

mpls

mpls adjacency information

aif

Type: interface

adjacency output interface

anh

Type: ipv6addr

adjacency next hop

detail

detail

stats

adjacency statistics

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

adj-count

Type: integer

total adj count

nexthop

Type: ipv6addr

next hop address

rewinfo

Type: string

rewrite information

interface

Type: interface

output interface

bgp_rnh

Type: string

next hop address

bgp_orig_as

Type: integer

bgp orig as

bgp_peer_as

Type: integer

bgp peer as

Command Modes

- /exec

show forwarding ipv6 multicast route

show forwarding [ vrf { vrf-name | vrf-known-name | all } | table tab_id ] ipv6 multicast route { [ group { group | group_addr } | source { source | source_addr } | module module | vrf { vrf-name | all } ] | + | summary [ module module | vrf { vrf-name | vrf-known-name | all } ] + } [ __readonly__ table_type num_routes num_starg_routes num_sg_routes num_gprefix_routes num_prefix_insert_fail num_groups num_sources src_len grp_len df_ordinal rpfif address flag route_pkts route_bytes ]

Syntax Description

show

forwarding

display fib information

ipv6

ipv6

multicast

IPV6 related Multicast information

route

Multicast route information

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

table

display info per vpn-id

tab_id

Type: hex

table number

group

Multicast IPv6 Group Address

group

Type: ipv6prefix

Multicast IPv6 Group Address with prefix

group_addr

Type: ipv6addr

Multicast IPv6 Group Address

source

Multicast IPv6 Source Address

source

Type: ipv6prefix

Multicast IPv6 Source Address with prefix

source_addr

Type: ipv6addr

Multicast IPv6 Source Address

summary

display route counts

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

table_type

Type: string

Table Type

num_routes

Type: integer

Number of routes

num_starg_routes

Type: integer

Number of (*,G) routes

num_sg_routes

Type: integer

Number of (S,G) routes

num_gprefix_routes

Type: integer

Number of (*,G-prefix) routes

num_prefix_insert_fail

Type: integer

Prefix insert fail count

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

address

Type: string

Ipv6 address string

src_len

Type: integer

Source Address Mask

grp_len

Type: integer

Group address Mask

df_ordinal

Type: string

DF ordinal

rpfif

Type: string

RPF interface

flag

Type: string

Route type flag

route_pkts

Type: longlong

Route packet count

route_bytes

Type: longlong

Route bytes

Command Modes

- /exec

show forwarding ipv6 pss route

show forwarding [ vrf { vrf-name | vrf-known-name } | table table_id ] ipv6 pss route [ module module ]

Syntax Description

show

show

forwarding

forwarding

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

table

display info per vpn-id

table_id

Type: integer

table number

ipv6

ipv6

pss

display info from pss

route

route

module

slot Available only in the 9500 series.

module

Type: integer

slot number

Command Modes

- /exec

show forwarding l2 multicast

show forwarding l2 multicast [ vlan vlan-id [ group grpaddr source srcaddr | destination-mac dstmac ] ] [ vdc vdc-id ] [ module num ] [ __readonly__ epoch resource_id dest_index hw_handle dmac text value ]

Syntax Description

show

Show running system information

forwarding

Forwarding information

l2

L2 related information

multicast

Multicast related information

vlan

Information Specific to a Vlan

vlan-id

Type: vlan

Vlan id value

group

(S,G) specific information

grpaddr

Type: ipaddr

Group address

source

source specific information

srcaddr

Type: ipaddr

Source address

destination-mac

Destination MAC address

dstmac

Type: ethernet

Ethernet MAC address

vdc

VDC

vdc-id

Type: integer

min: 1  max: 16

VDC id

module

Slot

num

Type: integer

Slot number

__readonly__

resource_id

Type: integer

Resource Identifier

dest_index

Type: hex

Destination Index Identifier

epoch

Type: integer

Epoch number

hw_handle

Type: hex

Hardware Handle

dmac

Type: ethernet

Destination MAC address

text

Type: string

String

value

Type: integer

Value

Command Modes

- /exec

show forwarding l2vpn ipv6 multicast route

show forwarding l2vpn ipv6 multicast route [ [ vlan vlan-id ] | [ softwarebd software-bd ] ] [ module module ]

Syntax Description

show

show

forwarding

forwarding

l2vpn

Layer 2 VPN Not available in this release.

ipv6

ipv6

multicast

Multicast IPv6 information

route

Mcast route information

vlan

vlan

softwarebd

Software Bridge Domain

vlan-id

Type: integer

min: 1  max: 4095

vlan id

software-bd

Type: integer

min: 1  max: 16383

Software bd

module

slot

module

Type: integer

slot number

Command Modes

- /exec

show forwarding l2vpn label vpls

show forwarding l2vpn label [label_id] vpls [ module module ] [ __readonly__ label_id ]

Syntax Description

show

show

forwarding

forwarding

l2vpn

l2vpn forwarding Not available in this release.

label

VC label

label_id

Type: integer

min: 0  max: 1048475

VC label

vpls

VPLS

module

slot

__readonly__

label_id

Type: integer

Label ID

Command Modes

- /exec

show forwarding l2vpn label xconnect

show forwarding l2vpn label [label_id] xconnect [ module module ] [ __readonly__ label_id ]

Syntax Description

show

show

forwarding

forwarding

l2vpn

l2vpn forwarding Not available in this release.

label

VC label

label_id

Type: integer

min: 0  max: 1048475

VC label

xconnect

xconnect or VPWS

module

slot

__readonly__

label_id

Type: integer

Label ID

Command Modes

- /exec

show forwarding l2vpn multicast outgoing-interface-list

show forwarding l2vpn multicast outgoing-interface-list [ index oiflist-index ]

Syntax Description

show

forwarding

Forwarding information

l2vpn

Layer 2 VPN Not available in this release.

multicast

Multicast IPv4 information

outgoing-interface-list

show outgoing interface list info

index

oiflist index

oiflist-index

Type: integer

min: 1  max: 65534

oiflist-index

Command Modes

- /exec

show forwarding l2vpn multicast route

show forwarding l2vpn multicast route [ [ vlan vlan-id ] | [ softwarebd software-bd ] ] [ module module ]

Syntax Description

show

show

forwarding

forwarding

l2vpn

Layer 2 VPN Not available in this release.

multicast

Multicast IPv4 information

route

Mcast route information

vlan

vlan

softwarebd

Software Bridge Domain

vlan-id

Type: integer

min: 1  max: 4095

vlan id

software-bd

Type: integer

min: 1  max: 16383

Software bd

module

slot

module

Type: integer

slot number

Command Modes

- /exec

show forwarding l2vpn service vpls

show forwarding l2vpn service vpls { service_id { service_id | all } | vlan { vlan_id | vlan_all } | peer { interface intf-name | next-hop addr | peer_all } } [ module module ] [detail]

Syntax Description

show

show

forwarding

display fib information

l2vpn

l2vpn forwarding Not available in this release.

service

Services

vpls

Vpls

service_id

Specifies a service_id

service_id

Type: integer

service ID

all

all VPLS services

vlan

VLAN info

vlan_id

Type: integer

VLAN number

vlan_all

all VPLS services

peer

define the peer

peer_all

all peers

interface

PW interface for peer

intf-name

Type: interface

interface name

next-hop

Next hop to reach the peer

addr

Type: ipaddr

IP address

module

slot

module

Type: integer

slot number

detail

Display detailed information

Command Modes

- /exec

show forwarding l2vpn service xconnect

show forwarding l2vpn service xconnect service_id { service_id | all } [ module module ] [detail]

Syntax Description

show

show

forwarding

display fib information

l2vpn

l2vpn forwarding Not available in this release.

service

Services

xconnect

xconnect or VPWS

service_id

Specify a service_id in hex

service_id

Type: hex

service ID

all

All service-id will be displayed

module

slot

module

Type: integer

slot number

detail

Display detailed information

Command Modes

- /exec

show forwarding l2vpn vlan

show forwarding l2vpn vlan [vlan_id] [ module module ] [ __readonly__ vlan ]

Syntax Description

show

show

forwarding

forwarding

l2vpn

l2vpn forwarding Not available in this release.

vlan

vlan

vlan_id

Type: integer

min: 0  max: 4095

vlan id

module

slot

module

Type: integer

slot number

__readonly__

vlan

Type: integer

vlan

Command Modes

- /exec

show forwarding mpls

show forwarding mpls [ vrf { vrf-name | vrf-known-name | all } [ label label | prefix | v6prefix ] | table table_id [ label label | prefix | v6prefix ] | label-space label-space-id | label label | prefix | v6prefix ] [ module module ] [implicit] [ __readonly__ out-table-id out-intf out-ip out-op ]

Syntax Description

show

show

forwarding

forwarding

mpls

mpls forwarding Not available in this release.

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known vrf name

all

all vrfs

table

display info per vpn-id

table_id

Type: hex

table number

label-space

label space

label-space-id

Type: integer

label space id

label

mpls labels

label

Type: integer

min: 0  max: 1048475

mpls label value

prefix

Type: ipprefix

Labels for single exact match route

v6prefix

Type: ipv6prefix

Labels for single exact match v6 route

module

slot

module

Type: integer

slot number

__readonly__

out-table-id

Type: hex

Output table-id

out-intf

Type: interface

Output Interface

out-ip

Type: ipaddr

Output Next Hop

out-op

Type: string

Output Label op

implicit

Display implicit label

Command Modes

- /exec

show forwarding mpls aggregate

show forwarding mpls aggregate [ label { label-id | all } ] [detail] [ module module ] [ __readonly__ [ TABLE_label_info label id [sw_index] ] ]

Syntax Description

show

forwarding

display fib information

mpls

mpls forwaring Not available in this release.

aggregate

aggregate label

label

label

label-id

Type: integer

label-id

all

all

detail

detail

module

slot

module

Type: integer

slot number

__readonly__

TABLE_label_info

label

Type: integer

id

Type: hex

sw_index

Type: hex

Command Modes

- /exec

show forwarding mpls cbts

show forwarding mpls cbts [ module module ] [ __readonly__ [ TABLE_cbts label [out-intf] [out-table-id] [out-ip] [out-op] ] ]

Syntax Description

show

show

forwarding

forwarding

mpls

mpls forwaring Not available in this release.

cbts

cbts labels

module

slot

module

Type: integer

slot number

__readonly__

TABLE_cbts

label

Type: integer

mpls label value

out-intf

Type: string

Output Interface

out-table-id

Type: hex

Output table-id

out-ip

Type: string

Output Next Hop

out-op

Type: string

Output Label op

Command Modes

- /exec

show forwarding mpls ecmp

show forwarding mpls ecmp [ module module ] [ __readonly__ [ TABLE_ecmp type num_paths ip_paths mpls_paths ecmp_hash holder refcount hw_index [ TABLE_ecmp_paths label_info ] ] ]

Syntax Description

show

show

forwarding

display fib information

mpls

mpls forwarding

ecmp

mpls ecmps

module

slot

module

Type: integer

slot number

__readonly__

TABLE_ecmp

type

Type: hex

ecmp type

num_paths

Type: integer

No of paths

ip_paths

Type: integer

No of ip paths

mpls_paths

Type: integer

No of mpls paths

ecmp_hash

Type: hex

ecmp hash

holder

Type: hex

holder bitmap

refcount

Type: integer

refcount

hw_index

Type: hex

Hw index

TABLE_ecmp_paths

label_info

Type: string

rew info

Command Modes

- /exec

show forwarding mpls summary

show forwarding mpls summary [ module module ] [ __readonly__ [ TABLE_labels space count total_deagg_labels ] ]

Syntax Description

show

show

forwarding

display fib information

mpls

mpls forwarding Not available in this release.

summary

summary

module

slot

module

Type: integer

slot number

__readonly__

TABLE_labels

space

Type: hex

label space

count

Type: integer

number of labels

total_deagg_labels

Type: integer

total deagg labels

Command Modes

- /exec

show forwarding mpls te

show forwarding mpls te [te_if] [detail] [ module module ] [ __readonly__ TABLE_te id [midpoint_source] [dest] [tunnel_id] [ext_tunnel_id] [lisp_id] [adjacency] [hh] [lfib_adj] [adj_refcount] [obj_refcount] [te_state] [next_hop] [next_if_index] [op_label] [backup_tunnel] [adj_key_id] [frr_label] [local_label] [adj_count] [type] [out_if] [out_lbl] [backup_if] [backup_lbl] ]

Syntax Description

show

forwarding

display fib information

mpls

mpls forwarding Not available in this release.

te

Traffic Engineering

detail

detail

module

slot

te_if

Type: interface

tunnel-te number

module

Type: integer

slot number

__readonly__

TABLE_te

id

Type: string

headend if index

midpoint_source

Type: string

dest

Type: string

tunnel_id

Type: hex

ext_tunnel_id

Type: hex

lisp_id

Type: hex

adjacency

Type: string

hh

Type: hex

HH

lfib_adj

Type: string

lfib adjavency is drop

adj_refcount

Type: integer

obj_refcount

Type: integer

te_state

Type: string

next_hop

Type: string

next_if_index

Type: string

op_label

Type: integer

backup_tunnel

Type: string

adj_key_id

Type: integer

frr_label

Type: integer

local_label

Type: string

adj_count

Type: integer

te related adj count

type

Type: string

out_if

Type: string

out_lbl

Type: integer

backup_if

Type: string

backup_lbl

Type: integer

Command Modes

- /exec

show forwarding multicast outgoing-interface-list

show forwarding multicast outgoing-interface-list { L2 | L3 } [platform] [ module module ] [index] [ __readonly__ refcount num_oif intf ]

Syntax Description

show

forwarding

Forwarding information

multicast

Multicast IPv4 information

outgoing-interface-list

show outgoing interface list info

L2

Layer 2 oiflist

L3

Layer 3 oiflist

platform

Display PI/PD

module

slot Available only in the 9500 series.

module

Type: integer

slot number

index

Type: integer

min: 1  max: 65535

Outgoing Interface List Index

__readonly__

refcount

Type: integer

Reference count

num_oif

Type: integer

Number of outgoing interfaces

intf

Type: string

OIF name

Command Modes

- /exec

show forwarding multicast route

show forwarding [ vrf { vrf-name | vrf-known-name | all } | table table_id ] [ ip | ipv4 ] multicast route [platform] { [ group { gaddr [mask] | gprefix } | source { saddr [smask] | sprefix } | module module | vrf { vrf-name | vrf-known-name | all } ] | + | summary [ module module | vrf { vrf-name | vrf-known-name | all } ] + } [ __readonly__ table_type num_routes num_starg_routes num_sg_routes num_gprefix_routes num_prefix_insert_fail num_groups num_sources src_len grp_len df_ordinal rpfif rpf_ifindex flag flag_value route_pkts route_bytes oiflist_id platform_id oif_count refcount oifname oifindex oif_pkts oif_bytes ]

Syntax Description

show

forwarding

Forwarding information

ip

ipv4

ipv4

ipv4

multicast

Multicast IPv4 information

route

Mcast route information

platform

Platform Details

table

display info per vpn-id

table_id

Type: integer

table number

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

group

Multicast IPv4 Group specific info

gaddr

Type: ipaddr

Multicast IPv4 Group Address

mask

Type: ipaddr

Multicast IPv4 Group Address mask

gprefix

Type: ipprefix

Multicast IPv4 Group Prefix

source

Multicast IPv4 Source specific info

saddr

Type: ipaddr

Multicast IPv4 Source Address

smask

Type: ipaddr

Multicast IPv4 Source Address mask

sprefix

Type: ipprefix

Multicast IPv4 Source Prefix

summary

display route counts

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

table_type

Type: string

Table Type

num_routes

Type: integer

Number of routes

num_starg_routes

Type: integer

Number of (*,G) routes

num_sg_routes

Type: integer

Number of (S,G) routes

num_gprefix_routes

Type: integer

Number of (*,G-prefix) routes

num_prefix_insert_fail

Type: integer

Prefix insert fail count

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

src_len

Type: integer

Source Address Mask

grp_len

Type: integer

Group address Mask

df_ordinal

Type: string

DF ordinal

rpfif

Type: string

RPF interface

rpf_ifindex

Type: hex

RPF Interface ifIndex

flag

Type: string

Route type flag

flag_value

Type: hex

hex value of route flag

route_pkts

Type: longlong

Route packet count

route_bytes

Type: longlong

Route bytes

oiflist_id

Type: integer

OIF list Identifier

platform_id

Type: integer

Platform-index

oif_count

Type: integer

Number of OIFs

refcount

Type: integer

OIF list Reference Count

oifname

Type: string

OIF Interface name

oifindex

Type: hex

OIF Interface ifIndex

oif_pkts

Type: longlong

OIF packets

oif_bytes

Type: longlong

OIF bytes

Command Modes

- /exec

show forwarding otv

show forwarding otv intf [ peer peer-id ] [ module module ] [ __readonly__ vlan peer-id peer_vlan_count tunnel_ifindex tunnel_ifname ]

Syntax Description

show

forwarding

fib information

otv

overlay-transport-virtualization Not available in this release.

intf

Type: interface

overlay interface

peer

overlay peer

peer-id

Type: integer

overlay peer-id

module

slot

module

Type: integer

slot number

__readonly__

vlan

Type: integer

Vlan information

peer-id

Type: integer

peer-id

peer_vlan_count

Type: integer

peer vlan count

tunnel_ifindex

Type: hex

tunnel ifindex

tunnel_ifname

Type: string

tunnel if name

Command Modes

- /exec

show forwarding otv ipv6 multicast route

show forwarding otv ipv6 multicast route [ vlan vlan_id ] [ module module ] [ __readonly__ [table_type] [vlan-id] [replicator] [num_routes] [num_starg_routes] [num_sg_routes] [num_gprefix_routes] [num_prefix_insert_fail] [num_groups] [num_sources] [ TABLE_otv_mroute [src_addr] [src_len] [grp_addr] [grp_len] [df_ordinal] [rpfif] [flag] [route_pkts] [route_bytes] [otv_route_pkts] [otv_route_bytes] [ TABLE_OIF oif_count [oiflist_id] [index] [refcount] [ TABLE_OIFLIST oifindex [oif_pkts] [oif_bytes] [src_addr] [src_len] [oifname] [vlanid] [grp_addr] [grp_len] [otv_src_addr] [otv_grp_addr] ] ] ] ]

Syntax Description

show

show

forwarding

forwarding

otv

over-the-top virtualization Not available in this release.

ipv6

ipv6

multicast

Multicast IPv6 information

route

Mcast route information

vlan

vlan

vlan_id

Type: integer

min: 1  max: 4095

vlan id

module

slot

module

Type: integer

slot number

__readonly__

table_type

Type: string

Table Type

vlan-id

Type: integer

vlan id

replicator

Type: string

replicator name

num_routes

Type: integer

Number of routes

num_starg_routes

Type: integer

Number of (*,G) routes

num_sg_routes

Type: integer

Number of (S,G) routes

num_gprefix_routes

Type: integer

Number of (*,G-prefix) routes

num_prefix_insert_fail

Type: integer

Prefix insert fail count

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

TABLE_otv_mroute

src_addr

Type: string

Ipv6 address string

src_len

Type: integer

Source Address Mask

grp_addr

Type: string

Ipv6 address string

grp_len

Type: integer

Group address Mask

df_ordinal

Type: string

DF ordinal

rpfif

Type: string

RPF interface

flag

Type: string

Route type flag

route_pkts

Type: longlong

Route packet count

route_bytes

Type: longlong

Route bytes

otv_route_pkts

Type: longlong

OTV Route packet count

otv_route_bytes

Type: longlong

OTV Route bytes

TABLE_OIF

oif_count

Type: integer

Number of OIFs

oiflist_id

Type: integer

OIF list Identifier

index

Type: integer

min: 1  max: 65535

outgoing interface list index

refcount

Type: integer

reference count

TABLE_OIFLIST

oifindex

Type: string

OIF Interface ifIndex

oif_pkts

Type: longlong

OIF packets

oif_bytes

Type: longlong

OIF bytes

src_addr

Type: ipaddr

Multicast IPv4 Source Address

src_len

Type: integer

Source Address Mask

oifname

Type: string

OIF Interface name

vlanid

Type: integer

vlan id of the route

grp_addr

Type: ipaddr

Multicast IPv4 Group Address

grp_len

Type: integer

Group address Mask

otv_src_addr

Type: ipaddr

Multicast IPv4 Source Address

otv_grp_addr

Type: ipaddr

Multicast IPv4 Group Address

Command Modes

- /exec

show forwarding otv multicast outgoing-interface-list

show forwarding otv multicast outgoing-interface-list [ __readonly__ TABLE_OIF index [refcount] [intf] [ TABLE_OIFLIST oifindex [src_addr] [src_len] [oifname] [vlanid] [grp_addr] [grp_len] ] ]

Syntax Description

show

forwarding

Forwarding information

otv

over-the-top virtualization Not available in this release.

multicast

Multicast IPv4 information

outgoing-interface-list

show outgoing interface list info

__readonly__

TABLE_OIF

outgoing interface list table

index

Type: integer

min: 1  max: 65535

outgoing interface list index

refcount

Type: integer

reference count

intf

Type: string

interface name

TABLE_OIFLIST

outgoing interface list table

oifindex

Type: string

OIF Interface ifIndex

src_addr

Type: ipaddr

Multicast IPv4 Source Address

src_len

Type: integer

Source Address Mask

oifname

Type: string

OIF Interface name

vlanid

Type: integer

vlan id of the route

grp_addr

Type: ipaddr

Multicast IPv4 Group Address

grp_len

Type: integer

Group address Mask

Command Modes

- /exec

show forwarding otv multicast route

show forwarding otv multicast route [ [ vlan vlan-id ] | [ softwarebd software-bd ] ] [ module module ] [ __readonly__ replicator ]

Syntax Description

show

show

forwarding

forwarding

otv

over-the-top virtualization Not available in this release.

multicast

Multicast IPv4 information

route

Mcast route information

vlan

vlan

vlan-id

Type: integer

min: 1  max: 4095

vlan id

softwarebd

Software Bridge Domain

software-bd

Type: integer

min: 1  max: 16383

Software bd

module

slot

module

Type: integer

slot number

__readonly__

replicator

Type: string

replicator name

Command Modes

- /exec

show forwarding otv vlan

show forwarding otv vlan [vlan_id] [ module module ] [ __readonly__ vlan ]

Syntax Description

show

show

forwarding

forwarding

otv

otv Not available in this release.

vlan

vlan

vlan_id

Type: integer

min: 0  max: 4095

vlan id

module

slot

module

Type: integer

slot number

__readonly__

vlan

Type: integer

vlan

Command Modes

- /exec

show forwarding pss route

show forwarding [ vrf { vrf-name | vrf-known-name } | table table_id ] [ ip | ipv4 ] pss route [ module module ]

Syntax Description

show

show

forwarding

forwarding

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

table

display info per vpn-id

table_id

Type: integer

table number

ip

ipv4

ipv4

ipv4

pss

display info from pss

route

route

module

slot Available only in the 9500 series.

module

Type: integer

slot number

Command Modes

- /exec

show forwarding restart

show forwarding restart [ module module ]

Syntax Description

show

forwarding

fib information

restart

restart fib

module

slot

module

Type: integer

slot number

Command Modes

- /exec

show forwarding security group-tag

show forwarding [ vrf { vrf-name | vrf-known-name | all } | table table_id | vlan vlan_id ] [ ip | ipv4 ] security group-tag [addr] [ module num | vrf { vrf-name | vrf-known-name | all } ] + [ __readonly__ header vrfname tid pfx-count ipa tag tv vid ]

Syntax Description

show

forwarding

display fib information

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

table

display info per vpn-id

table_id

Type: integer

table number

vlan

vlan

vlan_id

Type: integer

vlan number

ip

ipv4

ipv4

ipv4

security

display IP security information

group-tag

ip_address->security_group_tag

addr

Type: ipaddr

specific ip address

module

slot Available only in the 9500 series.

__readonly__

header

Type: string

header string

vrfname

Type: string

VRF name

tid

Type: integer

table identifier

num

Type: integer-range

module number

pfx-count

Type: integer

total prefix count in VRF

ipa

Type: ipaddr

ip address

tag

Type: integer

min: 0  max: 65535

security group tag

tv

Type: integer

min: 0  max: 1

sgt valid

vid

Type: integer

vlan indentifier

Command Modes

- /exec

show forwarding security mac

show forwarding [ vrf { vrf-name | vrf-known-name | all } | table table_id ] [ ip | ipv4 ] security mac [addr] [ module module | vrf { vrf-name | vrf-known-name | all } ] + [ __readonly__ header vrfname tid pfx-count ipa mac p m v intf ]

Syntax Description

show

forwarding

display fib information

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

table

display info per vpn-id

table_id

Type: integer

table number

ip

ipv4

ipv4

ipv4

security

display IP security information

mac

ip_address->mac_address

addr

Type: ipaddr

specific ip address

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

header

Type: string

header string

vrfname

Type: string

VRF name

tid

Type: integer

table identifier

pfx-count

Type: integer

total prefix count in VRF

ipa

Type: ipaddr

ip address

mac

Type: string

mac address

p

Type: integer

min: 0  max: 1

1 => ip->port binding

m

Type: integer

min: 0  max: 1

1 => ip->mac binding

v

Type: integer

min: 0  max: 1

1 => ip->vlan binding

intf

Type: interface

ip->port interface

Command Modes

- /exec

show forwarding trace

show forwarding trace [clear] [ module module ] [ __readonly__ op ]

Syntax Description

show

forwarding

display fib information

trace

display trace buffer Available only in the 9500 series.

clear

clear the trace buffer

module

slot

module

Type: integer

slot number

__readonly__

op

Type: string

output

Command Modes

- /exec

show forwarding trace profile

show forwarding trace profile

Syntax Description

show

forwarding

display fib information

trace

display trace buffer

profile

show the collection profiling information

Command Modes

- /exec

show forwarding trace profile funcstats

show forwarding trace profile funcstats [ enable | disable ] [ module module ] [ __readonly__ op ]

Syntax Description

show

forwarding

display fib information

trace

display trace buffer

profile

show the collection profiling information

funcstats

function statistics

enable

enable function statistics

disable

disable function statistics

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

op

Type: string

output

Command Modes

- /exec

Chapter 8. G Show Commands

- show glbp

- show glbp brief

- show glbp capability

show glbp

show glbp [ vrf vrf-name ] [ interface int-num ] [ group group-num ] [ active | standby | disabled | init | listen ] + [ __readonly__ show_glbp_start TABLE_grp_detail sg_if_index sg_group_num sg_cmd_start sg_state sg_state_reason sg_state_count sg_state_last_change sg_vip sg_vip_attr sg_num_vip_sec TABLE_grp_vip_sec sg_vip_sec sg_vip_sec_attr sg_active_addr sg_cur_hello sg_cfg_hello sg_active_hello sg_cur_hold sg_cfg_hold sg_active_hold sg_is_hello_timer_running sg_next_hello sg_cur_redirect_time sg_cfg_redirect_time sg_active_redirect_time sg_cur_sec_holdtime sg_cfg_sec_holdtime sg_active_sec_holdtime sg_cfg_ext_holdtime sg_auth_data_type sg_auth_data sg_preempt sg_preempt_min_delay sg_is_preempt_timer_running sg_preempt_ts sg_active_priority sg_active_timer sg_standby_addr sg_standby_priority sg_standby_timer sg_grp_priority sg_grp_priority_attr sg_weighting sg_weighting_attr sg_weighting_satisfied sg_weighting_max sg_weighting_lower sg_weighting_upper sg_track_object sg_track_state sg_track_decrement sg_load_bal sg_red_name sg_mem_count sg_mem_start TABLE_grp_members sg_mem_local_mac sg_mem_local_ip sg_mem_mac sg_mem_ip sg_is_mem_local sg_is_mem_authenticated sg_mem_end sg_all_mem_end sg_fwd_count sg_active_fwd_count sg_fwd_start TABLE_fwd_detail sg_fwd_num sg_fwd_state sg_fwd_state_change_count sg_fwd_last_state_change sg_fwd_mac sg_fwd_mac_type sg_fwd_cfg_mac sg_fwd_owner sg_fwd_redirect sg_fwd_redirect_timer sg_fwd_is_sec_tmr_run sg_fwd_sec_timer sg_fwd_ttl sg_fwd_ttr sg_fwd_pre sg_fwd_pre_min_delay sg_fwd_is_pre_min_run sg_fwd_pre_min_val sg_fwd_active_router sg_fwd_active_router_attr sg_fwd_weighting sg_fwd_active_addr sg_fwd_active_prio sg_fwd_active_prio_attr sg_fwd_active_prio_weight_attr sg_fwd_active_timer_val sg_fwd_arp_replies sg_fwd_redirection sg_fwd_preempt sg_fwd_end sg_all_fwd_end sg_nsf_state show_glbp_end ]

Syntax Description

show

Show running system information

glbp

Show GLBP

vrf

Display per-VRF information

vrf-name

Type: vrf

VRF name

interface

Interface

int-num

Type: interface

Interface type and number

group

Group number

group-num

Type: integer

min: 0  max: 1023

Group number

active

Groups in active state

standby

Groups in standby state

disabled

Groups in disabled state

init

Groups in init state

listen

Groups in listen state

__readonly__

Read only

show_glbp_start

Type: uinteger

show glbp start

TABLE_grp_detail

Group table detail

sg_if_index

Type: interface

Interface type and number

sg_group_num

Type: uinteger

Group number

sg_state

glbp state

Active  value: 0x20

Init  value: 0x02

Disabled  value: 0x01

Listen  value: 0x04

Speak  value: 0x08

Standby  value: 0x10

sg_state_reason

Type: string

Reason

sg_state_count

Type: uinteger

Number of state changes

sg_state_last_change

Type: duration

Time of last state change

sg_vip

Type: ipaddr

Virtual IP address

sg_vip_attr

Virtual IP address attribute

config  value: 0

learnt  value: 1

duplicate  value: 2

sg_num_vip_sec

Type: uinteger

Number of Secondary virtual IP address

TABLE_grp_vip_sec

Group secondary ip address

sg_vip_sec

Type: ipaddr

Secondary virtual IP address

sg_vip_sec_attr

Secondary Virtual IP address attribute

config  value: 0

duplicate  value: 2

sg_active_addr

Type: ipaddr

Active IP address

sg_cur_hello

Type: uinteger

Current Hello Time

sg_cfg_hello

Type: uinteger

Configured Hello Time

sg_active_hello

Type: uinteger

Active Hello Time

sg_cur_hold

Type: uinteger

Current Hold Time

sg_cfg_hold

Type: uinteger

Configured Hold Time

sg_active_hold

Type: uinteger

Active Hold Time

sg_is_hello_timer_running

Type: bool

Hello Timer

sg_next_hello

Type: uinteger

Time for next hello

sg_cur_redirect_time

Type: uinteger

Current redirect time

sg_cfg_redirect_time

Type: uinteger

Configured redirect time

sg_active_redirect_time

Type: uinteger

Active redirect time

sg_cur_sec_holdtime

Type: uinteger

Current secondary hold time

sg_cfg_sec_holdtime

Type: uinteger

Configured secondary hold time

sg_active_sec_holdtime

Type: uinteger

Active secondary hold time

sg_cfg_ext_holdtime

Type: uinteger

Configured Extended hold time

sg_auth_data_type

Authentication data type

text  value: 1

key-string  value: 2

key-chain  value: 3

sg_auth_data

Type: string

Authentication data

sg_preempt

Type: bool

Preemption enabled

sg_preempt_min_delay

Type: uinteger

Preemption min delay

sg_is_preempt_timer_running

Type: bool

Preemption timer running

sg_preempt_ts

Type: uinteger

Preemption timestamp

sg_active_priority

Type: uinteger

Active router priority

sg_active_timer

Type: uinteger

Active timer value

sg_standby_addr

Type: ipaddr

Standby address

sg_standby_priority

Type: uinteger

Standby priority

sg_standby_timer

Type: uinteger

Standby timer value

sg_grp_priority

Type: uinteger

Group priority

sg_grp_priority_attr

Type: _enum

Group priority attribute

sg_weighting

Type: uinteger

Weighting

sg_weighting_attr

Type: _enum

Weighting attribute

sg_weighting_satisfied

Type: bool

Weighting satisfied

sg_weighting_max

Type: uinteger

Weighting max

sg_weighting_lower

Type: uinteger

Weighting lower

sg_weighting_upper

Type: uinteger

Weighting upper

sg_track_object

Type: uinteger

Track

sg_track_state

Type: uinteger

Track state

sg_track_decrement

Type: uinteger

Track decrement

sg_load_bal

Load balancing

disabled  value: 1

round-robin  value: 2

weighted  value: 3

host-dependent  value: 4

unknown  value: 5

sg_red_name

Type: string

IP redundancy name

sg_mem_count

Type: uinteger

Membership count

sg_mem_start

Type: uinteger

Start of membership attributes

TABLE_grp_members

Group members

sg_mem_local_mac

Type: ethernet

Member's local mac address

sg_mem_local_ip

Type: ipaddr

Member's local ip address

sg_mem_mac

Type: ethernet

Member's mac address

sg_mem_ip

Type: ipaddr

Member's ip address

sg_is_mem_local

Type: bool

Local

sg_is_mem_authenticated

Type: bool

Is Member authenticated

sg_mem_end

Type: uinteger

End of membership attributes

sg_all_mem_end

Type: uinteger

End of all members

sg_fwd_count

Type: uinteger

Number of forwarders in the group

sg_active_fwd_count

Type: uinteger

Number of active forwarders in group

sg_fwd_start

Type: uinteger

Forwarder Start attribute

TABLE_fwd_detail

Forwarder table detail

sg_fwd_num

Type: uinteger

Forwarder Number

sg_fwd_state

Forwarder State

Active  value: 0x20

Init  value: 0x02

Disabled  value: 0x01

Listen  value: 0x04

sg_fwd_state_change_count

Type: uinteger

Forwarder State Change count

sg_fwd_last_state_change

Type: duration

Time of last State Change

sg_fwd_mac

Type: ethernet

Forwarder MAC address

sg_fwd_mac_type

Type: _enum

Forwarder MAC address type

sg_fwd_cfg_mac

Type: ethernet

Configured Forwarder MAC address

sg_fwd_owner

Type: ethernet

Forwarder owner

sg_fwd_redirect

Type: bool

Forwarder redirection enabled

sg_fwd_redirect_timer

Type: uinteger

Forwarder redirection timer

sg_fwd_is_sec_tmr_run

Type: bool

Is Forwarder secondary timer running

sg_fwd_sec_timer

Type: uinteger

Forwarder secondary timer

sg_fwd_ttl

Type: uinteger

Forwarder ttl

sg_fwd_ttr

Type: uinteger

Forwarder ttr

sg_fwd_pre

Type: bool

Forwarder preemption enabled

sg_fwd_pre_min_delay

Type: uinteger

Forwarder preempt min delay

sg_fwd_is_pre_min_run

Type: bool

Is Forwarder preempt min running

sg_fwd_pre_min_val

Type: uinteger

Forwarder preempt min value

sg_fwd_active_router

Type: ipaddr

Forwarder active router address

sg_fwd_active_router_attr

Type: _enum

Forwarder active router attribute

sg_fwd_weighting

Type: uinteger

Forwarder weighting

sg_fwd_active_addr

Type: ipaddr

Forwarder active address

sg_fwd_active_prio

Type: uinteger

Forwarder active priority

sg_fwd_active_prio_attr

Forwarder priority attribute

primary  value: 1

secondary  value: 2

sg_fwd_active_prio_weight_attr

Forwarder priority weight attribute

none  value: 0

low  value: 1

sg_fwd_active_timer_val

Type: uinteger

Forwarder active timer val

sg_fwd_arp_replies

Type: uinteger

Forwarder arp replies

sg_fwd_redirection

Type: string

Forwarder redirection string

sg_fwd_preempt

Type: string

Forwarder preemption string

sg_fwd_end

Type: uinteger

Forwarder End attribute

sg_all_fwd_end

Type: uinteger

All Forwarders End attribute

sg_nsf_state

Type: bool

show nsf state

sg_cmd_start

Type: bool

start of show command

show_glbp_end

Type: uinteger

End of Group

Command Modes

- /exec

show glbp brief

show glbp [ vrf vrf-name ] [ interface int-num ] [ group group-num ] [ active | standby | disabled | init | listen ] + brief [ __readonly__ sg_brf_start sg_brf_show_header TABLE_grp sg_brf_int sg_brf_group sg_brf_pri sg_brf_state sg_brf_vip sg_brf_act sg_brf_stdby sg_brf_fwd_start TABLE_fwd sg_brf_fwd_int sg_brf_fwd_group sg_brf_fwd_num sg_brf_fwd_pri sg_brf_fwd_state sg_brf_fwd_mac sg_brf_fwd_act sg_brf_fwd_end sg_brf_all_fwd_end sg_brf_end ]

Syntax Description

show

Show running system information

glbp

Show GLBP

vrf

Display per-VRF information

vrf-name

Type: vrf

VRF name

interface

Interface

int-num

Type: interface

Interface type and number

group

Group number

group-num

Type: integer

min: 0  max: 1023

Group number

active

Groups in active state

standby

Groups in standby state

disabled

Groups in disabled state

init

Groups in init state

listen

Groups in listen state

brief

Brief output

__readonly__

Read only

sg_brf_start

Type: uinteger

Start of group brief

sg_brf_show_header

Type: uinteger

Show brief header

TABLE_grp

Group table

sg_brf_int

Type: interface

Interface type and number

sg_brf_group

Type: uinteger

Group number

sg_brf_pri

Type: uinteger

Group priority

sg_brf_state

Group state

Active  value: 0x20

Init  value: 0x02

Disabled  value: 0x01

Listen  value: 0x04

Speak  value: 0x08

Standby  value: 0x10

sg_brf_vip

Type: ipaddr

Virtual IP address

sg_brf_act

Type: ipaddr

Active router

sg_brf_stdby

Type: ipaddr

Standby router

sg_brf_fwd_start

Type: uinteger

Start of forwarder brief

TABLE_fwd

Forwarder table

sg_brf_fwd_int

Type: interface

Forwarder interface

sg_brf_fwd_group

Type: uinteger

Forwarder group number

sg_brf_fwd_num

Type: uinteger

Forwarder number

sg_brf_fwd_pri

Type: uinteger

Forwarder priority

sg_brf_fwd_state

Forwarder state

Active  value: 0x20

Init  value: 0x02

Disabled  value: 0x01

Listen  value: 0x04

sg_brf_fwd_mac

Type: ethernet

Forwarder MAC address

sg_brf_fwd_act

Type: ipaddr

Forwarder active address

sg_brf_fwd_end

Type: uinteger

End of forwarder brief

sg_brf_all_fwd_end

Type: uinteger

End of all forwarders in group

sg_brf_end

Type: uinteger

End of group brief

Command Modes

- /exec

show glbp capability

show glbp capability [ interface int-num ] [ __readonly__ sg_cap_header sg_cap_start TABLE_cap sg_cap_int sg_cap_int_type sg_cap_support sg_cap_max_groups sg_cap_end sg_cap_all_if_end ]

Syntax Description

show

Show running system information

glbp

GLBP

capability

GLBP capability

interface

Interface

int-num

Type: interface

Interface type and number

__readonly__

Read only

sg_cap_header

Type: bool

GLBP capability header

sg_cap_start

Type: uinteger

Start of GLBP capability

TABLE_cap

Capability table

sg_cap_int

Type: interface

Interface

sg_cap_int_type

Type: uinteger

Interface type

sg_cap_support

Type: bool

Is GLBP supported

sg_cap_max_groups

Type: uinteger

Maximum number of GLBP groups

sg_cap_end

Type: uinteger

End of GLBP capability for interface

sg_cap_all_if_end

Type: uinteger

End of GLBP capability for all interfaces

Command Modes

- /exec

Chapter 9. H Show Commands

- show hardware

- show hardware access-list lou resource threshold

- show hardware access-list resource pooling

- show hardware access-list tcam region

- show hardware capacity

- show hardware capacity eobc

- show hardware capacity forwarding

- show hardware capacity interface

- show hardware capacity module

- show hardware capacity power

- show hardware fabricpath mac-learning module

- show hardware feature-capability

- show hardware forwarding interface statistics mode

- show hardware forwarding multicast fabric-path ingress

- show hardware ip verify

- show hardware mac address-table

- show hardware qos eoq stats-class

- show hardware qos ns-buffer-profile

- show hardware qos ns-mcq3-alias

- show hardware rate-limiter

- show hardware rl snmp class-id

- show hardware rl snmp global class-id

- show hardware rl snmp local snmp-index class-id

- show hosts

- show hsrp

- show hsrp bfd-sessions

- show hsrp delay

- show hsrp ext-mib sec-addr

- show hsrp ext-mib use-bia

- show hsrp summary

show hardware

show hardware [ __readonly__ header_str bios_ver_str [loader_ver_str] kickstart_ver_str [sys_ver_str] bios_cmpl_time kick_file_name kick_cmpl_time kick_tmstmp [isan_file_name] [isan_cmpl_time] [isan_tmstmp] chassis_id module_id cpu_name memory mem_type proc_board_id [host_name] bootflash_size [slot0_size] kern_uptm_days kern_uptm_hrs kern_uptm_mins kern_uptm_secs rr_usecs rr_ctime rr_reason [rr_sys_ver] [rr_service] [manufacturer] TABLE_slot [ TABLE_slot_info [ [num_slot_str] [status_ok_empty] [ [ type [num_submods] ] model_num hw_ver part_num part_revision manuf_date serial_num CLEI_code ] ] ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

__readonly__

header_str

Type: string

bios_ver_str

Type: string

loader_ver_str

Type: string

kickstart_ver_str

Type: string

sys_ver_str

Type: string

bios_cmpl_time

Type: string

kick_file_name

Type: string

kick_cmpl_time

Type: string

kick_tmstmp

Type: string

isan_file_name

Type: string

isan_cmpl_time

Type: string

isan_tmstmp

Type: string

chassis_id

Type: string

module_id

Type: string

cpu_name

Type: string

memory

Type: integer

mem_type

Type: string

proc_board_id

Type: string

bootflash_size

Type: integer

slot0_size

Type: integer

host_name

Type: string

kern_uptm_days

Type: integer

kern_uptm_hrs

Type: integer

kern_uptm_mins

Type: integer

kern_uptm_secs

Type: integer

rr_usecs

Type: integer

rr_ctime

Type: integer

rr_reason

Type: string

rr_sys_ver

Type: string

rr_service

Type: string

manufacturer

Type: string

TABLE_slot

Slot

TABLE_slot_info_header

Slot Info Header

num_slot_str

Type: string

Number of elements

TABLE_slot_info

Slot Info

status_ok_empty

Type: string

Status (Present or Absent)

type

Type: string

Description of the element

num_submods

Type: string

Number of Submodules

model_num

Type: string

Model Number

hw_ver

Type: string

Hardware version

part_num

Type: string

Part Number

part_revision

Type: string

Part revision

manuf_date

Type: string

Manufacturing date

serial_num

Type: string

Serial Number

CLEI_code

Type: string

CLEI code

Command Modes

- /exec

show hardware access-list lou resource threshold

show hardware access-list lou resource threshold [ __readonly__ current [ lou [ resource [ threshold [ threshold_value ] ] ] ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

access-list

Access Control List

lou

LOU

resource

hardware resource

threshold

port expansion threshold

__readonly__

current

lou

resource

threshold

threshold_value

Type: integer

Command Modes

- /exec

show hardware access-list resource pooling

show hardware access-list resource pooling [ __readonly__ mod-num status ]

Syntax Description

show

Show running system information

hardware

Show hardware information

access-list

Access Control List

resource

Hardware resource Not available in this release.

pooling

ACL programming across TCAM banks

__readonly__

mod-num

Type: integer

module number

status

Type: integer

Banchaining status

Command Modes

- /exec

show hardware access-list tcam region

show hardware access-list tcam region [ __readonly__ TCAM_Region [ TABLE_Sizes tcam_type tcam_size ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

access-list

Access Control List

tcam

Show tcam parameters

region

Show tcam region sizes

__readonly__

TCAM_Region

TABLE_Sizes

tcam_type

Type: string

tcam_size

Type: integer

Command Modes

- /exec

show hardware capacity

show hardware capacity

Syntax Description

show

Show running system information

hardware

Hardware related

capacity

Hardware usage levels for Power, Switching Fabric, Flash, etc

Command Modes

- /exec

show hardware capacity eobc

show hardware capacity eobc [ __readonly__ eobc_usage eobc_rx_packets eobc_rx_dropped eobc_rx_pps eobc_tx_packets eobc_tx_dropped eobc_tx_pps ]

Syntax Description

show

Show running system information

hardware

Hardware related

capacity

resource inventory and/or usage level

eobc

EOBC resources

__readonly__

eobc_usage

eobc_rx_packets

Type: uinteger

eobc_rx_dropped

Type: uinteger

eobc_rx_pps

Type: uinteger

eobc_tx_packets

Type: uinteger

eobc_tx_dropped

Type: uinteger

eobc_tx_pps

Type: uinteger

Command Modes

- /exec

show hardware capacity forwarding

show hardware capacity forwarding

Syntax Description

show

Show running system information

hardware

Hardware related

capacity

Hardware usage levels for Power, Switching Fabric, Flash, etc

forwarding

L2/L3 Forwarding resources

Command Modes

- /exec

show hardware capacity interface

show hardware capacity interface [ __readonly__ TABLE_module_drops module_drops tx_drops rx_drops max_tx_port max_rx_port TABLE_module_buffers module_buffers tx_buffers rx_buffers ]

Syntax Description

show

Show running system information

hardware

Hardware related

capacity

Usage levels

interface

Interface Resources - Tx/Rx drops and Tx/Rx buffers

__readonly__

Read Only

module_drops

Type: uinteger

Module number for Tx/Rx drops

TABLE_module_drops

show module

tx_drops

Type: longlong

Tx drops

rx_drops

Type: longlong

Rx drops

max_tx_port

Type: uinteger

Port with max Tx drops

max_rx_port

Type: uinteger

Port with max Rx drops

module_buffers

Type: uinteger

Module number for Tx/Rx buffers

TABLE_module_buffers

show module

tx_buffers

Type: uinteger

Tx buffers

rx_buffers

Type: uinteger

Rx buffers

Command Modes

- /exec

show hardware capacity module

show hardware capacity module [ __readonly__ sup_ha_status sup_ha_admin_status sup_ha_oper_status dual_sup_hw_state redundancy_state switch_resouces TABLE_lcinfo mod_num model_num part_num serial_num TABLE_xbarinfo mod_num1 model_num1 part_num1 serial_num1 TABLE_flash_nvram_info mod_num2 dev_name total_bytes free_bytes percent_used ]

Syntax Description

show

Show running system information

hardware

Hardware related

capacity

resource inventory and/or usage level

module

SUP, LC, XBAR

__readonly__

sup_ha_status

sup_ha_admin_status

Type: uinteger

sup_ha_oper_status

Type: uinteger

dual_sup_hw_state

Type: string

redundancy_state

Type: string

switch_resouces

TABLE_lcinfo

mod_num

Type: uinteger

model_num

Type: string

part_num

Type: string

serial_num

Type: string

TABLE_xbarinfo

mod_num1

Type: uinteger

model_num1

Type: string

part_num1

Type: string

serial_num1

Type: string

TABLE_flash_nvram_info

mod_num2

Type: uinteger

dev_name

Type: string

total_bytes

Type: string

free_bytes

Type: string

percent_used

Type: string

Command Modes

- /exec

show hardware capacity power

show hardware capacity power [ __readonly__ power_summary ps_redun_mode_admin ps_redun_mode_oper power_total power_rsvd power_rsvd_percent power_given_mod power_given_mod_percent power_avail power_avail_percent power_out_actual_draw power_input_actual_draw ]

Syntax Description

show

Show running system information

hardware

Hardware related

capacity

resource inventory and/or usage level

power

power summary

__readonly__

power_summary

ps_redun_mode_admin

Mode: Redundant or Non-redundant

Non-Redundant(combined)  value: 0

Redundant  value: 1

Combined(obsolete)  value: 2

Non-Redundant  value: 3

InSrc-Redundant  value: 4

PS-Redundant  value: 5

ps_redun_mode_oper

Mode: Redundant or Non-redundant

Non-Redundant(combined)  value: 0

Redundant  value: 1

Combined(obsolete)  value: 2

Non-Redundant  value: 3

InSrc-Redundant  value: 4

PS-Redundant  value: 5

power_total

Type: string

power_rsvd

Type: string

power_rsvd_percent

Type: string

power_given_mod

Type: string

power_given_mod_percent

Type: string

power_avail

Type: string

power_avail_percent

Type: string

power_out_actual_draw

Type: string

Total Power Output, Actuals

power_input_actual_draw

Type: string

Total Power Input, Actuals

Command Modes

- /exec

show hardware fabricpath mac-learning module

show hardware fabricpath mac-learning module module [ __readonly__ [ TABLE_module module_num port_group mac_learning ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

fabricpath

Fabric Path Not available in this release.

mac-learning

MAC Learning

module

Specify a module number

module

Type: integer

Specify a module number

__readonly__

TABLE_module

module_num

Type: integer

Specify a module number

port_group

Type: string

mac_learning

Type: string

Command Modes

- /exec

show hardware feature-capability

show hardware feature-capability [detailed] [ __readonly__ [ TABLE_feature_support feature_name [ TABLE_module_support mod_inst support ] ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

feature-capability

show registered features supported

detailed

detailed

__readonly__

TABLE_feature_support

show features supported

feature_name

Type: string

feature name

TABLE_module_support

show registered features supported

mod_inst

Type: string

module instance

support

Type: string

support details

Command Modes

- /exec

show hardware forwarding interface statistics mode

show hardware forwarding interface statistics mode [ __readonly__ system [ sysmode ] [ TABLE_module module modmode ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

forwarding

Hardware forwarding

interface

Interface

statistics

Statistics

mode

Statistics mode

__readonly__

system

sysmode

Type: string

TABLE_module

module

Type: integer

Specify a module number

modmode

Type: string

Command Modes

- /exec

show hardware forwarding multicast fabric-path ingress

show hardware forwarding multicast fabric-path ingress ing-intf { vlan vlan | ethertype ethertype | src-mac src-mac | dst-mac dst-mac | src-ip src-ip | src-ipv6 src-ipv6 | dst-ip dst-ip | dst-ipv6 dst-ipv6 | src-port src-port | dst-port dst-port } + [ __readonly__ module [ module_num rbh ] ]

Syntax Description

show

Show running system information

hardware

Show hardware information

forwarding

Show hardware information for forwarding path

multicast

Show hardware information for multicast forwarding

fabric-path

Show hardware information for multicast forwarding Not available in this release.

ingress

Ingress interface for multicast traffic

ing-intf

Type: interface

vlan

VLAN if switchport

vlan

Type: vlan

ethertype

Ethertype of the packet stream

ethertype

Type: hex

src-mac

Source MAC Address

src-mac

Type: ethernet

dst-mac

Destination MAC Address

dst-mac

Type: ethernet

src-ip

Source IPv4 address

src-ip

Type: ipaddr

src-ipv6

Source IPv6 address

src-ipv6

Type: ipv6addr

dst-ip

Destination IPv4 address

dst-ip

Type: ipaddr

dst-ipv6

Destination IPv6 address

dst-ipv6

Type: ipv6addr

src-port

Source L4 port

src-port

Type: integer

dst-port

Destination l4 port

dst-port

Type: integer

__readonly__

module

module_num

Type: integer

rbh

Type: integer

Command Modes

- /exec

show hardware ip verify

show hardware [forwarding] ip verify [ module module ] [ __readonly__ info_str ]

Syntax Description

show

Show running system information

hardware

Show hardware information

forwarding

Show hardware information for forwarding path

ip

IP Not available in this release.

verify

Show IP packet verification checks enabled in hardware Not available in this release.

module

Specify a module number

module

Type: integer

Specify a module number

__readonly__

info_str

Type: string

IDS Check Stats

Command Modes

- /exec

show hardware mac address-table

show hardware mac address-table module [ static | dynamic ] [ address mac-addr | interface interface-name | vlan id | vdc vdc | fe feid ] + [ bd bd_id ] [ __readonly__ l2entry header ]

Syntax Description

show

show

hardware

Show hardware information

mac

MAC configuration commands

address-table

MAC Address Table

module

Type: integer

min: 1  max: 16

Module Number

static

Display Static Entries

dynamic

Display Dynamic Entries

address

address

mac-addr

Type: ethernet

MAC Address

interface

Interface

interface-name

Type: interface

Interface name

vlan

VLAN

id

Type: integer

min: 1  max: 4094

VLAN ID

vdc

VDC ID

vdc

Type: integer

min: 1  max: 16

VDC ID value

fe

Forwarding Engine Instance ID(Zero based)

feid

Type: integer

min: 0  max: 15

FE ID value

bd

Bridge Domain

bd_id

Type: integer

min: 1  max: 16384

BD ID value

__readonly__

header

Type: string

Header

l2entry

Type: string

L2 Entry String

Command Modes

- /exec

show hardware qos eoq stats-class

show hardware qos eoq stats-class [ module module ] [ __readonly__ TABLE_qos_eoq_stats_class module eoq-stats-class-desc ]

Syntax Description

show

Show running system information

hardware

Show hardware information

qos

Show QoS related information

eoq

Show Extended Output Queue(EOQ) related information

stats-class

Show EOQ Statistics class selection config

module

Specify a module number Not available in this release.

module

Type: integer

Specify a module number

__readonly__

TABLE_qos_eoq_stats_class

the xml qos_eoq_stats_class configuration

eoq-stats-class-desc

Type: string

selected class description

Command Modes

- /exec

show hardware qos ns-buffer-profile

show hardware qos ns-buffer-profile [ module module ] [ __readonly__ TABLE_qos_ns_buffer_profile module buff-prof-desc ]

Syntax Description

show

Show running system information

hardware

Show hardware information

qos

Show qos related information

ns-buffer-profile

Show ns-buffer-profile config

module

Specify a module number Not available in this release.

module

Type: integer

Specify a module number

__readonly__

TABLE_qos_ns_buffer_profile

the xml qos_ns_buffer_profile configuration

buff-prof-desc

Type: string

buffer profile description

Command Modes

- /exec

show hardware qos ns-mcq3-alias

show hardware qos ns-mcq3-alias [ module module ] [ __readonly__ TABLE_qos_ns_mcq3_alias module ns-mcq3-alias-desc ]

Syntax Description

show

Show running system information

hardware

Show hardware information

qos

Show QoS related information

ns-mcq3-alias

Show NS mc-queue-3 alias class selection config Available only in the 9300 series.

module

Specify a module number Not available in this release.

module

Type: integer

Specify a module number

__readonly__

TABLE_qos_ns_mcq3_alias

the xml qos_ns_mcq3_alias configuration

ns-mcq3-alias-desc

Type: string

selected class description

Command Modes

- /exec

show hardware rate-limiter

show hardware rate-limiter [ module module ] [ layer-3 { l3-opts | multicast mcast-opts } | layer-2 l2-opts | opts | f1 f1-opts ] [ __readonly__ TABLE_hardware_rate_limiter rate-limit-class class-descr module rate-limit-configured rate-limit-allowed rate-limit-dropped rate-limit-total ]

Syntax Description

show

Show running system information

hardware

Show hardware information

rate-limiter

Show Rate-Limiter configs and statistics

layer-3

Layer-3 control and Routed packets

l3-opts

glean  value: 3

Glean traffic

multicast

Multicast data packets

mcast-opts

local-groups  value: 5

Data packets punted for initiating SPT join

layer-2

Layer-2 control and Bridged packets Not available in this release.

l2-opts

storm-control  value: 7

Packets flooded in VLAN
port-security  value: 12

Packets violating MAC restrictions on the ingress interface
mcast-snooping  value: 13

IGMP Snoop packets for L2 Multicast
vpc-low  value: 14

Control packets over vPC low q
l2pt  value: 15

Layer2 tunnel protocol
vpc-peer-gw  value: 21

Traffic to be redirected to vPC peer
lisp-map-cache  value: 22

Traffic to be redirected to LISP peer

opts

access-list-log  value: 8

Packets copied to supervisor for access-list logging
bfd  value: 23

BFD protocol traffic
exception  value: 24

Catch-all exception traffic

f1

Control packets from F1 modules to supervisor Not available in this release.

f1-opts

rl-1  value: 16

STP and Fabricpath-ISIS
rl-2  value: 17

L3-ISIS and OTV-ISIS
rl-3  value: 18

UDLD, LACP, CDP and LLDP
rl-4  value: 19

Q-in-Q and ARP request
rl-5  value: 20

IGMP, NTP, DHCP-Snoop, Port-Security and Mgmt traffic

module

Specify a module number

module

Type: integer

Specify a module number

__readonly__

TABLE_hardware_rate_limiter

the xml Rate-Limiter configuration and statistics

rate-limit-class

Type: integer

the xml rate limiter class

class-descr

Type: string

class description

module

Type: integer

the xml module number

rate-limit-configured

Type: integer

the xml rate-limit-configured

rate-limit-allowed

Type: longlong

the xml rate-limit-allowed

rate-limit-dropped

Type: longlong

the xml rate-limit-dropped

rate-limit-total

Type: longlong

the xml rate-limit-total

Command Modes

- /exec

show hardware rl snmp class-id

show hardware rl snmp class-id class-id [ __readonly__ TABLE-classRateLimiterTable class-id-out class-descr ]

Syntax Description

show

Show running system information

hardware

Show hardware information

rl

Show Rate-Limiter configs and statistics

snmp

Show Rate-Limiter snmp information

class-id

rate-limiter class-id

class-id

Type: integer

rate-limiter class

__readonly__

TABLE-classRateLimiterTable

Class Rate Limiter Table

class-id-out

Type: integer

class if out

class-descr

Type: string

class description

Command Modes

- /exec

show hardware rl snmp global class-id

show hardware rl snmp global class-id class-id [ __readonly__ TABLE-globalRateLimiterTable class-id-out rate-limit-configured rate-limit-allowed rate-limit-dropped rate-limit-total ]

Syntax Description

show

Show running system information

hardware

Show hardware information

rl

Show Rate-Limiter configs and statistics

snmp

Show Rate-Limiter snmp information

global

Show Global information

class-id

rate-limiter class-id

class-id

Type: integer

rate-limiter class

__readonly__

TABLE-globalRateLimiterTable

Global Rate Limiter Table

class-id-out

Type: integer

class if out

rate-limit-configured

Type: integer

rate-limit-configured

rate-limit-allowed

Type: longlong

rate-limit-allowed

rate-limit-dropped

Type: longlong

rate-limit-dropped

rate-limit-total

Type: longlong

rate-limit-total

Command Modes

- /exec

show hardware rl snmp local snmp-index class-id

show hardware rl snmp local snmp-index snmp-index class-id class-id [ __readonly__ TABLE-localRateLimiterTable snmp-index-out class-id-out rate-limit-configured rate-limit-configured-source rate-limit-allowed rate-limit-dropped rate-limit-total ]

Syntax Description

show

Show running system information

hardware

Show hardware information

rl

Show Rate-Limiter configs and statistics

snmp

Show Rate-Limiter snmp information

local

Show Local information

snmp-index

snmp physical index

snmp-index

Type: integer

physical index

class-id

rate-limiter class-id

class-id

Type: integer

rate-limiter class

__readonly__

TABLE-localRateLimiterTable

Local Rate Limiter Table

snmp-index-out

Type: integer

snmp index out

class-id-out

Type: integer

class if out

rate-limit-configured

Type: integer

rate-limit-configured

rate-limit-configured-source

Type: integer

rate-limit-configured-source

rate-limit-allowed

Type: longlong

rate-limit-allowed

rate-limit-dropped

Type: longlong

rate-limit-dropped

rate-limit-total

Type: longlong

rate-limit-total

Command Modes

- /exec

show hosts

show hosts [ __readonly__ [dnslookup] [dnsnameservice] [ TABLE_vrf vrfname [defaultdomains] [additionaldomainserver] [domainservers] [nameservice] [dhcpdomains] [dhcpdomainservers] ] [ TABLE_dnsconfigvrf dnsvrfname [usevrf] [token] [ TABLE_dnsconfigvrfconfig config ] ] [ TABLE_hosts host [address] ] ]

Syntax Description

show

Show running system information

hosts

Show information about DNS

__readonly__

dnslookup

Type: string

dns lookup enable status

dnsnameservice

Type: string

name service

TABLE_vrf

vrf domain servers

vrfname

Type: string

vrf name

defaultdomains

Type: string

default domain

additionaldomainserver

Type: string

additionaldomain

domainservers

Type: string

domain server

nameservice

Type: string

name service

dhcpdomains

Type: string

dhcp domains

dhcpdomainservers

Type: string

dhcpservers

TABLE_dnsconfigvrf

dns config vrf

dnsvrfname

Type: string

vrfname

usevrf

Type: string

usevrf

token

Type: string

token

TABLE_dnsconfigvrfconfig

dns config vrf config

config

Type: string

token

TABLE_hosts

all configured dns hosts

host

Type: string

xml host information

address

Type: string

xml address information

Command Modes

- /exec

show hsrp

show hsrp [ interface interface-id ] [ group group-number ] [ active | init | learn | listen | speak | standby ] + [all] [ brief [all] | detail ] [ ipv4 | ipv6 ] [ __readonly__ show_hsrp_start TABLE_grp_detail sh_if_index sh_group_num sh_group_type sh_group_version sh_group_state sh_state_reason sh_prio sh_cfg_prio sh_fwd_lower_threshold sh_fwd_upper_threshold sh_can_forward sh_preempt sh_preempt_min_delay sh_preempt_min_delay_active sh_preempt_reload_delay sh_preempt_reload_delay_active sh_preempt_sync_delay sh_preempt_sync_delay_active sh_cur_hello sh_cur_hello_attr sh_cfg_hello sh_cfg_hello_attr sh_active_hello sh_cur_hold sh_cur_hold_attr sh_cfg_hold sh_cfg_hold_attr sh_vip sh_vip_v6 sh_vip_attr sh_num_vip_sec TABLE_grp_vip_sec sh_vip_sec sh_vip_sec_v6 sh_active_router_addr sh_active_router_addr_v6 sh_active_router_prio sh_active_router_timer sh_standby_router_addr sh_standby_router_addr_v6 sh_standby_router_prio sh_authentication_type sh_authentication_data sh_keystring_attr sh_keystring_timeout sh_keystring_cur_valid sh_vmac sh_vmac_attr sh_num_of_state_changes sh_last_state_change sh_num_of_total_state_changes sh_last_total_state_change sh_num_track_obj TABLE_grp_track_obj sh_track_obj sh_track_obj_state sh_track_obj_prio sh_ip_redund_name sh_ip_redund_name_attr show_hsrp_end ]

Syntax Description

show

Show running system information

hsrp

Hot Standby Router Protocol (HSRP) information

interface

Groups on this interface

interface-id

Type: interface

Interface

active

Groups in active state

init

Groups in init state

listen

Groups in listen state

standby

Groups in standby state

learn

Groups in learn state

speak

Groups in speak state

group

Group number

group-number

Type: integer

min: 0  max: 4095

Group Number

all

Include groups in disabled state

brief

Brief output

detail

Detailed output

ipv4

HSRP V4 Groups

ipv6

HSRP V6 Groups

all

Display all VIPs

__readonly__

Read only

show_hsrp_start

Type: uinteger

Show hsrp start

TABLE_grp_detail

Group table detail

sh_if_index

Type: interface

Interface type and number

sh_group_num

Type: uinteger

Group number

sh_group_state

HSRP state

Disabled  value: 2

Active  value: 8

Initial  value: 3

Listen  value: 5

Speak  value: 6

Standby  value: 7

sh_state_reason

Type: string

Reason

sh_group_type

Group type

v4  value: 0

v6  value: 1

sh_group_version

Group version

v1  value: 1

v2  value: 2

sh_prio

Type: uinteger

Priority

sh_cfg_prio

Type: uinteger

Configured priority

sh_fwd_lower_threshold

Type: uinteger

Lower threshold value

sh_fwd_upper_threshold

Type: uinteger

Upper threhsold value

sh_can_forward

Type: bool

Current forwarding status

sh_preempt

Type: bool

Preemption enabled/not

sh_preempt_min_delay

Type: uinteger

Preemption min delay

sh_preempt_min_delay_active

Type: uinteger

Active preemption min delay

sh_preempt_reload_delay

Type: uinteger

Preemption reload delay

sh_preempt_reload_delay_active

Type: uinteger

Active preemption reload delay

sh_preempt_sync_delay

Type: uinteger

Preemption sync delay

sh_preempt_sync_delay_active

Type: uinteger

Active preemption sync delay

sh_cur_hello

Type: uinteger

Current hello time

sh_cur_hello_attr

Hello time in ms/not

msec  value: 0

sec  value: 1

sh_cfg_hello

Type: uinteger

Configured hello time

sh_cfg_hello_attr

Hello time in ms/not

msec  value: 0

sec  value: 1

sh_active_hello

Type: string

Active hello time

sh_cur_hold

Type: uinteger

Current hold time

sh_cur_hold_attr

Hello time in ms/not

msec  value: 0

sec  value: 1

sh_cfg_hold

Type: uinteger

Configured hold time

sh_cfg_hold_attr

Hello time in ms/not

msec  value: 0

sec  value: 1

sh_vip

Type: ipaddr

Virtual IP address

sh_vip_v6

Type: ipv6addr

Virtual IPv6 address

sh_vip_attr

Virtual IP address attribute

config  value: 0

learnt  value: 1

autoconfig  value: 2

sh_num_vip_sec

Type: uinteger

Number of Secondary virtual IP address

TABLE_grp_vip_sec

Group secondary ip address

sh_vip_sec

Type: ipaddr

Secondary virtual IP address

sh_vip_sec_v6

Type: ipv6addr

Gropu secondary ipv6 address

sh_active_router_addr

Type: ipaddr

Active router address

sh_active_router_addr_v6

Type: ipv6addr

Active router V6 address

sh_active_router_prio

Type: uinteger

Active router priority

sh_active_router_timer

Type: string

Active router expiry timer

sh_standby_router_addr

Type: ipaddr

Standby router address

sh_standby_router_addr_v6

Type: ipv6addr

Standby router V6 address

sh_standby_router_prio

Type: uinteger

Standby router priority

sh_authentication_type

Authentication type

text  value: 0

md5  value: 1

sh_authentication_data

Type: string

Authentication data

sh_keystring_attr

Keystring attribute

unencrypted  value: 0

hidden  value: 1

sh_keystring_timeout

Type: uinteger

Keystring timeout

sh_keystring_cur_valid

Type: string

Keystring current valid time

sh_vmac

Type: ethernet

Virtual MAC

sh_vmac_attr

Virtual MAC attribute

Interface MAC - use-bia enabled  value: 0

Configured MAC  value: 1

Default MAC  value: 2

sh_num_of_state_changes

Type: uinteger

Number of state changes

sh_last_state_change

Type: uinteger

Last state change time

sh_num_of_total_state_changes

Type: uinteger

Number of total state changes

sh_last_total_state_change

Type: uinteger

Last total state change time

sh_num_track_obj

Type: uinteger

Number of tracked objects

TABLE_grp_track_obj

Group tracked objects

sh_track_obj

Type: uinteger

Tracked object

sh_track_obj_state

State of tracked object

UP  value: 1

DOWN  value: 0

sh_track_obj_prio

Type: uinteger

Tracked object priority decrement

sh_ip_redund_name

Type: string

IP redundancy name

sh_ip_redund_name_attr

IP redundancy name attribute

Default  value: 0

Configured  value: 1

show_hsrp_end

Type: uinteger

End of Group

Command Modes

- /exec

show hsrp bfd-sessions

show hsrp bfd-sessions [ interface interface-id [ to ipaddress ] ] [ __readonly__ TABLE_bfd_sess interface list_size { src_addr | src_addr_v6 } { dst_addr | dst_addr_v6 } ref_count TABLE_ref_groups ref_group_id TABLE_hist_groups hist_group_id hist_operation hist_rel_time hist_abs_time hist_ref_count hist_group_state hist_status hist_op_reason ]

Syntax Description

show

Show running system information

hsrp

Hot Standby Router Protocol (HSRP) information

bfd-sessions

BFD sessions

interface

Groups on this interface

interface-id

Type: interface

Interface

to

To IP address

ipaddress

Type: ipaddr

Sessions to IP address

__readonly__

TABLE_bfd_sess

interface

Type: interface

Interface

list_size

Type: uinteger

List size

src_addr

Type: ipaddr

IPv4 Source address

dst_addr

Type: ipaddr

IPv4 Destination address

src_addr_v6

Type: ipv6addr

IPv6 Source address

dst_addr_v6

Type: ipv6addr

IPv6 Destination address

ref_count

Type: uinteger

Ref count

TABLE_ref_groups

ref_group_id

Type: uinteger

Group id

TABLE_hist_groups

hist_group_id

Type: uinteger

Group id

hist_operation

Type: string

Operation

hist_rel_time

Type: string

Relative time

hist_abs_time

Type: string

Absolute time

hist_ref_count

Type: uinteger

Ref count

hist_group_state

Type: string

Group state

hist_status

Type: string

Status

hist_op_reason

Type: string

Op reason

Command Modes

- /exec

show hsrp delay

show hsrp delay [ interface interface-id ] [ __readonly__ TABLE_delay interface min_delay reload_delay ]

Syntax Description

show

Show running system information

hsrp

Hot Standby Router Protocol (HSRP) information

delay

Group initialisation delay

interface

Groups on this interface

interface-id

Type: interface

Interface

__readonly__

TABLE_delay

interface

Type: interface

Interface

min_delay

Type: uinteger

Min delay

reload_delay

Type: uinteger

Reload delay

Command Modes

- /exec

show hsrp ext-mib sec-addr

show hsrp ext-mib sec-addr [ ifindex-in group-id-in ip1-in ip2-in ip3-in ip4-in ] [ __readonly__ TABLE_cHsrpExtSecAddrTable ifindex-out group-id-out ip1-out ip2-out ip3-out ip4-out cHsrpExtSecAddrTable cHsrpExtSecAddrAddress cHsrpExtSecAddrRowStatus ]

Syntax Description

__readonly__

Read Only

show

Show running system information

hsrp

Hot Standby Router Protocol (HSRP) information

ext-mib

Show hsrp extended mib specific configuration

sec-addr

Secondary virtual address

ifindex-in

Type: uinteger

hsrp group ifindex

group-id-in

Type: uinteger

hsrp group id

group-id-out

Type: uinteger

hsrp group num

ifindex-out

Type: uinteger

hsrp group interface index

ip1-in

Type: uinteger

first part of vip

ip2-in

Type: uinteger

second part of vip

ip3-in

Type: uinteger

third part of vip

ip4-in

Type: uinteger

fourth part of vip

ip1-out

Type: uinteger

first part of vip out

ip2-out

Type: uinteger

second part of vip out

ip3-out

Type: uinteger

third part of vip out

ip4-out

Type: uinteger

fourth part of vip out

TABLE_cHsrpExtSecAddrTable

Hsrp extended mib secondary address table

cHsrpExtSecAddrTable

Type: uinteger

Hsrp extended mib Secondary address table

cHsrpExtSecAddrAddress

Type: uinteger

Hsrp extended mib Secondary Address

cHsrpExtSecAddrRowStatus

Type: uinteger

Hsrp extended mib secondary address row status

Command Modes

- /exec

show hsrp ext-mib use-bia

show hsrp ext-mib use-bia [ifindex-in] [ __readonly__ TABLE_cHsrpExtIfEntry ifindex-out cHsrpExtIfUseBIA cHsrpExtIfRowStatus ]

Syntax Description

__readonly__

Read Only

show

Show running system information

hsrp

Hot Standby Router Protocol (HSRP) information

ext-mib

Show hsrp extended mib specific configuration

use-bia

Use BIA

ifindex-in

Type: uinteger

hsrp group ifindex

ifindex-out

Type: uinteger

hsrp group ifindex

TABLE_cHsrpExtIfEntry

Use BIA info table

cHsrpExtIfUseBIA

Type: uinteger

Use BIA enabled

cHsrpExtIfRowStatus

Type: uinteger

Use BIA row status

Command Modes

- /exec

show hsrp summary

show hsrp summary [ __readonly__ switchover_notify_rxed bfd_enabled num_of_groups num_of_v4_v1_groups num_of_v4_v2_groups num_of_v6_v2_groups num_of_active_groups num_of_standby_groups num_of_listen_groups num_of_v6_active_groups num_of_v6_standby_groups num_of_v6_listen_groups num_of_hsrp_enabled_ifs counter_pkts_tx counter_pkts_tx_failure counter_pkts_in counter_pkts_bad_vr counter_mts_rx ]

Syntax Description

show

Show running system information

hsrp

Hot Standby Router Protocol (HSRP) information

summary

Show HSRP summary

__readonly__

switchover_notify_rxed

Type: string

Switchover notification received (1 => active)

bfd_enabled

Type: string

BFD status

num_of_groups

Type: uinteger

Total number of groups

num_of_v4_v1_groups

Type: uinteger

Number of IPv4 V1 groups

num_of_v4_v2_groups

Type: uinteger

Number of IPv4 V2 groups

num_of_v6_v2_groups

Type: uinteger

Number of IPv6 V2 groups

num_of_active_groups

Type: uinteger

Number of active groups

num_of_standby_groups

Type: uinteger

Number of standby groups

num_of_listen_groups

Type: uinteger

Number of listen groups

num_of_v6_active_groups

Type: uinteger

Number of IPv6 active groups

num_of_v6_standby_groups

Type: uinteger

Number of IPv6 standby groups

num_of_v6_listen_groups

Type: uinteger

Number of IPv6 listen groups

num_of_hsrp_enabled_ifs

Type: uinteger

Number of HSRP enabled interfaces

counter_pkts_tx

Type: uinteger

Number of packet transmission successes

counter_pkts_tx_failure

Type: uinteger

Number of packet transmission failure

counter_pkts_in

Type: uinteger

Number of packets received successfully

counter_pkts_bad_vr

Type: uinteger

Number of packets for unknown groups

counter_mts_rx

Type: uinteger

Number of MTS messages received

Command Modes

- /exec

Chapter 10. I Show Commands

- show inactive-if-config log

- show incompatibility-all nxos

- show incompatibility nxos

- show install active

- show install all failed-standby

- show install all failure-reason

- show install all impact

- show install all impact epld

- show install all status

- show install committed

- show install epld status

- show install impact (sysmgr_upgradecli)

- show install impact (sysmgr_upgradecli)

- show install impact detail

- show install inactive

- show install log

- show install packages

- show install pkg-info

- show install request

- show interface (if_manager)

- show interface (if_manager)

- show interface (if_manager)

- show interface (if_manager)

- show interface (if_manager)

- show interface (if_manager)

- show_interface

- show interface brief (if_manager)

- show interface brief (if_manager)

- show interface brief (if_manager)

- show interface brief (if_manager)

- show interface brief (if_manager)

- show interface brief (if_manager)

- show interface cable-diagnostics-tdr

- show interface capabilities (if_manager)

- show interface capabilities (if_manager)

- show interface counters (if_manager)

- show interface counters (if_manager)

- show interface counters (if_manager)

- show interface counters (if_manager)

- show interface counters (if_manager)

- show interface counters brief

- show interface counters detailed (if_manager)

- show interface counters detailed (if_manager)

- show interface counters detailed (if_manager)

- show interface counters detailed (if_manager)

- show interface counters detailed all (if_manager)

- show interface counters detailed all (if_manager)

- show interface counters detailed all (if_manager)

- show interface counters detailed all (if_manager)

- show interface counters detailed all (if_manager)

- show interface counters detailed all (if_manager)

- show interface counters errors (if_manager)

- show interface counters errors (if_manager)

- show interface counters errors (if_manager)

- show interface counters errors fex

- show interface counters fex

- show interface counters snmp

- show interface counters snmp fex

- show interface counters trunk

- show interface debounce (if_manager)

- show interface debounce (if_manager)

- show interface description (if_manager)

- show interface description (if_manager)

- show interface description (if_manager)

- show interface description (if_manager)

- show interface description (if_manager)

- show interface description (svi)

- show interface fcoe

- show interface fex-conf

- show interface fex-fabric

- show interface fex-intf

- show interface flowcontrol (if_manager)

- show interface flowcontrol (if_manager)

- show interface flowcontrol fex

- show interface mac-address (if_manager)

- show interface mac-address (if_manager)

- show interface priority-flow-control

- show interface private-vlan mapping

- show interface pruning

- show interface snmp-ifindex

- show interface status (if_manager)

- show interface status (if_manager)

- show interface status (if_manager)

- show interface status (if_manager)

- show interface status (if_manager)

- show interface status (svi)

- show interface status err-disabled (if_manager)

- show interface status err-disabled (if_manager)

- show interface status err-vlans (if_manager)

- show interface status err-vlans (if_manager)

- show interface status fex

- show interface switchport (if_manager)

- show interface switchport (if_manager)

- show interface transceiver (if_manager)

- show interface transceiver (if_manager)

- show interface transceiver fex-fabric (if_manager)

- show interface transceiver fex-fabric (if_manager)

- show interface trunk (if_manager)

- show interface trunk (if_manager)

- show inventory

- show inventory fex

- show ip (bgp)

- show ip (bgp)

- show ip adjacency

- show ip arp

- show ip arp cache

- show ip arp client

- show ip arp inspection

- show ip arp inspection interfaces

- show ip arp inspection log

- show ip arp inspection statistics

- show ip arp inspection vlan

- show ip arp off-list

- show ip arp snmp pttree

- show ip arp statistics

- show ip arp tunnel-statistics

- show ip arp vaddr

- show ip arp vpc-statistics

- show ip as-path-access-list

- show ip cache

- show ip client

- show ip community

- show ip community-list

- show ip dampening

- show ip dhcp global statistics

- show ip dhcp relay

- show ip dhcp relay address

- show ip dhcp relay statistics

- show ip dhcp snooping

- show ip dhcp snooping binding

- show ip dhcp snooping statistics

- show ip dns source-interface

- show ip dns source-interface vrf all

- show ip eigrp route-map statistics redistribute

- show ip extcommunity

- show ip extcommunity-list

- show ip fib adjacency

- show ip fib distribution

- show ip fib distribution capture

- show ip fib distribution clients

- show ip fib distribution mroute

- show ip fib distribution multicast

- show ip fib distribution multicast outgoing-interface-list

- show ip fib distribution state

- show ip fib interfaces

- show ip fib mroute

- show ip fib mroute txlist

- show ip fib route

- show ip flap-statistics

- show ip ftm statistics

- show ip igmp

- show ip igmp interfaceshow ip igmp interface

- show ip igmp local-groups

- show ip igmp policy statistics reports

- show ip igmp snooping

- show ip igmp snooping explicit-tracking

- show ip igmp snooping groups

- show ip igmp snooping lookup-mode

- show ip igmp snooping mac-oif

- show ip igmp snooping mrouter

- show ip igmp snooping otv vlan brief

- show ip igmp snooping pw vlan brief

- show ip igmp snooping querier

- show ip igmp snooping snmp mib adminMode

- show ip igmp snooping snmp mib aliasingMode

- show ip igmp snooping snmp mib cisV3ProcessEnableOperStatus

- show ip igmp snooping snmp mib explicitTrackingTable

- show ip igmp snooping snmp mib fallBackTime

- show ip igmp snooping snmp mib fastBlockEnabled

- show ip igmp snooping snmp mib fastleaveenabled

- show ip igmp snooping snmp mib filterStatsTable

- show ip igmp snooping snmp mib ifAccessGroupTable

- show ip igmp snooping snmp mib ifConfigTable

- show ip igmp snooping snmp mib ifLimitTable

- show ip igmp snooping snmp mib ifLimitTotalTable

- show ip igmp snooping snmp mib igmpsnoopingenabled

- show ip igmp snooping snmp mib iterfaceStatsTable

- show ip igmp snooping snmp mib lastMemeberQueryCount

- show ip igmp snooping snmp mib lastMemeberQueryInterval

- show ip igmp snooping snmp mib leaveQueryType

- show ip igmp snooping snmp mib mcastGroupTable

- show ip igmp snooping snmp mib mcastRouterCfgTable

- show ip igmp snooping snmp mib mcastRouterConfigTable

- show ip igmp snooping snmp mib multicastGroupConfigTable

- show ip igmp snooping snmp mib multicastGroupPortListTable

- show ip igmp snooping snmp mib multicastGroupTable

- show ip igmp snooping snmp mib operMode

- show ip igmp snooping snmp mib querierTable

- show ip igmp snooping snmp mib reportsuppressionenabled

- show ip igmp snooping snmp mib robustnessVariable

- show ip igmp snooping snmp mib routerAlertCheckEnabled

- show ip igmp snooping snmp mib sourceOnlyEntryAgingTime

- show ip igmp snooping snmp mib sourceOnlyLearningEnabled

- show ip igmp snooping snmp mib tcnFloodQueryCount

- show ip igmp snooping snmp mib timeToLiveCheckEnabled

- show ip igmp snooping snmp mib topoChanageQuerySolicitEnabled

- show ip igmp snooping snmp mib v3ProcessEnabledAdminStatus

- show ip igmp snooping snmp mib v3SnoopingSupport

- show ip igmp snooping snmp mib vlanconfigtable

- show ip igmp snooping snmp mib vlanFilterConfigTable

- show ip igmp snooping statistics (igmp)

- show ip igmp snooping statistics (igmp)

- show ip igmp vrf all

- show ip interface

- show ip lisp data-cache

- show ip load-sharing

- show ip local-pt

- show ip local policy

- show ip logging

- show ip msdp

- show ip msdp count

- show ip msdp mesh-group

- show ip msdp peer

- show ip msdp policy statistics sa-policy

- show ip msdp rpf

- show ip msdp sources

- show ip msdp statistics

- show ip msdp summary

- show ip multicast vrf

- show ip neighbors

- show ip nexthop

- show ip nexthop-database

- show ip ospf

- show ip ospf border-routers

- show ip ospf database

- show ip ospf database database-summary

- show ip ospf database detail

- show ip ospf ha

- show ip ospf interface

- show ip ospf interface brief

- show ip ospf lsa-content-changed-list

- show ip ospf memory

- show ip ospf mpls ldp interface

- show ip ospf neighbors

- show ip ospf neighbors detail

- show ip ospf neighbors summary

- show ip ospf policy statistics

- show ip ospf request-list

- show ip ospf retransmission-list

- show ip ospf route

- show ip ospf route summary

- show ip ospf sham-links

- show ip ospf statistics

- show ip ospf summary-address

- show ip ospf traffic

- show ip ospf traps-queue

- show ip ospf virtual-links

- show ip ospf virtual-links brief

- show ip pim bitfield

- show ip pim config-sanity

- show ip pim group-range

- show ip pim lisp encap

- show ip pim mdt

- show ip pim mdt bgp

- show ip pim mdt history interval

- show ip pim mdt receive

- show ip pim mdt send

- show ip pim oif-list

- show ip pim policy statistics (pim)

- show ip pim policy statistics (pim)

- show ip pim route

- show ip pim rp-hash

- show ip pim rp

- show ip pim statistics

- show ip policy

- show ip prefix-list (bgp)

- show ip prefix-list (rpm)

- show ip process

- show ip received-paths

- show ip rip policy statistics redistribute

- show ip router-id

- show ip rsvp

- show ip rsvp authentication

- show ip rsvp counters

- show ip rsvp fast-reroute

- show ip rsvp hello client lsp

- show ip rsvp hello client neighbor

- show ip rsvp hello graceful-restart

- show ip rsvp hello instance

- show ip rsvp interface

- show ip rsvp session

- show ip rsvp signalling rate-limit

- show ip rsvp signalling refresh interval

- show ip rsvp signalling refresh misses

- show ip rsvp signalling refresh reduction

- show ip stats

- show ip telnet source-interface

- show ip telnet source-interface vrf all

- show ip tftp source-interface

- show ip tftp source-interface vrf all

- show ip traffic

- show ip txlist

- show ip verify source

- show ip vrf

- show ipv6 (bgp)

- show ipv6 (bgp)

- show ipv6 (am)

- show ipv6 (bgp)

- show ipv6 cache

- show ipv6 client

- show ipv6 community

- show ipv6 dampening

- show ipv6 dhcp relay

- show ipv6 dhcp relay statistics

- show ipv6 eigrp route-map statistics redistribute

- show ipv6 extcommunity

- show ipv6 flap-statistics

- show ipv6 fragments

- show ipv6 global traffic

- show ipv6 icmp

- show ipv6 icmp ndp

- show ipv6 icmp off-list

- show ipv6 icmp process sdb

- show ipv6 icmp snmp pttree

- show ipv6 icmp vaddr

- show ipv6 icmp vpc-statistics

- show ipv6 icmp vrf

- show ipv6 interface

- show ipv6 interface global

- show ipv6 lisp data-cache

- show ipv6 local-pt

- show ipv6 local policy

- show ipv6 mld groups

- show ipv6 mld local-groups

- show ipv6 mld vrf all

- show ipv6 mtu

- show ipv6 ndp

- show ipv6 neighbor static

- show ipv6 neighbors

- show ipv6 nexthop

- show ipv6 nexthop-database

- show ipv6 pim bitfield

- show ipv6 pim df

- show ipv6 pim embed-rp

- show ipv6 pim group-range

- show ipv6 pim interfaceshow ipv6 pim interface

- show ipv6 pim neighbor

- show ipv6 pim oif-list

- show ipv6 pim policy statistics

- show ipv6 pim route

- show ipv6 pim rp-hash

- show ipv6 pim rp

- show ipv6 pim statistics

- show ipv6 pim vrf

- show ipv6 policy

- show ipv6 prefix-list

- show ipv6 process

- show ipv6 process sdb

- show ipv6 received-paths

- show ipv6 regexp

- show ipv6 rip policy statistics redistribute

- show ipv6 routers

- show ipv6 static-route

- show ipv6 statistics

- show ipv6 summary

- show ipv6 traffic

- show isis (isis)

- show isis (isis)

- show isis adjacency

- show isis csnp

- show isis database

- show isis ipv6 redistribute route

- show isis ipv6 route-map statistics

- show isis lsp free-list

- show isis mesh-group

- show isis redistribute route

- show isis route-map statistics

- show isis routeshow isis ipv6 routeshow isis route is

- show isis rrm

- show isis spf-adjacency

- show isis spf-log

- show isis srm

- show isis ssn

- show isis statistics

- show isis summary-addressshow isis ipv6 summary-address

- show isis tlv overflow-list

- show isis topology

- show isis traffic

show inactive-if-config log

show inactive-if-config log

Syntax Description

show

Show running system information

inactive-if-config

Current clear inactive if config log

log

Displays execution log of last clear inactive if config command

Command Modes

- /exec

show incompatibility-all nxos

show incompatibility-all nxos uri0 [ __readonly__ [ TABLE_incompat_all Str1 [Serv] [Cap] [Desc] [Req] [Enable] ] [Dynamic] ]

Syntax Description

show

Show running system information

incompatibility-all

Show incompatible configurations for the entire system

nxos

show incompatibilities with an image

uri0

Type: uri

Enter image uri

__readonly__

TABLE_incompat_all

Show incompatibility system table

Str1

Type: string

Serv

Type: string

Cap

Type: string

Desc

Type: string

Req

Type: string

Enable

Type: string

Dynamic

Type: string

Command Modes

- /exec

show incompatibility nxos

show incompatibility nxos uri0 [ __readonly__ [ TABLE_incompat_sys Str1 [Serv] [Cap] [Desc] [Req] [Enable] ] [Dynamic] ]

Syntax Description

show

Show running system information

incompatibility

Show incompatible configurations

nxos

show incompatibilities with an image

uri0

Type: uri

Enter image uri

__readonly__

TABLE_incompat_sys

Show incompatibility system table

Str1

Type: string

Serv

Type: string

Cap

Type: string

Desc

Type: string

Req

Type: string

Enable

Type: string

Dynamic

Type: string

Command Modes

- /exec

show install active

show install active [on-reload] [ __readonly__ curr_kickstart_image curr_system_image [ TABLE_smu_list install_smu_id+ ] [ TABLE_module_list install_modno [ TABLE_module_smu_list install_module_smu_id ] ] ]

Syntax Description

show

Show running system information

install

Install related show commands

active

Active packages

on-reload

Activated on next reload

__readonly__

TABLE_smu_list

curr_kickstart_image

Type: string

curr_system_image

Type: string

install_smu_id

Type: string

TABLE_module_list

install_modno

Type: uinteger

TABLE_module_smu_list

install_module_smu_id

Type: string

Command Modes

- /exec

show install all failed-standby

show install all failed-standby [ __readonly__ [ TABLE_installFailStandby Str1 ] ]

Syntax Description

show

Show running system information

install

Show the software install impact between two images

all

Show install all information

failed-standby

show log from failed standby

__readonly__

TABLE_installFailStandby

Install failed-standby table

Str1

Type: string

Command Modes

- /exec

show install all failure-reason

show install all failure-reason [ __readonly__ [ TABLE_installFailReason installFailReasonStr ] ]

Syntax Description

show

Show running system information

install

Show the software install impact between two images

all

show install all information

failure-reason

Show failure reason for the last install all

__readonly__

TABLE_installFailReason

Install failure-reason table

installFailReasonStr

Type: string

Command Modes

- /exec

show install all impact

show install all impact [ nxos uri ] +

Syntax Description

show

Show running system information

install

Show the software install impact between two images

all

show install all information

impact

show impact of the install all command

nxos

boot-variable name

uri

Type: uri

Enter image uri

Command Modes

- /exec

show install all impact epld

show install all impact epld uri1

Syntax Description

show

Show running system information

install

Show the software install status

all

show install all information

impact

show impact of the install all epld command

epld

Show EPLD install information

uri1

Type: uri

Local URI containing EPLD Image

Command Modes

- /exec

show install all status

show install all status

Syntax Description

show

Show running system information

install

Show the software install impact between two images

all

show install all information

status

show status of the current or last install all

Command Modes

- /exec

show install committed

show install committed [ __readonly__ curr_kickstart_image curr_system_image [ TABLE_smu_list install_smu_id+ ] ]

Syntax Description

show

Show running system information

install

Install related show commands

committed

Committed packages

__readonly__

TABLE_smu_list

curr_kickstart_image

Type: string

curr_system_image

Type: string

install_smu_id

Type: string

Command Modes

- /exec

show install epld status

show install epld status

Syntax Description

show

Show running system information

install

Show the software install status

epld

Show EPLD install information

status

Show status of previous EPLD upgrades

Command Modes

- /exec

show install impact (sysmgr_upgradecli)

show install impact uri0 uri1

Syntax Description

show

Show running system information

install

Show the software install impact between two images

impact

impact system_uri {active_system_uri/active_kickstart_uri}

uri0

Type: uri

Enter system URI

uri1

Type: uri

Enter active URI

Command Modes

- /exec

show install impact (sysmgr_upgradecli)

show install impact uri0

Syntax Description

show

Show running system information

install

Show the software install impact between two images

impact

impact system_uri {active_system_uri/active_kickstart_uri}

uri0

Type: uri

Enter system URI

Command Modes

- /exec

show install impact detail

show install impact uri0 detail

Syntax Description

show

Show running system information

install

Show the software install impact between two images

impact

impact system_uri {active_system_uri/active_kickstart_uri}

uri0

Type: uri

Enter system URI

detail

Show detailed install impact of given system image

Command Modes

- /exec

show install inactive

show install inactive [on-reload] [ __readonly__ curr_kickstart_image curr_system_image [ TABLE_smu_list install_smu_id+ ] ]

Syntax Description

show

Show running system information

install

Install related show commands

inactive

Inactive packages

on-reload

Dectivated on next reload

__readonly__

TABLE_smu_list

curr_kickstart_image

Type: string

curr_system_image

Type: string

install_smu_id

Type: string

Command Modes

- /exec

show install log

show install log { [ id | from id1 ] [detail] [reverse] | [last] } [ __readonly__ current_time curr_time [ TABLE_show_log_output install_id install_user install_time [install_op] [ [ install_add_package install_add_via [install_add_server] ] [install_add_log_entry] + ] [ [install_remove_status] [install_remove_filename] [install_remove_log_entry] + ] [ [install_activate_filename] [install_activate_log_entry] + ] [ [install_commit_filename] [install_commit_log_entry] + ] [ [install_deactivate_filename] [install_deactivate_log_entry] + ] ] ]

Syntax Description

show

Show running system information

install

Install related show commands

log

log

id

Type: integer

Install Identifies

from

Starting at this install identifier

id1

Type: integer

Install Identifier

detail

Detailed information including impacted processes

reverse

Displays the logs in reverse order

last

Display the logs for last install operation

__readonly__

current_time

current time

curr_time

Type: string

TABLE_show_log_output

install_id

Type: uinteger

installation operation id

install_user

Type: string

install_time

Type: string

install_op

add  value: 101

remove  value: 102

commit  value: 103

activate  value: 104

deactivate  value: 105

install_add_package

Type: string

install_add_via

Type: string

install_add_server

Type: string

install_add_log_entry

Type: string

install_remove_status

Type: string

install_remove_filename

Type: string

install_remove_log_entry

Type: string

install_activate_filename

Type: string

install_activate_log_entry

Type: string

install_commit_filename

Type: string

install_commit_log_entry

Type: string

install_deactivate_filename

Type: string

install_deactivate_log_entry

Type: string

Command Modes

- /exec

show install packages

show install packages [ __readonly__ curr_kickstart_image curr_system_image [ TABLE_smu_list install_smu_id install_smu_state [ TABLE_module_list install_modno install_mod_smu_state ] ] ]

Syntax Description

show

Show running system information

install

Install related show commands

packages

All packages

__readonly__

TABLE_smu_list

curr_kickstart_image

Type: string

curr_system_image

Type: string

install_smu_id

Type: string

install_smu_state

Type: string

TABLE_module_list

install_modno

Type: uinteger

install_mod_smu_state

Type: string

Command Modes

- /exec

show install pkg-info

show install pkg-info pname [ __readonly__ image_full_name expiry_date uncompressed_size vendor description build_time build_source platform supersedes+ superseded_by+ prerequisite+ restart_information+ pre_activate_scripts+ post_activate_scripts+ pre_deactivate_scripts+ post_deactivate_scripts+ ]

Syntax Description

show

Show running system information

install

Install related show commands

pkg-info

Show package info

pname

Type: string

length: 256

Package Name

__readonly__

image_full_name

Type: string

expiry_date

Type: string

uncompressed_size

Type: uinteger

vendor

Type: string

description

Type: string

build_time

Type: string

build_source

Type: string

platform

Type: string

supersedes

Type: string

superseded_by

Type: string

prerequisite

Type: string

restart_information

Type: string

pre_activate_scripts

Type: string

post_activate_scripts

Type: string

pre_deactivate_scripts

Type: string

post_deactivate_scripts

Type: string

Command Modes

- /exec

show install request

show install request [ __readonly__ curr_time [ operation user percent_complete [ module_percent_complete module_number ] + ] [none] ]

Syntax Description

show

Show running system information

install

Install related show commands

request

Last installation operation

__readonly__

curr_time

Type: string

operation

Type: string

user

Type: string

percent_complete

Type: uinteger

module_percent_complete

Type: uinteger

module_number

Type: uinteger

none

Type: string

Command Modes

- /exec

show interface (if_manager)

show interface ifid [brief] [ __readonly__ TABLE_interface interface [desc] [svi_if_index] [svi_admin_state] [svi_rsn_desc] [svi_line_proto] [svi_hw] [svi_mac] [svi_desc] [svi_ip_addr] [svi_ip_mask] [svi_mtu] [svi_bw] [svi_delay] [svi_tx_load] [svi_rx_load] [svi_carrier_delay_sec] [svi_carrier_delay_msec] [svi_arp_type] [svi_arp_timeout] [svi_time_last_cleared] [TABLE_sec_vlan] [sec_vlan] [sec_vlan_type] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_l3avg2_inbytes] [eth_l3avg2_inpkts] [eth_l3avg2_outbytes] [eth_l3avg2_outpkts] [eth_l3avg3_inbytes] [eth_l3avg3_inpkts] [eth_l3avg3_outbytes] [eth_l3avg3_outpkts] [eth_inpkts] [eth_inbytes] [eth_nobuf] [eth_inbcast] [eth_inmcast] [eth_inucast] [eth_ingiants] [eth_ipmcast] [eth_inhw_switched] [eth_insw_switched] [eth_runts] [eth_storm_supp] [eth_throtles] [eth_inerr] [eth_crc] [eth_ecc] [eth_frame] [eth_overrun] [eth_ignored] [eth_watchdog] [eth_outbcast] [eth_outmcast] [eth_outucast] [eth_outgiants] [eth_inpause] [eth_dribble] [eth_in_ifdown_drops] [eth_bad_eth] [eth_bad_proto] [eth_outpkts] [eth_outbytes] [eth_underrun] [eth_outhw_switched] [eth_outsw_switched] [eth_outerr] [eth_coll] [eth_resets] [eth_babbles] [eth_latecoll] [eth_deferred] [eth_lostcarrier] [eth_nocarrier] [eth_outpause] [eth_buffail] [eth_bufswapped] [eth_arpdrops] [eth_out_ifdown_drops] [eth_single_coll] [eth_multi_coll] [eth_excess_coll] [eth_jabbers] [eth_shortframe] [eth_indiscard] [eth_bad_encap] [eth_outcrc] [eth_symbol] [eth_out_drops] [eth_sqetest] [eth_inb64] [eth_inb65_127] [eth_inb128_255] [eth_inb256_511] [eth_inb512_1023] [eth_inb1024_1518] [eth_inb1519_1548] [eth_intrunk] [eth_outb64] [eth_outb65_127] [eth_outb128_255] [eth_outb256_511] [eth_outb512_1023] [eth_outb1024_1518] [eth_outb1519_1548] [eth_outtrunk] [eth_bpdu_outlost] [eth_cos0_outlost] [eth_cos1_outlost] [eth_cos2_outlost] [eth_cos3_outlost] [eth_cos4_outlost] [eth_cos5_outlost] [eth_cos6_outlost] [eth_cos7_outlost] [eth_fcoe_in_pkts] [eth_fcoe_in_octets] [eth_fcoe_out_pkts] [eth_fcoe_out_octets] [eth_nfcoe_in_pkts] [eth_nfcoe_in_octets] [eth_nfcoe_out_pkts] [eth_nfcoe_out_octets] [eth_eee_atx_lpi_msec] [eth_eee_arcv_lpi_msec] [eth_eee_atx_lpi_transitions] [eth_eee_arcv_lpi_transitions] [eth_phy_ber_count] [eth_phy_errblks_count] [svi_routed_pkts_in] [svi_routed_bytes_in] [svi_routed_pkts_out] [svi_routed_bytes_out] [svi_ucast_pkts_in] [svi_ucast_bytes_in] [svi_mcast_pkts_in] [svi_mcast_bytes_in] [svi_ucast_pkts_out] [svi_ucast_bytes_out] [svi_mcast_pkts_out] [svi_mcast_bytes_out] [svi_ipv4_ucast_pkts_in] [svi_ipv4_ucast_bytes_in] [svi_ipv4_ucast_pkts_out] [svi_ipv4_ucast_bytes_out] [svi_ipv4_mcast_pkts_in] [svi_ipv4_mcast_bytes_in] [svi_ipv4_mcast_pkts_out] [svi_ipv4_mcast_bytes_out] [svi_ipv6_ucast_pkts_in] [svi_ipv6_ucast_bytes_in] [svi_ipv6_ucast_pkts_out] [svi_ipv6_ucast_bytes_out] [svi_ipv6_mcast_pkts_in] [svi_ipv6_mcast_bytes_in] [svi_ipv6_mcast_pkts_out] [svi_ipv6_mcast_bytes_out] [svi_average_input_bits] [svi_average_input_packets] [svi_average_output_bits] [svi_average_output_packets] [svi_rate_in_mins] [svi_reliability] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid

Type: interface-mrange

Enter interface type and number in module/slot format

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

desc

Type: string

Interface description

svi_if_index

Type: interface

Interface

svi_admin_state

up  value: 0

down  value: 1

administratively down  value: 2

type not supported  value: 3

svi_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

svi_line_proto

up  value: 0

down  value: 1

svi_hw

Type: string

length: 32

Hardware

svi_mac

Type: string

length: 32

Address

svi_desc

Type: string

Interface Description

svi_ip_addr

Type: ipaddr

IP Address

svi_ip_mask

Type: uinteger

IP address mask

svi_mtu

Type: uinteger

MTU size in bytes

svi_bw

Type: uinteger

Bandwidth in kilobits

svi_delay

Type: uinteger

Throughput delay (tens of microseconds)

svi_tx_load

Type: uinteger

Tx Load

svi_rx_load

Type: uinteger

Rx Load

svi_carrier_delay_sec

Type: uinteger

carrier delay value in seconds

svi_carrier_delay_msec

Type: uinteger

carrier delay value in milli-seconds

svi_arp_type

Type: string

ARP type

svi_arp_timeout

Type: string

ARP timeout value

svi_time_last_cleared

Type: string

Time last cleared

TABLE_sec_vlan

secondary vlans

sec_vlan

Type: vlan

vlan id

sec_vlan_type

Type: string

secondary vlan type

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

IPv4 L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

IPv4 L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

IPv4 L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

IPv4 L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

IPv4 L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

IPv4 L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

IPv4 L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

IPv4 L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_l3avg2_inbytes

Type: longlong

Load interval 2 L3 average in switched bytes

eth_l3avg2_inpkts

Type: longlong

Load interval 2 L3 average in switched pkts

eth_l3avg2_outbytes

Type: longlong

Load interval 2 L3 average out switched bytes

eth_l3avg2_outpkts

Type: longlong

Load interval 2 L3 average out switched pkts

eth_l3avg3_inbytes

Type: longlong

Load interval 3 L3 average in switched bytes

eth_l3avg3_inpkts

Type: longlong

Load interval 3 L3 average in switched pkts

eth_l3avg3_outbytes

Type: longlong

Load interval 3 L3 average out switched bytes

eth_l3avg3_outpkts

Type: longlong

Load interval 3 L3 average out switched pkts

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_nobuf

Type: longlong

No buffer received

eth_inbcast

Type: longlong

Broadcasts

eth_inmcast

Type: longlong

Multicasts

eth_inucast

Type: longlong

Unicasts

eth_ingiants

Type: longlong

giants

eth_ipmcast

Type: longlong

IP multicast

eth_inhw_switched

Type: longlong

Input H/W Switched

eth_insw_switched

Type: longlong

Input S/W Switched

eth_runts

Type: longlong

runts

eth_storm_supp

Type: longlong

storm suppression

eth_throtles

Type: longlong

throttles

eth_inerr

Type: longlong

input errors

eth_crc

Type: longlong

CRC

eth_ecc

Type: longlong

ECC

eth_frame

Type: longlong

frame

eth_overrun

Type: longlong

overrun

eth_ignored

Type: longlong

ignored

eth_watchdog

Type: longlong

watchdog

eth_outbcast

Type: longlong

Broadcasts

eth_outmcast

Type: longlong

Multicasts

eth_outucast

Type: longlong

Unicasts

eth_outgiants

Type: longlong

giants

eth_inpause

Type: longlong

pause input

eth_dribble

Type: longlong

input packets with dribble condition

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_outpkts

Type: longlong

packets output

eth_outbytes

Type: longlong

bytes output

eth_underrun

Type: longlong

underruns

eth_outhw_switched

Type: longlong

Out H/W Switched

eth_outsw_switched

Type: longlong

Out S/W Switched

eth_outerr

Type: longlong

output errors

eth_coll

Type: longlong

collisions

eth_resets

Type: longlong

interface resets

eth_babbles

Type: longlong

babbles

eth_latecoll

Type: longlong

late collision

eth_deferred

Type: longlong

deferred

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_outpause

Type: longlong

PAUSE output

eth_buffail

Type: longlong

output buffer failures

eth_bufswapped

Type: longlong

output buffers swapped out

eth_arpdrops

Type: longlong

arp drops

eth_out_ifdown_drops

Type: longlong

Output if-down drops

eth_single_coll

Type: longlong

single collisions

eth_multi_coll

Type: longlong

multi collisions

eth_excess_coll

Type: longlong

excessive collisions

eth_jabbers

Type: longlong

jabbers

eth_shortframe

Type: longlong

short frames

eth_indiscard

Type: longlong

discards

eth_bad_encap

Type: longlong

bad encapsulation

eth_outcrc

Type: longlong

Output CRC

eth_symbol

Type: longlong

symbol errors

eth_out_drops

Type: longlong

output drops

eth_sqetest

Type: longlong

SQE test

eth_inb64

Type: longlong

input pkts between 0 and 64 bytes

eth_inb65_127

Type: longlong

input pkts between 65 and 127 bytes

eth_inb128_255

Type: longlong

input pkts between 128 and 255 bytes

eth_inb256_511

Type: longlong

input pkts between 256 and 511 bytes

eth_inb512_1023

Type: longlong

input pkts between 512 and 1023 bytes

eth_inb1024_1518

Type: longlong

input pkts between 1024 and 1518 bytes

eth_inb1519_1548

Type: longlong

input pkts between 1519 and 1548 bytes

eth_intrunk

Type: longlong

input trunk pkts

eth_outb64

Type: longlong

output pkts between 0 and 64 bytes

eth_outb65_127

Type: longlong

output pkts between 65 and 127 bytes

eth_outb128_255

Type: longlong

output pkts between 128 and 255 bytes

eth_outb256_511

Type: longlong

output pkts between 256 and 511 bytes

eth_outb512_1023

Type: longlong

output pkts between 512 and 1023 bytes

eth_outb1024_1518

Type: longlong

output pkts between 1024 and 1518 bytes

eth_outb1519_1548

Type: longlong

output pkts between 1519 and 1548 bytes

eth_outtrunk

Type: longlong

output trunk pkts

eth_bpdu_outlost

Type: longlong

BPDU output lost

eth_cos0_outlost

Type: longlong

output pkts

eth_cos1_outlost

Type: longlong

output pkts

eth_cos2_outlost

Type: longlong

output pkts

eth_cos3_outlost

Type: longlong

output pkts

eth_cos4_outlost

Type: longlong

output pkts

eth_cos5_outlost

Type: longlong

output pkts

eth_cos6_outlost

Type: longlong

output pkts

eth_cos7_outlost

Type: longlong

output pkts

eth_fcoe_in_pkts

Type: longlong

fcoe in pkts

eth_fcoe_in_octets

Type: longlong

fcoe in octets

eth_fcoe_out_pkts

Type: longlong

fcoe out pkts

eth_fcoe_out_octets

Type: longlong

fcoe out octets

eth_nfcoe_in_pkts

Type: longlong

nfcoe in pkts

eth_nfcoe_in_octets

Type: longlong

nfcoe in octets

eth_nfcoe_out_pkts

Type: longlong

nfcoe out pkts

eth_nfcoe_out_octets

Type: longlong

nfcoe out octets

eth_eee_atx_lpi_msec

Type: longlong

Tx Lpi usec

eth_eee_arcv_lpi_msec

Type: longlong

Rx Lpi usec

eth_eee_atx_lpi_transitions

Type: longlong

Tx Lpi requests

eth_eee_arcv_lpi_transitions

Type: longlong

Rx Lpi indications

eth_phy_ber_count

Type: longlong

Bit error rate counter

eth_phy_errblks_count

Type: longlong

Errored blocks counter

svi_routed_pkts_in

Type: long

in routed pkts

svi_routed_bytes_in

Type: long

in routed bytes

svi_routed_pkts_out

Type: long

out routed pkts

svi_routed_bytes_out

Type: long

out routed bytes

svi_ucast_pkts_in

Type: long

in unicast pkts

svi_ucast_bytes_in

Type: long

in unicast bytes

svi_mcast_pkts_in

Type: long

in multicast pkts

svi_mcast_bytes_in

Type: long

in multicast bytes

svi_ucast_pkts_out

Type: long

out unicast pkts

svi_ucast_bytes_out

Type: long

out unicast bytes

svi_mcast_pkts_out

Type: long

out multicast pkts

svi_mcast_bytes_out

Type: long

out multicast bytes

svi_ipv4_ucast_pkts_in

Type: long

IPv4 in unicast pkts

svi_ipv4_ucast_bytes_in

Type: long

IPv4 in unicast bytes

svi_ipv4_ucast_pkts_out

Type: long

IPv4 out unicast pkts

svi_ipv4_ucast_bytes_out

Type: long

IPv4 out unicast bytes

svi_ipv4_mcast_pkts_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_bytes_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_pkts_out

Type: long

IPv4 out multicast pkts

svi_ipv4_mcast_bytes_out

Type: long

IPv4 out multicast bytes

svi_ipv6_ucast_pkts_in

Type: long

IPv6 in unicast pkts

svi_ipv6_ucast_bytes_in

Type: long

IPv6 in unicast bytes

svi_ipv6_ucast_pkts_out

Type: long

IPv6 out unicast pkts

svi_ipv6_ucast_bytes_out

Type: long

IPv6 out unicast bytes

svi_ipv6_mcast_pkts_in

Type: long

IPv6 in multicast pkts

svi_ipv6_mcast_bytes_in

Type: long

IPv6 in multicast bytes

svi_ipv6_mcast_pkts_out

Type: long

IPv6 out multicast pkts

svi_ipv6_mcast_bytes_out

Type: long

IPv6 out multicast bytes

svi_average_input_bits

Type: long

Input rate bits/sec

svi_average_input_packets

Type: long

Input rate bits/sec

svi_average_output_bits

Type: long

Output rate bits/sec

svi_average_output_packets

Type: long

Output rate bits/sec

svi_rate_in_mins

Type: long

Time in mins for which average rate is computed

svi_reliability

Type: uinteger

Reliability

Command Modes

- /exec

show interface (if_manager)

show interface ifeth [ __readonly__ TABLE_interface interface state [state_rsn_desc] [state_rsn] [eth_rsn_fac] [eth_rsn_code] [admin_state] [share_state] [parent_interface] [vpc_status] [eth_bundle] [eth_hw_desc] [eth_hw_addr] [eth_bia_addr] [desc] [eth_ip_addr] [eth_ip_mask] [eth_ip_prefix] [eth_mtu] [eth_bw] [eth_dly] [eth_reliability] [eth_txload] [eth_rxload] [eth_encap_vlan] [medium] [eth_mode] [eth_duplex] [eth_speed] [eth_media] [eth_beacon] [eth_autoneg] [eth_in_flowctrl] [eth_out_flowctrl] [eth_mdix] [eth_ratemode] [eth_swt_monitor] [eth_ethertype] [eth_eee_state] [eth_members] [eth_link_flapped] [eth_clear_counters] [eth_reset_cntr] [eth_load_interval1] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_inpkts] [eth_inbytes] [eth_jumbo_inpkts] [eth_storm_supp] [eth_runts] [eth_giants] [eth_crc] [eth_nobuf] [eth_inerr] [eth_frame] [eth_overrun] [eth_underrun] [eth_ignored] [eth_watchdog] [eth_bad_eth] [eth_bad_proto] [eth_in_ifdown_drops] [eth_dribble] [eth_indiscard] [eth_inpause] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_outpkts] [eth_outbytes] [eth_jumbo_outpkts] [eth_outerr] [eth_coll] [eth_deferred] [eth_latecoll] [eth_lostcarrier] [eth_nocarrier] [eth_babbles] [eth_outdiscard] [eth_outpause] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth

Type: interface-mrange

Enter interface type and number in module/slot format

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

eth_rsn_fac

Type: string

State reason facility

eth_rsn_code

Type: string

State reason code

admin_state

Type: string

admin state

share_state

Interface ownership

Dedicated  value: 0x00

state is owned
Shared  value: 0x01

state is shared
Dedicated(Shared)  value: 0x02

state is owned

parent_interface

Type: interface

parent interface

vpc_status

Type: string

VPC status

eth_bundle

Type: string

Belongs to bundle

eth_hw_desc

Type: string

HW description

eth_hw_addr

Type: ethernet

HW address

eth_bia_addr

Type: ethernet

bia address

desc

Type: string

Interface description

eth_ip_addr

Type: ipaddr

IP Address

eth_ip_mask

Type: uinteger

IP address mask

eth_ip_prefix

Type: string

IP address prefix

eth_mtu

Type: string

MTU

eth_bw

Type: uinteger

Bandwidth

eth_dly

Type: uinteger

Delay

eth_reliability

Type: string

Reliability

eth_txload

Type: string

Tx load

eth_rxload

Type: string

Rx load

eth_encap_vlan

Type: uinteger

Encapsulation Vlan

medium

Type: string

medium type

eth_mode

Port mode

access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
Private-vlan host  value: 0x00400000

PVLAN host
Private-vlan promiscuous  value: 0x00800000

PVLAN promiscuous
Private-vlan trunk promiscuous  value: 0x10000000

PVLAN trunk promiscuous
Private-vlan trunk secondary  value: 0x20000000

PVLAN_trunk_secondary
fex-fabric  value: 0x02000000

FEX fabric
dot1q-tunnel  value: 0x01000000

1qTunl
FabricPath  value: 0x00100003

FabricPath

eth_duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

eth_speed

Speed

auto-speed  value: 0

Auto
10 Mb/s  value: 10

10Mb/s
100 Mb/s  value: 100

100Mb/s
auto-speed 10-100  value: 110

Auto 10-100Mb/s
1000 Mb/s  value: 1000

1Gb/s
10 Gb/s  value: 10000

10Gb/s
40 Gb/s  value: 40000

40Gb/s
100 Gb/s  value: 100000

100Gb/s

eth_media

Type: string

Media type

eth_beacon

Beacon

on  value: 1

On
off  value: 2

Off

eth_autoneg

Autonegotiation

off  value: 2

Off
on  value: 1

On

eth_in_flowctrl

Input flowcontrol

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

eth_out_flowctrl

Output flowcontrol

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

eth_mdix

Mdix

off  value: 0

Off
on  value: 1

On

eth_ratemode

Rate mode

dedicated  value: 1

rate mode is dedicated
shared  value: 2

rate mode is shared

eth_swt_monitor

Switchport Monitor

off  value: 0

Off
on  value: 1

On
on, forwarding is on  value: 2

Forward On
on, forwarding is on, learning is on  value: 3

Learn On

eth_ethertype

Type: string

EtherType

eth_eee_state

Type: string

EEE state

eth_members

Type: string

Members in this channel

eth_link_flapped

Type: string

Last link flapped

eth_clear_counters

Type: string

Last clearing of show interface counters

eth_reset_cntr

Type: uinteger

Interface resets

eth_load_interval1

Type: uinteger

interval 1 timer value in sec

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_jumbo_inpkts

Type: longlong

Incoming jumbo pkts

eth_storm_supp

Type: longlong

storm suppression

eth_runts

Type: longlong

runts

eth_giants

Type: longlong

giants

eth_crc

Type: longlong

CRC

eth_nobuf

Type: longlong

No buffer received

eth_inerr

Type: longlong

input errors

eth_frame

Type: longlong

frame

eth_overrun

Type: longlong

overrun

eth_underrun

Type: longlong

underruns

eth_ignored

Type: longlong

ignored

eth_watchdog

Type: longlong

watchdog

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_dribble

Type: longlong

input packets with dribble condition

eth_indiscard

Type: longlong

discards

eth_inpause

Type: longlong

pause input

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

packets output

eth_outbytes

Type: longlong

bytes output

eth_jumbo_outpkts

Type: longlong

Outgoing jumbo pkts

eth_outerr

Type: longlong

output errors

eth_coll

Type: longlong

collisions

eth_deferred

Type: longlong

deferred

eth_latecoll

Type: longlong

late collision

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_babbles

Type: longlong

babbles

eth_outdiscard

Type: longlong

output discard

eth_outpause

Type: longlong

PAUSE output

Command Modes

- /exec

show interface (if_manager)

show interface ifmgmt [ __readonly__ TABLE_interface interface state [state_rsn_desc] [state_rsn] [eth_rsn_fac] [eth_rsn_code] [share_state] [eth_bundle] [eth_dce_mode] [vpc_status] [eth_hw_desc] [eth_hw_addr] [eth_bia_addr] [desc] [eth_ip_addr] [eth_ip_mask] [eth_ip_prefix] [eth_mtu] [eth_bw] [eth_encap_vlan] [eth_dly] [eth_reliability] [eth_txload] [eth_rxload] [eth_loopback] [eth_keepalive] [eth_duplex] [eth_speed] [eth_mode] [eth_ratemode] [eth_autoneg] [eth_beacon] [eth_media] [eth_in_flowctrl] [eth_out_flowctrl] [eth_mdix] [eth_swt_monitor] [eth_ethertype] [eth_members] [eth_clk_mode] [eth_arp_type] [eth_arp_timeout] [eth_last_in] [eth_last_out] [eth_out_hang] [eth_clear_counters] [eth_link_flapped] [eth_inq_size] [eth_inq_max] [eth_inq_drops] [eth_inq_flush] [eth_out_drop] [eth_q_strategy] [eth_outq_size] [eth_outq_max] [eth_reset_cntr] [mgmt_hw_desc] [mgmt_hw_addr] [mgmt_ip_addr] [mgmt_ip_mask] [mgmt_mtu] [mgmt_speed] [mgmt_duplex] [vdc_lvl_in_avg_bits] [vdc_lvl_in_avg_pkts] [vdc_lvl_out_avg_bits] [vdc_lvl_out_avg_pkts] [vdc_lvl_in_pkts] [vdc_lvl_in_ucast] [vdc_lvl_in_mcast] [vdc_lvl_in_bcast] [vdc_lvl_in_bytes] [vdc_lvl_in_bps] [vdc_lvl_in_pps] [vdc_lvl_out_pkts] [vdc_lvl_out_ucast] [vdc_lvl_out_mcast] [vdc_lvl_out_bcast] [vdc_lvl_out_bytes] [vdc_lvl_out_bps] [vdc_lvl_out_pps] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifmgmt

Type: interface-mrange

Enter interface type and number in module/slot format

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

eth_rsn_fac

Type: string

State reason facility

eth_rsn_code

Type: string

State reason code

share_state

Interface ownership

Dedicated  value: 0x00

state is owned
Shared  value: 0x01

state is shared
Dedicated(Shared)  value: 0x02

state is owned

eth_bundle

Type: string

Belongs to bundle

eth_dce_mode

Type: string

DCE mode description

vpc_status

Type: string

VPC status

eth_hw_desc

Type: string

HW description

eth_hw_addr

Type: ethernet

HW address

eth_bia_addr

Type: ethernet

bia address

desc

Type: string

Interface description

eth_ip_addr

Type: ipaddr

IP Address

eth_ip_mask

Type: uinteger

IP address mask

eth_ip_prefix

Type: string

IP address prefix

eth_mtu

Type: string

MTU

eth_bw

Type: uinteger

Bandwidth

eth_encap_vlan

Type: uinteger

Encapsulation Vlan

eth_dly

Type: uinteger

Delay

eth_reliability

Type: string

Reliability

eth_txload

Type: string

Tx load

eth_rxload

Type: string

Rx load

eth_loopback

Loopback

notset  value: 0x0

not set
line  value: 0x1

line
mac  value: 0x2

mac
ext  value: 0x3

external

eth_keepalive

Type: uinteger

Keepalive

eth_duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

eth_speed

Speed

auto-speed  value: 0

Auto
10 Mb/s  value: 10

10Mb/s
100 Mb/s  value: 100

100Mb/s
auto-speed 10-100  value: 110

Auto 10-100Mb/s
1000 Mb/s  value: 1000

1Gb/s
10 Gb/s  value: 10000

10Gb/s
40 Gb/s  value: 40000

40Gb/s
100 Gb/s  value: 100000

100Gb/s

eth_mode

Port mode

access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
Private-vlan host  value: 0x00400000

PVLAN host
Private-vlan promiscuous  value: 0x00800000

PVLAN promiscuous
Private-vlan trunk promiscuous  value: 0x10000000

PVLAN trunk promiscuous
Private-vlan trunk secondary  value: 0x20000000

PVLAN_trunk_secondary
fex-fabric  value: 0x02000000

FEX fabric
dot1q-tunnel  value: 0x01000000

1qTunl
FabricPath  value: 0x00100003

FabricPath

eth_ratemode

Rate mode

dedicated  value: 1

rate mode is dedicated
shared  value: 2

rate mode is shared

eth_autoneg

Autonegotiation

off  value: 2

Off
on  value: 1

On

eth_beacon

Beacon

on  value: 1

On
off  value: 2

Off

eth_media

Type: string

Media type

eth_in_flowctrl

Input flowcontrol

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

eth_out_flowctrl

Output flowcontrol

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

eth_mdix

Mdix

off  value: 0

Off
on  value: 1

On

eth_swt_monitor

Switchport Monitor

off  value: 0

Off
on  value: 1

On
on, forwarding is on  value: 2

Forward On
on, forwarding is on, learning is on  value: 3

Learn On

eth_ethertype

Type: string

EtherType

eth_members

Type: string

Members in this channel

eth_clk_mode

Type: string

Clock mode

eth_arp_type

Type: string

ARP type

eth_arp_timeout

Type: string

ARP timeout

eth_last_in

Type: string

Last input

eth_last_out

Type: string

Last output

eth_out_hang

Type: string

Last output hang

eth_clear_counters

Type: string

Last clearing of show interface counters

eth_link_flapped

Type: string

Last link flapped

eth_inq_size

Type: uinteger

Input queue size

eth_inq_max

Type: uinteger

Input queue max

eth_inq_drops

Type: uinteger

Input queue drops

eth_inq_flush

Type: uinteger

Input queue flushes

eth_out_drop

Type: uinteger

Output drops

eth_q_strategy

Type: string

Queueing strategy

eth_outq_size

Type: uinteger

Output queue size

eth_outq_max

Type: uinteger

Output queue max

eth_reset_cntr

Type: uinteger

Interface resets

mgmt_hw_desc

Type: string

HW description

mgmt_hw_addr

Type: ethernet

HW address

mgmt_ip_addr

Type: ipaddr

IP address

mgmt_ip_mask

Type: ipaddr

IP address mask

mgmt_mtu

Type: uinteger

MTU

mgmt_speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

mgmt_duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

vdc_lvl_in_avg_bits

Type: longlong

VDC level average input bits

vdc_lvl_in_avg_pkts

Type: longlong

VDC level average input packets

vdc_lvl_out_avg_bits

Type: longlong

VDC level average output bits

vdc_lvl_out_avg_pkts

Type: longlong

VDC level average output packets

vdc_lvl_in_pkts

Type: longlong

VDC level input packets

vdc_lvl_in_ucast

Type: longlong

VDC level input unicast packets

vdc_lvl_in_mcast

Type: longlong

VDC level input multicast packets

vdc_lvl_in_bcast

Type: longlong

VDC level input broadcast packets

vdc_lvl_in_bytes

Type: longlong

VDC level input bytes

vdc_lvl_in_bps

Type: longlong

VDC level input bytes per second

vdc_lvl_in_pps

Type: longlong

VDC level input packets per second

vdc_lvl_out_pkts

Type: longlong

VDC level output packets

vdc_lvl_out_ucast

Type: longlong

VDC level output unicast packets

vdc_lvl_out_mcast

Type: longlong

VDC level output multicast packets

vdc_lvl_out_bcast

Type: longlong

VDC level output broadcast packets

vdc_lvl_out_bytes

Type: longlong

VDC level output bytes

vdc_lvl_out_bps

Type: longlong

VDC level output bytes per second

vdc_lvl_out_pps

Type: longlong

VDC level output packets per second

Command Modes

- /exec

show interface (if_manager)

show interface ifrange [ __readonly__ TABLE_interface interface state state_rsn state_rsn_desc desc [overlay_addr] [overlay_addr_mask] [overlay_mtu] [overlay_bandwidth] [overlay_encap_str] [overlay_vrf] [overlay_src_addr] [overlay_dst_addr] [overlay_last_link_flap] [overlay_clear_counters] [overlay_load_interval] [overlay_rx_ucastpkts] [overlay_rx_ucastbytes] [overlay_rx_mcastpkts] [overlay_rx_mcastbytes] [overlay_rx_pkts] [overlay_rx_bytes] [overlay_rx_bcastpkts] [overlay_rx_bcastbytes] [overlay_rx_bitrate] [overlay_rx_pktrate] [overlay_tx_ucastpkts] [overlay_tx_ucastbytes] [overlay_tx_mcastpkts] [overlay_tx_mcastbytes] [overlay_tx_bcastpkts] [overlay_tx_bcastbytes] [overlay_tx_pkts] [overlay_tx_bytes] [overlay_tx_bitrate] [overlay_tx_pktrate] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifrange

Type: interface-mrange

Enter interface type and number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

desc

Type: string

Interface description

overlay_addr

Type: ipaddr

Overlay address

overlay_addr_mask

Type: uinteger

Overlay address mask

overlay_mtu

Type: uinteger

MTU

overlay_bandwidth

Type: uinteger

Bandwidth

overlay_encap_str

Type: string

Encap type

overlay_vrf

Type: string

VRF

overlay_src_addr

Type: ipaddr

Source address

overlay_dst_addr

Type: ipaddr

Destination address

overlay_last_link_flap

Type: string

Last link flap

overlay_clear_counters

Type: string

Last clearing of show interface counters

overlay_load_interval

Type: uinteger

Load interval

overlay_rx_ucastpkts

Type: longlong

Received ucast pkts

overlay_rx_ucastbytes

Type: longlong

Received ucast bytes

overlay_rx_mcastpkts

Type: longlong

Received mcast pkts

overlay_rx_mcastbytes

Type: longlong

Received mcast bytes

overlay_rx_bcastpkts

Type: longlong

Received bcast pkts

overlay_rx_bcastbytes

Type: longlong

Received bcast bytes

overlay_rx_pkts

Type: longlong

Total received pkts

overlay_rx_bytes

Type: longlong

Total received bytes

overlay_rx_bitrate

Type: longlong

Receive bit rate

overlay_rx_pktrate

Type: longlong

Receive pkt rate

overlay_tx_ucastpkts

Type: longlong

Trasnmitted ucast pkts

overlay_tx_ucastbytes

Type: longlong

Trasnmitted ucast bytes

overlay_tx_mcastpkts

Type: longlong

Trasnmitted mcast pkts

overlay_tx_mcastbytes

Type: longlong

Trasnmitted mcast bytes

overlay_tx_bcastpkts

Type: longlong

Trasnmitted bcast pkts

overlay_tx_bcastbytes

Type: longlong

Trasnmitted bcast bytes

overlay_tx_pkts

Type: longlong

Total transmitted pkts

overlay_tx_bytes

Type: longlong

Total transmitted bytes

overlay_tx_bitrate

Type: longlong

Transmit bit rate

overlay_tx_pktrate

Type: longlong

Transmit pkt rate

Command Modes

- /exec

show interface (if_manager)

show interface [ __readonly__ TABLE_interface interface [state] [state_rsn_desc] [state_rsn] [eth_rsn_fac] [eth_rsn_code] [admin_state] [share_state] [parent_interface] [vpc_status] [eth_bundle] [eth_hw_desc] [eth_hw_addr] [eth_bia_addr] [desc] [eth_ip_addr] [eth_ip_mask] [eth_ip_prefix] [eth_mtu] [eth_bw] [eth_dly] [eth_reliability] [eth_txload] [eth_rxload] [eth_encap_vlan] [medium] [eth_mode] [eth_duplex] [eth_speed] [eth_media] [eth_beacon] [eth_autoneg] [eth_in_flowctrl] [eth_out_flowctrl] [eth_mdix] [eth_ratemode] [eth_swt_monitor] [eth_ethertype] [eth_eee_state] [eth_members] [eth_link_flapped] [eth_clear_counters] [eth_reset_cntr] [eth_load_interval1] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_inpkts] [eth_inbytes] [eth_jumbo_inpkts] [eth_storm_supp] [eth_runts] [eth_giants] [eth_crc] [eth_nobuf] [eth_inerr] [eth_frame] [eth_overrun] [eth_underrun] [eth_ignored] [eth_watchdog] [eth_bad_eth] [eth_bad_proto] [eth_in_ifdown_drops] [eth_dribble] [eth_indiscard] [eth_inpause] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_outpkts] [eth_outbytes] [eth_jumbo_outpkts] [eth_outerr] [eth_coll] [eth_deferred] [eth_latecoll] [eth_lostcarrier] [eth_nocarrier] [eth_babbles] [eth_outdiscard] [eth_outpause] [mgmt_hw_desc] [mgmt_hw_addr] [mgmt_ip_addr] [mgmt_ip_mask] [mgmt_mtu] [mgmt_speed] [mgmt_duplex] [vdc_lvl_in_avg_bits] [vdc_lvl_in_avg_pkts] [vdc_lvl_out_avg_bits] [vdc_lvl_out_avg_pkts] [vdc_lvl_in_pkts] [vdc_lvl_in_ucast] [vdc_lvl_in_mcast] [vdc_lvl_in_bcast] [vdc_lvl_in_bytes] [vdc_lvl_in_bps] [vdc_lvl_in_pps] [vdc_lvl_out_pkts] [vdc_lvl_out_ucast] [vdc_lvl_out_mcast] [vdc_lvl_out_bcast] [vdc_lvl_out_bytes] [vdc_lvl_out_bps] [vdc_lvl_out_pps] [mgmt_in_pkts] [mgmt_in_bytes] [mgmt_in_mcast] [mgmt_in_compressed] [mgmt_in_errors] [mgmt_in_frame] [mgmt_in_overrun] [mgmt_in_fifo] [mgmt_out_pkts] [mgmt_out_bytes] [mgmt_out_underruns] [mgmt_out_errors] [mgmt_out_collisions] [mgmt_out_fifo] [mgmt_out_carrier] [mgmt_align_err] [mgmt_fcs_err] [mgmt_xmit_err] [mgmt_rcv_err] [mgmt_undersize] [mgmt_outdisc] [mgmt_single_col] [mgmt_multi_col] [mgmt_late_col] [mgmt_excess_col] [mgmt_carri_sen] [mgmt_runts] [mgmt_giants] [mgmt_sqetest_err] [mgmt_deferred_tx] [mgmt_inmactx_err] [mgmt_inmacrx_err] [mgmt_symbol_err] [loop_in_pkts] [loop_in_bytes] [loop_in_mcast] [loop_in_compressed] [loop_in_errors] [loop_in_frame] [loop_in_overrun] [loop_in_fifo] [loop_out_pkts] [loop_out_bytes] [loop_out_underruns] [loop_out_errors] [loop_out_collisions] [loop_out_fifo] [loop_out_carriers] admin-state { tunnel-ipv4 | tunnel-ipv6 } mtu bandwidth encap-type keepalive-period keepalive-retries { src-ipv4 | src-ipv6 } src-intf { dest-ipv4 | dest-ipv6 } dest-hostname vrf_name wccp_header ttl_val tunnel_pmtud_age_time tunnel_pmtud_min_mtu tunnel_pmtud tunnel_pgm_mtu tunnel_rx_pkt_count tunnel_rx_byte_count tunnel_rx_rate tunnel_tx_pkt_count tunnel_tx_byte_count tunnel_tx_rate tunnel_clear_counter [svi_if_index] [svi_admin_state] [svi_rsn_desc] [svi_line_proto] [svi_hw] [svi_mac] [svi_desc] [svi_ip_addr] [svi_ip_mask] [svi_mtu] [svi_bw] [svi_delay] [svi_tx_load] [svi_rx_load] [svi_carrier_delay_sec] [svi_carrier_delay_msec] [svi_arp_type] [svi_arp_timeout] [svi_time_last_cleared] [TABLE_sec_vlan] [sec_vlan] [sec_vlan_type] [svi_routed_pkts_in] [svi_routed_bytes_in] [svi_routed_pkts_out] [svi_routed_bytes_out] [svi_ucast_pkts_in] [svi_ucast_bytes_in] [svi_mcast_pkts_in] [svi_mcast_bytes_in] [svi_ucast_pkts_out] [svi_ucast_bytes_out] [svi_mcast_pkts_out] [svi_mcast_bytes_out] [svi_ipv4_ucast_pkts_in] [svi_ipv4_ucast_bytes_in] [svi_ipv4_ucast_pkts_out] [svi_ipv4_ucast_bytes_out] [svi_ipv4_mcast_pkts_in] [svi_ipv4_mcast_bytes_in] [svi_ipv4_mcast_pkts_out] [svi_ipv4_mcast_bytes_out] [svi_ipv6_ucast_pkts_in] [svi_ipv6_ucast_bytes_in] [svi_ipv6_ucast_pkts_out] [svi_ipv6_ucast_bytes_out] [svi_ipv6_mcast_pkts_in] [svi_ipv6_mcast_bytes_in] [svi_ipv6_mcast_pkts_out] [svi_ipv6_mcast_bytes_out] [svi_average_input_bits] [svi_average_input_packets] [svi_average_output_bits] [svi_average_output_packets] [svi_rate_in_mins] [svi_reliability] [overlay_addr] [overlay_addr_mask] [overlay_mtu] [overlay_bandwidth] [overlay_encap_str] [overlay_vrf] [overlay_src_addr] [overlay_dst_addr] [overlay_last_link_flap] [overlay_clear_counters] [overlay_load_interval] [overlay_rx_ucastpkts] [overlay_rx_ucastbytes] [overlay_rx_mcastpkts] [overlay_rx_mcastbytes] [overlay_rx_pkts] [overlay_rx_bytes] [overlay_rx_bcastpkts] [overlay_rx_bcastbytes] [overlay_rx_bitrate] [overlay_rx_pktrate] [overlay_tx_ucastpkts] [overlay_tx_ucastbytes] [overlay_tx_mcastpkts] [overlay_tx_mcastbytes] [overlay_tx_bcastpkts] [overlay_tx_bcastbytes] [overlay_tx_pkts] [overlay_tx_bytes] [overlay_tx_bitrate] [overlay_tx_pktrate] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

eth_rsn_fac

Type: string

State reason facility

eth_rsn_code

Type: string

State reason code

admin_state

Type: string

admin state

share_state

Interface ownership

Dedicated  value: 0x00

state is owned
Shared  value: 0x01

state is shared
Dedicated(Shared)  value: 0x02

state is owned

parent_interface

Type: interface

parent interface

vpc_status

Type: string

VPC status

eth_bundle

Type: string

Belongs to bundle

eth_hw_desc

Type: string

HW description

eth_hw_addr

Type: ethernet

HW address

eth_bia_addr

Type: ethernet

bia address

desc

Type: string

Interface description

eth_ip_addr

Type: ipaddr

IP Address

eth_ip_mask

Type: uinteger

IP address mask

eth_ip_prefix

Type: string

IP address prefix

eth_mtu

Type: string

MTU

eth_bw

Type: uinteger

Bandwidth

eth_dly

Type: uinteger

Delay

eth_reliability

Type: string

Reliability

eth_txload

Type: string

Tx load

eth_rxload

Type: string

Rx load

eth_encap_vlan

Type: uinteger

Encapsulation Vlan

medium

Type: string

medium type

eth_mode

Port mode

access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
Private-vlan host  value: 0x00400000

PVLAN host
Private-vlan promiscuous  value: 0x00800000

PVLAN promiscuous
Private-vlan trunk promiscuous  value: 0x10000000

PVLAN trunk promiscuous
Private-vlan trunk secondary  value: 0x20000000

PVLAN_trunk_secondary
fex-fabric  value: 0x02000000

FEX fabric
dot1q-tunnel  value: 0x01000000

1qTunl
FabricPath  value: 0x00100003

FabricPath

eth_duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

eth_speed

Speed

auto-speed  value: 0

Auto
10 Mb/s  value: 10

10Mb/s
100 Mb/s  value: 100

100Mb/s
auto-speed 10-100  value: 110

Auto 10-100Mb/s
1000 Mb/s  value: 1000

1Gb/s
10 Gb/s  value: 10000

10Gb/s
40 Gb/s  value: 40000

40Gb/s
100 Gb/s  value: 100000

100Gb/s

eth_media

Type: string

Media type

eth_beacon

Beacon

on  value: 1

On
off  value: 2

Off

eth_autoneg

Autonegotiation

off  value: 2

Off
on  value: 1

On

eth_in_flowctrl

Input flowcontrol

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

eth_out_flowctrl

Output flowcontrol

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

eth_mdix

Mdix

off  value: 0

Off
on  value: 1

On

eth_ratemode

Rate mode

dedicated  value: 1

rate mode is dedicated
shared  value: 2

rate mode is shared

eth_swt_monitor

Switchport Monitor

off  value: 0

Off
on  value: 1

On
on, forwarding is on  value: 2

Forward On
on, forwarding is on, learning is on  value: 3

Learn On

eth_ethertype

Type: string

EtherType

eth_eee_state

Type: string

EEE state

eth_members

Type: string

Members in this channel

eth_link_flapped

Type: string

Last link flapped

eth_clear_counters

Type: string

Last clearing of show interface counters

eth_reset_cntr

Type: uinteger

Interface resets

eth_load_interval1

Type: uinteger

interval 1 timer value in sec

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_jumbo_inpkts

Type: longlong

Incoming jumbo pkts

eth_storm_supp

Type: longlong

storm suppression

eth_runts

Type: longlong

runts

eth_giants

Type: longlong

giants

eth_crc

Type: longlong

CRC

eth_nobuf

Type: longlong

No buffer received

eth_inerr

Type: longlong

input errors

eth_frame

Type: longlong

frame

eth_overrun

Type: longlong

overrun

eth_underrun

Type: longlong

underruns

eth_ignored

Type: longlong

ignored

eth_watchdog

Type: longlong

watchdog

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_dribble

Type: longlong

input packets with dribble condition

eth_indiscard

Type: longlong

discards

eth_inpause

Type: longlong

pause input

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

packets output

eth_outbytes

Type: longlong

bytes output

eth_jumbo_outpkts

Type: longlong

Outgoing jumbo pkts

eth_outerr

Type: longlong

output errors

eth_coll

Type: longlong

collisions

eth_deferred

Type: longlong

deferred

eth_latecoll

Type: longlong

late collision

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_babbles

Type: longlong

babbles

eth_outdiscard

Type: longlong

output discard

eth_outpause

Type: longlong

PAUSE output

mgmt_hw_desc

Type: string

HW description

mgmt_hw_addr

Type: ethernet

HW address

mgmt_ip_addr

Type: ipaddr

IP address

mgmt_ip_mask

Type: ipaddr

IP address mask

mgmt_mtu

Type: uinteger

MTU

mgmt_speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

mgmt_duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

vdc_lvl_in_avg_bits

Type: longlong

VDC level average input bits

vdc_lvl_in_avg_pkts

Type: longlong

VDC level average input packets

vdc_lvl_out_avg_bits

Type: longlong

VDC level average output bits

vdc_lvl_out_avg_pkts

Type: longlong

VDC level average output packets

vdc_lvl_in_pkts

Type: longlong

VDC level input packets

vdc_lvl_in_ucast

Type: longlong

VDC level input unicast packets

vdc_lvl_in_mcast

Type: longlong

VDC level input multicast packets

vdc_lvl_in_bcast

Type: longlong

VDC level input broadcast packets

vdc_lvl_in_bytes

Type: longlong

VDC level input bytes

vdc_lvl_in_bps

Type: longlong

VDC level input bytes per second

vdc_lvl_in_pps

Type: longlong

VDC level input packets per second

vdc_lvl_out_pkts

Type: longlong

VDC level output packets

vdc_lvl_out_ucast

Type: longlong

VDC level output unicast packets

vdc_lvl_out_mcast

Type: longlong

VDC level output multicast packets

vdc_lvl_out_bcast

Type: longlong

VDC level output broadcast packets

vdc_lvl_out_bytes

Type: longlong

VDC level output bytes

vdc_lvl_out_bps

Type: longlong

VDC level output bytes per second

vdc_lvl_out_pps

Type: longlong

VDC level output packets per second

mgmt_in_pkts

Type: uinteger

Input packets

mgmt_in_bytes

Type: uinteger

Input bytes

mgmt_in_mcast

Type: uinteger

Input multicast frames

mgmt_in_compressed

Type: uinteger

Input compressed

mgmt_in_errors

Type: uinteger

Input errors

mgmt_in_frame

Type: uinteger

Input frame errors

mgmt_in_overrun

Type: uinteger

Input overrun

mgmt_in_fifo

Type: uinteger

Input fifo

mgmt_out_pkts

Type: uinteger

Output packets

mgmt_out_bytes

Type: uinteger

Output bytes

mgmt_out_underruns

Type: uinteger

Output overruns

mgmt_out_errors

Type: uinteger

Output errors

mgmt_out_collisions

Type: uinteger

Output collisions

mgmt_out_fifo

Type: uinteger

Output fifo

mgmt_out_carrier

Type: uinteger

Output carrier errors

mgmt_align_err

Type: longlong

Align error

mgmt_fcs_err

Type: longlong

FCS error

mgmt_xmit_err

Type: longlong

Transmit error

mgmt_rcv_err

Type: longlong

Receive error

mgmt_undersize

Type: longlong

Undersize

mgmt_outdisc

Type: longlong

Out discard

mgmt_single_col

Type: longlong

Single collision

mgmt_multi_col

Type: longlong

Multiple collision

mgmt_late_col

Type: longlong

Late collision

mgmt_excess_col

Type: longlong

Excess collision

mgmt_carri_sen

Type: longlong

Carrier sense

mgmt_runts

Type: longlong

Runts

mgmt_giants

Type: longlong

Giants

mgmt_sqetest_err

Type: longlong

SQETest error

mgmt_deferred_tx

Type: longlong

Deferred tx

mgmt_inmactx_err

Type: longlong

In MAC tx

mgmt_inmacrx_err

Type: longlong

In MAC rx

mgmt_symbol_err

Type: longlong

Symbol error

loop_in_pkts

Type: longlong

Input packets

loop_in_bytes

Type: longlong

Input bytes

loop_in_mcast

Type: longlong

Input multicast

loop_in_compressed

Type: longlong

Input compressed

loop_in_errors

Type: longlong

Input errors

loop_in_frame

Type: longlong

Input frame errors

loop_in_overrun

Type: longlong

Input overrun

loop_in_fifo

Type: longlong

Input fifo

loop_out_pkts

Type: longlong

Output packets

loop_out_bytes

Type: longlong

Output bytes

loop_out_underruns

Type: longlong

Output underruns

loop_out_errors

Type: longlong

Output errors

loop_out_collisions

Type: longlong

Output collisions

loop_out_fifo

Type: longlong

Output fifo

loop_out_carriers

Type: longlong

Output carrier errors

admin-state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

tunnel-ipv4

Type: ipprefix

interface IPv4 address

tunnel-ipv6

Type: ipv6prefix

interface IPv6 address

mtu

Type: uinteger

interface Maximum Transmission Unit

bandwidth

Type: uinteger

interface Bandwidth in kilobits

encap-type

GRE/IP  value: 1

GRE/IPv6  value: 2

GRE/WCCP  value: 5

keepalive-period

Type: uinteger

keealive period

keepalive-retries

Type: uinteger

number of retries

src-ipv4

Type: ipaddr

tunnel source IPv4 address

src-ipv6

Type: ipv6addr

tunnel source IPv6 address

src-intf

Type: interface

tunnel source interface

dest-ipv4

Type: ipaddr

tunnel destination IPv4 address

dest-ipv6

Type: ipv6addr

tunnel destination IPv6 address

dest-hostname

Type: string

tunnel destination hostname

vrf_name

Type: string

transport VRF name

wccp_header

Type: uinteger

wccp header

ttl_val

Type: uinteger

tunnel time to live value

tunnel_pmtud_age_time

Type: uinteger

tunnel path MTU discovery age time

tunnel_pmtud_min_mtu

Type: uinteger

tunnel path MTU discovery min mtu

tunnel_pmtud

Type: uinteger

tunnel path MTU discovered

tunnel_pgm_mtu

Type: uinteger

tunnel actual programmed MTU

tunnel_rx_pkt_count

Type: longlong

total number of packets received

tunnel_rx_byte_count

Type: longlong

total number of bytes received

tunnel_rx_rate

Type: longlong

packets input rate per 5 minutes

tunnel_tx_pkt_count

Type: longlong

total number of packets transmitted

tunnel_tx_byte_count

Type: longlong

total number of bytes transmitted

tunnel_tx_rate

Type: longlong

packets transmitted per 5 minutes

tunnel_clear_counter

Type: string

Last clearing of show interface counters

svi_if_index

Type: interface

Interface

svi_admin_state

up  value: 0

down  value: 1

administratively down  value: 2

type not supported  value: 3

svi_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

svi_line_proto

up  value: 0

down  value: 1

svi_hw

Type: string

length: 32

Hardware

svi_mac

Type: string

length: 32

Address

svi_desc

Type: string

Interface Description

svi_ip_addr

Type: ipaddr

IP Address

svi_ip_mask

Type: uinteger

IP address mask

svi_mtu

Type: uinteger

MTU size in bytes

svi_bw

Type: uinteger

Bandwidth in kilobits

svi_delay

Type: uinteger

Throughput delay (tens of microseconds)

svi_tx_load

Type: uinteger

Tx Load

svi_rx_load

Type: uinteger

Rx Load

svi_carrier_delay_sec

Type: uinteger

carrier delay value in seconds

svi_carrier_delay_msec

Type: uinteger

carrier delay value in milli-seconds

svi_arp_type

Type: string

ARP type

svi_arp_timeout

Type: string

ARP timeout value

svi_time_last_cleared

Type: string

Time last cleared

TABLE_sec_vlan

secondary vlans

sec_vlan

Type: vlan

vlan id

sec_vlan_type

Type: string

secondary vlan type

svi_routed_pkts_in

Type: long

in routed pkts

svi_routed_bytes_in

Type: long

in routed bytes

svi_routed_pkts_out

Type: long

out routed pkts

svi_routed_bytes_out

Type: long

out routed bytes

svi_ucast_pkts_in

Type: long

in unicast pkts

svi_ucast_bytes_in

Type: long

in unicast bytes

svi_mcast_pkts_in

Type: long

in multicast pkts

svi_mcast_bytes_in

Type: long

in multicast bytes

svi_ucast_pkts_out

Type: long

out unicast pkts

svi_ucast_bytes_out

Type: long

out unicast bytes

svi_mcast_pkts_out

Type: long

out multicast pkts

svi_mcast_bytes_out

Type: long

out multicast bytes

svi_ipv4_ucast_pkts_in

Type: long

IPv4 in unicast pkts

svi_ipv4_ucast_bytes_in

Type: long

IPv4 in unicast bytes

svi_ipv4_ucast_pkts_out

Type: long

IPv4 out unicast pkts

svi_ipv4_ucast_bytes_out

Type: long

IPv4 out unicast bytes

svi_ipv4_mcast_pkts_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_bytes_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_pkts_out

Type: long

IPv4 out multicast pkts

svi_ipv4_mcast_bytes_out

Type: long

IPv4 out multicast bytes

svi_ipv6_ucast_pkts_in

Type: long

IPv6 in unicast pkts

svi_ipv6_ucast_bytes_in

Type: long

IPv6 in unicast bytes

svi_ipv6_ucast_pkts_out

Type: long

IPv6 out unicast pkts

svi_ipv6_ucast_bytes_out

Type: long

IPv6 out unicast bytes

svi_ipv6_mcast_pkts_in

Type: long

IPv6 in multicast pkts

svi_ipv6_mcast_bytes_in

Type: long

IPv6 in multicast bytes

svi_ipv6_mcast_pkts_out

Type: long

IPv6 out multicast pkts

svi_ipv6_mcast_bytes_out

Type: long

IPv6 out multicast bytes

svi_average_input_bits

Type: long

Input rate bits/sec

svi_average_input_packets

Type: long

Input rate bits/sec

svi_average_output_bits

Type: long

Output rate bits/sec

svi_average_output_packets

Type: long

Output rate bits/sec

svi_rate_in_mins

Type: long

Time in mins for which average rate is computed

svi_reliability

Type: uinteger

Reliability

overlay_addr

Type: ipaddr

Overlay address

overlay_addr_mask

Type: uinteger

Overlay address mask

overlay_mtu

Type: uinteger

MTU

overlay_bandwidth

Type: uinteger

Bandwidth

overlay_encap_str

Type: string

Encap type

overlay_vrf

Type: string

VRF

overlay_src_addr

Type: ipaddr

Source address

overlay_dst_addr

Type: ipaddr

Destination address

overlay_last_link_flap

Type: string

Last link flap

overlay_clear_counters

Type: string

Last clearing of show interface counters

overlay_load_interval

Type: uinteger

Load interval

overlay_rx_ucastpkts

Type: longlong

Received ucast pkts

overlay_rx_ucastbytes

Type: longlong

Received ucast bytes

overlay_rx_mcastpkts

Type: longlong

Received mcast pkts

overlay_rx_mcastbytes

Type: longlong

Received mcast bytes

overlay_rx_bcastpkts

Type: longlong

Received bcast pkts

overlay_rx_bcastbytes

Type: longlong

Received bcast bytes

overlay_rx_pkts

Type: longlong

Total received pkts

overlay_rx_bytes

Type: longlong

Total received bytes

overlay_rx_bitrate

Type: longlong

Receive bit rate

overlay_rx_pktrate

Type: longlong

Receive pkt rate

overlay_tx_ucastpkts

Type: longlong

Trasnmitted ucast pkts

overlay_tx_ucastbytes

Type: longlong

Trasnmitted ucast bytes

overlay_tx_mcastpkts

Type: longlong

Trasnmitted mcast pkts

overlay_tx_mcastbytes

Type: longlong

Trasnmitted mcast bytes

overlay_tx_bcastpkts

Type: longlong

Trasnmitted bcast pkts

overlay_tx_bcastbytes

Type: longlong

Trasnmitted bcast bytes

overlay_tx_pkts

Type: longlong

Total transmitted pkts

overlay_tx_bytes

Type: longlong

Total transmitted bytes

overlay_tx_bitrate

Type: longlong

Transmit bit rate

overlay_tx_pktrate

Type: longlong

Transmit pkt rate

Command Modes

- /exec

show interface (if_manager)

show interface ifloop [ __readonly__ TABLE_interface interface [state] [share_state] [state_rsn] [state_rsn_desc] [desc] [eth_bundle] [eth_eee_state] [eth_dce_mode] [vpc_status] [eth_rsn_fac] [eth_rsn_code] [eth_hw_desc] [eth_hw_addr] [eth_bia_addr] [eth_ip_addr] [eth_ip_mask] [eth_ip_prefix] [eth_mtu] [eth_bw] [eth_encap_vlan] [eth_dly] [eth_reliability] [eth_txload] [eth_rxload] [eth_loopback] [eth_keepalive] [eth_duplex] [eth_speed] [eth_mode] [eth_ratemode] [eth_autoneg] [eth_beacon] [eth_media] [eth_in_flowctrl] [eth_out_flowctrl] [eth_mdix] [eth_swt_monitor] [eth_ethertype] [eth_members] [eth_clk_mode] [eth_arp_type] [eth_arp_timeout] [eth_last_in] [eth_last_out] [eth_out_hang] [eth_clear_counters] [eth_link_flapped] [eth_inq_size] [eth_inq_max] [eth_inq_drops] [eth_inq_flush] [eth_out_drop] [eth_q_strategy] [eth_outq_size] [eth_outq_max] [eth_reset_cntr] [loop_in_pkts] [loop_in_bytes] [loop_in_mcast] [loop_in_compressed] [loop_in_errors] [loop_in_frame] [loop_in_overrun] [loop_in_fifo] [loop_out_pkts] [loop_out_bytes] [loop_out_underruns] [loop_out_errors] [loop_out_collisions] [loop_out_fifo] [loop_out_carriers] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifloop

Type: interface-mrange

Enter interface type and number in module/slot format

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

share_state

Interface ownership

Dedicated  value: 0x00

state is owned
Shared  value: 0x01

state is shared
Dedicated(Shared)  value: 0x02

state is owned

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

desc

Type: string

Interface description

eth_bundle

Type: string

Belongs to bundle

eth_eee_state

Type: string

EEE state

eth_dce_mode

Type: string

DCE mode description

vpc_status

Type: string

VPC status

eth_rsn_fac

Type: string

State reason facility

eth_rsn_code

Type: string

State reason code

eth_hw_desc

Type: string

HW description

eth_hw_addr

Type: ethernet

HW address

eth_bia_addr

Type: ethernet

bia address

eth_ip_addr

Type: ipaddr

IP Address

eth_ip_mask

Type: uinteger

IP address mask

eth_ip_prefix

Type: string

IP Prefix

eth_mtu

Type: string

MTU

eth_bw

Type: uinteger

Bandwidth

eth_encap_vlan

Type: uinteger

Encapsulation Vlan

eth_dly

Type: uinteger

Delay

eth_reliability

Type: string

Reliability

eth_txload

Type: string

Tx load

eth_rxload

Type: string

Rx load

eth_loopback

Loopback

notset  value: 0x0

not set
line  value: 0x1

line
mac  value: 0x2

mac
ext  value: 0x3

external

eth_keepalive

Type: uinteger

Keepalive

eth_duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

eth_speed

Speed

auto-speed  value: 0

Auto
10 Mb/s  value: 10

10Mb/s
100 Mb/s  value: 100

100Mb/s
auto-speed 10-100  value: 110

Auto 10-100Mb/s
1000 Mb/s  value: 1000

1Gb/s
10 Gb/s  value: 10000

10Gb/s
40 Gb/s  value: 40000

40Gb/s
100 Gb/s  value: 100000

100Gb/s

eth_mode

Port mode

access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
Private-vlan host  value: 0x00400000

PVLAN host
Private-vlan promiscuous  value: 0x00800000

PVLAN promiscuous
Private-vlan trunk promiscuous  value: 0x10000000

PVLAN trunk promiscuous
Private-vlan trunk secondary  value: 0x20000000

PVLAN_trunk_secondary
fex-fabric  value: 0x02000000

FEX fabric
dot1q-tunnel  value: 0x01000000

1qTunl
FabricPath  value: 0x00100003

FabricPath

eth_ratemode

Rate mode

dedicated  value: 1

rate mode is dedicated
shared  value: 2

rate mode is shared

eth_autoneg

Autonegotiation

off  value: 2

Off
on  value: 1

On

eth_beacon

Beacon

on  value: 1

On
off  value: 2

Off

eth_media

Type: string

Media type

eth_in_flowctrl

Input flowcontrol

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

eth_out_flowctrl

Output flowcontrol

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

eth_mdix

Mdix

off  value: 0

Off
on  value: 1

On

eth_swt_monitor

Switchport Monitor

off  value: 0

Off
on  value: 1

On
on, forwarding is on  value: 2

Forward On
on, forwarding is on, learning is on  value: 3

Learn On

eth_ethertype

Type: string

EtherType

eth_members

Type: string

Members in this channel

eth_clk_mode

Type: string

Clock mode

eth_arp_type

Type: string

ARP type

eth_arp_timeout

Type: string

ARP timeout

eth_last_in

Type: string

Last input

eth_last_out

Type: string

Last output

eth_out_hang

Type: string

Last output hang

eth_clear_counters

Type: string

Last clearing of show interface counters

eth_link_flapped

Type: string

Last link flapped

eth_inq_size

Type: uinteger

Input queue size

eth_inq_max

Type: uinteger

Input queue max

eth_inq_drops

Type: uinteger

Input queue drops

eth_inq_flush

Type: uinteger

Input queue flushes

eth_out_drop

Type: uinteger

Output drops

eth_q_strategy

Type: string

Queueing strategy

eth_outq_size

Type: uinteger

Output queue size

eth_outq_max

Type: uinteger

Output queue max

eth_reset_cntr

Type: uinteger

Interface resets

loop_in_pkts

Type: longlong

Input packets

loop_in_bytes

Type: longlong

Input bytes

loop_in_mcast

Type: longlong

Input multicast

loop_in_compressed

Type: longlong

Input compressed

loop_in_errors

Type: longlong

Input errors

loop_in_frame

Type: longlong

Input frame errors

loop_in_overrun

Type: longlong

Input overrun

loop_in_fifo

Type: longlong

Input fifo

loop_out_pkts

Type: longlong

Output packets

loop_out_bytes

Type: longlong

Output bytes

loop_out_underruns

Type: longlong

Output underruns

loop_out_errors

Type: longlong

Output errors

loop_out_collisions

Type: longlong

Output collisions

loop_out_fifo

Type: longlong

Output fifo

loop_out_carriers

Type: longlong

Output carrier errors

Command Modes

- /exec

show_interface

show_interface single

Syntax Description

show_interface

Port_mgr hidden command

single

Type: interface

interface type and number in module/slot format

Command Modes

- /exec

show interface brief (if_manager)

show interface brief [ __readonly__ TABLE_interface interface [vlan] [type] [portmode] state [state_rsn] [state_rsn_desc] [desc] [vrf] [ipv6_addr] [ip_addr] [speed] [mtu] [ratemode] [portchan] [proto] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

desc

Type: string

Interface description

vrf

Type: string

Vrf membership

ipv6_addr

Type: ipv6addr

IPv6 address

ip_addr

Type: ipaddr

IP address

mtu

Type: uinteger

MTU

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

vlan

Type: string

Vlan

type

Type: string

Type

portmode

Port mode

routed  value: 0

Layer 3
access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
pvlan  value: 0x00400000

PVLAN
fabric  value: 0x02000000

Fabric
1qtunl  value: 0x01000000

1q-Tunnel
f-path  value: 0x00100003

FabricPath

ratemode

Type: _enum

Interface port speed

portchan

Type: uinteger

Port Channel Membership

proto

Type: string

Port Channel Protocol

Command Modes

- /exec

show interface brief (if_manager)

show interface ifloop_brf brief [ __readonly__ TABLE_interface interface state [desc] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifloop_brf

Type: interface-mrange

Enter interface type and number in module/slot format

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

desc

Type: string

Interface description

Command Modes

- /exec

show interface brief (if_manager)

show interface ifmgmt_brf brief [ __readonly__ TABLE_interface interface [vrf] state [ipv6_addr] [ip_addr] mtu speed [duplex] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifmgmt_brf

Type: interface-mrange

Enter interface type and number in module/slot format

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

vrf

Type: string

Vrf membership

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

ipv6_addr

Type: ipv6addr

IPv6 address

ip_addr

Type: ipaddr

IP address

mtu

Type: uinteger

MTU

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

Command Modes

- /exec

show interface brief (if_manager)

show interface ifeth_brf brief [ __readonly__ TABLE_interface interface [vlan] type portmode state state_rsn_desc speed ratemode [portchan] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_brf

Type: interface-mrange

Enter interface type and number in module/slot format

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

vlan

Type: string

Vlan

type

Type: string

Type

portmode

Port mode

routed  value: 0

Layer 3
access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
pvlan  value: 0x00400000

PVLAN
fabric  value: 0x02000000

Fabric
1qtunl  value: 0x01000000

1q-Tunnel
f-path  value: 0x00100003

FabricPath

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

ratemode

Type: _enum

Interface port speed

portchan

Type: uinteger

Port Channel Membership

Command Modes

- /exec

show interface brief (if_manager)

show interface ifrange brief [ __readonly__ TABLE_interface interface state [state_rsn] [state_rsn_desc] [overlay_mtu] [overlay_bandwidth] [overlay_vrf] [overlay_src_addr] [overlay_dst_addr] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifrange

Type: interface-mrange

Enter interface type and number

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

overlay_mtu

Type: uinteger

MTU

overlay_bandwidth

Type: uinteger

Bandwidth

overlay_vrf

Type: string

VRF

overlay_src_addr

Type: ipaddr

Source address

overlay_dst_addr

Type: ipaddr

Destination address

Command Modes

- /exec

show interface brief (if_manager)

show interface ifpch_brf brief [ __readonly__ TABLE_interface interface [vlan] type portmode state state_rsn_desc speed ratemode [proto] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifpch_brf

Type: interface-mrange

Enter interface type and number in module/slot format

brief

Show brief info of interface

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

vlan

Type: string

Vlan

type

Type: string

Type

portmode

Port mode

routed  value: 0

Layer 3
access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
pvlan  value: 0x00400000

PVLAN
fabric  value: 0x02000000

Fabric
1qtunl  value: 0x01000000

1q-Tunnel
f-path  value: 0x00100003

FabricPath

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

ratemode

Type: _enum

Interface port speed

proto

Type: string

Port Channel Protocol

Command Modes

- /exec

show interface cable-diagnostics-tdr

show interface ifid_tdr cable-diagnostics-tdr [ __readonly__ TABLE_interface interface speed distance1 pair1_status distance2 pair2_status distance3 pair3_status distance4 pair4_status ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_tdr

Type: interface-mrange

Enter interface type and number in module/slot format

cable-diagnostics-tdr

Show interface tdr test information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

distance1

Type: string

Distance to fault for pair 1

distance2

Type: string

Distance to fault for pair 2

distance3

Type: string

Distance to fault for pair 3

distance4

Type: string

Distance to fault for pair 4

pair1_status

Pair1 status

Terminated  value: 0x0

no open or short on this pair
Short  value: 0x1

short detected on this pair
Open  value: 0x2

open detected on this pair
Test Failed  value: 0x3

tdr test failed on this pair
Test Running  value: 0x4

test is in progress
Test Not Run  value: 0x5

test not run

pair2_status

Pair2 status

Terminated  value: 0x0

no open or short on this pair
Short  value: 0x1

short detected on this pair
Open  value: 0x2

open detected on this pair
Test Failed  value: 0x3

tdr test failed on this pair
Test Running  value: 0x4

test is in progress
Test Not Run  value: 0x5

test not run

pair3_status

Pair3 status

Terminated  value: 0x0

no open or short on this pair
Short  value: 0x1

short detected on this pair
Open  value: 0x2

open detected on this pair
Test Failed  value: 0x3

tdr test failed on this pair
Test Running  value: 0x4

test is in progress
Test Not Run  value: 0x5

test not run

pair4_status

Pair4 status

Terminated  value: 0x0

no open or short on this pair
Short  value: 0x1

short detected on this pair
Open  value: 0x2

open detected on this pair
Test Failed  value: 0x3

tdr test failed on this pair
Test Running  value: 0x4

test is in progress
Test Not Run  value: 0x5

test not run

Command Modes

- /exec

show interface capabilities (if_manager)

show interface capabilities [ __readonly__ TABLE_interface interface model type speed duplex trunk_encap dce_capable channel bcast_supp flo_ctrl rate_mode port_mode [fast_start] qos_scheduling cos_rewrite tos_rewrite [inline_power] span udld [mdix] [tdr] lnk_debounce lnk_debounce_time fex_fabric dot1q_tunnel [pvlan_trunk_mode] [port_group] [port_group_members] eee_capable pfc_capable speed_group_capable ]

Syntax Description

show

Show running system information

interface

Show interface status and information

capabilities

Show interface capabilities information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

model

Type: string

Model

type

Type: string

Type

speed

Type: string

Speed

duplex

Type: string

Duplex

trunk_encap

Type: string

Trunk encap. type

dce_capable

DCE mode capable

no  value: 0

No
yes  value: 1

Yes

channel

Channel

no  value: 0

No
yes  value: 1

Yes

bcast_supp

Type: string

Broadcast suppression

flo_ctrl

Type: string

Flowcontrol

rate_mode

Type: string

Rate mode

port_mode

Port mode

Unknown  value: 0

Unknown
Switched  value: 1

Switched
Routed  value: 2

Routed
Routed,Switched  value: 3

Routed, Switched

fast_start

Fast start

no  value: 0

No
yes  value: 1

Yes

qos_scheduling

Type: string

QOS scheduling

cos_rewrite

CoS rewrite

no  value: 0

No
yes  value: 1

Yes

tos_rewrite

ToS rewrite

no  value: 0

No
yes  value: 1

Yes

inline_power

Inline power

no  value: 0

No
yes  value: 1

Yes

span

SPAN

no  value: 0

No
yes  value: 1

Yes

udld

UDLD

no  value: 0

No
yes  value: 1

Yes

mdix

MDIX

no  value: 0

No
yes  value: 1

Yes

tdr

TDR

no  value: 0

No
yes  value: 1

Yes

lnk_debounce

Link debounce

no  value: 0

No
yes  value: 1

Yes

lnk_debounce_time

Link debounce time

no  value: 0

No
yes  value: 1

Yes

fex_fabric

FEX Fabric

no  value: 0

No
yes  value: 1

Yes

dot1q_tunnel

dot1q-tunnel

no  value: 0

No
yes  value: 1

Yes

pvlan_trunk_mode

Private-vlan trunk mode

no  value: 0

No
yes  value: 1

Yes

port_group

Type: integer

Port Group

port_group_members

Type: string

Port Group Members

eee_capable

EEE (efficient-eth)

no  value: 0

No
yes  value: 1

Yes

pfc_capable

PFC Capable:

no  value: 0

No
yes  value: 1

Yes

bkout_capable

Breakout Capable:

no  value: 0

No
yes  value: 1

Yes

speed_group_capable

Speed group capable

no  value: 0

No
yes  value: 1

Yes

Command Modes

- /exec

show interface capabilities (if_manager)

show interface ifid_eth_cap capabilities [ __readonly__ TABLE_interface interface model type speed duplex trunk_encap dce_capable channel bcast_supp flo_ctrl rate_mode port_mode [fast_start] qos_scheduling cos_rewrite tos_rewrite [inline_power] span udld [mdix] [tdr] lnk_debounce lnk_debounce_time fex_fabric dot1q_tunnel [pvlan_trunk_mode] [port_group] [port_group_members] eee_capable pfc_capable speed_group_capable ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_eth_cap

Type: interface-mrange

Enter interface type and number in module/slot format

capabilities

Show interface capabilities information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

model

Type: string

Model

type

Type: string

Type

speed

Type: string

Speed

duplex

Type: string

Duplex

trunk_encap

Type: string

Trunk encap. type

dce_capable

DCE mode capable

no  value: 0

No
yes  value: 1

Yes

channel

Channel

no  value: 0

No
yes  value: 1

Yes

bcast_supp

Type: string

Broadcast suppression

flo_ctrl

Type: string

Flowcontrol

rate_mode

Type: string

Rate mode

port_mode

Port mode

Unknown  value: 0

Unknown
Switched  value: 1

Switched
Routed  value: 2

Routed
Routed,Switched  value: 3

Routed, Switched

fast_start

Fast start

no  value: 0

No
yes  value: 1

Yes

qos_scheduling

Type: string

QOS scheduling

cos_rewrite

CoS rewrite

no  value: 0

No
yes  value: 1

Yes

tos_rewrite

ToS rewrite

no  value: 0

No
yes  value: 1

Yes

inline_power

Inline power

no  value: 0

No
yes  value: 1

Yes

span

SPAN

no  value: 0

No
yes  value: 1

Yes

udld

UDLD

no  value: 0

No
yes  value: 1

Yes

mdix

MDIX

no  value: 0

No
yes  value: 1

Yes

tdr

TDR

no  value: 0

No
yes  value: 1

Yes

lnk_debounce

Link debounce

no  value: 0

No
yes  value: 1

Yes

lnk_debounce_time

Link debounce time

no  value: 0

No
yes  value: 1

Yes

fex_fabric

FEX Fabric

no  value: 0

No
yes  value: 1

Yes

dot1q_tunnel

dot1q-tunnel

no  value: 0

No
yes  value: 1

Yes

pvlan_trunk_mode

Private-vlan trunk mode

no  value: 0

No
yes  value: 1

Yes

port_group

Type: integer

Port Group

port_group_members

Type: string

Port Group Members

eee_capable

EEE (efficient-eth)

no  value: 0

No
yes  value: 1

Yes

pfc_capable

PFC Capable:

no  value: 0

No
yes  value: 1

Yes

bkout_capable

Breakout Capable:

no  value: 0

No
yes  value: 1

Yes

speed_group_capable

Speed group capable

no  value: 0

No
yes  value: 1

Yes

Command Modes

- /exec

show interface counters (if_manager)

show interface counters [ module module ] [ __readonly__ TABLE_rx_counters interface_rx [eth_inpkts] [eth_inbytes] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_l3in_bytes] [eth_l3in_ucastpkts] [eth_l3in_mcastpkts] [eth_l3in_bcastpkts] TABLE_tx_counters interface_tx [eth_outpkts] [eth_outbytes] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_l3out_bytes] [eth_l3out_ucastpkts] [eth_l3out_mcastpkts] [eth_l3out_bcastpkts] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

module

Limit display to interfaces on module

module

Type: integer

Enter module number

__readonly__

Read Only

interface_rx

Type: interface

Interface index rx

interface_tx

Type: interface

Interface index tx

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

Packets output

eth_outbytes

Type: longlong

Bytes output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_l3in_bytes

Type: longlong

L3 Rx bytes

eth_l3in_ucastpkts

Type: longlong

L3 Rx Unicast pkts

eth_l3in_mcastpkts

Type: longlong

L3 Rx Multicast pkts

eth_l3in_bcastpkts

Type: longlong

L3 Rx Broadcast pkts

eth_l3out_bytes

Type: longlong

L3 Tx bytes

eth_l3out_ucastpkts

Type: longlong

L3 Tx Unicast pkts

eth_l3out_mcastpkts

Type: longlong

L3 Tx Multicast pkts

eth_l3out_bcastpkts

Type: longlong

L3 Tx Broadcast pkts

Command Modes

- /exec

show interface counters (if_manager)

show interface counters [ __readonly__ TABLE_rx_counters interface_rx [eth_inpkts] [eth_inbytes] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_l3in_bytes] [eth_l3in_ucastpkts] [eth_l3in_mcastpkts] [eth_l3in_bcastpkts] TABLE_tx_counters interface_tx [eth_outpkts] [eth_outbytes] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_l3out_bytes] [eth_l3out_ucastpkts] [eth_l3out_mcastpkts] [eth_l3out_bcastpkts] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

__readonly__

Read Only

interface_rx

Type: interface

Interface index rx

interface_tx

Type: interface

Interface index tx

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

Packets output

eth_outbytes

Type: longlong

Bytes output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_l3in_bytes

Type: longlong

L3 Rx bytes

eth_l3in_ucastpkts

Type: longlong

L3 Rx Unicast pkts

eth_l3in_mcastpkts

Type: longlong

L3 Rx Multicast pkts

eth_l3in_bcastpkts

Type: longlong

L3 Rx Broadcast pkts

eth_l3out_bytes

Type: longlong

L3 Tx bytes

eth_l3out_ucastpkts

Type: longlong

L3 Tx Unicast pkts

eth_l3out_mcastpkts

Type: longlong

L3 Tx Multicast pkts

eth_l3out_bcastpkts

Type: longlong

L3 Tx Broadcast pkts

Command Modes

- /exec

show interface counters (if_manager)

show interface ifeth_ctr counters [snmp] [ __readonly__ TABLE_rx_counters interface_rx [eth_inbytes] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_l3in_bytes] [eth_l3in_ucastpkts] [eth_l3in_mcastpkts] [eth_l3in_bcastpkts] TABLE_tx_counters interface_tx [eth_outbytes] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_l3out_bytes] [eth_l3out_ucastpkts] [eth_l3out_mcastpkts] [eth_l3out_bcastpkts] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_ctr

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

snmp

Show SNMP MIB values

__readonly__

Read Only

interface_rx

Type: interface

Interface index rx

interface_tx

Type: interface

Interface index tx

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inbytes

Type: longlong

Bytes input

eth_inucast

Type: longlong

Unicasts input

eth_inmcast

Type: longlong

Multicasts input

eth_inbcast

Type: longlong

Broadcasts input

eth_outbytes

Type: longlong

Bytes output

eth_outucast

Type: longlong

Unicasts output

eth_outmcast

Type: longlong

Multicasts output

eth_outbcast

Type: longlong

Broadcasts output

eth_l3in_bytes

Type: longlong

L3 Rx bytes

eth_l3in_ucastpkts

Type: longlong

L3 Rx Unicast pkts

eth_l3in_mcastpkts

Type: longlong

L3 Rx Multicast pkts

eth_l3in_bcastpkts

Type: longlong

L3 Rx Broadcast pkts

eth_l3out_bytes

Type: longlong

L3 Tx bytes

eth_l3out_ucastpkts

Type: longlong

L3 Tx Unicast pkts

eth_l3out_mcastpkts

Type: longlong

L3 Tx Multicast pkts

eth_l3out_bcastpkts

Type: longlong

L3 Tx Broadcast pkts

Command Modes

- /exec

show interface counters (if_manager)

show interface ifrange counters [ __readonly__ TABLE_interface interface [overlay_load_interval] [overlay_rx_ucastpkts] [overlay_rx_ucastbytes] [overlay_rx_mcastpkts] [overlay_rx_mcastbytes] [overlay_rx_pkts] [overlay_rx_bytes] [overlay_rx_bcastpkts] [overlay_rx_bcastbytes] [overlay_rx_bitrate] [overlay_rx_pktrate] [overlay_tx_ucastpkts] [overlay_tx_ucastbytes] [overlay_tx_mcastpkts] [overlay_tx_mcastbytes] [overlay_tx_bcastpkts] [overlay_tx_bcastbytes] [overlay_tx_pkts] [overlay_tx_bytes] [overlay_tx_bitrate] [overlay_tx_pktrate] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifrange

Type: interface-mrange

Enter interface type and number

counters

Show interface counters

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

overlay_load_interval

Type: uinteger

Load interval

overlay_rx_ucastpkts

Type: longlong

Received ucast pkts

overlay_rx_ucastbytes

Type: longlong

Received ucast bytes

overlay_rx_mcastpkts

Type: longlong

Received mcast pkts

overlay_rx_mcastbytes

Type: longlong

Received mcast bytes

overlay_rx_bcastpkts

Type: longlong

Received bcast pkts

overlay_rx_bcastbytes

Type: longlong

Received bcast bytes

overlay_rx_pkts

Type: longlong

Total received pkts

overlay_rx_bytes

Type: longlong

Total received bytes

overlay_rx_bitrate

Type: longlong

Receive bit rate

overlay_rx_pktrate

Type: longlong

Receive pkt rate

overlay_tx_ucastpkts

Type: longlong

Trasnmitted ucast pkts

overlay_tx_ucastbytes

Type: longlong

Trasnmitted ucast bytes

overlay_tx_mcastpkts

Type: longlong

Trasnmitted mcast pkts

overlay_tx_mcastbytes

Type: longlong

Trasnmitted mcast bytes

overlay_tx_bcastpkts

Type: longlong

Trasnmitted bcast pkts

overlay_tx_bcastbytes

Type: longlong

Trasnmitted bcast bytes

overlay_tx_pkts

Type: longlong

Total transmitted pkts

overlay_tx_bytes

Type: longlong

Total transmitted bytes

overlay_tx_bitrate

Type: longlong

Transmit bit rate

overlay_tx_pktrate

Type: longlong

Transmit pkt rate

Command Modes

- /exec

show interface counters (if_manager)

show interface ifid_ctr counters [snmp] [ __readonly__ TABLE_rx_counters interface_rx [eth_inpkts] [eth_inbytes] [eth_inucast] [eth_inmcast] [eth_inbcast] TABLE_tx_counters interface_tx [eth_outpkts] [eth_outbytes] [eth_outucast] [eth_outmcast] [eth_outbcast] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_ctr

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

snmp

Show SNMP MIB values

__readonly__

Read Only

interface_rx

Type: interface

Interface index rx

interface_tx

Type: interface

Interface index tx

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

Packets output

eth_outbytes

Type: longlong

Bytes output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

Command Modes

- /exec

show interface counters brief

show interface ifeth_ctr_brf counters brief [ __readonly__ TABLE_interface interface eth_load_intv1 eth_inrate1 eth_inframes1 eth_outrate1 eth_outframes1 eth_load_intv2 eth_inrate2 eth_inframes2 eth_outrate2 eth_outframes2 eth_load_intv3 eth_inrate3 eth_inframes3 eth_outrate3 eth_outframes3 ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_ctr_brf

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

brief

Show interface counters in brief

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

eth_load_intv1

Type: uinteger

interval 1 timer value in sec

eth_inrate1

Type: uinteger

interval 1 input rate in mbps

eth_inframes1

Type: uinteger

interval 1 input rate in frames (pkts)

eth_outrate1

Type: uinteger

interval 1 output rate in mbps

eth_outframes1

Type: uinteger

interval 1 output rate in output frames (pkts)

eth_load_intv2

Type: uinteger

interval 2 timer value in sec

eth_inrate2

Type: uinteger

interval 2 input rate in mbps

eth_inframes2

Type: uinteger

interval 2 input rate in frames (pkts)

eth_outrate2

Type: uinteger

interval 2 output rate in mbps

eth_outframes2

Type: uinteger

interval 2 output rate in output frames (pkts)

eth_load_intv3

Type: uinteger

interval 3 timer value in sec

eth_inrate3

Type: uinteger

interval 3 input rate in mbps

eth_inframes3

Type: uinteger

interval 3 input rate in frames (pkts)

eth_outrate3

Type: uinteger

interval 3 output rate in mbps

eth_outframes3

Type: uinteger

interval 3 output rate in output frames (pkts)

Command Modes

- /exec

show interface counters detailed (if_manager)

show interface ifmgmt_ctr_dtl counters detailed [ __readonly__ TABLE_interface interface [vdc_lvl_in_pkts] [vdc_lvl_in_bytes] [vdc_lvl_in_ucast] [vdc_lvl_in_mcast] [vdc_lvl_in_bcast] [vdc_lvl_in_bps] [vdc_lvl_in_pps] [vdc_lvl_in_avg_pkts] [vdc_lvl_in_avg_bytes] [vdc_lvl_out_pkts] [vdc_lvl_out_bytes] [vdc_lvl_out_ucast] [vdc_lvl_out_mcast] [vdc_lvl_out_bcast] [vdc_lvl_out_bps] [vdc_lvl_out_pps] [vdc_lvl_out_avg_pkts] [vdc_lvl_out_avg_bytes] [mgmt_in_pkts] [mgmt_in_bytes] [mgmt_in_mcast] [mgmt_in_compressed] [mgmt_in_errors] [mgmt_in_frame] [mgmt_in_overrun] [mgmt_in_fifo] [mgmt_out_pkts] [mgmt_out_bytes] [mgmt_out_underruns] [mgmt_out_errors] [mgmt_out_collisions] [mgmt_out_fifo] [mgmt_out_carrier] [mgmt_align_err] [mgmt_fcs_err] [mgmt_xmit_err] [mgmt_rcv_err] [mgmt_undersize] [mgmt_outdisc] [mgmt_single_col] [mgmt_multi_col] [mgmt_late_col] [mgmt_excess_col] [mgmt_carri_sen] [mgmt_runts] [mgmt_giants] [mgmt_sqetest_err] [mgmt_deferred_tx] [mgmt_inmactx_err] [mgmt_inmacrx_err] [mgmt_symbol_err] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifmgmt_ctr_dtl

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

vdc_lvl_in_pkts

Type: longlong

VDC level input packets

vdc_lvl_in_bytes

Type: longlong

VDC level input bytes

vdc_lvl_in_ucast

Type: longlong

VDC level input unicast packets

vdc_lvl_in_mcast

Type: longlong

VDC level input multicast packets

vdc_lvl_in_bcast

Type: longlong

VDC level input broadcast packets

vdc_lvl_in_bps

Type: longlong

VDC level input bytes per second

vdc_lvl_in_pps

Type: longlong

VDC level input packets per second

vdc_lvl_in_avg_pkts

Type: longlong

VDC level average input packets

vdc_lvl_in_avg_bytes

Type: longlong

VDC level average input bytes

vdc_lvl_out_pkts

Type: longlong

VDC level output packets

vdc_lvl_out_bytes

Type: longlong

VDC level output bytes

vdc_lvl_out_ucast

Type: longlong

VDC level output unicast packets

vdc_lvl_out_mcast

Type: longlong

VDC level output multicast packets

vdc_lvl_out_bcast

Type: longlong

VDC level output broadcast packets

vdc_lvl_out_bps

Type: longlong

VDC level output bytes per second

vdc_lvl_out_pps

Type: longlong

VDC level output packets per second

vdc_lvl_out_avg_pkts

Type: longlong

VDC level average output packets

vdc_lvl_out_avg_bytes

Type: longlong

VDC level average output bytes

mgmt_in_pkts

Type: uinteger

Input packets

mgmt_in_bytes

Type: uinteger

Input bytes

mgmt_in_mcast

Type: uinteger

Input multicast frames

mgmt_in_compressed

Type: uinteger

Input compressed

mgmt_in_errors

Type: uinteger

Input errors

mgmt_in_frame

Type: uinteger

Input frame errors

mgmt_in_overrun

Type: uinteger

Input overrun

mgmt_in_fifo

Type: uinteger

Input fifo

mgmt_out_pkts

Type: uinteger

Output packets

mgmt_out_bytes

Type: uinteger

Output bytes

mgmt_out_underruns

Type: uinteger

Output overruns

mgmt_out_errors

Type: uinteger

Output errors

mgmt_out_collisions

Type: uinteger

Output collisions

mgmt_out_fifo

Type: uinteger

Output fifo

mgmt_out_carrier

Type: uinteger

Output carrier errors

mgmt_align_err

Type: longlong

Align error

mgmt_fcs_err

Type: longlong

FCS error

mgmt_xmit_err

Type: longlong

Transmit error

mgmt_rcv_err

Type: longlong

Receive error

mgmt_undersize

Type: longlong

Undersize

mgmt_outdisc

Type: longlong

Out discard

mgmt_single_col

Type: longlong

Single collision

mgmt_multi_col

Type: longlong

Multiple collision

mgmt_late_col

Type: longlong

Late collision

mgmt_excess_col

Type: longlong

Excess collision

mgmt_carri_sen

Type: longlong

Carrier sense

mgmt_runts

Type: longlong

Runts

mgmt_giants

Type: longlong

Giants

mgmt_sqetest_err

Type: longlong

SQETest error

mgmt_deferred_tx

Type: longlong

Deferred tx

mgmt_inmactx_err

Type: longlong

In MAC tx

mgmt_inmacrx_err

Type: longlong

In MAC rx

mgmt_symbol_err

Type: longlong

Symbol error

Command Modes

- /exec

show interface counters detailed (if_manager)

show interface ifloop_ctr_dtl counters detailed [ __readonly__ TABLE_interface interface [loop_in_pkts] [loop_in_bytes] [loop_in_mcast] [loop_in_compressed] [loop_in_errors] [loop_in_frame] [loop_in_overrun] [loop_in_fifo] [loop_out_pkts] [loop_out_bytes] [loop_out_underruns] [loop_out_errors] [loop_out_collisions] [loop_out_fifo] [loop_out_carriers] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifloop_ctr_dtl

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

loop_in_pkts

Type: uinteger

Input packets

loop_in_bytes

Type: uinteger

Input bytes

loop_in_mcast

Type: uinteger

Input multicast

loop_in_compressed

Type: uinteger

Input compressed

loop_in_errors

Type: uinteger

Input errors

loop_in_frame

Type: uinteger

Input frame errors

loop_in_overrun

Type: uinteger

Input overrun

loop_in_fifo

Type: uinteger

Input fifo

loop_out_pkts

Type: uinteger

Output packets

loop_out_bytes

Type: uinteger

Output bytes

loop_out_underruns

Type: uinteger

Output underruns

loop_out_errors

Type: uinteger

Output errors

loop_out_collisions

Type: uinteger

Output collisions

loop_out_fifo

Type: uinteger

Output fifo

loop_out_carriers

Type: uinteger

Output carrier errors

Command Modes

- /exec

show interface counters detailed (if_manager)

show interface ifeth_ctr_dtl counters detailed [snmp] [ __readonly__ TABLE_interface interface [eth_load_interval1] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_inpkts] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_ingiants] [eth_inbytes] [eth_storm_supp] [eth_inb64] [eth_inb65_127] [eth_inb128_255] [eth_inb256_511] [eth_inb512_1023] [eth_inb1024_1518] [eth_inb1519_1548] [eth_intrunk] [eth_outpkts] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_outgiants] [eth_outbytes] [eth_outb64] [eth_outb65_127] [eth_outb128_255] [eth_outb256_511] [eth_outb512_1023] [eth_outb1024_1518] [eth_outb1519_1548] [eth_outtrunk] [eth_nobuf] [eth_runts] [eth_crc] [eth_ecc] [eth_overrun] [eth_underrun] [eth_ignored] [eth_bad_eth] [eth_bad_proto] [eth_in_ifdown_drops] [eth_coll] [eth_latecoll] [eth_lostcarrier] [eth_nocarrier] [eth_babbles] [eth_watchdog] [eth_dribble] [eth_inerr] [eth_outerr] [eth_deferred] [eth_jabbers] [eth_shortframe] [eth_single_coll] [eth_multi_coll] [eth_excess_coll] [eth_indiscard] [eth_bad_encap] [eth_outcrc] [eth_symbol] [eth_out_drops] [eth_bpdu_outlost] [eth_cos0_outlost] [eth_cos1_outlost] [eth_cos2_outlost] [eth_cos3_outlost] [eth_cos4_outlost] [eth_cos5_outlost] [eth_cos6_outlost] [eth_cos7_outlost] [eth_inpause] [eth_outpause] [eth_resets] [eth_sqetest] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_ipmcast] [eth_inhw_switched] [eth_insw_switched] [eth_throtles] [eth_frame] [eth_outhw_switched] [eth_outsw_switched] [eth_buffail] [eth_bufswapped] [eth_arpdrops] [eth_out_ifdown_drops] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_ctr_dtl

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

snmp

Show SNMP MIB values

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

eth_load_interval1

Type: uinteger

interval 1 timer value in sec

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_inpkts

Type: longlong

Packets input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_ingiants

Type: longlong

giants

eth_inbytes

Type: longlong

Bytes input

eth_storm_supp

Type: longlong

storm suppression

eth_inb64

Type: longlong

input pkts between 0 and 64 bytes

eth_inb65_127

Type: longlong

input pkts between 65 and 127 bytes

eth_inb128_255

Type: longlong

input pkts between 128 and 255 bytes

eth_inb256_511

Type: longlong

input pkts between 256 and 511 bytes

eth_inb512_1023

Type: longlong

input pkts between 512 and 1023 bytes

eth_inb1024_1518

Type: longlong

input pkts between 1024 and 1518 bytes

eth_inb1519_1548

Type: longlong

input pkts between 1519 and 1548 bytes

eth_intrunk

Type: longlong

input trunk pkts

eth_outpkts

Type: longlong

packets output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_outgiants

Type: longlong

giants

eth_outbytes

Type: longlong

bytes output

eth_outb64

Type: longlong

output pkts between 0 and 64 bytes

eth_outb65_127

Type: longlong

output pkts between 65 and 127 bytes

eth_outb128_255

Type: longlong

output pkts between 128 and 255 bytes

eth_outb256_511

Type: longlong

output pkts between 256 and 511 bytes

eth_outb512_1023

Type: longlong

output pkts between 512 and 1023 bytes

eth_outb1024_1518

Type: longlong

output pkts between 1024 and 1518 bytes

eth_outb1519_1548

Type: longlong

output pkts between 1519 and 1548 bytes

eth_outtrunk

Type: longlong

output trunk pkts

eth_nobuf

Type: longlong

No buffer received

eth_runts

Type: longlong

runts

eth_crc

Type: longlong

CRC

eth_ecc

Type: longlong

ECC

eth_overrun

Type: longlong

overrun

eth_underrun

Type: longlong

underruns

eth_ignored

Type: longlong

ignored

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_coll

Type: longlong

collisions

eth_latecoll

Type: longlong

late collision

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_babbles

Type: longlong

babbles

eth_watchdog

Type: longlong

watchdog

eth_dribble

Type: longlong

input packets with dribble condition

eth_inerr

Type: longlong

input errors

eth_outerr

Type: longlong

output errors

eth_deferred

Type: longlong

deferred

eth_jabbers

Type: longlong

jabbers

eth_shortframe

Type: longlong

short frames

eth_single_coll

Type: longlong

single collisions

eth_multi_coll

Type: longlong

multi collisions

eth_excess_coll

Type: longlong

excessive collisions

eth_indiscard

Type: longlong

discards

eth_bad_encap

Type: longlong

bad encapsulation

eth_outcrc

Type: longlong

Output CRC

eth_symbol

Type: longlong

symbol errors

eth_out_drops

Type: longlong

output drops

eth_bpdu_outlost

Type: longlong

BPDU output lost

eth_cos0_outlost

Type: longlong

output pkts

eth_cos1_outlost

Type: longlong

output pkts

eth_cos2_outlost

Type: longlong

output pkts

eth_cos3_outlost

Type: longlong

output pkts

eth_cos4_outlost

Type: longlong

output pkts

eth_cos5_outlost

Type: longlong

output pkts

eth_cos6_outlost

Type: longlong

output pkts

eth_cos7_outlost

Type: longlong

output pkts

eth_inpause

Type: longlong

pause input

eth_outpause

Type: longlong

PAUSE output

eth_resets

Type: longlong

interface resets

eth_sqetest

Type: longlong

SQE test

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_ipmcast

Type: longlong

IP multicast

eth_inhw_switched

Type: longlong

Input H/W Switched

eth_insw_switched

Type: longlong

Input S/W Switched

eth_throtles

Type: longlong

throttles

eth_frame

Type: longlong

frame

eth_outhw_switched

Type: longlong

Out H/W Switched

eth_outsw_switched

Type: longlong

Out S/W Switched

eth_buffail

Type: longlong

output buffer failures

eth_bufswapped

Type: longlong

output buffers swapped out

eth_arpdrops

Type: longlong

arp drops

eth_out_ifdown_drops

Type: longlong

Output if-down drops

Command Modes

- /exec

show interface counters detailed (if_manager)

show interface counters detailed [snmp] [ __readonly__ TABLE_interface interface [vdc_lvl_in_pkts] [vdc_lvl_in_bytes] [vdc_lvl_in_ucast] [vdc_lvl_in_mcast] [vdc_lvl_in_bcast] [vdc_lvl_in_bps] [vdc_lvl_in_pps] [vdc_lvl_in_avg_pkts] [vdc_lvl_in_avg_bytes] [vdc_lvl_out_pkts] [vdc_lvl_out_bytes] [vdc_lvl_out_ucast] [vdc_lvl_out_mcast] [vdc_lvl_out_bcast] [vdc_lvl_out_bps] [vdc_lvl_out_pps] [vdc_lvl_out_avg_pkts] [vdc_lvl_out_avg_bytes] [mgmt_in_pkts] [mgmt_in_bytes] [mgmt_in_mcast] [mgmt_in_compressed] [mgmt_in_errors] [mgmt_in_frame] [mgmt_in_overrun] [mgmt_in_fifo] [mgmt_out_pkts] [mgmt_out_bytes] [mgmt_out_underruns] [mgmt_out_errors] [mgmt_out_collisions] [mgmt_out_fifo] [mgmt_out_carrier] [mgmt_align_err] [mgmt_fcs_err] [mgmt_xmit_err] [mgmt_rcv_err] [mgmt_undersize] [mgmt_outdisc] [mgmt_single_col] [mgmt_multi_col] [mgmt_late_col] [mgmt_excess_col] [mgmt_carri_sen] [mgmt_runts] [mgmt_giants] [mgmt_sqetest_err] [mgmt_deferred_tx] [mgmt_inmactx_err] [mgmt_inmacrx_err] [mgmt_symbol_err] [loop_in_pkts] [loop_in_bytes] [loop_in_mcast] [loop_in_compressed] [loop_in_errors] [loop_in_frame] [loop_in_overrun] [loop_in_fifo] [loop_out_pkts] [loop_out_bytes] [loop_out_underruns] [loop_out_errors] [loop_out_collisions] [loop_out_fifo] [loop_out_carriers] [eth_load_interval1] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_inpkts] [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_ingiants] [eth_inbytes] [eth_storm_supp] [eth_inb64] [eth_inb65_127] [eth_inb128_255] [eth_inb256_511] [eth_inb512_1023] [eth_inb1024_1518] [eth_inb1519_1548] [eth_intrunk] [eth_outpkts] [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_outgiants] [eth_outbytes] [eth_outb64] [eth_outb65_127] [eth_outb128_255] [eth_outb256_511] [eth_outb512_1023] [eth_outb1024_1518] [eth_outb1519_1548] [eth_outtrunk] [eth_nobuf] [eth_runts] [eth_crc] [eth_ecc] [eth_overrun] [eth_underrun] [eth_ignored] [eth_bad_eth] [eth_bad_proto] [eth_in_ifdown_drops] [eth_coll] [eth_latecoll] [eth_lostcarrier] [eth_nocarrier] [eth_babbles] [eth_watchdog] [eth_dribble] [eth_inerr] [eth_outerr] [eth_deferred] [eth_jabbers] [eth_shortframe] [eth_single_coll] [eth_multi_coll] [eth_excess_coll] [eth_indiscard] [eth_bad_encap] [eth_outcrc] [eth_symbol] [eth_out_drops] [eth_bpdu_outlost] [eth_cos0_outlost] [eth_cos1_outlost] [eth_cos2_outlost] [eth_cos3_outlost] [eth_cos4_outlost] [eth_cos5_outlost] [eth_cos6_outlost] [eth_cos7_outlost] [eth_inpause] [eth_outpause] [eth_resets] [eth_sqetest] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_ipmcast] [eth_inhw_switched] [eth_insw_switched] [eth_throtles] [eth_frame] [eth_outhw_switched] [eth_outsw_switched] [eth_buffail] [eth_bufswapped] [eth_arpdrops] [eth_out_ifdown_drops] [eth_fcoe_in_pkts] [eth_fcoe_in_octets] [eth_fcoe_out_pkts] [eth_fcoe_out_octets] [eth_nfcoe_in_pkts] [eth_nfcoe_in_octets] [eth_nfcoe_out_pkts] [eth_nfcoe_out_octets] [svi_routed_pkts_in] [svi_routed_bytes_in] [svi_routed_pkts_out] [svi_routed_bytes_out] [svi_ucast_pkts_in] [svi_ucast_bytes_in] [svi_mcast_pkts_in] [svi_mcast_bytes_in] [svi_ucast_pkts_out] [svi_ucast_bytes_out] [svi_mcast_pkts_out] [svi_mcast_bytes_out] [svi_ipv4_ucast_pkts_in] [svi_ipv4_ucast_bytes_in] [svi_ipv4_ucast_pkts_out] [svi_ipv4_ucast_bytes_out] [svi_ipv4_mcast_pkts_in] [svi_ipv4_mcast_bytes_in] [svi_ipv4_mcast_pkts_out] [svi_ipv4_mcast_bytes_out] [svi_ipv6_ucast_pkts_in] [svi_ipv6_ucast_bytes_in] [svi_ipv6_ucast_pkts_out] [svi_ipv6_ucast_bytes_out] [svi_ipv6_mcast_pkts_in] [svi_ipv6_mcast_bytes_in] [svi_ipv6_mcast_pkts_out] [svi_ipv6_mcast_bytes_out] [svi_average_input_bits] [svi_average_input_packets] [svi_average_output_bits] [svi_average_output_packets] [svi_rate_in_mins] [svi_time_last_cleared] [svi_tx_load] [svi_rx_load] [svi_reliability] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

detailed

Show only non-zero counters

snmp

Show SNMP MIB values

__readonly__

Read Only

TABLE_interface

show interface

interface

Type: interface

Interface index

vdc_lvl_in_pkts

Type: longlong

VDC level input packets

vdc_lvl_in_bytes

Type: longlong

VDC level input bytes

vdc_lvl_in_ucast

Type: longlong

VDC level input unicast packets

vdc_lvl_in_mcast

Type: longlong

VDC level input multicast packets

vdc_lvl_in_bcast

Type: longlong

VDC level input broadcast packets

vdc_lvl_in_bps

Type: longlong

VDC level input bytes per second

vdc_lvl_in_pps

Type: longlong

VDC level input packets per second

vdc_lvl_in_avg_pkts

Type: longlong

VDC level average input packets

vdc_lvl_in_avg_bytes

Type: longlong

VDC level average input bytes

vdc_lvl_out_pkts

Type: longlong

VDC level output packets

vdc_lvl_out_bytes

Type: longlong

VDC level output bytes

vdc_lvl_out_ucast

Type: longlong

VDC level output unicast packets

vdc_lvl_out_mcast

Type: longlong

VDC level output multicast packets

vdc_lvl_out_bcast

Type: longlong

VDC level output broadcast packets

vdc_lvl_out_bps

Type: longlong

VDC level output bytes per second

vdc_lvl_out_pps

Type: longlong

VDC level output packets per second

vdc_lvl_out_avg_pkts

Type: longlong

VDC level average output packets

vdc_lvl_out_avg_bytes

Type: longlong

VDC level average output bytes

mgmt_in_pkts

Type: uinteger

Input packets

mgmt_in_bytes

Type: uinteger

Input bytes

mgmt_in_mcast

Type: uinteger

Input multicast frames

mgmt_in_compressed

Type: uinteger

Input compressed

mgmt_in_errors

Type: uinteger

Input errors

mgmt_in_frame

Type: uinteger

Input frame errors

mgmt_in_overrun

Type: uinteger

Input overrun

mgmt_in_fifo

Type: uinteger

Input fifo

mgmt_out_pkts

Type: uinteger

Output packets

mgmt_out_bytes

Type: uinteger

Output bytes

mgmt_out_underruns

Type: uinteger

Output overruns

mgmt_out_errors

Type: uinteger

Output errors

mgmt_out_collisions

Type: uinteger

Output collisions

mgmt_out_fifo

Type: uinteger

Output fifo

mgmt_out_carrier

Type: uinteger

Output carrier errors

mgmt_align_err

Type: longlong

Align error

mgmt_fcs_err

Type: longlong

FCS error

mgmt_xmit_err

Type: longlong

Transmit error

mgmt_rcv_err

Type: longlong

Receive error

mgmt_undersize

Type: longlong

Undersize

mgmt_outdisc

Type: longlong

Out discard

mgmt_single_col

Type: longlong

Single collision

mgmt_multi_col

Type: longlong

Multiple collision

mgmt_late_col

Type: longlong

Late collision

mgmt_excess_col

Type: longlong

Excess collision

mgmt_carri_sen

Type: longlong

Carrier sense

mgmt_runts

Type: longlong

Runts

mgmt_giants

Type: longlong

Giants

mgmt_sqetest_err

Type: longlong

SQETest error

mgmt_deferred_tx

Type: longlong

Deferred tx

mgmt_inmactx_err

Type: longlong

In MAC tx

mgmt_inmacrx_err

Type: longlong

In MAC rx

mgmt_symbol_err

Type: longlong

Symbol error

loop_in_pkts

Type: uinteger

Input packets

loop_in_bytes

Type: uinteger

Input bytes

loop_in_mcast

Type: uinteger

Input multicast

loop_in_compressed

Type: uinteger

Input compressed

loop_in_errors

Type: uinteger

Input errors

loop_in_frame

Type: uinteger

Input frame errors

loop_in_overrun

Type: uinteger

Input overrun

loop_in_fifo

Type: uinteger

Input fifo

loop_out_pkts

Type: uinteger

Output packets

loop_out_bytes

Type: uinteger

Output bytes

loop_out_underruns

Type: uinteger

Output underruns

loop_out_errors

Type: uinteger

Output errors

loop_out_collisions

Type: uinteger

Output collisions

loop_out_fifo

Type: uinteger

Output fifo

loop_out_carriers

Type: uinteger

Output carrier errors

eth_load_interval1

Type: uinteger

interval 1 timer value in sec

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_inpkts

Type: longlong

Packets input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_ingiants

Type: longlong

giants

eth_inbytes

Type: longlong

Bytes input

eth_storm_supp

Type: longlong

storm suppression

eth_inb64

Type: longlong

input pkts between 0 and 64 bytes

eth_inb65_127

Type: longlong

input pkts between 65 and 127 bytes

eth_inb128_255

Type: longlong

input pkts between 128 and 255 bytes

eth_inb256_511

Type: longlong

input pkts between 256 and 511 bytes

eth_inb512_1023

Type: longlong

input pkts between 512 and 1023 bytes

eth_inb1024_1518

Type: longlong

input pkts between 1024 and 1518 bytes

eth_inb1519_1548

Type: longlong

input pkts between 1519 and 1548 bytes

eth_intrunk

Type: longlong

input trunk pkts

eth_outpkts

Type: longlong

packets output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_outgiants

Type: longlong

giants

eth_outbytes

Type: longlong

bytes output

eth_outb64

Type: longlong

output pkts between 0 and 64 bytes

eth_outb65_127

Type: longlong

output pkts between 65 and 127 bytes

eth_outb128_255

Type: longlong

output pkts between 128 and 255 bytes

eth_outb256_511

Type: longlong

output pkts between 256 and 511 bytes

eth_outb512_1023

Type: longlong

output pkts between 512 and 1023 bytes

eth_outb1024_1518

Type: longlong

output pkts between 1024 and 1518 bytes

eth_outb1519_1548

Type: longlong

output pkts between 1519 and 1548 bytes

eth_outtrunk

Type: longlong

output trunk pkts

eth_nobuf

Type: longlong

No buffer received

eth_runts

Type: longlong

runts

eth_crc

Type: longlong

CRC

eth_ecc

Type: longlong

ECC

eth_overrun

Type: longlong

overrun

eth_underrun

Type: longlong

underruns

eth_ignored

Type: longlong

ignored

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_coll

Type: longlong

collisions

eth_latecoll

Type: longlong

late collision

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_babbles

Type: longlong

babbles

eth_watchdog

Type: longlong

watchdog

eth_dribble

Type: longlong

input packets with dribble condition

eth_inerr

Type: longlong

input errors

eth_outerr

Type: longlong

output errors

eth_deferred

Type: longlong

deferred

eth_jabbers

Type: longlong

jabbers

eth_shortframe

Type: longlong

short frames

eth_single_coll

Type: longlong

single collisions

eth_multi_coll

Type: longlong

multi collisions

eth_excess_coll

Type: longlong

excessive collisions

eth_indiscard

Type: longlong

discards

eth_bad_encap

Type: longlong

bad encapsulation

eth_outcrc

Type: longlong

Output CRC

eth_symbol

Type: longlong

symbol errors

eth_out_drops

Type: longlong

output drops

eth_bpdu_outlost

Type: longlong

BPDU output lost

eth_cos0_outlost

Type: longlong

output pkts

eth_cos1_outlost

Type: longlong

output pkts

eth_cos2_outlost

Type: longlong

output pkts

eth_cos3_outlost

Type: longlong

output pkts

eth_cos4_outlost

Type: longlong

output pkts

eth_cos5_outlost

Type: longlong

output pkts

eth_cos6_outlost

Type: longlong

output pkts

eth_cos7_outlost

Type: longlong

output pkts

eth_inpause

Type: longlong

pause input

eth_outpause

Type: longlong

PAUSE output

eth_resets

Type: longlong

interface resets

eth_sqetest

Type: longlong

SQE test

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_ipmcast

Type: longlong

IP multicast

eth_inhw_switched

Type: longlong

Input H/W Switched

eth_insw_switched

Type: longlong

Input S/W Switched

eth_throtles

Type: longlong

throttles

eth_frame

Type: longlong

frame

eth_outhw_switched

Type: longlong

Out H/W Switched

eth_outsw_switched

Type: longlong

Out S/W Switched

eth_buffail

Type: longlong

output buffer failures

eth_bufswapped

Type: longlong

output buffers swapped out

eth_arpdrops

Type: longlong

arp drops

eth_out_ifdown_drops

Type: longlong

Output if-down drops

eth_fcoe_in_pkts

Type: longlong

fcoe in pkts

eth_fcoe_in_octets

Type: longlong

fcoe in octets

eth_fcoe_out_pkts

Type: longlong

fcoe out pkts

eth_fcoe_out_octets

Type: longlong

fcoe out octets

eth_nfcoe_in_pkts

Type: longlong

nfcoe in pkts

eth_nfcoe_in_octets

Type: longlong

nfcoe in octets

eth_nfcoe_out_pkts

Type: longlong

nfcoe out pkts

eth_nfcoe_out_octets

Type: longlong

nfcoe out octets

svi_routed_pkts_in

Type: long

in routed pkts

svi_routed_bytes_in

Type: long

in routed bytes

svi_routed_pkts_out

Type: long

out routed pkts

svi_routed_bytes_out

Type: long

out routed bytes

svi_ucast_pkts_in

Type: long

in unicast pkts

svi_ucast_bytes_in

Type: long

in unicast bytes

svi_mcast_pkts_in

Type: long

in multicast pkts

svi_mcast_bytes_in

Type: long

in multicast bytes

svi_ucast_pkts_out

Type: long

out unicast pkts

svi_ucast_bytes_out

Type: long

out unicast bytes

svi_mcast_pkts_out

Type: long

out multicast pkts

svi_mcast_bytes_out

Type: long

out multicast bytes

svi_ipv4_ucast_pkts_in

Type: long

IPv4 in unicast pkts

svi_ipv4_ucast_bytes_in

Type: long

IPv4 in unicast bytes

svi_ipv4_ucast_pkts_out

Type: long

IPv4 out unicast pkts

svi_ipv4_ucast_bytes_out

Type: long

IPv4 out unicast bytes

svi_ipv4_mcast_pkts_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_bytes_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_pkts_out

Type: long

IPv4 out multicast pkts

svi_ipv4_mcast_bytes_out

Type: long

IPv4 out multicast bytes

svi_ipv6_ucast_pkts_in

Type: long

IPv6 in unicast pkts

svi_ipv6_ucast_bytes_in

Type: long

IPv6 in unicast bytes

svi_ipv6_ucast_pkts_out

Type: long

IPv6 out unicast pkts

svi_ipv6_ucast_bytes_out

Type: long

IPv6 out unicast bytes

svi_ipv6_mcast_pkts_in

Type: long

IPv6 in multicast pkts

svi_ipv6_mcast_bytes_in

Type: long

IPv6 in multicast bytes

svi_ipv6_mcast_pkts_out

Type: long

IPv6 out multicast pkts

svi_ipv6_mcast_bytes_out

Type: long

IPv6 out multicast bytes

svi_average_input_bits

Type: long

Input rate bits/sec

svi_average_input_packets

Type: long

Input rate bits/sec

svi_average_output_bits

Type: long

Output rate bits/sec

svi_average_output_packets

Type: long

Output rate bits/sec

svi_rate_in_mins

Type: long

Time in mins for which average rate is computed

svi_time_last_cleared

Type: string

Time last cleared

svi_tx_load

Type: uinteger

Tx Load

svi_rx_load

Type: uinteger

Rx Load

svi_reliability

Type: uinteger

Reliability

Command Modes

- /exec

show interface counters detailed all (if_manager)

show interface ifid_ctr_dtl_all counters detailed all [snmp]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_ctr_dtl_all

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

all

Show every interface counter

snmp

Show SNMP MIB values

Command Modes

- /exec

show interface counters detailed all (if_manager)

show interface ifmgmt_ctr_dtl_all counters detailed all [ __readonly__ TABLE_interface interface [vdc_lvl_in_pkts] [vdc_lvl_in_bytes] [vdc_lvl_in_ucast] [vdc_lvl_in_mcast] [vdc_lvl_in_bcast] [vdc_lvl_in_bps] [vdc_lvl_in_pps] [vdc_lvl_in_avg_pkts] [vdc_lvl_in_avg_bytes] [vdc_lvl_out_pkts] [vdc_lvl_out_bytes] [vdc_lvl_out_ucast] [vdc_lvl_out_mcast] [vdc_lvl_out_bcast] [vdc_lvl_out_bps] [vdc_lvl_out_pps] [vdc_lvl_out_avg_pkts] [vdc_lvl_out_avg_bytes] [mgmt_in_pkts] [mgmt_in_bytes] [mgmt_in_mcast] [mgmt_out_pkts] [mgmt_out_bytes] [mgmt_in_errors] [mgmt_out_errors] [mgmt_in_fifo] [mgmt_out_fifo] [mgmt_in_compressed] [mgmt_in_frame] [mgmt_in_overrun] [mgmt_out_underruns] [mgmt_out_collisions] [mgmt_out_carrier] [mgmt_align_err] [mgmt_fcs_err] [mgmt_xmit_err] [mgmt_rcv_err] [mgmt_undersize] [mgmt_outdisc] [mgmt_single_col] [mgmt_multi_col] [mgmt_late_col] [mgmt_excess_col] [mgmt_carri_sen] [mgmt_runts] [mgmt_giants] [mgmt_sqetest_err] [mgmt_deferred_tx] [mgmt_inmactx_err] [mgmt_inmacrx_err] [mgmt_symbol_err] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifmgmt_ctr_dtl_all

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

all

Show every interface counter

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

vdc_lvl_in_pkts

Type: longlong

VDC level input packets

vdc_lvl_in_bytes

Type: longlong

VDC level input bytes

vdc_lvl_in_ucast

Type: longlong

VDC level input unicast packets

vdc_lvl_in_mcast

Type: longlong

VDC level input multicast packets

vdc_lvl_in_bcast

Type: longlong

VDC level input broadcast packets

vdc_lvl_in_bps

Type: longlong

VDC level input bytes per second

vdc_lvl_in_pps

Type: longlong

VDC level input packets per second

vdc_lvl_in_avg_pkts

Type: longlong

VDC level average input packets

vdc_lvl_in_avg_bytes

Type: longlong

VDC level average input bytes

vdc_lvl_out_pkts

Type: longlong

VDC level output packets

vdc_lvl_out_bytes

Type: longlong

VDC level output bytes

vdc_lvl_out_ucast

Type: longlong

VDC level output unicast packets

vdc_lvl_out_mcast

Type: longlong

VDC level output multicast packets

vdc_lvl_out_bcast

Type: longlong

VDC level output broadcast packets

vdc_lvl_out_bps

Type: longlong

VDC level output bytes per second

vdc_lvl_out_pps

Type: longlong

VDC level output packets per second

vdc_lvl_out_avg_pkts

Type: longlong

VDC level average output packets

vdc_lvl_out_avg_bytes

Type: longlong

VDC level average output bytes

mgmt_in_pkts

Type: uinteger

Input packets

mgmt_in_bytes

Type: uinteger

Input bytes

mgmt_in_mcast

Type: uinteger

Input multicast frames

mgmt_out_pkts

Type: uinteger

Output packets

mgmt_out_bytes

Type: uinteger

Output bytes

mgmt_in_errors

Type: uinteger

Input errors

mgmt_out_errors

Type: uinteger

Output errors

mgmt_in_fifo

Type: uinteger

Input fifo

mgmt_out_fifo

Type: uinteger

Output fifo

mgmt_in_compressed

Type: uinteger

Input compressed

mgmt_in_frame

Type: uinteger

Input frame errors

mgmt_in_overrun

Type: uinteger

Input overrun

mgmt_out_underruns

Type: uinteger

Output overruns

mgmt_out_collisions

Type: uinteger

Output collisions

mgmt_out_carrier

Type: uinteger

Output carrier errors

mgmt_align_err

Type: longlong

Align error

mgmt_fcs_err

Type: longlong

FCS error

mgmt_xmit_err

Type: longlong

Transmit error

mgmt_rcv_err

Type: longlong

Receive error

mgmt_undersize

Type: longlong

Undersize

mgmt_outdisc

Type: longlong

Out discard

mgmt_single_col

Type: longlong

Single collision

mgmt_multi_col

Type: longlong

Multiple collision

mgmt_late_col

Type: longlong

Late collision

mgmt_excess_col

Type: longlong

Excess collision

mgmt_carri_sen

Type: longlong

Carrier sense

mgmt_runts

Type: longlong

Runts

mgmt_giants

Type: longlong

Giants

mgmt_sqetest_err

Type: longlong

SQETest error

mgmt_deferred_tx

Type: longlong

Deferred tx

mgmt_inmactx_err

Type: longlong

In MAC tx

mgmt_inmacrx_err

Type: longlong

In MAC rx

mgmt_symbol_err

Type: longlong

Symbol error

Command Modes

- /exec

show interface counters detailed all (if_manager)

show interface ifloop_ctr_dtl_all counters detailed all [ __readonly__ TABLE_interface interface [rx_total_pkts] [tx_total_pkts] [rx_mcast_pkts] [rx_octets] [tx_octets] [loop_in_pkts] [loop_in_bytes] [loop_in_mcast] [loop_in_compressed] [loop_in_errors] [loop_in_frame] [loop_in_overrun] [loop_in_fifo] [loop_out_pkts] [loop_out_bytes] [loop_out_underruns] [loop_out_errors] [loop_out_collisions] [loop_out_fifo] [loop_out_carriers] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifloop_ctr_dtl_all

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

all

Show every interface counter

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

rx_total_pkts

Type: longlong

total input packets

tx_total_pkts

Type: longlong

total output packets

rx_mcast_pkts

Type: longlong

input multicasts

rx_octets

Type: longlong

input bytes

tx_octets

Type: longlong

output bytes

loop_in_pkts

Type: longlong

Input packets

loop_in_bytes

Type: longlong

Input bytes

loop_in_mcast

Type: longlong

Input multicast

loop_in_compressed

Type: longlong

Input compressed

loop_in_errors

Type: longlong

Input errors

loop_in_frame

Type: longlong

Input frame errors

loop_in_overrun

Type: longlong

Input overrun

loop_in_fifo

Type: longlong

Input fifo

loop_out_pkts

Type: longlong

Output packets

loop_out_bytes

Type: longlong

Output bytes

loop_out_underruns

Type: longlong

Output underruns

loop_out_errors

Type: longlong

Output errors

loop_out_collisions

Type: longlong

Output collisions

loop_out_fifo

Type: longlong

Output fifo

loop_out_carriers

Type: longlong

Output carrier errors

Command Modes

- /exec

show interface counters detailed all (if_manager)

show interface ifrange counters detailed all [snmp] [ __readonly__ TABLE_interface interface [svi_routed_pkts_in] [svi_routed_bytes_in] [svi_routed_pkts_out] [svi_routed_bytes_out] [svi_ucast_pkts_in] [svi_ucast_bytes_in] [svi_mcast_pkts_in] [svi_mcast_bytes_in] [svi_ucast_pkts_out] [svi_ucast_bytes_out] [svi_mcast_pkts_out] [svi_mcast_bytes_out] [svi_ipv4_ucast_pkts_in] [svi_ipv4_ucast_bytes_in] [svi_ipv4_ucast_pkts_out] [svi_ipv4_ucast_bytes_out] [svi_ipv4_mcast_pkts_in] [svi_ipv4_mcast_bytes_in] [svi_ipv4_mcast_pkts_out] [svi_ipv4_mcast_bytes_out] [svi_ipv6_ucast_pkts_in] [svi_ipv6_ucast_bytes_in] [svi_ipv6_ucast_pkts_out] [svi_ipv6_ucast_bytes_out] [svi_ipv6_mcast_pkts_in] [svi_ipv6_mcast_bytes_in] [svi_ipv6_mcast_pkts_out] [svi_ipv6_mcast_bytes_out] [svi_average_input_bits] [svi_average_input_packets] [svi_average_output_bits] [svi_average_output_packets] [svi_rate_in_mins] [svi_time_last_cleared] [svi_tx_load] [svi_rx_load] [svi_reliability] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifrange

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

all

everything

snmp

Show SNMP MIB values

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

svi_routed_pkts_in

Type: long

in routed pkts

svi_routed_bytes_in

Type: long

in routed bytes

svi_routed_pkts_out

Type: long

out routed pkts

svi_routed_bytes_out

Type: long

out routed bytes

svi_ucast_pkts_in

Type: long

in unicast pkts

svi_ucast_bytes_in

Type: long

in unicast bytes

svi_mcast_pkts_in

Type: long

in multicast pkts

svi_mcast_bytes_in

Type: long

in multicast bytes

svi_ucast_pkts_out

Type: long

out unicast pkts

svi_ucast_bytes_out

Type: long

out unicast bytes

svi_mcast_pkts_out

Type: long

out multicast pkts

svi_mcast_bytes_out

Type: long

out multicast bytes

svi_ipv4_ucast_pkts_in

Type: long

IPv4 in unicast pkts

svi_ipv4_ucast_bytes_in

Type: long

IPv4 in unicast bytes

svi_ipv4_ucast_pkts_out

Type: long

IPv4 out unicast pkts

svi_ipv4_ucast_bytes_out

Type: long

IPv4 out unicast bytes

svi_ipv4_mcast_pkts_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_bytes_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_pkts_out

Type: long

IPv4 out multicast pkts

svi_ipv4_mcast_bytes_out

Type: long

IPv4 out multicast bytes

svi_ipv6_ucast_pkts_in

Type: long

IPv6 in unicast pkts

svi_ipv6_ucast_bytes_in

Type: long

IPv6 in unicast bytes

svi_ipv6_ucast_pkts_out

Type: long

IPv6 out unicast pkts

svi_ipv6_ucast_bytes_out

Type: long

IPv6 out unicast bytes

svi_ipv6_mcast_pkts_in

Type: long

IPv6 in multicast pkts

svi_ipv6_mcast_bytes_in

Type: long

IPv6 in multicast bytes

svi_ipv6_mcast_pkts_out

Type: long

IPv6 out multicast pkts

svi_ipv6_mcast_bytes_out

Type: long

IPv6 out multicast bytes

svi_average_input_bits

Type: long

Input rate bits/sec

svi_average_input_packets

Type: long

Input rate bits/sec

svi_average_output_bits

Type: long

Output rate bits/sec

svi_average_output_packets

Type: long

Output rate bits/sec

svi_rate_in_mins

Type: long

Time in mins for which average rate is computed

svi_time_last_cleared

Type: string

Time last cleared

svi_tx_load

Type: uinteger

Tx Load

svi_rx_load

Type: uinteger

Rx Load

svi_reliability

Type: uinteger

Reliability

Command Modes

- /exec

show interface counters detailed all (if_manager)

show interface ifeth_ctr_dtl_all counters detailed all [snmp] [ __readonly__ TABLE_interface interface [rx_total_pkts] [tx_total_pkts] [rx_ucast_pkts] [rx_mcast_pkts] [rx_bcast_pkts] [rx_octets] [tx_ucast_pkts] [tx_mcast_pkts] [tx_bcast_pkts] [tx_octets] [rxtx_pkts_64octets] [rxtx_pkts_65_127octets] [rxtx_pkts_128_255octets] [rxtx_pkts_256_511octets] [rxtx_pkts_512_1023octets] [rxtx_pkts_1024_1518octets] [rxtx_pkts_1519_1548octets] [rx_trunk_frames] [tx_trunk_frames] [rx_drop_events] [rxtx_giants] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_l3avg2_inbytes] [eth_l3avg2_inpkts] [eth_l3avg2_outbytes] [eth_l3avg2_outpkts] [eth_l3avg3_inbytes] [eth_l3avg3_inpkts] [eth_l3avg3_outbytes] [eth_l3avg3_outpkts] [eth_inpkts] [eth_inbytes] [eth_nobuf] [eth_inbcast] [eth_inmcast] [eth_inucast] [eth_ingiants] [eth_ipmcast] [eth_inhw_switched] [eth_insw_switched] [eth_runts] [eth_storm_supp] [eth_throtles] [eth_inerr] [eth_crc] [eth_ecc] [eth_frame] [eth_overrun] [eth_ignored] [eth_watchdog] [eth_outbcast] [eth_outmcast] [eth_outucast] [eth_outgiants] [eth_inpause] [eth_dribble] [eth_in_ifdown_drops] [eth_bad_eth] [eth_bad_proto] [eth_outpkts] [eth_outbytes] [eth_underrun] [eth_outhw_switched] [eth_outsw_switched] [eth_outerr] [eth_coll] [eth_resets] [eth_babbles] [eth_latecoll] [eth_deferred] [eth_lostcarrier] [eth_nocarrier] [eth_outpause] [eth_buffail] [eth_bufswapped] [eth_arpdrops] [eth_out_ifdown_drops] [eth_single_coll] [eth_multi_coll] [eth_excess_coll] [eth_jabbers] [eth_shortframe] [eth_indiscard] [eth_bad_encap] [eth_outcrc] [eth_symbol] [eth_out_drops] [eth_sqetest] [eth_inb64] [eth_inb65_127] [eth_inb128_255] [eth_inb256_511] [eth_inb512_1023] [eth_inb1024_1518] [eth_inb1519_1548] [eth_intrunk] [eth_outb64] [eth_outb65_127] [eth_outb128_255] [eth_outb256_511] [eth_outb512_1023] [eth_outb1024_1518] [eth_outb1519_1548] [eth_outtrunk] [eth_bpdu_outlost] [eth_cos0_outlost] [eth_cos1_outlost] [eth_cos2_outlost] [eth_cos3_outlost] [eth_cos4_outlost] [eth_cos5_outlost] [eth_cos6_outlost] [eth_cos7_outlost] [eth_fcoe_in_pkts] [eth_fcoe_in_octets] [eth_fcoe_out_pkts] [eth_fcoe_out_octets] [eth_nfcoe_in_pkts] [eth_nfcoe_in_octets] [eth_nfcoe_out_pkts] [eth_nfcoe_out_octets] [eth_eee_atx_lpi_msec] [eth_eee_arcv_lpi_msec] [eth_eee_atx_lpi_transitions] [eth_eee_arcv_lpi_transitions] [eth_phy_ber_count] [eth_phy_errblks_count] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_ctr_dtl_all

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

detailed

Show only non-zero counters

all

everything

snmp

Show SNMP MIB values

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

rx_total_pkts

Type: longlong

total input packets

tx_total_pkts

Type: longlong

total output packets

rx_ucast_pkts

Type: longlong

input unicasts

rx_mcast_pkts

Type: longlong

input multicasts

rx_bcast_pkts

Type: longlong

input broadcasts

rx_octets

Type: longlong

input bytes

tx_ucast_pkts

Type: longlong

output unicasts

tx_mcast_pkts

Type: longlong

output multicasts

tx_bcast_pkts

Type: longlong

output broadcasts

tx_octets

Type: longlong

output bytes

rxtx_pkts_64octets

Type: longlong

all pkts between 0 and 64 bytes

rxtx_pkts_65_127octets

Type: longlong

all pkts between 65 and 127 bytes

rxtx_pkts_128_255octets

Type: longlong

all pkts between 128 and 255 bytes

rxtx_pkts_256_511octets

Type: longlong

all pkts between 256 and 511 bytes

rxtx_pkts_512_1023octets

Type: longlong

all pkts between 512 and 1023 bytes

rxtx_pkts_1024_1518octets

Type: longlong

all pkts between 1024 and 1518 bytes

rxtx_pkts_1519_1548octets

Type: longlong

all pkts between 1519 and 1548 bytes

rx_trunk_frames

Type: longlong

input trunk pkts

tx_trunk_frames

Type: longlong

output trunk pkts

rx_drop_events

Type: longlong

dropped pkts

rxtx_giants

Type: longlong

giants

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

IPv4 L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

IPv4 L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

IPv4 L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

IPv4 L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

IPv4 L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

IPv4 L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

IPv4 L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

IPv4 L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_l3avg2_inbytes

Type: longlong

Load interval 2 L3 average in switched bytes

eth_l3avg2_inpkts

Type: longlong

Load interval 2 L3 average in switched pkts

eth_l3avg2_outbytes

Type: longlong

Load interval 2 L3 average out switched bytes

eth_l3avg2_outpkts

Type: longlong

Load interval 2 L3 average out switched pkts

eth_l3avg3_inbytes

Type: longlong

Load interval 3 L3 average in switched bytes

eth_l3avg3_inpkts

Type: longlong

Load interval 3 L3 average in switched pkts

eth_l3avg3_outbytes

Type: longlong

Load interval 3 L3 average out switched bytes

eth_l3avg3_outpkts

Type: longlong

Load interval 3 L3 average out switched pkts

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_nobuf

Type: longlong

No buffer received

eth_inbcast

Type: longlong

Broadcasts

eth_inmcast

Type: longlong

Multicasts

eth_inucast

Type: longlong

Unicasts

eth_ingiants

Type: longlong

giants

eth_ipmcast

Type: longlong

IP multicast

eth_inhw_switched

Type: longlong

Input H/W Switched

eth_insw_switched

Type: longlong

Input S/W Switched

eth_runts

Type: longlong

runts

eth_storm_supp

Type: longlong

storm suppression

eth_throtles

Type: longlong

throttles

eth_inerr

Type: longlong

input errors

eth_crc

Type: longlong

CRC

eth_ecc

Type: longlong

ECC

eth_frame

Type: longlong

frame

eth_overrun

Type: longlong

overrun

eth_ignored

Type: longlong

ignored

eth_watchdog

Type: longlong

watchdog

eth_outbcast

Type: longlong

Broadcasts

eth_outmcast

Type: longlong

Multicasts

eth_outucast

Type: longlong

Unicasts

eth_outgiants

Type: longlong

giants

eth_inpause

Type: longlong

pause input

eth_dribble

Type: longlong

input packets with dribble condition

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_outpkts

Type: longlong

packets output

eth_outbytes

Type: longlong

bytes output

eth_underrun

Type: longlong

underruns

eth_outhw_switched

Type: longlong

Out H/W Switched

eth_outsw_switched

Type: longlong

Out S/W Switched

eth_outerr

Type: longlong

output errors

eth_coll

Type: longlong

collisions

eth_resets

Type: longlong

interface resets

eth_babbles

Type: longlong

babbles

eth_latecoll

Type: longlong

late collision

eth_deferred

Type: longlong

deferred

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_outpause

Type: longlong

PAUSE output

eth_buffail

Type: longlong

output buffer failures

eth_bufswapped

Type: longlong

output buffers swapped out

eth_arpdrops

Type: longlong

arp drops

eth_out_ifdown_drops

Type: longlong

Output if-down drops

eth_single_coll

Type: longlong

single collisions

eth_multi_coll

Type: longlong

multi collisions

eth_excess_coll

Type: longlong

excessive collisions

eth_jabbers

Type: longlong

jabbers

eth_shortframe

Type: longlong

short frames

eth_indiscard

Type: longlong

discards

eth_bad_encap

Type: longlong

bad encapsulation

eth_outcrc

Type: longlong

Output CRC

eth_symbol

Type: longlong

symbol errors

eth_out_drops

Type: longlong

output drops

eth_sqetest

Type: longlong

SQE test

eth_inb64

Type: longlong

input pkts between 0 and 64 bytes

eth_inb65_127

Type: longlong

input pkts between 65 and 127 bytes

eth_inb128_255

Type: longlong

input pkts between 128 and 255 bytes

eth_inb256_511

Type: longlong

input pkts between 256 and 511 bytes

eth_inb512_1023

Type: longlong

input pkts between 512 and 1023 bytes

eth_inb1024_1518

Type: longlong

input pkts between 1024 and 1518 bytes

eth_inb1519_1548

Type: longlong

input pkts between 1519 and 1548 bytes

eth_intrunk

Type: longlong

input trunk pkts

eth_outb64

Type: longlong

output pkts between 0 and 64 bytes

eth_outb65_127

Type: longlong

output pkts between 65 and 127 bytes

eth_outb128_255

Type: longlong

output pkts between 128 and 255 bytes

eth_outb256_511

Type: longlong

output pkts between 256 and 511 bytes

eth_outb512_1023

Type: longlong

output pkts between 512 and 1023 bytes

eth_outb1024_1518

Type: longlong

output pkts between 1024 and 1518 bytes

eth_outb1519_1548

Type: longlong

output pkts between 1519 and 1548 bytes

eth_outtrunk

Type: longlong

output trunk pkts

eth_bpdu_outlost

Type: longlong

BPDU output lost

eth_cos0_outlost

Type: longlong

output pkts

eth_cos1_outlost

Type: longlong

output pkts

eth_cos2_outlost

Type: longlong

output pkts

eth_cos3_outlost

Type: longlong

output pkts

eth_cos4_outlost

Type: longlong

output pkts

eth_cos5_outlost

Type: longlong

output pkts

eth_cos6_outlost

Type: longlong

output pkts

eth_cos7_outlost

Type: longlong

output pkts

eth_fcoe_in_pkts

Type: longlong

fcoe in pkts

eth_fcoe_in_octets

Type: longlong

fcoe in octets

eth_fcoe_out_pkts

Type: longlong

fcoe out pkts

eth_fcoe_out_octets

Type: longlong

fcoe out octets

eth_nfcoe_in_pkts

Type: longlong

nfcoe in pkts

eth_nfcoe_in_octets

Type: longlong

nfcoe in octets

eth_nfcoe_out_pkts

Type: longlong

nfcoe out pkts

eth_nfcoe_out_octets

Type: longlong

nfcoe out octets

eth_eee_atx_lpi_msec

Type: longlong

Tx Lpi usec

eth_eee_arcv_lpi_msec

Type: longlong

Rx Lpi usec

eth_eee_atx_lpi_transitions

Type: longlong

Tx Lpi requests

eth_eee_arcv_lpi_transitions

Type: longlong

Rx Lpi indications

eth_phy_ber_count

Type: longlong

Bit error rate counter

eth_phy_errblks_count

Type: longlong

Errored blocks counter

Command Modes

- /exec

show interface counters detailed all (if_manager)

show interface counters detailed all [snmp] [ __readonly__ TABLE_interface interface [vdc_lvl_in_pkts] [vdc_lvl_in_bytes] [vdc_lvl_in_ucast] [vdc_lvl_in_mcast] [vdc_lvl_in_bcast] [vdc_lvl_in_bps] [vdc_lvl_in_pps] [vdc_lvl_in_avg_pkts] [vdc_lvl_in_avg_bytes] [vdc_lvl_out_pkts] [vdc_lvl_out_bytes] [vdc_lvl_out_ucast] [vdc_lvl_out_mcast] [vdc_lvl_out_bcast] [vdc_lvl_out_bps] [vdc_lvl_out_pps] [vdc_lvl_out_avg_pkts] [vdc_lvl_out_avg_bytes] [mgmt_in_pkts] [mgmt_in_bytes] [mgmt_in_mcast] [mgmt_out_pkts] [mgmt_out_bytes] [mgmt_in_errors] [mgmt_out_errors] [mgmt_in_fifo] [mgmt_out_fifo] [mgmt_in_compressed] [mgmt_in_frame] [mgmt_in_overrun] [mgmt_out_underruns] [mgmt_out_collisions] [mgmt_out_carrier] [mgmt_align_err] [mgmt_fcs_err] [mgmt_xmit_err] [mgmt_rcv_err] [mgmt_undersize] [mgmt_outdisc] [mgmt_single_col] [mgmt_multi_col] [mgmt_late_col] [mgmt_excess_col] [mgmt_carri_sen] [mgmt_runts] [mgmt_giants] [mgmt_sqetest_err] [mgmt_deferred_tx] [mgmt_inmactx_err] [mgmt_inmacrx_err] [mgmt_symbol_err] [rx_total_pkts] [tx_total_pkts] [rx_ucast_pkts] [rx_mcast_pkts] [rx_bcast_pkts] [rx_octets] [tx_ucast_pkts] [tx_mcast_pkts] [tx_bcast_pkts] [tx_octets] [rxtx_pkts_64octets] [rxtx_pkts_65_127octets] [rxtx_pkts_128_255octets] [rxtx_pkts_256_511octets] [rxtx_pkts_512_1023octets] [rxtx_pkts_1024_1518octets] [rxtx_pkts_1519_1548octets] [rx_trunk_frames] [tx_trunk_frames] [rx_drop_events] [rxtx_giants] [eth_load_interval1_rx] [eth_inrate1_bits] [eth_inrate1_pkts] [eth_load_interval1_tx] [eth_outrate1_bits] [eth_outrate1_pkts] [eth_load_interval2] [eth_inrate2_bits] [eth_inrate2_pkts] [eth_outrate2_bits] [eth_outrate2_pkts] [eth_load_interval3] [eth_inrate3_bits] [eth_inrate3_pkts] [eth_outrate3_bits] [eth_outrate3_pkts] [eth_l2_ucastpkts] [eth_l2_ucastbytes] [eth_l2_mcastpkts] [eth_l2_mcastbytes] [eth_l2_bcastpkts] [eth_l2_bcastbytes] [eth_l3in_ucastpkts] [eth_l3in_ucastbytes] [eth_l3in_mcastpkts] [eth_l3in_mcastbytes] [eth_l3in_bcastpkts] [eth_l3in_bcastbytes] [eth_l3out_ucastpkts] [eth_l3out_ucastbytes] [eth_l3out_mcastpkts] [eth_l3out_mcastbytes] [eth_l3out_bcastpkts] [eth_l3out_bcastbytes] [eth_l3in_routed_pkts] [eth_l3in_routed_bytes] [eth_l3out_routed_pkts] [eth_l3out_routed_bytes] [eth_l3avg1_inbytes] [eth_l3avg1_inpkts] [eth_l3avg1_outbytes] [eth_l3avg1_outpkts] [eth_l3avg2_inbytes] [eth_l3avg2_inpkts] [eth_l3avg2_outbytes] [eth_l3avg2_outpkts] [eth_l3avg3_inbytes] [eth_l3avg3_inpkts] [eth_l3avg3_outbytes] [eth_l3avg3_outpkts] [eth_inpkts] [eth_inbytes] [eth_nobuf] [eth_inbcast] [eth_inmcast] [eth_inucast] [eth_ingiants] [eth_ipmcast] [eth_inhw_switched] [eth_insw_switched] [eth_runts] [eth_storm_supp] [eth_throtles] [eth_inerr] [eth_crc] [eth_ecc] [eth_frame] [eth_overrun] [eth_ignored] [eth_watchdog] [eth_outbcast] [eth_outmcast] [eth_outucast] [eth_outgiants] [eth_inpause] [eth_dribble] [eth_in_ifdown_drops] [eth_bad_eth] [eth_bad_proto] [eth_outpkts] [eth_outbytes] [eth_underrun] [eth_outhw_switched] [eth_outsw_switched] [eth_outerr] [eth_coll] [eth_resets] [eth_babbles] [eth_latecoll] [eth_deferred] [eth_lostcarrier] [eth_nocarrier] [eth_outpause] [eth_buffail] [eth_bufswapped] [eth_arpdrops] [eth_out_ifdown_drops] [eth_single_coll] [eth_multi_coll] [eth_excess_coll] [eth_jabbers] [eth_shortframe] [eth_indiscard] [eth_bad_encap] [eth_outcrc] [eth_symbol] [eth_out_drops] [eth_sqetest] [eth_inb64] [eth_inb65_127] [eth_inb128_255] [eth_inb256_511] [eth_inb512_1023] [eth_inb1024_1518] [eth_inb1519_1548] [eth_intrunk] [eth_outb64] [eth_outb65_127] [eth_outb128_255] [eth_outb256_511] [eth_outb512_1023] [eth_outb1024_1518] [eth_outb1519_1548] [eth_outtrunk] [eth_bpdu_outlost] [eth_cos0_outlost] [eth_cos1_outlost] [eth_cos2_outlost] [eth_cos3_outlost] [eth_cos4_outlost] [eth_cos5_outlost] [eth_cos6_outlost] [eth_cos7_outlost] [eth_fcoe_in_pkts] [eth_fcoe_in_octets] [eth_fcoe_out_pkts] [eth_fcoe_out_octets] [eth_nfcoe_in_pkts] [eth_nfcoe_in_octets] [eth_nfcoe_out_pkts] [eth_nfcoe_out_octets] [eth_eee_atx_lpi_msec] [eth_eee_arcv_lpi_msec] [eth_eee_atx_lpi_transitions] [eth_eee_arcv_lpi_transitions] [eth_phy_ber_count] [eth_phy_errblks_count] [loop_in_pkts] [loop_in_bytes] [loop_in_mcast] [loop_in_compressed] [loop_in_errors] [loop_in_frame] [loop_in_overrun] [loop_in_fifo] [loop_out_pkts] [loop_out_bytes] [loop_out_underruns] [loop_out_errors] [loop_out_collisions] [loop_out_fifo] [loop_out_carriers] [svi_routed_pkts_in] [svi_routed_bytes_in] [svi_routed_pkts_out] [svi_routed_bytes_out] [svi_ucast_pkts_in] [svi_ucast_bytes_in] [svi_mcast_pkts_in] [svi_mcast_bytes_in] [svi_ucast_pkts_out] [svi_ucast_bytes_out] [svi_mcast_pkts_out] [svi_mcast_bytes_out] [svi_ipv4_ucast_pkts_in] [svi_ipv4_ucast_bytes_in] [svi_ipv4_ucast_pkts_out] [svi_ipv4_ucast_bytes_out] [svi_ipv4_mcast_pkts_in] [svi_ipv4_mcast_bytes_in] [svi_ipv4_mcast_pkts_out] [svi_ipv4_mcast_bytes_out] [svi_ipv6_ucast_pkts_in] [svi_ipv6_ucast_bytes_in] [svi_ipv6_ucast_pkts_out] [svi_ipv6_ucast_bytes_out] [svi_ipv6_mcast_pkts_in] [svi_ipv6_mcast_bytes_in] [svi_ipv6_mcast_pkts_out] [svi_ipv6_mcast_bytes_out] [svi_average_input_bits] [svi_average_input_packets] [svi_average_output_bits] [svi_average_output_packets] [svi_rate_in_mins] [svi_time_last_cleared] [svi_tx_load] [svi_rx_load] [svi_reliability] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

detailed

Show only non-zero counters

all

Show every interface counter

snmp

Show SNMP MIB values

__readonly__

Read Only

TABLE_interface

show interface

interface

Type: interface

Interface index

vdc_lvl_in_pkts

Type: longlong

VDC level input packets

vdc_lvl_in_bytes

Type: longlong

VDC level input bytes

vdc_lvl_in_ucast

Type: longlong

VDC level input unicast packets

vdc_lvl_in_mcast

Type: longlong

VDC level input multicast packets

vdc_lvl_in_bcast

Type: longlong

VDC level input broadcast packets

vdc_lvl_in_bps

Type: longlong

VDC level input bytes per second

vdc_lvl_in_pps

Type: longlong

VDC level input packets per second

vdc_lvl_in_avg_pkts

Type: longlong

VDC level average input packets

vdc_lvl_in_avg_bytes

Type: longlong

VDC level average input bytes

vdc_lvl_out_pkts

Type: longlong

VDC level output packets

vdc_lvl_out_bytes

Type: longlong

VDC level output bytes

vdc_lvl_out_ucast

Type: longlong

VDC level output unicast packets

vdc_lvl_out_mcast

Type: longlong

VDC level output multicast packets

vdc_lvl_out_bcast

Type: longlong

VDC level output broadcast packets

vdc_lvl_out_bps

Type: longlong

VDC level output bytes per second

vdc_lvl_out_pps

Type: longlong

VDC level output packets per second

vdc_lvl_out_avg_pkts

Type: longlong

VDC level average output packets

vdc_lvl_out_avg_bytes

Type: longlong

VDC level average output bytes

mgmt_in_pkts

Type: uinteger

Input packets

mgmt_in_bytes

Type: uinteger

Input bytes

mgmt_in_mcast

Type: uinteger

Input multicast frames

mgmt_out_pkts

Type: uinteger

Output packets

mgmt_out_bytes

Type: uinteger

Output bytes

mgmt_in_errors

Type: uinteger

Input errors

mgmt_out_errors

Type: uinteger

Output errors

mgmt_in_fifo

Type: uinteger

Input fifo

mgmt_out_fifo

Type: uinteger

Output fifo

mgmt_in_compressed

Type: uinteger

Input compressed

mgmt_in_frame

Type: uinteger

Input frame errors

mgmt_in_overrun

Type: uinteger

Input overrun

mgmt_out_underruns

Type: uinteger

Output overruns

mgmt_out_collisions

Type: uinteger

Output collisions

mgmt_out_carrier

Type: uinteger

Output carrier errors

mgmt_align_err

Type: longlong

Align error

mgmt_fcs_err

Type: longlong

FCS error

mgmt_xmit_err

Type: longlong

Transmit error

mgmt_rcv_err

Type: longlong

Receive error

mgmt_undersize

Type: longlong

Undersize

mgmt_outdisc

Type: longlong

Out discard

mgmt_single_col

Type: longlong

Single collision

mgmt_multi_col

Type: longlong

Multiple collision

mgmt_late_col

Type: longlong

Late collision

mgmt_excess_col

Type: longlong

Excess collision

mgmt_carri_sen

Type: longlong

Carrier sense

mgmt_runts

Type: longlong

Runts

mgmt_giants

Type: longlong

Giants

mgmt_sqetest_err

Type: longlong

SQETest error

mgmt_deferred_tx

Type: longlong

Deferred tx

mgmt_inmactx_err

Type: longlong

In MAC tx

mgmt_inmacrx_err

Type: longlong

In MAC rx

mgmt_symbol_err

Type: longlong

Symbol error

rx_total_pkts

Type: longlong

total input packets

tx_total_pkts

Type: longlong

total output packets

rx_ucast_pkts

Type: longlong

input unicasts

rx_mcast_pkts

Type: longlong

input multicasts

rx_bcast_pkts

Type: longlong

input broadcasts

rx_octets

Type: longlong

input bytes

tx_ucast_pkts

Type: longlong

output unicasts

tx_mcast_pkts

Type: longlong

output multicasts

tx_bcast_pkts

Type: longlong

output broadcasts

tx_octets

Type: longlong

output bytes

rxtx_pkts_64octets

Type: longlong

all pkts between 0 and 64 bytes

rxtx_pkts_65_127octets

Type: longlong

all pkts between 65 and 127 bytes

rxtx_pkts_128_255octets

Type: longlong

all pkts between 128 and 255 bytes

rxtx_pkts_256_511octets

Type: longlong

all pkts between 256 and 511 bytes

rxtx_pkts_512_1023octets

Type: longlong

all pkts between 512 and 1023 bytes

rxtx_pkts_1024_1518octets

Type: longlong

all pkts between 1024 and 1518 bytes

rxtx_pkts_1519_1548octets

Type: longlong

all pkts between 1519 and 1548 bytes

rx_trunk_frames

Type: longlong

input trunk pkts

tx_trunk_frames

Type: longlong

output trunk pkts

rx_drop_events

Type: longlong

dropped pkts

rxtx_giants

Type: longlong

giants

eth_load_interval1_rx

Type: uinteger

interval 1 timer value in sec

eth_inrate1_bits

Type: longlong

interval 1 input rate bits/sec

eth_inrate1_pkts

Type: longlong

interval 1 input rate pkts/sec

eth_load_interval1_tx

Type: uinteger

interval 1 timer value in sec

eth_outrate1_bits

Type: longlong

interval 1 output rate bits/sec

eth_outrate1_pkts

Type: longlong

interval 1 output rate pkts/sec

eth_load_interval2

Type: uinteger

interval 2 timer value in sec

eth_inrate2_bits

Type: longlong

interval 2 input rate bits/sec

eth_inrate2_pkts

Type: longlong

interval 2 input rate pkts/sec

eth_outrate2_bits

Type: longlong

interval 2 output rate bits/sec

eth_outrate2_pkts

Type: longlong

interval 2 output rate pkts/sec

eth_load_interval3

Type: uinteger

interval 3 timer value in sec

eth_inrate3_bits

Type: longlong

interval 3 input rate bits/sec

eth_inrate3_pkts

Type: longlong

interval 3 input rate pkts/sec

eth_outrate3_bits

Type: longlong

interval 3 output rate bits/sec

eth_outrate3_pkts

Type: longlong

interval 3 output rate pkts/sec

eth_l2_ucastpkts

Type: longlong

L2 switched ucast pkts

eth_l2_ucastbytes

Type: longlong

L2 switched ucast bytes

eth_l2_mcastpkts

Type: longlong

L2 switched mcast pkts

eth_l2_mcastbytes

Type: longlong

L2 switched mcast bytes

eth_l2_bcastpkts

Type: longlong

L2 switched bcast pkts

eth_l2_bcastbytes

Type: longlong

L2 switched bcast bytes

eth_l3in_ucastpkts

Type: longlong

IPv4 L3 in switched ucast pkts

eth_l3in_ucastbytes

Type: longlong

IPv4 L3 in switched ucast bytes

eth_l3in_mcastpkts

Type: longlong

IPv4 L3 in switched mcast pkts

eth_l3in_mcastbytes

Type: longlong

IPv4 L3 in switched mcast bytes

eth_l3in_bcastpkts

Type: longlong

L3 in switched bcast pkts

eth_l3in_bcastbytes

Type: longlong

L3 in switched bcast bytes

eth_l3out_ucastpkts

Type: longlong

IPv4 L3 out switched ucast pkts

eth_l3out_ucastbytes

Type: longlong

IPv4 L3 out switched ucast bytes

eth_l3out_mcastpkts

Type: longlong

IPv4 L3 out switched mcast pkts

eth_l3out_mcastbytes

Type: longlong

IPv4 L3 out switched mcast bytes

eth_l3out_bcastpkts

Type: longlong

L3 out switched bcast pkts

eth_l3out_bcastbytes

Type: longlong

L3 out switched bcast bytes

eth_l3in_routed_pkts

Type: longlong

L3 in routed pkts

eth_l3in_routed_bytes

Type: longlong

L3 in routed bytes

eth_l3out_routed_pkts

Type: longlong

L3 out routed pkts

eth_l3out_routed_bytes

Type: longlong

L3 out routed bytes

eth_l3avg1_inbytes

Type: longlong

Load interval 1 L3 average in switched bytes

eth_l3avg1_inpkts

Type: longlong

Load interval 1 L3 average in switched pkts

eth_l3avg1_outbytes

Type: longlong

Load interval 1 L3 average out switched bytes

eth_l3avg1_outpkts

Type: longlong

Load interval 1 L3 average out switched pkts

eth_l3avg2_inbytes

Type: longlong

Load interval 2 L3 average in switched bytes

eth_l3avg2_inpkts

Type: longlong

Load interval 2 L3 average in switched pkts

eth_l3avg2_outbytes

Type: longlong

Load interval 2 L3 average out switched bytes

eth_l3avg2_outpkts

Type: longlong

Load interval 2 L3 average out switched pkts

eth_l3avg3_inbytes

Type: longlong

Load interval 3 L3 average in switched bytes

eth_l3avg3_inpkts

Type: longlong

Load interval 3 L3 average in switched pkts

eth_l3avg3_outbytes

Type: longlong

Load interval 3 L3 average out switched bytes

eth_l3avg3_outpkts

Type: longlong

Load interval 3 L3 average out switched pkts

eth_inpkts

Type: longlong

Packets input

eth_inbytes

Type: longlong

Bytes input

eth_nobuf

Type: longlong

No buffer received

eth_inbcast

Type: longlong

Broadcasts

eth_inmcast

Type: longlong

Multicasts

eth_inucast

Type: longlong

Unicasts

eth_ingiants

Type: longlong

giants

eth_ipmcast

Type: longlong

IP multicast

eth_inhw_switched

Type: longlong

Input H/W Switched

eth_insw_switched

Type: longlong

Input S/W Switched

eth_runts

Type: longlong

runts

eth_storm_supp

Type: longlong

storm suppression

eth_throtles

Type: longlong

throttles

eth_inerr

Type: longlong

input errors

eth_crc

Type: longlong

CRC

eth_ecc

Type: longlong

ECC

eth_frame

Type: longlong

frame

eth_overrun

Type: longlong

overrun

eth_ignored

Type: longlong

ignored

eth_watchdog

Type: longlong

watchdog

eth_outbcast

Type: longlong

Broadcasts

eth_outmcast

Type: longlong

Multicasts

eth_outucast

Type: longlong

Unicasts

eth_outgiants

Type: longlong

giants

eth_inpause

Type: longlong

pause input

eth_dribble

Type: longlong

input packets with dribble condition

eth_in_ifdown_drops

Type: longlong

Input if-down drops

eth_bad_eth

Type: longlong

bad ether type drop

eth_bad_proto

Type: longlong

bad protocol drops

eth_outpkts

Type: longlong

packets output

eth_outbytes

Type: longlong

bytes output

eth_underrun

Type: longlong

underruns

eth_outhw_switched

Type: longlong

Out H/W Switched

eth_outsw_switched

Type: longlong

Out S/W Switched

eth_outerr

Type: longlong

output errors

eth_coll

Type: longlong

collisions

eth_resets

Type: longlong

interface resets

eth_babbles

Type: longlong

babbles

eth_latecoll

Type: longlong

late collision

eth_deferred

Type: longlong

deferred

eth_lostcarrier

Type: longlong

lost carrier

eth_nocarrier

Type: longlong

no carrier

eth_outpause

Type: longlong

PAUSE output

eth_buffail

Type: longlong

output buffer failures

eth_bufswapped

Type: longlong

output buffers swapped out

eth_arpdrops

Type: longlong

arp drops

eth_out_ifdown_drops

Type: longlong

Output if-down drops

eth_single_coll

Type: longlong

single collisions

eth_multi_coll

Type: longlong

multi collisions

eth_excess_coll

Type: longlong

excessive collisions

eth_jabbers

Type: longlong

jabbers

eth_shortframe

Type: longlong

short frames

eth_indiscard

Type: longlong

discards

eth_bad_encap

Type: longlong

bad encapsulation

eth_outcrc

Type: longlong

Output CRC

eth_symbol

Type: longlong

symbol errors

eth_out_drops

Type: longlong

output drops

eth_sqetest

Type: longlong

SQE test

eth_inb64

Type: longlong

input pkts between 0 and 64 bytes

eth_inb65_127

Type: longlong

input pkts between 65 and 127 bytes

eth_inb128_255

Type: longlong

input pkts between 128 and 255 bytes

eth_inb256_511

Type: longlong

input pkts between 256 and 511 bytes

eth_inb512_1023

Type: longlong

input pkts between 512 and 1023 bytes

eth_inb1024_1518

Type: longlong

input pkts between 1024 and 1518 bytes

eth_inb1519_1548

Type: longlong

input pkts between 1519 and 1548 bytes

eth_intrunk

Type: longlong

input trunk pkts

eth_outb64

Type: longlong

output pkts between 0 and 64 bytes

eth_outb65_127

Type: longlong

output pkts between 65 and 127 bytes

eth_outb128_255

Type: longlong

output pkts between 128 and 255 bytes

eth_outb256_511

Type: longlong

output pkts between 256 and 511 bytes

eth_outb512_1023

Type: longlong

output pkts between 512 and 1023 bytes

eth_outb1024_1518

Type: longlong

output pkts between 1024 and 1518 bytes

eth_outb1519_1548

Type: longlong

output pkts between 1519 and 1548 bytes

eth_outtrunk

Type: longlong

output trunk pkts

eth_bpdu_outlost

Type: longlong

BPDU output lost

eth_cos0_outlost

Type: longlong

output pkts

eth_cos1_outlost

Type: longlong

output pkts

eth_cos2_outlost

Type: longlong

output pkts

eth_cos3_outlost

Type: longlong

output pkts

eth_cos4_outlost

Type: longlong

output pkts

eth_cos5_outlost

Type: longlong

output pkts

eth_cos6_outlost

Type: longlong

output pkts

eth_cos7_outlost

Type: longlong

output pkts

eth_fcoe_in_pkts

Type: longlong

fcoe in pkts

eth_fcoe_in_octets

Type: longlong

fcoe in octets

eth_fcoe_out_pkts

Type: longlong

fcoe out pkts

eth_fcoe_out_octets

Type: longlong

fcoe out octets

eth_nfcoe_in_pkts

Type: longlong

nfcoe in pkts

eth_nfcoe_in_octets

Type: longlong

nfcoe in octets

eth_nfcoe_out_pkts

Type: longlong

nfcoe out pkts

eth_nfcoe_out_octets

Type: longlong

nfcoe out octets

eth_eee_atx_lpi_msec

Type: longlong

Tx Lpi usec

eth_eee_arcv_lpi_msec

Type: longlong

Rx Lpi usec

eth_eee_atx_lpi_transitions

Type: longlong

Tx Lpi requests

eth_eee_arcv_lpi_transitions

Type: longlong

Rx Lpi indications

eth_phy_ber_count

Type: longlong

Bit error rate counter

eth_phy_errblks_count

Type: longlong

Errored blocks counter

loop_in_pkts

Type: longlong

Input packets

loop_in_bytes

Type: longlong

Input bytes

loop_in_mcast

Type: longlong

Input multicast

loop_in_compressed

Type: longlong

Input compressed

loop_in_errors

Type: longlong

Input errors

loop_in_frame

Type: longlong

Input frame errors

loop_in_overrun

Type: longlong

Input overrun

loop_in_fifo

Type: longlong

Input fifo

loop_out_pkts

Type: longlong

Output packets

loop_out_bytes

Type: longlong

Output bytes

loop_out_underruns

Type: longlong

Output underruns

loop_out_errors

Type: longlong

Output errors

loop_out_collisions

Type: longlong

Output collisions

loop_out_fifo

Type: longlong

Output fifo

loop_out_carriers

Type: longlong

Output carrier errors

svi_routed_pkts_in

Type: long

in routed pkts

svi_routed_bytes_in

Type: long

in routed bytes

svi_routed_pkts_out

Type: long

out routed pkts

svi_routed_bytes_out

Type: long

out routed bytes

svi_ucast_pkts_in

Type: long

in unicast pkts

svi_ucast_bytes_in

Type: long

in unicast bytes

svi_mcast_pkts_in

Type: long

in multicast pkts

svi_mcast_bytes_in

Type: long

in multicast bytes

svi_ucast_pkts_out

Type: long

out unicast pkts

svi_ucast_bytes_out

Type: long

out unicast bytes

svi_mcast_pkts_out

Type: long

out multicast pkts

svi_mcast_bytes_out

Type: long

out multicast bytes

svi_ipv4_ucast_pkts_in

Type: long

IPv4 in unicast pkts

svi_ipv4_ucast_bytes_in

Type: long

IPv4 in unicast bytes

svi_ipv4_ucast_pkts_out

Type: long

IPv4 out unicast pkts

svi_ipv4_ucast_bytes_out

Type: long

IPv4 out unicast bytes

svi_ipv4_mcast_pkts_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_bytes_in

Type: long

IPv4 in multicast bytes

svi_ipv4_mcast_pkts_out

Type: long

IPv4 out multicast pkts

svi_ipv4_mcast_bytes_out

Type: long

IPv4 out multicast bytes

svi_ipv6_ucast_pkts_in

Type: long

IPv6 in unicast pkts

svi_ipv6_ucast_bytes_in

Type: long

IPv6 in unicast bytes

svi_ipv6_ucast_pkts_out

Type: long

IPv6 out unicast pkts

svi_ipv6_ucast_bytes_out

Type: long

IPv6 out unicast bytes

svi_ipv6_mcast_pkts_in

Type: long

IPv6 in multicast pkts

svi_ipv6_mcast_bytes_in

Type: long

IPv6 in multicast bytes

svi_ipv6_mcast_pkts_out

Type: long

IPv6 out multicast pkts

svi_ipv6_mcast_bytes_out

Type: long

IPv6 out multicast bytes

svi_average_input_bits

Type: long

Input rate bits/sec

svi_average_input_packets

Type: long

Input rate bits/sec

svi_average_output_bits

Type: long

Output rate bits/sec

svi_average_output_packets

Type: long

Output rate bits/sec

svi_rate_in_mins

Type: long

Time in mins for which average rate is computed

svi_time_last_cleared

Type: string

Time last cleared

svi_tx_load

Type: uinteger

Tx Load

svi_rx_load

Type: uinteger

Rx Load

svi_reliability

Type: uinteger

Reliability

Command Modes

- /exec

show interface counters errors (if_manager)

show interface counters errors [ module module ] [ __readonly__ TABLE_interface interface [eth_align_err] [eth_fcs_err] [eth_xmit_err] [eth_rcv_err] [eth_undersize] [eth_outdisc] [eth_single_col] [eth_multi_col] [eth_late_col] [eth_excess_col] [eth_carri_sen] [eth_runts] [eth_giants] [eth_sqetest_err] [eth_deferred_tx] [eth_inmacrx_err] [eth_inmactx_err] [eth_symbol_err] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

errors

Show interface error counters

module

Limit display to interfaces on module

module

Type: integer

Enter module number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

eth_align_err

Type: longlong

Align error

eth_fcs_err

Type: longlong

FCS error

eth_xmit_err

Type: longlong

Transmit error

eth_rcv_err

Type: longlong

Receive error

eth_undersize

Type: longlong

Undersize

eth_outdisc

Type: longlong

Out discard

eth_single_col

Type: longlong

Single collision

eth_multi_col

Type: longlong

Multiple collision

eth_late_col

Type: longlong

Late collision

eth_excess_col

Type: longlong

Excess collision

eth_carri_sen

Type: longlong

Carrier sense

eth_runts

Type: longlong

Runts

eth_giants

Type: longlong

Giants

eth_sqetest_err

Type: longlong

SQETest error

eth_deferred_tx

Type: longlong

Deferred tx

eth_inmacrx_err

Type: longlong

In MAC rx

eth_inmactx_err

Type: longlong

In MAC tx

eth_symbol_err

Type: longlong

Symbol error

Command Modes

- /exec

show interface counters errors (if_manager)

show interface loop_ctr_errs counters errors

Syntax Description

show

Show running system information

interface

Show interface status and information

loop_ctr_errs

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

errors

Show interface error counters

Command Modes

- /exec

show interface counters errors (if_manager)

show interface ifeth_ctr_errs counters errors [snmp] [ __readonly__ TABLE_interface interface [eth_align_err] [eth_fcs_err] [eth_xmit_err] [eth_rcv_err] [eth_undersize] [eth_outdisc] [eth_single_col] [eth_multi_col] [eth_late_col] [eth_excess_col] [eth_carri_sen] [eth_runts] [eth_giants] [eth_sqetest_err] [eth_deferred_tx] [eth_inmactx_err] [eth_inmacrx_err] [eth_symbol_err] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_ctr_errs

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

errors

Show interface error counters

snmp

Show SNMP MIB values

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

eth_align_err

Type: longlong

Align error

eth_fcs_err

Type: longlong

FCS error

eth_xmit_err

Type: longlong

Transmit error

eth_rcv_err

Type: longlong

Receive error

eth_undersize

Type: longlong

Undersize

eth_outdisc

Type: longlong

Out discard

eth_single_col

Type: longlong

Single collision

eth_multi_col

Type: longlong

Multiple collision

eth_late_col

Type: longlong

Late collision

eth_excess_col

Type: longlong

Excess collision

eth_carri_sen

Type: longlong

Carrier sense

eth_runts

Type: longlong

Runts

eth_giants

Type: longlong

Giants

eth_sqetest_err

Type: longlong

SQETest error

eth_deferred_tx

Type: longlong

Deferred tx

eth_inmactx_err

Type: longlong

In MAC tx

eth_inmacrx_err

Type: longlong

In MAC rx

eth_symbol_err

Type: longlong

Symbol error

Command Modes

- /exec

show interface counters errors fex

show interface counters errors fex fex_num [ __readonly__ TABLE_interface interface [eth_align_err] [eth_fcs_err] [eth_xmit_err] [eth_rcv_err] [eth_undersize] [eth_outdisc] [eth_single_col] [eth_multi_col] [eth_late_col] [eth_excess_col] [eth_carri_sen] [eth_runts] [eth_giants] [eth_sqetest_err] [eth_deferred_tx] [eth_inmactx_err] [eth_inmacrx_err] [eth_symbol_err] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

errors

Show interface error counters

fex

Limit display to interfaces on a FEX

fex_num

Type: integer

min: 100  max: 199

Enter FEX number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

eth_align_err

Type: longlong

Align error

eth_fcs_err

Type: longlong

FCS error

eth_xmit_err

Type: longlong

Transmit error

eth_rcv_err

Type: longlong

Receive error

eth_undersize

Type: longlong

Undersize

eth_outdisc

Type: longlong

Out discard

eth_single_col

Type: longlong

Single collision

eth_multi_col

Type: longlong

Multiple collision

eth_late_col

Type: longlong

Late collision

eth_excess_col

Type: longlong

Excess collision

eth_carri_sen

Type: longlong

Carrier sense

eth_runts

Type: longlong

Runts

eth_giants

Type: longlong

Giants

eth_sqetest_err

Type: longlong

SQETest error

eth_deferred_tx

Type: longlong

Deferred tx

eth_inmactx_err

Type: longlong

In MAC tx

eth_inmacrx_err

Type: longlong

In MAC rx

eth_symbol_err

Type: longlong

Symbol error

Command Modes

- /exec

show interface counters fex

show interface counters fex mod_num [ __readonly__ TABLE_rx_counters interface eth_inpkts [eth_inucast] [eth_inmcast] [eth_inbcast] TABLE_tx_counters interface eth_outpkts [eth_outucast] [eth_outmcast] [eth_outbcast] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

fex

Enter fex ID

mod_num

Type: integer

min: 100  max: 199

Enter fex ID

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inpkts

Type: longlong

Packets input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

Packets output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

Command Modes

- /exec

show interface counters snmp

show interface counters snmp [ module module ] [ __readonly__ TABLE_rx_counters interface eth_inpkts [eth_inucast] [eth_inmcast] [eth_inbcast] [eth_l3in_bytes] [eth_l3in_ucastpkts] [eth_l3in_mcastpkts] [eth_l3in_bcastpkts] TABLE_tx_counters interface eth_outpkts [eth_outucast] [eth_outmcast] [eth_outbcast] [eth_l3out_bytes] [eth_l3out_ucastpkts] [eth_l3out_mcastpkts] [eth_l3out_bcastpkts] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

snmp

Show SNMP MIB values

module

Limit display to interfaces on module

module

Type: integer

Enter module number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inpkts

Type: longlong

Packets input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

Packets output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

eth_l3in_bytes

Type: longlong

L3 Rx bytes

eth_l3in_ucastpkts

Type: longlong

L3 Rx Unicast pkts

eth_l3in_mcastpkts

Type: longlong

L3 Rx Multicast pkts

eth_l3in_bcastpkts

Type: longlong

L3 Rx Broadcast pkts

eth_l3out_bytes

Type: longlong

L3 Tx bytes

eth_l3out_ucastpkts

Type: longlong

L3 Tx Unicast pkts

eth_l3out_mcastpkts

Type: longlong

L3 Tx Multicast pkts

eth_l3out_bcastpkts

Type: longlong

L3 Tx Broadcast pkts

Command Modes

- /exec

show interface counters snmp fex

show interface counters snmp fex fex_num [ __readonly__ TABLE_rx_counters interface eth_inpkts [eth_inucast] [eth_inmcast] [eth_inbcast] TABLE_tx_counters interface eth_outpkts [eth_outucast] [eth_outmcast] [eth_outbcast] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

counters

Show interface counters

snmp

Show SNMP MIB values

fex

Limit display to interfaces on a FEX

fex_num

Type: integer

min: 100  max: 199

Enter FEX number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_rx_counters

show Rx counters

TABLE_tx_counters

show Tx counters

eth_inpkts

Type: longlong

Packets input

eth_inucast

Type: longlong

Unicasts

eth_inmcast

Type: longlong

Multicasts

eth_inbcast

Type: longlong

Broadcasts

eth_outpkts

Type: longlong

Packets output

eth_outucast

Type: longlong

Unicasts

eth_outmcast

Type: longlong

Multicasts

eth_outbcast

Type: longlong

Broadcasts

Command Modes

- /exec

show interface counters trunk

show interface ifeth_ctr_trnk counters trunk [ __readonly__ TABLE_interface interface [eth_trunk_frames_tx] [eth_trunk_frames_rx] [eth_wrong_encap] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_ctr_trnk

Type: interface-mrange

Enter interface type and number in module/slot format

counters

Show interface counters

trunk

Show interface trunk counters

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

eth_trunk_frames_tx

Type: uinteger

Trunk frame transmitted

eth_trunk_frames_rx

Type: uinteger

Trunk frames received

eth_wrong_encap

Type: uinteger

Wrong encapsulation

Command Modes

- /exec

show interface debounce (if_manager)

show interface ifeth_dbnc debounce [ __readonly__ TABLE_interface interface debounce debounce_val ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_dbnc

Type: interface-mrange

Enter interface type and number in module/slot format

debounce

Show interface debounce time information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

debounce

Type: string

Debounce time

debounce_val

Type: uinteger

Value(ms)

Command Modes

- /exec

show interface debounce (if_manager)

show interface debounce [ __readonly__ TABLE_interface interface debounce debounce_val ]

Syntax Description

show

Show running system information

interface

Show interface status and information

debounce

Show interface debounce time information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

debounce

Type: string

Debounce time

debounce_val

Type: uinteger

Value(ms)

Command Modes

- /exec

show interface description (if_manager)

show interface ifid_mgmt_loop description [ __readonly__ TABLE_interface interface [state] [protocol] [desc] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_mgmt_loop

Type: interface-mrange

Enter interface type and number in module/slot format

description

Show interface description

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

protocol

Type: string

Protocol

desc

Type: string

Description

Command Modes

- /exec

show interface description (if_manager)

show interface ifid_eth description [ __readonly__ TABLE_interface interface [state] [type] [speed] [protocol] [desc] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_eth

Type: interface-mrange

Enter interface type and number in module/slot format

description

Show interface description

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

type

Type: string

Type

speed

Speed

--  value: 0

undefined
10  value: 10

10Mb/s
100  value: 100

100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s

protocol

Type: string

Protocol

desc

Type: string

Description

Command Modes

- /exec

show interface description (if_manager)

show interface iftun_desc description [ __readonly__ TABLE_interface interface state protocol desc ]

Syntax Description

show

Show running system information

interface

Show interface status and information

iftun_desc

Type: interface-mrange

Enter tunnel interface number

description

Show interface description

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

protocol

Type: string

Protocol

desc

Type: string

Description

Command Modes

- /exec

show interface description (if_manager)

show interface ifrange description [ __readonly__ TABLE_interface interface state protocol desc ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifrange

Type: interface-mrange

Enter tunnel interface number

description

Show interface description

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

protocol

Type: string

Protocol

desc

Type: string

Description

Command Modes

- /exec

show interface description (if_manager)

show interface description [ __readonly__ TABLE_interface interface [state] [type] [speed] [protocol] [desc] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

description

Show interface description

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

type

Type: string

Type

speed

Speed

--  value: 0

undefined
10  value: 10

10Mb/s
100  value: 100

100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s

protocol

Type: string

Protocol

desc

Type: string

Description

Command Modes

- /exec

show interface description (svi)

show interface ifid description [ __readonly__ start if_index LINE ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid

Type: interface-mrange

VLAN ID 1-4094 or range(s): 1-5, 10 or 2-5,7-19

description

Interface specific description

__readonly__

Read Only

start

Type: uinteger

Start

if_index

Type: interface

Interface

LINE

Type: string

length: 254

Description

Command Modes

- /exec

show interface fcoe

show interface ifeth_fcoe fcoe [ __readonly__ TABLE_interface interface [state] [vfc] [vfc_bound] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_fcoe

Type: interface-mrange

Enter interface type and number in module/slot format

fcoe

Show interface fcoe information Not available in this release.

__readonly__

Read Only

TABLE_interface

show interface

interface

Type: interface

Interface index

state

Type: string

State of interface

vfc

Type: string

VFC

vfc_bound

Type: string

Binding information

Command Modes

- /exec

show interface fex-conf

show interface if_id fex-conf [ __readonly__ fbr_if rchas_id rmod_no ]

Syntax Description

show

Show running system information

interface

Show interface status and information

if_id

Type: interface-mrange

Enter interface type and number in module/slot format

fex-conf

Show interface fex information

__readonly__

Read Only

fbr_if

Type: interface

Interface name

rchas_id

Type: uinteger

Configured fex number

rmod_no

Type: uinteger

Configured fex module number

Command Modes

- /exec

show interface fex-fabric

show interface fex-fabric [ __readonly__ TABLE_fex_fabric fex_no fbr_port fex_uplink chas_vendor fex_model chas_ser mod_vendor mod_model fex_ser mod_no mgmt_inst fbr_state ]

Syntax Description

show

Show running system information

interface

Show interface status and information

fex-fabric

Show all FEX fabric ports

__readonly__

Read Only

TABLE_fex_fabric

Discovered fex fabric ports

fex_no

Type: uinteger

Configured chassis number

fbr_port

Type: interface

Interface name

fex_uplink

Type: uinteger

Remote Link id

chas_vendor

Type: string

Chassis Vendor

fex_model

Type: string

Chassis Model

chas_ser

Type: string

Chassis serial Number

mod_vendor

Type: string

Module Vendor

mod_model

Type: string

Module Model

fex_ser

Type: string

Module serial Number

mod_no

Type: uinteger

Module Number(Left/Right module)

mgmt_inst

Type: string

Management instance

fbr_state

Fabric port state

None  value: 0

fabric port in state none
Created  value: 1

fabric port in state created
Discovered  value: 2

fabric port in state discovered
Configured  value: 3

fabric port in state configured
Fabric_Up  value: 4

fabric port in state fabric up
Connecting  value: 5

fabric port in state connecting
Active  value: 6

fabric port in state active
Incompatible_topology  value: 7

fabric port in state incompatible topology
Disconnected  value: 8

fabric port in state disconnected
Identity_mismatch  value: 9

fabric port in state identity mismatch

Command Modes

- /exec

show interface fex-intf

show interface if_id fex-intf [ __readonly__ TABLE_fabric_if fbr_if TABLE_sat_if sat_if ]

Syntax Description

show

Show running system information

interface

Show interface status and information

if_id

Type: interface-mrange

Enter interface type and number in module/slot format

fex-intf

Show FEX ports pinned to fabric port

__readonly__

Read Only

TABLE_fabric_if

Fabric interface satellite ports

fbr_if

Type: interface

Fabric Interface name

TABLE_sat_if

Satellite ports

sat_if

Type: interface

FEX Interface name

Command Modes

- /exec

show interface flowcontrol (if_manager)

show interface ifeth_fl_ctrl flowcontrol [ __readonly__ TABLE_interface interface send_admin send_oper recv_admin recv_oper rxpause txpause ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_fl_ctrl

Type: interface-mrange

Enter interface type and number in module/slot format

flowcontrol

Show interface flowcontrol information Not available in this release.

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

send_admin

Send flowcontrol admin

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

send_oper

Send flowcontrol oper

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

recv_admin

Receive flowcontrol admin

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

recv_oper

Receive flowcontrol oper

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

rxpause

Type: longlong

RxPause

txpause

Type: longlong

TxPause

Command Modes

- /exec

show interface flowcontrol (if_manager)

show interface flowcontrol [ module module ] [ __readonly__ TABLE_interface interface send_admin send_oper recv_admin recv_oper rxpause txpause ]

Syntax Description

show

Show running system information

interface

Show interface status and information

flowcontrol

Show interface flowcontrol information Not available in this release.

module

Limit display to interfaces on module

module

Type: integer

Enter module number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

send_admin

Send flowcontrol admin

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

send_oper

Send flowcontrol oper

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

recv_admin

Receive flowcontrol admin

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

recv_oper

Receive flowcontrol oper

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

rxpause

Type: longlong

RxPause

txpause

Type: longlong

TxPause

Command Modes

- /exec

show interface flowcontrol fex

show interface flowcontrol fex fex_num [ __readonly__ TABLE_interface interface send_admin send_oper recv_admin recv_oper rxpause txpause ]

Syntax Description

show

Show running system information

interface

Show interface status and information

flowcontrol

Show interface flowcontrol information

fex

Limit display to interfaces on a FEX

fex_num

Type: integer

min: 100  max: 199

Enter FEX number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

send_admin

Send flowcontrol admin

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

send_oper

Send flowcontrol oper

on  value: 0x1

Send ON
off  value: 0x0

Send OFF
desired  value: 0x4

Send desired

recv_admin

Receive flowcontrol admin

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

recv_oper

Receive flowcontrol oper

on  value: 0x2

Receive ON
off  value: 0x0

Receive OFF
desired  value: 0x8

Receive desired

rxpause

Type: longlong

RxPause

txpause

Type: longlong

TxPause

Command Modes

- /exec

show interface mac-address (if_manager)

show interface ifid_macaddr mac-address [ __readonly__ TABLE_interface interface address ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_macaddr

Type: interface-mrange

Enter interface type and number in module/slot format

mac-address

Show interface MAC address

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

address

Type: ethernet

MAC Address

Command Modes

- /exec

show interface mac-address (if_manager)

show interface mac-address [ __readonly__ TABLE_interface interface address bia_address ]

Syntax Description

show

Show running system information

interface

Show interface status and information

mac-address

Show interface MAC address

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

address

Type: ethernet

MAC Address

bia_address

Type: ethernet

Burn-In MAC Address

Command Modes

- /exec

show interface priority-flow-control

show interface priority-flow-control [ module mod_num ] [ __readonly__ interface admin oper ]

Syntax Description

show

Show running system information

interface

Show interface status and information

priority-flow-control

Show interface PFC information

module

Limit display to interfaces on module

mod_num

Type: integer

min: 1  max: 18

Enter module number

__readonly__

interface

Type: interface

Interface index

admin

PFC admin

auto  value: 1

Auto
off  value: 2

off
on  value: 3

on
dont-care  value: 4

dont-care

oper

PFC oper

auto  value: 1

Auto
off  value: 2

off
on  value: 3

on
dont-care  value: 4

dont-care

Command Modes

- /exec

show interface private-vlan mapping

show interface [if] private-vlan mapping [ __readonly__ output-filtered start interface-id secondary-vlan pvlan-type ]

Syntax Description

show

Show running system information

interface

Show interface status and information

private-vlan

Show interface private vlan information

mapping

Show interface private vlan information

__readonly__

Read Only

if

Type: interface

Vlan Interface number

output-filtered

Type: uinteger

the output is filtered for specified ifs

start

Type: uinteger

Start

interface-id

Type: interface

Interface

secondary-vlan

Type: uinteger

Secondary Vlan

pvlan-type

isolated  value: 1

Isolated PVLAN
community  value: 2

Community PVLAN
primary  value: 3

Primary PVLAN
non-operational  value: 4

Non-operational PVLAN

Command Modes

- /exec

show interface pruning

show interface pruning [ __readonly__ start TABLE_interface_pruning1 if_index1 rx_join TABLE_interface_pruning2 if_index2 cur_join ]

Syntax Description

show

Show running system information

interface

Show interface status and information

pruning

Show interface trunk VTP pruning information

__readonly__

Read Only

start

Type: uinteger

Start

TABLE_interface_pruning1

Interface pruning information in table format

if_index1

Type: interface

Trunk

rx_join

Type: string

Vlans pruned for lack of request by neighbor

TABLE_interface_pruning2

Interface pruning information in table format

if_index2

Type: interface

Trunk

cur_join

Type: string

Vlan traffic requested of neighbor

Command Modes

- /exec

show interface snmp-ifindex

show interface snmp-ifindex [ __readonly__ TABLE_interface interface [ifindex-dec] snmp-ifindex ]

Syntax Description

show

Show running system information

interface

Show interface status and information

snmp-ifindex

Show snmp ifindex list

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

snmp-ifindex

Type: hex

If Index in Hex

ifindex-dec

Type: uinteger

If Index in Decimal

Command Modes

- /exec

show interface status (if_manager)

show interface ifid_status status [ __readonly__ TABLE_interface interface [name] [state] [vlan] [duplex] [speed] [type] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_status

Type: interface-mrange

Enter interface type and number in module/slot format

status

Show interface line status

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

vlan

Type: string

Vlan

duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

type

Type: string

Type

Command Modes

- /exec

show interface status (if_manager)

show interface ifeth_status status [ __readonly__ TABLE_interface interface [name] [state] [vlan] duplex speed [type] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_status

Type: interface-mrange

Enter interface type and number in module/slot format

status

Show interface line status

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

vlan

Type: string

Vlan

duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

type

Type: string

Type

Command Modes

- /exec

show interface status (if_manager)

show interface iftun_status status [err-disabled] [ __readonly__ TABLE_interface interface name state state_rsn state_rsn_desc ]

Syntax Description

show

Show running system information

interface

Show interface status and information

iftun_status

Type: interface-mrange

Enter tunnel interface number

status

Show interface line status

err-disabled

Show interface error disabled state

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

Command Modes

- /exec

show interface status (if_manager)

show interface ifrange status [err-disabled] [ __readonly__ TABLE_interface interface name state state_rsn state_rsn_desc ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifrange

Type: interface-mrange

Enter tunnel interface number

status

Show interface line status

err-disabled

Show interface error disabled state

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

Command Modes

- /exec

show interface status (if_manager)

show interface status [ down | inactive | module module | up ] [ __readonly__ TABLE_interface interface [name] state vlan duplex speed [type] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

status

Show interface line status

down

Show interface down state

inactive

Show interface inactive state

module

Limit display to interfaces on module

module

Type: integer

Enter module number

up

Show interface up state

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

vlan

Type: string

Vlan

duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

type

Type: string

Type

Command Modes

- /exec

show interface status (svi)

show interface ifid status [ __readonly__ start if_index admin-state line-proto ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid

Type: interface-mrange

VLAN ID 1-4094 or range(s): 1-5, 10 or 2-5,7-19

status

Interface status

__readonly__

Read Only

start

Type: uinteger

Start

if_index

Type: interface

Interface

admin-state

up  value: 0

down  value: 1

administratively down  value: 2

type not supported  value: 3

line-proto

up  value: 0

down  value: 1

shut  value: 4

out of service  value: 5

unknown  value: 6

Command Modes

- /exec

show interface status err-disabled (if_manager)

show interface ifeth_errdis status err-disabled [ __readonly__ TABLE_interface interface [name] state [state_rsn] [state_rsn_desc] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

status

Show interface line status

ifeth_errdis

Type: interface-mrange

Enter interface type and number in module/slot format

err-disabled

Show interface error disabled state

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

Command Modes

- /exec

show interface status err-disabled (if_manager)

show interface status err-disabled [ __readonly__ TABLE_interface interface [name] state [state_rsn] [state_rsn_desc] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

status

Show interface line status

err-disabled

Show interface error disabled state

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
connected  value: 2

None
faulty  value: 3

Hardware failure
faulty  value: 4

Diag failure
err-disabled  value: 5

Error disabled
faulty  value: 6

Port Software failure
notconnect  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
disabled  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspnd  value: 14

Suspended
portSuspnd  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInPrgrss  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentDown  value: 26

Parent interface down
parentDown  value: 254

Parent interface down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
fcotAbsent  value: 29

SFP not present
err-disabled  value: 30

Error disabled due to SFP vendor not supported
err-disabled  value: 31

Error disabled due to incompatible admin port mode
err-disabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
err-disabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
err-disabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
err-disabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
err-disabled  value: 45

Error disabled due to first interface in this group is E
err-disabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChng  value: 54

Admin config change
srcPrtRemv  value: 55

Tunnel src port removed
srcMdOffline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invaldAttch  value: 62

Invalid attachment Ficon not configured on peer
portBlcked  value: 63

Port blocked due to Ficon
err-disabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invldFlgis  value: 65

Suspended due to too many invalid flogis
invldBndng  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
err-disabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnect  value: 82

Link failure Port unusable
notConnect  value: 83

Link failure loss of signal
notConnect  value: 84

Link failure loss of sync
notConnect  value: 85

Link failure NOS received
notConnect  value: 86

Link failure OLS received
notConnect  value: 87

Link failure renegotiation failed
notConnect  value: 88

Link failure Link Reset failed nonempty recv queue
notConnect  value: 89

Link failure Excessive credit loss indications
notConnect  value: 90

Link failure receive queue overflow
err-disabled  value: 91

Error disabled due to excessive port interrupts
notConnect  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnect  value: 93

Link failure Link reset failed queue not empty
notConnect  value: 94

Link failure OPNy timeout while receive queue not empty
notConnect  value: 95

Link failure OPNy returned while receive queue not empty
notConnect  value: 96

Link failure Link reset failed queue not empty
notConnect  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
err-disabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNm  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
grcefulShtdwn  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trckdPortDwn  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmpEcho  value: 166

UDLD empty echo
udldAggr  value: 192

UDLD detected link failure in aggressive mode
connctrErr  value: 125

Port connector type error
err-disabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
intlRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompTunCfg  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnrchble  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
inCompCfg  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitEThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNtAvl  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllcFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
htStdbyInBndl  value: 148

Hot standby in bundle
err-disabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
dupTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
intFailErrDis  value: 163

Internal handshake failure
bpdugrdErrDis  value: 164

BPDUGuard triggered error disable
portDis  value: 168

Port is disabled
secViolErrDis  value: 165

error disabled due to security violation
mdNotCfg  value: 169

tunnel interface is down because mode is not configured
srcNotCfg  value: 170

tunnel interface is down because source is not configured
dstNotCfgd  value: 171

tunnel interface is down because destination is not configured
unbleSrcIP  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unbleDstIP  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpVpcLnk  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpStPrtSteF  value: 194

Interface is error disabled becasue of STP set port state failure
suspndByVpc  value: 195

port channel is down because it was suspended by vpc
vpcCfgPrgrss  value: 196

vpc configuration is in progress
vpcPeerLnkDwn  value: 197

vpc peer-link is down
noRespFrmVpc  value: 198

vpc down because failed to receive response from peer
vpcCmpFailed  value: 303

vpc down because compatibility check failed
noTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnlSrcDwn  value: 200

tunnel interface is down because tunnel source interface is down
conflctErrDis  value: 203

Error disabled due to IP address conflict
fabrcIfDown  value: 184

Pinned fabric port is down
invalidFbIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFail  value: 217

Error disabled due to IP QoS policy application failure
routrmacFail  value: 221

Router mac allocation failed
vlnNotExst  value: 230

VLAN/BD does not exist
vlnDwn  value: 232

VLAN/BD is down
vlnTypInvld  value: 231

VLAN type is invalid
vdcModeUnsupported  value: 250

Non-Routable VDC mode
dcbxpCmptFail  value: 234

Ip Qos DCBXP compat check failed
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
xcvrSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
xcvrAuthFailed  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
suspendedMinLinks  value: 251

Suspended due to minlinks
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
parentDown  value: 254

Parent interface down
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn

Interface state reason

sfpInit  value: 238

Transceiver Initializing
down  value: 1

Other
none  value: 2

None
hwFailure  value: 3

Hardware failure
diagFailure  value: 4

Diag failure
errDisabled  value: 5

Error disabled
swFailure  value: 6

Port Software failure
notConnected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPcpt  value: 9

Non participating
init  value: 10

Initializing
inactive  value: 11

Inactive
admin down  value: 12

Administratively down
channelDown  value: 13

Channel admin down
suspended  value: 14

Suspended
suspended  value: 199

Suspended
channelUpdate  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolated  value: 17

Isolation due to ELP failure
isolated  value: 18

Isolation due to ESC failure
isolated  value: 19

Isolation due to domain overlap
isolated  value: 20

Isolation due to domain id assignment failure
isolated  value: 21

Isolation due to domain other side eport isolated
isolated  value: 22

Isolation due to invalid fabric reconfiguration
isolated  value: 23

Isolation due to domain manager disabled
isolated  value: 24

Isolation due to zone merge failure
isolated  value: 25

Isolation due to vsan not configured on peer
parentAdminDown  value: 26

Parent Interface Admin Down
srcUnbound  value: 27

Tunnel port src interface unbound
ifRemoved  value: 28

Interface is removed
sfpAbsent  value: 29

SFP not present
errDisabled  value: 30

Error disabled due to SFP vendor not supported
errDisabled  value: 31

Error disabled due to incompatible admin port mode
errDisabled  value: 32

Error disabled due to incompatible admin port speed
suspended  value: 33

Suspended due to incompatible mode
suspended  value: 34

Suspended due to incompatible speed
suspended  value: 35

Suspended due to incompatible remote switch WWN
isolated  value: 36

Isolation due to domain manager other side not responding
errorDisabled  value: 37

Error Disabled due to EPP Failure
isolated  value: 38

Isolation due to port vsan mismatch
isolated  value: 39

Isolation due to port loopback to same switch
modUpgrade  value: 40

Linecard upgrade in progress
errDisabled  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabled  value: 42

Error disabled due to incompatible admin port rxbufsize
noOperMembers  value: 43

No operational members
isolated  value: 44

Isolation due to remote zone server not responding
errDisabled  value: 45

Error disabled due to first interface in this group is E
errDisabled  value: 46

Error disabled due to other interfaces in this group are not shut
peerDown  value: 47

TCP connection closed by peer
peerDown  value: 48

TCP connection rest by peer
tcpDown  value: 49

TCP max retransmission reached
tcpDown  value: 50

TCP keep alive timer expired
tcpDown  value: 51

TCP persist timer expired
parentEthDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
srcPortRemoved  value: 55

Tunnel src port removed
srcModNotOnline  value: 56

Tunnel source module not online
invalidCfg  value: 57

Possible port channel misconfiguration
isolated  value: 58

Isolation due to port security failure
isolated  value: 59

Isolation due to fabric bind failure
isolated  value: 60

Isolation due to no common vsans with peer on trunk
ficonDown  value: 61

Ficon vsan down
invalidAttach  value: 62

Invalid attachment Ficon not configured on peer
portBlocked  value: 63

Port blocked due to Ficon
errDisabled  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
invalidFlogis  value: 65

Suspended due to too many invalid flogis
invalidBinding  value: 66

Suspended due to port security
isolated  value: 67

Isolation due to ELP failure revision mismatch
isolated  value: 68

Isolation due to ELP failure class F param error
isolated  value: 69

Isolation due to ELP failure class N param error
isolated  value: 70

Isolation due to ELP failure invalid flow control code
isolated  value: 71

Isolation due to ELP failure invalid flow control param
isolated  value: 72

Isolation due to ELP failure invalid port name
isolated  value: 73

Isolation due to ELP failure invalid switch name
isolated  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolated  value: 75

Isolation due to ELP failure loopback detected
isolated  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolated  value: 77

Isolation due to ELP failure invalid payload size
errDisabled  value: 78

Error Disabled due to portchannel misconfiguration
notConnected  value: 82

Link failure Port unusable
notConnected  value: 83

Link failure loss of signal
notConnected  value: 84

Link failure loss of sync
notConnected  value: 85

Link failure NOS received
notConnected  value: 86

Link failure OLS received
notConnected  value: 87

Link failure renegotiation failed
notConnected  value: 88

Link failure Link Reset failed nonempty recv queue
notConnected  value: 89

Link failure Excessive credit loss indications
notConnected  value: 90

Link failure receive queue overflow
errDisabled  value: 91

Error disabled due to excessive port interrupts
notConnected  value: 92

Link failure Loop initialization failed nonempty recv queue
notConnected  value: 93

Link failure Link reset failed queue not empty
notConnected  value: 94

Link failure OPNy timeout while receive queue not empty
notConnected  value: 95

Link failure OPNy returned while receive queue not empty
notConnected  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolated  value: 98

Isolation due to FCSP failure
sfpErr  value: 99

SFP checksum error
suspended  value: 100

Suspended due to external Loopback diagnostics failure
isolated  value: 101

Invalid fabric binding exchange
isolated  value: 102

Isolation due to TOV Mismatch
errDisabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
some  value: 108

Not all VSANs UP on the trunk
isolated  value: 109

Isolation due to fabric binding peer switch WWN not found
isolated  value: 110

Isolation due to fabric binding peer domain mismatch
isolated  value: 111

Isolation due to fabric binding database mismatch
isolated  value: 112

Isolation due to fabric binding no response from peer
suspended  value: 113

Suspended due to dynamic vsan suspension
suspended  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspended  value: 116

Suspended as extended credit mode not allowed for loop ports
isolated  value: 117

Isolation due to portchannel misconfiguration
suspended  value: 118

Peer device does not support portchannels
isolated  value: 119

Isolation during port bringup
isolated  value: 120

Isolation due to domain not allowed
isolated  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
authFailed  value: 123

Authentication failed
udldUnidir  value: 144

Unidirectional UDLD detected
udldLoop  value: 145

UDLD Tx Rx loop
udldMismatch  value: 146

UDLD neighbor mismatch
udldEmptyEcho  value: 166

UDLD empty echo
udldAggressive  value: 192

UDLD detected link failure in aggressive mode
connectorErr  value: 125

Port connector type error
errDisabled  value: 126

Error disabled due to reinit limit reached
dupPort  value: 127

Duplicate port num in VSAN
internalRcf  value: 128

Internal RCF in progress
dupWwn  value: 129

Duplicate WWN
invalid  value: 130

Invalid other princ epp req received
isolated  value: 131

Isolated due to unknown reason
inCompleteConfig  value: 150

Incomplete tunnel configuration
HWProgFailed  value: 151

Hardware programming failed
destUnreachable  value: 152

No route to tunnel destination address
modRemoved  value: 255

Module removed
mtuFailure  value: 153

MTU allocation failed
down  value: 149

All parameters have not been configured
sfpAbsent  value: 155

SFP is not inserted
xcvrAbsent  value: 239

Transceiver is not inserted
sfpInvalid  value: 154

SFP is not Cisco certified
xcvrInvalid  value: 240

Transceiver is not Cisco certified
bitERateThrshExc  value: 79

Bit error rate threshold exceeded
linkFail  value: 80

Link failure link reset
linkFail  value: 81

Link failure port initialization failed
elpFailAllZPeer  value: 132

ELP failure, all zero peer WWN received
isolated  value: 133

Isolation due to preferred path
isolated  value: 134

FC redirect isolation
portLicNotAvail  value: 135

Port activity license not available
isolated  value: 136

SDM isolation
fcidAllocFail  value: 137

FCID allocation failed
extDisabled  value: 138

Externally disabled
authPending  value: 147

Authorization pending
hotStandbyInBndl  value: 148

Hot standby in bundle
errDisabled  value: 157

Channel error-disabled
capAbsent  value: 156

Port capabilities not known
VRFMismatch  value: 158

Mismatch in source and transport VRF
VRFFWRef  value: 159

Forward referencing transport VRF
duplicateTunnel  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErr  value: 143

Too many link flaps in a short interval
primVlanDn  value: 161

Primary vlan is down.
vrfUnusable  value: 162

VRF Unusable
internalFailureErrDisable  value: 163

Internal handshake failure
bpduguardErrDisable  value: 164

BPDUGuard triggered error disable
portDisabled  value: 168

Port is disabled
securityViolationErrDisable  value: 165

error disabled due to security violation
modeNotConfigured  value: 169

tunnel interface is down because mode is not configured
sourceNotConfigured  value: 170

tunnel interface is down because source is not configured
destinationNotConfigured  value: 171

tunnel interface is down because destination is not configured
unable2ResolveSourceIPAddress  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable2ResolveDestIPAddress  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRFIsDown  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
StpInconsistentVpcPeerLink  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
StpSetPortStateFail  value: 194

Interface is error disabled becasue of STP set port state failure
suspendedByVpc  value: 195

port channel is down because it was suspended by vpc
vpcConfigInProgress  value: 196

vpc configuration is in progress
vpcPeerLinkDown  value: 197

vpc peer-link is down
noResponseFromVpcPeer  value: 198

vpc down because failed to receive response from peer
vpcCompatFailed  value: 303

vpc down because compatibility check failed
notEnoughTcamResrc  value: 304

Not enough free entries in TCAM bank
tunnelSrcDown  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDis  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IPQosFailure  value: 217

Error disabled due to IP QoS policy application failure
routermacFailure  value: 221

Router mac allocation failed
vlanDoesNotExist  value: 230

VLAN/BD does not exist
vlanIsDown  value: 232

VLAN/BD is down
vlanTypeInvalid  value: 231

VLAN type is invalid
dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX Recieved 100 PDUs without ACK
ipQosDcbxpCompatFailure  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
parentDown  value: 254

parent interface down
inactive  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
transceiverSpeedMismatch  value: 237

The speed supported by the transceiver does not match the speed configured on the port
transceiverAuthFailure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Failed to bring up vPC+ peer link Fabric Path switch ID not configured
vPC+PeerLnkNotFabricPath  value: 257

Failed to bring up vPC+ peer link port is not configured as a Fabric Path port
xcvrEthComplianceErr  value: 262

The transceiver has failed ethernet compliance
speedGrpChk  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

state_rsn_desc

Interface state reason detailed

dcxMultipleMSAPs  value: 222

DCX Multiple MSAP IDs recieved for the port
dcxNoACKin100PDUs  value: 223

DCX received 100 PDUs without ACK
sfpInit  value: 238

Transceiver Initializing
other  value: 1

Other
none  value: 2

None
Hardware failure  value: 3

Hardware failure
Diag failure  value: 4

Diag failure
Error disabled  value: 5

Error disabled
Port software failure  value: 6

Port Software failure
Link not connected  value: 7

Link failure or not connected
offline  value: 8

offline
nonPartcipating  value: 9

Non participating
initializing  value: 10

Initializing
inactive  value: 11

Inactive
Administratively down  value: 12

Administratively down
Channel admin down  value: 13

Channel admin down
suspended  value: 14

Suspended
Port suspended  value: 199

Suspended
Memb update in progress  value: 15

Channel membership update in progress
rcfInProgress  value: 16

RCF is in progress
isolatedELPFail  value: 17

Isolation due to ELP failure
isolatedESCFail  value: 18

Isolation due to ESC failure
isolatedDomainOverlap  value: 19

Isolation due to domain overlap
isolatedDomainidAssigmentFail  value: 20

Isolation due to domain id assignment failure
isolatedOthersideEportIsolated  value: 21

Isolation due to domain other side eport isolated
isolatedInvalidFabReconf  value: 22

Isolation due to invalid fabric reconfiguration
isolatedDomainMgrDis  value: 23

Isolation due to domain manager disabled
isolatedZoneMergeFail  value: 24

Isolation due to zone merge failure
isolatedVsanMisConf  value: 25

Isolation due to vsan not configured on peer
Parent Interface Admin down  value: 26

Parent interface admin down
tunnelSrcUnbound  value: 27

Tunnel port src interface unbound
Interface is removed  value: 28

Interface is removed
SFP not present  value: 29

SFP not present
SFP vendor not supported  value: 30

Error disabled due to SFP vendor not supported
errDisabledIncompatPortMode  value: 31

Error disabled due to incompatible admin port mode
errDisabledIncompatPortSpeed  value: 32

Error disabled due to incompatible admin port speed
suspendedIncompatMode  value: 33

Suspended due to incompatible mode
suspendedIncompatSpeed  value: 34

Suspended due to incompatible speed
suspendedIncompatRemoteWWN  value: 35

Suspended due to incompatible remote switch WWN
isolatedOthSideDomainMgrNoResp  value: 36

Isolation due to domain manager other side not responding
errorDisabledEPPFail  value: 37

Error Disabled due to EPP Failure
isolatedVsanMismatch  value: 38

Isolation due to port vsan mismatch
isolatedPortLoopback  value: 39

Isolation due to port loopback to same switch
LC upgrade in progress  value: 40

Linecard upgrade in progress
errDisabledIncompatRxbbcredit  value: 41

Error disabled due to incompatible admin port rxbbcredit
errDisabledIncompatRxbufsize  value: 42

Error disabled due to incompatible admin port rxbufsize
No operational members  value: 43

No operational members
isolatedRemoteservNoResp  value: 44

Isolation due to remote zone server not responding
errDisabledIfaceGroupB  value: 45

Error disabled due to first interface in this group is E
errDisabledIfaceGroupNoShut  value: 46

Error disabled due to other interfaces in this group are not shut
tcpConnClosePeer  value: 47

TCP connection closed by peer
tcpConnResetPeer  value: 48

TCP connection rest by peer
tcpMaxRetx  value: 49

TCP max retransmission reached
tcpKeepAliveExp  value: 50

TCP keep alive timer expired
tcpPersistTmrExp  value: 51

TCP persist timer expired
parentEthLinkDown  value: 52

Parent ethernet link down
parentEthDown  value: 53

Parent ethernet down
adminCfgChange  value: 54

Admin config change
tunnelSrcPortRemoved  value: 55

Tunnel src port removed
tunnelSrcModNotOnline  value: 56

Tunnel source module not online
Port-ch misconfigured  value: 57

Possible port channel misconfiguration
isolatedPortSecFail  value: 58

Isolation due to port security failure
isolatedFabBindFail  value: 59

Isolation due to fabric bind failure
isolatedNoCommVsan  value: 60

Isolation due to no common vsans with peer on trunk
ficonVsanDown  value: 61

Ficon vsan down
invalidAttachFiconMisConfig  value: 62

Invalid attachment Ficon not configured on peer
portBlockedFicon  value: 63

Port blocked due to Ficon
errDisabledIncompatRxbbPrefBuf  value: 64

Error disabled due to incompatible admin port rxbbcredit performance buffers
suspendedInvalidFlogis  value: 65

Suspended due to too many invalid flogis
suspendedPortSec  value: 66

Suspended due to port security
isolatedELPFailRevMismatch  value: 67

Isolation due to ELP failure revision mismatch
isolatedELPFailFParamErr  value: 68

Isolation due to ELP failure class F param error
isolatedELPFailNParamErr  value: 69

Isolation due to ELP failure class N param error
isolatedInvFlctrlCode  value: 70

Isolation due to ELP failure invalid flow control code
isolatedInvFlctrlParam  value: 71

Isolation due to ELP failure invalid flow control param
isolatedELPFailInvPortName  value: 72

Isolation due to ELP failure invalid port name
isolatedELLPFailInvSwName  value: 73

Isolation due to ELP failure invalid switch name
isolatedELPFailMismatch  value: 74

Isolation due to ELP failure R_A_TOV or E_D_TOV mismatch
isolatedELPFailLoopback  value: 75

Isolation due to ELP failure loopback detected
isolatedELPFailInvTxbbcredit  value: 76

Isolation due to ELP failure invalid transmit B2B credit
isolatedELPFailInvPayloadSz  value: 77

Isolation due to ELP failure invalid payload size
errDisabledPortChannelMisConfig  value: 78

Error Disabled due to portchannel misconfiguration
linkNotConnected  value: 82

Link failure Port unusable
linkFailSigLoss  value: 83

Link failure loss of signal
linkFailSyncLoss  value: 84

Link failure loss of sync
linkFailNOSRcvd  value: 85

Link failure NOS received
linkFailOLSRcvd  value: 86

Link failure OLS received
linkFailRenegFail  value: 87

Link failure renegotiation failed
linkFailResetFail  value: 88

Link failure Link Reset failed nonempty recv queue
linkFailEcxessCreditLoss  value: 89

Link failure Excessive credit loss indications
linkFailRecvQOverflow  value: 90

Link failure receive queue overflow
errDisabledExcessportInt  value: 91

Error disabled due to excessive port interrupts
linkFailInitFail  value: 92

Link failure Loop initialization failed nonempty recv queue
linkFailResetFailQNotEmpty  value: 93

Link failure Link reset failed queue not empty
linkFailOPNyTORxQNotEmpty  value: 94

Link failure OPNy timeout while receive queue not empty
linkFailOPNyRetRxQNotEmpty  value: 95

Link failure OPNy returned while receive queue not empty
linkFailQNotEmpty  value: 96

Link failure Link reset failed queue not empty
notConnected  value: 97

Link failure or notconnected
isolatedFCSPFail  value: 98

Isolation due to FCSP failure
SFP checksum error  value: 99

SFP checksum error
suspendedExtLoopDiagFail  value: 100

Suspended due to external Loopback diagnostics failure
isolatedInvFabBind  value: 101

Invalid fabric binding exchange
isolatedTOVMismatch  value: 102

Isolation due to TOV Mismatch
errDisabledFiconNotEnabled  value: 103

Error disabled due to ficon not enabled
noFiconPortNum  value: 104

Error disabled due to no ficon portnumber for logical interface
ficonEnabled  value: 105

Ficon being enabled
ficonProhibit  value: 106

Port down because prohibit mask in place for E TE port
gracefulShutdown  value: 107

Gracefully shutdown
vsansNotUponTrunk  value: 108

Not all VSANs UP on the trunk
isolatedFabBindWWNnotFound  value: 109

Isolation due to fabric binding peer switch WWN not found
isolatedFabBindDomMismatch  value: 110

Isolation due to fabric binding peer domain mismatch
isolatedFabBindDBMismatch  value: 111

Isolation due to fabric binding database mismatch
isolatedNoPeerResp  value: 112

Isolation due to fabric binding no response from peer
suspendedDynVsanSuspend  value: 113

Suspended due to dynamic vsan suspension
suspendedDynVsanNotFound  value: 114

Suspended due to dynamic vsan not found
trackedPortDown  value: 115

All tracked ports down
suspendedExtendedCrednotAllowed  value: 116

Suspended as extended credit mode not allowed for loop ports
Portchannel mis-config  value: 117

Isolation due to portchannel misconfiguration
suspendedPeerNoPortchannelSupp  value: 118

Peer device does not support portchannels
isolatedPortBringup  value: 119

Isolation during port bringup
isolatedDomNotAllowed  value: 120

Isolation due to domain not allowed
isolatedVirIVRDomOverlap  value: 121

Isolation due to virtual IVR domain overlap
outOfService  value: 122

Out of service
Authentication failed  value: 123

Authentication failed
UDLD detected  value: 144

Unidirectional UDLD detected
UDLD Tx Rx loop  value: 145

UDLD Tx Rx loop
UDLD neighbor mismatch  value: 146

UDLD neighbor mismatch
UDLD empty echo  value: 166

UDLD empty echo
UDLD aggressive mode  value: 192

UDLD detected link failure in aggressive mode
connectorTypeErr  value: 125

Port connector type error
Port reinit limit reached  value: 126

Error disabled due to reinit limit reached
duplicatePortInVsan  value: 127

Duplicate port num in VSAN
internalRcfProgress  value: 128

Internal RCF in progress
duplicateWwn  value: 129

Duplicate WWN
invalidOthPrincEppRcvd  value: 130

Invalid other princ epp req received
isolatedUnknowRsn  value: 131

Isolated due to unknown reason
Module removed  value: 255

Module removed
MTU allocation failed  value: 153

MTU allocation failed
Incomplete configuration  value: 150

Incomplete tunnel configuration
Hardware prog failed  value: 151

hardware programming failed
No route to tunnel destination address  value: 152

No route to tunnel destination address
Configuration Incomplete  value: 149

All parameters have not been configured
SFP not inserted  value: 155

SFP is not inserted
XCVR not inserted  value: 239

Transceiver is not inserted
SFP validation failed  value: 154

SFP is not Cisco certified
Transceiver validation failed  value: 240

Transceiver is not Cisco certified
bitErrRateThresholdExceed  value: 79

Bit error rate threshold exceeded
linkFailLinkReset  value: 80

Link failure link reset
linkFailPortInitFail  value: 81

Link failure port initialization failed
elpFailAllZeroPeerWwnRcvd  value: 132

ELP failure, all zero peer WWN received
preferredPathIsolation  value: 133

Isolation due to preferred path
fcRedirectIsolation  value: 134

FC redirect isolation
portActLicenseNotAvailable  value: 135

Port activity license not available
sdmIsolation  value: 136

SDM isolation
fcidAllocationFail  value: 137

FCID allocation failed
externallyDisabled  value: 138

Externally disabled
Authorization pending  value: 147

Authorization pending
Hot standby in bundle  value: 148

Hot standby in bundle
Channel error-disabled  value: 157

Channel error-disabled
Capability absent  value: 156

Port capabilities could not be read from card_cfg server
Mismatch in source and transport VRFs  value: 158

Mismatch in source and transport VRF
Forward referencing transport VRF  value: 159

Forward referencing transport VRF
Duplicate tunnel configurations cannot coexist  value: 160

two tunnel interface with same configuration is not allowed
linkFlapErrDisabled  value: 143

Too many link flaps in a short interval
Primary vlan is down  value: 161

Primary vlan is down.
VRF Unusable  value: 162

VRF Unusable
Internal-Fail errDisable  value: 163

Internal handshake failure
BPDUGuard errDisable  value: 164

BPDUGuard triggered error disable
Port is disabled  value: 168

Port is disabled
Sec-violation errDisable  value: 165

error disabled due to security violation
tunnel mode is not configured  value: 169

tunnel interface is down because mode is not configured
tunnel source is not configured  value: 170

tunnel interface is down because source is not configured
tunnel destination is not configured  value: 171

tunnel interface is down because destination is not configured
unable to resolve source ip-address  value: 172

tunnel interface is down because could not resolved ip-address associated with tunnel source interface
unable to resolve tunnel destination ip-address  value: 173

tunnel interface is down because could not resolved ip-address associated with tunnel destination
VRF configured to interface is down  value: 174

tunnel interface is down because vrf configured to tunnel interface is down
STP inconsistency on VPC peer-link  value: 193

Interface is error disabled becasue of STP inconsistency on VPC peer-link
STP set port state failure  value: 194

Interface is error disabled becasue of STP set port state failure
suspended by vpc  value: 195

port channel is down because it was suspended by vpc
vpc configuration is in progress  value: 196

vpc configuration is in progress
vpc peerlink is down  value: 197

vpc peer-link is down
no response from vpc peer  value: 198

vpc down because failed to receive response from peer
vpc compatibility check failed  value: 303

vpc down because compatibility check failed
not enough tcam entries  value: 304

Not enough free entries in TCAM bank
source interface is down  value: 200

tunnel interface is down because tunnel source interface is down
ipAddrConflictErrDisabled  value: 203

Error disabled due to IP address conflict
fabricIfDown  value: 184

Pinned fabric port is down
invalidFabIf  value: 185

Invalid fabric port
FEX-fabric sfp invalid  value: 202

FEX fabric sfp invalid
SDP timeout/SFP Mismatch  value: 206

SDP timeout/SFP Mismatch
FEX identity mismatch  value: 207

FEX identity mismatch
FEX not configured  value: 209

FEX ID not configured on fabric port
IP QoS policy app failed  value: 217

Error disabled due to IP QoS policy application failure
Router mac alloc failed  value: 221

Router mac allocation failed
VLAN/BD does not exist  value: 230

VLAN/BD does not exist
VLAN/BD is down  value: 232

VLAN/BD is down
VLAN type is invalid  value: 231

VLAN type is invalid
Non-routable VDC mode  value: 250

Non-routable VDC mode
IP Qos DCBXP compat failed  value: 234

Ip Qos DCBXP compat check failed
suspended(min-links)  value: 251

Suspended due to minlinks
Parent interface down  value: 254

Parent Interface Down
Inactive - M1 port not allowed in FabricPath-mode VLAN  value: 253

Inactive - M1 port not allowed in FabricPath-mode VLAN
Transceiver speed does not match the speed configured on the port  value: 237

The speed supported by the transceiver does not match the speed configured on the port
Transceiver auth failure  value: 285

Transceiver authentication failed on the port
vPC+SwitchIDNotCfgd  value: 256

Fabric Path switch ID not configured for vPC+ Peer Link
vPC+PeerLnkNotFabricPath  value: 257

vPC+ peer link port is not configured as a Fabric Path port
The transceiver has failed ethernet compliance  value: 262

The transceiver has failed ethernet compliance
check speed-group config  value: 307

Speed-Group config does not match type of transceiver
suspended(no LACP PDUs)  value: 272

Suspended due to no LACP PDUs received from peer

Command Modes

- /exec

show interface status err-vlans (if_manager)

show interface ifeth_errvlans status err-vlans [ __readonly__ TABLE_interface interface [name] [ TABLE_vlan [err_vlan] [err_vlan_status] [err_vlan_syserr] ] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_errvlans

Type: interface-mrange

Enter interface type and number in module/slot format

status

Show interface line status

err-vlans

Show errored vlans

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

TABLE_vlan

show vlan

err_vlan

Type: string

Errored vlan

err_vlan_status

Type: string

Errored vlan status

err_vlan_syserr

Errored vlan syserr name

Invalid/New Syserr? - Update if_manager_cmd.h and pm_cli_eth.c Ex: CSCsv27076  value: 0

Invalid Syserr
SYSERR_PM_TIMEOUT  value: 0x40290025

SYSERR_PM_TIMEOUT
SYSERR_MCECM_PEER_UNRCH  value: 0x41B70034

SYSERR_MCECM_PEER_UNRCH
SYSERR_MCECM_VLAN_NOT_ALLOWED_PEER  value: 0x41B70036

SYSERR_MCECM_VLAN_NOT_ALLOWED_PEER
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_ELECTION_ERROR  value: 0x41B70037

SYSERR_MCECM_ELECTION_ERROR
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_VLAN_NOT_CFGD_PEER  value: 0x41B7003D

SYSERR_MCECM_VLAN_NOT_CFGD_PEER
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_MCECM_OOB_NOT_OPERATIONAL  value: 0x41B7004D

SYSERR_MCECM_OOB_NOT_OPERATIONAL
SYSERR_MCECM_VLAN_MODE_NOT_ALLOWED  value: 0x41B7006C

SYSERR_MCECM_VLAN_MODE_NOT_ALLOWED
SYSERR_PM_COMPAT_CHECK_FAIL_SPEED  value: 0x40290113

SYSERR_PM_COMPAT_CHECK_FAIL_SPEED
SYSERR_PM_COMPAT_CHECK_FAIL_DUPLEX  value: 0x40290114

SYSERR_PM_COMPAT_CHECK_FAIL_DUPLEX
SYSERR_PM_COMPAT_CHECK_FAIL_PORT_MODE  value: 0x40290115

SYSERR_PM_COMPAT_CHECK_FAIL_PORT_MODE
SYSERR_PM_COMPAT_CHECK_FAIL_NATIVE_VLAN  value: 0x40290116

SYSERR_PM_COMPAT_CHECK_FAIL_NATIVE_VLAN
SYSERR_PM_COMPAT_CHECK_FAIL_MTU  value: 0x40290117

SYSERR_PM_COMPAT_CHECK_FAIL_MTU
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_STP_MODE_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003B

SYSERR_STP_MODE_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_ENDIS_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003C

SYSERR_STP_ENDIS_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_MST_REGION_CFG_NAME_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003D

SYSERR_STP_MST_REGION_CFG_NAME_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_MST_REGION_CFG_REV_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003E

SYSERR_STP_MST_REGION_CFG_REV_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_MST_REGION_CFG_VI_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003F

SYSERR_STP_MST_REGION_CFG_VI_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_LOOPGUARD_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0040

SYSERR_STP_LOOPGUARD_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_BA_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0041

SYSERR_STP_BA_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0042

SYSERR_STP_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_IF_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0043

SYSERR_STP_IF_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_IF_PORT_GUARD_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0044

SYSERR_STP_IF_PORT_GUARD_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_GBL_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0045

SYSERR_STP_GBL_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_IF_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0046

SYSERR_STP_IF_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL

Command Modes

- /exec

show interface status err-vlans (if_manager)

show interface status err-vlans [ __readonly__ TABLE_interface interface [name] TABLE_vlan err_vlan err_vlan_status err_vlan_syserr ]

Syntax Description

show

Show running system information

interface

Show interface status and information

status

Show interface line status

err-vlans

Show errored vlans

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

TABLE_vlan

show vlan

err_vlan

Type: string

Errored vlan

err_vlan_status

Type: string

Errored vlan status

err_vlan_syserr

Errored vlan syserr name

Invalid/New Syserr? - Update if_manager_cmd.h and pm_cli_eth.c Ex: CSCsv27076  value: 0

Invalid Syserr
SYSERR_PM_TIMEOUT  value: 0x40290025

SYSERR_PM_TIMEOUT
SYSERR_MCECM_PEER_UNRCH  value: 0x41B70034

SYSERR_MCECM_PEER_UNRCH
SYSERR_MCECM_VLAN_NOT_ALLOWED_PEER  value: 0x41B70036

SYSERR_MCECM_VLAN_NOT_ALLOWED_PEER
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_ELECTION_ERROR  value: 0x41B70037

SYSERR_MCECM_ELECTION_ERROR
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_VLAN_NOT_CFGD_PEER  value: 0x41B7003D

SYSERR_MCECM_VLAN_NOT_CFGD_PEER
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_MCECM_OOB_NOT_OPERATIONAL  value: 0x41B7004D

SYSERR_MCECM_OOB_NOT_OPERATIONAL
SYSERR_MCECM_VLAN_MODE_NOT_ALLOWED  value: 0x41B7006C

SYSERR_MCECM_VLAN_MODE_NOT_ALLOWED
SYSERR_PM_COMPAT_CHECK_FAIL_SPEED  value: 0x40290113

SYSERR_PM_COMPAT_CHECK_FAIL_SPEED
SYSERR_PM_COMPAT_CHECK_FAIL_DUPLEX  value: 0x40290114

SYSERR_PM_COMPAT_CHECK_FAIL_DUPLEX
SYSERR_PM_COMPAT_CHECK_FAIL_PORT_MODE  value: 0x40290115

SYSERR_PM_COMPAT_CHECK_FAIL_PORT_MODE
SYSERR_PM_COMPAT_CHECK_FAIL_NATIVE_VLAN  value: 0x40290116

SYSERR_PM_COMPAT_CHECK_FAIL_NATIVE_VLAN
SYSERR_PM_COMPAT_CHECK_FAIL_MTU  value: 0x40290117

SYSERR_PM_COMPAT_CHECK_FAIL_MTU
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_STP_MODE_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003B

SYSERR_STP_MODE_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_ENDIS_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003C

SYSERR_STP_ENDIS_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_MST_REGION_CFG_NAME_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003D

SYSERR_STP_MST_REGION_CFG_NAME_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_MST_REGION_CFG_REV_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003E

SYSERR_STP_MST_REGION_CFG_REV_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_MST_REGION_CFG_VI_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD003F

SYSERR_STP_MST_REGION_CFG_VI_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_LOOPGUARD_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0040

SYSERR_STP_LOOPGUARD_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_BA_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0041

SYSERR_STP_BA_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0042

SYSERR_STP_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_IF_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0043

SYSERR_STP_IF_PORT_TYPE_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_IF_PORT_GUARD_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0044

SYSERR_STP_IF_PORT_GUARD_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_GBL_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0045

SYSERR_STP_GBL_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL
SYSERR_STP_IF_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL  value: 0x40DD0046

SYSERR_STP_IF_MST_SIM_PVST_TYPE1_COMPAT_CHECK_FAIL

Command Modes

- /exec

show interface status fex

show interface status fex fex_num [ __readonly__ TABLE_interface interface [name] state vlan duplex speed [type] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

status

Show interface line status

fex

Limit display to interfaces on a FEX

fex_num

Type: integer

min: 100  max: 199

Enter FEX number

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

name

Type: string

Name

state

Interface state

up  value: 0x0001

state is up
down  value: 0x0002

state is down
testing  value: 0x0004

state is testing
trunking  value: 0x0008

state is trunking
link-up  value: 0x0010

state is link up

vlan

Type: string

Vlan

duplex

Duplex

auto  value: 3

Auto
half  value: 1

Half
full  value: 2

Full

speed

Speed

auto  value: 0

Auto
10  value: 10

10Mb/s
100  value: 100

100Mb/s
auto  value: 110

Auto 10-100Mb/s
1000  value: 1000

1Gb/s
10G  value: 10000

10Gb/s
a-10  value: 16

10Mb/s
a-100  value: 106

100Mb/s
a-1000  value: 1006

1Gb/s
a-10G  value: 10006

10Gb/s
40G  value: 40000

40Gb/s
100G  value: 100000

100Gb/s
a-40G  value: 40006

40Gb/s
a-100G  value: 100006

100Gb/s

type

Type: string

Type

Command Modes

- /exec

show interface switchport (if_manager)

show interface ifeth_swtch switchport [ __readonly__ TABLE_interface interface switchport [switchport_monitor] [oper_mode] [access_vlan] [access_vlan_name] [native_vlan] [native_vlan_name] [trunk_vlans] [fabricpath_topologies] [pruning_vlans] [admin_pvlan_pri_assoc] [admin_pvlan_sec_assoc] [admin_pvlan_pri_mapping] [admin_pvlan_sec_mapping] [admin_pvlan_trunk_native] [admin_pvlan_trunk_encap] [admin_pvlan_trunk_normal] [admin_pvlan_trunk_private] [oper_pvlan] [autostate_mode] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_swtch

Type: interface-mrange

Enter interface type and number in module/slot format

switchport

Show interface switchport information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

switchport

Type: string

Switchport enabled

switchport_monitor

Switchport monitor enabled

Not enabled  value: 0

Not enabled
Enabled  value: 1

Enabled

oper_mode

Operational mode

access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
Private-vlan host  value: 0x00400000

PVLAN host
Private-vlan promiscuous  value: 0x00800000

PVLAN promiscuous
Private-vlan trunk promiscuous  value: 0x10000000

PVLAN trunk promiscuous
Private-vlan trunk secondary  value: 0x20000000

PVLAN_trunk_secondary
fex-fabric  value: 0x02000000

FEX fabric
dot1q-tunnel  value: 0x01000000

1qTunl
FabricPath  value: 0x00100003

FabricPath

access_vlan

Type: uinteger

Access mode VLAN

access_vlan_name

Type: string

Access mode VLAN name

native_vlan

Type: uinteger

Trunking native mode VLAN

native_vlan_name

Type: string

Trunking native mode VLAN name

trunk_vlans

Type: string

Trunking VLANs Allowed

fabricpath_topologies

Type: string

FabricPath Topologies Allowed

pruning_vlans

Type: string

Pruning eligible VLANs

admin_pvlan_pri_assoc

Type: string

Administrative private-vlan primary host-association

admin_pvlan_sec_assoc

Type: string

Administrative private-vlan secondary host-association

admin_pvlan_pri_mapping

Type: string

Administrative private-vlan primary mapping

admin_pvlan_sec_mapping

Type: string

Administrative private-vlan secondary mapping

admin_pvlan_trunk_native

Type: string

Administrative private-vlan trunk native VLAN

admin_pvlan_trunk_encap

Type: string

Administrative private-vlan trunk encapsulation

admin_pvlan_trunk_normal

Type: string

Administrative private-vlan trunk normal VLANs

admin_pvlan_trunk_private

Type: string

Administrative private-vlan trunk private VLANs

oper_pvlan

Type: string

Operational private-vlan

autostate_mode

Type: string

SVI Autostate Exclude Info

Command Modes

- /exec

show interface switchport (if_manager)

show interface switchport [ __readonly__ TABLE_interface interface switchport [switchport_monitor] [oper_mode] [access_vlan] [access_vlan_name] [native_vlan] [native_vlan_name] [trunk_vlans] [fabricpath_topologies] [pruning_vlans] [admin_pvlan_pri_assoc] [admin_pvlan_sec_assoc] [admin_pvlan_pri_mapping] [admin_pvlan_sec_mapping] [admin_pvlan_trunk_native] [admin_pvlan_trunk_encap] [admin_pvlan_trunk_normal] [admin_pvlan_trunk_private] [oper_pvlan] [autostate_mode] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

switchport

Show interface switchport information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

switchport

Type: string

Switchport enabled

switchport_monitor

Switchport monitor enabled

Not enabled  value: 0

Not enabled
Enabled  value: 1

Enabled

oper_mode

Operational mode

access  value: 0x00080000

Access
trunk  value: 0x00100000

Trunk
Private-vlan host  value: 0x00400000

PVLAN host
Private-vlan promiscuous  value: 0x00800000

PVLAN promiscuous
Private-vlan trunk promiscuous  value: 0x10000000

PVLAN trunk promiscuous
Private-vlan trunk secondary  value: 0x20000000

PVLAN_trunk_secondary
fex-fabric  value: 0x02000000

FEX fabric
dot1q-tunnel  value: 0x01000000

1qTunl
FabricPath  value: 0x00100003

FabricPath

access_vlan

Type: uinteger

Access mode VLAN

access_vlan_name

Type: string

Access mode VLAN name

native_vlan

Type: uinteger

Trunking native mode VLAN

native_vlan_name

Type: string

Trunking native mode VLAN name

trunk_vlans

Type: string

Trunking VLANs Allowed

fabricpath_topologies

Type: string

FabricPath Topologies Allowed

pruning_vlans

Type: string

Pruning eligible VLANs

admin_pvlan_pri_assoc

Type: string

Administrative private-vlan primary host-association

admin_pvlan_sec_assoc

Type: string

Administrative private-vlan secondary host-association

admin_pvlan_pri_mapping

Type: string

Administrative private-vlan primary mapping

admin_pvlan_sec_mapping

Type: string

Administrative private-vlan secondary mapping

admin_pvlan_trunk_native

Type: string

Administrative private-vlan trunk native VLAN

admin_pvlan_trunk_encap

Type: string

Administrative private-vlan trunk encapsulation

admin_pvlan_trunk_normal

Type: string

Administrative private-vlan trunk normal VLANs

admin_pvlan_trunk_private

Type: string

Administrative private-vlan trunk private VLANs

oper_pvlan

Type: string

Operational private-vlan

autostate_mode

Type: string

SVI Autostate Exclude Info

Command Modes

- /exec

show interface transceiver (if_manager)

show interface ifid_transceiver transceiver [ calibrations | details | sprom ] [ __readonly__ TABLE_interface interface [sfp] [type] [name] [partnum] [rev] [serialnum] [nom_bitrate] [len_9] [len_9_2] [len_50] [len_625] [len_cu] [len_50_OM3] [txcvr_type] [connector_type] [bit_encoding] [protocol_type] [10gbe_code] [fiber_type_byte0] [fiber_type_byte1] [tx_range] [ciscoid] [ciscoid_1] [cisco_part_number] [cisco_product_id] [cisco_vendor_id] [temp_slope] [temp_offset] [volt_slope] [volt_offset] [curr_slope] [curr_offset] [tx_pwr_slope] [tx_pwr_offset] [rx_pwr_4] [rx_pwr_3] [rx_pwr_2] [rx_pwr_1] [rx_pwr_0] [ TABLE_lane [lane_number] [temperature] [temp_flag] [temp_alrm_hi] [temp_alrm_lo] [temp_warn_hi] [temp_warn_lo] [voltage] [volt_flag] [volt_alrm_hi] [volt_alrm_lo] [volt_warn_hi] [volt_warn_lo] [current] [current_flag] [current_alrm_hi] [current_alrm_lo] [current_warn_hi] [current_warn_lo] [tx_pwr] [tx_pwr_flag] [tx_pwr_alrm_hi] [tx_pwr_alrm_lo] [tx_pwr_warn_hi] [tx_pwr_warn_lo] [rx_pwr] [rx_pwr_flag] [rx_pwr_alrm_hi] [rx_pwr_alrm_lo] [rx_pwr_warn_hi] [rx_pwr_warn_lo] [xmit_faults] ] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifid_transceiver

Type: interface-mrange

Enter interface type and number in module/slot format

transceiver

Show interface transceiver information

calibrations

Show interface transceiver calibration information

details

Show interface transceiver detail information

sprom

Show interface transceiver sprom information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

sfp

Type: string

sfp

type

Type: string

type

name

Type: string

Name

partnum

Type: string

part number

rev

Type: string

revision

serialnum

Type: string

serial number

nom_bitrate

Type: uinteger

Nominal bit rate in MBits/sec

len_9

Type: uinteger

Link length supported for 9/125um fiber in Km

len_9_2

Type: uinteger

Link length supported for 9/125um fiber in m

len_50

Type: uinteger

Link length supported for 50/125um fiber in m

len_625

Type: uinteger

Link length supported for 62.5/125um fiber in m

len_cu

Type: uinteger

Link length supported for copper sfp in m

len_50_OM3

Type: uinteger

Link length supported for 50/125um fiber in m

txcvr_type

Type: string

connector_type

Type: string

bit_encoding

Type: string

protocol_type

Type: string

10gbe_code

Type: string

fiber_type_byte0

Type: string

fiber_type_byte1

Type: string

tx_range

Type: uinteger

ciscoid

Type: string

Cisco extended id

ciscoid_1

Type: uinteger

Cisco extended id number

cisco_part_number

Type: string

Cisco part number

cisco_product_id

Type: string

Cisco product identifier

cisco_vendor_id

Type: string

Cisco vendor identifier

temp_slope

Type: uinteger

Temperature slope

temp_offset

Type: uinteger

Temperature offset

volt_slope

Type: uinteger

Voltage slope

volt_offset

Type: uinteger

Voltage offset

curr_slope

Type: uinteger

Current slope

curr_offset

Type: uinteger

Current offset

tx_pwr_slope

Type: uinteger

Tx power slope

tx_pwr_offset

Type: uinteger

Tx power offset

rx_pwr_4

Type: float

Rx power 4

rx_pwr_3

Type: float

Rx power 3

rx_pwr_2

Type: float

Rx power 2

rx_pwr_1

Type: float

Rx power 1

rx_pwr_0

Type: float

Rx power 0

TABLE_lane

show lane

lane_number

Type: uinteger

Lane number

temperature

Type: float

Temperature

temp_flag

Temperature Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

temp_alrm_hi

Type: float

Temperature Alarm High

temp_alrm_lo

Type: float

Temperature Alarm Low

temp_warn_hi

Type: float

Temperature Warning High

temp_warn_lo

Type: float

Temperature Warning Low

voltage

Type: float

Voltage

volt_flag

Voltage Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

volt_alrm_hi

Type: float

Voltage Alarm High

volt_alrm_lo

Type: float

Voltage Alarm Low

volt_warn_hi

Type: float

Voltage Warning High

volt_warn_lo

Type: float

Voltage Warning Low

current

Type: float

Current

current_flag

Current Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

current_alrm_hi

Type: float

Current Alarm High

current_alrm_lo

Type: float

Current Alarm Low

current_warn_hi

Type: float

Current Warning High

current_warn_lo

Type: float

Current Warning Low

tx_pwr

Type: float

Tx Power

tx_pwr_flag

Tx Power Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

tx_pwr_alrm_hi

Type: float

Tx Power Alarm High

tx_pwr_alrm_lo

Type: float

Tx Power Alarm Low

tx_pwr_warn_hi

Type: float

Tx Power Warning High

tx_pwr_warn_lo

Type: float

Tx Power Warning Low

rx_pwr

Type: float

Rx Power

rx_pwr_flag

Rx Power Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

rx_pwr_alrm_hi

Type: float

Rx Power Alarm High

rx_pwr_alrm_lo

Type: float

Rx Power Alarm Low

rx_pwr_warn_hi

Type: float

Rx Power Warning High

rx_pwr_warn_lo

Type: float

Rx Power Warning Low

xmit_faults

Type: longlong

Transmit Fault Count

Command Modes

- /exec

show interface transceiver (if_manager)

show interface transceiver [ calibrations | details ] [ __readonly__ TABLE_interface interface [sfp] [type] [name] [partnum] [rev] [serialnum] [nom_bitrate] [len_9] [len_50] [len_625] [len_cu] [len_50_OM3] [txcvr_type] [connector_type] [bit_encoding] [protocol_type] [10gbe_code] [fiber_type_byte0] [fiber_type_byte1] [tx_range] [ciscoid] [ciscoid_1] [cisco_part_number] [cisco_product_id] [cisco_vendor_id] [temp_slope] [temp_offset] [volt_slope] [volt_offset] [curr_slope] [curr_offset] [tx_pwr_slope] [tx_pwr_offset] [rx_pwr_4] [rx_pwr_3] [rx_pwr_2] [rx_pwr_1] [rx_pwr_0] [ TABLE_lane [lane_number] [temperature] [temp_flag] [temp_alrm_hi] [temp_alrm_lo] [temp_warn_hi] [temp_warn_lo] [voltage] [volt_flag] [volt_alrm_hi] [volt_alrm_lo] [volt_warn_hi] [volt_warn_lo] [current] [current_flag] [current_alrm_hi] [current_alrm_lo] [current_warn_hi] [current_warn_lo] [tx_pwr] [tx_pwr_flag] [tx_pwr_alrm_hi] [tx_pwr_alrm_lo] [tx_pwr_warn_hi] [tx_pwr_warn_lo] [rx_pwr] [rx_pwr_flag] [rx_pwr_alrm_hi] [rx_pwr_alrm_lo] [rx_pwr_warn_hi] [rx_pwr_warn_lo] [xmit_faults] ] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

transceiver

Show interface transceiver information

calibrations

Show interface transceiver calibration information

details

Show interface transceiver detail information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

sfp

Type: string

sfp

type

Type: string

type

name

Type: string

Name

partnum

Type: string

part number

rev

Type: string

revision

serialnum

Type: string

serial number

nom_bitrate

Type: uinteger

Nominal bit rate in MBits/sec

len_9

Type: uinteger

Link length supported for 9/125um fiber

len_50

Type: uinteger

Link length supported for 50/125um fiber

len_625

Type: uinteger

Link length supported for 62.5/125um fiber

len_cu

Type: uinteger

Link length supported for copper

len_50_OM3

Type: uinteger

Link length supported for 50/125um fiber in m

txcvr_type

Type: string

connector_type

Type: string

bit_encoding

Type: string

protocol_type

Type: string

10gbe_code

Type: string

fiber_type_byte0

Type: string

fiber_type_byte1

Type: string

tx_range

Type: uinteger

ciscoid

Type: string

Cisco extended id

ciscoid_1

Type: uinteger

Cisco extended id number

cisco_part_number

Type: string

Cisco part number

cisco_product_id

Type: string

Cisco product identifier

cisco_vendor_id

Type: string

Cisco vendor identifier

temp_slope

Type: uinteger

Temperature slope

temp_offset

Type: uinteger

Temperature offset

volt_slope

Type: uinteger

Voltage slope

volt_offset

Type: uinteger

Voltage offset

curr_slope

Type: uinteger

Current slope

curr_offset

Type: uinteger

Current offset

tx_pwr_slope

Type: uinteger

Tx power slope

tx_pwr_offset

Type: uinteger

Tx power offset

rx_pwr_4

Type: float

Rx power 4

rx_pwr_3

Type: float

Rx power 3

rx_pwr_2

Type: float

Rx power 2

rx_pwr_1

Type: float

Rx power 1

rx_pwr_0

Type: float

Rx power 0

TABLE_lane

show lane

lane_number

Type: uinteger

Lane number

temperature

Type: float

Temperature

temp_flag

Temperature Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

temp_alrm_hi

Type: float

Temperature Alarm High

temp_alrm_lo

Type: float

Temperature Alarm Low

temp_warn_hi

Type: float

Temperature Warning High

temp_warn_lo

Type: float

Temperature Warning Low

voltage

Type: float

Voltage

volt_flag

Voltage Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

volt_alrm_hi

Type: float

Voltage Alarm High

volt_alrm_lo

Type: float

Voltage Alarm Low

volt_warn_hi

Type: float

Voltage Warning High

volt_warn_lo

Type: float

Voltage Warning Low

current

Type: float

Current

current_flag

Current Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

current_alrm_hi

Type: float

Current Alarm High

current_alrm_lo

Type: float

Current Alarm Low

current_warn_hi

Type: float

Current Warning High

current_warn_lo

Type: float

Current Warning Low

tx_pwr

Type: float

Tx Power

tx_pwr_flag

Tx Power Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

tx_pwr_alrm_hi

Type: float

Tx Power Alarm High

tx_pwr_alrm_lo

Type: float

Tx Power Alarm Low

tx_pwr_warn_hi

Type: float

Tx Power Warning High

tx_pwr_warn_lo

Type: float

Tx Power Warning Low

rx_pwr

Type: float

Rx Power

rx_pwr_flag

Rx Power Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

rx_pwr_alrm_hi

Type: float

Rx Power Alarm High

rx_pwr_alrm_lo

Type: float

Rx Power Alarm Low

rx_pwr_warn_hi

Type: float

Rx Power Warning High

rx_pwr_warn_lo

Type: float

Rx Power Warning Low

xmit_faults

Type: longlong

Transmit Fault Count

Command Modes

- /exec

show interface transceiver fex-fabric (if_manager)

show interface ifeth_trans transceiver fex-fabric [ calibrations | details ] [ __readonly__ TABLE_interface interface sfp name partnum rev serialnum nom_bitrate len_50 len_625 ciscoid ciscoid_1 [temp_slope] [temp_offset] [volt_slope] [volt_offset] [curr_slope] [curr_offset] [tx_pwr_slope] [tx_pwr_offset] [rx_pwr_4] [rx_pwr_3] [rx_pwr_2] [rx_pwr_1] [rx_pwr_0] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_trans

Type: interface-mrange

Enter interface type and number in module/slot format

transceiver

Show interface transceiver information

fex-fabric

Show FEX interface transceiver information

calibrations

Show interface transceiver calibration information

details

Show interface transceiver detail information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

sfp

Type: string

sfp

name

Type: string

Name

partnum

Type: string

part number

rev

Type: string

revision

serialnum

Type: string

serial number

nom_bitrate

Type: uinteger

Nominal bit rate in MBits/sec

len_50

Type: uinteger

Link length supported for 50/125mm fiber

len_625

Type: uinteger

Link length supported for 62.5/125mm fiber

ciscoid

Type: string

Cisco extended id

ciscoid_1

Type: uinteger

Cisco extended id number

temp_slope

Type: uinteger

Temperature slope

temp_offset

Type: uinteger

Temperature offset

volt_slope

Type: uinteger

Voltage slope

volt_offset

Type: uinteger

Voltage offset

curr_slope

Type: uinteger

Current slope

curr_offset

Type: uinteger

Current offset

tx_pwr_slope

Type: uinteger

Tx power slope

tx_pwr_offset

Type: uinteger

Tx power offset

rx_pwr_4

Type: float

Rx power 4

rx_pwr_3

Type: float

Rx power 3

rx_pwr_2

Type: float

Rx power 2

rx_pwr_1

Type: float

Rx power 1

rx_pwr_0

Type: float

Rx power 0

Command Modes

- /exec

show interface transceiver fex-fabric (if_manager)

show interface transceiver fex-fabric [ calibrations | details ] [ __readonly__ TABLE_interface interface [sfp] [type] [name] [partnum] [rev] [serialnum] [nom_bitrate] [len_50] [len_625] [ciscoid] [ciscoid_1] [temp_slope] [temp_offset] [volt_slope] [volt_offset] [curr_slope] [curr_offset] [tx_pwr_slope] [tx_pwr_offset] [rx_pwr_4] [rx_pwr_3] [rx_pwr_2] [rx_pwr_1] [rx_pwr_0] [lane_number] [temperature] [temp_flag] [temp_alrm_hi] [temp_alrm_lo] [temp_warn_hi] [temp_warn_lo] [voltage] [volt_flag] [volt_alrm_hi] [volt_alrm_lo] [volt_warn_hi] [volt_warn_lo] [current] [current_flag] [current_alrm_hi] [current_alrm_lo] [current_warn_hi] [current_warn_lo] [tx_pwr] [tx_pwr_flag] [tx_pwr_alrm_hi] [tx_pwr_alrm_lo] [tx_pwr_warn_hi] [tx_pwr_warn_lo] [rx_pwr] [rx_pwr_flag] [rx_pwr_alrm_hi] [rx_pwr_alrm_lo] [rx_pwr_warn_hi] [rx_pwr_warn_lo] [xmit_faults] ]

Syntax Description

show

Show running system information

interface

Show interface status and information

transceiver

Show interface transceiver information

fex-fabric

Show FEX interface transceiver information

calibrations

Show interface transceiver calibration information

details

Show interface transceiver detail information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

sfp

Type: string

sfp

type

Type: string

type

name

Type: string

Name

partnum

Type: string

part number

rev

Type: string

revision

serialnum

Type: string

serial number

nom_bitrate

Type: uinteger

Nominal bit rate in MBits/sec

len_50

Type: uinteger

Link length supported for 50/125mm fiber

len_625

Type: uinteger

Link length supported for 62.5/125mm fiber

ciscoid

Type: string

Cisco extended id

ciscoid_1

Type: uinteger

Cisco extended id number

temp_slope

Type: uinteger

Temperature slope

temp_offset

Type: uinteger

Temperature offset

volt_slope

Type: uinteger

Voltage slope

volt_offset

Type: uinteger

Voltage offset

curr_slope

Type: uinteger

Current slope

curr_offset

Type: uinteger

Current offset

tx_pwr_slope

Type: uinteger

Tx power slope

tx_pwr_offset

Type: uinteger

Tx power offset

rx_pwr_4

Type: float

Rx power 4

rx_pwr_3

Type: float

Rx power 3

rx_pwr_2

Type: float

Rx power 2

rx_pwr_1

Type: float

Rx power 1

rx_pwr_0

Type: float

Rx power 0

lane_number

Type: uinteger

Lane number

temperature

Type: float

Temperature

temp_flag

Temperature Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

temp_alrm_hi

Type: float

Temperature Alarm High

temp_alrm_lo

Type: float

Temperature Alarm Low

temp_warn_hi

Type: float

Temperature Warning High

temp_warn_lo

Type: float

Temperature Warning Low

voltage

Type: float

Voltage

volt_flag

Voltage Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

volt_alrm_hi

Type: float

Voltage Alarm High

volt_alrm_lo

Type: float

Voltage Alarm Low

volt_warn_hi

Type: float

Voltage Warning High

volt_warn_lo

Type: float

Voltage Warning Low

current

Type: float

Current

current_flag

Current Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

current_alrm_hi

Type: float

Current Alarm High

current_alrm_lo

Type: float

Current Alarm Low

current_warn_hi

Type: float

Current Warning High

current_warn_lo

Type: float

Current Warning Low

tx_pwr

Type: float

Tx Power

tx_pwr_flag

Tx Power Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

tx_pwr_alrm_hi

Type: float

Tx Power Alarm High

tx_pwr_alrm_lo

Type: float

Tx Power Alarm Low

tx_pwr_warn_hi

Type: float

Tx Power Warning High

tx_pwr_warn_lo

Type: float

Tx Power Warning Low

rx_pwr

Type: float

Rx Power

rx_pwr_flag

Rx Power Flag

++  value: 1

High Alarm
+  value: 2

High Warning
-  value: 3

Low Warning
--  value: 4

Low Alarm
value: 5

No Alarm or Warning

rx_pwr_alrm_hi

Type: float

Rx Power Alarm High

rx_pwr_alrm_lo

Type: float

Rx Power Alarm Low

rx_pwr_warn_hi

Type: float

Rx Power Warning High

rx_pwr_warn_lo

Type: float

Rx Power Warning Low

xmit_faults

Type: longlong

Transmit Fault Count

Command Modes

- /exec

show interface trunk (if_manager)

show interface ifeth_trnk trunk [ __readonly__ TABLE_interface interface native status portchannel TABLE_allowed_vlans interface allowedvlans TABLE_errored_vlans interface erroredvlans TABLE_stp_forward interface stpfwd_vlans TABLE_fabricpath_vlans interface fabricpath_vlans TABLE_vtp_pruning interface vtppruning_vlans ]

Syntax Description

show

Show running system information

interface

Show interface status and information

ifeth_trnk

Type: interface-mrange

Enter interface type and number in module/slot format

trunk

Show interface trunk information

__readonly__

Read Only

interface

Type: interface

Interface index

TABLE_interface

show interface

TABLE_allowed_vlans

show allowed vlans

TABLE_errored_vlans

show errored vlans

TABLE_stp_forward

show STP forwarding VLANs

TABLE_fabricpath_vlans

show fabricpath VLANs

TABLE_vtp_pruning

show VTP pruning VLANs

status

Type: string

Status

native

Type: uinteger

Native VLAN

portchannel

Type: string

Port Channel

allowedvlans

Type: string

VLANs allowed and active in management domain

erroredvlans

Type: string

Errored VLANs

stpfwd_vlans

Type: string

STP Forwarding VLANs

fabricpath_vlans

Type: string

FabricPath VLANs

vtppruning_vlans

Type: string

VTP Pruning VLANs

Command Modes

- /exec

show interface trunk (if_manager)

show interface trunk [ module module | vlan vlan_id | fex fex_num ] [ __readonly__ TABLE_interface interface native status portchannel TABLE_allowed_vlans interface allowedvlans TABLE_errored_vlans interface erroredvlans TABLE_stp_forward interface stpfwd_vlans TABLE_fabricpath_vlans interface fabricpath_vlans TABLE_vtp_pruning interface vtppruning_vlans ]

Syntax Description

show

Show running system information

interface

Show interface status and information

trunk

Show interface trunk information

module

Limit display to interfaces on module

module

Type: integer

Enter module number

fex

Limit display to interfaces on a FEX

fex_num

Type: integer

min: 100  max: 199

Enter FEX number

vlan

Show per vlan information for trunk

vlan_id

Type: vlan-mrange

Enter vlan range

interface

Type: interface

Interface index

__readonly__

Read Only

TABLE_interface

show interface

TABLE_allowed_vlans

show allowed vlans

TABLE_errored_vlans

show errored vlans

TABLE_stp_forward

show STP forwarding VLANs

TABLE_fabricpath_vlans

show fabricpath VLANs

TABLE_vtp_pruning

show VTP pruning VLANs

status

Type: string

Status

native

Type: uinteger

Native VLAN

portchannel

Type: string

Port Channel

allowedvlans

Type: string

VLANs allowed and active in management domain

erroredvlans

Type: string

Errored VLANs

stpfwd_vlans

Type: string

STP Forwarding VLANs

fabricpath_vlans

Type: string

FabricPath VLANs

vtppruning_vlans

Type: string

VTP Pruning VLANs

Command Modes

- /exec

show inventory

show inventory [ chassis | clock | fans | power_supply | module [module] | s0 [santa-cruz-range] ] [ __readonly__ TABLE_inv name desc productid vendorid serialnum ]

Syntax Description

show

Show running system information

inventory

system inventory information

chassis

system inventory chassis information

clock

system inventory clock information

fans

system inventory fan information

power_supply

system inventory power supply information

module

system inventory module information

module

Type: integer

please enter the module number

s0

Type: xbar-str

please enter the module number

santa-cruz-range

Type: integer

please enter the xbar number

__readonly__

TABLE_inv

Inventory table

name

Type: string

Name of inventory

desc

Type: string

Description of inventory

productid

Type: string

Product ID

vendorid

Type: string

Vendor ID

serialnum

Type: string

Serial Number

Command Modes

- /exec

show inventory fex

show inventory fex i [ __readonly__ TABLE_inv name desc productid vendorid serialnum ]

Syntax Description

show

Show running system information

inventory

system inventory information

fex

Show fex physical inventory

i

Type: integer

min: 100  max: 199

Enter FEX identifier

__readonly__

TABLE_inv

Inventory table

name

Type: string

Name of inventory

desc

Type: string

Description of inventory

productid

Type: string

Product ID

vendorid

Type: string

Vendor ID

serialnum

Type: string

Serial Number

Command Modes

- /exec

show ip (bgp)

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } { route-map { rmap-name | rmap-name } | filter-list { fltrlist-name | test_pol_name } | { community-list { commlist-name | test_pol_name } | extcommunity-list { extcommlist-name | test_pol_name } } [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

route-map

Display routes matching the route-map

rmap-name

Type: string

pattern: [!-~]*

length: 63

Route-map name

rmap-name

Type: string

Known route-map name

filter-list

Display routes matching the filter-list

fltrlist-name

Type: string

length: 63

Name of filter-list

community-list

Display routes matching the community-list

extcommunity-list

Display routes matching the extcommunity-list

commlist-name

Type: string

length: 63

Name of community-list

extcommlist-name

Type: string

length: 63

Name of extcommunity-list

test_pol_name

Type: string

An existing test-list policy

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

exact-match

Exact match of the communities

Command Modes

- /exec

show ip (bgp)

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast | mdt } | all ] } [ ip-addr [ ip-mask [longer-prefixes] ] | ip-prefix [longer-prefixes] ] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ip-addr

Type: ipaddr

Display one particular network from the BRIB in detail

ip-mask

Type: ipaddr

Mask for one particular prefix in the BRIB

ip-prefix

Type: ipprefix

Display one particular prefix from the BRIB in detail

longer-prefixes

Display route and more specific routes

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

mdt

Display BGP information for multicast distribution tree

all

Display BGP information for all address families

Command Modes

- /exec

show ip adjacency

show ip adjacency [ interface [summary] | ip-addr [ non-best | detail ] | detail | summary | non-best | [throttle] statistics ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [invalid_pkt_cnt] [invalid_byte_cnt] [global_drop_pkt_cnt] [global_drop_byte_cnt] [global_punt_pkt_cnt] [global_punt_byte_cnt] [global_glean_pkt_cnt] [global_glean_byte_cnt] [glean_pkt_cnt] [glean_byte_cnt] [normal_pkt_cnt] [normal_byte_cnt] [last_updated] [count-static] [count-dynamic] [count-others] [count-throttle] [count-total] [ TABLE_vrf vrf-name-out [ TABLE_afi afi count [ TABLE_adj intf-out ip-addr-out [phy-intf] mac pref owner [pkt-count] [byte-count] [is-best] [is-thrtld] ] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

adjacency

Display adjacency table

interface

Type: interface

Display specific interface adjacencies only

ip-addr

Type: ipaddr

IPV4 source address

detail

Show detail information of adjacency entries

summary

Show adjacency summary

non-best

Show both best/non-best entries

throttle

Throttle

statistics

Show adjacency statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Show adjacency entries for all vrfs

__readonly__

TABLE_vrf

vrf-name-out

Type: string

invalid_pkt_cnt

Type: uinteger

invalid_byte_cnt

Type: uinteger

global_drop_pkt_cnt

Type: uinteger

global_drop_byte_cnt

Type: uinteger

global_punt_pkt_cnt

Type: uinteger

global_punt_byte_cnt

Type: uinteger

global_glean_pkt_cnt

Type: uinteger

global_glean_byte_cnt

Type: uinteger

glean_pkt_cnt

Type: uinteger

glean_byte_cnt

Type: uinteger

normal_pkt_cnt

Type: uinteger

normal_byte_cnt

Type: uinteger

last_updated

Type: string

count-static

Type: uinteger

count-dynamic

Type: uinteger

count-others

Type: uinteger

count-throttle

Type: uinteger

count-total

Type: uinteger

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

count

Type: uinteger

TABLE_adj

intf-out

Type: string

phy-intf

Type: string

ip-addr-out

Type: ipaddr

mac

Type: ethernet

pref

Type: uinteger

owner

Type: string

pkt-count

Type: uinteger

byte-count

Type: uinteger

is-best

Type: string

is-thrtld

Type: string

Command Modes

- /exec

show ip arp

show ip arp [ [ ip-address | [ sync-entries | fhrp-non-active-learn ] [detail] | static | summary | [summary] interface ] [ vrf { vrf-name | vrf-known-name | all } ] ] [ __readonly__ TABLE_vrf vrf-name-out [cnt-resolved] [cnt-incomplete] [cnt-thrtld-incomplete] [cnt-unknown] [cnt-total] [ TABLE_adj intf-out ip-addr-out [time-stamp] mac [phy-intf] [unknown] [incomplete] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

summary

Display ARP adjacency summary

detail

Display detailed information

sync-entries

Display ARP table learnt only due to arp table sync

fhrp-non-active-learn

Display ARP table learnt only due to request for non-active FHRP address

interface

Type: interface

ARP interface

ip-address

Type: ipaddr

IP address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display ARP entries for all vrfs

static

Display Static ARP entries

__readonly__

TABLE_vrf

vrf-name-out

Type: string

cnt-resolved

Type: uinteger

cnt-incomplete

Type: uinteger

cnt-thrtld-incomplete

Type: uinteger

cnt-unknown

Type: uinteger

cnt-total

Type: uinteger

TABLE_adj

intf-out

Type: string

ip-addr-out

Type: ipaddr

time-stamp

Type: string

mac

Type: ethernet

phy-intf

Type: string

unknown

Type: bool

incomplete

Type: bool

Command Modes

- /exec

show ip arp cache

show ip arp cache { { brief | detail } | interface [intf] } [operational]

Syntax Description

show

Show running system information

ip

Display IP information

arp

arp

cache

Display ip arp cache

interface

Display ip arp related interface information

brief

Display summary of arp interface status and configuration

detail

Display detailed information of arp interface status and configuration

operational

Display only interfaces that are administratively enabled

intf

Type: interface

Interface name to display

Command Modes

- /exec

show ip arp client

show ip arp client [ __readonly__ arp-clients [ TABLE_arp_client_list arp-cli-uuid l2-client-type client-flg mts-addr-sap cli-msg-cnt [l2-cli-func-name] [l2-cli-dbg-func] [l2-cli-dbg-un-init-func] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

client

Display ARP Client table

__readonly__

arp-clients

Type: longlong

TABLE_arp_client_list

arp-cli-uuid

Type: integer

l2-client-type

Type: string

client-flg

Type: integer

mts-addr-sap

Type: longlong

cli-msg-cnt

Type: longlong

l2-cli-func-name

Type: string

l2-cli-dbg-func

Type: string

l2-cli-dbg-un-init-func

Type: string

Command Modes

- /exec

show ip arp inspection

show ip arp inspection [ __readonly__ src_mac_valid dest_mac_valid ip_addr_valid TABLE_entry active_vlan_id is_insp_enabled oper_state acl_name is_static_acl acl_logging dhcp_logging req_fwded res_fwded req_dropped res_dropped dhcp_drops acl_drops dhcp_permits acl_permits req_smac_fails res_smac_fails res_dmac_fails req_ip_fails res_ip_fails ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

arp

IP ARP table

inspection

Status of ARP Inspection Not available in this release.

__readonly__

src_mac_valid

Type: uinteger

dest_mac_valid

Type: uinteger

ip_addr_valid

Type: uinteger

TABLE_entry

active_vlan_id

Type: vlan

is_insp_enabled

enabled  value: 1

disabled  value: 0

oper_state

active  value: 1

inactive  value: 0

acl_name

Type: string

is_static_acl

static  value: 1

non-static  value: 0

acl_logging

deny  value: 1

permit  value: 2

dhcp_logging

deny  value: 1

permit  value: 2

req_fwded

Type: long

res_fwded

Type: long

req_dropped

Type: long

res_dropped

Type: long

dhcp_drops

Type: long

acl_drops

Type: long

dhcp_permits

Type: long

acl_permits

Type: long

req_smac_fails

Type: long

res_smac_fails

Type: long

res_dmac_fails

Type: long

req_ip_fails

Type: long

res_ip_fails

Type: long

Command Modes

- /exec

show ip arp inspection interfaces

show ip arp inspection interfaces [intf1] [ __readonly__ TABLE_intf intf_header intf2 trust_state ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

arp

IP ARP table

inspection

Status of ARP Inspection Not available in this release.

interfaces

Trsut status of all interfaces

intf1

Type: interface

interface

__readonly__

TABLE_intf

intf_header

Type: uinteger

intf2

Type: interface

trust_state

trusted  value: 1

untrusted  value: 0

Command Modes

- /exec

show ip arp inspection log

show ip arp inspection log [ __readonly__ log_buff_size log_rate_entries log_rate_interval log_frame ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

arp

IP ARP table

inspection

Status of ARP Inspection Not available in this release.

log

Log Buffer

__readonly__

log_buff_size

Type: uinteger

log_rate_entries

Type: uinteger

log_rate_interval

Type: uinteger

log_frame

Type: string

Command Modes

- /exec

show ip arp inspection statistics

show ip arp inspection statistics [ vlan vlan-range ] [ __readonly__ TABLE_stats vlanid req_fwded res_fwded req_dropped res_dropped dhcp_drops [acl_drops] dhcp_permits [acl_permits] req_smac_fails res_smac_fails res_dmac_fails req_ip_fails res_ip_fails ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

arp

IP ARP table

inspection

Status of ARP Inspection Not available in this release.

statistics

Status of ARP Inspection

vlan

Selected vlan range

vlan-range

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

__readonly__

TABLE_stats

vlanid

Type: vlan

req_fwded

Type: long

res_fwded

Type: long

req_dropped

Type: long

res_dropped

Type: long

dhcp_drops

Type: long

acl_drops

Type: long

dhcp_permits

Type: long

acl_permits

Type: long

req_smac_fails

Type: long

res_smac_fails

Type: long

res_dmac_fails

Type: long

req_ip_fails

Type: long

res_ip_fails

Type: long

Command Modes

- /exec

show ip arp inspection vlan

show ip arp inspection vlan vlan-range [ __readonly__ src_mac_valid dest_mac_valid ip_addr_valid TABLE_vlan active_vlan_id is_insp_enabled oper_state acl_name is_static_acl acl_logging dhcp_logging ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

arp

IP ARP table

inspection

Status of ARP Inspection Not available in this release.

vlan

Selected vlan range

vlan-range

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

__readonly__

src_mac_valid

Type: uinteger

dest_mac_valid

Type: uinteger

ip_addr_valid

Type: uinteger

TABLE_vlan

active_vlan_id

Type: vlan

is_insp_enabled

enabled  value: 1

disabled  value: 0

oper_state

active  value: 1

inactive  value: 0

acl_name

Type: string

is_static_acl

static  value: 1

non-static  value: 0

acl_logging

deny  value: 1

permit  value: 2

dhcp_logging

deny  value: 1

permit  value: 2

Command Modes

- /exec

show ip arp off-list

show ip arp off-list [ vlan vlan-id ] [ __readonly__ [ offlist-vlan-id vlan-adj-cnt ] [arp-sync-adj-cnt] TABLE_arp_vlan_list adj-vlan-id off-adj-ip-addr time-stamp arp-mac-addr off-adj-flags ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

off-list

Show adjacencies in off-list arp database

vlan

Vlan id

vlan-id

Type: integer

Show information for specified vlan

__readonly__

offlist-vlan-id

Type: integer

vlan-adj-cnt

Type: integer

arp-sync-adj-cnt

Type: integer

TABLE_arp_vlan_list

adj-vlan-id

Type: integer

off-adj-ip-addr

Type: ipaddr

time-stamp

Type: string

arp-mac-addr

Type: string

off-adj-flags

Type: integer

Command Modes

- /exec

show ip arp snmp pttree

show ip arp snmp pttree { static | dynamic | virtual | typeall } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

snmp

Show only snmp pttree

pttree

Patricia tree

static

show only static adjacencies in pt tree

dynamic

show only dynamic adjacencies in pt tree

virtual

show only virtual adjacencies in pt tree

typeall

show all adjacencies in pt tree

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display ARP statistics for all vrfs

Command Modes

- /exec

show ip arp statistics

show ip arp statistics [interface] [interface-all] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name-out1 TABLE_stat tx-total tx-req tx-reply tx-req-l2 tx-reply-l2 tx-grat tx-tunnel tx-drop tx-mbuf-fail tx-ctxt-not-crtd tx-bad-ctxt-id tx-invalid-ifindex tx-invalid-sip tx-invalid-dip tx-own-ip tx-unattached-ip tx-adj-create-fail tx-null-sip tx-null-smac tx-client-enq-fail tx-dest-unreachable tx-invalid-local-proxy tx-invalid-proxy tx-vip-not-active tx-multiple-vip-for-proxy rx-total rx-req rx-reply rx-req-l2 rx-reply-l2 rx-proxy rx-local-proxy rx-tunnel rx-fastpath rx-snoop rx-drop bad-if bad-len invalid-prot invalid-ctxt ctxt-not-crtd invalid-l2 invalid-l3 invalid-sip our-sip arp-if-no-mem subnet-mismatch dir-bcast invalid-dip non-local-dst non-active-fhrp invalid-smac our-smac not-init l2-prxy-en l2-port-untrusted stdby-fhrp-vip grat-prxy-en arp-req-ignore l2-intf l2fm-query-fail tunnel_fail adds dels timeouts ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

statistics

Display ARP statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display ARP statistics for all vrfs

interface-all

Display ARP statistics for all interface

interface

Type: interface

ARP interface

__readonly__

TABLE_vrf

vrf-name-out1

Type: string

TABLE_stat

tx-total

Type: uinteger

tx-req

Type: uinteger

tx-reply

Type: uinteger

tx-req-l2

Type: uinteger

tx-reply-l2

Type: uinteger

tx-grat

Type: uinteger

tx-tunnel

Type: uinteger

tx-drop

Type: uinteger

tx-mbuf-fail

Type: uinteger

tx-ctxt-not-crtd

Type: uinteger

tx-bad-ctxt-id

Type: uinteger

tx-invalid-ifindex

Type: uinteger

tx-invalid-sip

Type: uinteger

tx-invalid-dip

Type: uinteger

tx-own-ip

Type: uinteger

tx-unattached-ip

Type: uinteger

tx-adj-create-fail

Type: uinteger

tx-null-sip

Type: uinteger

tx-null-smac

Type: uinteger

tx-client-enq-fail

Type: uinteger

tx-dest-unreachable

Type: uinteger

tx-invalid-local-proxy

Type: uinteger

tx-invalid-proxy

Type: uinteger

tx-vip-not-active

Type: uinteger

tx-multiple-vip-for-proxy

Type: uinteger

rx-total

Type: uinteger

rx-req

Type: uinteger

rx-reply

Type: uinteger

rx-req-l2

Type: uinteger

rx-reply-l2

Type: uinteger

rx-proxy

Type: uinteger

rx-local-proxy

Type: uinteger

rx-tunnel

Type: uinteger

rx-fastpath

Type: uinteger

rx-snoop

Type: uinteger

rx-drop

Type: uinteger

bad-if

Type: uinteger

bad-len

Type: uinteger

invalid-prot

Type: uinteger

invalid-ctxt

Type: uinteger

ctxt-not-crtd

Type: uinteger

invalid-l2

Type: uinteger

invalid-l3

Type: uinteger

invalid-sip

Type: uinteger

our-sip

Type: uinteger

arp-if-no-mem

Type: uinteger

subnet-mismatch

Type: uinteger

dir-bcast

Type: uinteger

invalid-dip

Type: uinteger

non-local-dst

Type: uinteger

non-active-fhrp

Type: uinteger

invalid-smac

Type: uinteger

our-smac

Type: uinteger

not-init

Type: uinteger

l2-prxy-en

Type: uinteger

l2-port-untrusted

Type: uinteger

stdby-fhrp-vip

Type: uinteger

grat-prxy-en

Type: uinteger

arp-req-ignore

Type: uinteger

l2-intf

Type: uinteger

l2fm-query-fail

Type: uinteger

tunnel_fail

Type: uinteger

adds

Type: uinteger

dels

Type: uinteger

timeouts

Type: uinteger

Command Modes

- /exec

show ip arp tunnel-statistics

show ip arp tunnel-statistics [ __readonly__ TABLE_ip_arp_tunnel_stat [arp-tun-pkt-rcv-cnt] [arp-tun-pkt-rcv-ing-vpc] [arp-tun-pkt-rcv-ing-gpc] [arp-tun-pkt-rcv-ing-orp-vpc] [arp-tun-pkt-rcv-ing-orp-vpc-pl] [arp-tun-pkt-snd-cnt] [arp-tun-pkt-snd-snoop-cnt] [arp-tun-pkt-snd-non-local-vip-cnt] [arp-tun-pkt-snd-peer-gate-cnt] [arp-tun-pkt-snd-ing-vpc] [arp-tun-pkt-snd-ing-gpc] [arp-tun-pkt-snd-ing-orp-vpc] [arp-tun-pkt-snd-ing-orp-vpc-pl] [arp-tun-pkt-rcv-drp-cnt] [arp-tun-pkt-snd-drp-cnt] [arp-tun-pkt-snd-drp-snd-fail-cnt] [arp-tun-pkt-rcv-drp-ver-cnt] [arp-tun-pkt-rcv-drp-pl-cnt] [arp-tun-pkt-rcv-drp-ing-non-mct] [arp-tun-pkt-rcv-drp-inv-ing-intf] [arp-tun-pkt-snd-drp-inv-ing-intf] [arp-tun-pkt-rcvdrp-inv-gpc-core-sw] [arp-tun-pkt-rcvdrp-inv-gpc-peer-sw] [arp-tun-pkt-drp-inv-mcec] [arp-tun-pkt-im-api-fail] [arp-tun-pkt-drp-ctxt-inv] [arp-tun-pkt-drp-mct-dwn] [arp-tun-pkt-rcv-drp-mbuf-op-fail] [arp-tun-pkt-snd-drp-mbuf-op-fail] [arp-tun-pkt-snd-drp-tunnel] [arp-tun-pkt-snd-drp-ce] [arp-tun-pkt-snd-drp-inv-gpc] [arp-tun-pkt-rcv-drp-inv-gpc] ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

tunnel-statistics

Display ARP statistics for tunneled packets

__readonly__

TABLE_ip_arp_tunnel_stat

ARP Tunnel stats

arp-tun-pkt-rcv-cnt

Type: integer

arp-tun-pkt-rcv-ing-vpc

Type: integer

arp-tun-pkt-rcv-ing-gpc

Type: integer

arp-tun-pkt-rcv-ing-orp-vpc

Type: integer

arp-tun-pkt-rcv-ing-orp-vpc-pl

Type: integer

arp-tun-pkt-snd-cnt

Type: integer

arp-tun-pkt-snd-snoop-cnt

Type: integer

arp-tun-pkt-snd-non-local-vip-cnt

Type: integer

arp-tun-pkt-snd-peer-gate-cnt

Type: integer

arp-tun-pkt-snd-ing-vpc

Type: integer

arp-tun-pkt-snd-ing-gpc

Type: integer

arp-tun-pkt-snd-ing-orp-vpc

Type: integer

arp-tun-pkt-snd-ing-orp-vpc-pl

Type: integer

arp-tun-pkt-rcv-drp-cnt

Type: integer

arp-tun-pkt-snd-drp-cnt

Type: integer

arp-tun-pkt-snd-drp-snd-fail-cnt

Type: integer

arp-tun-pkt-rcv-drp-ver-cnt

Type: integer

arp-tun-pkt-rcv-drp-pl-cnt

Type: integer

arp-tun-pkt-rcv-drp-ing-non-mct

Type: integer

arp-tun-pkt-rcv-drp-inv-ing-intf

Type: integer

arp-tun-pkt-snd-drp-inv-ing-intf

Type: integer

arp-tun-pkt-rcvdrp-inv-gpc-core-sw

Type: integer

arp-tun-pkt-rcvdrp-inv-gpc-peer-sw

Type: integer

arp-tun-pkt-drp-inv-mcec

Type: integer

arp-tun-pkt-im-api-fail

Type: integer

arp-tun-pkt-drp-ctxt-inv

Type: integer

arp-tun-pkt-drp-mct-dwn

Type: integer

arp-tun-pkt-rcv-drp-mbuf-op-fail

Type: integer

arp-tun-pkt-snd-drp-mbuf-op-fail

Type: integer

arp-tun-pkt-snd-drp-tunnel

Type: integer

arp-tun-pkt-snd-drp-ce

Type: integer

arp-tun-pkt-snd-drp-inv-gpc

Type: integer

arp-tun-pkt-rcv-drp-inv-gpc

Type: integer

Command Modes

- /exec

show ip arp vaddr

show ip arp vaddr

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

vaddr

Display VADDR ARP table

Command Modes

- /exec

show ip arp vpc-statistics

show ip arp vpc-statistics [ __readonly__ TABLE_arp_vpc_stats [arp-pro-drp-pull-disable] [arp-pro-drp-push-msg-disable] [arp-pro-ign-snd-pull-disabe] [arp-ign-snd-push-disable] [arp-drp-im-fail] [arp-drp-mcecm-fail] [arp-drp-invalid-pc-iod] [arp-drp-pt-lookup-fail] [arp-drp-resp-fail-no-mct] [arp-drp-resp-fail] [arp-resp-sent] [arp-resp-recvd] [arp-resp-recv-err] [arp-rcvd-msg] [arp-send-fail] [arp-cfs-rel-dlvry-fail] [arp-cfs-rel-dnvry-suc] [arp-drp-pt-add-fail] [arp-drp-no-mem] [arp-drp-tmr-cre-fail] [arp-drp-add-adj-fail] [arp-off-drp-pt-lookup-fail] [arp-dont-drp-vlan-mismat] [arp-drp-svi-invalid] [arp-dont-drop-sv-down] [arp-drp-mct-down] [arp-drp-ctxt-invalid] [arp-drp-vrf-invalid] [arp-drp-l3addr-invalid] [arp-drp-l3addr-sanity-fail] [arp-drp-mac-sanity-fail] [arp-own-rtr-mac] [arp-drp-own-ipaddr] [arp-drp-own-vipadd] [arp-drp-adj-fail] [arp-drp-subnet-mismatch] [arp-drp-adj-exist] [arp-dont-drp-ip-not-enable] [arp-drp-total-cnt] [arp-dont-drop-total-cnt] [arp-add-adj] [arp-del-adj] [arp-adj-already-exist] ]

Syntax Description

show

Show running system information

ip

Display IP information

arp

Display ARP table and statistics

vpc-statistics

Show vPC global statistics

__readonly__

TABLE_arp_vpc_stats

Arp Vpc statistics

arp-pro-drp-pull-disable

Type: integer

arp-pro-drp-push-msg-disable

Type: integer

arp-pro-ign-snd-pull-disabe

Type: integer

arp-ign-snd-push-disable

Type: integer

arp-drp-im-fail

Type: integer

arp-drp-mcecm-fail

Type: integer

arp-drp-invalid-pc-iod

Type: integer

arp-drp-pt-lookup-fail

Type: integer

arp-drp-resp-fail-no-mct

Type: integer

arp-drp-resp-fail

Type: integer

arp-resp-sent

Type: integer

arp-resp-recvd

Type: integer

arp-resp-recv-err

Type: integer

arp-rcvd-msg

Type: integer

arp-send-fail

Type: integer

arp-cfs-rel-dlvry-fail

Type: integer

arp-cfs-rel-dnvry-suc

Type: integer

arp-drp-pt-add-fail

Type: integer

arp-drp-no-mem

Type: integer

arp-drp-tmr-cre-fail

Type: integer

arp-drp-add-adj-fail

Type: integer

arp-off-drp-pt-lookup-fail

Type: integer

arp-dont-drp-vlan-mismat

Type: integer

arp-drp-svi-invalid

Type: integer

arp-dont-drop-sv-down

Type: integer

arp-drp-mct-down

Type: integer

arp-drp-ctxt-invalid

Type: integer

arp-drp-vrf-invalid

Type: integer

arp-drp-l3addr-invalid

Type: integer

arp-drp-l3addr-sanity-fail

Type: integer

arp-drp-mac-sanity-fail

Type: integer

arp-own-rtr-mac

Type: integer

arp-drp-own-ipaddr

Type: integer

arp-drp-own-vipadd

Type: integer

arp-drp-adj-fail

Type: integer

arp-drp-subnet-mismatch

Type: integer

arp-drp-adj-exist

Type: integer

arp-dont-drp-ip-not-enable

Type: integer

arp-drp-total-cnt

Type: integer

arp-dont-drop-total-cnt

Type: integer

arp-add-adj

Type: integer

arp-del-adj

Type: integer

arp-adj-already-exist

Type: integer

Command Modes

- /exec

show ip as-path-access-list

show ip as-path-access-list [ aspl-name | aspl-cfg-name ] [ __readonly__ TABLE_aspl name action rule ]

Syntax Description

show

Show running system information

ip

Display IP information

as-path-access-list

List AS path access lists

aspl-name

Type: string

pattern: [!-~]*

length: 63

AS path access list name

aspl-cfg-name

Type: string

Known as-path access-list name

__readonly__

TABLE_aspl

name

Type: string

action

Type: string

rule

Type: string

Command Modes

- /exec

show ip cache

show ip cache { { brief | detail } | interface [intf] } [operational]

Syntax Description

show

Show running system information

ip

Display IP information

cache

Display ip cache

brief

Display summary of ip interface status and configuration

detail

Display detailed information of ip interface status and configuration

operational

Display only interfaces that are administratively enabled

interface

Display ip related interface information

intf

Type: interface

Interface name to display

Command Modes

- /exec

show ip client

show ip client [client-name] [ __readonly__ [ TABLE_ip_clnt [ TABLE_clnt clnt-name clnt-uuid clnt-pid clnt-ext-pid [clnt-proto] clnt-ind clnt-cntxt-id clnt-mts-sap clnt-flg clnt-msg-succ-cnt clnt-msg-fail-cnt [ clnt-recv-fn-name clnt-recv-fn ] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

client

Display clients registered with the IP process

client-name

Type: string

Display information for a single IP client

__readonly__

TABLE_ip_clnt

TABLE_clnt

clnt-name

Type: string

clnt-uuid

Type: integer

clnt-pid

Type: integer

clnt-ext-pid

Type: integer

clnt-proto

Type: integer

clnt-ind

Type: integer

clnt-cntxt-id

Type: longlong

clnt-mts-sap

Type: integer

clnt-flg

Type: hex

clnt-msg-succ-cnt

Type: integer

clnt-msg-fail-cnt

Type: integer

clnt-recv-fn-name

Type: string

clnt-recv-fn

Type: hex

Command Modes

- /exec

show ip community

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } community { regexp-str | { comm-id | wellknown-id } + [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

all

Display BGP information for all address families

community

Display routes matching the BGP communities

regexp-str

Type: string

Regular expression to match the communities

comm-id

Type: community

BGP community value

wellknown-id

BGP wellknown community

no-export  value: 1

Do not export to next AS (well-known community)
no-advertise  value: 2

Do not advertise to any peer (well-known community)
no-export-subconfed  value: 3

Do not send outside local AS (well known community)
internet  value: 4

Internet (well-known community)

exact-match

Exact match of the communities

Command Modes

- /exec

show ip community-list

show ip community-list [cl_name] [ __readonly__ TABLE_cl name action rule ]

Syntax Description

show

Show running system information

ip

Display IP information

community-list

List community-list

cl_name

Type: string

pattern: [!-~]*

length: 63

Standard or expanded community-list name

__readonly__

TABLE_cl

name

Type: string

action

Type: string

rule

Type: string

Command Modes

- /exec

show ip dampening

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } dampening { dampened-paths [ regexp regexp-str ] | flap-statistics | parameters | history-paths [ regexp regexp-str ] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

dampening

Display dampening info

dampened-paths

Display all dampened paths

flap-statistics

Display flap statistics for routes

parameters

Display dampening parameters

history-paths

Display all history paths

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

regexp

Display routes matching the AS path regular expression

regexp-str

Type: string

Regular expression to match the AS paths

Command Modes

- /exec

show ip dhcp global statistics

show ip dhcp global statistics [ __readonly__ pkts_processed pkts_recvd_through_cfsoe pkts_fwded pkts_cfsoe_fwded pkts_dropped pkts_dropped_from_untrusted_ports pkts_dropped_src_mac_chk_fail pkts_dropped_opt82_ins_fail pkts_dropped_unknown_op_intf pkts_dropped_unknown_pkt pkts_dropped_no_trust_inf pkts_dropped_unknown_pkt pkts_dropped_relay_disable pkts_dropped_no_binding_entry pkts_dropped_interface_error pkts_dropped_max_hops_exceeded ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show information about DHCP

global

DHCP global stats

statistics

Statistics related to DHCP

__readonly__

Read only

pkts_processed

Type: uinteger

pkts_recvd_through_cfsoe

Type: uinteger

pkts_fwded

Type: uinteger

pkts_cfsoe_fwded

Type: uinteger

pkts_dropped

Type: uinteger

pkts_dropped_from_untrusted_ports

Type: uinteger

pkts_dropped_src_mac_chk_fail

Type: uinteger

pkts_dropped_opt82_ins_fail

Type: uinteger

pkts_dropped_unknown_op_intf

Type: uinteger

pkts_dropped_unknown_pkt

Type: uinteger

pkts_dropped_no_trust_inf

Type: uinteger

pkts_dropped_relay_disable

Type: uinteger

pkts_dropped_no_binding_entry

Type: uinteger

pkts_dropped_interface_error

Type: uinteger

pkts_dropped_max_hops_exceeded

Type: uinteger

Command Modes

- /exec

show ip dhcp relay

show ip dhcp relay [ __readonly__ relay_service_enable relay_opt82_enable relay_subopt_VPN_enable relay_subopt_type_cisco_enable global_smart-relay_enable relay_address_hdr TABLE_intf intf relay_address vrf_name smart_relay_enabled_intfs subnet_bcast_enabled_intfs ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show items in DHCP

relay

DHCP relay

__readonly__

Read only

relay_service_enable

enabled  value: 1

disabled  value: 0

relay_opt82_enable

enabled  value: 1

disabled  value: 0

relay_subopt_VPN_enable

enabled  value: 1

disabled  value: 0

relay_subopt_type_cisco_enable

enabled  value: 1

disabled  value: 0

global_smart-relay_enable

enabled  value: 1

disabled  value: 0

relay_address_hdr

Type: uinteger

TABLE_intf

intf

Type: interface

interface name

relay_address

Type: ipaddr

helper address

vrf_name

Type: string

length: 32

vrf name

smart_relay_enabled_intfs

Type: string

smart-relay enabled interfaces

subnet_bcast_enabled_intfs

Type: string

subnet_bcast enabled interfaces

Command Modes

- /exec

show ip dhcp relay address

show ip dhcp relay address [ interface intf-range ] [ __readonly__ TABLE_intf intf_header intf2 relay_address vrf_name ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show DHCP

relay

relay address of the interface

address

DHCP relay address

interface

DHCP relay address of the interface

intf-range

Type: interface-mrange

interface

__readonly__

Read only

TABLE_intf

intf_header

Type: uinteger

intf2

Type: interface

interface name

relay_address

Type: ipaddr

helper address

vrf_name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

Command Modes

- /exec

show ip dhcp relay statistics

show ip dhcp relay statistics [ interface intf | interface intf serverip ip-addr-val [ use-vrf vrf-name ] ] [ __readonly__ msg_stats_hdr msg_type_str tx_pkts rx_pkts drops msg_type_str_total total_tx_pkts total_rx_pkts total_drops line l3_fwd_hdr l3_fwd_tx_pkts l3_fwd_rx_pkts l3_fwd_drops server_consolidated_hdr server_total_request server_total_response server_req_hdr server_resp_hdr server_helper_addr server_vrf server_discover server_request server_decline server_release server_inform server_offer server_ack server_nack drop_hdr drop_opt82_insert_fail drop_unknown_op_intf drop_unknown drop_malformed drop_relay_disable drop_intf_err drop_tx_sock_err drop_tx_fail_client_intf drop_l3_unknown_op_intf drop_max_hops drop_invalid_msg_type drop_validation_fail non_dhcp_hdr non_dhcp_tx_pkts non_dhcp_rx_pkts non_dhcp_drops footer ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show information about DHCP

relay

DHCP Relay

statistics

Statistics related to DHCP

interface

input interface

intf

Type: interface

interface

serverip

Helper address

ip-addr-val

Type: ipaddr

IP address

use-vrf

helper address VRF membership

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf

length: 32

VRF name

__readonly__

Read only

msg_stats_hdr

Type: uinteger

msg_type_str

Type: string

tx_pkts

Type: uinteger

rx_pkts

Type: uinteger

drops

Type: uinteger

msg_type_str_total

Type: uinteger

total_tx_pkts

Type: uinteger

total_rx_pkts

Type: uinteger

total_drops

Type: uinteger

line

Type: uinteger

l3_fwd_hdr

Type: uinteger

l3_fwd_tx_pkts

Type: uinteger

l3_fwd_rx_pkts

Type: uinteger

l3_fwd_drops

Type: uinteger

server_consolidated_hdr

Type: uinteger

server_total_request

Type: uinteger

server_total_response

Type: uinteger

server_req_hdr

Type: uinteger

server_resp_hdr

Type: uinteger

server_helper_addr

Type: uinteger

server_vrf

Type: string

server_discover

Type: uinteger

server_request

Type: uinteger

server_decline

Type: uinteger

server_release

Type: uinteger

server_inform

Type: uinteger

server_offer

Type: uinteger

server_ack

Type: uinteger

server_nack

Type: uinteger

drop_hdr

Type: uinteger

drop_opt82_insert_fail

Type: uinteger

drop_unknown_op_intf

Type: uinteger

drop_unknown

Type: uinteger

drop_malformed

Type: uinteger

drop_relay_disable

Type: uinteger

drop_intf_err

Type: uinteger

drop_max_hops

Type: uinteger

drop_tx_sock_err

Type: uinteger

drop_tx_fail_client_intf

Type: uinteger

drop_l3_unknown_op_intf

Type: uinteger

drop_invalid_msg_type

Type: uinteger

drop_validation_fail

Type: uinteger

non_dhcp_hdr

Type: uinteger

non_dhcp_tx_pkts

Type: uinteger

non_dhcp_rx_pkts

Type: uinteger

non_dhcp_drops

Type: uinteger

footer

Type: uinteger

Command Modes

- /exec

show ip dhcp snooping

show ip dhcp snooping [ __readonly__ snoop_service_enable snoop_gbl_enable snoop_vlan_enable snoop_oper_vlan_enable snoop_opt82_enable snoop_hwaddr_verify_enable snoop_hdr TABLE_intf_entry intf_entry_if_index intf_entry_trust_dhcp intf_entry_pkt_limit ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show items in DHCP

snooping

DHCP snooping Not available in this release.

__readonly__

Read only

snoop_service_enable

enabled  value: 1

disabled  value: 0

snoop_gbl_enable

enabled  value: 1

disabled  value: 0

snoop_vlan_enable

Type: bitmap

snoop_oper_vlan_enable

Type: bitmap

snoop_opt82_enable

enabled  value: 1

disabled  value: 0

snoop_hwaddr_verify_enable

enabled  value: 1

disabled  value: 0

snoop_hdr

Type: uinteger

TABLE_intf_entry

intf_entry_if_index

Type: interface

intf_entry_trust_dhcp

trusted  value: 1

untrusted  value: 0

intf_entry_pkt_limit

Type: uinteger

Command Modes

- /exec

show ip dhcp snooping binding

show ip dhcp snooping binding [ ip | mac | vlan vlan-range | interface intf ] + [ dynamic | static ] [ __readonly__ bind_num_entries bind_hdr TABLE_bind_entry bind_vlan bind_mac bind_ipaddr bind_lease bind_type bind_intf ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show items in DHCP

snooping

DHCP snooping

binding

DHCP snooping bindings

ip

Type: ipaddr

Binding entry IP address

mac

Type: ethernet

Binding entry MAC address

vlan

Binding entry VLAN

vlan-range

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

interface

Binding entry input interface

intf

Type: interface

interface

dynamic

Dynamic entries

static

Static entries

__readonly__

Read only

bind_num_entries

Type: uinteger

bind_hdr

Type: uinteger

TABLE_bind_entry

bind_vlan

Type: vlan

bind_mac

Type: ethernet

bind_ipaddr

Type: ipaddr

bind_lease

Type: uinteger

bind_type

Type: uinteger

bind_intf

Type: interface

Command Modes

- /exec

show ip dhcp snooping statistics

show ip dhcp snooping statistics [ vlan vlan-id interface intf | vlan vlan-id ] [ __readonly__ msg_stats_hdr msg_type_str tx_pkts rx_pkts drops msg_type_str_total total_tx_pkts total_rx_pkts total_drops line cfs_hdr cfs_tx_pkts cfs_rx_pkts mct_hdr mct_tx_pkts mct_rx_pkts l2_fwd_hdr l2_fwd_tx_pkts l2_fwd_rx_pkts l2_fwd_drops drop_hdr drop_untrust drop_src_mac_chk_fail drop_opt82_insert_fail drop_unknown_op_intf drop_unknown drop_tx_trusted_port_fail drop_no_trusted_port drop_vlan_validation_fail drop_malformed drop_nobinding drop_intf_err drop_max_hops drop_invalid_msg_type drop_invalid_dhcp_discover_with_ip drop_validation_fail non_dhcp_hdr non_dhcp_tx_pkts non_dhcp_rx_pkts non_dhcp_drops ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

dhcp

Show information about DHCP

snooping

DHCP snooping Not available in this release.

statistics

Statistics related to DHCP

vlan

VLAN

vlan-id

Type: vlan

VLAN id

interface

input interface

intf

Type: interface

interface

__readonly__

Read only

msg_stats_hdr

Type: uinteger

msg_type_str

Type: string

tx_pkts

Type: uinteger

rx_pkts

Type: uinteger

drops

Type: uinteger

msg_type_str_total

Type: uinteger

total_tx_pkts

Type: uinteger

total_rx_pkts

Type: uinteger

total_drops

Type: uinteger

line

Type: uinteger

cfs_hdr

Type: uinteger

cfs_tx_pkts

Type: uinteger

cfs_rx_pkts

Type: uinteger

mct_hdr

Type: uinteger

mct_tx_pkts

Type: uinteger

mct_rx_pkts

Type: uinteger

l2_fwd_hdr

Type: uinteger

l2_fwd_tx_pkts

Type: uinteger

l2_fwd_rx_pkts

Type: uinteger

l2_fwd_drops

Type: uinteger

drop_hdr

Type: uinteger

drop_untrust

Type: uinteger

drop_src_mac_chk_fail

Type: uinteger

drop_invalid_dhcp_discover_with_ip

Type: uinteger

drop_opt82_insert_fail

Type: uinteger

drop_unknown_op_intf

Type: uinteger

drop_unknown

Type: uinteger

drop_tx_trusted_port_fail

Type: uinteger

drop_no_trusted_port

Type: uinteger

drop_vlan_validation_fail

Type: uinteger

drop_malformed

Type: uinteger

drop_nobinding

Type: uinteger

drop_intf_err

Type: uinteger

drop_max_hops

Type: uinteger

drop_invalid_msg_type

Type: uinteger

drop_validation_fail

Type: uinteger

non_dhcp_hdr

Type: uinteger

non_dhcp_tx_pkts

Type: uinteger

non_dhcp_rx_pkts

Type: uinteger

non_dhcp_drops

Type: uinteger

Command Modes

- /exec

show ip dns source-interface

show ip dns source-interface [ vrf { vrf-name | vrf-known-name } ] [ __readonly__ [ TABLE_ipdnsvrf vrfname ifname ] ]

Syntax Description

show

Show running system information

ip

Display IP information

dns

Display domain-lookup information

source-interface

Display source interface information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_ipdnsvrf

source interface of dns given vrf

vrfname

Type: string

vrfname

ifname

Type: string

ifname

Command Modes

- /exec

show ip dns source-interface vrf all

show ip dns source-interface vrf all [ __readonly__ [ TABLE_ipdns vrfname ifname ] ]

Syntax Description

show

Show running system information

ip

Display IP information

dns

Display domain-lookup information

source-interface

Display source interface information

vrf

Display per-VRF information

all

Display entries for all vrfs

__readonly__

TABLE_ipdns

source interface of dns

vrfname

Type: string

vrfname

ifname

Type: string

ifname

Command Modes

- /exec

show ip eigrp route-map statistics redistribute

show ip eigrp [eigrp-ptag] route-map statistics redistribute { bgp as | { eigrp | isis | ospf | rip } tag | static | direct | amt | lisp } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_asn asn TABLE_vrf vrf TABLE_rmap name action seq_num [ TABLE_cmd command compare_count match_count ] total_accept_count total_reject_count ]

Syntax Description

show

Show running system information

ip

Display IP information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

route-map

Route-map related information

statistics

Route-map statistics

redistribute

Redistribute information from another routing protocol

bgp

Border Gateway Protocol (BGP)

as

Type: asn

Autonomous system number

isis

IS-IS Routing for IPv4

ospf

Open Shortest Path First (OSPF)

rip

Routing Information Protocol (RIP)

eigrp

Enhanced Interior Gateway Routing Protocol (EIGRP)

tag

Type: string

Process tag

static

Static routes

direct

Directly connected

amt

AMT Anycast prefix

lisp

LISP EID-prefixes

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

TABLE_rmap

name

Type: string

action

Type: string

seq_num

Type: uinteger

TABLE_cmd

command

Type: string

compare_count

Type: uinteger

match_count

Type: uinteger

total_accept_count

Type: uinteger

total_reject_count

Type: uinteger

Command Modes

- /exec

show ip extcommunity

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } extcommunity { regexp-str | 4byteas-generic { transitive ext-comm-gen-trans | non-transitive ext-comm-gen-nontrans } + [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

all

Display BGP information for all address families

extcommunity

Display routes matching the BGP extcommunities

4byteas-generic

Generic extended community

transitive

Transitive extcommunity

non-transitive

Non-Transitive extcommunity

regexp-str

Type: string

Regular expression to match the extcommunities

ext-comm-gen-trans

Type: community

Extcommunity number aa4:nn format

ext-comm-gen-nontrans

Type: community

Extcommunity number aa4:nn format

exact-match

Exact match of the extcommunities

Command Modes

- /exec

show ip extcommunity-list

show ip extcommunity-list [extcl_name] [ __readonly__ TABLE_extcl name action rule ]

Syntax Description

show

Show running system information

ip

Display IP information

extcommunity-list

List extcommunity-list

extcl_name

Type: string

pattern: [!-~]*

length: 63

Standard or expanded community-list name

__readonly__

TABLE_extcl

name

Type: string

action

Type: string

rule

Type: string

Command Modes

- /exec

show ip fib adjacency

show ip fib adjacency [aif] [anh] [ module module ] [ __readonly__ adj-count nexthop rewinfo interface ]

Syntax Description

show

ip

ipv4

fib

display fib information

adjacency

display adjacency information

aif

Type: interface

adjacency output interface

anh

Type: ipaddr

adjacency next hop

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

adj-count

Type: integer

total adj count

nexthop

Type: ipaddr

next hop address

rewinfo

Type: string

rewrite information

interface

Type: interface

output interface

Command Modes

- /exec

show ip fib distribution

show ip fib distribution [ pauz | rezum ]

Syntax Description

show

ip

ipv4

fib

forwarding information

distribution

fib distribution information

pauz

start black-holing routes

rezum

stop black-holing routes

Command Modes

- /exec

show ip fib distribution capture

show ip fib distribution capture [ __readonly__ type len data ]

Syntax Description

show

ip

ipv4

fib

forwarding information

distribution

fib distribution info

capture

unicast capture buffer

__readonly__

type

Type: integer

type

len

Type: integer

length

data

Type: string

raw data

Command Modes

- /exec

show ip fib distribution clients

show ip fib distribution clients [ __readonly__ id pid name shms shme shmn ]

Syntax Description

show

ip

ipv4

fib

forwarding information

distribution

fib distribution info

clients

unicast client information

__readonly__

id

Type: integer

client identifier

pid

Type: integer

client pid

name

Type: string

client name

shms

Type: hex

shmem start

shme

Type: hex

shmem end

shmn

Type: string

shmem name

Command Modes

- /exec

show ip fib distribution mroute

show ip fib distribution mroute [ { group | gprefix } [source] ] [ table id ] [ __readonly__ table_name src_len grp_len df_ordinal rpfif rpf_ifname flag flag_value num_groups num_sources refcount oiflist_id oif_count oif_name oif_ifindex bytecnt pktcnt ]

Syntax Description

show

ip

IP information

fib

Forwarding Information

distribution

FIB distribution information

mroute

MFDM IP multicast routing table

group

Type: ipaddr

IPv4 Multicast Group Address

gprefix

Type: ipprefix

IPv4 Multicast Group Prefix

source

Type: ipaddr

IPv4 Source Address

table

Specify Multicast Routing Table

id

Type: integer

Multicast Routing Table Identifier

__readonly__

table_name

Type: string

Table name

src_len

Type: integer

Source Address Mask

grp_len

Type: integer

Group address Mask

df_ordinal

Type: integer

DF ordinal

rpfif

Type: string

RPF interface

rpf_ifname

Type: string

RPF Interface ifName

flag

Type: string

Route type flag

flag_value

Type: hex

hex value of route flag

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

refcount

Type: integer

Reference Count

oiflist_id

Type: integer

OIF list Identifier

oif_count

Type: integer

Number of OIFs

oif_name

Type: string

OIF Name

oif_ifindex

Type: hex

OIF ifIndex

bytecnt

Type: longlong

Current Byte counter

pktcnt

Type: longlong

Current Packet counter

Command Modes

- /exec

show ip fib distribution multicast

show ip fib distribution multicast [messages] [ __readonly__ fibstate slot accepting_routes num_accepting_routes ]

Syntax Description

show

ip

IP information

fib

Forwarding Information

distribution

FIB distribution information

multicast

Multicast FIB distribution information

messages

Outstanding Message Information

__readonly__

fibstate

Type: string

IP Multicast FIB process state

slot

Type: integer

Slot

accepting_routes

Type: string

Indicates whether FIB is accepting routes

num_accepting_routes

Type: integer

Number of fibs accepting routes

Command Modes

- /exec

show ip fib distribution multicast outgoing-interface-list

show ip fib distribution multicast outgoing-interface-list { L2 | L3 | OTV } [index] [ __readonly__ platform_index ref_count num_oif oif ]

Syntax Description

show

ip

IP information

fib

Forwarding Information

distribution

FIB distribution information

multicast

Multicast FIB distribution information

outgoing-interface-list

Outgoing interface list

L2

Layer 2 oiflist

L3

Layer 3 oiflist

OTV

OTV oiflist

index

Type: integer

min: 1  max: 65535

Outgoing Interface List index

__readonly__

platform_index

Type: hex

Platform index

ref_count

Type: integer

Reference count

num_oif

Type: integer

Number of outgoing interfaces

oif

Type: string

OIF name

Command Modes

- /exec

show ip fib distribution state

show ip fib distribution state [ __readonly__ slot known ar rcnt state ]

Syntax Description

show

ip

ipv4

fib

forwarding information

distribution

fib distribution info

state

unicast fib state info

__readonly__

slot

Type: integer

slot number

known

Type: string

heard from - yes/no

ar

Type: string

accepting routes - yes/no

rcnt

Type: integer

total route count

state

Type: string

fib state

Command Modes

- /exec

show ip fib interfaces

show ip fib interfaces [ module module ] [ __readonly__ intf v4adjcnt v6adjcnt rpfmode ]

Syntax Description

show

ip

ipv4

fib

fib information

interfaces

show fib interface info

__readonly__

intf

Type: interface

interface name

module

slot Available only in the 9500 series.

module

Type: integer

slot number

v4adjcnt

Type: integer

count of v4 adjacencies

v6adjcnt

Type: integer

count of v6 adjacencies

rpfmode

uRPF mode

none  value: 1

loose(def)  value: 2

loose  value: 3

strict  value: 4

Command Modes

- /exec

show ip fib mroute

show ip fib mroute [ { group | gprefix } [source] ] [ table table-id ] [ module module ] [ __readonly__ table_type num_groups num_sources src_len grp_len df_ordinal rpfif rpf_ifindex flag flag_value route_pkts route_bytes oiflist_id platform_id oif_count refcount oifname oifindex oif_pkts oif_bytes ]

Syntax Description

show

ip

ipv4

fib

Display fib information

mroute

Multicast IPv4 routes

group

Type: ipaddr

Multicast IPv4 Group Address

gprefix

Type: ipprefix

Multicast IPv4 Group Prefix

source

Type: ipaddr

Multicast IPv4 Source Address

table

display info per vpn-id

table-id

Type: integer

table-id

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

table_type

Type: string

Table Type

num_groups

Type: integer

Number of group entries in the table

num_sources

Type: integer

Number of (S, G) entries for the group address

src_len

Type: integer

Source Address Mask

grp_len

Type: integer

Group address Mask

df_ordinal

Type: string

DF ordinal

rpfif

Type: string

RPF interface

rpf_ifindex

Type: hex

RPF Interface ifIndex

flag

Type: string

Route type flag

flag_value

Type: hex

hex value of route flag

route_pkts

Type: longlong

Route packet count

route_bytes

Type: longlong

Route bytes

oiflist_id

Type: integer

OIF list Identifier

platform_id

Type: integer

Platform-index

oif_count

Type: integer

Number of OIFs

refcount

Type: integer

OIF list Reference Count

oifname

Type: string

OIF Interface name

oifindex

Type: hex

OIF Interface ifIndex

oif_pkts

Type: longlong

OIF packets

oif_bytes

Type: longlong

OIF bytes

Command Modes

- /exec

show ip fib mroute txlist

show ip fib mroute txlist [ module module ]

Syntax Description

show

ip

ipv4

fib

display fib information

mroute

display IP mcast routing table

txlist

display routes in the txlist

module

slot Available only in the 9500 series.

module

Type: integer

slot number

Command Modes

- /exec

show ip fib route

show ip fib route [ vrf { vrf-name | vrf-known-name | all } | table table_id ] [ summary | prefix [longer-prefixes] | address | interface interface | next-hop nh | attached | unresolved | adjacency { aif anh | drop | glean | punt } ] [ module module | vrf { vrf-name | vrf-known-name | all } ] + [ __readonly__ header vrfname tableid prefix-count pfx { nexthop | special } intf route-count path-count mask-length routes-per-mask ]

Syntax Description

show

ip

ipv4

fib

display fib information

route

display IP routing table

vrf

display info per VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

table

display info per vpn-id

table_id

Type: integer

table number

summary

display route counts

prefix

Type: ipprefix

display single exact match route

longer-prefixes

display longer prefixes

address

Type: ipaddr

display single longest match route

interface

display routes with this output i/f only

interface

Type: interface

output interface

next-hop

display routes with this next-hop only

nh

Type: ipaddr

next hop address

attached

display directly connected routes

unresolved

display unresolved routes

adjacency

display routes via specified adjacency

aif

Type: interface

adjacency output interface

anh

Type: ipaddr

adjacency next-hop address

drop

display routes via drop adjacency

glean

display routes via glean adjacency

punt

display routes via punt adjacency

module

slot Available only in the 9500 series.

module

Type: integer

slot number

__readonly__

header

Type: string

header string

vrfname

Type: string

VRF name

tableid

Type: integer

table identifier

prefix-count

Type: integer

total number of prefix in VRF

pfx

Type: ipprefix

ipv4 prefix

nexthop

Type: ipaddr

next hop address

special

special adjacencies

Attached  value: 1

Receive  value: 2

Drop  value: 3

intf

Type: interface

output interface

route-count

Type: integer

total number of routes in VRF

path-count

Type: integer

total number of paths in VRF

mask-length

Type: integer

length of mask

routes-per-mask

Type: integer

Command Modes

- /exec

show ip flap-statistics

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } flap-statistics [ ip-prefix | ip-addr [ip-mask] ] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

flap-statistics

Display route flap statistics

ip-prefix

Type: ipprefix

Display flap statistics for one prefix

ip-addr

Type: ipaddr

Display flap statistics for one network

ip-mask

Type: ipaddr

Network mask

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

Command Modes

- /exec

show ip ftm statistics

show ip ftm statistics

Syntax Description

show

Show running system information

ip

Display IP information

ftm

FTM API

statistics

Statistics

Command Modes

- /exec

show ip igmp

show ip igmp { groups | route } [ source [group] | group [source] ] [interface] [summary] [ vrf { vrf-name | vrf-known-name | all } ] [summary-old] [ __readonly__ TABLE_vrf vrf if-name group-addr entry-count restart-count TABLE_group group-addr if-name uptime expires reporter static-oif local-group TABLE_source source-addr if-name uptime expires reporter static-oif local-group translated ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

groups

Display IGMP attached group membership information

route

Display IGMP attached group membership information

group

Type: ipaddr

Multicast IP address of single group to display

source

Type: ipaddr

Source IP address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

interface

Type: interface

Display group membership on single interface name

summary

Display group summary

summary-old

Display group summary

__readonly__

TABLE_vrf

vrf

Type: vrf

if-name

Type: interface

group-addr

Type: ipaddr

entry-count

Type: uinteger

restart-count

Type: uinteger

TABLE_group

uptime

Type: duration

expires

Type: duration

static-oif

Type: bool

local-group

Type: bool

reporter

Type: ipaddr

TABLE_source

source-addr

Type: ipaddr

translated

Type: bool

Command Modes

- /exec

show ip igmp interfaceshow ip igmp interface

show ip igmp interface interface [detail] | show ip igmp interface [brief] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf entry-count TABLE_if if-name if-status ip-sum addr querier q-ver next-query expires mc ver host-ver qi cqi mrt cmrt sqi csqi sqc lmmrt lmqc gt cgt qt cqt uri rv crv rll rc v1rr v2qs v2qr v2rs v2rr v2ls v2lr v3qs v3qr v3rs v3rr cse v2gqdest v3gqdest ple lsip scf qnq rvm qvm uit v1gdam v2gdam v3dai ra static-group-map join-group-map il ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

interface

Display IGMP interface related information

detail

Display detailed information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

interface

Type: interface

Interface name of single interface to display

brief

Display one line status per interface

__readonly__

TABLE_vrf

vrf

Type: vrf

entry-count

Type: uinteger

TABLE_if

if-name

Type: interface

if-status

Type: string

ip-sum

Type: string

addr

Type: ipaddr

querier

Type: ipaddr

q-ver

Type: string

next-query

Type: string

expires

Type: string

mc

Type: uinteger

ver

Type: uinteger

host-ver

Type: uinteger

qi

Type: uinteger

cqi

Type: uinteger

mrt

Type: uinteger

cmrt

Type: uinteger

sqi

Type: uinteger

csqi

Type: uinteger

sqc

Type: uinteger

lmmrt

Type: uinteger

lmqc

Type: uinteger

gt

Type: uinteger

cgt

Type: uinteger

qt

Type: uinteger

cqt

Type: uinteger

uri

Type: uinteger

rv

Type: uinteger

crv

Type: uinteger

rll

Type: bool

rc

Type: uinteger

v1rr

Type: uinteger

v2qs

Type: uinteger

v2qr

Type: uinteger

v2rs

Type: uinteger

v2rr

Type: uinteger

v2ls

Type: uinteger

v2lr

Type: uinteger

v3qs

Type: uinteger

v3qr

Type: uinteger

v3rs

Type: uinteger

v3rr

Type: uinteger

v2gqdest

Type: uinteger

v3gqdest

Type: uinteger

cse

Type: uinteger

ple

Type: uinteger

lsip

Type: uinteger

scf

Type: uinteger

qnq

Type: uinteger

rvm

Type: uinteger

qvm

Type: uinteger

uit

Type: uinteger

v1gdam

Type: uinteger

v2gdam

Type: uinteger

v3dai

Type: uinteger

ra

Type: uinteger

static-group-map

Type: string

join-group-map

Type: string

il

Type: bool

Command Modes

- /exec

show ip igmp local-groups

show ip igmp local-groups [interface] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf TABLE_entry group-addr source-addr static-oif local-group if-name last-reported ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

local-groups

Display IGMP local group membership information

interface

Type: interface

Display group membership on single interface name

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

vrf

Type: vrf

TABLE_entry

group-addr

Type: ipaddr

source-addr

Type: ipaddr

static-oif

Type: bool

local-group

Type: bool

if-name

Type: interface

last-reported

Type: duration

Command Modes

- /exec

show ip igmp policy statistics reports

show ip igmp policy statistics reports [interface]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Show IGMP related information

policy

Policy related information

statistics

Policy statistics

reports

IGMP reports

interface

Type: interface

Interface to display statistics for

Command Modes

- /exec

show ip igmp snooping

show ip igmp snooping [ vlan vlan | bridge-domain bdid ] [ __readonly__ vdc enabled grepsup gv3repsup glinklocalgrpsup rle TABLE_vlan vlan-id [description] [ snoop-on qa qv qi qlmqi rv sq sqr eht fl repsup v3repsup vlinklocalgrpsup rpc gc actvports lkupmode ] ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

vlan

Display VLAN IGMP snooping membership information

vlan

Type: vlan

Specify VLAN

bridge-domain

Display BD IGMP snooping membership information

bdid

Type: integer

Specify BD

__readonly__

vdc

Type: uinteger

enabled

Type: bool

grepsup

Type: bool

gv3repsup

Type: bool

glinklocalgrpsup

Type: bool

rle

Type: bool

TABLE_vlan

vlan-id

Type: integer

description

Type: string

description, if any

snoop-on

Type: bool

qa

Type: ipaddr

qv

Type: uinteger

qi

Type: uinteger

qlmqi

Type: uinteger

rv

Type: uinteger

sq

Type: bool

sqr

Type: bool

eht

Type: bool

fl

Type: bool

repsup

Type: bool

v3repsup

Type: bool

vlinklocalgrpsup

Type: bool

rpc

Type: uinteger

gc

Type: uinteger

actvports

Type: interface

lkupmode

Type: bool

Command Modes

- /exec

- /exec

show ip igmp snooping explicit-tracking

show ip igmp snooping explicit-tracking [ vlan vlan ] [ __readonly__ TABLE_vlan vlan-id grp-addr src-addr if-name host-addr uptime last-join expires ] [detail]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

explicit-tracking

Display explicit-tracking database for IGMPv3

vlan

Display Vlan explicit-tracking database

detail

Display detail info regarding host and vPC

vlan

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_vlan

vlan-id

Type: integer

grp-addr

Type: ipaddr

src-addr

Type: ipaddr

if-name

Type: interface

host-addr

Type: ipaddr

uptime

Type: duration

last-join

Type: duration

expires

Type: duration

Command Modes

- /exec

show ip igmp snooping groups

show ip igmp snooping [otv] groups [ source [group] | group [source] ] [ vlan vlan ] [detail] [summary] [ __readonly__ TABLE_vlan vlan-id rports rtrPortFlag oifs TABLE_port if-name TABLE_rtrports rport-if-name raddr TABLE_source source TABLE_group addr ver raddr rsf js g-mfdm old-host g-vpc static dynamic snoop-enabled omf-enabled group-count s-g-count TABLE_static_ports static-if-name TABLE_v2_ports v2-if-name uptime expires gq-missed TABLE_star_g_ports star-g-if-name uptime expires TABLE_source source srsf s-mfdm s-vpc src-static src-dynamic TABLE_src_static_ports src-static-if-name TABLE_src_dynamic dyn-if-name src-uptime src-expires ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

otv

IGMP Snooping OTV information

groups

Display snooping information for group address

summary

Display snooping group summary

group

Type: ipaddr

Multicast IP address of single group to display

source

Type: ipaddr

Source IP address

vlan

Display VLAN/BD IGMP snooping membership information

vlan

Type: vlan

Specify VLAN/BD

detail

Display detailed information for the group

__readonly__

TABLE_vlan

vlan-id

Type: integer

rports

Type: bool

rtrPortFlag

Type: bool

oifs

Type: bool

TABLE_port

if-name

Type: interface

TABLE_rtrports

rport-if-name

Type: interface

raddr

Type: ipaddr

TABLE_group

addr

Type: ipaddr

ver

Type: uinteger

raddr

Type: ipaddr

TABLE_source

source

Type: ipaddr

rsf

Type: bool

js

Type: integer

g-mfdm

Type: bool

old-host

Type: duration

g-vpc

Type: bool

static

Type: bool

dynamic

Type: bool

snoop-enabled

Type: string

omf-enabled

Type: string

group-count

Type: uinteger

s-g-count

Type: uinteger

TABLE_static_ports

static-if-name

Type: interface

TABLE_v2_ports

v2-if-name

Type: interface

uptime

Type: duration

expires

Type: duration

gq-missed

Type: integer

TABLE_star_g_ports

star-g-if-name

Type: interface

uptime

Type: duration

expires

Type: duration

TABLE_source

source

Type: ipaddr

srsf

Type: bool

s-mfdm

Type: bool

s-vpc

Type: bool

src-static

Type: bool

src-dynamic

Type: bool

TABLE_src_static_ports

src-static-if-name

Type: interface

TABLE_src_dynamic

dyn-if-name

Type: interface

src-uptime

Type: duration

src-expires

Type: duration

Command Modes

- /exec

show ip igmp snooping lookup-mode

show ip igmp snooping lookup-mode [ vlan vlan ] [ __readonly__ TABLE_global configured operational TABLE_vlan vlan-id lookup ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

lookup-mode

IGMP Snooping lkup mode information

vlan

Display VLAN/BD information

vlan

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_global

configured

Type: string

operational

Type: string

TABLE_vlan

vlan-id

Type: uinteger

lookup

Type: string

Command Modes

- /exec

show ip igmp snooping mac-oif

show ip igmp snooping mac-oif [ vlan vlan ] [detail] [ __readonly__ totaloif TABLE_vlan vlan-id count mac-addr oifs ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

mac-oif

IGMP Snooping static mac oif information

vlan

Display VLAN/BD information

vlan

Type: vlan

Specify VLAN/BD

detail

static mac oif detail, M2RIB oif info

__readonly__

totaloif

Type: integer

TABLE_vlan

vlan-id

Type: integer

count

Type: integer

mac-addr

Type: ethernet

oifs

Type: interface

Command Modes

- /exec

show ip igmp snooping mrouter

show ip igmp snooping mrouter [otv] [ vlan vlan ] [detail] [ __readonly__ TABLE_vlan vlan-id TABLE_intf if-name type uptime expires static dynamic internal vpc ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

mrouter

Display multicast routers detected

otv

IGMP Snooping OTV information

vlan

Display VLAN/BD multicast router information

vlan

Type: vlan

Specify VLAN/BD

detail

Display detailed mrouter information

__readonly__

TABLE_vlan

vlan-id

Type: integer

TABLE_intf

if-name

Type: interface

type

Type: string

uptime

Type: duration

expires

Type: duration

static

Type: bool

dynamic

Type: bool

internal

Type: bool

vpc

Type: bool

Command Modes

- /exec

show ip igmp snooping otv vlan brief

show ip igmp snooping otv vlan brief [ __readonly__ vlan-id ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

otv

IGMP Snooping OTV information

vlan

Display VLAN/BD information

brief

Brief output

__readonly__

vlan-id

Type: integer

Command Modes

- /exec

show ip igmp snooping pw vlan brief

show ip igmp snooping pw vlan brief [ __readonly__ vlan-id ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

pw

IGMP Snooping PW information

vlan

Display VLAN/BD information

brief

Brief output

__readonly__

vlan-id

Type: integer

Command Modes

- /exec

show ip igmp snooping querier

show ip igmp snooping querier [ vlan vlan ] [detail] [ __readonly__ TABLE_vlan vlan-id qa ver expires qv qiod int qname ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

querier

Display snooping querier information

vlan

Display VLAN/BD IGMP snooping querier information

vlan

Type: vlan

Specify VLAN/BD

detail

Display detailed information

__readonly__

TABLE_vlan

vlan-id

Type: integer

qa

Type: ipaddr

ver

Type: uinteger

expires

Type: duration

qv

Type: string

qiod

Type: interface

qname

Type: string

int

Type: bool

Command Modes

- /exec

show ip igmp snooping snmp mib adminMode

show ip igmp snooping snmp mib adminMode [ __readonly__ cisAdminMode ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

adminMode

Indicates the administrative snooping mode of IGMP Snooping feature

__readonly__

Read Only

cisAdminMode

Type: integer

mib object cisAdminMode

Command Modes

- /exec

show ip igmp snooping snmp mib aliasingMode

show ip igmp snooping snmp mib aliasingMode [ __readonly__ cisAddressAliasingMode ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

aliasingMode

Indicates the current IGMP Address Aliasing Mode of the device

__readonly__

Read Only

cisAddressAliasingMode

Type: integer

mib object cisAddressAliasingMode

Command Modes

- /exec

show ip igmp snooping snmp mib cisV3ProcessEnableOperStatus

show ip igmp snooping snmp mib cisV3ProcessEnableOperStatus [ __readonly__ cisV3ProcessEnabledOperStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

cisV3ProcessEnableOperStatus

Indicates the current operational status of IGMP v3 processing in the system

__readonly__

Read Only

cisV3ProcessEnabledOperStatus

Type: integer

mib object cisV3ProcessEnabledOperStatus

Command Modes

- /exec

show ip igmp snooping snmp mib explicitTrackingTable

show ip igmp snooping snmp mib explicitTrackingTable [ vlan cisVlanIndex-in ] [ __readonly__ TABLE_cisVlanExplicitTrackingTable cisVlanIndex-out cisVlanExplicitTrackingEnabled cisVlanExplicitTrackingLimit ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

explicitTrackingTable

Show mib table cisVlanExplicitTrackingTable

vlan

Display VLAN/BD IGMP snooping membership information

cisVlanIndex-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisVlanExplicitTrackingTable

cisVlanIndex-out

Type: integer

mib table index cisVlanIndex

cisVlanExplicitTrackingEnabled

Type: integer

mib object cisVlanExplicitTrackingEnabled

cisVlanExplicitTrackingLimit

Type: integer

mib object cisVlanExplicitTrackingLimit

Command Modes

- /exec

show ip igmp snooping snmp mib fallBackTime

show ip igmp snooping snmp mib fallBackTime [ __readonly__ cisFallbackTime ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

fallBackTime

Indicates the time the IGMP address aliasing mode is fallback

__readonly__

Read Only

cisFallbackTime

Type: integer

mib object cisFallbackTime

Command Modes

- /exec

show ip igmp snooping snmp mib fastBlockEnabled

show ip igmp snooping snmp mib fastBlockEnabled [ __readonly__ cisFastBlockEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

fastBlockEnabled

Indicates whether Fast-Block mechanism has been enabled for the system

__readonly__

Read Only

cisFastBlockEnabled

Type: integer

mib object cisFastBlockEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib fastleaveenabled

show ip igmp snooping snmp mib fastleaveenabled [ __readonly__ cisFastLeaveEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

fastleaveenabled

Check if fastleave is enabled

__readonly__

Read Only

cisFastLeaveEnabled

Type: integer

mib object cisFastLeaveEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib filterStatsTable

show ip igmp snooping snmp mib filterStatsTable [ interface ifIndex-in vlan cisFilterStatsVlanNumber-in ] [ __readonly__ TABLE_cisFilterStatsTable ifIndex-out cisFilterStatsVlanNumber-out cisFilterAccessGroupDenied cisFilterLimitDenied cisFilterTotalLimitDenied cisFilterMinVersionDenied ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

filterStatsTable

Display VLAN/BD Filter Group

interface

Display interface

ifIndex-in

Type: integer

Interface Index

vlan

Display Interface access group VLAN/BD information

cisFilterStatsVlanNumber-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisFilterStatsTable

ifIndex-out

Type: integer

mib table index ifIndex

cisFilterStatsVlanNumber-out

Type: string

mib table index cisFilterStatsVlanNumber

cisFilterAccessGroupDenied

Type: uinteger

mib object cisFilterAccessGroupDenied

cisFilterLimitDenied

Type: string

mib object cisFilterLimitDenied

cisFilterTotalLimitDenied

Type: uinteger

mib object cisFilterTotalLimitDenied

cisFilterMinVersionDenied

Type: uinteger

mib object cisFilterMinVersionDenied

Command Modes

- /exec

show ip igmp snooping snmp mib ifAccessGroupTable

show ip igmp snooping snmp mib ifAccessGroupTable [ interface ifIndex-in vlan cisIfAccessGroupVlan-in ] [ __readonly__ TABLE_cisIfAccessGroupTable ifIndex-out cisIfAccessGroupVlan-out cisIfAccessGroupsChannelsAllowed cisIfAccessGroupStorageType cisIfAccessGroupRowStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

ifAccessGroupTable

Display interface access group

interface

Display interface

ifIndex-in

Type: interface

Interface Index

vlan

Display Interface access group VLAN/BD information

cisIfAccessGroupVlan-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisIfAccessGroupTable

ifIndex-out

Type: integer

mib table index ifIndex

cisIfAccessGroupVlan-out

Type: integer

mib table index cisIfAccessGroupVlan

cisIfAccessGroupsChannelsAllowed

Type: uinteger

mib object cisIfAccessGroupsChannelsAllowed

cisIfAccessGroupStorageType

Type: string

mib object cisIfAccessGroupStorageType

cisIfAccessGroupRowStatus

Type: integer

mib object cisIfAccessGroupRowStatus

Command Modes

- /exec

show ip igmp snooping snmp mib ifConfigTable

show ip igmp snooping snmp mib ifConfigTable [ interface ifIndex-in ] [ __readonly__ TABLE_cisIfConfigTable ifIndex-out cisIfTopoChangeFloodEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

ifConfigTable

Display interface configuration

interface

Display interface

ifIndex-in

Type: interface

Interface Index

__readonly__

TABLE_cisIfConfigTable

ifIndex-out

Type: integer

mib table index ifIndex

cisIfTopoChangeFloodEnabled

Type: integer

mib object cisIfTopoChangeFloodEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib ifLimitTable

show ip igmp snooping snmp mib ifLimitTable [ interface ifIndex-in vlan cisIfLimitVlanNumber-in ] [ __readonly__ TABLE_cisIfLimitTable ifIndex-out cisIfLimitVlanNumber-out cisIfLimitMax cisIfLimitExcludeAccessGrp cisIfLimitStorageType cisIfLimitRowStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

ifLimitTable

Display interface configuration

interface

Display interface

ifIndex-in

Type: interface

Interface Index

vlan

Display Interface Limit VLAN/BD informaition

cisIfLimitVlanNumber-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisIfLimitTable

ifIndex-out

Type: integer

mib table index ifIndex

cisIfLimitVlanNumber-out

Type: integer

mib table index cisIfLimitVlanNumber

cisIfLimitMax

Type: uinteger

mib object cisIfLimitMax

cisIfLimitExcludeAccessGrp

Type: string

mib object cisIfLimitExcludeAccessGrp

cisIfLimitStorageType

Type: integer

mib object cisIfLimitStorageType

cisIfLimitRowStatus

Type: integer

mib object cisIfLimitRowStatus

Command Modes

- /exec

show ip igmp snooping snmp mib ifLimitTotalTable

show ip igmp snooping snmp mib ifLimitTotalTable [ interface ifIndex-in ] [ __readonly__ TABLE_cisIfLimitTotalTable ifIndex-out cisIfLimitTotalLimitMax cisIfLimitTotalExcludeAccessGrp cisIfLimitTotalStorageType cisIfLimitTotalRowStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

ifLimitTotalTable

Display interface configuration

interface

Display interface

ifIndex-in

Type: interface

Interface Index

__readonly__

TABLE_cisIfLimitTotalTable

ifIndex-out

Type: integer

mib table index ifIndex

cisIfLimitTotalLimitMax

Type: uinteger

mib object cisIfLimitTotalLimitMax

cisIfLimitTotalExcludeAccessGrp

Type: string

mib object cisIfLimitTotalExcludeAccessGrp

cisIfLimitTotalStorageType

Type: integer

mib object cisIfLimitTotalStorageType

cisIfLimitTotalRowStatus

Type: integer

mib object cisIfLimitTotalRowStatus

Command Modes

- /exec

show ip igmp snooping snmp mib igmpsnoopingenabled

show ip igmp snooping snmp mib igmpsnoopingenabled [ __readonly__ cisIgmpSnoopingEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

igmpsnoopingenabled

Check if IGMP snooping is enabled

__readonly__

Read Only

cisIgmpSnoopingEnabled

Type: integer

mib object cisIgmpSnoopingEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib iterfaceStatsTable

show ip igmp snooping snmp mib iterfaceStatsTable [ interface ifIndex-in ] [ __readonly__ TABLE_cisInterfaceStatsTable ifIndex-out cisTxGeneralQueries cisTxGroupSpecificQueries cisTxReports cisTxLeaves cisRxGeneralQueries cisRxGroupSpecificQueries cisRxReports cisRxLeaves cisRxValidPackets cisRxInvalidPackets cisRxOtherPackets cisRxMACGeneralQueries cisRxTopoNotifications cisV3Allows cisV3Blocks cisV3IsIncluded cisV3IsExcluded cisV3ToIncluded cisV3ToExcluded ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

iterfaceStatsTable

Display interface stats

interface

Display interface information

ifIndex-in

Type: interface

Interface Index

__readonly__

TABLE_cisInterfaceStatsTable

ifIndex-out

Type: integer

mib table index ifIndex

cisTxGeneralQueries

Type: uinteger

mib object cisTxGeneralQueries

cisTxGroupSpecificQueries

Type: uinteger

mib object cisTxGroupSpecificQueries

cisTxReports

Type: uinteger

mib object cisTxReports

cisTxLeaves

Type: uinteger

mib object cisTxLeaves

cisRxGeneralQueries

Type: uinteger

mib object cisRxGeneralQueries

cisRxGroupSpecificQueries

Type: uinteger

mib object cisRxGroupSpecificQueries

cisRxReports

Type: uinteger

mib object cisRxReports

cisRxLeaves

Type: uinteger

mib object cisRxLeaves

cisRxValidPackets

Type: uinteger

mib object cisRxValidPackets

cisRxInvalidPackets

Type: uinteger

mib object cisRxInvalidPackets

cisRxOtherPackets

Type: uinteger

mib object cisRxOtherPackets

cisRxMACGeneralQueries

Type: uinteger

mib object cisRxMACGeneralQueries

cisRxTopoNotifications

Type: uinteger

mib object cisRxTopoNotifications

cisV3Allows

Type: uinteger

mib object cisV3Allows

cisV3Blocks

Type: uinteger

mib object cisV3Blocks

cisV3IsIncluded

Type: uinteger

mib object cisV3IsIncluded

cisV3IsExcluded

Type: uinteger

mib object cisV3IsExcluded

cisV3ToIncluded

Type: uinteger

mib object cisV3ToIncluded

cisV3ToExcluded

Type: uinteger

mib object cisV3ToExcluded

Command Modes

- /exec

show ip igmp snooping snmp mib lastMemeberQueryCount

show ip igmp snooping snmp mib lastMemeberQueryCount [ __readonly__ cisLastMemberQueryCount ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

lastMemeberQueryCount

Specifies the Last Member Query Count value of this device

__readonly__

Read Only

cisLastMemberQueryCount

Type: integer

mib object cisLastMemberQueryCount

Command Modes

- /exec

show ip igmp snooping snmp mib lastMemeberQueryInterval

show ip igmp snooping snmp mib lastMemeberQueryInterval [ __readonly__ cisLastMemberQueryInterval ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

lastMemeberQueryInterval

Specifies the IGMP Last Member Query Interval of this device

__readonly__

Read Only

cisLastMemberQueryInterval

Type: integer

mib object cisLastMemberQueryInterval

Command Modes

- /exec

show ip igmp snooping snmp mib leaveQueryType

show ip igmp snooping snmp mib leaveQueryType [ __readonly__ cisLeaveQueryType ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

leaveQueryType

Indicates type of leave query

__readonly__

Read Only

cisLeaveQueryType

Type: integer

mib object cisLeaveQueryType

Command Modes

- /exec

show ip igmp snooping snmp mib mcastGroupTable

show ip igmp snooping snmp mib mcastGroupTable [ vlan cisMcastGroupVlanIndex-in cisMcastGroupAddressType-in cisMcastGroupAddress-in ] [ __readonly__ TABLE_cisMcastGroupTable cisMcastGroupVlanIndex-out cisMcastGroupAddressType-out cisMcastGroupAddress-out cisMcastGroupFilterMode cisMcastGroupIgmpVersion cisMcastGroupIncludeHostCount cisMcastGroupExcludeHostCount cisMcastGroupPortList ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

mcastGroupTable

Show mib table cisMcastGroupTable

vlan

Display VLAN/BD IGMP snooping membership information

cisMcastGroupVlanIndex-in

Type: vlan

Specify VLAN/BD

cisMcastGroupAddressType-in

Type: integer

Address type

cisMcastGroupAddress-in

Type: ipaddr

Group address

__readonly__

TABLE_cisMcastGroupTable

cisMcastGroupVlanIndex-out

Type: integer

mib table index cisMcastGroupVlanIndex

cisMcastGroupAddressType-out

Type: integer

mib table index cisMcastGroupAddressType

cisMcastGroupAddress-out

Type: ipaddr

mib table index cisMcastGroupAddress

cisMcastGroupFilterMode

Type: integer

mib object cisMcastGroupFilterMode

cisMcastGroupIgmpVersion

Type: integer

mib object cisMcastGroupIgmpVersion

cisMcastGroupIncludeHostCount

Type: uinteger

mib object cisMcastGroupIncludeHostCount

cisMcastGroupExcludeHostCount

Type: uinteger

mib object cisMcastGroupExcludeHostCount

cisMcastGroupPortList

Type: string

mib object cisMcastGroupPortList

Command Modes

- /exec

show ip igmp snooping snmp mib mcastRouterCfgTable

show ip igmp snooping snmp mib mcastRouterCfgTable [ interface ifIndex-in vlan cisMcastRouterVlanIndex-in ] [ __readonly__ TABLE_cisMcastRouterCfgTable ifIndex-out cisMcastRouterVlanIndex-out cisMcastRouterType cisMcastRouterRowStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

mcastRouterCfgTable

show mib table cisMcastRouterCfgTable

interface

Display Mcast Router Interface Information

ifIndex-in

Type: integer

Specify the Mcast router interface

vlan

Display VLAN/BD IGMP snooping membership information

cisMcastRouterVlanIndex-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisMcastRouterCfgTable

ifIndex-out

Type: integer

mib table index ifIndex

cisMcastRouterVlanIndex-out

Type: integer

mib table index cisMcastRouterVlanIndex

cisMcastRouterType

Type: integer

mib object cisMcastRouterType

cisMcastRouterRowStatus

Type: integer

mib object cisMcastRouterRowStatus

Command Modes

- /exec

show ip igmp snooping snmp mib mcastRouterConfigTable

show ip igmp snooping snmp mib mcastRouterConfigTable [ vlan cisMcastRouterConfigVlanIndex-in interface ifIndex-in ] [ __readonly__ TABLE_cisMcastRouterConfigTable ifIndex-out cisMcastRouterConfigVlanIndex-out cisMcastRouterConfigRouterType cisMcastRouterConfigStorageType cisMcastRouterConfigRowStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

mcastRouterConfigTable

show mib table cisMcastRouterConfigTable

vlan

Display VLAN/BD IGMP snooping membership information

cisMcastRouterConfigVlanIndex-in

Type: vlan

Specify VLAN/BD

interface

Display Mcast Router Interface Information

ifIndex-in

Type: integer

Specify the Mcast router interface index

__readonly__

TABLE_cisMcastRouterConfigTable

cisMcastRouterConfigVlanIndex-out

Type: integer

mib table index cisMcastRouterConfigVlanIndex

ifIndex-out

Type: integer

mib table index ifIndex

cisMcastRouterConfigRouterType

Type: integer

mib object cisMcastRouterConfigRouterType

cisMcastRouterConfigStorageType

Type: integer

mib object cisMcastRouterConfigStorageType

cisMcastRouterConfigRowStatus

Type: integer

mib object cisMcastRouterConfigRowStatus

Command Modes

- /exec

show ip igmp snooping snmp mib multicastGroupConfigTable

show ip igmp snooping snmp mib multicastGroupConfigTable [ vlan cisMulticastGroupConfVlanIndex-in cisMulticastGroupConfCeVlanIndex-in cisMulticastGroupConfAddressType-in cisMulticastGroupConfAddress-in cisMulticastGroupConfSourceAddress-in cisMulticastGroupConfPortRange-in ] [ __readonly__ TABLE_cisMulticastGroupConfigTable cisMulticastGroupConfVlanIndex-out cisMulticastGroupConfCeVlanIndex-out cisMulticastGroupConfAddressType-out cisMulticastGroupConfAddress-out cisMulticastGroupConfSourceAddress-out cisMulticastGroupConfPortRange-out cisMulticastGroupConfPortList cisMulticastGroupConfStorageType cisMulticastGroupConfRowStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

multicastGroupConfigTable

show mib table cisMulticastGroupConfigTable

vlan

Display VLAN/BD IGMP snooping membership information

cisMulticastGroupConfVlanIndex-in

Type: vlan

Specify VLAN/BD

cisMulticastGroupConfCeVlanIndex-in

Type: vlan

Specify consumer edge VLAN/BD

cisMulticastGroupConfAddressType-in

Type: integer

min: 0  max: 4

Group Address Type

cisMulticastGroupConfAddress-in

Type: ipaddr

Group address

cisMulticastGroupConfSourceAddress-in

Type: ipaddr

source address

cisMulticastGroupConfPortRange-in

Type: integer

port Range

__readonly__

TABLE_cisMulticastGroupConfigTable

cisMulticastGroupConfVlanIndex-out

Type: integer

mib table index cisMulticastGroupConfVlanIndex

cisMulticastGroupConfCeVlanIndex-out

Type: integer

mib table index cisMulticastGroupConfCeVlanIndex

cisMulticastGroupConfAddressType-out

Type: integer

mib table index cisMulticastGroupConfAddressType

cisMulticastGroupConfAddress-out

Type: ipaddr

mib table index cisMulticastGroupConfAddress

cisMulticastGroupConfSourceAddress-out

Type: ipaddr

mib table index cisMulticastGroupConfSourceAddress

cisMulticastGroupConfPortRange-out

Type: integer

mib table index cisMulticastGroupConfPortRange

cisMulticastGroupConfPortList

Type: string

mib object cisMulticastGroupConfPortList

cisMulticastGroupConfStorageType

Type: uinteger

mib object cisMulticastGroupConfStorageType

cisMulticastGroupConfRowStatus

Type: uinteger

mib object index cisMulticastGroupConfRowStatus

Command Modes

- /exec

show ip igmp snooping snmp mib multicastGroupPortListTable

show ip igmp snooping snmp mib multicastGroupPortListTable [ vlan cisMulticastGroupVlanIndex-in cisMulticastGroupCeVlanIndex-in cisMulticastGroupAddressType-in cisMulticastGroupAddress-in cisMulticastGroupSourceAddress-in cisMulticastGroupPortRangeIndex-in ] [ __readonly__ TABLE_cisMulticastGroupPortListTable cisMulticastGroupVlanIndex-out cisMulticastGroupCeVlanIndex-out cisMulticastGroupAddressType-out cisMulticastGroupAddress-out cisMulticastGroupSourceAddress-out cisMulticastGroupPortRangeIndex-out cisMulticastGroupPortList ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

multicastGroupPortListTable

show mib table multicastGroupPortListTable

vlan

Display VLAN/BD IGMP snooping membership information

cisMulticastGroupVlanIndex-in

Type: vlan

Specify VLAN/BD

cisMulticastGroupCeVlanIndex-in

Type: vlan

Specify consumer edge VLAN/BD

cisMulticastGroupAddressType-in

Type: integer

min: 0  max: 4

Group Address Type

cisMulticastGroupAddress-in

Type: ipaddr

Group address

cisMulticastGroupSourceAddress-in

Type: ipaddr

source address

cisMulticastGroupPortRangeIndex-in

Type: integer

port Range Index

__readonly__

TABLE_cisMulticastGroupPortListTable

cisMulticastGroupVlanIndex-out

Type: integer

mib table index cisMulticastGroupVlanIndex

cisMulticastGroupCeVlanIndex-out

Type: integer

mib table index cisMulticastGroupCeVlanIndex

cisMulticastGroupAddressType-out

Type: integer

mib table index cisMulticastGroupAddressType

cisMulticastGroupAddress-out

Type: ipaddr

mib table index cisMulticastGroupAddress

cisMulticastGroupSourceAddress-out

Type: ipaddr

mib table index cisMulticastGroupSourceAddress

cisMulticastGroupPortRangeIndex-out

Type: integer

mib table index cisMulticastGroupPortRangeIndex

cisMulticastGroupPortList

Type: string

mib object cisMulticastGroupPortList

Command Modes

- /exec

show ip igmp snooping snmp mib multicastGroupTable

show ip igmp snooping snmp mib multicastGroupTable [ vlan cisMulticastGroupVlanIndex-in cisMulticastGroupCeVlanIndex-in cisMulticastGroupAddressType-in cisMulticastGroupAddress-in cisMulticastGroupSourceAddress-in ] [ __readonly__ TABLE_cisMulticastGroupTable cisMulticastGroupVlanIndex-out cisMulticastGroupCeVlanIndex-out cisMulticastGroupAddressType-out cisMulticastGroupAddress-out cisMulticastGroupSourceAddress-out cisMulticastGroupGroupType cisMulticastGroupIgmpVersion cisMulticastGroupSourceUpTime cisMulticastGroupSourceExpires cisMulticastGroupInclHostCount cisMulticastGroupExclHostCount ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

multicastGroupTable

show mib table multicastGroupTable

vlan

Display VLAN/BD IGMP snooping membership information

cisMulticastGroupVlanIndex-in

Type: vlan

Specify VLAN/BD

cisMulticastGroupCeVlanIndex-in

Type: vlan

Specify consumer edge VLAN/BD

cisMulticastGroupAddressType-in

Type: integer

min: 0  max: 4

Group Address Type

cisMulticastGroupAddress-in

Type: ipaddr

Group address

cisMulticastGroupSourceAddress-in

Type: ipaddr

Source address

__readonly__

TABLE_cisMulticastGroupTable

cisMulticastGroupVlanIndex-out

Type: integer

mib table index cisMulticastGroupVlanIndex

cisMulticastGroupCeVlanIndex-out

Type: integer

mib table index cisMulticastGroupCeVlanIndex

cisMulticastGroupAddressType-out

Type: integer

mib table index cisMulticastGroupAddressType

cisMulticastGroupAddress-out

Type: ipaddr

mib table index cisMulticastGroupAddress

cisMulticastGroupSourceAddress-out

Type: ipaddr

mib table index cisMulticastGroupSourceAddress

cisMulticastGroupGroupType

Type: integer

mib object cisMulticastGroupGroupType

cisMulticastGroupIgmpVersion

Type: string

mib object cisMulticastGroupIgmpVersion

cisMulticastGroupSourceUpTime

Type: duration

mib object cisMulticastGroupSourceUpTime

cisMulticastGroupSourceExpires

Type: duration

mib object cisMulticastGroupSourceExpires

cisMulticastGroupInclHostCount

Type: uinteger

mib object cisMulticastGroupInclHostCount

cisMulticastGroupExclHostCount

Type: uinteger

mib object cisMulticastGroupExclHostCount

Command Modes

- /exec

show ip igmp snooping snmp mib operMode

show ip igmp snooping snmp mib operMode [ __readonly__ cisOperMode ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

operMode

Indicates the operational snooping mode of the device

__readonly__

Read Only

cisOperMode

Type: integer

mib object cisOperMode

Command Modes

- /exec

show ip igmp snooping snmp mib querierTable

show ip igmp snooping snmp mib querierTable [ vlan cisIgmpQuerierVlanIndex-in ] [ __readonly__ TABLE_cisIgmpQuerierTable cisIgmpQuerierVlanIndex-out cisIgmpQuerierEnabled cisIgmpQuerierState cisIgmpQuerierVersion cisIgmpQuerierAddressType cisIgmpQuerierAddress cisIgmpQuerierInterface cisIgmpQuerierTcnQueryCount cisIgmpQuerierTcnQueryInterval cisIgmpQuerierTimerExpiry cisIgmpQuerierMaxResponseTime cisIgmpQuerierQueryInterval cisIgmpQuerierAdminAddressType cisIgmpQuerierAdminAddress cisIgmpQuerierAdminVersion cisIgmpQuerierTcnQueryPending ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

querierTable

Show mib table cisIgmpQuerierTable

vlan

Display VLAN/BD IGMP snooping membership information

cisIgmpQuerierVlanIndex-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisIgmpQuerierTable

cisIgmpQuerierVlanIndex-out

Type: integer

mib table index cisIgmpQuerierVlanIndex

cisIgmpQuerierEnabled

Type: integer

mib object cisIgmpQuerierEnabled

cisIgmpQuerierState

Type: integer

mib object cisIgmpQuerierState

cisIgmpQuerierVersion

Type: integer

mib object cisIgmpQuerierVersion

cisIgmpQuerierAddressType

Type: integer

mib object cisIgmpQuerierAddressType

cisIgmpQuerierAddress

Type: ipaddr

mib object cisIgmpQuerierAddress

cisIgmpQuerierInterface

Type: uinteger

mib object cisIgmpQuerierInterface

cisIgmpQuerierTcnQueryCount

Type: uinteger

mib object cisIgmpQuerierTcnQueryCount

cisIgmpQuerierTcnQueryInterval

Type: uinteger

mib object cisIgmpQuerierTcnQueryInterval

cisIgmpQuerierTimerExpiry

Type: uinteger

mib object cisIgmpQuerierTimerExpiry

cisIgmpQuerierMaxResponseTime

Type: uinteger

mib object cisIgmpQuerierMaxResponseTime

cisIgmpQuerierQueryInterval

Type: uinteger

mib object cisIgmpQuerierQueryInterval

cisIgmpQuerierAdminAddressType

Type: integer

mib object cisIgmpQuerierAdminAddressType

cisIgmpQuerierAdminAddress

Type: ipaddr

mib object cisIgmpQuerierAdminAddress

cisIgmpQuerierAdminVersion

Type: integer

mib object cisIgmpQuerierAdminVersion

cisIgmpQuerierTcnQueryPending

Type: uinteger

mib object cisIgmpQuerierTcnQueryPending

Command Modes

- /exec

show ip igmp snooping snmp mib reportsuppressionenabled

show ip igmp snooping snmp mib reportsuppressionenabled [ __readonly__ cisReportSuppressionEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

reportsuppressionenabled

Check if reportsuppression is enabled

__readonly__

Read Only

cisReportSuppressionEnabled

Type: integer

mib object cisReportSuppressionEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib robustnessVariable

show ip igmp snooping snmp mib robustnessVariable [ __readonly__ cisRobustnessVariable ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

robustnessVariable

Specifies the Robustness Variable of this device

__readonly__

Read Only

cisRobustnessVariable

Type: integer

mib object cisRobustnessVariable

Command Modes

- /exec

show ip igmp snooping snmp mib routerAlertCheckEnabled

show ip igmp snooping snmp mib routerAlertCheckEnabled [ __readonly__ cisLastMemberQueryCount ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

routerAlertCheckEnabled

Specifies whether checking of Router-Alert option is enabled for IGMP traffic in the system

__readonly__

Read Only

cisLastMemberQueryCount

Type: integer

mib object cisLastMemberQueryCount

Command Modes

- /exec

show ip igmp snooping snmp mib sourceOnlyEntryAgingTime

show ip igmp snooping snmp mib sourceOnlyEntryAgingTime [ __readonly__ cisSourceOnlyEntryAgingTime ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

sourceOnlyEntryAgingTime

Specifies the aging time in seconds for Source Only multicast entries

__readonly__

Read Only

cisSourceOnlyEntryAgingTime

Type: integer

mib object cisSourceOnlyEntryAgingTime

Command Modes

- /exec

show ip igmp snooping snmp mib sourceOnlyLearningEnabled

show ip igmp snooping snmp mib sourceOnlyLearningEnabled [ __readonly__ cisSourceOnlyLearningEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

sourceOnlyLearningEnabled

Specifies whether Source Only multicast entries are learned by IGMP Snooping or not

__readonly__

Read Only

cisSourceOnlyLearningEnabled

Type: integer

mib object cisSourceOnlyLearningEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib tcnFloodQueryCount

show ip igmp snooping snmp mib tcnFloodQueryCount [ __readonly__ cisTopoChangeFloodQueryCount ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

tcnFloodQueryCount

Specifies the flooding period for multicast traffic upon receiving Topology Change Notifications

__readonly__

Read Only

cisTopoChangeFloodQueryCount

Type: integer

mib object cisTopoChangeFloodQueryCount

Command Modes

- /exec

show ip igmp snooping snmp mib timeToLiveCheckEnabled

show ip igmp snooping snmp mib timeToLiveCheckEnabled [ __readonly__ cisTimeToLiveCheckEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

timeToLiveCheckEnabled

Specifies whether Time-To-Live (TTL) check is enabled when processing IGMP packets in the system

__readonly__

Read Only

cisTimeToLiveCheckEnabled

Type: integer

mib object cisTimeToLiveCheckEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib topoChanageQuerySolicitEnabled

show ip igmp snooping snmp mib topoChanageQuerySolicitEnabled [ __readonly__ cisTopoChangeQuerySolicitEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

topoChanageQuerySolicitEnabled

Specifies whether the device running IGMP Snooping will solicit IGMP General Queries from the Querier upon receiving a TCN

__readonly__

Read Only

cisTopoChangeQuerySolicitEnabled

Type: integer

mib object cisTopoChangeQuerySolicitEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib v3ProcessEnabledAdminStatus

show ip igmp snooping snmp mib v3ProcessEnabledAdminStatus [ __readonly__ cisV3ProcessEnabledAdminStatus ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

v3ProcessEnabledAdminStatus

Indicates the administrative status of IGMP v3 processing in the system

__readonly__

Read Only

cisV3ProcessEnabledAdminStatus

Type: integer

mib object cisV3ProcessEnabledAdminStatus

Command Modes

- /exec

show ip igmp snooping snmp mib v3SnoopingSupport

show ip igmp snooping snmp mib v3SnoopingSupport [ __readonly__ cisV3SnoopingSupport ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

v3SnoopingSupport

Indicates IGMP Snooping support for IGMPv3

__readonly__

Read Only

cisV3SnoopingSupport

Type: integer

mib object cisV3SnoopingSupport

Command Modes

- /exec

show ip igmp snooping snmp mib vlanconfigtable

show ip igmp snooping snmp mib vlanconfigtable [ vlan cisVlanIndex-in ] [ __readonly__ TABLE_cisVlanConfigTable cisVlanIndex-out cisVlanIgmpSnoopingEnabled cisVlanFastLeaveEnabled cisVlanIgmpSnoopingOperMode cisVlanIgmpSnoopingLearningMode cisVlanReportSuppressionEnabled cisVlanLeaveQueryInterval cisVlanLastMemberQueryCount cisVlanRobustnessVariable cisVlanTimeToLiveCheckEnabled cisVlanRouterAlertCheckEnabled ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

vlanconfigtable

Show mib table cisVlanConfigTable

vlan

Display VLAN/BD IGMP snooping membership information

cisVlanIndex-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisVlanConfigTable

cisVlanIndex-out

Type: integer

mib table index cisVlanIndex

cisVlanIgmpSnoopingEnabled

Type: integer

mib object cisVlanIgmpSnoopingEnabled

cisVlanFastLeaveEnabled

Type: integer

mib object cisVlanFastLeaveEnabled

cisVlanIgmpSnoopingOperMode

Type: integer

mib object cisVlanIgmpSnoopingOperMode

cisVlanIgmpSnoopingLearningMode

Type: integer

mib object cisVlanIgmpSnoopingLearningMode

cisVlanReportSuppressionEnabled

Type: integer

mib object cisVlanReportSuppressionEnabled

cisVlanLeaveQueryInterval

Type: uinteger

mib object cisVlanLeaveQueryInterval

cisVlanLastMemberQueryCount

Type: uinteger

mib object cisVlanLastMemberQueryCount

cisVlanRobustnessVariable

Type: uinteger

mib object cisVlanRobustnessVariable

cisVlanTimeToLiveCheckEnabled

Type: integer

mib object cisVlanTimeToLiveCheckEnabled

cisVlanRouterAlertCheckEnabled

Type: integer

mib object cisVlanRouterAlertCheckEnabled

Command Modes

- /exec

show ip igmp snooping snmp mib vlanFilterConfigTable

show ip igmp snooping snmp mib vlanFilterConfigTable [ vlan cisVlanIndex-in ] [ __readonly__ TABLE_cisVlanFilterConfigTable cisVlanIndex-out cisVlanFilterAccessGroup cisVlanFilterLimitMax cisVlanFilterLimitExclAccessGrp cisVlanFilterMinVersionAllowed ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

snmp

Show SNMP

mib

Show MIB table

vlanFilterConfigTable

Display VLAN/BD Filter Group

vlan

Display Interface access group VLAN/BD information

cisVlanIndex-in

Type: vlan

Specify VLAN/BD

__readonly__

TABLE_cisVlanFilterConfigTable

cisVlanIndex-out

Type: vlan

mib talbe index cisVlanIndex>

cisVlanFilterAccessGroup

Type: string

mib table index cisVlanFilterAccessGroup

cisVlanFilterLimitMax

Type: uinteger

mib object cisVlanFilterLimitMax

cisVlanFilterLimitExclAccessGrp

Type: string

mib object cisVlanFilterLimitExclAccessGrp

cisVlanFilterMinVersionAllowed

Type: uinteger

mib object cisVlanFilterMinVersionAllowed

Command Modes

- /exec

show ip igmp snooping statistics (igmp)

show ip igmp snooping { report-policy | access-group } statistics [ vlan vlan ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

report-policy

IGMP Report Policy

access-group

IGMP access-group

statistics

Policy statistics

vlan

Display VLAN IGMP snooping policy statistics information

vlan

Type: vlan

Specify VLAN

Command Modes

- /exec

show ip igmp snooping statistics (igmp)

show ip igmp snooping statistics [ global | vlan vlanId ] [ __readonly__ pr inv_pkt pnv pf vpcdrqs vpcdrqr vpcdrqf vpcdrus vpcdrur vpcdruf vpccfssf vpccfsrs vpccfsrr vpccfsrf vpccfsrfp vpccfsurls vpccfsurlr vpccfsurlf vpccfsrls vpccfsrlr vpccfsrlf inv_iod stptcnr imapif mfreqr mfcmps mfdgcmps bufsnt bufackr TABLE_vlan vlan-id ut vpr v1rr v2rr v3rr v1qr v2qr v3qr v2lr phr irr iqr v1rs v2rs v2ls v3gs vmr upr qo v2ro v2lo v3ro vpsr str mps mpr mpe cps cpr cpe ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

statistics

Display packet/error counter statistics

global

Display global statistics

vlan

Display VLAN/BD statistics

vlanId

Type: vlan

Specify VLAN/BD

__readonly__

pr

Type: integer

inv_pkt

Type: integer

pnv

Type: integer

pf

Type: integer

vpcdrqs

Type: integer

vpcdrqr

Type: integer

vpcdrqf

Type: integer

vpcdrus

Type: integer

vpcdrur

Type: integer

vpcdruf

Type: integer

vpccfssf

Type: integer

vpccfsrs

Type: integer

vpccfsrr

Type: integer

vpccfsrf

Type: integer

vpccfsrfp

Type: integer

vpccfsurls

Type: integer

vpccfsurlr

Type: integer

vpccfsurlf

Type: integer

vpccfsrls

Type: integer

vpccfsrlr

Type: integer

vpccfsrlf

Type: integer

inv_iod

Type: integer

stptcnr

Type: integer

imapif

Type: integer

mfreqr

Type: integer

mfcmps

Type: integer

mfdgcmps

Type: integer

bufsnt

Type: integer

bufackr

Type: integer

TABLE_vlan

vlan-id

Type: integer

ut

Type: string

vpr

Type: integer

v1rr

Type: integer

v2rr

Type: integer

v3rr

Type: integer

v1qr

Type: integer

v2qr

Type: integer

v3qr

Type: integer

v2lr

Type: integer

phr

Type: integer

irr

Type: integer

iqr

Type: integer

v1rs

Type: integer

v2rs

Type: integer

v2ls

Type: integer

v3gs

Type: integer

vmr

Type: integer

upr

Type: integer

qo

Type: integer

v2ro

Type: integer

v2lo

Type: integer

v3ro

Type: integer

vpsr

Type: integer

str

Type: integer

cps

Type: integer

cpr

Type: integer

cpe

Type: integer

mps

Type: integer

mpr

Type: integer

mpe

Type: integer

Command Modes

- /exec

show ip igmp vrf all

show ip igmp vrf all [ __readonly__ TABLE_vrfname vrf-name vrf-id instance work-in-txlist TABLE_vrfid vrf-name-i vrf-id-i instance-i work-in-txlist-i ]

Syntax Description

show

Show running system information

ip

Display IP information

igmp

Display IGMP status and configuration

vrf

Display per-VRF information

all

Display information for all VRFs

__readonly__

TABLE_vrfname

vrf-name

Type: vrf

vrf-id

Type: uinteger

instance

Type: uinteger

work-in-txlist

Type: string

TABLE_vrfid

vrf-name-i

Type: vrf

vrf-id-i

Type: uinteger

instance-i

Type: uinteger

work-in-txlist-i

Type: string

Command Modes

- /exec

show ip interface

show ip interface { brief [include-secondary] | [interface] | [ip-addr] } [operational] [vaddr] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_vrf vrf-name-out ] [ TABLE_intf intf-name proto-state link-state admin-state iod prefix subnet masklen [ TABLE_secondary_address prefix1 subnet1 masklen1 ] [num-addr] [vaddr-client] [vaddr-prefix] [vaddr-subnet] [vaddr-masklen] [num-vaddr] [unnum-intf] [ip-disabled] [bcast-addr] [maddr] [num-maddr] [mtu] [pref] [tag] [proxy-arp] [lcl-proxy-arp] [mrouting] [icmp-redirect] [dir-bcast] [ip-unreach] [port-unreach] [urpf-mode] [ip-ls-type] [urpf-acl] [pbr-in] [pbr-out] [acl-in] [acl-out] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

interface

Display IP related interface information

brief

Display summary of IP interface status and configuration

include-secondary

Display summary of all IP addresses

operational

Display only interfaces that are administratively enabled

interface

Type: interface

Interface name to display

ip-addr

Type: ipaddr

Display interface for local IP address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display all VRFs

vaddr

Display virtual IP addresses as well

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_intf

intf-name

Type: string

iod

Type: uinteger

prefix

Type: ipaddr

proto-state

Type: string

link-state

Type: string

admin-state

Type: string

subnet

Type: ipaddr

masklen

Type: uinteger

TABLE_secondary_address

prefix1

Type: ipaddr

subnet1

Type: ipaddr

masklen1

Type: uinteger

num-addr

Type: uinteger

vaddr-client

Type: string

vaddr-prefix

Type: ipaddr

vaddr-subnet

Type: ipaddr

vaddr-masklen

Type: uinteger

num-vaddr

Type: uinteger

unnum-intf

Type: string

ip-disabled

Type: string

bcast-addr

Type: ipaddr

maddr

Type: ipaddr

num-maddr

Type: uinteger

mtu

Type: uinteger

pref

Type: uinteger

tag

Type: uinteger

proxy-arp

Type: string

lcl-proxy-arp

Type: string

mrouting

Type: string

icmp-redirect

Type: string

dir-bcast

Type: string

ip-unreach

Type: string

port-unreach

Type: string

urpf-mode

none  value: 0

loose  value: 1

strict  value: 2

ip-ls-type

none  value: 0

default  value: 1

per-packet  value: 2

urpf-acl

Type: string

pbr-in

Type: string

pbr-out

Type: string

acl-in

Type: string

acl-out

Type: string

Command Modes

- /exec

show ip lisp data-cache

show ip lisp data-cache [eid] [ vrf { vrf-name | vrf-known-name } ]

Syntax Description

show

Show running system information

ip

Display IP information

lisp

LISP show commands Not available in this release.

data-cache

Display EID-to-RLOC data cache mapping in this ITR

eid

Type: ipaddr

Display mapping for IP destination EID

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

Command Modes

- /exec

show ip load-sharing

show ip load-sharing [ __readonly__ univer-id-ran-seed [l3-msg-load] [l34-msg-load] [dest-addr-load] [src-dst-ip-gre] [bad-load] ]

Syntax Description

show

Show running system information

ip

Configure IP features

load-sharing

Display global loadbalance info

__readonly__

univer-id-ran-seed

Type: uinteger

l3-msg-load

Type: string

l34-msg-load

Type: string

dest-addr-load

Type: string

src-dst-ip-gre

Type: string

bad-load

Type: string

Command Modes

- /exec

show ip local-pt

show ip local-pt [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

local-pt

Display local ip address ptree

vrf

Clear information for particular VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ip local policy

show ip local policy [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_pbr interface rmap status vrf_name ]

Syntax Description

show

Show running system information

ip

Display IP information

local

IP local options

policy

Policy routing

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_pbr

interface

Type: string

rmap

Type: string

status

Type: string

vrf_name

Type: string

Command Modes

- /exec

show ip logging

show ip logging [hash] [__readonly__]

Syntax Description

show

Show running system information

ip

Display IP information

logging

Display IP policy logging table

hash

logging hash data

__readonly__

Command Modes

- /exec

show ip msdp

show ip msdp { sa-cache | route } [ source [group] | group [source] ] [asn] [ peer peer ] [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-vrf total-sa-count TABLE_sa src-addr grp-addr rp-addr out-asn peer-addr uptime expire ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

route

Display MSDP SA route cache

sa-cache

Display MSDP SA route cache

source

Type: ipaddr

Display group/source address for SA

group

Type: ipaddr

Display group/source address for SA

asn

Type: asn

AS number

detail

Display detailed information

peer

Display MSDP SA received from single peer

peer

Type: ipaddr

IP address of peer for SA

__readonly__

out-vrf

Type: vrf

total-sa-count

Type: integer

TABLE_sa

src-addr

Type: ipaddr

grp-addr

Type: ipaddr

rp-addr

Type: ipaddr

peer-addr

Type: ipaddr

out-asn

Type: asn

uptime

Type: duration

expire

Type: duration

Command Modes

- /exec

show ip msdp count

show ip msdp count [asn] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-vrf total-cnt TABLE_asn out-asn src-cnt grp-cnt ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

count

Display SA cache counters

asn

Type: asn

AS number

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-vrf

Type: vrf

total-cnt

Type: integer

TABLE_asn

out-asn

Type: asn

src-cnt

Type: uinteger

grp-cnt

Type: uinteger

Command Modes

- /exec

show ip msdp mesh-group

show ip msdp mesh-group [mesh-group] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-vrf TABLE_meshgroup meshgroup-name TABLE_peer peer-ipaddr peer-asn peer-description ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

mesh-group

Display members of mesh-group

mesh-group

Type: string

Display single mesh-group

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-vrf

Type: vrf

TABLE_meshgroup

meshgroup-name

Type: string

TABLE_peer

peer-ipaddr

Type: ipaddr

peer-asn

Type: asn

peer-description

Type: string

Command Modes

- /exec

show ip msdp peer

show ip msdp peer [peer-address] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_peer peer-ipaddr out-vrf peer-asn local-ipaddr local-iface fully-configured peer-description connection-status state-duration peer-listening peer-uptime peer-password peer-ki peer-kt peer-ri peer-rr sa-in-policy sa-out-policy sa-limit mesh-name last-rcvd sa-rcvd sa-sent sa-req-rcvd sa-req-sent sa-resp-rcvd sa-resp-sent sa-ka-rcvd sa-ka-sent sa-notif-rcvd sa-notif-sent out-ctrl-msgs in-ctrl-msgs out-data-msgs in-data-msgs rem-port local-port ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

peer

Display MSDP peer information

peer-address

Type: ipaddr

IP address of MSDP peer

__readonly__

TABLE_peer

peer-ipaddr

Type: ipaddr

out-vrf

Type: vrf

peer-asn

Type: asn

local-ipaddr

Type: ipaddr

local-iface

Type: interface

fully-configured

Type: bool

peer-description

Type: string

connection-status

Inactive  value: 1

Admin-shutdown  value: 2

Connecting  value: 3

Listening  value: 4

Established  value: 5

state-duration

Type: duration

peer-listening

Type: bool

peer-uptime

Type: duration

peer-password

Type: bool

peer-ki

Type: uinteger

peer-kt

Type: uinteger

peer-ri

Type: uinteger

peer-rr

Type: string

sa-in-policy

Type: string

sa-out-policy

Type: string

sa-limit

Type: integer

mesh-name

Type: string

last-rcvd

Type: duration

sa-rcvd

Type: uinteger

sa-sent

Type: uinteger

sa-req-rcvd

Type: uinteger

sa-req-sent

Type: uinteger

sa-resp-rcvd

Type: uinteger

sa-resp-sent

Type: uinteger

sa-ka-rcvd

Type: uinteger

sa-ka-sent

Type: uinteger

sa-notif-rcvd

Type: uinteger

sa-notif-sent

Type: uinteger

out-ctrl-msgs

Type: uinteger

in-ctrl-msgs

Type: uinteger

out-data-msgs

Type: uinteger

in-data-msgs

Type: uinteger

rem-port

Type: uinteger

local-port

Type: uinteger

Command Modes

- /exec

show ip msdp policy statistics sa-policy

show ip msdp policy statistics sa-policy peer-address { in | out } [ vrf { vrf-name | vrf-known-name } ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

MSDP global configuration commands

policy

Policy information

statistics

Policy statistics

sa-policy

Configureed SA policy for MSDP peer

peer-address

Type: ipaddr

IP address of MSDP peer for SA policy

in

Input policy

out

Output policy

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

Command Modes

- /exec

show ip msdp rpf

show ip msdp rpf rp-address [ vrf { vrf-name | vrf-known-name all } ] [ __readonly__ out-vrf out-rp-address TABLE_mesh peer-addr mesh-name is-peer-cnt-one is-rp-peer is-bgp-alive is-mbgp bgp-peer-addr peer-asn origin-asn ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

rpf

Display RPF-peer for RP address

rp-address

Type: ipaddr

IP address of RP

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-vrf

Type: vrf

out-rp-address

Type: ipaddr

TABLE_mesh

peer-addr

Type: ipaddr

mesh-name

Type: string

is-peer-cnt-one

Type: bool

is-rp-peer

Type: bool

is-bgp-alive

Type: bool

is-mbgp

Type: bool

bgp-peer-addr

Type: bool

peer-asn

Type: asn

origin-asn

Type: asn

Command Modes

- /exec

show ip msdp sources

show ip msdp sources [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-vrf TABLE_source source-addr is-count-ge-limit count is-limit-valid limit source-prefix violates ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

sources

Display learned sources with their group counts & limits

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-vrf

Type: vrf

TABLE_source

source-addr

Type: ipaddr

is-count-ge-limit

Type: bool

count

Type: integer

is-limit-valid

Type: bool

limit

Type: integer

source-prefix

Type: ipprefix

violates

Type: integer

Command Modes

- /exec

show ip msdp statistics

show ip msdp statistics [peer-address] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-vrf select-err recv-sel-err TABLE_peer peer-address buffer-full recv-buf-full fatal-err recv-fat-err would-block recv-would-block sock-exp ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

statistics

Display internal statistics

peer-address

Type: ipaddr

IP address of MSDP peer

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-vrf

Type: vrf

select-err

Type: integer

recv-sel-err

Type: integer

TABLE_peer

peer-address

Type: ipaddr

buffer-full

Type: integer

recv-buf-full

Type: integer

fatal-err

Type: integer

recv-fat-err

Type: integer

would-block

Type: integer

recv-would-block

Type: integer

sock-exp

Type: integer

Command Modes

- /exec

show ip msdp summary

show ip msdp summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-vrf local-asn originator-id config-peer-count estb-peer-count shut-peer-count TABLE_peer peer-address peer-asn peer-state peer-uptime peer-last-msg peer-sa-rcvd peer-sa-limit ]

Syntax Description

show

Show running system information

ip

Display IP information

msdp

Display MSDP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

summary

Display MSDP peer summary

__readonly__

out-vrf

Type: vrf

local-asn

Type: asn

originator-id

Type: ipaddr

config-peer-count

Type: integer

estb-peer-count

Type: integer

shut-peer-count

Type: integer

TABLE_peer

peer-address

Type: ipaddr

peer-asn

Type: asn

peer-state

Inactive  value: 1

Admin-shutdown  value: 2

Connecting  value: 3

Listening  value: 4

Established  value: 5

peer-uptime

Type: duration

peer-last-msg

Type: duration

peer-sa-rcvd

Type: uinteger

peer-sa-limit

Type: bool

Command Modes

- /exec

show ip multicast vrf

show ip multicast vrf [ vrf-name | vrf-known-name | all ] [ __readonly__ vrf-count TABLE_vrf vrf-name cid tid rc gc sc star_gc state ]

Syntax Description

show

Show running system information

ip

Display IP information

multicast

Display multicast routing info

vrf

Display information for particular VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

vrf-count

Type: integer

cid

Type: integer

tid

Type: integer

rc

Type: integer

gc

Type: integer

sc

Type: integer

star_gc

Type: integer

state

Type: string

Command Modes

- /exec

show ip neighbors

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } neighbors { [ neighbor-id [ routes [ advertised | received | dampened ] | advertised-routes | received-routes | paths | flap-statistics ] ] | neighbor-prefix-id } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbors

Display all configured BGP neighbors

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

neighbor-prefix-id

Type: ipprefix

Display details for a prefix peering

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

routes

Display all routes advertised/received to/from peer

advertised

Display all routes advertised to this peer

received

Display all routes received from this peer

dampened

Display all dampened routes received from this peer

advertised-routes

Display all the routes advertised to this peer

received-routes

Display all the routes received from this peer

flap-statistics

Display flap statistics for routes received from this peer

paths

Display AS paths learned from this peer

Command Modes

- /exec

show ip nexthop

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } ] } nexthop ipnexthop [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

nexthop

Display routes matching the nexthop

ipnexthop

Type: ipaddr

Nexthop address

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

Command Modes

- /exec

show ip nexthop-database

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } nexthop-database [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

nexthop-database

Display nexthop database

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

Command Modes

- /exec

show ip ospf

show ip ospf [tag] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag instance_number cname rid [domain_tag] [dn_bit_ignore] stateful_ha gr_ha [gr_planned_only] [gr_notify_period] [gr_grace_period] [gr_state] [gr_last_status] [gr_helper_mode] support_tos0_only support_opaque_lsa [low_mem_cond] is_abr is_asbr [max_lsa_non_self_number] [max_lsa_state] [max_lsa_warning_only] [max_lsa_current_non_self_lsa_number] [max_lsa_threshold_pct] [max_lsa_ignore_time] [max_lsa_reset_time] [max_lsa_ignore_count] [max_lsa_current_ignore_count] [max_lsa_ignore_time_left] [max_lsa_reset_time_left] [max_lsa_permanent_ignore] [ TABLE_redist proto [max_lsas] [warning] [threshold] [current_count] ] admin_dist ref_bw spf_start_time spf_hold_time spf_max_time lsa_start_time lsa_hold_time lsa_max_time min_lsa_arr_time lsa_aging_pace spf_max_paths max_metric_adver [ [max_metric_time_left] [max_metric_wait_bgp] [max_metric_timeout] [max_metric_always] [max_metric_sum_lsa] [max_metric_ext_lsa] ] asext_lsa_cnt asext_lsa_crc asopaque_lsa_cnt asopaque_lsa_crc area_total area_normal area_stub area_nssa act_area_total act_area_normal act_area_stub act_area_nssa no_discard_rt_ext no_discard_rt_int [bfd_enabled] [passive_dflt] [name_lookup] [ TABLE_area aname [backbone_active] [active] age total_intf act_intf passive_intf loopback_intf [gr_nbr_cnt] stub [stub_def_cost] nssa [no_redist] [nssa_trans] no_summary auth_type spf_runs last_spf_run_time [rtr_lsa_throt] [ TABLE_range addr masklen state nets advertise [cost] ] [filter_in] [filter_out] lsa_cnt lsa_crc ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_ctx

ptag

Type: string

instance_number

Type: integer

cname

Type: string

rid

Type: ipaddr

domain_tag

Type: integer

dn_bit_ignore

Type: bool

stateful_ha

Type: bool

gr_ha

Type: bool

gr_planned_only

Type: bool

gr_notify_period

Type: duration

gr_grace_period

Type: duration

gr_state

active  value: 0

inactive  value: 1

gr_last_status

None  value: 0

Successful  value: 1

Failed (notify period timeout)  value: 2

Failed (grace period timeout)  value: 3

Failed (topology change)  value: 4

Failed (invalid lsid)  value: 5

gr_helper_mode

Type: bool

support_tos0_only

Type: bool

support_opaque_lsa

Type: bool

low_mem_cond

Type: bool

is_abr

Type: bool

is_asbr

Type: bool

max_lsa_non_self_number

Type: uinteger

max_lsa_state

Type: string

max_lsa_warning_only

Type: bool

max_lsa_current_non_self_lsa_number

Type: uinteger

max_lsa_threshold_pct

Type: uinteger

max_lsa_ignore_time

Type: duration

max_lsa_reset_time

Type: duration

max_lsa_ignore_count

Type: uinteger

max_lsa_current_ignore_count

Type: uinteger

max_lsa_ignore_time_left

Type: duration

max_lsa_reset_time_left

Type: duration

max_lsa_permanent_ignore

Type: bool

TABLE_redist

proto

Type: string

max_lsas

Type: integer

warning

Type: string

threshold

Type: integer

current_count

Type: integer

admin_dist

Type: integer

ref_bw

Type: integer

spf_start_time

Type: duration

spf_hold_time

Type: duration

spf_max_time

Type: duration

lsa_start_time

Type: duration

lsa_hold_time

Type: duration

lsa_max_time

Type: duration

min_lsa_arr_time

Type: duration

lsa_aging_pace

Type: integer

spf_max_paths

Type: integer

max_metric_adver

Type: bool

max_metric_time_left

Type: duration

max_metric_wait_bgp

Type: bool

max_metric_timeout

Type: duration

max_metric_always

Type: bool

max_metric_sum_lsa

Type: integer

max_metric_ext_lsa

Type: integer

asext_lsa_cnt

Type: integer

asext_lsa_crc

Type: hex

asopaque_lsa_cnt

Type: integer

asopaque_lsa_crc

Type: hex

area_total

Type: integer

area_normal

Type: integer

area_stub

Type: integer

area_nssa

Type: integer

act_area_total

Type: integer

act_area_normal

Type: integer

act_area_stub

Type: integer

act_area_nssa

Type: integer

bfd_enabled

Type: bool

name_lookup

Type: bool

passive_dflt

Type: bool

no_discard_rt_ext

Type: bool

no_discard_rt_int

Type: bool

TABLE_area

aname

Type: string

backbone_active

Type: bool

active

Type: bool

age

Type: duration

total_intf

Type: integer

act_intf

Type: integer

passive_intf

Type: integer

loopback_intf

Type: integer

gr_nbr_cnt

Type: integer

stub

Type: bool

stub_def_cost

Type: integer

nssa

Type: bool

no_redist

Type: bool

nssa_trans

Type: bool

no_summary

Type: bool

auth_type

none  value: 0

simple  value: 1

md5  value: 2

spf_runs

Type: integer

last_spf_run_time

Type: duration

rtr_lsa_throt

Type: duration

TABLE_range

addr

Type: ipaddr

masklen

Type: integer

state

active  value: 0

passive  value: 1

nets

Type: integer

advertise

advertise  value: 0

doNotAdvertise  value: 1

cost

Type: integer

filter_in

Type: string

filter_out

Type: string

lsa_cnt

Type: integer

lsa_crc

Type: hex

Command Modes

- /exec

show ip ospf border-routers

show ip ospf [tag] border-routers [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_br type addr cost asbr abr area spf_inst [vlink_unresolved] [ TABLE_br_ubest_nh [ubest_nh_addr] [ubest_nh_intf] ] [ TABLE_br_mbest_nh [mbest_nh_addr] [mbest_nh_intf] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

border-routers

Border routers

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_br

type

nopath  value: 0

discard-internal  value: 1

discard-external  value: 2

intra  value: 3

inter  value: 4

type-1  value: 5

nssa type-1  value: 6

type-2  value: 7

nssa type-2  value: 8

addr

Type: ipaddr

cost

Type: uinteger

asbr

Type: bool

abr

Type: bool

area

Type: string

spf_inst

Type: uinteger

vlink_unresolved

Type: bool

TABLE_br_ubest_nh

ubest_nh_addr

Type: ipaddr

ubest_nh_intf

Type: interface

TABLE_br_mbest_nh

mbest_nh_addr

Type: ipaddr

mbest_nh_intf

Type: interface

Command Modes

- /exec

show ip ospf database

show ip ospf [tag] database [ [ [ [ network | asbr-summary | summary | router | opaque-link | opaque-area | nssa-external ] [ area area-id-ip ] ] | external [ ext_tag tag_val ] | opaque-as ] [lsid] [ self-originated | adv-router advid | adv-router-name adv-name ] ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx rid ptag cname [ TABLE_db2_lsa name [area] id advrtr age seqno cksum [opaque_id] [corrupt] [rtr_num_links] [tag] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Link-state Database Summary

network

Display network LSAs

asbr-summary

Display type 4 (asbr-summary) LSAs

external

Display type 5 (external) LSAs

router

Display router LSAs

nssa-external

Display type 7 (NSSA external) LSAs

opaque-link

Display Opaque Link-Local LSAs

opaque-area

Display Opaque Area LSAs

opaque-as

Display Opaque AS LSAs

summary

Display type 3 (network-summary) LSAs

self-originated

Display only self-originated LSAs

lsid

Type: ipaddr

Restrict display by link state ID

adv-router

Restrict display by Advertising router

advid

Type: ipaddr

Advertising router ID

adv-router-name

Restrict display by Advertising router name

adv-name

Type: string

DNS Name of the Advertising router

area

Display only LSA's in this area

area-id-ip

Type: ipaddr

Area Id as an integer or ip address

ext_tag

Restrict display by tag

tag_val

Type: uinteger

min: 1  max: 4294967295

32-bit tag value

__readonly__

TABLE_ctx

rid

Type: ipaddr

ptag

Type: string

cname

Type: string

TABLE_db2_lsa

name

Type: string

area

Type: string

id

Type: ipaddr

advrtr

Type: ipaddr

age

Type: uinteger

seqno

Type: hex

cksum

Type: hex

opaque_id

Type: integer

corrupt

Type: bool

rtr_num_links

Type: integer

tag

Type: integer

Command Modes

- /exec

show ip ospf database database-summary

show ip ospf [tag] database database-summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx rid ptag cname [ TABLE_dbsum [ TABLE_dbsum_area area [ TABLE_dbsum_area_lsa area_lsa_name area_lsa_count ] area_lsa_total ] [ TABLE_dbsum_all [ TABLE_dbsum_lsa_all lsa_name lsa_count ] non_self_lsa_total lsa_total ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Link-state Database Summary

database-summary

Summary of database

__readonly__

TABLE_ctx

rid

Type: ipaddr

ptag

Type: string

cname

Type: string

TABLE_dbsum

TABLE_dbsum_area

area

Type: string

TABLE_dbsum_area_lsa

area_lsa_name

Type: string

area_lsa_count

Type: integer

area_lsa_total

Type: integer

TABLE_dbsum_all

TABLE_dbsum_lsa_all

lsa_name

Type: string

lsa_count

Type: integer

non_self_lsa_total

Type: integer

lsa_total

Type: integer

Command Modes

- /exec

show ip ospf database detail

show ip ospf [tag] database [ [ [ network | asbr-summary | summary | router | opaque-link | opaque-area | nssa-external ] [ area area-id-ip ] ] | external [ ext_tag tag_val ] | opaque-as ] [lsid] [ self-originated | adv-router advid | adv-router-name adv-name ] detail [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx rid ptag cname [ TABLE_db2_lsa name [area] [rtr_max_metric] [ TABLE_lsdb age maxage options options_str wrapping dummy flush_pending type id id_str [opaque_type] [opaque_id] advrtr seqno cksum len [corrupt] [rtr_abr] [rtr_asbr] [rtr_translate] [rtr_vlink_end] [rtr_num_links] [rtr_links_mismatch] [ TABLE_rlsa [rtr_link_type] [rtr_link_id_str] [rtr_link_id] [rtr_link_data_str] [rtr_link_data] [rtr_link_num_tos] [rtr_link_metric] [ TABLE_rlinktos [rtr_link_tos_id] [rtr_link_tos_metric] ] ] [net_mask] [ TABLE_netlsa [net_rtr] ] [sum_mask] [sum_metric] [ TABLE_sumlsa [sum_tos_id] [sum_tos_metric] ] [nssa_mask] [nssa_metric_type2] [nssa_metric] [nssa_fwd_addr] [nssa_tag] [ TABLE_nssa [nssa_tos_metric_type2] [nssa_tos_id] [nssa_tos_metric] [nssa_tos_fwd_addr] [nssa_tos_tag] ] [asext_mask] [asext_metric_type2] [asext_metric] [asext_fwd_addr] [asext_tag] [ TABLE_asext [asext_tos_metric_type2] [ asext_tos_id asext_tos_metric ] [asext_tos_fwd_addr] [asext_tos_tag] ] [opaque_link_intf] [opaque_unknown] [opaque_data_len] [opaque_data] [opaque_corrupt] [tlv_type] [tlv_len] [tlv_data] [tlv_unknown] [gr_interval] [gr_reason] [gr_addr] [te_frag_id] [te_rtr_id] [te_link_type] [te_link_id] [te_link_metric] [te_link_max_bw] [te_link_rsv_bw] [te_link_unrsv_bw] [te_link_admin] [te_num_links] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Link-state Database Summary

network

Display network LSAs

asbr-summary

Display type 4 (asbr-summary) LSAs

external

Display type 5 (external) LSAs

router

Display router LSAs

nssa-external

Display type 7 (NSSA external) LSAs

opaque-link

Display Opaque Link-Local LSAs

opaque-area

Display Opaque Area LSAs

opaque-as

Display Opaque AS LSAs

summary

Display type 3 (network-summary) LSAs

self-originated

Display only self-originated LSAs

lsid

Type: ipaddr

Restrict display by link state ID

adv-router

Restrict display by Advertising router

advid

Type: ipaddr

Advertising router ID

adv-router-name

Restrict display by Advertising router name

adv-name

Type: string

DNS Name of the Advertising router

area

Display only LSA's in this area

area-id-ip

Type: ipaddr

Area Id as an integer or ip address

ext_tag

Restrict display by tag

tag_val

Type: uinteger

min: 1  max: 4294967295

32-bit tag value

detail

Display LSA in detail

__readonly__

TABLE_ctx

rid

Type: ipaddr

ptag

Type: string

cname

Type: string

TABLE_db2_lsa

name

Type: string

area

Type: string

rtr_max_metric

Type: bool

TABLE_lsdb

age

Type: integer

maxage

Type: bool

options

Type: hex

options_str

Type: string

wrapping

Type: bool

dummy

Type: bool

flush_pending

Type: bool

type

Type: string

id

Type: string

id_str

Type: string

opaque_type

Type: uinteger

opaque_id

Type: integer

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

len

Type: integer

corrupt

Type: bool

rtr_abr

Type: bool

rtr_asbr

Type: bool

rtr_translate

Type: bool

rtr_vlink_end

Type: bool

rtr_num_links

Type: integer

rtr_links_mismatch

Type: bool

TABLE_rlsa

rtr_link_type

Type: string

rtr_link_id_str

Type: string

rtr_link_id

Type: ipaddr

rtr_link_data_str

Type: string

rtr_link_data

Type: ipaddr

rtr_link_num_tos

Type: integer

rtr_link_metric

Type: integer

TABLE_rlinktos

rtr_link_tos_id

Type: integer

rtr_link_tos_metric

Type: integer

net_mask

Type: integer

TABLE_netlsa

net_rtr

Type: ipaddr

sum_mask

Type: integer

sum_metric

Type: uinteger

TABLE_sumlsa

sum_tos_id

Type: integer

sum_tos_metric

Type: uinteger

nssa_mask

Type: integer

nssa_metric_type2

Type: bool

nssa_metric

Type: uinteger

nssa_fwd_addr

Type: ipaddr

nssa_tag

Type: uinteger

TABLE_nssa

nssa_tos_metric_type2

Type: bool

nssa_tos_id

Type: integer

nssa_tos_metric

Type: uinteger

nssa_tos_fwd_addr

Type: ipaddr

nssa_tos_tag

Type: uinteger

asext_mask

Type: integer

asext_metric_type2

Type: bool

asext_metric

Type: uinteger

asext_fwd_addr

Type: ipaddr

asext_tag

Type: integer

TABLE_asext

asext_tos_metric_type2

Type: bool

asext_tos_id

Type: integer

asext_tos_metric

Type: integer

asext_tos_fwd_addr

Type: ipaddr

asext_tos_tag

Type: integer

opaque_link_intf

Type: interface

opaque_unknown

Type: bool

opaque_data_len

Type: integer

opaque_data

Type: integer

opaque_corrupt

Type: bool

tlv_type

Type: integer

tlv_len

Type: integer

tlv_data

Type: integer

tlv_unknown

Type: bool

gr_interval

Type: integer

gr_reason

Type: string

gr_addr

Type: ipaddr

te_frag_id

Type: integer

te_rtr_id

Type: ipaddr

te_link_type

Type: string

te_link_id

Type: string

te_link_metric

Type: integer

te_link_max_bw

Type: string

te_link_rsv_bw

Type: string

te_link_unrsv_bw

Type: string

te_link_admin

Type: string

te_num_links

Type: integer

Command Modes

- /exec

show ip ospf ha

show ip ospf [tag] ha [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname stateful pss_restored pss_state gr_enabled gr_grace_period gr_state gr_last_status gr_helper_mode ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ha

High Availability status

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

stateful

enabled  value: 0

disabled  value: 1

pss_restored

Type: bool

pss_state

disable  value: 0

standby  value: 1

recovering  value: 2

active  value: 3

gr_enabled

Type: bool

gr_grace_period

Type: duration

gr_state

Active  value: 0

Inactive  value: 1

gr_last_status

Type: string

gr_helper_mode

Type: bool

Command Modes

- /exec

show ip ospf interface

show ip ospf [tag] interface [ interface | vrf { vrf-name | vrf-known-name | all } ] [private] [ __readonly__ TABLE_ctx ptag cname [ TABLE_intf ifname admin_status proto_status addr [masklen] area [if_cfg] state_str type_str cost [bfd_enabled] [ldp_sync] index [passive] [mpls] [transmit_delay] [if_priority] [dr_rid] [dr_addr] [bdr_rid] [bdr_addr] [nbr_total] [nbr_flood] [nbr_adjs] [gr_nbr] [hello_interval] [dead_interval] [wait_interval] [rxmt_interval] [hello_timer] [wait_timer] [pacing_timer] [lsu_timer] [lsack_timer] [netlsa_throt_timer] [auth_type] [keychain_name] [keychain_ready] [auth_md5_keyid] [link_lsa_cnt] [link_lsa_crc] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

interface

OSPF enabled interface

interface

Type: interface

OSPF enabled interface

private

Developer-only statistics

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_intf

ifname

Type: interface

admin_status

up  value: 0

down  value: 1

proto_status

up  value: 0

down  value: 1

addr

Type: ipaddr

masklen

Type: integer

area

Type: string

if_cfg

Type: bool

state_str

UNKNOWN  value: 0

DOWN  value: 1

LOOPBACK  value: 2

WAITING  value: 3

P2P  value: 4

DROTHER  value: 5

BDR  value: 6

DR  value: 7

type_str

UNKNOWN  value: 0

LOOPBACK  value: 1

P2P  value: 2

P2MP  value: 3

NBMA  value: 4

BROADCAST  value: 5

cost

Type: integer

bfd_enabled

Type: bool

ldp_sync

Type: bool

index

Type: integer

passive

Type: bool

mpls

Type: bool

transmit_delay

Type: integer

if_priority

Type: integer

dr_rid

Type: ipaddr

dr_addr

Type: ipaddr

bdr_rid

Type: ipaddr

bdr_addr

Type: ipaddr

nbr_total

Type: integer

nbr_flood

Type: integer

nbr_adjs

Type: integer

gr_nbr

Type: integer

hello_interval

Type: integer

dead_interval

Type: integer

wait_interval

Type: integer

rxmt_interval

Type: integer

hello_timer

Type: duration

wait_timer

Type: duration

pacing_timer

Type: duration

lsu_timer

Type: duration

lsack_timer

Type: duration

netlsa_throt_timer

Type: duration

auth_type

none  value: 0

simple  value: 1

md5  value: 2

keychain_name

Type: string

keychain_ready

Type: bool

auth_md5_keyid

Type: integer

link_lsa_cnt

Type: integer

link_lsa_crc

Type: integer

Command Modes

- /exec

show ip ospf interface brief

show ip ospf [tag] interface brief [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname intf_count TABLE_intf ifname index area cost state_str nbr_total admin_status ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

interface

OSPF enabled interface

brief

Display summary of OSPF interfaces

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

intf_count

Type: integer

TABLE_intf

ifname

Type: interface

index

Type: uinteger

area

Type: string

cost

Type: uinteger

state_str

UNKNOWN  value: 0

DOWN  value: 1

LOOPBACK  value: 2

WAITING  value: 3

P2P  value: 4

DROTHER  value: 5

BDR  value: 6

DR  value: 7

nbr_total

Type: integer

admin_status

up  value: 0

down  value: 1

Command Modes

- /exec

show ip ospf lsa-content-changed-list

show ip ospf [tag] lsa-content-changed-list { ip-addr | neighbor-name } interface [ __readonly__ [ TABLE_ctx ptag cname [ TABLE_lschg nbr_rid intf nbr_addr [ TABLE_lsa [type] [lsid] [advrtr] [seqno] [cksum] [age] ] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

lsa-content-changed-list

LSAs that changed contents

interface

Type: interface

OSPF enabled interface

ip-addr

Type: ipaddr

Neighbor router ID

neighbor-name

Type: string

DNS Name of the neighbor

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_lschg

nbr_rid

Type: ipaddr

intf

Type: interface

nbr_addr

Type: ipaddr

TABLE_lsa

type

Type: integer

lsid

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

age

Type: uinteger

Command Modes

- /exec

show ip ospf memory

show ip ospf [tag] memory [ __readonly__ TABLE_mem ptag byte_total byte_consumed byte_overhead byte_allocated alloc_current alloc_created alloc_failed alloc_free bf_current bf_created bf_failed bf_free bf_byte_consumed bf_32_current bf_32_created bf_32_failed bf_32_free bf_32_byte_consumed slab_current slab_created slab_failed slab_free slab_byte_consumed if_index_alloc_failed nbr_index_alloc_failed ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

memory

Memory usage statistics

__readonly__

TABLE_mem

ptag

Type: string

byte_total

Type: integer

byte_consumed

Type: integer

byte_overhead

Type: integer

byte_allocated

Type: uinteger

alloc_current

Type: integer

alloc_created

Type: integer

alloc_failed

Type: integer

alloc_free

Type: integer

bf_current

Type: integer

bf_created

Type: integer

bf_failed

Type: integer

bf_free

Type: integer

bf_byte_consumed

Type: uinteger

bf_32_current

Type: integer

bf_32_created

Type: integer

bf_32_failed

Type: integer

bf_32_free

Type: integer

bf_32_byte_consumed

Type: uinteger

slab_current

Type: integer

slab_created

Type: integer

slab_failed

Type: integer

slab_free

Type: integer

slab_byte_consumed

Type: integer

if_index_alloc_failed

Type: integer

nbr_index_alloc_failed

Type: integer

Command Modes

- /exec

show ip ospf mpls ldp interface

show ip ospf [tag] mpls ldp interface [ interface | vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_ldpintf ifname area ldp_ac ldp_sync state_str type_str ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

mpls

MPLS related information

ldp

LDP related information

interface

OSPF enabled interface

interface

Type: interface

OSPF enabled interface

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_ldpintf

ifname

Type: interface

area

Type: string

ldp_ac

Type: bool

ldp_sync

Type: bool

state_str

unknown  value: 0

down  value: 1

loopback  value: 2

waiting  value: 3

p2p  value: 4

drother  value: 5

bdr  value: 6

dr  value: 7

type_str

unknown  value: 0

loopback  value: 1

p2p  value: 2

p2mp  value: 3

nbma  value: 4

broadcast  value: 5

Command Modes

- /exec

show ip ospf neighbors

show ip ospf [tag] neighbors [ interface [ neighbor | neighbor-name ] | [ neighbor | neighbor-name ] [ vrf { vrf-name | vrf-known-name | all } ] ] [ __readonly__ TABLE_ctx ptag cname nbrcount [ TABLE_nbr rid priority state uptime addr intf [multiarea] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

neighbors

Neighbor list

interface

Type: interface

OSPF enabled interface

neighbor

Type: ipaddr

Router ID of neighbor

neighbor-name

Type: string

DNS Name of the neighbor

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

nbrcount

Type: integer

TABLE_nbr

rid

Type: ipaddr

priority

Type: integer

state

UNKNOWN  value: 0

DOWN  value: 1

ATTEMPT  value: 2

INIT  value: 3

TWOWAY  value: 4

EXSTART  value: 5

EXCHANGE  value: 6

LOADING  value: 7

FULL  value: 8

uptime

Type: duration

addr

Type: ipaddr

intf

Type: interface

multiarea

Type: bool

Command Modes

- /exec

show ip ospf neighbors detail

show ip ospf [tag] neighbors [interface] [ neighbor | neighbor-name ] detail [ vrf { vrf-name | vrf-known-name | all } ] [private] [ __readonly__ TABLE_ctx ptag cname [ TABLE_nbr rid addr area intf state transition lastchange [bfd_state] [priority] [ifid] [dr] [dc] [bdr] [master] [seqno] [dbdallsentacked] [dbdallsent] [dbdallacked] [lsaonreqlist] [lsafromlastreq] [lsreqrxmts] helloptions dbdoptions lastnonhello [deadtimer] [pacingtimer] [dbdrxmtimer] [reqrxmtimer] [lsutimer] [rerxmtimer] [fastrerxmtimer] [lsacktimer] [grtimer] [helpermode] [helpercand] [helperterm] [senddbd] [sendlsreq] [sendlsu] [sendlsurxmt] [sendlsack] [sendlsreqreply] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

neighbors

Neighbor list

interface

Type: interface

OSPF enabled interface

neighbor

Type: ipaddr

Router ID of neighbor

neighbor-name

Type: string

DNS Name of the neighbor

detail

Show detailed neighbor display

private

Developer-only statistics

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_nbr

rid

Type: ipaddr

addr

Type: ipaddr

area

Type: string

intf

Type: interface

state

UNKNOWN  value: 0

DOWN  value: 1

ATTEMPT  value: 2

INIT  value: 3

TWOWAY  value: 4

EXSTART  value: 5

EXCHANGE  value: 6

LOADING  value: 7

FULL  value: 8

transition

Type: integer

lastchange

Type: duration

bfd_state

Type: string

priority

Type: integer

ifid

Type: integer

dr

Type: ipaddr

bdr

Type: ipaddr

master

master  value: 0

slave  value: 1

seqno

Type: integer

dbdallsentacked

Type: bool

dbdallsent

Type: bool

dbdallacked

Type: bool

lsaonreqlist

Type: integer

lsafromlastreq

Type: integer

lsreqrxmts

Type: integer

helloptions

Type: hex

dbdoptions

Type: hex

lastnonhello

Type: duration

deadtimer

Type: duration

pacingtimer

Type: duration

dbdrxmtimer

Type: duration

reqrxmtimer

Type: duration

lsutimer

Type: duration

rerxmtimer

Type: duration

fastrerxmtimer

Type: duration

lsacktimer

Type: duration

grtimer

Type: duration

helpermode

Type: bool

helpercand

Type: bool

helperterm

Type: bool

senddbd

Type: bool

sendlsreq

Type: bool

sendlsu

Type: bool

sendlsurxmt

Type: bool

sendlsack

Type: bool

sendlsreqreply

Type: bool

dc

Type: bool

Command Modes

- /exec

show ip ospf neighbors summary

show ip ospf [tag] neighbors [interface] summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname TABLE_intf { ifname | total } down attempt init twoway exstart exchange loading full if_total ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

neighbors

Neighbor list

interface

Type: interface

OSPF enabled interface

summary

Summary of neighbors

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_intf

ifname

Type: interface

total

Type: bool

down

Type: integer

attempt

Type: integer

init

Type: integer

twoway

Type: integer

exstart

Type: integer

exchange

Type: integer

loading

Type: integer

full

Type: integer

if_total

Type: integer

Command Modes

- /exec

show ip ospf policy statistics

show ip ospf [inst] policy statistics { redistribute { { bgp | eigrp } as | { isis | ospf | rip } tag | static | direct | amt } | area area-id-ip filter-list { in | out } } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ ptag TABLE_ctx cname ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

inst

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

policy

Display Policy related information

statistics

Display Route Filter statistics

redistribute

Statistics for redistribution

isis

ISO Intermediate-to-Intermediate (IS-IS)

bgp

Border Gateway Protocol (BGP)

as

Type: integer

min: 1  max: 65535

Autonomous system number

ospf

Open Shortest Path First (OSPFv2)

eigrp

Enhanced Interior Gateway Protocol (EIGRP)

rip

Routing Information Protocol (RIP)

static

Static

direct

Directly connected

amt

AMT anycast prefix

tag

Type: string

Source protocol tag

area

Configure area properties

area-id-ip

Type: ipaddr

Area Id as an integer or ip address

filter-list

Filter prefixes between OSPF areas

in

Filter networks sent to this area

out

Filter networks sent from this area

__readonly__

ptag

Type: string

TABLE_ctx

cname

Type: string

Command Modes

- /exec

show ip ospf request-list

show ip ospf [tag] request-list { ip-addr | neighbor-name } interface [ __readonly__ [ TABLE_ctx ptag cname [ TABLE_lsreq nbr_rid intf nbr_addr total [ TABLE_lsa [type] [lsid] [advrtr] [seqno] [cksum] [age] ] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

request-list

Link state request list

interface

Type: interface

OSPF enabled interface

ip-addr

Type: ipaddr

Neighbor router ID

neighbor-name

Type: string

DNS Name of the neighbor

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_lsreq

nbr_rid

Type: ipaddr

intf

Type: interface

nbr_addr

Type: ipaddr

total

Type: integer

TABLE_lsa

type

Type: integer

lsid

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

age

Type: uinteger

Command Modes

- /exec

show ip ospf retransmission-list

show ip ospf [tag] retransmission-list { routerid | router-name } interface [ __readonly__ [ TABLE_ctx ptag cname [ TABLE_rxmit nbr_rid intf nbr_addr [timer_running] [timer_due] [ TABLE_lsa [type] [lsid] [advrtr] [seqno] [cksum] [age] ] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

retransmission-list

Link state retransmission list

routerid

Type: ipaddr

Neighbor router ID

router-name

Type: string

DNS Name of the router

interface

Type: interface

OSPF enabled interface

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_rxmit

nbr_rid

Type: ipaddr

intf

Type: interface

nbr_addr

Type: ipaddr

timer_running

Type: bool

timer_due

Type: duration

TABLE_lsa

type

Type: integer

lsid

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

age

Type: uinteger

Command Modes

- /exec

show ip ospf route

show ip ospf [tag] route [ ip-addr | ip-prefix [longer-prefixes] ] [all_routes] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [hdr_addr] [hdr_masklen] [ TABLE_route addr masklen type in_rib direct [area] [tag] [vlink_unresolved] [ TABLE_route_ubest_nh [ubest_nh_addr] [ubest_nh_intf] [ubest_cost] [distance] [ubest_nh_direct] ] [ TABLE_route_mbest_nh [mbest_nh_addr] [mbest_nh_intf] [mbest_cost] [mbest_nh_direct] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

route

Internal OSPF routes

ip-addr

Type: ipaddr

Show single OSPF route

ip-prefix

Type: ipprefix

Show single exact match OSPF route

longer-prefixes

Show exact match and more specific routes

all_routes

Display all OSPF routes

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

hdr_addr

Type: ipaddr

hdr_masklen

Type: integer

TABLE_route

addr

Type: ipaddr

masklen

Type: integer

type

nopath  value: 0

discard-internal  value: 1

discard-external  value: 2

intra  value: 3

inter  value: 4

type-1  value: 5

nssa type-1  value: 6

type-2  value: 7

nssa type-2  value: 8

unknown  value: 9

in_rib

Type: bool

direct

Type: bool

area

Type: string

tag

Type: uinteger

vlink_unresolved

Type: bool

TABLE_route_ubest_nh

ubest_nh_addr

Type: ipaddr

ubest_nh_intf

Type: interface

ubest_cost

Type: uinteger

distance

Type: integer

ubest_nh_direct

Type: bool

TABLE_route_mbest_nh

mbest_nh_addr

Type: ipaddr

mbest_nh_intf

Type: interface

mbest_cost

Type: uinteger

mbest_nh_direct

Type: bool

Command Modes

- /exec

show ip ospf route summary

show ip ospf [tag] route [ ip-prefix [longer-prefixes] ] summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_route total_routes total_paths [ TABLE_route_type path_type path_routes path_paths ] [ TABLE_route_masklen masklen masklen_routes masklen_paths ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

route

Internal OSPF routes

ip-prefix

Type: ipprefix

Show single exact match OSPF route

longer-prefixes

Show exact match and more specific routes

summary

Show route counts

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_route

total_routes

Type: integer

total_paths

Type: integer

TABLE_route_type

path_type

nopath  value: 0

discard-internal  value: 1

discard-external  value: 2

intra  value: 3

inter  value: 4

type-1  value: 5

nssa type-1  value: 6

type-2  value: 7

nssa type-2  value: 8

unknown  value: 9

path_routes

Type: integer

path_paths

Type: integer

TABLE_route_masklen

masklen

Type: integer

masklen_routes

Type: integer

masklen_paths

Type: integer

Command Modes

- /exec

show ip ospf sham-links

show ip ospf [tag] sham-links [brief] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_slink name [nbr_rid] if_state transit_area nh_intf nbr_addr [transit_area_stub] [transit_area_nssa] addr [masklen] area [if_cfg] state_str type_str cost [bfd_enabled] index [passive] [mpls] [transmit_delay] [if_priority] [dr_rid] [dr_addr] [bdr_rid] [bdr_addr] [nbr_total] [nbr_flood] [nbr_adjs] [gr_nbr] [hello_interval] [dead_interval] [wait_interval] [rxmt_interval] [sum_total] [hello_timer] [wait_timer] [pacing_timer] [lsu_timer] [lsack_timer] [netlsa_throt_timer] [auth_type] [keychain_name] [keychain_ready] [auth_md5_keyid] [link_lsa_cnt] [link_lsa_crc] [dc_enabled] [dest_ip] [src_ip] [ifnum] [state] [transition] [lastchange] [priority] [ifid] [dr] [bdr] [master] [seqno] [dbdallsentacked] [dbdallsent] [dbdallacked] [lsaonreqlist] [lsafromlastreq] [lsreqrxmts] [helloptions] [dbdoptions] [lastnonhello] [deadtimer] [pacingtimer] [dbdrxmtimer] [reqrxmtimer] [lsutimer] [rerxmtimer] [fastrerxmtimer] [lsacktimer] [grtimer] [helpermode] [helpercand] [helperterm] [senddbd] [sendlsreq] [sendlsu] [sendlsurxmt] [sendlsack] [sendlsreqreply] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

sham-links

Sham link information Not available in this release.

brief

Display summary of OSPF sham links

__readonly__

ptag

Type: string

TABLE_ctx

cname

Type: string

TABLE_slink

name

Type: string

nbr_rid

Type: ipaddr

if_state

up  value: 0

down  value: 1

transit_area

Type: string

nh_intf

Type: interface

dc_enabled

Type: bool

nbr_addr

Type: ipaddr

sum_total

Type: integer

transit_area_stub

Type: bool

transit_area_nssa

Type: bool

addr

Type: ipaddr

masklen

Type: integer

area

Type: string

if_cfg

Type: bool

state_str

uknown  value: 0

down  value: 1

loopback  value: 2

waiting  value: 3

p2p  value: 4

drother  value: 5

bdr  value: 6

dr  value: 7

type_str

unknown  value: 0

loopback  value: 1

p2p  value: 2

p2mp  value: 3

nbma  value: 4

broadcast  value: 5

cost

Type: integer

bfd_enabled

Type: bool

index

Type: integer

passive

Type: bool

mpls

Type: bool

transmit_delay

Type: integer

if_priority

Type: integer

dr_rid

Type: ipaddr

dr_addr

Type: ipaddr

bdr_rid

Type: ipaddr

bdr_addr

Type: ipaddr

nbr_total

Type: integer

nbr_flood

Type: integer

nbr_adjs

Type: integer

gr_nbr

Type: integer

hello_interval

Type: integer

dead_interval

Type: integer

wait_interval

Type: integer

rxmt_interval

Type: integer

hello_timer

Type: duration

wait_timer

Type: duration

pacing_timer

Type: duration

lsu_timer

Type: duration

lsack_timer

Type: duration

netlsa_throt_timer

Type: duration

auth_type

none  value: 0

simple  value: 1

md5  value: 2

keychain_name

Type: string

keychain_ready

Type: bool

auth_md5_keyid

Type: integer

link_lsa_cnt

Type: integer

link_lsa_crc

Type: integer

state

unknown  value: 0

down  value: 1

attempt  value: 2

init  value: 3

twoway  value: 4

exstart  value: 5

exchange  value: 6

loading  value: 7

full  value: 8

transition

Type: integer

lastchange

Type: duration

priority

Type: integer

ifid

Type: integer

dr

Type: ipaddr

bdr

Type: ipaddr

master

master  value: 0

slave  value: 1

seqno

Type: integer

dbdallsentacked

Type: bool

dbdallsent

Type: bool

dbdallacked

Type: bool

lsaonreqlist

Type: integer

lsafromlastreq

Type: integer

lsreqrxmts

Type: integer

helloptions

Type: integer

dbdoptions

Type: integer

lastnonhello

Type: duration

deadtimer

Type: duration

pacingtimer

Type: duration

dbdrxmtimer

Type: duration

reqrxmtimer

Type: duration

lsutimer

Type: duration

rerxmtimer

Type: duration

fastrerxmtimer

Type: duration

lsacktimer

Type: duration

grtimer

Type: duration

helpermode

Type: bool

helpercand

Type: bool

helperterm

Type: bool

senddbd

Type: bool

sendlsreq

Type: bool

sendlsu

Type: bool

sendlsurxmt

Type: bool

sendlsack

Type: bool

sendlsreqreply

Type: bool

dest_ip

Type: ipaddr

src_ip

Type: ipaddr

ifnum

Type: integer

ifstate

Type: string

Command Modes

- /exec

show ip ospf statistics

show ip ospf [tag] statistics [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_stats ptag cname last_clear rid_change dr_elections older_lsa_recv nbr_state_change nbr_dead_postpone nbr_dead_expire nbr_bad_lsreq nbr_seqno_mismatch spf_full spf_summary spf_external spf_extsummary rtr_generate rtr_refresh rtr_flush rtr_other_flush net_generate net_refresh net_flush net_other_flush sum_generate sum_refresh sum_flush sum_other_flush asbr_generate asbr_refresh asbr_flush asbr_other_flush asext_generate asext_refresh asext_flush asext_other_flush opaque_link_generate opaque_link_refresh opaque_link_flush opaque_link_other_flush opaque_area_generate opaque_area_refresh opaque_area_flush opaque_area_other_flush opaque_as_generate opaque_as_refresh opaque_as_flush opaque_as_other_flush limbo_lsa_count limbo_lsa_hwm limbo_lsa_deleted limbo_lsa_revived limbo_runs limbo_lsa_last_time_hwm [limbo_timer] helloq_size helloq_max_size helloq_hwm helloq_drops helloq_last_hwm_time floodq_size floodq_max_size floodq_hwm floodq_drops floodq_last_hwm_time lsdb_add_fail [ TABLE_buffer_detail [buf_size] [buf_size_huge] buf_in_use buf_hwm buf_perm buf_alloc buf_free ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

statistics

Event counters

__readonly__

TABLE_stats

ptag

Type: string

cname

Type: string

last_clear

Type: duration

rid_change

Type: integer

dr_elections

Type: integer

older_lsa_recv

Type: integer

nbr_state_change

Type: integer

nbr_dead_postpone

Type: integer

nbr_dead_expire

Type: integer

nbr_bad_lsreq

Type: integer

nbr_seqno_mismatch

Type: integer

spf_full

Type: integer

spf_summary

Type: integer

spf_external

Type: integer

spf_extsummary

Type: integer

rtr_generate

Type: integer

rtr_refresh

Type: integer

rtr_flush

Type: integer

rtr_other_flush

Type: integer

net_generate

Type: integer

net_refresh

Type: integer

net_flush

Type: integer

net_other_flush

Type: integer

sum_generate

Type: integer

sum_refresh

Type: integer

sum_flush

Type: integer

sum_other_flush

Type: integer

asbr_generate

Type: integer

asbr_refresh

Type: integer

asbr_flush

Type: integer

asbr_other_flush

Type: integer

asext_generate

Type: integer

asext_refresh

Type: integer

asext_flush

Type: integer

asext_other_flush

Type: integer

opaque_link_generate

Type: integer

opaque_link_refresh

Type: integer

opaque_link_flush

Type: integer

opaque_link_other_flush

Type: integer

opaque_area_generate

Type: integer

opaque_area_refresh

Type: integer

opaque_area_flush

Type: integer

opaque_area_other_flush

Type: integer

opaque_as_generate

Type: integer

opaque_as_refresh

Type: integer

opaque_as_flush

Type: integer

opaque_as_other_flush

Type: integer

limbo_lsa_count

Type: integer

limbo_lsa_hwm

Type: integer

limbo_lsa_deleted

Type: integer

limbo_lsa_revived

Type: integer

limbo_runs

Type: integer

limbo_lsa_last_time_hwm

Type: string

limbo_timer

Type: duration

helloq_size

Type: integer

helloq_max_size

Type: integer

helloq_hwm

Type: integer

helloq_drops

Type: integer

helloq_last_hwm_time

Type: string

floodq_size

Type: integer

floodq_max_size

Type: integer

floodq_hwm

Type: integer

floodq_drops

Type: integer

floodq_last_hwm_time

Type: string

lsdb_add_fail

Type: integer

TABLE_buffer_detail

buf_size

Type: integer

buf_size_huge

Type: bool

buf_in_use

Type: integer

buf_hwm

Type: integer

buf_perm

Type: integer

buf_alloc

Type: integer

buf_free

Type: integer

Command Modes

- /exec

show ip ospf summary-address

show ip ospf [tag] summary-address [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_ctx ptag cname rid [ TABLE_sum addr masklen [metric] [tag] [pending] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

summary-address

Summary-address redistribution information

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

rid

Type: ipaddr

TABLE_sum

addr

Type: ipaddr

masklen

Type: integer

metric

Type: integer

tag

Type: uinteger

pending

Type: bool

Command Modes

- /exec

show ip ospf traffic

show ip ospf [tag] traffic [ interface [detail] | [detail] | [detail] vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_traf ptag cname last_clear [ifname] pkt_in pkt_out lsu_first_trans lsu_retrans lsu_for_lsreq lsu_nbr_trans throttle_out throttle_out_token throttle_out_ip lsa_ignored lsa_dropped_spf lsa_dropped_gr pkt_drops_in pkt_drops_out pkt_errors_in pkt_errors_out hello_errors_in dbds_errors_in lsreqs_errors_in lsus_errors_in lsacks_errors_in pkt_unknown_in pkt_unknown_out pkt_no_ospf_intf bad_version bad_crc dup_rtr_id dup_src_addr invalid_src_addr invalid_dst_addr non_existing_nbr pkt_passive_intf wrong_area invalid_pkt_len nbr_changed_routerid_ipaddr [bad_auth] [bad_reserved] [pkt_no_vrf] hellos_in dbds_in lsreqs_in lsus_in lsacks_in hellos_out dbds_out lsreqs_out lsus_out lsacks_out [ hellos_in_hq dbds_in_hq lsreqs_in_flq lsus_in_flq lsacks_in_flq lsas_in_dbds_in lsas_in_lsreqs_in lsas_in_lsus_in lsas_in_lsacks_in lsas_in_dbds_out lsas_in_lsreqs_out lsas_in_lsus_out lsas_in_lsacks_out lsas_in_rxmt_lsus_out ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

interface

Type: interface

OSPF enabled interface

detail

Display detailed information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

traffic

Packet counters

__readonly__

TABLE_traf

ptag

Type: string

cname

Type: string

last_clear

Type: duration

ifname

Type: interface

pkt_in

Type: integer

pkt_out

Type: integer

lsu_first_trans

Type: integer

lsu_retrans

Type: integer

lsu_for_lsreq

Type: integer

lsu_nbr_trans

Type: integer

throttle_out

Type: integer

throttle_out_token

Type: integer

throttle_out_ip

Type: integer

lsa_ignored

Type: integer

lsa_dropped_spf

Type: integer

lsa_dropped_gr

Type: integer

pkt_drops_in

Type: integer

pkt_drops_out

Type: integer

pkt_errors_in

Type: integer

pkt_errors_out

Type: integer

hello_errors_in

Type: integer

dbds_errors_in

Type: integer

lsreqs_errors_in

Type: integer

lsus_errors_in

Type: integer

lsacks_errors_in

Type: integer

pkt_unknown_in

Type: integer

pkt_unknown_out

Type: integer

pkt_no_ospf_intf

Type: integer

bad_version

Type: integer

bad_crc

Type: integer

dup_rtr_id

Type: integer

dup_src_addr

Type: integer

invalid_src_addr

Type: integer

invalid_dst_addr

Type: integer

non_existing_nbr

Type: integer

pkt_passive_intf

Type: integer

wrong_area

Type: integer

invalid_pkt_len

Type: integer

nbr_changed_routerid_ipaddr

Type: integer

bad_auth

Type: integer

bad_reserved

Type: integer

pkt_no_vrf

Type: integer

hellos_in

Type: integer

dbds_in

Type: integer

lsreqs_in

Type: integer

lsus_in

Type: integer

lsacks_in

Type: integer

hellos_out

Type: integer

dbds_out

Type: integer

lsreqs_out

Type: integer

lsus_out

Type: integer

lsacks_out

Type: integer

hellos_in_hq

Type: integer

dbds_in_hq

Type: integer

lsreqs_in_flq

Type: integer

lsus_in_flq

Type: integer

lsacks_in_flq

Type: integer

lsas_in_dbds_in

Type: integer

lsas_in_lsreqs_in

Type: integer

lsas_in_lsus_in

Type: integer

lsas_in_lsacks_in

Type: integer

lsas_in_dbds_out

Type: integer

lsas_in_lsreqs_out

Type: integer

lsas_in_lsus_out

Type: integer

lsas_in_lsacks_out

Type: integer

lsas_in_rxmt_lsus_out

Type: integer

Command Modes

- /exec

show ip ospf traps-queue

show ip ospf [tag] traps-queue

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

traps-queue

Show all the priority traps queue parameters

Command Modes

- /exec

show ip ospf virtual-links

show ip ospf [tag] virtual-links [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_vlink name nbr_rid if_state transit_area nh_intf nbr_addr [transit_area_stub] [transit_area_nssa] addr [masklen] area [if_cfg] state_str type_str cost index [passive] [mpls] [transmit_delay] [if_priority] [dr_rid] [dr_addr] [bdr_rid] [bdr_addr] [nbr_total] [nbr_flood] [nbr_adjs] [gr_nbr] [hello_interval] [dead_interval] [wait_interval] [rxmt_interval] [hello_timer] [wait_timer] [pacing_timer] [lsu_timer] [lsack_timer] [netlsa_throt_timer] [auth_type] [keychain_name] [keychain_ready] [auth_md5_keyid] [link_lsa_cnt] [link_lsa_crc] [dc_enabled] [state] [transition] [lastchange] [priority] [ifid] [dr] [bdr] [master] [seqno] [dbdallsentacked] [dbdallsent] [dbdallacked] [lsaonreqlist] [lsafromlastreq] [lsreqrxmts] [helloptions] [dbdoptions] [lastnonhello] [deadtimer] [pacingtimer] [dbdrxmtimer] [reqrxmtimer] [lsutimer] [rerxmtimer] [fastrerxmtimer] [lsacktimer] [grtimer] [helpermode] [helpercand] [helperterm] [senddbd] [sendlsreq] [sendlsu] [sendlsurxmt] [sendlsack] [sendlsreqreply] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

virtual-links

Virtual link information

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_vlink

name

Type: string

nbr_rid

Type: ipaddr

if_state

up  value: 0

down  value: 1

transit_area

Type: string

nh_intf

Type: interface

dc_enabled

Type: bool

nbr_addr

Type: ipaddr

transit_area_stub

Type: bool

transit_area_nssa

Type: bool

addr

Type: ipaddr

masklen

Type: integer

area

Type: string

if_cfg

Type: bool

state_str

UNKNOWN  value: 0

DOWN  value: 1

LOOPBACK  value: 2

WAITING  value: 3

P2P  value: 4

DROTHER  value: 5

BDR  value: 6

DR  value: 7

type_str

UNKNOWN  value: 0

LOOPBACK  value: 1

P2P  value: 2

P2MP  value: 3

NBMA  value: 4

BROADCAST  value: 5

cost

Type: integer

index

Type: integer

passive

Type: bool

mpls

Type: bool

transmit_delay

Type: integer

if_priority

Type: integer

dr_rid

Type: ipaddr

dr_addr

Type: ipaddr

bdr_rid

Type: ipaddr

bdr_addr

Type: ipaddr

nbr_total

Type: integer

nbr_flood

Type: integer

nbr_adjs

Type: integer

gr_nbr

Type: integer

hello_interval

Type: integer

dead_interval

Type: integer

wait_interval

Type: integer

rxmt_interval

Type: integer

hello_timer

Type: duration

wait_timer

Type: duration

pacing_timer

Type: duration

lsu_timer

Type: duration

lsack_timer

Type: duration

netlsa_throt_timer

Type: duration

auth_type

none  value: 0

simple  value: 1

md5  value: 2

keychain_name

Type: string

keychain_ready

Type: bool

auth_md5_keyid

Type: integer

link_lsa_cnt

Type: integer

link_lsa_crc

Type: integer

state

unknown  value: 0

down  value: 1

attempt  value: 2

init  value: 3

twoway  value: 4

exstart  value: 5

exchange  value: 6

loading  value: 7

full  value: 8

transition

Type: integer

lastchange

Type: duration

priority

Type: integer

ifid

Type: integer

dr

Type: ipaddr

bdr

Type: ipaddr

master

master  value: 0

slave  value: 1

seqno

Type: integer

dbdallsentacked

Type: bool

dbdallsent

Type: bool

dbdallacked

Type: bool

lsaonreqlist

Type: integer

lsafromlastreq

Type: integer

lsreqrxmts

Type: integer

helloptions

Type: integer

dbdoptions

Type: integer

lastnonhello

Type: duration

deadtimer

Type: duration

pacingtimer

Type: duration

dbdrxmtimer

Type: duration

reqrxmtimer

Type: duration

lsutimer

Type: duration

rerxmtimer

Type: duration

fastrerxmtimer

Type: duration

lsacktimer

Type: duration

grtimer

Type: duration

helpermode

Type: bool

helpercand

Type: bool

helperterm

Type: bool

senddbd

Type: bool

sendlsreq

Type: bool

sendlsu

Type: bool

sendlsurxmt

Type: bool

sendlsack

Type: bool

sendlsreqreply

Type: bool

Command Modes

- /exec

show ip ospf virtual-links brief

show ip ospf [tag] virtual-links brief [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname vlink_count [ TABLE_vlink nbr_rid vlink_num transit_area cost if_state ] ]

Syntax Description

show

Show running system information

ip

Display IP information

ospf

Display OSPF status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

virtual-links

Virtual link information

brief

Display summary of OSPF virtual links

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

vlink_count

Type: integer

TABLE_vlink

nbr_rid

Type: ipaddr

vlink_num

Type: uinteger

transit_area

Type: string

cost

Type: integer

if_state

up  value: 0

down  value: 1

Command Modes

- /exec

show ip pim bitfield

show ip pim bitfield

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

bitfield

Display compressed bitfield details

Command Modes

- /exec

show ip pim config-sanity

show ip pim config-sanity

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

config-sanity

Configuration Sanity check

Command Modes

- /exec

show ip pim group-range

show ip pim group-range [group] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context TABLE_group grp-addr invalid-grp mode rp-addr sh-tree-only-range action ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

group-range

Display the various group-ranges

group

Type: ipaddr

IP address of group to display

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

TABLE_group

invalid-grp

Type: bool

grp-addr

Type: ipaddr

mode

rp-addr

Type: ipaddr

sh-tree-only-range

Type: ipprefix

action

Command Modes

- /exec

show ip pim lisp encap

show ip pim lisp encap [ __readonly__ TABLE_index index source-rloc dest-rloc ref-count ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

lisp

LISP related information

encap

All the encap indices

__readonly__

TABLE_index

index

Type: uinteger

source-rloc

Type: ipaddr

dest-rloc

Type: ipaddr

ref-count

Type: uinteger

Command Modes

- /exec

show ip pim mdt

show ip pim mdt [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf out_context mti mti_status default_mdt_grp grp_mode asm_shared_tree mti_config_mtu mti_active_mtu mdt_src_if bgp_update_src_if hello_interval jp_interval data_mdt_join_interval data_switchover_interval data_holddown_interval data_timeout_interval mdt_src mdt_src_if bgp_rd bgp_rd_set send_join_count rcvd_join_count TABLE_data_mdt grange_prefix grange_mask_len threshold [policy_name] ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

mdt

Display MDT information Not available in this release.

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

out_context

Type: string

mti

Type: interface

mti_status

Type: string

default_mdt_grp

Type: ipaddr

grp_mode

Type: string

asm_shared_tree

Type: string

mti_config_mtu

Type: uinteger

mti_active_mtu

Type: uinteger

mdt_src_if

Type: interface

bgp_update_src_if

Type: interface

hello_interval

Type: uinteger

jp_interval

Type: uinteger

data_mdt_join_interval

Type: uinteger

data_switchover_interval

Type: uinteger

data_holddown_interval

Type: uinteger

data_timeout_interval

Type: uinteger

mdt_src

Type: ipaddr

mdt_src_if

Type: interface

bgp_rd

Type: string

bgp_rd_set

Type: string

send_join_count

Type: uinteger

rcvd_join_count

Type: uinteger

TABLE_data_mdt

grange_prefix

Type: ipaddr

grange_mask_len

Type: uinteger

threshold

Type: uinteger

policy_name

Type: string

Command Modes

- /exec

show ip pim mdt bgp

show ip pim mdt bgp [ mdt-source src-addr ] [ __readonly__ TABLE_entry bgp_rd mdt_src mdt_grp local ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

mdt

Display MDT information Not available in this release.

bgp

Display BGP related information

mdt-source

Source address of MVPN neighbor

src-addr

Type: ipaddr

Source Address

__readonly__

TABLE_entry

bgp_rd

Type: string

mdt_src

Type: ipaddr

mdt_grp

Type: ipaddr

local

Type: string

Command Modes

- /exec

show ip pim mdt history interval

show ip pim mdt history interval min [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf out_context [ TABLE_entry csrc cgrp psrc pgrp uptime send_count ] ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

mdt

Display MDT information Not available in this release.

history

Display MDT Data Join Send Histoy

interval

Display in specified interval

min

Type: uinteger

min: 1  max: 18724286

Minutes

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

out_context

Type: string

TABLE_entry

csrc

Type: ipaddr

cgrp

Type: ipaddr

psrc

Type: ipaddr

pgrp

Type: ipaddr

uptime

Type: duration

send_count

Type: uinteger

Command Modes

- /exec

show ip pim mdt receive

show ip pim mdt receive [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf out_context [ TABLE_entry csrc cgrp psrc pgrp uptime expires recv_count ] ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

mdt

Display MDT information Not available in this release.

receive

Display Received Data Joins Information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

detail

Display detailed information

__readonly__

TABLE_vrf

out_context

Type: string

TABLE_entry

csrc

Type: ipaddr

cgrp

Type: ipaddr

psrc

Type: ipaddr

pgrp

Type: ipaddr

uptime

Type: duration

expires

Type: duration

recv_count

Type: uinteger

Command Modes

- /exec

show ip pim mdt send

show ip pim mdt send [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf out_context [ TABLE_entry csrc cgrp psrc pgrp uptime send_count ] ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

mdt

Display MDT information Not available in this release.

send

Display MDT Data Join Send Information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

detail

Display detailed information

__readonly__

TABLE_vrf

out_context

Type: string

TABLE_entry

csrc

Type: ipaddr

cgrp

Type: ipaddr

psrc

Type: ipaddr

pgrp

Type: ipaddr

uptime

Type: duration

send_count

Type: uinteger

Command Modes

- /exec

show ip pim oif-list

show ip pim oif-list group [source] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name TABLE_grp mcast-addrs incoming-intf rpf-nbr timeout-interval oif-list-count [ TABLE_oiflist oif-name ] timeout-list-count [ TABLE_timeoutlist timeoutoif-name ] immediate-list-count [ TABLE_immediatelist immediateoif-name ] immediate-timeout-list-count [ TABLE_immediatetimeoutlist immediatetimeoutoif-name ] ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

oif-list

Display interfaces for oif-list of PIM route

source

Type: ipaddr

Source address to display

group

Type: ipaddr

Group address to display

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

vrf-name

Type: vrf

TABLE_grp

mcast-addrs

Type: string

incoming-intf

Type: string

rpf-nbr

Type: ipaddr

timeout-interval

Type: string

oif-list-count

Type: uinteger

TABLE_oiflist

oif-name

Type: string

timeout-list-count

Type: uinteger

TABLE_timeoutlist

timeoutoif-name

Type: string

immediate-list-count

Type: uinteger

TABLE_immediatelist

immediateoif-name

Type: string

immediate-timeout-list-count

Type: uinteger

TABLE_immediatetimeoutlist

immediatetimeoutoif-name

Type: string

Command Modes

- /exec

show ip pim policy statistics (pim)

show ip pim policy statistics { register-policy | bsr { bsr-policy | rp-candidate-policy } | auto-rp { rp-candidate-policy | mapping-agent-policy } } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

PIM global configuration commands

policy

Policy related information

statistics

Policy statistics

register-policy

Show statistics for register-policy

bsr

Bootstrap protocol RP-distribution policy

bsr-policy

Statistics for filtered BSR messages

rp-candidate-policy

Statistics for filtered RP candidate messages

auto-rp

Statistics for auto-rp messages

rp-candidate-policy

Statistics for filtered RP candidate messages

mapping-agent-policy

Statistics for filtered mapping agent messages

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ip pim policy statistics (pim)

show ip pim policy statistics { jp-policy | neighbor-policy } interface

Syntax Description

show

Show running system information

ip

Display IP information

pim

PIM global configuration commands

policy

Policy related information

statistics

Policy statistics

jp-policy

Statistics for jp-policy

neighbor-policy

Statistics for neighbor-policy

interface

Type: interface

Interface to display policy statistics for

Command Modes

- /exec

show ip pim route

show ip pim route { [bitfield] | source group | group [source] [bitfield] } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf context-name route-count TABLE_addr mcast-addrs rp-addr rp-local bidir sgexpire sgrexpire timeleft rp-bit register assert-timeout TABLE_rpf intf-name rpf-nbr-1 rpf-nbr-addr rpf-nbr-2 metric-pref route-metric TABLE_oif count bf-str TABLE_timeout count bf-str TABLE_immediate count bf-str TABLE_immediatetimeout count bf-str timeout-interval jp-holdtime encap-index ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

route

Display PIM specific route information

group

Type: ipaddr

Group address to display

source

Type: ipaddr

Source address to display

bitfield

Display details of each bitfield for PIM route

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

context-name

Type: string

route-count

Type: integer

TABLE_addr

mcast-addrs

Type: string

rp-addr

Type: string

rp-local

Type: string

bidir

Type: bool

sgexpire

Type: string

sgrexpire

Type: string

timeleft

Type: string

rp-bit

Type: bool

register

Type: string

assert-timeout

Type: string

TABLE_rpf

intf-name

Type: string

rpf-nbr-1

Type: string

rpf-nbr-addr

Type: string

rpf-nbr-2

Type: string

metric-pref

Type: integer

route-metric

Type: integer

TABLE_oif

count

Type: integer

bf-str

Type: bool

TABLE_timeout

count

Type: integer

bf-str

Type: bool

TABLE_immediate

count

Type: integer

bf-str

Type: bool

TABLE_immediatetimeout

count

Type: integer

bf-str

Type: bool

timeout-interval

Type: integer

jp-holdtime

Type: integer

encap-index

Type: uinteger

Command Modes

- /exec

show ip pim rp-hash

show ip pim rp-hash group [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context rp-found is-rp-bsr-learnt out-group hash-length out-bsr TABLE_rp rp-addr hash isbest_hash ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

rp-hash

Display RP hash value for group

group

Type: ipaddr

Group address for RP lookup

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

rp-found

Type: bool

is-rp-bsr-learnt

Type: bool

out-group

Type: ipaddr

hash-length

Type: integer

out-bsr

Type: ipaddr

TABLE_rp

rp-addr

Type: ipaddr

hash

Type: uinteger

isbest_hash

Type: bool

Command Modes

- /exec

show ip pim rp

show ip pim rp [group] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context is-bsr-enabled is-bsr-listen-only is-bsr-forward-only are-we-bsr bsr-address is-bsr-address bsr-priority bsr-hash-masklen bs-timer bsr-uptime bsr-expires is-autorp-enabled is-autorp-listen-only is-autorp-forward-only are-we-autorp autorp-address is-autorp-address autorp-dis-timer autorp-up-time autorp-expire-time rp-cand-policy-name bsr-policy-name rp-announce-policy-name rp-discovery-policy-name TABLE_anycast_rp anycast-rp-addr TABLE_arp_rp arp-rp-addr is-rpaddr-local TABLE_rp rp-addr is-rp-in-cib df-ordinal rp-uptime rp-priority autorp-expires bsr-rp-expires autorp-info-src bsr-info-src is-rp-static static-rp-group-map TABLE_grange grange-grp grange-masklen is-bidir-grp is-autorp-rp-owner is-bsr-rp-owner is-static-rp-owner ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

rp

Display PIM RP, Auto-RP, and BSR related information

group

Type: ipaddr

Display RP for group address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

is-bsr-enabled

Type: bool

is-bsr-listen-only

Type: bool

is-bsr-forward-only

Type: bool

are-we-bsr

Type: bool

bsr-address

Type: ipaddr

is-bsr-address

Type: bool

bsr-priority

Type: uinteger

bsr-hash-masklen

Type: uinteger

bs-timer

Type: duration

bsr-uptime

Type: duration

bsr-expires

Type: duration

is-autorp-enabled

Type: bool

is-autorp-listen-only

Type: bool

is-autorp-forward-only

Type: bool

are-we-autorp

Type: bool

autorp-address

Type: ipaddr

is-autorp-address

Type: bool

autorp-dis-timer

Type: duration

autorp-up-time

Type: duration

autorp-expire-time

Type: duration

rp-cand-policy-name

Type: string

bsr-policy-name

Type: string

rp-announce-policy-name

Type: string

rp-discovery-policy-name

Type: string

TABLE_anycast_rp

anycast-rp-addr

Type: ipaddr

TABLE_arp_rp

arp-rp-addr

Type: ipaddr

is-rpaddr-local

Type: bool

TABLE_rp

rp-addr

Type: ipaddr

is-rp-in-cib

Type: bool

df-ordinal

Type: uinteger

rp-uptime

Type: duration

rp-priority

Type: integer

autorp-expires

Type: duration

bsr-rp-expires

Type: duration

autorp-info-src

Type: ipaddr

bsr-info-src

Type: ipaddr

is-rp-static

Type: bool

static-rp-group-map

Type: string

TABLE_grange

grange-grp

Type: ipaddr

grange-masklen

Type: uinteger

is-bidir-grp

Type: bool

is-autorp-rp-owner

Type: bool

is-bsr-rp-owner

Type: bool

is-static-rp-owner

Type: bool

Command Modes

- /exec

show ip pim statistics

show ip pim statistics [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ uptime reg-sent reg-rcvd null-reg-sent null-reg-rcvd reg-stop-sent reg-stop-rcvd reg-rcvd-not-rp reg-rcvd-for-ssm reg-rcvd-for-bidir bootstrap-sent bootstrap-rcvd cand-rp-sent cand-rp-rcvd bs-no-nbr bs-border-deny bs-len-errors bs-rpf-failed bs-no-listen candrp-border-deny candrp-no-listen autorp-announce-sent autorp-announce-rcvd autorp-discovery-sent autorp-discovery-rcvd autorp-rpf-failed autorp-border-deny autorp-invalid-type autorp-ttl-expired autorp-no-listen ctrl-no-route data-no-route no-state create-state ]

Syntax Description

show

Show running system information

ip

Display IP information

pim

Display PIM status and configuration

statistics

Packet counter statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

uptime

Type: duration

reg-sent

Type: uinteger

reg-rcvd

Type: uinteger

null-reg-sent

Type: uinteger

null-reg-rcvd

Type: uinteger

reg-stop-sent

Type: uinteger

reg-stop-rcvd

Type: uinteger

reg-rcvd-not-rp

Type: uinteger

reg-rcvd-for-ssm

Type: uinteger

reg-rcvd-for-bidir

Type: uinteger

bootstrap-sent

Type: uinteger

bootstrap-rcvd

Type: uinteger

cand-rp-sent

Type: uinteger

cand-rp-rcvd

Type: uinteger

bs-no-nbr

Type: uinteger

bs-border-deny

Type: uinteger

bs-len-errors

Type: uinteger

bs-rpf-failed

Type: uinteger

bs-no-listen

Type: uinteger

candrp-border-deny

Type: uinteger

candrp-no-listen

Type: uinteger

autorp-announce-sent

Type: uinteger

autorp-announce-rcvd

Type: uinteger

autorp-discovery-sent

Type: uinteger

autorp-discovery-rcvd

Type: uinteger

autorp-rpf-failed

Type: uinteger

autorp-border-deny

Type: uinteger

autorp-invalid-type

Type: uinteger

autorp-ttl-expired

Type: uinteger

autorp-no-listen

Type: uinteger

ctrl-no-route

Type: uinteger

data-no-route

Type: uinteger

no-state

Type: uinteger

create-state

Type: uinteger

Command Modes

- /exec

show ip policy

show ip policy [ vrf { vrf-name | vrf-known-name | all } ] [detail] [ __readonly__ TABLE_pbr interface rmap status vrf_name ]

Syntax Description

show

Show running system information

ip

Display IP information

policy

Policy routing

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

detail

Detailed information

__readonly__

TABLE_pbr

interface

Type: string

rmap

Type: string

status

Type: string

vrf_name

Type: string

Command Modes

- /exec

show ip prefix-list (bgp)

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } ] } prefix-list { prfxlist-name | test_pol_name } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

prefix-list

Display routes matching the prefix-list

prfxlist-name

Type: string

length: 63

Name of prefix-list

test_pol_name

Type: string

An existing test-list policy

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

Command Modes

- /exec

show ip prefix-list (rpm)

show ip prefix-list { [ detail | summary ] [ ipv4-pfl-name | ipv4-pfl-cfg-name ] | { ipv4-pfl-name | ipv4-pfl-cfg-name } seq seq-no | { ipv4-pfl-name | ipv4-pfl-cfg-name } prefix [ first-match | longer ] } [ __readonly__ TABLE_ip_pfl name seq action rule ]

Syntax Description

show

Show running system information

ip

Display IP information

detail

Show detailed information

summary

Show summarized information

prefix-list

List IP prefix lists

ipv4-pfl-name

Type: string

pattern: [!-~]*

length: 63

Name of prefix-list

ipv4-pfl-cfg-name

Type: string

Known prefix-list name

seq

Sequence number

seq-no

Type: uinteger

min: 1  max: 4294967294

Sequence number

prefix

Type: ipprefix

IP prefix network/length, e.g., 35.0.0.0/8

first-match

Find the first match

longer

Find the more specific entries

__readonly__

TABLE_ip_pfl

name

Type: string

seq

Type: uinteger

action

Type: string

rule

Type: string

Command Modes

- /exec

show ip process

show ip process [api] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_ip_pro_vrf [ pro-cntxt-name pro-cntxt-id pro-base-tid pro-auto-disc pro-atuo-add pro-null-bcast auto-punt-bcast static-disc static-def-route ip-unreach ] [ TABLE_pro_api [ api-vrf api-cntxt-id api-base-tid api-ip-addr api-rtr-id-iod ] ] [ TABLE_iod [ entry-iod ] ] [ TABLE_local_addr [ local-addr ] ] ] [ TABLE_ip_pro_all all-pro-cntxt-name all-pro-cntxt-id ] ]

Syntax Description

show

Show running system information

ip

Display IP information

process

Display IP global information

api

Show api values

vrf

Display per-VRF information

all

Display all VRFs

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_ip_pro_vrf

pro-cntxt-name

Type: string

pro-cntxt-id

Type: longlong

pro-base-tid

Type: integer

pro-auto-disc

Type: string

pro-atuo-add

Type: string

pro-null-bcast

Type: string

auto-punt-bcast

Type: string

static-disc

Type: string

static-def-route

Type: longlong

ip-unreach

Type: longlong

TABLE_pro_api

api-vrf

Type: string

api-cntxt-id

Type: longlong

api-base-tid

Type: integer

api-ip-addr

Type: ipaddr

api-rtr-id-iod

Type: string

TABLE_iod

entry-iod

Type: integer

TABLE_local_addr

local-addr

Type: ipaddr

TABLE_ip_pro_all

all-pro-cntxt-name

Type: string

all-pro-cntxt-id

Type: longlong

Command Modes

- /exec

show ip received-paths

show ip { mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } | all ] } received-paths [private] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

received-paths

Display paths stored for soft-reconfig

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

private

private

Command Modes

- /exec

show ip rip policy statistics redistribute

show ip rip [ instance inst ] policy statistics redistribute { bgp as | { eigrp | isis | src-rip | ospf } tag | direct | static } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP routing protocol status

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

policy

Policy related information

statistics

Policy statistics

redistribute

RIP redistribute routes from other routing protocol

bgp

Border Gateway Protocol (BGP)

eigrp

Enhanced Interior Gateway Routing Protocol (EIGRP)

as

Type: asn

Autonomous system number

isis

Intermediate-to-intermediate (ISIS)

<src-rip>

Routing Information Protocol (RIP)

ospf

Open Shortest Path First (OSPFv2)

tag

Type: string

Process tag

direct

Directly connected routes

static

Static routes

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ip router-id

show ip router-id [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ip

Display IP information

router-id

Display IP router identification

vrf

Display per-VRF information

all

Display all VRFs

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

Command Modes

- /exec

show ip rsvp

show ip rsvp [ __readonly__ [ TABLE_info sup-state ha-ena gr-ena hst-ena glb-router-id psr-ena local-epoch start-type restart-type bundle-ena bundle-time bundle-maxsz refresh-intvl refresh-miss rr-rapid-rexmit-ena refred-ena rr-init-rexmit-delay rr-ack-delay rate-limit-ena rate-limit-cap rate-limit-pace-intvl gr-tmr gr-tmr-expiry ] [ TABLE_auth auth-ena key-src digest seq-winsize challenge lifetime ] [ TABLE_clients clnt-name clnt-sap clnt-type clnt-lxsb clnt-batch-time ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

__readonly__

TABLE_info

sup-state

Type: string

ha-ena

Type: string

gr-ena

Type: bool

hst-ena

Type: bool

glb-router-id

Type: ipaddr

psr-ena

Type: string

local-epoch

Type: hex

start-type

Type: string

restart-type

Type: string

TABLE_auth

auth-ena

Disabled  value: 0

Enabled  value: 1

key-src

Type: string

digest

HMAC MD5 (16)  value: 0

HMAC SHA-1 (20)  value: 1

seq-winsize

Type: integer

challenge

Disabled  value: 0

Enabled  value: 1

lifetime

Type: integer

TABLE_clients

clnt-name

Type: string

clnt-sap

Type: integer

clnt-type

Type: integer

clnt-batch-time

Type: integer

clnt-lxsb

Type: string

bundle-ena

Type: string

bundle-time

Type: integer

bundle-maxsz

Type: integer

refresh-intvl

Type: integer

refresh-miss

Type: integer

refred-ena

Type: string

rr-rapid-rexmit-ena

Type: string

rr-init-rexmit-delay

Type: integer

rr-ack-delay

Type: integer

rate-limit-ena

Type: string

rate-limit-cap

Type: integer

rate-limit-pace-intvl

Type: integer

gr-tmr

Type: string

gr-tmr-expiry

Type: duration

Command Modes

- /exec

show ip rsvp authentication

show ip rsvp authentication [detail] [ interface ifname ] [ from ip_frm ] [ to ip_to ] [ __readonly__ [ TABLE_authentication src dst nbr-ip interface mode key-src key-id code [ TABLE_auth_detail lifetime lifetime-left digest challenge [tx-seq] [ rx-seq seq-winsize seq-wincnt ] ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

authentication

Display RSVP Security Association information

detail

Display detailed RSVP status

interface

Display RSVP interface information

ifname

Type: interface

Display RSVP interface information

from

Starting point of association

ip_frm

Type: ipaddr

Address of starting point of association

to

Ending point of association

ip_to

Type: ipaddr

Address of ending point of association

__readonly__

TABLE_authentication

src

Type: ipaddr

dst

Type: ipaddr

nbr-ip

Type: ipaddr

interface

Type: string

mode

Type: string

key-src

Type: string

key-id

Type: integer

code

Type: string

TABLE_auth_detail

lifetime

Type: integer

lifetime-left

Type: integer

digest

HMAC MD5 (16)  value: 0

HMAC SHA-1 (20)  value: 1

challenge

Type: bool

tx-seq

Type: longlong

rx-seq

Type: longlong

seq-winsize

Type: integer

seq-wincnt

Type: integer

Command Modes

- /exec

show ip rsvp counters

show ip rsvp counters [ interface ifname | teardown | authentication | all ] [ __readonly__ TABLE_counters [ rsn-unspec pt-cnt-unspec rt-cnt-unspec rsn-path-tmo pt-cnt-path-tmo rt-cnt-path-tmo rsn-resv-tmo pt-cnt-resv-tmo rt-cnt-resv-tmo rsn-signaled pt-cnt-signaled rt-cnt-signaled rsn-mgmt pt-cnt-mgmt rt-cnt-mgmt rsn-policy pt-cnt-policy rt-cnt-policy rsn-proxy pt-cnt-proxy rt-cnt-proxy rsn-no-rsrc pt-cnt-no-rsrc rt-cnt-no-rsrc rsn-preempted pt-cnt-preempted rt-cnt-preempted rsn-msg-err pt-cnt-msg-err rt-cnt-msg-err rsn-internal pt-cnt-internal rt-cnt-internal rsn-traffic pt-cnt-traffic rt-cnt-traffic rsn-sync-unk pt-cnt-sync-unk rt-cnt-sync-unk rsn-gr-tmo pt-cnt-gr-tmo rt-cnt-gr-tmo rsn-link-nbor-down pt-cnt-link-nbor-down rt-cnt-link-nbor-down rsn-local-perr-psr pt-cnt-local-perr-psr rt-cnt-local-perr-psr rsn-network-perr-psr pt-cnt-network-perr-psr rt-cnt-network-perr-psr rsn-hello-st-tmo pt-cnt-hello-st-tmo rt-cnt-hello-st-tmo rsn-plr-bkup-del pt-cnt-plr-bkup-del rt-cnt-plr-bkup-del rsn-cli-clear pt-cnt-cli-clear rt-cnt-cli-clear rsn-restart-cmd pt-cnt-restart-cmd rt-cnt-restart-cmd rsn-intf-del pt-cnt-intf-del rt-cnt-intf-del ] [ auth_send_authenticated auth_send_authentication_failures auth_send_challenges_rcvd auth_send_challenge_responses_sent auth-send-chall-rcvd auth-send-chall-resp-sent auth-recv-total-err auth-recv-valid-msgs auth_recv_incomplete_sa auth_recv_no_integrity auth_recv_bad_digest auth_recv_wrong_digest_type auth_recv_seq_num_dup auth_recv_seq_num_out_of_range auth_recv_bad_msg_format auth_recv_challenges_sent auth_recv_challenge_timeouts auth_recv_challenges_resent auth_recv_challenge_responses_rcvd auth_recv_during_challenge auth_recv_wrong_challenge_response auth_recv_challenge_response_dup auth_recv_challenge_response_late ] pkt-rx pkt-tx pkt-rx-err pkt-tx-err path-rx path-tx resv-rx resv-tx patherr-rx patherr-tx resverr-rx resverr-tx pathtear-rx pathtear-tx resvtear-rx resvtear-tx resvconf-rx resvconf-tx rtearconf-rx rtearconf-tx ack-rx ack-tx sref-rx sref-tx hello-rx hello-tx intchal-rx intchal-tx intresp-rx intresp-tx bundle-rx bundle-tx bundle-path-rx bundle-path-tx bundle-resv-rx bundle-resv-tx bundle-patherr-rx bundle-patherr-tx bundle-resverr-rx bundle-resverr-tx bundle-pathtear-rx bundle-pathtear-tx bundle-resvtear-rx bundle-resvtear-tx bundle-ack-rx bundle-ack-tx ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

counters

Display RSVP statistics

interface

Display RSVP interface information

ifname

Type: interface

Display RSVP interface information

teardown

Display signaling tear information

authentication

Display RSVP Security Association information

all

Display all information

__readonly__

TABLE_counters

rsn-unspec

Type: string

pt-cnt-unspec

Type: uinteger

rt-cnt-unspec

Type: uinteger

rsn-path-tmo

Type: string

pt-cnt-path-tmo

Type: uinteger

rt-cnt-path-tmo

Type: uinteger

rsn-resv-tmo

Type: string

pt-cnt-resv-tmo

Type: uinteger

rt-cnt-resv-tmo

Type: uinteger

rsn-signaled

Type: string

pt-cnt-signaled

Type: uinteger

rt-cnt-signaled

Type: uinteger

rsn-mgmt

Type: string

pt-cnt-mgmt

Type: uinteger

rt-cnt-mgmt

Type: uinteger

rsn-policy

Type: string

pt-cnt-policy

Type: uinteger

rt-cnt-policy

Type: uinteger

rsn-proxy

Type: string

pt-cnt-proxy

Type: uinteger

rt-cnt-proxy

Type: uinteger

rsn-no-rsrc

Type: string

pt-cnt-no-rsrc

Type: uinteger

rt-cnt-no-rsrc

Type: uinteger

rsn-preempted

Type: string

pt-cnt-preempted

Type: uinteger

rt-cnt-preempted

Type: uinteger

rsn-msg-err

Type: string

pt-cnt-msg-err

Type: uinteger

rt-cnt-msg-err

Type: uinteger

rsn-internal

Type: string

pt-cnt-internal

Type: uinteger

rt-cnt-internal

Type: uinteger

rsn-traffic

Type: string

pt-cnt-traffic

Type: uinteger

rt-cnt-traffic

Type: uinteger

rsn-sync-unk

Type: string

pt-cnt-sync-unk

Type: uinteger

rt-cnt-sync-unk

Type: uinteger

rsn-gr-tmo

Type: string

pt-cnt-gr-tmo

Type: uinteger

rt-cnt-gr-tmo

Type: uinteger

rsn-link-nbor-down

Type: string

pt-cnt-link-nbor-down

Type: uinteger

rt-cnt-link-nbor-down

Type: uinteger

rsn-local-perr-psr

Type: string

pt-cnt-local-perr-psr

Type: uinteger

rt-cnt-local-perr-psr

Type: uinteger

rsn-network-perr-psr

Type: string

pt-cnt-network-perr-psr

Type: uinteger

rt-cnt-network-perr-psr

Type: uinteger

rsn-hello-st-tmo

Type: string

pt-cnt-hello-st-tmo

Type: uinteger

rt-cnt-hello-st-tmo

Type: uinteger

rsn-plr-bkup-del

Type: string

pt-cnt-plr-bkup-del

Type: uinteger

rt-cnt-plr-bkup-del

Type: uinteger

rsn-cli-clear

Type: string

pt-cnt-cli-clear

Type: uinteger

rt-cnt-cli-clear

Type: uinteger

rsn-restart-cmd

Type: string

pt-cnt-restart-cmd

Type: uinteger

rt-cnt-restart-cmd

Type: uinteger

rsn-intf-del

Type: string

pt-cnt-intf-del

Type: uinteger

rt-cnt-intf-del

Type: uinteger

auth_send_authenticated

Type: uinteger

auth_send_authentication_failures

Type: uinteger

auth_send_challenges_rcvd

Type: uinteger

auth_send_challenge_responses_sent

Type: uinteger

auth-send-chall-rcvd

Type: uinteger

auth-send-chall-resp-sent

Type: uinteger

auth-recv-total-err

Type: uinteger

auth-recv-valid-msgs

Type: uinteger

auth_recv_incomplete_sa

Type: uinteger

auth_recv_no_integrity

Type: uinteger

auth_recv_bad_digest

Type: uinteger

auth_recv_wrong_digest_type

Type: uinteger

auth_recv_seq_num_dup

Type: uinteger

auth_recv_seq_num_out_of_range

Type: uinteger

auth_recv_bad_msg_format

Type: uinteger

auth_recv_challenges_sent

Type: uinteger

auth_recv_challenge_timeouts

Type: uinteger

auth_recv_challenges_resent

Type: uinteger

auth_recv_challenge_responses_rcvd

Type: uinteger

auth_recv_during_challenge

Type: uinteger

auth_recv_wrong_challenge_response

Type: uinteger

auth_recv_challenge_response_dup

Type: uinteger

auth_recv_challenge_response_late

Type: uinteger

pkt-rx

Type: integer

pkt-tx

Type: integer

pkt-rx-err

Type: integer

pkt-tx-err

Type: integer

path-rx

Type: integer

path-tx

Type: integer

resv-rx

Type: integer

resv-tx

Type: integer

patherr-rx

Type: integer

patherr-tx

Type: integer

resverr-rx

Type: integer

resverr-tx

Type: integer

pathtear-rx

Type: integer

pathtear-tx

Type: integer

resvtear-rx

Type: integer

resvtear-tx

Type: integer

resvconf-rx

Type: integer

resvconf-tx

Type: integer

rtearconf-rx

Type: integer

rtearconf-tx

Type: integer

ack-rx

Type: integer

ack-tx

Type: integer

sref-rx

Type: integer

sref-tx

Type: integer

hello-rx

Type: integer

hello-tx

Type: integer

intchal-rx

Type: integer

intchal-tx

Type: integer

intresp-rx

Type: integer

intresp-tx

Type: integer

bundle-rx

Type: integer

bundle-tx

Type: integer

bundle-path-rx

Type: integer

bundle-path-tx

Type: integer

bundle-resv-rx

Type: integer

bundle-resv-tx

Type: integer

bundle-patherr-rx

Type: integer

bundle-patherr-tx

Type: integer

bundle-resverr-rx

Type: integer

bundle-resverr-tx

Type: integer

bundle-pathtear-rx

Type: integer

bundle-pathtear-tx

Type: integer

bundle-resvtear-rx

Type: integer

bundle-resvtear-tx

Type: integer

bundle-ack-rx

Type: integer

bundle-ack-tx

Type: integer

Command Modes

- /exec

show ip rsvp fast-reroute

show ip rsvp fast-reroute [detail] [ destination dest_addr ] [ source src_addr ] [ dst-port dport-val ] [ src-port sport-val ] [ protect-if ifname ] [ __readonly__ total-path active-path ready-path unassign-path unprotect-path [ TABLE_frr type dest tun-id source bkpifid prot-intf nnhop frr-state bkp-ifname [ TABLE_detail mergept-ero mergept bw-prot frr-bw bw-prot-level desrd-bit b-sel-prio bkp-src tail-addr bkp-phy-ifnm bkp-phy-ifaddr bkp-phy-mtu ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

fast-reroute

Display RSVP fast-reroute information

detail

Display detailed RSVP status

destination

Display FRR data based on a destination address

dest_addr

Type: ipaddr

Destination address

source

Display FRR data based on a source address

src_addr

Type: ipaddr

Source address

dst-port

Display FRR data based on destination port

dport-val

Type: integer

Destination Port value

src-port

Display FRR data based on a source port

sport-val

Type: integer

Source port value

protect-if

Display FRR data based on protected interface

ifname

Type: interface

Protected interface name

__readonly__

total-path

Type: uinteger

active-path

Type: uinteger

ready-path

Type: uinteger

unassign-path

Type: uinteger

unprotect-path

Type: uinteger

TABLE_frr

type

Type: string

dest

Type: ipaddr

tun-id

Type: integer

source

Type: ipaddr

bkpifid

Type: hex

nnhop

Type: string

frr-state

Type: string

prot-intf

Type: string

bkp-ifname

Type: string

TABLE_detail

mergept-ero

Type: ipaddr

mergept

Type: ipaddr

bw-prot

Type: string

frr-bw

Type: uinteger

bw-prot-level

Type: uinteger

desrd-bit

Type: hex

b-sel-prio

Type: uinteger

bkp-src

Type: ipaddr

tail-addr

Type: ipaddr

bkp-phy-ifnm

Type: string

bkp-phy-ifaddr

Type: ipaddr

bkp-phy-mtu

Type: uinteger

Command Modes

- /exec

show ip rsvp hello client lsp

show ip rsvp hello client lsp [detail] [ __readonly__ [ TABLE_hc_lsp_sum src-addr dst-addr tun-id lsp-id subgrp-orig subgrp-id lsp-flags [ TABLE_hc_lsp_detail gr-up-nbr gr-down-nbr rr-up-nbr rr-down-nbr incompl-nbr-type ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

hello

Display RSVP Hello Information

client

Display Hello client instances

lsp

Display LSP information

detail

Display detailed RSVP status

__readonly__

TABLE_hc_lsp_sum

src-addr

Type: ipaddr

dst-addr

Type: ipaddr

tun-id

Type: integer

lsp-id

Type: integer

subgrp-orig

Type: ipaddr

subgrp-id

Type: integer

lsp-flags

Type: integer

TABLE_hc_lsp_detail

gr-up-nbr

Type: ipaddr

gr-down-nbr

Type: ipaddr

rr-up-nbr

Type: ipaddr

rr-down-nbr

Type: ipaddr

incompl-nbr-type

Type: string

Command Modes

- /exec

show ip rsvp hello client neighbor

show ip rsvp hello client neighbor [detail] [ __readonly__ TABLE_clnt_nbr_sum nbr-addr nbr-type nbr-state hi-state lsp-count ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

hello

Display RSVP Hello Information

client

Display Hello client instances

neighbor

Display information for Hello neighbor

detail

Display detailed RSVP status

__readonly__

TABLE_clnt_nbr_sum

nbr-addr

Type: ipaddr

nbr-type

Type: string

nbr-state

Type: string

hi-state

Type: string

lsp-count

Type: integer

Command Modes

- /exec

show ip rsvp hello graceful-restart

show ip rsvp hello graceful-restart [ __readonly__ TABLE_gr gr-state gr-mode refesh-interval refresh-misses dscp restart-time recover-time max-recover-wait ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

hello

Display RSVP Hello Information

graceful-restart

Display RSVP graceful-restart intformation

__readonly__

TABLE_gr

gr-state

Disabled  value: 0

Enabled  value: 1

Disabling  value: 2

gr-mode

none  value: 0

neighbor-helper  value: 1

full  value: 2

refesh-interval

Type: integer

refresh-misses

Type: integer

dscp

Type: hex

restart-time

Type: integer

recover-time

Type: integer

max-recover-wait

Type: integer

Command Modes

- /exec

show ip rsvp hello instance

show ip rsvp hello instance [ interface ifname ] [ neighbor nbr-addr ] [detail] [ __readonly__ [ TABLE_hello_inst client-type nbr-ip if-name nbr-state lost-comm-count lsp-count hello-interval [ TABLE_hi_detail src-ip missed-acks-conf ref-interval src-inst nbr-inst rest-time rec-time missed_ack_cnt bad-src-inst-cnt bad-dst-inst-cnt nbr-disabled-hi-cnt msg-rcvd msg-sent msg-supp ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

hello

Display RSVP Hello Information

instance

Display information for Hello instances

interface

Display RSVP interface information

ifname

Type: interface

Display RSVP interface information

neighbor

Display information for Hello neighbor

nbr-addr

Type: ipaddr

RSVP Neighbor address

detail

Display detailed RSVP status

__readonly__

TABLE_hello_inst

client-type

Type: string

nbr-ip

Type: ipaddr

if-name

Type: string

nbr-state

Type: string

lost-comm-count

Type: integer

lsp-count

Type: integer

hello-interval

Type: integer

TABLE_hi_detail

src-ip

Type: ipaddr

missed-acks-conf

Type: integer

ref-interval

Type: integer

src-inst

Type: hex

nbr-inst

Type: hex

rest-time

Type: integer

rec-time

Type: integer

missed_ack_cnt

Type: uinteger

bad-src-inst-cnt

Type: uinteger

bad-dst-inst-cnt

Type: uinteger

nbr-disabled-hi-cnt

Type: uinteger

msg-rcvd

Type: uinteger

msg-sent

Type: uinteger

msg-supp

Type: uinteger

Command Modes

- /exec

show ip rsvp interface

show ip rsvp interface [ifname] [ detail | backup-tunnel ] [ __readonly__ TABLE_inter if-name ifid iod mpls-ena conf-ena state [ TABLE_detail ifaddr masklen if-flags dyn-type mtu tail-addr phys-if dyn-tmr dyn-expiry dyn-keepalive-flg tcsb-count ip-nbr-cnt in-list-cnt rr-enabled rr-list-max refresh-timer sum-refresh-timer time-refresh-intval max-sr-size max-sr-size-conf sr-rel max-bundle-sz expiry-intval miss-limit expiry-timer bundle-ena rel-ena ack-intval ack-max-size ack-tmr ack-init-rexmit ack-max-conf-size ack-max-msg sig-dscp hello-dscp [ TABLE_pacing pacing-ena pace-tmr pace_intval pace-cap-rate pace-intval-end pace-msg-count pace-msg-defer-count ] [ TABLE_auth auth-ena key-src digest seq-winsize challenge ] [ TABLE_hello hst-ena hst-intval missed_acks ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

interface

Display RSVP interface information

ifname

Type: interface

Display RSVP interface information

backup-tunnel

Display backup tunnel information

detail

Display detailed RSVP status

__readonly__

TABLE_inter

if-name

Type: string

iod

Type: integer

ifid

Type: hex

mpls-ena

Type: bool

conf-ena

Type: string

state

Type: string

TABLE_detail

ifaddr

Type: ipaddr

masklen

Type: uinteger

if-flags

Type: integer

dyn-type

Type: string

mtu

Type: integer

tail-addr

Type: ipaddr

phys-if

Type: string

dyn-tmr

Type: string

dyn-expiry

Type: duration

dyn-keepalive-flg

Type: string

tcsb-count

Type: integer

ip-nbr-cnt

Type: integer

in-list-cnt

Type: integer

rr-enabled

Type: string

rr-list-max

Type: integer

refresh-timer

Type: string

sum-refresh-timer

Type: string

time-refresh-intval

Type: integer

max-sr-size

Type: integer

max-sr-size-conf

Type: integer

sr-rel

Type: string

max-bundle-sz

Type: integer

expiry-timer

Type: string

expiry-intval

Type: integer

miss-limit

Type: integer

bundle-ena

Type: string

rel-ena

Type: string

ack-intval

Type: integer

ack-max-size

Type: integer

ack-max-conf-size

Type: integer

ack-tmr

Type: string

ack-init-rexmit

Type: integer

ack-max-msg

Type: integer

sig-dscp

Type: integer

hello-dscp

Type: integer

TABLE_pacing

pacing-ena

Type: string

pace-tmr

Type: string

pace_intval

Type: integer

pace-cap-rate

Type: integer

pace-intval-end

Type: integer

pace-msg-count

Type: integer

pace-msg-defer-count

Type: integer

TABLE_auth

auth-ena

Disabled  value: 0

Enabled  value: 1

key-src

Type: string

digest

HMAC MD5 (16)  value: 0

HMAC SHA-1 (20)  value: 1

seq-winsize

Type: integer

challenge

Disabled  value: 0

Enabled  value: 1

TABLE_hello

hst-ena

Type: string

hst-intval

Type: integer

missed_acks

Type: integer

Command Modes

- /exec

show ip rsvp session

show ip rsvp session [ destination dest_addr ] [ __readonly__ total-count TABLE_session type dest-ip dport tunnel-id psb-cnt rsb-cnt reqs pxbs rxbs ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

session

Display RSVP Session information

destination

Display Sessions based on a destination address

dest_addr

Type: ipaddr

Destination address

__readonly__

total-count

Type: uinteger

TABLE_session

type

LSP4  value: 0

P2MP-LSP4  value: 1

OUNI  value: 2

IPv4  value: 3

dest-ip

Type: ipaddr

dport

Type: integer

tunnel-id

Type: string

psb-cnt

Type: integer

rsb-cnt

Type: integer

reqs

Type: integer

pxbs

Type: integer

rxbs

Type: integer

Command Modes

- /exec

show ip rsvp signalling rate-limit

show ip rsvp signalling rate-limit [ __readonly__ TABLE_counters rlim-ena limit intvl ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

signalling

Display signalling informaion

rate-limit

Display rate limit parameters

__readonly__

TABLE_counters

rlim-ena

Type: string

limit

Type: integer

intvl

Type: integer

Command Modes

- /exec

show ip rsvp signalling refresh interval

show ip rsvp signalling refresh interval [ __readonly__ TABLE_counters interval ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

signalling

Display signalling informaion

refresh

Display refresh information

interval

Display interval for refresh messagses

__readonly__

TABLE_counters

interval

Type: integer

Command Modes

- /exec

show ip rsvp signalling refresh misses

show ip rsvp signalling refresh misses [ __readonly__ TABLE_counters misses ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

signalling

Display signalling informaion

refresh

Display refresh information

misses

Display misses required to trigger state timeout

__readonly__

TABLE_counters

misses

Type: integer

Command Modes

- /exec

show ip rsvp signalling refresh reduction

show ip rsvp signalling refresh reduction [ __readonly__ TABLE_counters rr-ena ackdelay epoch msgid-inuse msgid-alloc msgid-free ]

Syntax Description

show

Show running system information

ip

Display IP information

rsvp

Display RSVP status

signalling

Display signalling informaion

refresh

Display refresh information

reduction

Display refresh reduction parameters

__readonly__

TABLE_counters

rr-ena

Type: string

ackdelay

Type: integer

epoch

Type: hex

msgid-inuse

Type: integer

msgid-alloc

Type: integer

msgid-free

Type: integer

Command Modes

- /exec

show ip stats

show ip stats

Syntax Description

show

Show running system information

ip

Display IP information

stats

Display IP internal stats

Command Modes

- /exec

show ip telnet source-interface

show ip telnet source-interface [ vrf { vrf-name | vrf-known-name } ] [ __readonly__ [ TABLE_iptelnetvrf vrfname ifname ] ]

Syntax Description

show

Show running system information

ip

Display IP information

telnet

Display telnet information

source-interface

Display source interface information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_iptelnetvrf

source interface of telnet given vrf

vrfname

Type: string

vrfname

ifname

Type: string

ifname

Command Modes

- /exec

show ip telnet source-interface vrf all

show ip telnet source-interface vrf all [ __readonly__ [ TABLE_iptelnet vrfname ifname ] ]

Syntax Description

show

Show running system information

ip

Display IP information

telnet

Display telnet information

source-interface

Display source interface information

vrf

Display per-VRF information

all

Display entries for all vrfs

__readonly__

TABLE_iptelnet

source interface of telnet

vrfname

Type: string

vrfname

ifname

Type: string

ifname

Command Modes

- /exec

show ip tftp source-interface

show ip tftp source-interface [ vrf { vrf-name | vrf-known-name } ] [ __readonly__ [ TABLE_iptftpvrf vrfname ifname ] ]

Syntax Description

show

Show running system information

ip

Display IP information

tftp

Display TFTP client information

source-interface

Display source interface information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_iptftpvrf

source interface of tftp given vrf

vrfname

Type: string

vrfname

ifname

Type: string

ifname

Command Modes

- /exec

show ip tftp source-interface vrf all

show ip tftp source-interface vrf all [ __readonly__ [ TABLE_iptftp vrfname ifname ] ]

Syntax Description

show

Show running system information

ip

Display IP information

tftp

Display TFTP client information

source-interface

Display source interface information

vrf

Display per-VRF information

all

Display entries for all vrfs

__readonly__

TABLE_iptftp

source interface of tftp

vrfname

Type: string

vrfname

ifname

Type: string

ifname

Command Modes

- /exec

show ip traffic

show ip traffic [ vrf { vrf-name | vrf-known-name } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_ip_traffic rcvd sent consumed fwd-ucast fwd-mcast fwd-label opts-end opts-nop opts-bsec opts-loosesrc-route opts-timestamp opts-esec opts-record-route opts-ump opts-stid opts-strsrc-route opts-alert opts-cipso opts-other bad-csum too-small bad-ver bad-hlen bad-len bad-dest bad-ttl cant-fwd out-drop bad-encap no-route no-proto bad-options frag fragmented out-frag frag-drop cant-frag reasm frag-to tx-redir tx-unreach tx-echo-req tx-echo-reply tx-mask-req tx-mask-rep tx-info-req tx-info-reply tx-param-prob tx-source-quench tx-tstamp-req tx-tstamp-reply tx-time-exceeded tx-router-solicit tx-router-advert rx-redir rx-unreach rx-echo-req rx-echo-reply rx-mask-req rx-mask-rep rx-info-req rx-info-reply rx-param-prob rx-source-quench rx-tstamp-req rx-tstamp-reply rx-time-exceeded rx-router-solicit rx-router-advert rx-format-errors rx-csum-errors inrcv inoctet inhdrerr innoroutes inaddrerr innoproto intruncated inforw reasmoks reasmfails reasmreqds indiscards indelivers outnoroutes outrqsts outforw outdiscards outfragreqds outfragoks outfragfails outfragcreates outtxmts outoctet inmcastpkts inmcastoctets outmcastpkts outmcastoctets inbdcastpkts outbdcastpkts ]

Syntax Description

show

Show running system information

ip

Display IP information

traffic

Display IP software processed traffic statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_ip_traffic

rcvd

Type: uinteger

sent

Type: uinteger

consumed

Type: uinteger

fwd-ucast

Type: uinteger

fwd-mcast

Type: uinteger

fwd-label

Type: uinteger

opts-end

Type: uinteger

opts-nop

Type: uinteger

opts-bsec

Type: uinteger

opts-loosesrc-route

Type: uinteger

opts-timestamp

Type: uinteger

opts-esec

Type: uinteger

opts-record-route

Type: uinteger

opts-ump

Type: uinteger

opts-stid

Type: uinteger

opts-strsrc-route

Type: uinteger

opts-alert

Type: uinteger

opts-cipso

Type: uinteger

opts-other

Type: uinteger

bad-csum

Type: uinteger

too-small

Type: uinteger

bad-ver

Type: uinteger

bad-hlen

Type: uinteger

bad-len

Type: uinteger

bad-dest

Type: uinteger

bad-ttl

Type: uinteger

cant-fwd

Type: uinteger

out-drop

Type: uinteger

bad-encap

Type: uinteger

no-route

Type: uinteger

no-proto

Type: uinteger

bad-options

Type: uinteger

frag

Type: uinteger

fragmented

Type: uinteger

out-frag

Type: uinteger

frag-drop

Type: uinteger

cant-frag

Type: uinteger

reasm

Type: uinteger

frag-to

Type: uinteger

tx-redir

Type: uinteger

tx-unreach

Type: uinteger

tx-echo-req

Type: uinteger

tx-echo-reply

Type: uinteger

tx-mask-req

Type: uinteger

tx-mask-rep

Type: uinteger

tx-info-req

Type: uinteger

tx-info-reply

Type: uinteger

tx-param-prob

Type: uinteger

tx-source-quench

Type: uinteger

tx-tstamp-req

Type: uinteger

tx-tstamp-reply

Type: uinteger

tx-time-exceeded

Type: uinteger

tx-router-solicit

Type: uinteger

tx-router-advert

Type: uinteger

rx-redir

Type: uinteger

rx-unreach

Type: uinteger

rx-echo-req

Type: uinteger

rx-echo-reply

Type: uinteger

rx-mask-req

Type: uinteger

rx-mask-rep

Type: uinteger

rx-info-req

Type: uinteger

rx-info-reply

Type: uinteger

rx-param-prob

Type: uinteger

rx-source-quench

Type: uinteger

rx-tstamp-req

Type: uinteger

rx-tstamp-reply

Type: uinteger

rx-time-exceeded

Type: uinteger

rx-router-solicit

Type: uinteger

rx-router-advert

Type: uinteger

rx-format-errors

Type: uinteger

rx-csum-errors

Type: uinteger

inrcv

Type: uinteger

inoctet

Type: uinteger

inhdrerr

Type: uinteger

innoroutes

Type: uinteger

inaddrerr

Type: uinteger

innoproto

Type: uinteger

intruncated

Type: uinteger

inforw

Type: uinteger

reasmoks

Type: uinteger

reasmfails

Type: uinteger

reasmreqds

Type: uinteger

indiscards

Type: uinteger

indelivers

Type: uinteger

outnoroutes

Type: uinteger

outrqsts

Type: uinteger

outforw

Type: uinteger

outdiscards

Type: uinteger

outfragreqds

Type: uinteger

outfragoks

Type: uinteger

outfragfails

Type: uinteger

outfragcreates

Type: uinteger

outtxmts

Type: uinteger

outoctet

Type: uinteger

inmcastpkts

Type: uinteger

inmcastoctets

Type: uinteger

outmcastpkts

Type: uinteger

outmcastoctets

Type: uinteger

inbdcastpkts

Type: uinteger

outbdcastpkts

Type: uinteger

Command Modes

- /exec

show ip txlist

show ip txlist { list | member }

Syntax Description

show

Show running system information

ip

Display IP information

txlist

Display IP txlist information

list

Display IP txlist main linkage

member

Display IP txlist active member linkage

Command Modes

- /exec

show ip verify source

show ip verify source [ interface intf6 ] [ __readonly__ TABLE_verify_entry verify_intf verify_intf_ipsg_val verify_ipsg_enable_intfs verify_hdr verify_filter_mode verify_ip_addr verify_mac_addr verify_vlan ]

Syntax Description

show

Show running system information

ip

Show the IP features of the system

verify

Verify IPSG information

source

IPSG source

interface

Interface

verify_intf_ipsg_val

Type: uinteger

IP source guard value (enabled or disable)

verify_ipsg_enable_intfs

Type: string

IP source guard enabled interfaces names

intf6

Type: interface

__readonly__

Read only

TABLE_verify_entry

verify_filter_mode

Type: uinteger

verify_intf

Type: interface

verify_hdr

Type: uinteger

verify_ip_addr

Type: ipaddr

verify_mac_addr

Type: ethernet

verify_vlan

Type: vlan

Command Modes

- /exec

show ip vrf

show ip mroute [bitfield] [detail] [ vrf { vrf-name | vrf-known-name | all } ] | show ip mroute rp [ vrf { vrf-name | vrf-known-name | all } ] | show ip mroute [group] summary [ software-forwarded | rpf-failed ] [ vrf { vrf-name | vrf-known-name | all } ] | show ip mroute summary [ count | software-forwarded | rpf-failed ] [ vrf { vrf-name | vrf-known-name | all } ] | show ip mroute { source group | { group [source] | group shared-tree | group source-tree } | shared-tree | source-tree } { [flags] | [detail] | [ summary [ software-forwarded | rpf-failed ] | bitfield ] } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name TABLE_addr mcast-addrs bidir uptime pending if-name rpf-nbr internal rpf-nbr-uptime oif-count TABLE_mpib mpib-name stale-route TABLE_oif oif-name oif-uptime mpib-refcount TABLE_oif_mpib oif-mpib-name stale-oif ]

Syntax Description

show

Show running system information

ip

Display IP information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

mroute

Display IP multicast routing table

summary

Display route counts and packet rates

shared-tree

Display route for *,G entries

source-tree

Display route for S,G entries

software-forwarded

Display software switched route counts only

rpf-failed

Display RPF failure statistics

rp

Display RP routes (RP, 0.0.0.0/32)

group

Type: ipaddr

Display multicast group/source address for route

source

Type: ipaddr

Display multicast group/source address for route

count

Display route counts only

bitfield

Display bitfield details

detail

Display detailed route attributes

flags

Display detailed route attributes

__readonly__

TABLE_vrf

vrf-name

Type: vrf

TABLE_addr

mcast-addrs

Type: string

bidir

Type: bool

pending

Type: bool

uptime

Type: duration

if-name

Type: interface

rpf-nbr

Type: ipaddr

internal

Type: bool

rpf-nbr-uptime

Type: duration

oif-count

Type: integer

TABLE_mpib

mpib-name

Type: string

stale-route

Type: bool

TABLE_oif

oif-name

Type: string

oif-uptime

Type: duration

mpib-refcount

Type: integer

TABLE_oif_mpib

oif-mpib-name

Type: string

stale-oif

Type: bool

Command Modes

- /exec

show ipv6 (bgp)

show ipv6 { bgp | mbgp } { route-map { rmap-name | rmap-name } | prefix-list { prfxlist-name | test_pol_name } | filter-list { fltrlist-name | test_pol_name } | community-list { commlist-name | test_pol_name } | extcommunity-list { extcommlist-name | test_pol_name } [exact-match] }

Syntax Description

show

Show running system information

ipv6

Display BGP information for IPv6 address family

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

route-map

Display routes matching the route-map

rmap-name

Type: string

pattern: [!-~]*

length: 63

Route-map name

rmap-name

Type: string

Known route-map name

prefix-list

Display routes matching the prefix-list

prfxlist-name

Type: string

length: 63

Name of prefix-list

filter-list

Display routes matching the filter-list

fltrlist-name

Type: string

length: 63

Name of filter-list

community-list

Display routes matching the community-list

commlist-name

Type: string

length: 63

Name of community-list

extcommunity-list

Display routes matching the extcommunity-list

extcommlist-name

Type: string

length: 63

Name of extcommunity-list

test_pol_name

Type: string

An existing test-list policy

exact-match

Exact match of the communities

Command Modes

- /exec

show ipv6 (bgp)

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] { rib-install | rib-uninstall | rib-pending } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ipv6

Display BGP information for IPv6 address family

rib-install

Routes installed in RIB

rib-uninstall

Routes not installed in RIB

rib-pending

Routes not acknowledged by RIB

Command Modes

- /exec

show ipv6 (am)

show ipv6 { adjacency | neighbor } [ interface [summary] | ipv6-addr [detail] | detail | summary | non-best | [throttle] statistics ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [invalid_pkt_cnt] [invalid_byte_cnt] [global_drop_pkt_cnt] [global_drop_byte_cnt] [global_punt_pkt_cnt] [global_punt_byte_cnt] [global_glean_pkt_cnt] [global_glean_byte_cnt] [glean_pkt_cnt] [glean_byte_cnt] [normal_pkt_cnt] [normal_byte_cnt] [last_updated] [count-static] [count-dynamic] [count-others] [count-throttle] [count-total] [ TABLE_vrf vrf-name-out [ TABLE_afi afi count [ TABLE_adj intf-out ipv6-addr [phy-intf] time-stamp mac pref owner [pkt-count] [byte-count] [is-best] [is-thrtld] ] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

adjacency

Display adjacency table

neighbor

Show IPv6 neighbor entry

interface

Type: interface

Display specific interface adjacencies only

ipv6-addr

Type: ipv6addr

IPV6 source address

detail

Show detail information of adjacency entries

summary

Show adjacency summary

non-best

Show both best/non-best entries

throttle

Throttle

statistics

Show adjacency statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Show adjacency entries for all vrfs

__readonly__

TABLE_vrf

vrf-name-out

Type: string

invalid_pkt_cnt

Type: uinteger

invalid_byte_cnt

Type: uinteger

global_drop_pkt_cnt

Type: uinteger

global_drop_byte_cnt

Type: uinteger

global_punt_pkt_cnt

Type: uinteger

global_punt_byte_cnt

Type: uinteger

global_glean_pkt_cnt

Type: uinteger

global_glean_byte_cnt

Type: uinteger

glean_pkt_cnt

Type: uinteger

glean_byte_cnt

Type: uinteger

normal_pkt_cnt

Type: uinteger

normal_byte_cnt

Type: uinteger

last_updated

Type: string

count-static

Type: uinteger

count-dynamic

Type: uinteger

count-others

Type: uinteger

count-throttle

Type: uinteger

count-total

Type: uinteger

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

count

Type: uinteger

TABLE_adj

intf-out

Type: string

phy-intf

Type: string

time-stamp

Type: string

ipv6-addr

Type: ipv6addr

mac

Type: ethernet

pref

Type: uinteger

owner

Type: string

pkt-count

Type: uinteger

byte-count

Type: uinteger

is-best

Type: string

is-thrtld

Type: string

Command Modes

- /exec

show ipv6 (bgp)

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv6-prefix [longer-prefixes] ] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ipv6

Display BGP information for IPv6 address family

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ipv6-prefix

Type: ipv6prefix

Display one particular IPv6 prefix from the BRIB in detail

longer-prefixes

Display route and more specific routes

Command Modes

- /exec

show ipv6 cache

show ipv6 cache { { brief | detail } | interface [intf] } [operational]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

cache

Display ipv6 cache

interface

Display ipv6 related interface information

brief

Display summary of ipv6 interface status and configuration

detail

Display detailed information of ipv6 interface status and configuration

operational

Display only interfaces that are administratively enabled

intf

Type: interface

Interface name to display

Command Modes

- /exec

show ipv6 client

show ipv6 client [client-name] [ __readonly__ TABLE_ipv6_client cli-name cli-stat cli-pid cli-ext-pid [protocol] pib-index cli-uuid rou-vrf rou-flg ctrl-sap data-sap ipc-ctrl-mq ipc-ctrl-fail ipc-data-mq ipc-data-fail [if-ext-ind] [ recv-fn recv-hex ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

client

Display clients registered with the IPv6 process

client-name

Type: string

Display information for a single IPv6 client

__readonly__

TABLE_ipv6_client

cli-name

Type: string

cli-stat

Type: string

cli-pid

Type: integer

cli-ext-pid

Type: integer

protocol

Type: integer

pib-index

Type: integer

cli-uuid

Type: integer

rou-vrf

Type: integer

rou-flg

Type: integer

ctrl-sap

Type: integer

data-sap

Type: integer

ipc-ctrl-mq

Type: integer

ipc-ctrl-fail

Type: integer

ipc-data-mq

Type: integer

ipc-data-fail

Type: integer

if-ext-ind

Type: integer

recv-fn

Type: string

recv-hex

Type: hex

Command Modes

- /exec

show ipv6 community

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] community { regexp-str | { comm-id | wellknown-id } + [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

ipv6

Display BGP information for IPv6 address family

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

community

Display routes matching the BGP communities

regexp-str

Type: string

Regular expression to match the communities

comm-id

Type: community

BGP community value

wellknown-id

BGP wellknown community

no-export  value: 1

Do not export to next AS (well-known community)
no-advertise  value: 2

Do not advertise to any peer (well-known community)
no-export-subconfed  value: 3

Do not send outside local AS (well known community)

exact-match

Exact match of the communities

Command Modes

- /exec

show ipv6 dampening

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] dampening { dampened-paths [ regexp regexp-str ] | history-paths [ regexp regexp-str ] | parameters | flap-statistics } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

dampening

Display dampening info

parameters

Display dampening parameters

dampened-paths

Display all dampened paths

history-paths

Display all history paths

flap-statistics

Display flap statistics for routes

ipv6

Display BGP information for IPv6 address family

regexp

Display routes matching the AS path regular expression

regexp-str

Type: string

Regular expression to match the AS paths

Command Modes

- /exec

show ipv6 dhcp relay

show ipv6 dhcp relay [ interface intf-range ] [ __readonly__ relay_service_enable relay_vpn_enable relay_cisco_option_enable gbl_src_intf interface-name intf_src_intf intf_header relay_address vrf_name dst_intf ]

Syntax Description

show

Show running system information

ipv6

Show the IPv6 features of the system

dhcp

Show DHCPv6

relay

DHCPv6 relay address of the interface

interface

DHCPv6 relay address of the interface

intf-range

Type: interface-mrange

interface

__readonly__

Read only

relay_service_enable

enabled  value: 1

disabled  value: 0

relay_vpn_enable

enabled  value: 1

disabled  value: 0

relay_cisco_option_enable

enabled  value: 1

disabled  value: 0

gbl_src_intf

Type: interface

interface name

interface-name

Type: interface

interface name

intf_src_intf

Type: interface

interface name

intf_header

Type: uinteger

relay_address

Type: ipv6addr

helper address

vrf_name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

dst_intf

Type: interface

interface name

Command Modes

- /exec

show ipv6 dhcp relay statistics

show ipv6 dhcp relay statistics [ interface intf [ [ server-ip ip-addr-val [ use-vrf vrf-name ] [ interface dest-interface ] ] | [ server-ip ip-addr-val [ interface dest-interface ] [ use-vrf vrf-name ] ] ] ] [ __readonly__ msg_stats_hdr msg_type_str tx_pkts rx_pkts drops msg_type_str_total server_stats_hdr server_helper_addr server_vrf server_intf server_requests server_responses drop_hdr drop_relay_disable drop_max_hops drop_validation_fails drop_unknown_op_intf drop_bad_context drop_opt_insert_fail drop_client_reply drop_no_ipv6_addr drop_intf_error drop_vpn_disabled drop_ipv6_extn_hdrs_presence ]

Syntax Description

show

Show running system information

ipv6

Show the IPv6 features of the system

dhcp

Show information about DHCPv6

relay

DHCPv6 Relay

statistics

Statistics related to DHCPv6

interface

input interface

intf

Type: interface

interface

server-ip

Server address

ip-addr-val

Type: ipv6addr

IPv6 relay address

use-vrf

server address VRF membership

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf

length: 32

VRF name

interface

Destination interface for the server address

dest-interface

Type: interface

Destination interface

__readonly__

Read only

msg_stats_hdr

Type: uinteger

msg_type_str

Type: string

tx_pkts

Type: uinteger

rx_pkts

Type: uinteger

drops

Type: uinteger

msg_type_str_total

Type: uinteger

server_stats_hdr

Type: uinteger

server_helper_addr

Type: uinteger

server_vrf

Type: string

server_intf

Type: interface

interface name

server_requests

Type: uinteger

server_responses

Type: uinteger

drop_hdr

Type: uinteger

drop_relay_disable

Type: uinteger

drop_max_hops

Type: uinteger

drop_validation_fails

Type: uinteger

drop_unknown_op_intf

Type: uinteger

drop_bad_context

Type: uinteger

drop_opt_insert_fail

Type: uinteger

drop_client_reply

Type: uinteger

drop_no_ipv6_addr

Type: uinteger

drop_intf_error

Type: uinteger

drop_vpn_disabled

Type: uinteger

drop_ipv6_extn_hdrs_presence

Type: uinteger

Command Modes

- /exec

show ipv6 eigrp route-map statistics redistribute

show ipv6 eigrp [eigrp-ptag] route-map statistics redistribute { bgp as | { eigrp | isis | ospfv3 | rip } tag | static | direct | amt } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_asn asn TABLE_vrf vrf TABLE_rmap name action seq_num [ TABLE_cmd command compare_count match_count ] total_accept_count total_reject_count ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

eigrp

Display EIGRP status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

route-map

Route-map related information

statistics

Route-map statistics

redistribute

Redistribute information from another routing protocol

bgp

Border Gateway Protocol (BGP)

as

Type: asn

Autonomous system number

isis

IS-IS Routing for IPv4

ospfv3

Open Shortest Path First (OSPF) V3

rip

Routing Information Protocol (RIP)

eigrp

Enhanced Interior Gateway Routing Protocol (EIGRP)

tag

Type: string

Process tag

static

Static routes

direct

Directly connected

amt

AMT Anycast prefix

__readonly__

TABLE_asn

asn

Type: uinteger

TABLE_vrf

vrf

Type: string

TABLE_rmap

name

Type: string

action

Type: string

seq_num

Type: uinteger

TABLE_cmd

command

Type: string

compare_count

Type: uinteger

match_count

Type: uinteger

total_accept_count

Type: uinteger

total_reject_count

Type: uinteger

Command Modes

- /exec

show ipv6 extcommunity

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] extcommunity { regexp-str | 4byteas-generic { transitive ext-comm-gen-trans | non-transitive ext-comm-gen-nontrans } + [exact-match] } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ipv6

Display BGP information for IPv6 address family

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

extcommunity

Display routes matching the BGP extcommunities

4byteas-generic

Generic extended community

transitive

Transitive extcommunity

non-transitive

Non-Transitive extcommunity

regexp-str

Type: string

Regular expression to match the extcommunities

ext-comm-gen-trans

Type: community

Extcommunity number aa4:nn format

ext-comm-gen-nontrans

Type: community

Extcommunity number aa4:nn format

exact-match

Exact match of the extcommunities

Command Modes

- /exec

show ipv6 flap-statistics

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] flap-statistics [ipv6-prefix] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

flap-statistics

Display route flap statistics

ipv6-prefix

Type: ipv6prefix

Display flap statistics for one prefix

ipv6

Display BGP information for IPv6 address family

Command Modes

- /exec

show ipv6 fragments

show ipv6 fragments [source-addr] [ __readonly__ [ TABLE_ipv6_frag [ TABLE_ipv6_each_q ipv6-src ipv6-dest frag-id frag-off m-flag nxt-header pay-load expires ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

fragments

Display queued fragments

source-addr

Type: ipv6addr

IPv6 address format: aaaa:bbbb:cccc:dddd:eeee:ffff:gggg:hhhh, aaaa::bbbb

__readonly__

TABLE_ipv6_frag

TABLE_ipv6_each_q

ipv6-src

Type: ipv6addr

ipv6-dest

Type: ipv6addr

frag-id

Type: hex

frag-off

Type: integer

m-flag

Type: string

nxt-header

Type: integer

pay-load

Type: integer

expires

Type: integer

Command Modes

- /exec

show ipv6 global traffic

show ipv6 { icmp | nd } global traffic [ __readonly__ TABLE_icmpv6_global_stat st-total rv-total st-err rv-err st-int-drp-cnt rv-int-drp-cnt st-adj-nt-recov-am-ha rv-adj-nt-recov-am-ha st-pkt-allow-inv-ttl-vpc rv-pkt-allow-inv-ttl-vpc st-drp-src-mac-own rv-drp-src-mac-own st-drp-tgt-ip-not-own rv-drp-tgt-ip-not-own st-drp-src-ip-not-own rv-drp-src-ip-not-own st-dest-unreach rv-dest-unreach st-admin-prohib rv-admin-prohib st-time-exceed rv-time-exceed st-para-pbms rv-para-pbms st-echo-req rv-echo-req st-echo-reply rv-echo-reply st-redirect rv-redirect st-pkt-too-big rv-pkt-too-big st-rtr-adver rv-rtr-adver st-rtr-solicit rv-rtr-solicit st-nei-adver rv-nei-adver st-nei-solicit rv-nei-solicit fast-path-pkts fastpath-disable other-path dup-rtr-ra-recvd rv-dup-rtr-ra-recvd TABLE_icmpv6_mld_stat st-v1-queries rv-v1-queries st-v2-queries rv-v2-queries st-v1-reports rv-v1-reports st-v2-reports rv-v2-reports st-v1-leaves rv-v1-leaves ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

nd

Display Neighbor Discovery interface information

global

Show ICMPv6/ND global variables

traffic

Display ICMPv6 software processed traffic statistics

__readonly__

TABLE_icmpv6_global_stat

st-total

Type: longlong

rv-total

Type: longlong

st-err

Type: longlong

rv-err

Type: longlong

st-int-drp-cnt

Type: longlong

rv-int-drp-cnt

Type: longlong

st-adj-nt-recov-am-ha

Type: longlong

rv-adj-nt-recov-am-ha

Type: longlong

st-pkt-allow-inv-ttl-vpc

Type: longlong

rv-pkt-allow-inv-ttl-vpc

Type: longlong

st-drp-src-mac-own

Type: longlong

rv-drp-src-mac-own

Type: longlong

st-drp-tgt-ip-not-own

Type: longlong

rv-drp-tgt-ip-not-own

Type: longlong

st-drp-src-ip-not-own

Type: longlong

rv-drp-src-ip-not-own

Type: longlong

st-dest-unreach

Type: longlong

rv-dest-unreach

Type: longlong

st-admin-prohib

Type: longlong

rv-admin-prohib

Type: longlong

st-time-exceed

Type: longlong

rv-time-exceed

Type: longlong

st-para-pbms

Type: longlong

rv-para-pbms

Type: longlong

st-echo-req

Type: longlong

rv-echo-req

Type: longlong

st-echo-reply

Type: longlong

rv-echo-reply

Type: longlong

st-redirect

Type: longlong

rv-redirect

Type: longlong

st-pkt-too-big

Type: longlong

rv-pkt-too-big

Type: longlong

st-rtr-adver

Type: longlong

rv-rtr-adver

Type: longlong

st-rtr-solicit

Type: longlong

rv-rtr-solicit

Type: longlong

st-nei-adver

Type: longlong

rv-nei-adver

Type: longlong

st-nei-solicit

Type: longlong

rv-nei-solicit

Type: longlong

fast-path-pkts

Type: longlong

fastpath-disable

Type: longlong

other-path

Type: longlong

dup-rtr-ra-recvd

Type: longlong

rv-dup-rtr-ra-recvd

Type: longlong

TABLE_icmpv6_mld_stat

st-v1-queries

Type: longlong

rv-v1-queries

Type: longlong

st-v2-queries

Type: longlong

rv-v2-queries

Type: longlong

st-v1-reports

Type: longlong

rv-v1-reports

Type: longlong

st-v2-reports

Type: longlong

rv-v2-reports

Type: longlong

st-v1-leaves

Type: longlong

rv-v1-leaves

Type: longlong

Command Modes

- /exec

show ipv6 icmp

show ipv6 icmp { adjacency | neighbor | sync-entries } [interface] [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ icmpv6-vrftype icmpv6-cxt-name [ TABLE_icmpv6_all_int TABLE_icmpv6_one_int icmpv6-ipv6-addr time-stamp-icmpv6 icmpv6-mac icmpv6-state icmpv6-short-name [phy-int-short-name] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

adjacency

Show IPv6 dynamic learnt adjacency entry

neighbor

Show IPv6 dynamic learnt neighbor entry

sync-entries

Show IPv6 table learnt only due to table sync

interface

Type: interface

Interface name to display

detail

Display detailed information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

icmpv6-vrftype

Type: string

icmpv6-cxt-name

Type: string

TABLE_icmpv6_all_int

TABLE_icmpv6_one_int

icmpv6-ipv6-addr

Type: ipv6addr

time-stamp-icmpv6

Type: string

icmpv6-mac

Type: string

icmpv6-state

Type: string

icmpv6-short-name

Type: string

phy-int-short-name

Type: string

Command Modes

- /exec

show ipv6 icmp ndp

show ipv6 icmp ndp

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

ndp

Displaysipv6 neighbor by looking at the top level pt

Command Modes

- /exec

show ipv6 icmp off-list

show ipv6 icmp off-list [ vlan vlan-id ] [ __readonly__ [vlan-adj-cnt] [icmpv6-sync-adj-cnt] TABLE_icmpv6_vlan_list adj-vlan-id off-adj-ip-addr icmpv6-time-stamp icmpv6-mac-addr off-adj-flags ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

off-list

Show adjacencies in off-list icmpv6 database

vlan

Vlan id

vlan-id

Type: integer

Show information for specified vlan

__readonly__

vlan-adj-cnt

Type: integer

icmpv6-sync-adj-cnt

Type: integer

TABLE_icmpv6_vlan_list

adj-vlan-id

Type: integer

off-adj-ip-addr

Type: ipv6addr

icmpv6-time-stamp

Type: string

icmpv6-mac-addr

Type: string

off-adj-flags

Type: integer

Command Modes

- /exec

show ipv6 icmp process sdb

show ipv6 icmp process sdb

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

process

Display process information

sdb

Dump IPv6 sdb in a file

Command Modes

- /exec

show ipv6 icmp snmp pttree

show ipv6 icmp snmp pttree { static | dynamic | virtual | typeall } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

snmp

Show only snmp pttree

pttree

Petricia tree

static

show only static adjacencies in pt tree

dynamic

show only dynamic adjacencies in pt tree

virtual

show only virtual adjacencies in pt tree

typeall

show all adjacencies in pt tree

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ipv6 icmp vaddr

show ipv6 icmp vaddr { link-local [detail] | global | pt-tree } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_pt_tree v-ipv6-addr v-mac-addr v-interface v-client-state ] [ TABLE_vrf_all [ TABLE_glo_vrf group-id protocol-vrf cli-uuid vaddr-action vrf-interface v-ipv6-addr-one vaddr-mac cxt-name cxt-id ] [ TABLE_one_int [ lcache-inter cxt-name-int cxt_id-int ] grp-id protocol-one-int client-uuid client-state-act client-in-use TABLE_vip_list virt-ipv6 virt-mac cxt_name cxt_id [ last-solocit-st last-nei-ad-st last-rtr-adv-st nxt-rtr-ad-st icmpv6-addr vmac-addr st-total rv-total st-err rv-err st-int-dwn-drp rv-int-dwn-drp st-adj-nt-recov-am rv-adj-nt-recov-am st-pkt-allow-inv-ttl rv-pkt-allow-inv-ttl st-pkt-drp-src-mac-own rv-pkt-drp-src-mac-own st-pkt-drp-tgt-not-own rv-pkt-drp-tgt-not-own st-pkt-drp-src-not-own rv-pkt-drp-src-not-own st-dest-unreach rv-dest-unreach st-admin-prohi rv-admin-prohi st-time-exceed rv-time-exceed st-patr-pbm rv-patr-pbm st-echo-req rv-echo-req st-echo-reply rv-echo-reply st-dup-ra rv-dup-ra st-redirect rv-redirect st-pkt-too-big rv-pkt-too-big st-rtr-adver rv-rtr-adver st-rtr-solicit rv-rtr-solicit st-nei-adver rv-nei-adver st-nei-solicit rv-nei-solicit ] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

vaddr

Show all virtual addresses configured

link-local

Display link-local virtual ipv6 addresses

detail

Display detailed information

global

Display global virtual ipv6 addresses

pt-tree

Display link-local virtual ipv6 addresses pt-tree information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_pt_tree

v-ipv6-addr

Type: ipv6addr

v-mac-addr

Type: string

v-interface

Type: interface

v-client-state

Type: string

TABLE_vrf_all

TABLE_glo_vrf

group-id

Type: integer

protocol-vrf

Type: string

cli-uuid

Type: hex

vaddr-action

Type: string

vrf-interface

Type: interface

v-ipv6-addr-one

Type: ipv6addr

vaddr-mac

Type: string

cxt-name

Type: string

cxt-id

Type: integer

TABLE_one_int

lcache-inter

Type: interface

cxt-name-int

Type: string

cxt_id-int

Type: longlong

grp-id

Type: integer

protocol-one-int

Type: string

client-uuid

Type: hex

client-state-act

Type: string

client-in-use

Type: integer

TABLE_vip_list

virt-ipv6

Type: ipv6addr

virt-mac

Type: string

cxt_name

Type: string

cxt_id

Type: longlong

last-solocit-st

Type: string

last-nei-ad-st

Type: string

last-rtr-adv-st

Type: string

nxt-rtr-ad-st

Type: string

icmpv6-addr

Type: ipv6addr

vmac-addr

Type: string

st-total

Type: longlong

rv-total

Type: longlong

st-err

Type: longlong

rv-err

Type: longlong

st-int-dwn-drp

Type: longlong

rv-int-dwn-drp

Type: longlong

st-adj-nt-recov-am

Type: longlong

rv-adj-nt-recov-am

Type: longlong

st-pkt-allow-inv-ttl

Type: longlong

rv-pkt-allow-inv-ttl

Type: longlong

st-pkt-drp-src-mac-own

Type: longlong

rv-pkt-drp-src-mac-own

Type: longlong

st-pkt-drp-tgt-not-own

Type: longlong

rv-pkt-drp-tgt-not-own

Type: longlong

st-pkt-drp-src-not-own

Type: longlong

rv-pkt-drp-src-not-own

Type: longlong

st-dest-unreach

Type: longlong

rv-dest-unreach

Type: longlong

st-admin-prohi

Type: longlong

rv-admin-prohi

Type: longlong

st-time-exceed

Type: longlong

rv-time-exceed

Type: longlong

st-patr-pbm

Type: longlong

rv-patr-pbm

Type: longlong

st-echo-req

Type: longlong

rv-echo-req

Type: longlong

st-echo-reply

Type: longlong

rv-echo-reply

Type: longlong

st-dup-ra

Type: longlong

rv-dup-ra

Type: longlong

st-redirect

Type: longlong

rv-redirect

Type: longlong

st-pkt-too-big

Type: longlong

rv-pkt-too-big

Type: longlong

st-rtr-adver

Type: longlong

rv-rtr-adver

Type: longlong

st-rtr-solicit

Type: longlong

rv-rtr-solicit

Type: longlong

st-nei-adver

Type: longlong

rv-nei-adver

Type: longlong

st-nei-solicit

Type: longlong

rv-nei-solicit

Type: longlong

Command Modes

- /exec

show ipv6 icmp vpc-statistics

show ipv6 icmp vpc-statistics [ __readonly__ TABLE_icmpv6_vpc_stats [icmpv6-pro-drp-pull-disable] [icmpv6-pro-drp-push-msg-disable] [icmpv6-pro-ign-snd-pull-disabe] [icmpv6-ign-snd-push-disable] [icmpv6-drp-im-fail] [icmpv6-drp-mcecm-fail] [icmpv6-drp-invalid-pc-iod] [icmpv6-drp-pt-lookup-fail] [icmpv6-drp-resp-fail-no-mct] [icmpv6-drp-resp-fail] [icmpv6-resp-sent] [icmpv6-resp-recvd] [icmpv6-resp-recv-err] [icmpv6-rcvd-msg] [icmpv6-send-fail] [icmpv6-cfs-rel-dlvry-fail] [icmpv6-cfs-rel-dnvry-suc] [icmpv6-drp-pt-add-fail] [icmpv6-drp-no-mem] [icmpv6-drp-tmr-cre-fail] [icmpv6-drp-add-adj-fail] [icmpv6-off-drp-pt-lookup-fail] [icmpv6-dont-drp-vlan-mismat] [icmpv6-drp-svi-invalid] [icmpv6-dont-drop-sv-down] [icmpv6-drp-mct-down] [icmpv6-drp-ctxt-invalid] [icmpv6-drp-vrf-invalid] [icmpv6-drp-l3addr-invalid] [icmpv6-drp-l3addr-sanity-fail] [icmpv6-drp-mac-sanity-fail] [icmpv6-own-rtr-mac] [icmpv6-drp-own-ipv6addr] [icmpv6-drp-own-vipv6add] [icmpv6-drp-adj-fail] [icmpv6-drp-subnet-mismatch] [icmpv6-drp-adj-exist] [icmpv6-dont-drp-ip-not-enable] [icmpv6-drp-total-cnt] [icmpv6-dont-drop-total-cnt] [icmpv6-add-adj] [icmpv6-del-adj] [icmpv6-adj-already-exist] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

vpc-statistics

Show vPC global statistics

__readonly__

TABLE_icmpv6_vpc_stats

icmpv6 Vpc statistics

icmpv6-pro-drp-pull-disable

Type: integer

icmpv6-pro-drp-push-msg-disable

Type: integer

icmpv6-pro-ign-snd-pull-disabe

Type: integer

icmpv6-ign-snd-push-disable

Type: integer

icmpv6-drp-im-fail

Type: integer

icmpv6-drp-mcecm-fail

Type: integer

icmpv6-drp-invalid-pc-iod

Type: integer

icmpv6-drp-pt-lookup-fail

Type: integer

icmpv6-drp-resp-fail-no-mct

Type: integer

icmpv6-drp-resp-fail

Type: integer

icmpv6-resp-sent

Type: integer

icmpv6-resp-recvd

Type: integer

icmpv6-resp-recv-err

Type: integer

icmpv6-rcvd-msg

Type: integer

icmpv6-send-fail

Type: integer

icmpv6-cfs-rel-dlvry-fail

Type: integer

icmpv6-cfs-rel-dnvry-suc

Type: integer

icmpv6-drp-pt-add-fail

Type: integer

icmpv6-drp-no-mem

Type: integer

icmpv6-drp-tmr-cre-fail

Type: integer

icmpv6-drp-add-adj-fail

Type: integer

icmpv6-off-drp-pt-lookup-fail

Type: integer

icmpv6-dont-drp-vlan-mismat

Type: integer

icmpv6-drp-svi-invalid

Type: integer

icmpv6-dont-drop-sv-down

Type: integer

icmpv6-drp-mct-down

Type: integer

icmpv6-drp-ctxt-invalid

Type: integer

icmpv6-drp-vrf-invalid

Type: integer

icmpv6-drp-l3addr-invalid

Type: integer

icmpv6-drp-l3addr-sanity-fail

Type: integer

icmpv6-drp-mac-sanity-fail

Type: integer

icmpv6-own-rtr-mac

Type: integer

icmpv6-drp-own-ipv6addr

Type: integer

icmpv6-drp-own-vipv6add

Type: integer

icmpv6-drp-adj-fail

Type: integer

icmpv6-drp-subnet-mismatch

Type: integer

icmpv6-drp-adj-exist

Type: integer

icmpv6-dont-drp-ip-not-enable

Type: integer

icmpv6-drp-total-cnt

Type: integer

icmpv6-dont-drop-total-cnt

Type: integer

icmpv6-add-adj

Type: integer

icmpv6-del-adj

Type: integer

icmpv6-adj-already-exist

Type: integer

Command Modes

- /exec

show ipv6 icmp vrf

show ipv6 { icmp | nd } interface [interface] { [ prefix [full] ] | [detail] } [ vrf { vrf-name | vrf-known-name | all } ] | show ipv6 [icmp] mld interface [brief] [detail] [ vrf { vrf-name | vrf-known-name | all } ] | show ipv6 [icmp] mld interface interface [ __readonly__ TABLE_vrf vrf-name-out TABLE_intf intf-name proto-state link-state admin-state addr subnet link-local-addr icmpv6-disabled last-ns-sent last-na-sent last-ra-sent next-na-sent ra-min-interval ra-interval set-m-flag set-o-flag current-hop-limit mtu router-lifetime reachable-time retrans-timer ns-interval send-redirect send-unreachables mld-disabled mld-querier mld-entry-count mld-config-version mld-querier-version mld-host-version mld-query-timer mld-querier-expiry mld-qi mld-config-qi mld-query-mrt mld-config-query-mrt mld-startup-qi mld-config-startup-qi mld-startup-qc mld-config-last-member-mrt mld-last-member-qc mld-group-timeout mld-config-group-timeout mld-querier-timeout mld-config-querier-timeout mld-config-unsol-rpt-interval mld-qrv mld-config-robustness-variable mld-config-rpt-link-local mld-refcount static-group-map join-group-map ra-sent ra-rec rs-sent rs-rec na-sent na-rec ns-sent ns-rec redirect-sent redirect-rec msg-sent msg-rec errors-sent erros-rec ifdown-sent ifdown-rec am-ha-not-ready allow-mct-ttl our-own-mac tgt-not-us dest-unreachs-sent dest-unreachs-rec admin-prohibs-sent admin-prohibs-rec time-excds-sent time-excds-rec parm-problems-sent parm-problems-rec echos-sent echos-rec echo-replies-sent echo-replies-rec pkt-toobigs-sent pkt-toobigs-rec fastpath-pkt-recv fastpath-disable-pkt-recv fastpath-ignore-pkt-recv v1-queries-sent v1-queries-rec v2-queries-sent v2-queries-rec v1-reports-sent v1-reports-rec v2-reports-sent v2-reports-rec v1-leaves-sent v1-leaves-rec v2-leaves-sent v2-leaves-rec uptime mld-config-il ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

nd

Display Neighbor Discovery interface information

mld

Display Multicast Listener Discovery information

interface

Display ICMPv6 related interface information

prefix

Display List of ICMPv6 RA prefix

full

Display Complete prefix information

detail

Display ICMPv6 related interface information in detail

brief

Display ICMPv6 related interface information in brief

interface

Type: interface

Interface name to show

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_intf

intf-name

Type: interface

proto-state

Type: bool

link-state

Type: bool

admin-state

Type: bool

addr

Type: ipv6addr

subnet

Type: ipv6prefix

link-local-addr

Type: ipv6addr

icmpv6-disabled

Type: bool

last-ns-sent

Type: string

last-na-sent

Type: string

last-ra-sent

Type: string

next-na-sent

Type: string

ra-min-interval

Type: string

ra-interval

Type: string

set-m-flag

Type: bool

set-o-flag

Type: bool

current-hop-limit

Type: uinteger

mtu

Type: uinteger

router-lifetime

Type: uinteger

reachable-time

Type: uinteger

retrans-timer

Type: uinteger

ns-interval

Type: uinteger

send-redirect

Type: bool

send-unreachables

Type: bool

mld-disabled

Type: bool

mld-querier

Type: ipv6addr

mld-entry-count

Type: uinteger

mld-config-version

Type: uinteger

mld-querier-version

Type: string

mld-host-version

Type: uinteger

mld-query-timer

Type: string

mld-querier-expiry

Type: uinteger

mld-qi

Type: uinteger

mld-config-qi

Type: uinteger

mld-query-mrt

Type: uinteger

mld-config-query-mrt

Type: uinteger

mld-startup-qi

Type: uinteger

mld-config-startup-qi

Type: uinteger

mld-startup-qc

Type: uinteger

mld-config-last-member-mrt

Type: uinteger

mld-last-member-qc

Type: uinteger

mld-group-timeout

Type: uinteger

mld-config-group-timeout

Type: uinteger

mld-querier-timeout

Type: uinteger

mld-config-querier-timeout

Type: uinteger

mld-config-unsol-rpt-interval

Type: uinteger

mld-qrv

Type: uinteger

mld-config-robustness-variable

Type: uinteger

mld-config-rpt-link-local

Type: bool

mld-refcount

Type: uinteger

static-group-map

Type: string

join-group-map

Type: string

ra-sent

Type: uinteger

ra-rec

Type: uinteger

rs-sent

Type: uinteger

rs-rec

Type: uinteger

na-sent

Type: uinteger

na-rec

Type: uinteger

ns-sent

Type: uinteger

ns-rec

Type: uinteger

redirect-sent

Type: uinteger

redirect-rec

Type: uinteger

msg-sent

Type: uinteger

msg-rec

Type: uinteger

errors-sent

Type: uinteger

erros-rec

Type: uinteger

ifdown-sent

Type: uinteger

ifdown-rec

Type: uinteger

am-ha-not-ready

Type: uinteger

allow-mct-ttl

Type: uinteger

our-own-mac

Type: uinteger

tgt-not-us

Type: uinteger

dest-unreachs-sent

Type: uinteger

dest-unreachs-rec

Type: uinteger

admin-prohibs-sent

Type: uinteger

admin-prohibs-rec

Type: uinteger

time-excds-sent

Type: uinteger

time-excds-rec

Type: uinteger

parm-problems-sent

Type: uinteger

parm-problems-rec

Type: uinteger

echos-sent

Type: uinteger

echos-rec

Type: uinteger

echo-replies-sent

Type: uinteger

echo-replies-rec

Type: uinteger

pkt-toobigs-sent

Type: uinteger

pkt-toobigs-rec

Type: uinteger

fastpath-pkt-recv

Type: uinteger

fastpath-disable-pkt-recv

Type: uinteger

fastpath-ignore-pkt-recv

Type: uinteger

v1-queries-sent

Type: uinteger

v1-queries-rec

Type: uinteger

v2-queries-sent

Type: uinteger

v2-queries-rec

Type: uinteger

v1-reports-sent

Type: uinteger

v1-reports-rec

Type: uinteger

v2-reports-sent

Type: uinteger

v2-reports-rec

Type: uinteger

v1-leaves-sent

Type: uinteger

v1-leaves-rec

Type: uinteger

v2-leaves-sent

Type: uinteger

v2-leaves-rec

Type: uinteger

uptime

Type: string

mld-config-il

Type: bool

Command Modes

- /exec

show ipv6 interface

show ipv6 interface [ brief [include-secondary] | [ interface | ipv6-addr ] [detail] ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_vrf vrf-name-out ] [ TABLE_intf intf-name [proto-state] [link-state] [admin-state] [iod] [addr] [prefix] [ TABLE_sec_addr [sec-prefix] ] [linklocal-addr] [linklocal-configured] [ipv6-disabled] [mrouting-enabled] [mgroup-locally-joined] [ TABLE_maddr m-addr [m-addr-refcnt] ] [ TABLE_sg [sg-saddr] [sg-maddr] [sg-refcnt] ] [mtu] [global-in-pcl-configured] [global-in-pcl-name] [global-in-pcl-pending] [global-out-pcl-configured] [global-out-pcl-name] [global-out-pcl-pending] [in-pcl-configured] [in-pcl-name] [in-pcl-pending] [out-pcl-configured] [out-pcl-name] [out-pcl-pending] [urpf-mode] [ipv6-lstype] [stats-last-reset] [upkt-fwd] [upkt-orig] [upkt-consumed] [ubyte-fwd] [ubyte-orig] [ubyte-consumed] [mpkt-fwd] [mpkt-orig] [mpkt-consumed] [mbyte-fwd] [mbyte-orig] [mbyte-consumed] [upkt-in-acc] [upkt-in-rej] [ubyte-in-acc] [ubyte-in-rej] [mpkt-in-acc] [mpkt-in-rej] [mbyte-in-acc] [mbyte-in-rej] [upkt-out-acc] [upkt-out-rej] [ubyte-out-acc] [ubyte-out-rej] [mpkt-out-acc] [mpkt-out-rej] [mbyte-out-acc] [mbyte-out-rej] [hw-upkt-sent] [hw-upkt-recv] [hw-ubyte-sent] [hw-ubyte-recv] [hw-mpkt-sent] [hw-mpkt-recv] [hw-mbyte-sent] [hw-mbyte-recv] [hw-upkt-drop] [hw-ubyte-drop] [hw-mpkt-drop] [hw-mbyte-drop] [hw-mpkt-rpdrop] [hw-mbyte-rpdrop] [hw-mpkt-dfdrop] [hw-mbyte-dfdrop] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

interface

Display IPv6 related interface information

brief

Display summary of IPv6 status and configuration

include-secondary

Display summary of all IPv6 addresses

interface

Type: interface

Interface name to display

detail

Display detailed IPv6 interface information

ipv6-addr

Type: ipv6addr

IPv6 address format: aaaa:bbbb:cccc:dddd:eeee:ffff:gggg:hhhh, aaaa::bbbb

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display all VRFs

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_intf

intf-name

Type: interface

proto-state

Type: string

link-state

Type: string

admin-state

Type: string

iod

Type: uinteger

addr

Type: ipv6addr

prefix

Type: string

TABLE_sec_addr

sec-prefix

Type: string

linklocal-addr

Type: ipv6addr

linklocal-configured

Type: string

ipv6-disabled

Type: string

mrouting-enabled

Type: string

mgroup-locally-joined

Type: string

TABLE_maddr

m-addr

Type: ipv6addr

m-addr-refcnt

Type: uinteger

TABLE_sg

sg-saddr

Type: ipv6addr

sg-maddr

Type: ipv6addr

sg-refcnt

Type: uinteger

mtu

Type: uinteger

global-in-pcl-configured

Type: bool

global-in-pcl-name

Type: string

global-in-pcl-pending

Type: bool

global-out-pcl-configured

Type: bool

global-out-pcl-name

Type: string

global-out-pcl-pending

Type: bool

in-pcl-configured

Type: bool

in-pcl-name

Type: string

in-pcl-pending

Type: bool

out-pcl-configured

Type: bool

out-pcl-name

Type: string

out-pcl-pending

Type: bool

urpf-mode

none  value: 0

loose  value: 1

strict  value: 2

ipv6-lstype

none  value: 0

default  value: 1

per-packet  value: 2

stats-last-reset

Type: string

upkt-fwd

Type: uinteger

upkt-orig

Type: uinteger

upkt-consumed

Type: uinteger

ubyte-fwd

Type: uinteger

ubyte-orig

Type: uinteger

ubyte-consumed

Type: uinteger

mpkt-fwd

Type: uinteger

mpkt-orig

Type: uinteger

mpkt-consumed

Type: uinteger

mbyte-fwd

Type: uinteger

mbyte-orig

Type: uinteger

mbyte-consumed

Type: uinteger

upkt-in-acc

Type: uinteger

upkt-in-rej

Type: uinteger

ubyte-in-acc

Type: uinteger

ubyte-in-rej

Type: uinteger

mpkt-in-acc

Type: uinteger

mpkt-in-rej

Type: uinteger

mbyte-in-acc

Type: uinteger

mbyte-in-rej

Type: uinteger

upkt-out-acc

Type: uinteger

upkt-out-rej

Type: uinteger

ubyte-out-acc

Type: uinteger

ubyte-out-rej

Type: uinteger

mpkt-out-acc

Type: uinteger

mpkt-out-rej

Type: uinteger

mbyte-out-acc

Type: uinteger

mbyte-out-rej

Type: uinteger

hw-upkt-sent

Type: uinteger

hw-upkt-recv

Type: uinteger

hw-ubyte-sent

Type: uinteger

hw-ubyte-recv

Type: uinteger

hw-mpkt-sent

Type: uinteger

hw-mpkt-recv

Type: uinteger

hw-mbyte-sent

Type: uinteger

hw-mbyte-recv

Type: uinteger

hw-upkt-drop

Type: uinteger

hw-ubyte-drop

Type: uinteger

hw-mpkt-drop

Type: uinteger

hw-mbyte-drop

Type: uinteger

hw-mpkt-rpdrop

Type: uinteger

hw-mbyte-rpdrop

Type: uinteger

hw-mpkt-dfdrop

Type: uinteger

hw-mbyte-dfdrop

Type: uinteger

Command Modes

- /exec

show ipv6 interface global

show ipv6 interface global

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

interface

Display IPv6 related interface information

global

Show IPv6 global parameters

Command Modes

- /exec

show ipv6 lisp data-cache

show ipv6 lisp data-cache [eid] [ vrf { vrf-name | vrf-known-name } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

lisp

LISP show commands Not available in this release.

data-cache

Display EID-to-RLOC data cache mapping in this ITR

eid

Type: ipaddr

Display mapping for IPv6 destination EID

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

Command Modes

- /exec

show ipv6 local-pt

show ipv6 local-pt [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

local-pt

Display IPv6 local address pt data structure

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display all VRFs

Command Modes

- /exec

show ipv6 local policy

show ipv6 local policy [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_pbr interface rmap status vrf_name ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

local

IPv6 local options

policy

Policy routing

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_pbr

interface

Type: string

rmap

Type: string

status

Type: string

vrf_name

Type: string

Command Modes

- /exec

show ipv6 mld groups

show ipv6 [icmp] mld groups [ source [group] | group [source] ] [interface] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name-out entry-count TABLE_group group-out TABLE_intf intf-name icmpv6-disabled mld-source mld-group mld-source-unspec mld-static mld-local-group mld-translated mld-uptime mld-expire ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

mld

Display Multicast Listener Discovery information

groups

Display MLD attached group membership information

source

Type: ipv6addr

Source IP address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

group

Type: ipv6addr

Multicast IPv6 address of group to display

interface

Type: interface

Display group membership on interface name

__readonly__

TABLE_vrf

vrf-name-out

Type: string

entry-count

Type: uinteger

TABLE_group

group-out

Type: ipv6addr

TABLE_intf

intf-name

Type: interface

icmpv6-disabled

Type: bool

mld-source

Type: ipv6addr

mld-group

Type: ipv6addr

mld-source-unspec

Type: bool

mld-static

Type: bool

mld-local-group

Type: bool

mld-translated

Type: bool

mld-uptime

Type: uinteger

mld-expire

Type: uinteger

Command Modes

- /exec

show ipv6 mld local-groups

show ipv6 [icmp] mld local-groups [interface] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf TABLE_entry group-addr source-addr static-oif local-group if-name last-reported ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

mld

Display Multicast Listener Discovery information

local-groups

Display MLD local group membership information

interface

Type: interface

Display group membership on interface name

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

vrf

Type: vrf

TABLE_entry

group-addr

Type: ipv6addr

source-addr

Type: ipv6addr

static-oif

Type: bool

local-group

Type: bool

if-name

Type: interface

last-reported

Type: duration

Command Modes

- /exec

show ipv6 mld vrf all

show ipv6 [icmp] mld vrf all

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

icmp

Display ICMPv6 information

mld

Display Multicast Listener Discovery information

vrf

Display per-VRF information

all

Display MLD VRFs

Command Modes

- /exec

show ipv6 mtu

show ipv6 mtu [ statistics | vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_mtu_stat out-ent exp-ent purge-ent int-err pkt-too-big cache-miss cache-upd mtu-small cache-no-upd ] [ TABLE_mtu_vrf [tot-ipv6-mtu] [ TABLE_one_mtu [pmtu-cntxt] [ mtu-ipv6 mtu-cache up-time iod-lcache ] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPV6 information

mtu

Display IPV6 Path MTU Cache

statistics

Display non-TCP Path MTU Statistics

vrf

Clear information for particular VRF

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_mtu_stat

out-ent

Type: longlong

exp-ent

Type: longlong

purge-ent

Type: longlong

int-err

Type: longlong

pkt-too-big

Type: longlong

cache-miss

Type: longlong

cache-upd

Type: longlong

mtu-small

Type: longlong

cache-no-upd

Type: longlong

TABLE_mtu_vrf

tot-ipv6-mtu

Type: integer

TABLE_one_mtu

pmtu-cntxt

Type: string

mtu-ipv6

Type: ipv6addr

mtu-cache

Type: integer

up-time

Type: string

iod-lcache

Type: string

Command Modes

- /exec

show ipv6 ndp

show ipv6 ndp

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ndp

Show IPv6 neighbors from netstack

Command Modes

- /exec

show ipv6 neighbor static

show ipv6 neighbor static [ interface interface ] [ __readonly__ [ TABLE_i6_nei nei-ipv6 nei-mac nei-iod nei-if-iod ] [tot-nei-ent] [ TABLE_nei_cnt nei-ipv6-tot nei-mac-tot nei-iod-tot nei-if-iod-tot ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

neighbor

Show IPv6 neighbor entry

static

Displays only static neighbors

interface

Display IPv6 related interface information

interface

Type: interface

Interface name to display

__readonly__

TABLE_i6_nei

nei-ipv6

Type: ipv6addr

nei-mac

Type: string

nei-iod

Type: string

nei-if-iod

Type: string

tot-nei-ent

Type: longlong

TABLE_nei_cnt

nei-ipv6-tot

Type: ipv6addr

nei-mac-tot

Type: string

nei-iod-tot

Type: string

nei-if-iod-tot

Type: string

Command Modes

- /exec

show ipv6 neighbors

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] neighbors { [ { neighbor-id | ipv6-neighbor-id } [ routes [ advertised | received | dampened ] | advertised-routes | paths | received-routes | flap-statistics ] ] | neighbor-prefix-id | ipv6-neighbor-prefix-id } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

neighbors

Display all configured BGP neighbors

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

neighbor-id

Type: ipaddr

Display one particular BGP neighbor

ipv6-neighbor-id

Type: ipv6addr

Display one particular IPv6 BGP neighbor

neighbor-prefix-id

Type: ipprefix

Display details for a prefix peering

ipv6-neighbor-prefix-id

Type: ipv6prefix

Display details for an IPv6 prefix peering

ipv6

Display BGP information for IPv6 address family

routes

Display all routes advertised/received to/from peer

advertised

Display all routes advertised to this peer

received

Display all routes received from this peer

dampened

Display all dampened routes received from this peer

advertised-routes

Display all the routes advertised to this peer

received-routes

Display all the routes received from this peer

flap-statistics

Display flap statistics for routes received from this peer

paths

Display AS paths learned from this peer

Command Modes

- /exec

show ipv6 nexthop

show ipv6 { bgp | mbgp } nexthop ipv6nexthop

Syntax Description

show

Show running system information

ipv6

Display BGP information for IPv6 address family

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

nexthop

Display routes matching the nexthop

ipv6nexthop

Type: ipv6addr

Nexthop address

Command Modes

- /exec

show ipv6 nexthop-database

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] nexthop-database [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

nexthop-database

Display nexthop database

ipv6

Display BGP information for IPv6 address family

Command Modes

- /exec

show ipv6 pim bitfield

show ipv6 pim bitfield

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

bitfield

Display compressed bitfield details

Command Modes

- /exec

show ipv6 pim df

show ipv6 pim df [rp-or-group] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context TABLE_rp rp-addr df-ordinal df-bits df-bits-count metric-pref metric TABLE_grange grange-grp grange-masklen TABLE_iod if-name df-winner df-state winner-metric-pref winner-metric uptime is-rpf ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

df

Display Bidir Designated Forwarders

rp-or-group

Type: ipv6addr

Display for a single RP or group address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

TABLE_rp

rp-addr

Type: ipv6addr

df-ordinal

Type: uinteger

df-bits

Type: string

df-bits-count

Type: uinteger

metric-pref

Type: uinteger

metric

Type: uinteger

TABLE_grange

grange-grp

Type: ipv6addr

grange-masklen

Type: uinteger

TABLE_iod

if-name

Type: interface

df-winner

Type: ipv6addr

df-state

Unknown  value: 1

Offer  value: 2

Loser  value: 3

Winner  value: 4

Backoff  value: 5

Illegal  value: 6

winner-metric-pref

Type: uinteger

winner-metric

Type: uinteger

uptime

Type: duration

is-rpf

Type: bool

Command Modes

- /exec

show ipv6 pim embed-rp

show ipv6 pim embed-rp group

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

embed-rp

Display Embed-RP group address mapping

group

Type: ipv6addr

Enter Embed-RP group address

Command Modes

- /exec

show ipv6 pim group-range

show ipv6 pim group-range [group] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context TABLE_group grp-addr invalid-grp mode rp-addr sh-tree-only-range ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

group-range

Display the various group ranges

group

Type: ipv6addr

IPV6 address of group to display

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

TABLE_group

invalid-grp

Type: bool

grp-addr

Type: ipv6addr

mode

rp-addr

Type: ipv6addr

sh-tree-only-range

Type: ipv6prefix

Command Modes

- /exec

show ipv6 pim interfaceshow ipv6 pim interface

show ipv6 pim interface interface | show ipv6 pim interface [brief] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context TABLE_iod if-name if-addr dr nbr-cnt is-border is-iface-in-cib is-pim-enabled if-addr-summary if-status dr-priority no-dr-priority hello-interval-sec hello-interval-msec hello-timer holdtime-sec holdtime-msec genid isauth-config nbr-policy-name jp-in-policy-name jp-out-policy-name last-cleared hello-sent hello-rcvd jp-sent jp-rcvd assert-sent assert-rcvd graft-sent graft-rcvd graft-ack-sent graft-ack-rcvd df-offer-sent df-offer-rcvd df-winner-sent df-winner-rcvd df-backoff-sent df-backoff-rcvd pass-sent pass-rcvd cksum-errors invalid-errors invalid-df-errors auth-failed pak-len-errors ver-errors pkts-self pkts-non-nbr jp-rcvd-on-rpf jp-rcvd-no-rp jp-rcvd-wrong-rp jp-rcvd-for-ssm jp-rcvd-for-bidir jp-in-policy-filter jp-out-policy-filter ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

interface

Display PIM6 interface related information

interface

Type: interface

Interface name of single interface to display

brief

Display one line status per interface

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

TABLE_iod

if-name

Type: interface

if-addr

Type: ipv6addr

dr

Type: ipv6addr

nbr-cnt

Type: uinteger

is-iface-in-cib

Type: bool

is-pim-enabled

Type: bool

is-border

Type: bool

if-addr-summary

Type: string

if-status

Type: string

dr-priority

Type: uinteger

no-dr-priority

Type: bool

hello-interval-sec

Type: uinteger

hello-interval-msec

Type: uinteger

hello-timer

Type: duration

holdtime-sec

Type: uinteger

holdtime-msec

Type: uinteger

genid

Type: uinteger

isauth-config

Type: bool

nbr-policy-name

Type: string

jp-in-policy-name

Type: string

jp-out-policy-name

Type: string

last-cleared

Type: duration

hello-sent

Type: uinteger

hello-rcvd

Type: uinteger

jp-sent

Type: uinteger

jp-rcvd

Type: uinteger

assert-sent

Type: uinteger

assert-rcvd

Type: uinteger

graft-sent

Type: uinteger

graft-rcvd

Type: uinteger

graft-ack-sent

Type: uinteger

graft-ack-rcvd

Type: uinteger

df-offer-sent

Type: uinteger

df-offer-rcvd

Type: uinteger

df-winner-sent

Type: uinteger

df-winner-rcvd

Type: uinteger

df-backoff-sent

Type: uinteger

df-backoff-rcvd

Type: uinteger

pass-sent

Type: uinteger

pass-rcvd

Type: uinteger

cksum-errors

Type: uinteger

invalid-errors

Type: uinteger

invalid-df-errors

Type: uinteger

auth-failed

Type: uinteger

pak-len-errors

Type: uinteger

ver-errors

Type: uinteger

pkts-self

Type: uinteger

pkts-non-nbr

Type: uinteger

jp-rcvd-on-rpf

Type: uinteger

jp-rcvd-no-rp

Type: uinteger

jp-rcvd-wrong-rp

Type: uinteger

jp-rcvd-for-ssm

Type: uinteger

jp-rcvd-for-bidir

Type: uinteger

jp-in-policy-filter

Type: uinteger

jp-out-policy-filter

Type: uinteger

Command Modes

- /exec

show ipv6 pim neighbor

show ipv6 pim neighbor { [interface] | [ipv6addr] } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context TABLE_iod if-name if-addr is-iface-in-cib is-pim-enabled TABLE_neighbor nbr-addr is-nbr-in-cib does-nbr-exist uptime expires dr-priority no-dr-priority bidir-capable name no-name sec-addr no-sec-addr ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

neighbor

Display PIM6 neighbor related information

interface

Type: interface

Display neighbors on single interface name

ipv6addr

Type: ipv6addr

IPV6 address of single neighbor to display

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

TABLE_iod

if-name

Type: interface

if-addr

Type: ipv6addr

is-iface-in-cib

Type: bool

is-pim-enabled

Type: bool

TABLE_neighbor

nbr-addr

Type: ipv6addr

is-nbr-in-cib

Type: bool

does-nbr-exist

Type: bool

uptime

Type: duration

expires

Type: duration

dr-priority

Type: uinteger

no-dr-priority

Type: bool

bidir-capable

Type: bool

name

Type: string

no-name

Type: bool

sec-addr

Type: ipv6addr

no-sec-addr

Type: bool

Command Modes

- /exec

show ipv6 pim oif-list

show ipv6 pim oif-list group [source] [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

oif-list

Display interfaces for oif-list of PIM6 route

source

Type: ipv6addr

Source address to display

group

Type: ipv6addr

Group address to display

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ipv6 pim policy statistics

show ipv6 pim policy statistics { jp-policy | neighbor-policy } interface

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

PIM6 global configuration commands

policy

Policy related information

statistics

Policy statistics

jp-policy

Statistics for jp-policy

neighbor-policy

Statistics for neighbor-policy

interface

Type: interface

Interface to display policy statistics for

Command Modes

- /exec

show ipv6 pim route

show ipv6 pim route { [bitfield] | source group | group [source] [bitfield] } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

route

Display PIM6 specific route information

group

Type: ipv6addr

Group address to display

source

Type: ipv6addr

Source address to display

bitfield

Display details of each bitfield for PIM6 route

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ipv6 pim rp-hash

show ipv6 pim rp-hash group [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context rp-found is-rp-bsr-learnt out-group hash-length out-bsr TABLE_rp rp-addr hash isbest_hash ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

rp-hash

Display RP hash value for group

group

Type: ipv6addr

Group address for RP lookup

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

rp-found

Type: bool

is-rp-bsr-learnt

Type: bool

out-group

Type: ipv6addr

hash-length

Type: integer

out-bsr

Type: ipv6addr

TABLE_rp

rp-addr

Type: ipv6addr

hash

Type: uinteger

isbest_hash

Type: bool

Command Modes

- /exec

show ipv6 pim rp

show ipv6 pim rp [group] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ out-context is-bsr-enabled is-bsr-listen-only is-bsr-forward-only are-we-bsr bsr-address is-bsr-address bsr-priority bsr-hash-masklen bs-timer bsr-uptime bsr-expires is-autorp-enabled is-autorp-listen-only is-autorp-forward-only are-we-autorp autorp-address is-autorp-address autorp-dis-timer autorp-up-time autorp-expire-time rp-cand-policy-name bsr-policy-name rp-announce-policy-name rp-discovery-policy-name TABLE_anycast_rp anycast-rp-addr TABLE_arp_rp arp-rp-addr is-rpaddr-local TABLE_rp rp-addr is-rp-in-cib df-ordinal rp-uptime rp-priority autorp-expires bsr-rp-expires autorp-info-src bsr-info-src is-rp-static static-rp-group-map TABLE_grange grange-grp grange-masklen is-bidir-grp is-autorp-rp-owner is-bsr-rp-owner is-static-rp-owner ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

rp

Display PIM6 RP, Auto-RP, and BSR related information

group

Type: ipv6addr

Display RP for group address

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

out-context

Type: vrf

is-bsr-enabled

Type: bool

is-bsr-listen-only

Type: bool

is-bsr-forward-only

Type: bool

are-we-bsr

Type: bool

bsr-address

Type: ipv6addr

is-bsr-address

Type: bool

bsr-priority

Type: uinteger

bsr-hash-masklen

Type: uinteger

bs-timer

Type: duration

bsr-uptime

Type: duration

bsr-expires

Type: duration

is-autorp-enabled

Type: bool

is-autorp-listen-only

Type: bool

is-autorp-forward-only

Type: bool

are-we-autorp

Type: bool

autorp-address

Type: ipv6addr

is-autorp-address

Type: bool

autorp-dis-timer

Type: duration

autorp-up-time

Type: duration

autorp-expire-time

Type: duration

rp-cand-policy-name

Type: string

bsr-policy-name

Type: string

rp-announce-policy-name

Type: string

rp-discovery-policy-name

Type: string

TABLE_anycast_rp

anycast-rp-addr

Type: ipv6addr

TABLE_arp_rp

arp-rp-addr

Type: ipv6addr

is-rpaddr-local

Type: bool

TABLE_rp

rp-addr

Type: ipv6addr

is-rp-in-cib

Type: bool

df-ordinal

Type: uinteger

rp-uptime

Type: duration

rp-priority

Type: integer

autorp-expires

Type: duration

bsr-rp-expires

Type: duration

autorp-info-src

Type: ipv6addr

bsr-info-src

Type: ipv6addr

is-rp-static

Type: bool

static-rp-group-map

Type: string

TABLE_grange

grange-grp

Type: ipv6addr

grange-masklen

Type: uinteger

is-bidir-grp

Type: bool

is-autorp-rp-owner

Type: bool

is-bsr-rp-owner

Type: bool

is-static-rp-owner

Type: bool

Command Modes

- /exec

show ipv6 pim statistics

show ipv6 pim statistics [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ uptime reg-sent reg-rcvd null-reg-sent null-reg-rcvd reg-stop-sent reg-stop-rcvd reg-rcvd-not-rp reg-rcvd-for-ssm reg-rcvd-for-bidir bootstrap-sent bootstrap-rcvd cand-rp-sent cand-rp-rcvd bs-no-nbr bs-border-deny bs-len-errors bs-rpf-failed bs-no-listen candrp-border-deny candrp-no-listen autorp-announce-sent autorp-announce-rcvd autorp-discovery-sent autorp-discovery-rcvd autorp-rpf-failed autorp-border-deny autorp-invalid-type autorp-ttl-expired autorp-no-listen ctrl-no-route data-no-route no-state create-state ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

statistics

Packet counter statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

uptime

Type: duration

reg-sent

Type: uinteger

reg-rcvd

Type: uinteger

null-reg-sent

Type: uinteger

null-reg-rcvd

Type: uinteger

reg-stop-sent

Type: uinteger

reg-stop-rcvd

Type: uinteger

reg-rcvd-not-rp

Type: uinteger

reg-rcvd-for-ssm

Type: uinteger

reg-rcvd-for-bidir

Type: uinteger

bootstrap-sent

Type: uinteger

bootstrap-rcvd

Type: uinteger

cand-rp-sent

Type: uinteger

cand-rp-rcvd

Type: uinteger

bs-no-nbr

Type: uinteger

bs-border-deny

Type: uinteger

bs-len-errors

Type: uinteger

bs-rpf-failed

Type: uinteger

bs-no-listen

Type: uinteger

candrp-border-deny

Type: uinteger

candrp-no-listen

Type: uinteger

autorp-announce-sent

Type: uinteger

autorp-announce-rcvd

Type: uinteger

autorp-discovery-sent

Type: uinteger

autorp-discovery-rcvd

Type: uinteger

autorp-rpf-failed

Type: uinteger

autorp-border-deny

Type: uinteger

autorp-invalid-type

Type: uinteger

autorp-ttl-expired

Type: uinteger

autorp-no-listen

Type: uinteger

ctrl-no-route

Type: uinteger

data-no-route

Type: uinteger

no-state

Type: uinteger

create-state

Type: uinteger

Command Modes

- /exec

show ipv6 pim vrf

show ipv6 pim vrf [ vrf-name | vrf-known-name | all ] [detail] [ __readonly__ TABLE_context out-context context-id table-id count ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

pim

Display PIM6 status and configuration

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display all VRFs PIM6 is configured for

detail

Display detailed information

__readonly__

TABLE_context

out-context

Type: vrf

context-id

Type: uinteger

table-id

Type: uinteger

count

Type: uinteger

Command Modes

- /exec

show ipv6 policy

show ipv6 policy [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_pbr interface rmap status vrf_name ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

policy

Policy routing

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_pbr

interface

Type: string

rmap

Type: string

status

Type: string

vrf_name

Type: string

Command Modes

- /exec

show ipv6 prefix-list

show ipv6 prefix-list { [ detail | summary ] [ ipv6-pfl-name | ipv6-pfl-cfg-name ] | { ipv6-pfl-name | ipv6-pfl-cfg-name } seq seq-no | { ipv6-pfl-name | ipv6-pfl-cfg-name } prefix [ first-match | longer ] } [ __readonly__ TABLE_ipv6_pfl name seq action rule ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

detail

Show detailed information

summary

Show summarized information

prefix-list

List IPv6 prefix lists

ipv6-pfl-name

Type: string

pattern: [!-~]*

length: 63

Name of prefix-list

ipv6-pfl-cfg-name

Type: string

Known prefix-list name

seq

Sequence number

seq-no

Type: uinteger

min: 1  max: 4294967294

Sequence number

prefix

Type: ipv6prefix

IPv6 prefix network/length

first-match

Find the first match

longer

Find the more specific entries

__readonly__

TABLE_ipv6_pfl

name

Type: string

seq

Type: uinteger

action

Type: string

rule

Type: string

Command Modes

- /exec

show ipv6 process

show ipv6 process [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_ipv6_all cnxt-name cnxt-id ] [ TABLE_ipv6 ipv6-vrf ipv6-vrf-id auto-disc auto-add sta-disc sta-def [ipv6-unreach] [ TABLE_iod iod-val iod-ifind ] [ TABLE_ipv6_nxt ipv6-nxt ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

process

Display IPv6 global information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display all VRFs

__readonly__

TABLE_ipv6_all

cnxt-name

Type: string

cnxt-id

Type: longlong

TABLE_ipv6

ipv6-vrf

Type: string

ipv6-vrf-id

Type: longlong

auto-disc

Type: string

auto-add

Type: string

sta-disc

Type: string

sta-def

Type: longlong

ipv6-unreach

Type: longlong

TABLE_iod

iod-val

Type: integer

iod-ifind

Type: hex

TABLE_ipv6_nxt

ipv6-nxt

Type: ipv6addr

Command Modes

- /exec

show ipv6 process sdb

show ipv6 process sdb

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

process

Display IPv6 global information

sdb

Dump IPv6 sdb in a file

Command Modes

- /exec

show ipv6 received-paths

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] received-paths [private] [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ipv6

Display BGP information for IPv6 address family

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

received-paths

Display paths stored for soft-reconfig

private

private

Command Modes

- /exec

show ipv6 regexp

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] regexp regexp-str [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ipv6

Display BGP information for IPv6 address family

regexp

Display routes matching the AS path regular expression

regexp-str

Type: string

Regular expression to match the AS paths

Command Modes

- /exec

show ipv6 rip policy statistics redistribute

show ipv6 rip [ instance inst ] policy statistics redistribute { bgp as | { eigrp | isis | src-rip | ospfv3 | lisp } tag | direct | static } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

rip

Display RIP routing protocol status

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

policy

Policy related information

statistics

Policy statistics

redistribute

RIP redistribute routes from other routing protocol

bgp

Border Gateway Protocol (BGP)

as

Type: asn

Autonomous system number

eigrp

Enhanced Interior Gateway Routing Protocol (EIGRP)

isis

Intermediate-to-intermediate (ISIS)

<src-rip>

Routing Information Protocol (RIP)

ospfv3

Open Shortest Path First (OSPFv3)

lisp

LISP EID-prefixes

tag

Type: string

Process tag

direct

Directly connected routes

static

Static routes

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

Command Modes

- /exec

show ipv6 routers

show ipv6 routers [all-routers] [ [ interface interface ] | [ vrf { vrf-name | vrf-known-name | all } ] ] [ __readonly__ TABLE_ipv6_routers [ TABLE_interface_ipv6 rtr-ipv6 ipv6-int-addr rtr-flo-time curr-hop-lmt life-time addr-flag other-flg mtu-rtr hm-agent-flg preference reach-time retrans-time [ TABLE_prefix_ipv6 ipv6-prefix buf-ipv6 buf-autono valid-life-time prefer-life ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

routers

Display neighbor router information

all-routers

All routers even on down interface

interface

Display neighbor router information on interface

interface

Type: interface

Interface name to display

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_ipv6_routers

TABLE_interface_ipv6

rtr-ipv6

Type: ipv6addr

ipv6-int-addr

Type: interface

rtr-flo-time

Type: float

curr-hop-lmt

Type: integer

life-time

Type: integer

addr-flag

Type: integer

other-flg

Type: integer

mtu-rtr

Type: integer

hm-agent-flg

Type: integer

preference

Type: string

reach-time

Type: longlong

retrans-time

Type: longlong

TABLE_prefix_ipv6

ipv6-prefix

Type: string

buf-ipv6

Type: string

buf-autono

Type: string

valid-life-time

Type: longlong

prefer-life

Type: longlong

Command Modes

- /exec

show ipv6 static-route

show ipv6 static-route [prefix] [multicast] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_route prefix-out next-hop intf-name pref real-nh has-real-intf real-intf-name ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

static-route

Display configured static routes

multicast

Display configured static mroutes

all

Display all VRFs

prefix

Type: ipv6prefix

IPv6 prefix format: xxxx:xxxx/ml, xxxx:xxxx::/ml, xxxx::xx/128

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_route

prefix-out

Type: ipv6prefix

next-hop

Type: ipv6addr

intf-name

Type: interface

pref

Type: uinteger

real-nh

Type: ipv6addr

has-real-intf

Type: bool

real-intf-name

Type: interface

Command Modes

- /exec

show ipv6 statistics

show ipv6 statistics

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

statistics

Display IPv6 global statistics

Command Modes

- /exec

show ipv6 summary

show ipv6 { bgp | mbgp } [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] summary [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

summary

Display summarized information of BGP state

ipv6

Display BGP information for IPv6 address family

Command Modes

- /exec

show ipv6 traffic

show ipv6 traffic [detail] [ vrf { vrf-name | vrf-known-name } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_ipv6_traffic uptime upkt-fwd mpkt-fwd ubyte-fwd mbyte-fwd upkt-orig mpkt-orig ubyte-orig mbyte-orig upkt-consumed mpkt-consumed ubyte-consumed mbyte-consumed ufrag-orig mfra-orig ufrag-consumed mfrag-consumed bad-version rt-lookup-fail hoplimit-excd opt-header-error pld-length-too-small pm-failed mbuf-error could-not-enc ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

traffic

Display IPv6 traffic statistics

detail

Display per protocol IPv6 statistics

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_ipv6_traffic

uptime

Type: string

upkt-fwd

Type: uinteger

mpkt-fwd

Type: uinteger

ubyte-fwd

Type: uinteger

mbyte-fwd

Type: uinteger

upkt-orig

Type: uinteger

mpkt-orig

Type: uinteger

ubyte-orig

Type: uinteger

mbyte-orig

Type: uinteger

upkt-consumed

Type: uinteger

mpkt-consumed

Type: uinteger

ubyte-consumed

Type: uinteger

mbyte-consumed

Type: uinteger

ufrag-orig

Type: uinteger

mfra-orig

Type: uinteger

ufrag-consumed

Type: uinteger

mfrag-consumed

Type: uinteger

bad-version

Type: uinteger

rt-lookup-fail

Type: uinteger

hoplimit-excd

Type: uinteger

opt-header-error

Type: uinteger

pld-length-too-small

Type: uinteger

pm-failed

Type: uinteger

mbuf-error

Type: uinteger

could-not-enc

Type: uinteger

Command Modes

- /exec

show isis (isis)

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] [ process | protocol ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out instance_num uuid process_id TABLE_vrf vrf-name-out system-id-out is-type-out sap-out mtu-out qh-out gr-t3-timer-out gr-status-out gr-state-out last-gr-status-out bfd-ipv4-state-out bfd-ipv6-state-out metric-send-out metric-accept-out area-addr-out proc-state-out vrf-id-out te-ted-out mpls-te-out [ TABLE_te te-lvl-out te-rtrid-intf-out [ TABLE_te_fa te-fa-sysid-out te-fa-intf-out ] ] te-stat-sys-id-out te-stat-rtr-id-out [ TABLE_te_stat_lvl te-stat-lvl-out te-stat-up-out te-stat-down-out ] intf-name-out auth-out auth-chk-out auth-kchain-out [ TABLE_redist max_redist warning threshold current_count ] TABLE_afi_safi afi-safi-out intf-num-out adj-check-out redist-pib-out redist-rpm-out dist-src-lvl-out dist-dest-lvl-out dist-leak-all-out dist-rpm-out admin-dist-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

process

Display IS-IS process information

protocol

Display IS-IS process information

__readonly__

tag-out

Type: string

instance_num

Type: integer

uuid

Type: integer

process_id

Type: integer

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi_safi

afi-safi-out

Type: string

system-id-out

Type: string

is-type-out

Type: string

sap-out

Type: integer

mtu-out

Type: integer

qh-out

Type: integer

gr-t3-timer-out

Type: integer

gr-status-out

Type: string

gr-state-out

Type: string

last-gr-status-out

Type: string

bfd-ipv4-state-out

Type: bool

bfd-ipv6-state-out

Type: bool

metric-send-out

Type: string

metric-accept-out

Type: string

area-addr-out

Type: string

proc-state-out

Type: string

vrf-id-out

Type: string

te-ted-out

Type: string

mpls-te-out

Type: string

TABLE_te

te-lvl-out

Type: string

te-rtrid-intf-out

Type: string

TABLE_te_fa

te-fa-sysid-out

Type: string

te-fa-intf-out

Type: string

te-stat-sys-id-out

Type: string

te-stat-rtr-id-out

Type: string

TABLE_te_stat_lvl

te-stat-lvl-out

Type: string

te-stat-up-out

Type: string

te-stat-down-out

Type: string

intf-name-out

Type: string

auth-out

Type: string

auth-chk-out

Type: string

auth-kchain-out

Type: string

TABLE_redist

max_redist

Type: integer

warning

Type: string

threshold

Type: integer

current_count

Type: integer

intf-num-out

Type: string

adj-check-out

Type: bool

redist-pib-out

Type: string

redist-rpm-out

Type: string

dist-src-lvl-out

Type: string

dist-dest-lvl-out

Type: string

dist-leak-all-out

Type: bool

dist-rpm-out

Type: string

admin-dist-out

Type: integer

Command Modes

- /exec

show isis (isis)

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] { hostname | hostname-table } [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out hname-enabled-out hname-detail-out hname-level-out hname-id-out hname-id-mine-out hname-name-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

hostname

Display IS-IS hostname table information

hostname-table

Display IS-IS hostname table information

detail

Display detailed IS-IS information

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

hname-enabled-out

Type: bool

hname-detail-out

Type: bool

hname-level-out

Type: integer

hname-id-out

Type: string

hname-id-mine-out

Type: integer

hname-name-out

Type: string

Command Modes

- /exec

show isis adjacency

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] adjacency [ interface [p2p-level-1-2] ] { [ system-id sid ] | [detail] | [summary] } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out adj-summary-out adj-interface-out adj-interface-name-out adj-sys-name-out adj-sys-id-out adj-usage-out adj-level-out adj-state-out adj-hold-time-out adj-intf-name-out adj-detail-set-out adj-transitions-out adj-flap-out adj-flap-time-out adj-ckt-type-out adj-ipv4-addr-out adj-ipv6-addr-out adj-bcast-out adj-ckt-id-out adj-lan-prio-out adj-bfd-ipv4-establish-out adj-bfd-ipv6-establish-out adj-resurrect-out adj-resurrect-count-out adj-resurrect-hwm-out adj-restart-capable-out adj-restart-ack-out adj-restart-mode-out adj-restart-adj-seen-ra-out adj-restart-adj-seen-csnp-out adj-restart-adj-seen-l1-csnp-out adj-restart-adj-seen-l2-csnp-out adj-restart-suppress-adj-out adj-summ-p2p-level-out adj-summ-p2p-state-out adj-summ-p2p-count-out adj-summ-lan-level-out adj-summ-lan-state-out adj-summ-lan-count-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

adjacency

Display IS-IS adjacency information

interface

Type: interface

IS-IS interface

system-id

Hostname or System ID

sid

Type: sid

Hostname or System ID (in the form of XXXX.XXXX.XXXX)

detail

Display IS-IS adjacency detail information

p2p-level-1-2

Display IS-IS point-to-point information at level-1-2

summary

Display IS-IS adjacency summary information

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

adj-summary-out

Type: bool

adj-interface-out

Type: bool

adj-interface-name-out

Type: string

adj-sys-name-out

Type: string

adj-sys-id-out

Type: string

adj-usage-out

Type: string

adj-level-out

Type: string

adj-state-out

Type: string

adj-hold-time-out

Type: string

adj-intf-name-out

Type: string

adj-detail-set-out

Type: bool

adj-transitions-out

Type: integer

adj-flap-out

Type: bool

adj-flap-time-out

Type: string

adj-ckt-type-out

Type: string

adj-ipv4-addr-out

Type: string

adj-ipv6-addr-out

Type: string

adj-bcast-out

Type: bool

adj-ckt-id-out

Type: string

adj-lan-prio-out

Type: integer

adj-bfd-ipv4-establish-out

Type: bool

adj-bfd-ipv6-establish-out

Type: bool

adj-resurrect-out

Type: bool

adj-resurrect-count-out

Type: integer

adj-resurrect-hwm-out

Type: integer

adj-restart-capable-out

Type: bool

adj-restart-ack-out

Type: bool

adj-restart-mode-out

Type: bool

adj-restart-adj-seen-ra-out

Type: bool

adj-restart-adj-seen-csnp-out

Type: bool

adj-restart-adj-seen-l1-csnp-out

Type: bool

adj-restart-adj-seen-l2-csnp-out

Type: bool

adj-restart-suppress-adj-out

Type: bool

adj-summ-p2p-level-out

L1  value: 1

L2  value: 2

L1-2  value: 3

adj-summ-p2p-state-out

UP  value: 1

INIT  value: 2

DOWN  value: 3

adj-summ-p2p-count-out

Type: integer

adj-summ-lan-level-out

L1  value: 1

L2  value: 2

adj-summ-lan-state-out

UP  value: 1

INIT  value: 2

DOWN  value: 3

adj-summ-lan-count-out

Type: integer

Command Modes

- /exec

show isis csnp

show isis [isis-tag] csnp [detail] [ __readonly__ TABLE_process_tag process-tag-out [ TABLE_CSNPLEVEL csnp-level csnp-cache-valid csnp-cache-hit cscnp-cache-miss csnp-hit-rate [ TABLE_CSNPLSPS csnp-start-lsp-id csnp-end-lsp-id csnp-entry-valid csnp-pdu-lengh [ TABLE_CSNPONELSP csnp-lsp-id csnp-lsp-seq-num csnp-lsp-chk-sum csnp-lsp-life-time ] ] ] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

csnp

Display IS-IS CSNP cache contents

detail

Display detailed IS-IS information

__readonly__

TABLE_process_tag

process-tag-out

Type: string

TABLE_CSNPLEVEL

csnp-level

Type: integer

csnp-cache-valid

Type: string

csnp-cache-hit

Type: integer

cscnp-cache-miss

Type: integer

csnp-hit-rate

Type: float

TABLE_CSNPLSPS

csnp-start-lsp-id

Type: string

csnp-end-lsp-id

Type: string

csnp-entry-valid

Type: string

csnp-pdu-lengh

Type: integer

TABLE_CSNPONELSP

csnp-lsp-id

Type: string

csnp-lsp-seq-num

Type: integer

csnp-lsp-chk-sum

Type: integer

csnp-lsp-life-time

Type: integer

Command Modes

- /exec

show isis database

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] database [level] [ detail | advertise | summary ] [lid] { [zero-sequence] | [ ip prefix ip-prefix ] | [ ipv6 prefix ipv6-prefix ] | [ router-id rid ] | [ adjacency adj-id ] } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out dbase-hname-absent-out dbase-level-out dbase-lsp-name-out dbase-lsp-status-out dbase-lsp-absent-out dbase-lsp-seqnum-out dbase-lsp-cksum-out dbase-lsp-lifetime-out dbase-att-out dbase-partition-out dbase-overload-out dbase-istype-out dbase-lsp-instance-out dbase-lsp-digest-out dbase-lsp-subtlv-name-out dbase-lsp-tlv-name-out dbase-lsp-area-addr-out dbase-lsp-is-nbr-name-out dbase-lsp-is-nbr-metric-out dbase-lsp-is-nbr-ext-metric-out dbase-lsp-es-nbr-name-out dbase-lsp-es-nbr-metric-out dbase-lsp-es-nbr-ext-metric-out dbase-lsp-auth-type-out dbase-lsp-auth-len-out dbase-lsp-ip-ri-addr-out dbase-lsp-ip-ri-mask-out dbase-lsp-ip-ri-metric-out dbase-lsp-ip-ri-ext-metric-out dbase-lsp-ip-ri-up-down-out dbase-lsp-prot-support-out dbase-lsp-ip-addr-out dbase-lsp-hname-out dbase-lsp-hname-len-out dbase-lsp-ext-is-name-out dbase-lsp-ext-is-metric-out dbase-lsp-extis-admin-group-out dbase-lsp-extis-bw-out dbase-lsp-extis-te-metric-out dbase-lsp-extis-pri1-out dbase-lsp-extis-pri1-val-out dbase-lsp-extis-pri2-out dbase-lsp-extis-pri2-val-out dbase-lsp-subtlv-unknown-out dbase-lsp-subtlv-len-out dbase-lsp-tlv-unknown-out dbase-lsp-tlv-len-out dbase-lsp-extip-addr-out dbase-lsp-extip-prefix-len-out dbase-lsp-extip-metric-out dbase-lsp-extip-up-down-out dbase-lsp-extipv6-addr-out dbase-lsp-extipv6-prefix-len-out dbase-lsp-extipv6-metric-out dbase-lsp-extipv6-up-down-out dbase-lsp-extipv6-ext-origin-out dbase-lsp-ipv6-addr-out dbase-lsp-malformed-out dbase-lsp-total-out dbase-lsp-empty-out dbase-lsp-zeroseq-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Display IS-IS database information

level

IS-IS level

level-1  value: 1

Display IS-IS Level-1 routing link state database
level-2  value: 2

Display IS-IS Level-2 routing link state database
l1  value: 1

Display IS-IS Level-1 routing link state database
l2  value: 2

Display IS-IS Level-2 routing link state database

lid

Type: lid

LSP ID in the form of XXXX.XXXX.XXXX.XX-XX

detail

Display detailed IS-IS information

advertise

Display advertise tlv lsp-memory information

summary

Display summary IS-IS information

zero-sequence

LSP with zero sequence number

ip

IP attribute filter

ipv6

IPv6 attribute filter

prefix

Prefix filter

ip-prefix

Type: ipprefix

Single exact match IP prefix filter

ipv6-prefix

Type: ipv6prefix

Single exact match IPv6 prefix filter

adjacency

Adjacency filter

adj-id

Type: nid

Single exact match adjacency filter

router-id

Router-id filter

rid

Type: ipaddr

single exact match router-id filter

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

dbase-hname-absent-out

Type: string

dbase-level-out

Type: integer

dbase-lsp-name-out

Type: string

dbase-lsp-status-out

Type: string

dbase-lsp-absent-out

Type: bool

dbase-lsp-seqnum-out

Type: integer

dbase-lsp-cksum-out

Type: integer

dbase-lsp-lifetime-out

Type: string

dbase-att-out

Type: integer

dbase-partition-out

Type: integer

dbase-overload-out

Type: integer

dbase-istype-out

Type: integer

dbase-lsp-instance-out

Type: integer

dbase-lsp-digest-out

Type: integer

dbase-lsp-subtlv-name-out

Type: string

dbase-lsp-tlv-name-out

Type: string

dbase-lsp-area-addr-out

Type: string

dbase-lsp-is-nbr-name-out

Type: string

dbase-lsp-is-nbr-metric-out

Type: integer

dbase-lsp-is-nbr-ext-metric-out

Type: integer

dbase-lsp-es-nbr-name-out

Type: string

dbase-lsp-es-nbr-metric-out

Type: integer

dbase-lsp-es-nbr-ext-metric-out

Type: integer

dbase-lsp-auth-type-out

Type: integer

dbase-lsp-auth-len-out

Type: integer

dbase-lsp-ext-is-name-out

Type: string

dbase-lsp-ext-is-metric-out

Type: integer

dbase-lsp-extis-admin-group-out

Type: integer

dbase-lsp-extis-bw-out

Type: integer

dbase-lsp-extis-te-metric-out

Type: integer

dbase-lsp-extis-pri1-out

Type: integer

dbase-lsp-extis-pri1-val-out

Type: integer

dbase-lsp-extis-pri2-out

Type: integer

dbase-lsp-extis-pri2-val-out

Type: integer

dbase-lsp-subtlv-unknown-out

Type: integer

dbase-lsp-subtlv-len-out

Type: integer

dbase-lsp-tlv-unknown-out

Type: integer

dbase-lsp-tlv-len-out

Type: integer

dbase-lsp-extip-addr-out

Type: string

dbase-lsp-extip-prefix-len-out

Type: integer

dbase-lsp-extip-metric-out

Type: integer

dbase-lsp-extip-up-down-out

Type: string

dbase-lsp-extipv6-addr-out

Type: string

dbase-lsp-extipv6-prefix-len-out

Type: integer

dbase-lsp-extipv6-metric-out

Type: integer

dbase-lsp-extipv6-up-down-out

Type: string

dbase-lsp-extipv6-ext-origin-out

Type: string

dbase-lsp-ip-ri-addr-out

Type: string

dbase-lsp-ip-ri-mask-out

Type: integer

dbase-lsp-ip-ri-metric-out

Type: integer

dbase-lsp-ip-ri-ext-metric-out

Type: string

dbase-lsp-ip-ri-up-down-out

Type: string

dbase-lsp-prot-support-out

Type: integer

dbase-lsp-ip-addr-out

Type: string

dbase-lsp-hname-out

Type: string

dbase-lsp-hname-len-out

Type: string

dbase-lsp-ipv6-addr-out

Type: string

dbase-lsp-malformed-out

Type: string

dbase-lsp-total-out

Type: integer

dbase-lsp-empty-out

Type: integer

dbase-lsp-zeroseq-out

Type: integer

Command Modes

- /exec

show isis ipv6 redistribute route

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] ipv6 redistribute route [ summary | ipv6-addr | ipv6-prefix [ longer-prefixes [summary] ] ] [direct-mask] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out redist-route-ipv6-vrf [redist-route-ipv6-af-ix] [redist-route-ipv6-prefix] [redist-route-ipv6-mask-len] [redist-route-ipv6-pib-name] [redist-route-ipv6-direct-mask] [redist-route-ipv6-route-type] [redist-route-ipv6-status] [ TABLE_redist redist-route-ipv6-level [redist-route-ipv6-metric] [redist-route-ipv6-sum-addr-prefix] [redist-route-ipv6-sum-addr-mask-len] ] [redist-route-ipv6-summary-route-total] [redist-route-ipv6-prot-route-total] [redist-route-ipv6-summary-pending-total] [redist-route-ipv6-summary-mask-len-ix] [redist-route-ipv6-summary-mask-len] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

redistribute

Display IS-IS redistribute information

route

Display ISIS redistribute route

ipv6

Display IS-IS IPv6 information

ipv6-addr

Type: ipv6addr

Display single IPv6 redistribute route

ipv6-prefix

Type: ipv6prefix

Display single exact match IPv6 redistribute route

longer-prefixes

Display exact match and more specific routes

summary

Display route counts

direct-mask

Display routes with direct-mask set

__readonly__

TABLE_process_tag

process-tag-out

Type: string

redist-route-ipv6-vrf

Type: string

redist-route-ipv6-af-ix

Type: string

redist-route-ipv6-prefix

Type: string

redist-route-ipv6-mask-len

Type: integer

redist-route-ipv6-pib-name

Type: string

redist-route-ipv6-direct-mask

Type: string

redist-route-ipv6-route-type

Type: string

redist-route-ipv6-status

Type: string

TABLE_redist

redist-route-ipv6-level

Type: integer

redist-route-ipv6-metric

Type: integer

redist-route-ipv6-sum-addr-prefix

Type: string

redist-route-ipv6-sum-addr-mask-len

Type: integer

redist-route-ipv6-summary-route-total

Type: integer

redist-route-ipv6-prot-route-total

Type: integer

redist-route-ipv6-summary-pending-total

Type: integer

redist-route-ipv6-summary-mask-len-ix

Type: integer

redist-route-ipv6-summary-mask-len

Type: integer

Command Modes

- /exec

show isis ipv6 route-map statistics

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] ipv6 route-map statistics { redistribute { static | direct | amt | lisp | bgp as | { src-isis | eigrp | ospfv3 | rip } tag } | distribute src-level into dst-level } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag [process-tag-out] [route-map-stat-vrf] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ipv6

Display IS-IS IPv6 information

route-map

Display IS-IS route-map information

statistics

Display IS-IS route-map statistics

redistribute

Redistribute information from another routing protocol

static

Static routes

direct

Directly connected

amt

AMT anycast prefix

lisp

LISP EID-prefixes

bgp

Border Gateway Protocol (BGP)

as

Type: asn

Autonomous system number

eigrp

Enhanced Interior Gateway Protocol

<src-isis>

IS-IS Routing for IPv6

ospfv3

Open Shortest Path First (OSPF) V3

rip

RIP for IPv6 (RIPNG)

tag

Type: string

Process tag

distribute

Distribute routes between ISIS levels

into

from level-n into level-m

src-level

Route-distribution between levels

level-1  value: 1

Inter-area routes from level-1 of this IS-IS instance
level-2  value: 2

Inter-area routes from level-2 of this IS-IS instance

dst-level

Route-distribution between levels

level-1  value: 1

Inter-area routes into level-1 of this IS-IS instance
level-2  value: 2

Inter-area routes into level-2 of this IS-IS instance

__readonly__

TABLE_process_tag

process-tag-out

Type: string

route-map-stat-vrf

Type: string

Command Modes

- /exec

show isis lsp free-list

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] { non-pseudonode | pseudonode { interface | orphan } } lsp free-list [summary] [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

non-pseudonode

Display IS-IS non-pseudo-node information

pseudonode

Display IS-IS pseudo-node information

interface

Type: interface

IS-IS interface

orphan

Display orphan LSP information

lsp

Display IS-IS LSP information

free-list

Display free-list information

summary

Display LSP count per free-list

Command Modes

- /exec

show isis mesh-group

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] mesh-group [mesh-id] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out mesh-id-set-out mesh-id-out mesh-set-id-out mesh-id-intf-name-out mesh-id-none-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

mesh-group

Display IS-IS mesh-groups

mesh-id

Type: uinteger

min: 1  max: 0

Display a single mesh-group

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

mesh-id-set-out

Type: bool

mesh-id-out

Type: bool

mesh-set-id-out

Type: integer

mesh-id-intf-name-out

Type: string

mesh-id-none-out

Type: bool

Command Modes

- /exec

show isis redistribute route

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] [ip] redistribute route [ summary | ip-addr | ip-prefix [ longer-prefixes [summary] ] ] [direct-mask] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out redist-route-vrf [redist-route-af-ix] [redist-route-prefix] [redist-route-mask-len] [redist-route-pib-name] [redist-route-direct-mask] [redist-route-route-type] [redist-route-status] [ TABLE_redist redist-route-level [redist-route-metric] [redist-route-sum-addr-prefix] [redist-route-sum-addr-mask-len] ] [redist-route-summary-route-total] [redist-route-prot-route-total] [redist-route-summary-pending-total] [redist-route-summary-mask-len-ix] [redist-route-summary-mask-len] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

redistribute

Display IS-IS redistribute information

route

Display ISIS redistribute route

ip

Display IS-IS IPv4 information

ip-addr

Type: ipaddr

Display single IP redistribute route

ip-prefix

Type: ipprefix

Display single exact match IP redistribute route

longer-prefixes

Display exact match and more specific routes

summary

Display route counts

direct-mask

Display routes with direct-mask set

__readonly__

TABLE_process_tag

process-tag-out

Type: string

redist-route-vrf

Type: string

redist-route-af-ix

Type: string

redist-route-prefix

Type: string

redist-route-mask-len

Type: integer

redist-route-pib-name

Type: string

redist-route-direct-mask

Type: string

redist-route-route-type

Type: string

redist-route-status

Type: string

TABLE_redist

redist-route-level

Type: integer

redist-route-metric

Type: integer

redist-route-sum-addr-prefix

Type: string

redist-route-sum-addr-mask-len

Type: integer

redist-route-summary-route-total

Type: integer

redist-route-prot-route-total

Type: integer

redist-route-summary-pending-total

Type: integer

redist-route-summary-mask-len-ix

Type: integer

redist-route-summary-mask-len

Type: integer

Command Modes

- /exec

show isis route-map statistics

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] [ip] route-map statistics { redistribute { static | direct | amt | lisp | bgp as | { src-isis | eigrp | ospf | rip } tag } | distribute src-level into dst-level } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag [process-tag-out] [route-map-stat-vrf] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ip

Display IS-IS IPv4 information

route-map

Display IS-IS route-map information

statistics

Display IS-IS route-map statistics

redistribute

Redistribute information from another routing protocol

static

Static routes

direct

Directly connected

amt

AMT anycast prefix

lisp

LISP EID-prefixes

bgp

Border Gateway Protocol (BGP)

as

Type: asn

Autonomous system number

eigrp

Enhanced Interior Gateway Protocol

<src-isis>

IS-IS Routing for IPv4

ospf

Open Shortest Path First (OSPF)

rip

RIP for IPv4

tag

Type: string

Process tag

distribute

Distribute routes between ISIS levels

into

from level-n into level-m

src-level

Route-distribution between levels

level-1  value: 1

Inter-area routes from level-1 of this IS-IS instance
level-2  value: 2

Inter-area routes from level-2 of this IS-IS instance

dst-level

Route-distribution between levels

level-1  value: 1

Inter-area routes into level-1 of this IS-IS instance
level-2  value: 2

Inter-area routes into level-2 of this IS-IS instance

__readonly__

TABLE_process_tag

process-tag-out

Type: string

route-map-stat-vrf

Type: string

Command Modes

- /exec

show isis routeshow isis ipv6 routeshow isis route is

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] [ip] route [ summary | detail | ip-addr [detail] | ip-prefix [ detail | longer-prefixes [ summary | detail ] ] ] [ vrf { vrf-name | vrf-known-name | all } ] | show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] ipv6 route [ topology { [base] | mt-ipv6 } ] [ summary | detail | ipv6-addr [detail] | ipv6-prefix [ detail | longer-prefixes [ summary | detail ] ] ] [ vrf { vrf-name | vrf-known-name | all } ] | show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] route is [ topology { [base] | mt-ipv6 } ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out afi-safi-out route-absent-out route-lvl-absent-out route-prefix-out route-mask-len-out route-level-out route-summ-discard-addr-out route-summ-discard-mask-len-out route-discard-addr-out route-discard-mask-len-out route-addr-print-out route-mask-len-print-out route-direct-print-out route-direct-out route-direct-via-out route-direct-if-name-out route-direct-metric-out route-direct-level-out route-direct-instance-out route-marker-out route-addr-valid-out route-ifname-out route-metric-out route-pref-out route-no-def-prefix-out route-instance-out route-discard-mask-out route-sum-prefix-out route-sum-prefix-len-out route-total-out route-paths-total-out route-paths-best-out route-paths-backup-out route-sum-lvl-out route-sum-total-out route-sum-direct-out route-sum-normal-out route-sum-missing-out route-best-pend-num-out route-bestpaths-out route-backuppaths-out route-path-sum-lvl-out route-path-sum-total-out route-path-sum-direct-out route-path-sum-normal-out route-bestroutes-per-mask-out route-best-mask-val-out route-best-mask-count-out route-pend-q-count-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ip

Display IS-IS IPv4 information

ipv6

Display IS-IS IPv6 information

is

Display IS route

route

Display IS-IS route information

ip-addr

Type: ipaddr

Display single IP route

ip-prefix

Type: ipprefix

Display single exact match IP route

ipv6-addr

Type: ipv6addr

Display single IPv6 route

ipv6-prefix

Type: ipv6prefix

Display single exact match IPv6 route

longer-prefixes

Display exact match and more specific routes

summary

Display route counts

detail

Display detail route information

topology

Display routes for a topology

base

Display routes for BASE topology

mt-ipv6

Display routes for MT-IPV6-UNICAST topology

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

afi-safi-out

Type: string

route-absent-out

Type: bool

route-lvl-absent-out

Type: bool

route-prefix-out

Type: string

route-mask-len-out

Type: integer

route-level-out

Type: integer

route-summ-discard-addr-out

Type: string

route-summ-discard-mask-len-out

Type: integer

route-discard-addr-out

Type: string

route-discard-mask-len-out

Type: integer

route-addr-print-out

Type: string

route-mask-len-print-out

Type: integer

route-direct-print-out

Type: string

route-direct-out

Type: bool

route-direct-via-out

Type: string

route-direct-if-name-out

Type: string

route-direct-metric-out

Type: integer

route-direct-level-out

Type: integer

route-direct-instance-out

Type: integer

route-marker-out

Type: bool

route-addr-valid-out

Type: bool

route-ifname-out

Type: string

route-metric-out

Type: integer

route-pref-out

Type: string

route-instance-out

Type: integer

route-no-def-prefix-out

Type: string

route-discard-mask-out

Type: bool

route-sum-prefix-out

Type: string

route-sum-prefix-len-out

Type: integer

route-total-out

Type: integer

route-paths-total-out

Type: integer

route-paths-best-out

Type: integer

route-paths-backup-out

Type: integer

route-sum-lvl-out

Type: integer

route-sum-total-out

Type: integer

route-sum-direct-out

Type: integer

route-sum-normal-out

Type: integer

route-sum-missing-out

Type: integer

route-best-pend-num-out

Type: integer

route-bestpaths-out

Type: string

route-backuppaths-out

Type: string

route-path-sum-lvl-out

Type: integer

route-path-sum-total-out

Type: integer

route-path-sum-direct-out

Type: integer

route-path-sum-normal-out

Type: integer

route-bestroutes-per-mask-out

Type: string

route-best-mask-val-out

Type: integer

route-best-mask-count-out

Type: integer

route-pend-q-count-out

Type: integer

Command Modes

- /exec

show isis rrm

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] rrm interface [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out rrm-if-name [ TABLE_rrm rrm-level rrm-retx-interval rrm-retx-throttle-interval rrm-retx-queue-length rrm-next-retx rrm-retx-queue-hwm rrm-retx-queue-exceed rrm-dbase-hdr [rrm-timestamp] [rrm-lsp-retx-instance] [rrm-lsp-db-instance] [rrm-rrm-set] [rrm-srm-set] ] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

rrm

Display IS-IS Retransmit-Routing-Message information

interface

Type: interface

IS-IS interface

__readonly__

TABLE_process_tag

process-tag-out

Type: string

rrm-if-name

Type: string

TABLE_rrm

rrm-level

Type: integer

rrm-retx-interval

Type: integer

rrm-retx-throttle-interval

Type: integer

rrm-retx-queue-length

Type: integer

rrm-next-retx

Type: string

rrm-retx-queue-hwm

Type: integer

rrm-retx-queue-exceed

Type: integer

rrm-dbase-hdr

Type: string

rrm-timestamp

Type: string

rrm-lsp-retx-instance

Type: integer

rrm-lsp-db-instance

Type: integer

rrm-rrm-set

Type: string

rrm-srm-set

Type: string

Command Modes

- /exec

show isis spf-adjacency

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] spf-adjacency [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out spf-adjacency-vrf [spf-adjacency-system-name] [spf-adjacency-refcount] [spf-adjacency-if-name] [spf-adjacency-rib-addr] [spf-adjacency-rib-addr-valid] [spf-adjacency-rib-ipv6-addr] [spf-adjacency-rib-ipv6-addr-valid] [spf-adjacency-spf-addr] [spf-adjacency-spf-ipv6-addr] [ TABLE_SPFADJLEVEL spf-adjacency-level ] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

spf-adjacency

Display IS-IS SPF adjacency information

__readonly__

TABLE_process_tag

process-tag-out

Type: string

spf-adjacency-vrf

Type: string

spf-adjacency-system-name

Type: string

spf-adjacency-refcount

Type: integer

spf-adjacency-if-name

Type: string

spf-adjacency-rib-addr

Type: string

spf-adjacency-rib-addr-valid

Type: string

spf-adjacency-rib-ipv6-addr

Type: string

spf-adjacency-rib-ipv6-addr-valid

Type: string

spf-adjacency-spf-addr

Type: string

spf-adjacency-spf-ipv6-addr

Type: string

TABLE_SPFADJLEVEL

spf-adjacency-level

Type: integer

Command Modes

- /exec

show isis spf-log

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] spf-log [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out spflog-calc-out spflog-size-out spflog-maxsize-out spflog-ago-time-out spflog-lvl-out spflog-reason-out spflog-count-out spflog-elapsed-ts-out spflog-log-num-out spflog-ts-detail-out spflog-date-detail-out spflog-lvl-detail-out spflog-instance-detail-out spflog-init-ts-detail-out spflog-spf-ts-detail-out spflog-detail-ts-is-out spflog-detail-ts-urib-out spflog-detail-ts-elapsed-out spflog-detail-lvl-out spflog-detail-spf-cnt-out spflog-detail-sync-cnt-out spflog-detail-spf-reason-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

spf-log

Display IS-IS SPF information

detail

Display detail ISIS SPF information

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

spflog-calc-out

Type: integer

spflog-size-out

Type: integer

spflog-maxsize-out

Type: integer

spflog-ago-time-out

Type: string

spflog-lvl-out

Type: integer

spflog-reason-out

Type: string

spflog-count-out

Type: integer

spflog-elapsed-ts-out

Type: string

spflog-log-num-out

Type: integer

spflog-ts-detail-out

Type: string

spflog-date-detail-out

Type: string

spflog-lvl-detail-out

Type: integer

spflog-instance-detail-out

Type: integer

spflog-init-ts-detail-out

Type: string

spflog-spf-ts-detail-out

Type: string

spflog-detail-ts-is-out

Type: string

spflog-detail-ts-urib-out

Type: string

spflog-detail-ts-elapsed-out

Type: string

spflog-detail-lvl-out

Type: integer

spflog-detail-spf-cnt-out

Type: integer

spflog-detail-sync-cnt-out

Type: integer

spflog-detail-spf-reason-out

Type: string

Command Modes

- /exec

show isis srm

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] srm interface [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out srm-if-name [ TABLE_srm srm-level srm-if-eligible srm-if-not-on-srm-list srm-lsp-interval srm-next-lsp srm-dbase-hdr ] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

srm

Display IS-IS Send-Routing-Message information

interface

Type: interface

IS-IS interface

__readonly__

TABLE_process_tag

process-tag-out

Type: string

srm-if-name

Type: string

TABLE_srm

srm-level

Type: integer

srm-if-eligible

Type: string

srm-if-not-on-srm-list

Type: string

srm-lsp-interval

Type: integer

srm-next-lsp

Type: string

srm-dbase-hdr

Type: string

Command Modes

- /exec

show isis ssn

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] ssn interface [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out snn-if-name [ TABLE_ssn snn-level snn-psnp-eligible snn-next-psnp snn-dbase_hdr ] ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ssn

Display IS-IS Send-Sequence-Number information

interface

Type: interface

IS-IS interface

__readonly__

TABLE_process_tag

process-tag-out

Type: string

snn-if-name

Type: string

TABLE_ssn

snn-level

Type: integer

snn-psnp-eligible

Type: string

snn-next-psnp

Type: string

snn-dbase_hdr

Type: string

Command Modes

- /exec

show isis statistics

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] statistics [interface] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out stat-if-out stat-if-name-out stat-spf-calc-out stat-lsp-sourced-out stat-lsp-refresh-out stat-lsp-purge-out stat-dis-elections-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

statistics

Display IS-IS protocol statistics

interface

Type: interface

IS-IS interface

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

stat-if-out

Type: bool

stat-if-name-out

Type: string

stat-spf-calc-out

Type: integer

stat-lsp-sourced-out

Type: integer

stat-lsp-refresh-out

Type: integer

stat-lsp-purge-out

Type: integer

stat-dis-elections-out

Type: integer

Command Modes

- /exec

show isis summary-addressshow isis ipv6 summary-address

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] [ip] summary-address [ ip-addr | ip-prefix [longer-prefixes] ] [ vrf { vrf-name | vrf-known-name | all } ] | show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] ipv6 summary-address [ ipv6-addr | ipv6-prefix [longer-prefixes] ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out afi-safi-out addr-absent-out addr-prefix-out addr-mask-len-out addr-level-out addr-num-out addr-lvl-out addr-metric-absent-out addr-metric-out addr-route-count-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ip

Display IS-IS IPv4 information

ipv6

Display IS-IS IPv6 information

summary-address

Display IS-IS summary address

ip-addr

Type: ipaddr

Display single IP summary address

ip-prefix

Type: ipprefix

Display single exact match IP summary address

ipv6-addr

Type: ipv6addr

Display single IPv6 summary address

ipv6-prefix

Type: ipv6prefix

Display single exact match IPv6 summary address

longer-prefixes

Display exact match and more specific summary address

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

afi-safi-out

Type: string

addr-absent-out

Type: bool

addr-prefix-out

Type: string

addr-mask-len-out

Type: integer

addr-level-out

Type: string

addr-num-out

Type: integer

addr-lvl-out

Type: integer

addr-metric-absent-out

Type: bool

addr-metric-out

Type: integer

addr-route-count-out

Type: integer

Command Modes

- /exec

show isis tlv overflow-list

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] { non-pseudonode | pseudonode interface } tlv overflow-list [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

non-pseudonode

Display IS-IS non-pseudo-node information

pseudonode

Display IS-IS pseudo-node information

interface

Type: interface

IS-IS interface

tlv

Display IS-IS TLV information

overflow-list

Display ISIS TLV overflow-list information

Command Modes

- /exec

show isis topology

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] topology [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_process_tag process-tag-out topology-vrf ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

topology

Display IS-IS Topology information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_process_tag

process-tag-out

Type: string

topology-vrf

Type: string

Command Modes

- /exec

show isis traffic

show isis [isis-tag] [ vrf { vrf-name | vrf-known-name | all } ] traffic [interface] [mbuf-priority] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ tag-out TABLE_vrf vrf-name-out traffic-if-out traffic-if-name-out traffic-lan-iih-out traffic-lan-iih-rcv-out traffic-lan-iih-xmit-out traffic-lan-iih-rcv-auth-err-out traffic-lan-iih-rcv-err-out traffic-p2p-iih-out traffic-p2p-iih-rcv-out traffic-p2p-iih-xmit-out traffic-p2p-iih-rcv-auth-err-out traffic-p2p-iih-rcv-err-out traffic-csnp-out traffic-csnp-rcv-out traffic-csnp-xmit-out traffic-csnp-rcv-auth-err-out traffic-csnp-rcv-err-out traffic-psnp-out traffic-psnp-rcv-out traffic-psnp-xmit-out traffic-psnp-rcv-auth-err-out traffic-psnp-rcv-err-out traffic-lsp-out traffic-lsp-rcv-out traffic-lsp-flood-out traffic-lsp-rcv-auth-err-out traffic-lsp-rcv-err-out traffic-lsp-rexmit-out traffic-xmit-err-out traffic-unknown-pdu-rcv-out ]

Syntax Description

show

Show running system information

isis

Display IS-IS status and configuration

isis-tag

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Routing process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

traffic

Display IS-IS traffic information

interface

Type: interface

IS-IS interface

mbuf-priority

Display mbuf priorities for received PDUs

__readonly__

tag-out

Type: string

TABLE_vrf

vrf-name-out

Type: string

traffic-if-out

Type: bool

traffic-if-name-out

Type: string

traffic-lan-iih-out

Type: string

traffic-lan-iih-rcv-out

Type: integer

traffic-lan-iih-xmit-out

Type: integer

traffic-lan-iih-rcv-auth-err-out

Type: integer

traffic-lan-iih-rcv-err-out

Type: integer

traffic-p2p-iih-out

Type: string

traffic-p2p-iih-rcv-out

Type: integer

traffic-p2p-iih-xmit-out

Type: integer

traffic-p2p-iih-rcv-auth-err-out

Type: integer

traffic-p2p-iih-rcv-err-out

Type: integer

traffic-csnp-out

Type: string

traffic-csnp-rcv-out

Type: integer

traffic-csnp-xmit-out

Type: integer

traffic-csnp-rcv-auth-err-out

Type: integer

traffic-csnp-rcv-err-out

Type: integer

traffic-psnp-out

Type: string

traffic-psnp-rcv-out

Type: integer

traffic-psnp-xmit-out

Type: integer

traffic-psnp-rcv-auth-err-out

Type: integer

traffic-psnp-rcv-err-out

Type: integer

traffic-lsp-out

Type: string

traffic-lsp-rcv-out

Type: integer

traffic-lsp-flood-out

Type: integer

traffic-lsp-rcv-auth-err-out

Type: integer

traffic-lsp-rcv-err-out

Type: integer

traffic-lsp-rexmit-out

Type: integer

traffic-xmit-err-out

Type: integer

traffic-unknown-pdu-rcv-out

Type: integer

Command Modes

- /exec

Chapter 11. K Show Commands

- show key chain (rpm)

- show key chain (rpm)

- show keystore

show key chain (rpm)

show key chain [keychain] mode decrypt [ __readonly__ TABLE_keychain chain_name TABLE_key key_id key_string accept_utc_zone accept_start accept_end accept_valid send_utc_zone send_start send_end send_valid ]

Syntax Description

show

Show running system information

key

Display Key Information

chain

Display Keychain Information

keychain

Type: string

pattern: [!-~]*

antipattern: mode | decrypt

length: 63

Keychain name

mode

Mode of display

decrypt

Display Decrypted Keystrings

__readonly__

TABLE_keychain

TABLE_key

chain_name

Type: string

key_id

Type: uinteger

key_string

Type: string

accept_utc_zone

Type: bool

accept_start

Type: string

accept_end

Type: string

accept_valid

Type: bool

send_utc_zone

Type: bool

send_start

Type: string

send_end

Type: string

send_valid

Type: bool

Command Modes

- /exec

show key chain (rpm)

show key chain [keychain] [ __readonly__ TABLE_keychain chain_name TABLE_key key_id key_string accept_utc_zone accept_start accept_end accept_valid send_utc_zone send_start send_end send_valid ]

Syntax Description

show

Show running system information

key

Display Key Information

chain

Display Keychain Information

keychain

Type: string

pattern: [!-~]*

antipattern: mode | decrypt

length: 63

Keychain name

__readonly__

TABLE_keychain

TABLE_key

chain_name

Type: string

key_id

Type: uinteger

key_string

Type: string

accept_utc_zone

Type: bool

accept_start

Type: string

accept_end

Type: string

accept_valid

Type: bool

send_utc_zone

Type: bool

send_start

Type: string

send_end

Type: string

send_valid

Type: bool

Command Modes

- /exec

show keystore

show keystore [ __readonly__ TABLE_sksd_state_entries index handle keystore_type keystore_ver fw_panics fw_resets rx_fifo_underruns rx_timeouts rx_bad_checksums rx_bad_fragment_lengths keystore_corruption ]

Syntax Description

show

Show running system information

keystore

keystore stats

__readonly__

TABLE_sksd_state_entries

Displays handles of the keys stored

index

Type: uinteger

Index value

handle

Type: string

Handle Name

keystore_type

Type: uinteger

Type of storage h/w or s/w

keystore_ver

Type: uinteger

Version

fw_panics

Type: uinteger

Number of panics

fw_resets

Type: uinteger

Number of Resets

rx_fifo_underruns

Type: uinteger

Rx FIFO Underruns

rx_timeouts

Type: uinteger

Number of Rx timeouts

rx_bad_checksums

Type: uinteger

Number of Bad Checsums

rx_bad_fragment_lengths

Type: uinteger

Bad fragment lenghts received

keystore_corruption

Type: uinteger

Number of corruptions detected

Command Modes

- /exec

Chapter 12. L Show Commands

- show l2protocol tunnel

- show lacp counters

- show lacp interface

- show lacp issu-impact

- show lacp neighbor

- show lacp port-channel

- show lacp system-identifier

- show ldap-search-map

- show ldap-server

- show ldap-server groups

- show ldap-server statistics

- show license

- show license brief

- show license file

- show license host-id

- show license reserved

- show license usage

- show line

- show line console

- show line console connected

- show line console user-input-string

- show lisp stats-cache

- show lldp dcbx interface

- show lldp entry

- show lldp interface

- show lldp neighbors

- show lldp neighbors detail

- show lldp portid-subtype

- show lldp timers

- show lldp tlv-select

- show lldp traffic

- show lldp traffic interface

- show locator-led status (pfm)

- show locator-led status (satmgr)

- show logging

- show logging console

- show logging info

- show logging ip access-list cache

- show logging ip access-list status

- show logging last

- show logging level (licmgr)

- show logging level (sksd)

- show logging level (syslog)

- show logging level aaa

- show logging level acllog

- show logging level aclmgr

- show logging level adjmgr

- show logging level arp

- show logging level ascii-cfg

- show logging level bfd

- show logging level bgp

- show logging level bloggerd

- show logging level bootvar

- show logging level callhome

- show logging level capability

- show logging level cdp

- show logging level cert-enroll

- show logging level cert_enroll

- show logging level cfs

- show logging level clis

- show logging level clk_mgr

- show logging level confcheck

- show logging level copp

- show logging level core

- show logging level dhcp_snoop

- show logging level diagnostic device_test

- show logging level diagnostic diagclient

- show logging level diagnostic diagmgr

- show logging level eigrp

- show logging level ethdstats

- show logging level ethpm

- show logging level evmc

- show logging level evmed

- show logging level evms

- show logging level feature-mgr

- show logging level fex

- show logging level fs-daemon

- show logging level glbp

- show logging level gpixm

- show logging level hsrp

- show logging level im

- show logging level interface-vlan

- show logging level ip igmp

- show logging level ip msdp

- show logging level ip pim

- show logging level ipconf

- show logging level ipqos

- show logging level ipv6 icmp

- show logging level ipv6 pim

- show logging level isis

- show logging level l2fm

- show logging level l2pt

- show logging level l3vm

- show logging level lacp

- show logging level ldap

- show logging level lldp

- show logging level m2rib

- show logging level mfdm

- show logging level mfwd

- show logging level module

- show logging level mpls switching

- show logging level mvsh

- show logging level netstack

- show logging level ntp

- show logging level nve

- show logging level oim

- show logging level onep

- show logging level orib

- show logging level ospf

- show logging level ospfv3

- show logging level patch-installer

- show logging level pfstat

- show logging level pixm

- show logging level platform

- show logging level pltfm_config

- show logging level plugin

- show logging level poap

- show logging level pong

- show logging level port-channel

- show logging level port-security

- show logging level private-vlan

- show logging level radius

- show logging level res_mgr

- show logging level rip

- show logging level routing multicast

- show logging level rpm

- show logging level rsvp

- show logging level sal

- show logging level scheduler

- show logging level security

- show logging level session-mgr

- show logging level smm

- show logging level snmpd

- show logging level spanning-tree

- show logging level spm

- show logging level sysmgr

- show logging level tacacs

- show logging level track

- show logging level tunnel

- show logging level u2rib

- show logging level u6rib

- show logging level udld

- show logging level ufdm

- show logging level urib

- show logging level vdc_mgr

- show logging level virtual-service

- show logging level vlan_mgr

- show logging level vmm

- show logging level vntag

- show logging level vpc

- show logging level vrrp-cfg

- show logging level vrrp-eng

- show logging level vshd

- show logging level vtp

- show logging level xbar

- show logging logfile

- show logging logfile duration

- show logging logfile last-index

- show logging logfile start-seqn

- show logging logfile start-time

- show logging loopback

- show logging module

- show logging monitor

- show logging nvram

- show logging onboard

- show logging server

- show logging source-interface

- show logging timestamp

show l2protocol tunnel

show l2protocol tunnel [ interface intf-range | vlan vlan-id ] [summary] [ __readonly__ is-summary cos-value first-entry TABLE-intf ifname status TABLE-protocol enabled pname shut-threshold drop-threshold encap-count decap-count drop-count ]

Syntax Description

show

Show running system information

l2protocol

Layer 2 Protocol

tunnel

Protocol Tunneling

interface

Display Layer 2 interface L2PT information

intf-range

Type: interface-mrange

Interface or range of interfaces

vlan

Display L2PT information based on VLAN

vlan-id

Type: integer

min: 1  max: 4094

Vlan ID

summary

Display summary

__readonly__

is-summary

Type: integer

cos-value

Type: integer

first-entry

Type: integer

TABLE-intf

ifname

Type: string

length: 20

TABLE-protocol

status

Type: string

length: 20

pname

Type: string

length: 20

enabled

Type: integer

shut-threshold

Type: integer

drop-threshold

Type: integer

encap-count

Type: integer

decap-count

Type: integer

drop-count

Type: integer

Command Modes

- /exec

show lacp counters

show lacp counters [ interface if0 ] [ __readonly__ TABLE_interface interface TABLE_member port pdus-sent pdus-rcvd marker-sent marker-rcvd marker-resp-sent marker-resp-rcvd pkt-errors [illegal-rcvd] [unknown-rcvd] ]

Syntax Description

show

Show running system information

lacp

LACP protocol

counters

LACP counters

interface

Specify a port-channel

if0

Type: interface-mrange

__readonly__

TABLE_interface

Port channel table

interface

Type: interface

Port channel

TABLE_member

Member port info

port

Type: interface

Member port

pdus-sent

Type: longlong

Number of PDUs sent

pdus-rcvd

Type: longlong

Number of PDUs received

marker-sent

Type: longlong

Number of Marker PDUs sent

marker-rcvd

Type: longlong

Number of Marker PDUs received

marker-resp-sent

Type: longlong

Number of Marker response PDUs sent

marker-resp-rcvd

Type: longlong

Number of Marker response PDUs received

pkt-errors

Type: longlong

Number of packet errors

illegal-rcvd

Type: longlong

Number of illegal packets received

unknown-rcvd

Type: longlong

Number of unknown packets received

Command Modes

- /exec

show lacp interface

show lacp interface [if0] [ __readonly__ interface operational-state channel-group port-channel pdus-sent pdus-rcvd marker-sent marker-rcvd marker-resp-sent marker-resp-rcvd unknown-rcvd illegal-rcvd lag-id active-time localport local-interface local-mac-address local-system-priority local-port-priority local-port-num local-op-key local-activity local-timeout local-sync local-collecting local-distributing partner-info-timeout local-admin-state local-oper-state partnerport partner-interface partner-mac-address partner-system-priority partner-port-priority partner-port-num partner-op-key partner-activity partner-timeout partner-sync partner-collecting partner-distributing partner-admin-state partner-oper-state agg-or-indiv ]

Syntax Description

show

Show running system information

lacp

LACP protocol

interface

Specify a interface

if0

Type: interface

__readonly__

interface

Type: interface

Interface ID

channel-group

Type: integer

Channel Group

port-channel

Type: interface

Port Channel

lag-id

Type: string

LAG Id

active-time

Type: string

active-time

operational-state

Operational State

invalid  value: 0

InvalidSel
not-processed  value: 1

NotProcessedPort
individual  value: 2

IndividualPort
suspended  value: 3

SuspendedPort
hot-standby  value: 4

HotStandbyPort
up  value: 5

SelectedPort

agg-or-indiv

Type: integer

Aggregate or individual port

pdus-rcvd

Type: longlong

PDUs received

pdus-sent

Type: longlong

PDUs sent

marker-rcvd

Type: longlong

Markers received

marker-sent

Type: longlong

Markers sent

marker-resp-rcvd

Type: longlong

Marker response received

marker-resp-sent

Type: longlong

Marker response sent

unknown-rcvd

Type: longlong

Unknown pdus received

illegal-rcvd

Type: longlong

Illegal pdus received

localport

Local port information

local-interface

Type: interface

Interface

local-mac-address

Type: string

MAC Address

local-system-priority

Type: hex

System Priority

local-port-priority

Type: hex

Port Priority

local-port-num

Type: hex

Port Number

local-op-key

Type: integer

Operational Key

local-admin-state

Type: string

Local Admin State

local-oper-state

Type: string

Local Oper State

local-activity

Mode

passive  value: 0

Passive state
active  value: 1

Active state
unknown  value: 2

Invalid state

local-timeout

Timeout

Long  value: 0

Long timeout (30)
Short  value: 1

Short timeout (1)

local-sync

Synchronization

IN_SYNC  value: 1

In sync
NOT_IN_SYNC  value: 0

Not in sync

local-distributing

Distributing

true  value: 1

Distributing
false  value: 0

Not distributing

local-collecting

Collecting

true  value: 1

Collecting
false  value: 0

Not collecting

partner-info-timeout

Partner information refresh timeout

Long  value: 0

Long timeout (90)
Short  value: 1

Short timeout (3)

partnerport

Partner port information

partner-interface

Type: string

Partner Interface

partner-mac-address

Type: string

Partner MAC Address

partner-system-priority

Type: hex

Partner System Priority

partner-port-priority

Type: hex

Partner Port Priority

partner-port-num

Type: hex

Partner Port Number

partner-op-key

Type: integer

Operational Key

partner-admin-state

Type: string

Partner Admin State

partner-oper-state

Type: string

Partner Oper State

partner-activity

Mode

passive  value: 0

Passive state
active  value: 1

Active state
unknown  value: 2

Invalid state

partner-timeout

Timeout

Long  value: 0

Long timeout (30)
short  value: 1

Short timeout (1)

partner-sync

Synchronization

IN_SYNC  value: 1

In sync
NOT_IN_SYNC  value: 0

Not in sync

partner-distributing

Distributing

true  value: 1

Distributing
false  value: 0

Not distributing

partner-collecting

Collecting

true  value: 1

Collecting
false  value: 0

Not collecting

Command Modes

- /exec

show lacp issu-impact

show lacp issu-impact [ __readonly__ TABLE_interface interface ]

Syntax Description

show

Show running system information

lacp

Show LACP information

issu-impact

Check for ISSU readiness

__readonly__

TABLE_interface

Port-channel issu-impact member list

interface

Type: interface

Port-channel Member

Command Modes

- /exec

show lacp neighbor

show lacp neighbor [ interface if0 ] [ __readonly__ TABLE_interface interface TABLE_member port partner-system-id partner-port-num partner-age partner-flags partner-port-priority partner-oper-key partner-port-state ]

Syntax Description

show

Show running system information

lacp

LACP protocol

neighbor

LACP interface neighbor

interface

Specify a port-channel

if0

Type: interface-mrange

__readonly__

TABLE_interface

Port channel table

interface

Type: interface

Port channel

TABLE_member

Member port info

port

Type: interface

Member port

partner-system-id

Type: string

Partner System ID

partner-port-num

Type: hex

Partner Port Number

partner-age

Type: integer

Partner age

partner-flags

Type: string

Partner flags

partner-port-priority

Type: integer

Partner Port Priority

partner-oper-key

Type: hex

Partner oper key

partner-port-state

Type: hex

Partner port state

Command Modes

- /exec

show lacp port-channel

show lacp port-channel [ interface if0 ] [ __readonly__ TABLE_interface interface aggr-mac-address local-system-priority local-system-id local-admin-key local-oper-key partner-system-priority partner-system-id partner-oper-key max-delay agg-or-indiv port-list + ]

Syntax Description

show

Show running system information

lacp

LACP protocol

port-channel

LACP port-channels

interface

Specify a port-channel

if0

Type: interface-mrange

__readonly__

TABLE_interface

Port channel table

interface

Type: interface

Port channel

aggr-mac-address

Type: string

Mac Address of aggregator

local-system-priority

Type: hex

Local System Priority

local-system-id

Type: string

Local System-Id

local-admin-key

Type: hex

Local admin key

local-oper-key

Type: hex

Local oper key

partner-system-priority

Type: hex

Partner System Priority

partner-system-id

Type: string

Partner System-Id

partner-oper-key

Type: hex

Partner oper key

max-delay

Type: integer

Maximum delay between aggregator and mac-client

agg-or-indiv

Type: integer

Aggregate or individual port

port-list

Type: interface

List of port names for member ports

Command Modes

- /exec

show lacp system-identifier

show lacp system-identifier [ __readonly__ system-priority system-mac ]

Syntax Description

show

Show running system information

lacp

LACP protocol

system-identifier

Show system-identifier information

__readonly__

system-priority

Type: integer

System priority

system-mac

Type: string

System mac address

Command Modes

- /exec

show ldap-search-map

show ldap-search-map [ __readonly__ number_of_search_maps search_map_count TABLE_ldap_searchmaps map_name [ map_baseDN map_attr map_filter ] ]

Syntax Description

__readonly__

number_of_search_maps

Total number of search maps configured

search_map_count

Type: integer

Ldap Search map count

TABLE_ldap_searchmaps

Ldap search map configuration

map_name

Type: string

Search map name

map_baseDN

Type: string

Ldap base DN

map_attr

Type: string

Search map attribute

map_filter

Type: string

Ldap Search filter

show

Show running system information

ldap-search-map

Show LDAP configuration information

Command Modes

- /exec

show ldap-server

show ldap-server [ __readonly__ global_timeout g_timeout global_port g_port global_deadtime g_deadtime total_number_of_server g_servers_count TABLE_ldap_hosts ldap_host h_idletime h_test_user h_test_passwd [h_test_dn] h_timeout h_port h_rootDN h_ssl_enable ]

Syntax Description

__readonly__

TABLE_ldap_hosts

Ldap host configuration

global_timeout

Ldap host global timeout

global_port

Ldap host global port

global_deadtime

Ldap host global deadtime

total_number_of_server

Total number of ldap hosts configured

g_servers_count

Type: integer

Total number of ldap hosts configured

g_timeout

Type: integer

global timeout value

g_port

Type: integer

Global ldap port

g_deadtime

Type: integer

Global deadtime value

ldap_host

Type: string

Ldap host

h_idletime

Type: integer

Ldap host idletime

h_test_user

Type: string

Ldap host testuser

h_test_passwd

Type: string

Ldap host password

h_test_dn

Type: string

Ldap testuser dn

h_timeout

Type: integer

Ldap host timeout

h_port

Type: integer

Ldap host port

h_rootDN

Type: string

Ldap host RootDN

h_ssl_enable

Ldap host ssl configuration

false  value: 0

true  value: 1

show

Show running system information

ldap-server

Show LDAP configuration information

Command Modes

- /exec

show ldap-server groups

show ldap-server groups [ __readonly__ total_number_of_groups total_groups_count TABLE_groups g_name g_vrf g_mode is_bind_and_search g_append_with_baseDN g_compare_or_bind g_cmp_passwd_attr [user-server-group] [Cert-DN-match] auth_mechanism [ TABLE_g_servers g_server g_port g_timeout ] [g_search_map] ]

Syntax Description

show

Show running system information

ldap-server

Show LDAP configuration information

groups

Show LDAP server group configuration information

__readonly__

total_number_of_groups

Total number of Ldap groups configured

total_groups_count

Type: integer

Ldap group count

TABLE_groups

LDAP Group information

g_name

Type: string

Ldap group name

g_vrf

Type: string

LDAP group vrf

g_mode

LDAP group mode

UnSecure  value: 0

Secure  value: 1

is_bind_and_search

Type: string

Ldap Authentication bind or search

g_append_with_baseDN

Type: string

LDAP baseDN append information

g_compare_or_bind

Type: string

LDAP bind or compare

g_cmp_passwd_attr

Type: string

LDAP compare password attribute

user-server-group

Ldap server group validation

enabled  value: 1

Cert-DN-match

Ldap group CERT-DN match

enabled  value: 1

auth_mechanism

Type: string

Ldap server group authentication mechanism

TABLE_g_servers

LDAP group server information

g_server

Type: string

LDAP group host

g_port

Type: integer

LDAP group host port

g_timeout

Type: integer

LDAP griup host timeout

g_search_map

Type: string

LDAP group search map

Command Modes

- /exec

show ldap-server statistics

show ldap-server statistics host0 [ __readonly__ server_state [ clock_time monitoring_statistics time_in_pstate ndead tt_in_dstate ] auth_statistics auth_failed_transactions auth_succ_transactions auth_req_sent auth_req_timedout auth_resp_no_match auth_resp_not_processed auth_resp_error acct_statistics acct_failed_transactions acct_succ_transactions acct_req_sent acct_req_timedout acct_resp_no_match acct_resp_not_processed acct_resp_error ]

Syntax Description

show

Show running system information

ldap-server

Show LDAP configuration information

statistics

Show LDAP statistics

host0

Type: string

DNS name or IP address

__readonly__

server_state

Show state of server

alive  value: 2

dead  value: 1

not monitored  value: 3

clock_time

Type: string

Show clock time in terms of hours, minutes and seconds

monitoring_statistics

Monitoring Statistics

time_in_pstate

Type: string

Time in previous state

ndead

Type: uinteger

Number of times dead

tt_in_dstate

Type: string

Total time in dead state

auth_statistics

Authentication Statistics

acct_statistics

Accounting Statistics

auth_failed_transactions

Type: uinteger

Authentication: Failed transactions

auth_succ_transactions

Type: uinteger

Authentication: Successful transactions

auth_req_sent

Type: uinteger

Authentication: Requests sent

auth_req_timedout

Type: uinteger

Authentication: Requests timedout

auth_resp_no_match

Type: uinteger

Authentication: Responses with no matching requests

auth_resp_not_processed

Type: uinteger

Authentication: Responses not processed

auth_resp_error

Type: uinteger

Authentication: Responses containing errors

acct_failed_transactions

Type: uinteger

Accounting: Failed transactions

acct_succ_transactions

Type: uinteger

Accounting: Successful transactions

acct_req_sent

Type: uinteger

Accounting: Requests sent

acct_req_timedout

Type: uinteger

Accounting: Requests timedout

acct_resp_no_match

Type: uinteger

Accounting: Responses with no matching requests

acct_resp_not_processed

Type: uinteger

Accounting: Responses not processed

acct_resp_error

Type: uinteger

Accounting: Responses containing errors

Command Modes

- /exec

show license

show license [ __readonly__ [ lic_file_name lic_file_contents ] + ]

Syntax Description

show

Show running system information

license

show the contents of all the license files

__readonly__

Read only

lic_file_name

Type: string

Name of the license file

lic_file_contents

Type: string

License file contents

Command Modes

- /exec

show license brief

show license brief [ __readonly__ [lic_file_name] + ]

Syntax Description

show

Show running system information

license

show the contents of all the license files

brief

Show a list of license files

__readonly__

Read only

lic_file_name

Type: string

Name of the license file

Command Modes

- /exec

show license file

show license file license-file [ __readonly__ [lic_file_contents] + ]

Syntax Description

show

Show running system information

license

Show the contents of all the license files

file

Show contents of a license file

license-file

Type: string

length: 32

Show the contents of license file __nil__ Please install a license before using this command.

__readonly__

Read only

lic_file_contents

Type: string

License file contents

Command Modes

- /exec

show license host-id

show license host-id [ __readonly__ host_id ]

Syntax Description

show

Show running system information

license

show the contents of all the license files

host-id

Show unique id for this host for licensing

__readonly__

Read only

host_id

Type: string

unique id for this host for licensing

Command Modes

- /exec

show license reserved

show license reserved

Syntax Description

show

show commands

license

Display licensing information

reserved

Display reserved licenses information

Command Modes

- /exec

show license usage

show license usage [ detail | license-feature ] [ __readonly__ TABLE_show_lic_usage feature_name lic_installed count status expiry_date comments application_name ]

Syntax Description

show

Show running system information

license

show the contents of all the license files

usage

Show license usage table

detail

Show license usage table

license-feature

Type: string

length: 30

Show services using license

__readonly__

Read only

TABLE_show_lic_usage

License usage

feature_name

Type: string

Name of the feature

lic_installed

Type: string

Is the license installed?

count

Type: string

License count

status

Type: string

License status

expiry_date

Type: string

Expiry date of the license

comments

Type: string

License comments

application_name

Type: string

Name of the application using the license

Command Modes

- /exec

show line

show line [ __readonly__ speed databits stopbits parity modem_in modem_init_str stat [ TABLE_ps_output ps ] [ speed_aux databits_aux stopbits_aux parity_aux modem_in_aux modem_init_str_aux hw_fc_aux stat_aux [ TABLE_ps_output_aux ps_aux ] ] ]

Syntax Description

show

Show running system information

line

Show the line configuration

__readonly__

TABLE_ps_output

Process info for console login

TABLE_ps_output_aux

Process info for com1 login

speed

Type: integer

Port speed(baud)

databits

Type: integer

Bits per byte

stopbits

Type: integer

Bits

parity

Type: string

Parity

modem_in

Type: string

Modem In

modem_init_str

Type: string

Modem Init-String

stat

Type: string

Statistics

ps

Type: string

Login process

speed_aux

Type: integer

Port speed(baud)

databits_aux

Type: integer

Bits per byte

stopbits_aux

Type: integer

Bits

parity_aux

Type: string

Parity

modem_in_aux

Type: string

Modem In

modem_init_str_aux

Type: string

Modem Init-String

hw_fc_aux

Type: string

Hardware Flowcontrol

stat_aux

Type: string

Statistics

ps_aux

Type: string

Login process

Command Modes

- /exec

show line console

show line console [ __readonly__ speed databits stopbits parity modem_in modem_init_str stat [ TABLE_ps_output ps ] ]

Syntax Description

show

Show running system information

line

Show the line configuration

console

Show console line configurations

show

Show running system information

line

Show the line configuration

__readonly__

TABLE_ps_output

Process info for console login

speed

Type: integer

Port speed(baud)

databits

Type: integer

Bits per byte

stopbits

Type: integer

Bits

parity

Type: string

Parity

modem_in

Type: string

Modem In

modem_init_str

Type: string

Modem Init-String

stat

Type: string

Statistics

ps

Type: string

Login process

Command Modes

- /exec

show line console connected

show line console connected [ __readonly__ output ]

Syntax Description

show

Show running system information

line

Show the line configuration

console

Show console line configurations

connected

Show whether the line is currently connected physically

__readonly__

output

Type: string

output string

Command Modes

- /exec

show line console user-input-string

show line console user-input-string [ __readonly__ input ]

Syntax Description

show

Show running system information

line

Show the line configuration

console

Show console line configurations

user-input-string

Show user-input init string

__readonly__

input

Type: string

user input string

Command Modes

- /exec

show lisp stats-cache

show lisp stats-cache [ vrf { vrf-name | vrf-known-name } ]

Syntax Description

show

Show running system information

lisp

LISP show commands Not available in this release.

stats-cache

Show dynamic statistics cache

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

Command Modes

- /exec

show lldp dcbx interface

show lldp dcbx interface if0 [ __readonly__ interface [ l_op_ver l_max_ver l_seq_no l_ack_no [ l_feature l_cfg_len l_cfg ] + ] [ p_op_ver p_max_ver p_seq_no p_ack_no [ p_tlv_type p_tlv_len p_tlv_value ] + ] ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

dcbx

Show dcbx information

interface

Show lldp interface information

if0

Type: interface

Enter interface

__readonly__

interface

Type: interface

Interface ID

l_op_ver

Type: uinteger

local dcbx control operation version

l_max_ver

Type: uinteger

local dcbx control maximum version

l_seq_no

Type: uinteger

local dcbx control seq no

l_ack_no

Type: uinteger

local dcbx control ack no

l_feature

Type: uinteger

local feature

l_cfg_len

Type: uinteger

local feature config length

l_cfg

Type: uinteger

local feature config

p_op_ver

Type: uinteger

peer dcbx control operation version

p_max_ver

Type: uinteger

peer dcbx control maximum version

p_seq_no

Type: uinteger

peer dcbx control seq no

p_ack_no

Type: uinteger

peer dcbx control ack no

p_tlv_type

Type: uinteger

peer TLV type field

p_tlv_len

Type: uinteger

peer TLV len field

p_tlv_value

Type: uinteger

peer TLV value field

Command Modes

- /exec

show lldp entry

show lldp entry [sys-name] [ __readonly__ neigh_hdr TABLE_entry chassis_type chassis_id port_type port_id l_port_id port_desc sys_name sys_desc ttl capability mgmt_addr_type mgmt_addr vlan_id neigh_count ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

entry

Show lldp entry information

sys-name

Type: string

WORD Peer's System name

__readonly__

neigh_hdr

Type: string

TABLE_entry

Table Entry

chassis_type

Type: uinteger

Chassis ID type

chassis_id

Type: string

Chassis ID

port_type

Type: uinteger

Port ID type

port_id

Type: string

Port ID

l_port_id

Type: string

Port ID

port_desc

Type: string

Port description

sys_name

Type: string

System name

sys_desc

Type: string

System description

ttl

Type: uinteger

Time to live

capability

Type: uinteger

Capability

mgmt_addr_type

Type: uinteger

Management Address type

mgmt_addr

Type: string

Management Address

vlan_id

Type: uinteger

Vlan ID

neigh_count

Type: integer

Command Modes

- /exec

show lldp interface

show lldp interface if0 [ __readonly__ interface tx_en rx_en dcbx_en port_mac [ tlv_type tlv_len tlv_value ] + [ l_op_ver l_max_ver l_seq_no l_ack_no [ l_feature l_cfg_len l_cfg ] + ] [ p_op_ver p_max_ver p_seq_no p_ack_no [ p_tlv_type p_tlv_len p_tlv_value ] + ] ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

interface

Show lldp interface information

if0

Type: interface

Enter interface

__readonly__

interface

Type: interface

Interface ID

tx_en

Type: string

tx enable

rx_en

Type: string

rx enable

dcbx_en

Type: string

dcbx enable

port_mac

Type: string

Port mac address

tlv_type

Type: uinteger

TLV type field

tlv_len

Type: uinteger

TLV len field

tlv_value

Type: uinteger

TLV value field

l_op_ver

Type: uinteger

local dcbx control operation version

l_max_ver

Type: uinteger

local dcbx control maximum version

l_seq_no

Type: uinteger

local dcbx control seq no

l_ack_no

Type: uinteger

local dcbx control ack no

l_feature

Type: uinteger

local feature

l_cfg_len

Type: uinteger

local feature config length

l_cfg

Type: uinteger

local feature config

p_op_ver

Type: uinteger

peer dcbx control operation version

p_max_ver

Type: uinteger

peer dcbx control maximum version

p_seq_no

Type: uinteger

peer dcbx control seq no

p_ack_no

Type: uinteger

peer dcbx control ack no

p_tlv_type

Type: uinteger

peer TLV type field

p_tlv_len

Type: uinteger

peer TLV len field

p_tlv_value

Type: uinteger

peer TLV value field

Command Modes

- /exec

show lldp neighbors

show lldp neighbors [ interface if ] [ __readonly__ neigh_hdr TABLE_nbor chassis_type chassis_id l_port_id ttl capability port_type port_id mgmt_addr_type mgmt_addr neigh_count ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

neighbors

Show lldp neighbor information

interface

Show lldp neighbor information on an interface

if

Type: interface

Enter interface

__readonly__

neigh_hdr

Type: string

TABLE_nbor

Neighbor Table

chassis_type

Type: uinteger

Chassis ID type

chassis_id

Type: string

Chassis ID

l_port_id

Type: string

Local port ID

ttl

Type: uinteger

Time to live

capability

Type: uinteger

Capability

port_type

Type: uinteger

Port ID type

port_id

Type: string

Port ID

mgmt_addr_type

Type: uinteger

Management Address type

mgmt_addr

Type: string

Management Address

neigh_count

Type: integer

Command Modes

- /exec

show lldp neighbors detail

show lldp neighbors [ interface if ] detail [ __readonly__ neigh_hdr TABLE_nbor_detail chassis_type chassis_id port_type port_id l_port_id port_desc sys_name sys_desc ttl capability mgmt_addr_type mgmt_addr vlan_id neigh_count ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

neighbors

Show lldp neighbor information

interface

Show lldp neighbor information on an interface

if

Type: interface

Enter interface

detail

Show lldp neighbor detail information

__readonly__

neigh_hdr

Type: string

TABLE_nbor_detail

Neighbor detail Table

chassis_type

Type: uinteger

Chassis ID type

chassis_id

Type: string

Chassis ID

port_type

Type: uinteger

Port ID type

port_id

Type: string

Port ID

l_port_id

Type: string

Port ID

port_desc

Type: string

Port description

sys_name

Type: string

System name

sys_desc

Type: string

System description

ttl

Type: uinteger

Time to live

capability

Type: uinteger

Capability

mgmt_addr_type

Type: uinteger

Management Address type

mgmt_addr

Type: string

Management Address

vlan_id

Type: uinteger

Vlan ID

neigh_count

Type: integer

Command Modes

- /exec

show lldp portid-subtype

show lldp portid-subtype [ __readonly__ portid_subtype ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

portid-subtype

Show lldp portid-subtype

__readonly__

portid_subtype

Type: uinteger

portid-subtype for LLDP TLV and MIBs

Command Modes

- /exec

show lldp timers

show lldp timers [ __readonly__ ttl reinit tx_interval tx_delay hold_mplier notification_interval ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

timers

Show lldp timers

__readonly__

ttl

Type: uinteger

Time to Live for lldp info

reinit

Type: uinteger

Interface reinit timer

tx_interval

Type: uinteger

Wait interval between successive transmit

tx_delay

Type: uinteger

Delay between successive frame transmissions

hold_mplier

Type: uinteger

Hold multiplier for ttl

notification_interval

Type: uinteger

Notification interval for SNMP trap

Command Modes

- /exec

show lldp tlv-select

show lldp tlv-select [ __readonly__ management-address port-description port-vlan system-capabilities system-description system-name dcbxp ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

tlv-select

Show lldp tlv-select

__readonly__

management-address

Type: string

Management address

port-description

Type: string

Port description

port-vlan

Type: string

Port vlan

system-capabilities

Type: string

System capabilities

system-description

Type: string

System description

system-name

Type: string

System name

dcbxp

Type: string

DCBXP

Command Modes

- /exec

show lldp traffic

show lldp traffic [ __readonly__ tx_cnt aged_cnt rx_cnt rx_err disc_cnt unrecognized_tlv ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

traffic

Show lldp counters

__readonly__

tx_cnt

Type: uinteger

Transmit count

aged_cnt

Type: uinteger

Aged out count

rx_cnt

Type: uinteger

Received count

rx_err

Type: uinteger

Received error count

disc_cnt

Type: uinteger

Disconnect count

unrecognized_tlv

Type: uinteger

Unrecognized TLV count

Command Modes

- /exec

show lldp traffic interface

show lldp traffic interface if [ __readonly__ interface tx_cnt aged_cnt rx_cnt rx_err disc_cnt unrecognized_tlv ]

Syntax Description

show

Show running system information

lldp

Show information about lldp

traffic

Show lldp counters

interface

Show lldp traffic counters on an interface

if

Type: interface

Enter interface

__readonly__

interface

Type: interface

Interface ID

tx_cnt

Type: uinteger

Transmit count

aged_cnt

Type: uinteger

Aged out count

rx_cnt

Type: uinteger

Received count

rx_err

Type: uinteger

Received error count

disc_cnt

Type: uinteger

Disconnect count

unrecognized_tlv

Type: uinteger

Unrecognized TLV count

Command Modes

- /exec

show locator-led status (pfm)

show locator-led status [ __readonly__ TABLE_loc_led_stat component status ]

Syntax Description

show

Show running system information

locator-led

blink locator led on device

status

status

__readonly__

TABLE_loc_led_stat

component

Type: string

status

Type: string

Command Modes

- /exec

show locator-led status (satmgr)

show locator-led status

Syntax Description

show

Show running system information

locator-led

Blink locator LED on device

status

View which modules have locator LED set

Command Modes

- /exec

show logging

show logging

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

Command Modes

- /exec

show logging console

show logging console

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

console

Show console logging configuration

Command Modes

- /exec

show logging info

show logging info

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

info

Show logging configuration

Command Modes

- /exec

show logging ip access-list cache

show logging ip access-list cache [detail] [ __readonly__ disp_flags sgt src_ip dst_ip src_port dst_port if_index proto hit_cnt ]

Syntax Description

show

Show running system information

logging

logging information

ip

IP configuration

access-list

Access-list

cache

logging

detail

Show additional details about entries in cache

__readonly__

disp_flags

Type: uinteger

Display flags

sgt

Type: uinteger

SGT

src_ip

Type: ipaddr

Source IP

dst_ip

Type: ipaddr

Dest IP

src_port

Type: uinteger

Source port

dst_port

Type: uinteger

Dest port

if_index

Type: interface

Interface

proto

Type: uinteger

Protocol

hit_cnt

Type: uinteger

Hits

Command Modes

- /exec

show logging ip access-list status

show logging ip access-list status [ __readonly__ num_entries seconds num_packets ]

Syntax Description

show

Show running system information

logging

logging information

ip

IP configuration

access-list

Access-list

status

ACLLOG status

__readonly__

num_entries

Type: uinteger

Max flows

seconds

Type: uinteger

Log-update interval in seconds

num_packets

Type: uinteger

threshold

Command Modes

- /exec

show logging last

show logging last i0

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

last

Show last few lines of logfile

i0

Type: integer

min: 1  max: 9999

Enter number of lines to display

Command Modes

- /exec

show logging level (licmgr)

show logging level { license | licmgr }

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

license

Show Licensing logging configuration

licmgr

Show Licensing logging configuration

Command Modes

- /exec

show logging level (sksd)

show logging level { keystore | sksd }

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

keystore

Show Keystore logging configuration

sksd

show Keystore/sksd logging configuration

Command Modes

- /exec

show logging level (syslog)

show logging level [ auth | authpriv | cron | daemon | ftp | kernel | local0 | local1 | local2 | local3 | local4 | local5 | local6 | local7 | lpr | mail | news | syslog | user | uucp ]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

auth

Show Authorization System logging configuration

authpriv

Show Authorization (Private) logging configuration

cron

Show Cron/at facility logging configuration

daemon

Show System daemons logging configuration

ftp

Show File Transfer System logging configuration

kernel

Show kernel logging configuration

local0

Show Local use daemons logging configuration

local1

Show Local use daemons logging configuration

local2

Show Local use daemons logging configuration

local3

Show Local use daemons logging configuration

local4

Show Local use daemons logging configuration

local5

Show Local use daemons logging configuration

local6

Show Local use daemons logging configuration

local7

Show Local use daemons logging configuration

lpr

Show Line Printer System logging configuration

mail

Show Mail System logging configuration

news

Show USENET news logging configuration

syslog

Show Internal Syslog Messages logging configuration

user

Show user process logging configuration

uucp

Show Unix-to-Unix copy system logging configuration

Command Modes

- /exec

show logging level aaa

show logging level aaa

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

aaa

Show aaa logging configuration

Command Modes

- /exec

show logging level acllog

show logging level acllog

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

acllog

Show acllog logging configuration

Command Modes

- /exec

show logging level aclmgr

show logging level aclmgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

aclmgr

Show aclmgr logging configuration

Command Modes

- /exec

show logging level adjmgr

show logging level adjmgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

adjmgr

Show adjmgr logging configuration

Command Modes

- /exec

show logging level arp

show logging level arp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

arp

Show arp logging configuration

Command Modes

- /exec

show logging level ascii-cfg

show logging level ascii-cfg

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ascii-cfg

Show ascii-cfg logging configuration

Command Modes

- /exec

show logging level bfd

show logging level bfd

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

bfd

Show bfd logging configuration

Command Modes

- /exec

show logging level bgp

show logging level bgp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

bgp

Show BGP logging configuration

Command Modes

- /exec

show logging level bloggerd

show logging level bloggerd

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

bloggerd

Show BloggerD logging configuration

Command Modes

- /exec

show logging level bootvar

show logging level bootvar

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

bootvar

Show bootvar logging configuration

Command Modes

- /exec

show logging level callhome

show logging level callhome

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

callhome

Show callhome logging configuration

Command Modes

- /exec

show logging level capability

show logging level capability

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

capability

Show capability logging configuration

Command Modes

- /exec

show logging level cdp

show logging level cdp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

cdp

Show CDP logging configuration

Command Modes

- /exec

show logging level cert-enroll

show logging level cert-enroll

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

cert-enroll

Show Cert-enroll logging configuration

Command Modes

- /exec

show logging level cert_enroll

show logging level cert_enroll

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

cert_enroll

Show Cert-enroll logging configuration

Command Modes

- /exec

show logging level cfs

show logging level cfs

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

cfs

Show CFS logging configuration

Command Modes

- /exec

show logging level clis

show logging level clis

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

clis

Show CLIS logging configuration

Command Modes

- /exec

show logging level clk_mgr

show logging level clk_mgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

clk_mgr

Show clock manager logging configuration

Command Modes

- /exec

show logging level confcheck

show logging level confcheck

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

confcheck

Show confcheck logging configuration

Command Modes

- /exec

show logging level copp

show logging level copp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

copp

Show copp logging configuration

Command Modes

- /exec

show logging level core

show logging level core

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

core

Show core daemon logging configuration

Command Modes

- /exec

show logging level dhcp_snoop

show logging level dhcp_snoop

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

dhcp_snoop

Show DHCP snoop logging configuration

Command Modes

- /exec

show logging level diagnostic device_test

show logging level diagnostic device_test

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

diagnostic

Diagnostic commands

device_test

Show device_test logging configuration

Command Modes

- /exec

show logging level diagnostic diagclient

show logging level diagnostic diagclient

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

diagnostic

Diagnostic commands

diagclient

Show diagclient logging configuration

Command Modes

- /exec

show logging level diagnostic diagmgr

show logging level diagnostic diagmgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

diagnostic

Diagnostic commands

diagmgr

Show diagmgr logging configuration

Command Modes

- /exec

show logging level eigrp

show logging level eigrp [eigrp-ptag]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

eigrp

Show EIGRP logging configuration

eigrp-ptag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: accounting | all | fsm | graceful-restart | interface | interfaces | internal | neighbor | neighbors | notifications | packets | prefix | route | route-map | shutdown | summary | topology | traffic | transmit | urib | vrf | vrf-events

length: 20

Process tag

Command Modes

- /exec

show logging level ethdstats

show logging level ethdstats

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ethdstats

Show delta statistics logging configuration

Command Modes

- /exec

show logging level ethpm

show logging level ethpm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ethpm

Show ethpm logging configuration

Command Modes

- /exec

show logging level evmc

show logging level evmc

Syntax Description

show

Show running system information

logging

Show message logging facilities

level

Show facility logging configuration

evmc

Show level for evmc syslog messages

Command Modes

- /exec

show logging level evmed

show logging level evmed

Syntax Description

show

Show running system information

logging

Show message logging facilities

level

Show facility logging configuration

evmed

Show level for evmed syslog messages

Command Modes

- /exec

show logging level evms

show logging level evms

Syntax Description

show

Show running system information

logging

Show message logging facilities

level

Show facility logging configuration

evms

Show level for evms syslog messages

Command Modes

- /exec

show logging level feature-mgr

show logging level feature-mgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

feature-mgr

Show feature manager logging configuration

Command Modes

- /exec

show logging level fex

show logging level fex

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

fex

Show FEX logging configuration

Command Modes

- /exec

show logging level fs-daemon

show logging level fs-daemon

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

fs-daemon

Show fs-daemon logging configuration

Command Modes

- /exec

show logging level glbp

show logging level glbp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

glbp

Show glbp logging settings

Command Modes

- /exec

show logging level gpixm

show logging level gpixm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

gpixm

Show global-pixm logging configuration

Command Modes

- /exec

show logging level hsrp

show logging level hsrp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

hsrp

Show HSRP logging configuration

Command Modes

- /exec

show logging level im

show logging level im

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

im

Show im logging configuration

Command Modes

- /exec

show logging level interface-vlan

show logging level interface-vlan

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

interface-vlan

Show interface-vlan logging configuration

Command Modes

- /exec

show logging level ip igmp

show logging level ip igmp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ip

Display IP information

igmp

Show igmp logging configuration

Command Modes

- /exec

show logging level ip msdp

show logging level ip msdp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ip

Display IP information

msdp

Show msdp logging configuration

Command Modes

- /exec

show logging level ip pim

show logging level ip pim

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ip

Display IP information

pim

Show pim logging configuration

Command Modes

- /exec

show logging level ipconf

show logging level ipconf [ipv6]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ipconf

Show ipconf logging configuration

ipv6

Show ipv6 Conf logging configuration

Command Modes

- /exec

show logging level ipqos

show logging level ipqos

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ipqos

Show ipqosmgr logging configuration

Command Modes

- /exec

show logging level ipv6 icmp

show logging level ipv6 icmp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ipv6

Configure IPv6 features

icmp

Show icmpv6 logging configuration

Command Modes

- /exec

show logging level ipv6 pim

show logging level ipv6 pim

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ipv6

Display IPv6 information

pim

Show pim6 logging configuration

Command Modes

- /exec

show logging level isis

show logging level isis

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

isis

Show ISIS logging configuration

Command Modes

- /exec

show logging level l2fm

show logging level l2fm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

l2fm

Show l2fm logging configuration

Command Modes

- /exec

show logging level l2pt

show logging level l2pt

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

l2pt

Show l2pt logging configuration

Command Modes

- /exec

show logging level l3vm

show logging level l3vm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

l3vm

Show L3VM logging configuration

Command Modes

- /exec

show logging level lacp

show logging level lacp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

lacp

Show lacp logging configuration

Command Modes

- /exec

show logging level ldap

show logging level ldap

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ldap

Show ldap logging configuration

Command Modes

- /exec

show logging level lldp

show logging level lldp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

lldp

Show LLDP logging configuration

Command Modes

- /exec

show logging level m2rib

show logging level m2rib

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

m2rib

Show M2RIB logging configuration

Command Modes

- /exec

show logging level mfdm

show logging level mfdm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

mfdm

Show mfdm logging configuration

Command Modes

- /exec

show logging level mfwd

show logging level mfwd

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

mfwd

Show MCASTFWD logging configuration

Command Modes

- /exec

show logging level module

show logging level module

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

module

Show module(linecard) manager logging configuration

Command Modes

- /exec

show logging level mpls switching

show logging level mpls switching

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

mpls

Show MPLS logging configuration

switching

Show mpls switching logging configuration

Command Modes

- /exec

show logging level mvsh

show logging level mvsh

Syntax Description

show

Show commands

logging

Show message logging facilities

level

Show message logging facilities

mvsh

Show level for mvsh syslog messages

Command Modes

- /exec

show logging level netstack

show logging level netstack

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

netstack

Show netstack logging configuration

Command Modes

- /exec

show logging level ntp

show logging level ntp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ntp

Show NTP logging settings.

Command Modes

- /exec

show logging level nve

show logging level nve

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

nve

Show NVE logging configuration

Command Modes

- /exec

show logging level oim

show logging level oim

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

oim

Display OIM information

Command Modes

- /exec

show logging level onep

show logging level onep

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

onep

One Platform

Command Modes

- /exec

show logging level orib

show logging level orib

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

orib

Show ORIB logging configuration

Command Modes

- /exec

show logging level ospf

show logging level ospf

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ospf

Show OSPF logging configuration

Command Modes

- /exec

show logging level ospfv3

show logging level ospfv3

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ospfv3

Display OSPFv3 status and configuration

Command Modes

- /exec

show logging level patch-installer

show logging level patch-installer

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

patch-installer

Show patch manager logging configuration

Command Modes

- /exec

show logging level pfstat

show logging level pfstat

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

pfstat

Show pfstat logging configuration

Command Modes

- /exec

show logging level pixm

show logging level pixm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

pixm

Show vdc-local-pixm logging configuration

Command Modes

- /exec

show logging level platform

show logging level platform

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

platform

Show platform logging configuration

Command Modes

- /exec

show logging level pltfm_config

show logging level pltfm_config

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

pltfm_config

Show pltfm_config logging configuration

Command Modes

- /exec

show logging level plugin

show logging level plugin

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

plugin

Show plugin logging configuration

Command Modes

- /exec

show logging level poap

show logging level poap

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

poap

Show poap logging configuration

Command Modes

- /exec

show logging level pong

show logging level pong

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

pong

Show Pong logging configuration

Command Modes

- /exec

show logging level port-channel

show logging level port-channel

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

port-channel

Show port-channel logging configuration

Command Modes

- /exec

show logging level port-security

show logging level port-security

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

port-security

Show port-security logging configuration

Command Modes

- /exec

show logging level private-vlan

show logging level private-vlan

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

private-vlan

Show interface-vlan logging configuration

Command Modes

- /exec

show logging level radius

show logging level radius

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

radius

Show radius logging configuration

Command Modes

- /exec

show logging level res_mgr

show logging level res_mgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

res_mgr

Show res_mgr logging configuration

Command Modes

- /exec

show logging level rip

show logging level rip

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

rip

Show RIP logging configuration

Command Modes

- /exec

show logging level routing multicast

show logging level routing [ ip | ipv4 ] multicast

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

Command Modes

- /exec

show logging level rpm

show logging level rpm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

rpm

Show RPM logging configuration

Command Modes

- /exec

show logging level rsvp

show logging level rsvp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

rsvp

Show RSVP logging configuration

Command Modes

- /exec

show logging level sal

show logging level sal

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

sal

Show SAL logging configuration

Command Modes

- /exec

show logging level scheduler

show logging level scheduler

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

scheduler

Show scheduler logging configuration

Command Modes

- /exec

show logging level security

show logging level security

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

security

Show security logging configuration

Command Modes

- /exec

show logging level session-mgr

show logging level session-mgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

session-mgr

Show session-mgr logging configurarion

Command Modes

- /exec

show logging level smm

show logging level smm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

smm

Show Shared Memory Manager logging configuration

Command Modes

- /exec

show logging level snmpd

show logging level snmpd

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

snmpd

Show SNMP logging configuration

Command Modes

- /exec

show logging level spanning-tree

show logging level spanning-tree

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

spanning-tree

Show spanning-tree logging configuration

Command Modes

- /exec

show logging level spm

show logging level spm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

spm

Show spm logging configuration

Command Modes

- /exec

show logging level sysmgr

show logging level sysmgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

sysmgr

Show sysmgr logging configuration

Command Modes

- /exec

show logging level tacacs

show logging level "tacacs"

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

tacacs

Show tacacs+ logging configuration

Command Modes

- /exec

show logging level track

show logging level track

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

track

Show track logging configuration

Command Modes

- /exec

show logging level tunnel

show logging level tunnel

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

tunnel

Show tunnel logging settings

Command Modes

- /exec

show logging level u2rib

show logging level u2rib

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

u2rib

Show U2RIB logging configuration

Command Modes

- /exec

show logging level u6rib

show logging level u6rib

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

u6rib

Show U6RIB logging configuration

Command Modes

- /exec

show logging level udld

show logging level udld

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

udld

Show udld logging configuration

Command Modes

- /exec

show logging level ufdm

show logging level ufdm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

ufdm

Show ufdm logging configuration

Command Modes

- /exec

show logging level urib

show logging level urib

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

urib

Show URIB logging configuration

Command Modes

- /exec

show logging level vdc_mgr

show logging level vdc_mgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vdc_mgr

Show vdc manager logging configuration

Command Modes

- /exec

show logging level virtual-service

show logging level virtual-service

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

virtual-service

Show virtualization manager logging configuration

Command Modes

- /exec

show logging level vlan_mgr

show logging level vlan_mgr

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vlan_mgr

Show vlan manager logging configuration

Command Modes

- /exec

show logging level vmm

show logging level vmm

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vmm

Show vmm logging configuration

Command Modes

- /exec

show logging level vntag

show logging level vntag

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vntag

Show vntag logging configuration

Command Modes

- /exec

show logging level vpc

show logging level vpc

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vpc

Show vPC logging configuration

Command Modes

- /exec

show logging level vrrp-cfg

show logging level vrrp-cfg

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vrrp-cfg

Show vrrp-cfg logging configuration

Command Modes

- /exec

show logging level vrrp-eng

show logging level vrrp-eng

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vrrp-eng

Show vrrp-eng logging configuration

Command Modes

- /exec

show logging level vshd

show logging level vshd

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vshd

Show vshd logging configuration

Command Modes

- /exec

show logging level vtp

show logging level vtp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

vtp

Show vtp logging configuration

Command Modes

- /exec

show logging level xbar

show logging level xbar

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

level

Show facility logging configuration

xbar

Show xbar logging configuration

Command Modes

- /exec

show logging logfile

show logging logfile

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

logfile

Show contents of logfile

Command Modes

- /exec

show logging logfile duration

show logging logfile duration s1

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

logfile

Show contents of logfile

duration

show messages from logfile of last given duration

s1

Type: string

length: 8

Enter hour, minutes, seconds of duration as HH:MM:SS

Command Modes

- /exec

show logging logfile last-index

show logging logfile last-index

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

logfile

Show contents of logfile

last-index

Show the sequence-number of the last message in logfile

Command Modes

- /exec

show logging logfile start-seqn

show logging logfile start-seqn i0 [ end-seqn i1 ]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

logfile

Show contents of logfile

start-seqn

Show messages from logfile from a given start-sequence-number

i0

Type: integer

Enter starting sequence number

end-seqn

Show messages from logfile from a given end-sequence-number

i1

Type: integer

Enter ending sequence number

Command Modes

- /exec

show logging logfile start-time

show logging logfile start-time i0 s0 i1 s1 [ end-time i2 s2 i3 s3 ]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

logfile

Show contents of logfile

start-time

Show messages from logfile from a given start-time

i0

Type: integer-range

Enter year in YYYY format

s0

Type: string

length: 3

Enter Month as Jan, Feb, Mar, ..., Oct, Nov, or Dec

i1

Type: integer-range

Enter day of month in dd format

s1

Type: string

length: 8

Enter hour, minutes, seconds as HH:MM:SS

end-time

Show messages from logfile up to a given end-time

i2

Type: integer-range

Enter year in YYYY format

s2

Type: string

length: 3

Enter Month as Jan, Feb, Mar, ..., Oct, Nov, or Dec

i3

Type: integer-range

Enter day of month in dd format

s3

Type: string

length: 8

Enter hour, minutes, seconds as HH:MM:SS

Command Modes

- /exec

show logging loopback

show logging loopback

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

loopback

Show logging loopback configuration

Command Modes

- /exec

show logging module

show logging module

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

module

Show module(linecard) logging configuration

Command Modes

- /exec

show logging monitor

show logging monitor

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

monitor

Show monitor logging configuration

Command Modes

- /exec

show logging nvram

show logging nvram [ last i0 ]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

nvram

Show NVRAM log

last

Show last few lines of nvram log

i0

Type: integer

min: 1  max: 100

Enter number of lines to display

Command Modes

- /exec

show logging onboard

show logging onboard [ card-first-power-on | card-boot-history | common_options | endtime s0 [ common_options | error-stats [ port i0 ] ] | error-stats [ port1 i1 ] | module module [ common_options | endtime1 s1 [ common_options | error-stats [ port3 i3 ] ] | error-stats [ port4 i4 ] | starttime s2 [ common_options | endtime2 s3 [ common_options | error-stats [ port6 i6 ] ] | error-stats [ port7 i7 ] ] | card-first-power-on | card-boot-history ] | obfl-logs | starttime1 s4 [ common_options | endtime3 s5 [ common_options | error-stats [ port8 i8 ] ] | error-stats [ port9 i9 ] ] | credit-loss [ module module [ last last_no { minutes | hours | days } ] | last last_no { minutes | hours | days } ] | flow-control { pause-count [ module module [ last last_no { minutes | hours | days } ] | last last_no { minutes | hours | days } ] | pause-events [ module module [ last last_no { minutes | hours | days } ] | last last_no { minutes | hours | days } ] | request-timeout [ module module ] | timeout-drops [ module module [ port10 i10 [ last last_no { minutes | hours | days } ] | last last_no { minutes | hours | days } ] | last last_no { minutes | hours | days } ] } ]

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

onboard

Show OBFL information

card-first-power-on

show card first power on information

card-boot-history

show card boot history

endtime

Show OBFL logs till end time mm/dd/yy-HH:MM:SS

s0

Type: string

length: 128

End time format - mm/dd/yy-HH:MM:SS

error-stats

Show OBFL error statistics

port

Show OBFL error statistics for a port

i0

Type: integer

min: 1  max: 64

common_options

give the options

boot-uptime  value: 11

boot-uptime
device-version  value: 12

device-version
environmental-history  value: 5

environmental-history
exception-log  value: 17

exception-log
interrupt-stats  value: 6

interrupt-stats
obfl-history  value: 13

obfl-history
stack-trace  value: 4

stack-trace
status  value: 16

status

port1

Show OBFL error statistics for a port

i1

Type: integer

min: 1  max: 64

module

Show OBFL information for Module

module

Type: integer

Enter module number

endtime1

Show OBFL logs till end time mm/dd/yy-HH:MM:SS

s1

Type: string

length: 128

End time format - mm/dd/yy-HH:MM:SS

port3

Show OBFL error statistics for a port

i3

Type: integer

min: 1  max: 64

port4

Show OBFL error statistics for a port

i4

Type: integer

min: 1  max: 64

starttime

Show OBFL logs from start time mm/dd/yy-HH:MM:SS

s2

Type: string

length: 128

Start time format - mm/dd/yy-HH:MM:SS

endtime2

Show OBFL logs till end time mm/dd/yy-HH:MM:SS

s3

Type: string

length: 128

End time format - mm/dd/yy-HH:MM:SS

port6

Show OBFL error statistics for a port

i6

Type: integer

min: 1  max: 64

port7

Show OBFL error statistics for a port

i7

Type: integer

min: 1  max: 64

starttime1

Show OBFL logs from start time mm/dd/yy-HH:MM:SS

s4

Type: string

length: 128

Start time format - mm/dd/yy-HH:MM:SS

endtime3

Show OBFL logs till end time mm/dd/yy-HH:MM:SS

s5

Type: string

length: 128

End time format - mm/dd/yy-HH:MM:SS

port8

Show OBFL error statistics for a port

i8

Type: integer

min: 1  max: 64

port9

Show OBFL error statistics for a port

i9

Type: integer

min: 1  max: 64

obfl-logs

Show OBFL Tech Support Log.

timeout-drops

Show OBFL Timeout Drops logs

port10

Show OBFL statistics per port basis

i10

Type: integer

min: 1  max: 64

credit-loss

Show OBFL Credit Loss logs

last

Show last min/hour/day logs

last_no

Type: integer

Duration in min/hrs/day

minutes

entry in minutes

hours

entry in hours

days

entry in days

request-timeout

Show OBFL request timeout log

flow-control

Show OBFL Flow Control log

pause-count

Show Flow Control Pause Count Logs

pause-events

Show Flow Control Pause Event Logs

Command Modes

- /exec

show logging server

show logging server

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

server

Show server logging configuration

Command Modes

- /exec

show logging source-interface

show logging source-interface

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

source-interface

Show logging source-interface configuration

Command Modes

- /exec

show logging timestamp

show logging timestamp

Syntax Description

show

Show running system information

logging

Show logging configuration and contents of logfile

timestamp

Show logging timestamp configuration

Command Modes

- /exec

Chapter 13. M Show Commands

- show mac-list

- show mac address-table (l2fm)

- show mac address-table (l2fm)

- show mac address-table aging-time

- show mac address-table count

- show mac address-table learning-mode

- show mac address-table multicast

- show mac address-table notification mac-move

- show mac vdc

- show mcectest

- show mcectest mcec interface

- show mgmt-policy

- show module

- show module bandwidth-fairness

- show module fex

- show module supported

- show module uptime

- show monitor

- show monitor session

- show mpls label range

- show mpls label statistics

- show mpls switching

- show mpls switching clients

- show mroute

- show mroute flood vlan

- show mroute summary

- show multicast ftag

- show multicast trees

- show mvpn bgp

- show mvpn mdt encap

- show mvpn mdt route

- show mvpn snmp mib genericTable

- show mvpn snmp mib mvpnBgpMdtUpdateTable

- show mvpn snmp mib mvpnMdtDataTable

- show mvpn snmp mib mvpnMdtDefaultTable

- show mvpn snmp mib mvpnMdtJnRcvTable

- show mvpn snmp mib mvpnMdtJnSendTable

- show mvpn snmp mib mvpnMrouteMdtTable

- show mvpn snmp mib mvpnMvrfNumber

- show mvpn snmp mib mvpnNotificationEnable

- show mvpn snmp mib mvpnTunnelTable

show mac-list

show mac-list [ mac_list_name [ seq seq_no | mac_addr [mac_mask] ] ] [ __readonly__ TABLE_mac_list name seq action rule ]

Syntax Description

show

Show running system information

mac-list

Show mac-lists

mac_list_name

Type: string

pattern: [!-~]*

length: 63

Name of mac list

seq

Sequence number

seq_no

Type: uinteger

min: 1  max: 4294967294

Sequence number

mac_addr

Type: ethernet

MAC address

mac_mask

Type: ethernet

MAC mask

__readonly__

TABLE_mac_list

name

Type: string

seq

Type: uinteger

action

Type: string

rule

Type: string

Command Modes

- /exec

show mac address-table (l2fm)

show mac address-table [ static | dynamic | secure ] [ [ address1 mac-addr | switch-id swid [ sub-switch-id sswid ] | vlan1 id ] + | [ address mac-addr | interface interface-name | vlan id ] + ] [ __readonly__ l2entry header TABLE_mac_address disp_mac_addr disp_type disp_vlan disp_is_static disp_age disp_is_secure disp_is_ntfy disp_port ]

Syntax Description

show

show

mac

MAC configuration commands

address-table

MAC Address Table

static

Display Static Entries

dynamic

Display Dynamic Entries

secure

Display Secure Entries Not available in this release.

address

address

address1

address

mac-addr

Type: ethernet

MAC Address

switch-id

Remote Switch ID

swid

Type: integer

min: 1  max: 4095

Switch ID

sub-switch-id

Remote Sub Switch ID

sswid

Type: integer

min: 0  max: 255

Sub Switch ID

interface

Interface

interface-name

Type: interface

Interface name

vlan

VLAN

vlan1

VLAN

id

Type: integer

min: 1  max: 4094

VLAN ID

__readonly__

header

Type: string

Header

l2entry

Type: string

L2 Entry String

TABLE_mac_address

Mac address table

disp_type

Type: string

GateWay or Primary Entry or OTV or None

disp_vlan

Type: uinteger

VLAN

disp_mac_addr

Type: ethernet

MAC Address

disp_is_static

Type: bool

Static/Dynamic

disp_age

Type: uinteger

Age of the Mac

disp_is_secure

Type: bool

Is mac secure

disp_is_ntfy

Type: bool

Is mac notified

disp_port

Type: string

Interface/port info of the mac

Command Modes

- /exec

show mac address-table (l2fm)

show mac address-table module [count] [ static | dynamic | secure ] [ [ address1 mac-addr | switch-id swid [ sub-switch-id sswid ] | vlan1 id | [ vdc1 vdc | e-vdc ] | fe1 feid ] + | [ address mac-addr | interface interface-name | vlan id | [ vdc vdc | e-vdc ] | fe feid ] + ] [hex] [ __readonly__ entrycount l2entry header pi_e age rm ifname sec ntfy type ]

Syntax Description

show

show

mac

MAC configuration commands

address-table

MAC Address Table

module

Type: integer

min: 1  max: 16

Module Number

count

Number of entries

static

Display Static Entries

dynamic

Display Dynamic Entries

secure

Display Secure Entries Not available in this release.

address

address

address1

address

mac-addr

Type: ethernet

MAC Address

switch-id

Remote Switch ID

swid

Type: integer

min: 1  max: 4095

Switch ID

sub-switch-id

Remote Sub Switch ID

sswid

Type: integer

min: 0  max: 255

Sub Switch ID

interface

Interface

interface-name

Type: interface

Interface name

vlan

VLAN

vlan1

VLAN

id

Type: integer

min: 1  max: 4094

VLAN ID

vdc

VDC ID or Name

vdc1

VDC ID or Name

vdc

Type: integer

min: 1  max: 16

VDC ID

e-vdc

Type: userdef

Select VDC ID that match VDC Name

fe

Forwarding Engine Instance ID(Zero based)

fe1

Forwarding Engine Instance ID(Zero based)

feid

Type: integer

min: 0  max: 15

FE ID value

hex

display swid/sswid/lid in hex

__readonly__

header

Type: string

Header

pi_e

Type: string

Primary Interface of EARL

age

Type: integer

min: 1  max: 1000000

Last seen age in seconds

rm

Type: string

RM

ifname

Type: string

interface name as string

sec

Type: string

secure

ntfy

Type: string

notify

entrycount

Type: string

Number of L2 entries

l2entry

Type: string

L2 Entry String

type

Type: string

MAC type - Static or Dynamic

Command Modes

- /exec

show mac address-table aging-time

show mac address-table aging-time [ __readonly__ age_str age ]

Syntax Description

show

show

mac

MAC configuration commands

address-table

MAC Address Table

aging-time

Configured/default age

__readonly__

age_str

Type: string

Age info

age

Type: integer

min: 1  max: 1000000

Age time

Command Modes

- /exec

show mac address-table count

show mac address-table count [ static | dynamic ] [ vlan id | interface interface-name | switch-id swid [ sub-switch-id sswid ] ] + [ __readonly__ TABLE-macaddtblcount id-out count_str total_cnt dyn_cnt static_cnt secure_cnt otv_cnt ]

Syntax Description

show

show

mac

MAC configuration commands

address-table

MAC Address Table

count

Number of MAC entries

static

Display Static Entries

dynamic

Display Dynamic Entries

vlan

VLAN

id

Type: integer

min: 1  max: 4094

VLAN ID

interface

Interface

interface-name

Type: interface

Interface name

switch-id

Remote Switch ID

swid

Type: integer

min: 1  max: 4095

Switch ID

sub-switch-id

Remote Sub Switch ID

sswid

Type: integer

min: 0  max: 255

Sub Switch ID

__readonly__

TABLE-macaddtblcount

MAC Address Dynamic Count Table

id-out

Type: integer

MAC Address Table VLAN ID

count_str

Type: string

Count info

total_cnt

Type: integer

Total count

dyn_cnt

Type: integer

Dynamic count

static_cnt

Type: integer

Static count

secure_cnt

Type: integer

Secure count

otv_cnt

Type: integer

OTV count

Command Modes

- /exec

show mac address-table learning-mode

show mac address-table learning-mode [ vlan id ] [ __readonly__ learning_mode_str vlan_id mode_str ]

Syntax Description

show

show

mac

MAC configuration commands

address-table

MAC Address Table

learning-mode

Learning Mode Not available in this release.

vlan

VLAN

id

Type: integer

min: 1  max: 4094

VLAN ID

__readonly__

learning_mode_str

Type: string

Learning Mode

vlan_id

Type: integer

min: 1  max: 4094

VLAN ID

mode_str

Type: string

Mode

Command Modes

- /exec

show mac address-table multicast

show mac address-table multicast [ vlan vlan-id ] [ __readonly__ TABLE_vlan vlan-id mac-addr type age oifs ]

Syntax Description

show

Show running system information

mac

MAC configuration commands

address-table

MAC Address Table

multicast

mcast mac OIF Static Entry Not available in this release.

vlan

VLAN/BD

vlan-id

Type: vlan

VLAN/BD

__readonly__

TABLE_vlan

vlan-id

Type: integer

mac-addr

Type: ethernet

type

Type: string

age

Type: integer

oifs

Type: interface

Command Modes

- /exec

show mac address-table notification mac-move

show mac address-table notification mac-move [ __readonly__ TABLE_mac_notif disp_mm_status disp_mm_triggers disp_macs_added disp_macs_moved disp_macs_removed ]

Syntax Description

show

show

mac

MAC

address-table

MAC Address Table

notification

Display Notification Information

mac-move

Mac Move Notification

__readonly__

Read Only

TABLE_mac_notif

Mac address notification table

disp_mm_status

Type: uinteger

Mac Move Status

disp_mm_triggers

Type: uinteger

# of triggers

disp_macs_added

Type: uinteger

Number of MACs added since system bring up

disp_macs_removed

Type: uinteger

Number of MACs removed since system bring up

disp_macs_moved

Type: uinteger

Number of MACs moved since system bring up

Command Modes

- /exec

show mac vdc

show mac vdc vdc_id [ __readonly__ vdc_id mac_address ]

Syntax Description

show

show

mac

show management port mac address of the given vdc

vdc

show management port mac address of this vdc id

vdc_id

Type: integer

min: 1  max: 4

please enter vdc id

__readonly__

vdc_id

Type: string

mac_address

Type: string

Command Modes

- /exec

show mcectest

show mcectest arg [ __readonly__ arg_resp ]

Syntax Description

show

Show running system information

mcectest

Show MCECTEST related information

arg

Type: string

Enter your arguments

__readonly__

Read Only

arg_resp

Type: string

Response

Command Modes

- /exec

show mcectest mcec interface

show mcectest mcec interface if [use-cache] [vdc-id] [ _readonly_ mcec_mode ]

Syntax Description

show

Show running system information

mcectest

Show MCECTEST related information

mcec

Show MCECM information

interface

Specify interface

use-cache

Use cache

_readonly_

mcec_mode

Type: string

MCEC port mode

Command Modes

- /exec

show mgmt-policy

show mgmt-policy { policy-name | all } [ __readonly__ TABLE_mgmt_policy mgt-pol-name [ source-ip source-mask ] [source-ip6] [ src-port-rangestart src-port-range-end ] [source-port] [ dst-port-rangestart dest-port-range-end ] [dest-port] ]

Syntax Description

show

Show running system information

mgmt-policy

PM Management policy

policy-name

Type: string

Name of the policy

all

Show all policies

__readonly__

TABLE_mgmt_policy

Management policy Details

mgt-pol-name

Type: string

source-ip

Type: ipaddr

source-mask

Type: string

source-ip6

Type: ipv6addr

src-port-rangestart

Type: integer

src-port-range-end

Type: integer

source-port

Type: integer

dst-port-rangestart

Type: integer

dest-port-range-end

Type: integer

dest-port

Type: integer

Command Modes

- /exec

show module

show module [ module | s0 [santa-cruz-range] | fabric [module] ] [ __readonly__ TABLE_modinfo modinf ports modtype model status [ TABLE_modpwrinfo modpwr pwrstat reason ] TABLE_modwwninfo modwwn sw hw slottype [ TABLE_modapplinfo modappl desc applver ] TABLE_modmacinfo modmac mac serialnum TABLE_moddiaginfo mod diagstatus TABLE_xbarinfo xbarinf xbarports xbartype xbarmodel xbarstatus [ TABLE_xbarpwrinfo xbarpwr xbarpwrstat xbarreason ] TABLE_xbarwwninfo xbarwwn xbarsw xbarhw xbarwwnstr TABLE_xbarmacinfo xbarmac xbarmacaddr xbarserialnum ]

Syntax Description

show

Show running system information

module

Show module information

module

Type: integer

min: 1  max: 30

Enter module number

s0

Type: xbar-str

Show xbar information

santa-cruz-range

Type: integer-range

please enter the xbar number

fabric

Show fabric information

santa-cruz-range

Type: integer-range

please enter the fabric number

__readonly__

TABLE_modinfo

Show Module info

modinf

Type: uinteger

Module

ports

Type: uinteger

Num Ports

modtype

Type: string

Module Type

model

Type: string

Model

status

Status

present  value: 0

removed  value: 1

online  value: 2

Offline  value: 3

powered-up  value: 4

powered-dn  value: 5

err-pwd-dn  value: 6

testing  value: 7

initializing  value: 8

failure  value: 9

registrn_failure  value: 10

failure  value: 11

upgrading  value: 12

SRG_failure  value: 13

HA_Seqno_failure  value: 14

inserted  value: 15

initializing(Gsync)  value: 16

battery-powered  value: 17

pwr-denied  value: 18

absent  value: 19

pwr-cycld  value: 20

unknown  value: 21

active  value: 22

active *  value: 26

standby  value: 23

ha-standby  value: 24

initializing(vdc)  value: 27

ok  value: 25

ok(partial failure)  value: 28

TABLE_modpwrinfo

Mod Pwr Info

modpwr

Type: uinteger

Module

pwrstat

Power Status

Unsupported(poweroff)  value: 0

removed  value: 1

online  value: 2

Offline  value: 3

powered-up  value: 4

powered-dn  value: 5

err-pwd-dn  value: 6

testing  value: 7

initializing  value: 8

failure  value: 9

registrn_failure  value: 10

failure  value: 11

upgrading  value: 12

SRG_failure  value: 13

HA_Seqno_failure  value: 14

inserted  value: 15

initializing(Gsync)  value: 16

battery-powered  value: 17

pwr-denied  value: 18

absent  value: 19

pwr-cycld  value: 20

unknown  value: 21

active  value: 22

standby  value: 23

ha-standby  value: 24

ok  value: 25

reason

Type: string

Reason

TABLE_modwwninfo

Mod WWN Info

modwwn

Type: uinteger

Module

sw

Type: string

SW Ver

hw

Type: string

HW Ver

slottype

Type: string

Slot

TABLE_modapplinfo

Mod Appl image info

modappl

Type: uinteger

Module

desc

Type: string

Image desc

applver

Type: string

Version

TABLE_modmacinfo

Mod MAC Info

modmac

Type: uinteger

Module

mac

Type: string

MAC

serialnum

Type: string

Serial Num

TABLE_moddiaginfo

Mod diag info

mod

Type: uinteger

Module

diagstatus

Type: string

Diag status

TABLE_xbarinfo

Show xbar info

xbarinf

Type: uinteger

Module

xbarports

Type: uinteger

Num Ports

xbartype

Type: string

Module Type

xbarmodel

Type: string

Model

xbarstatus

Status

Unsupported(poweroff)  value: 0

removed  value: 1

online  value: 2

Offline  value: 3

powered-up  value: 4

powered-dn  value: 5

err-pwd-dn  value: 6

testing  value: 7

initializing  value: 8

failure  value: 9

registrn_failure  value: 10

failure  value: 11

upgrading  value: 12

SRG_failure  value: 13

HA_Seqno_failure  value: 14

inserted  value: 15

initializing(Gsync)  value: 16

battery-powered  value: 17

pwr-denied  value: 18

absent  value: 19

pwr-cycld  value: 20

unknown  value: 21

active  value: 22

active *  value: 26

standby  value: 23

ha-standby  value: 24

initializing(vdc)  value: 27

ok  value: 25

TABLE_xbarpwrinfo

Xbar Pwr Info

xbarpwr

Type: uinteger

Module

xbarpwrstat

Power Status

Unsupported(poweroff)  value: 0

removed  value: 1

online  value: 2

Offline  value: 3

powered-up  value: 4

powered-dn  value: 5

err-pwd-dn  value: 6

testing  value: 7

initializing  value: 8

failure  value: 9

registrn_failure  value: 10

failure  value: 11

upgrading  value: 12

SRG_failure  value: 13

HA_Seqno_failure  value: 14

inserted  value: 15

initializing(Gsync)  value: 16

battery-powered  value: 17

pwr-denied  value: 18

absent  value: 19

pwr-cycld  value: 20

unknown  value: 21

active  value: 22

active *  value: 26

standby  value: 23

ha-standby  value: 24

initializing(vdc)  value: 27

ok  value: 25

xbarreason

Type: string

Reason

TABLE_xbarwwninfo

Xbar WWN Info

xbarwwn

Type: uinteger

Module

xbarsw

Type: string

SW Ver

xbarhw

Type: string

HW Ver

xbarwwnstr

Type: string

WWN

TABLE_xbarmacinfo

Xbar MAC Info

xbarmac

Type: uinteger

Module

xbarmacaddr

Type: string

MAC

xbarserialnum

Type: string

Serial Num

Command Modes

- /exec

show module bandwidth-fairness

show module module bandwidth-fairness [ __readonly__ TABLE_fairness statement ]

Syntax Description

show

Show running system information

module

Show module information

module

Type: integer

min: 1  max: 30

Enter module number

bandwidth-fairness

Show bandwidth fairness status

__readonly__

TABLE_fairness

statement

Type: string

Command Modes

- /exec

show module fex

show module fex [ all | i ] [ __readonly__ TABLE_modinfo fexinf modinf ports modtype model status TABLE_modwwninfo fexwwn modwwn sw hw wwn TABLE_modmacinfo fexmac modmac mac serialnum ]

Syntax Description

show

Show running system information

module

Show module information

fex

Show fex module information

all

Show information for all FEX

i

Type: integer

min: 100  max: 199

Enter FEX identifier

__readonly__

TABLE_modinfo

Show Module info

fexinf

Type: uinteger

Fex

modinf

Type: uinteger

Module

ports

Type: uinteger

Num Ports

modtype

Type: string

Module Type

model

Type: string

Model

status

Type: string

Status

TABLE_modwwninfo

Mod WWN Info

fexwwn

Type: uinteger

Fex

modwwn

Type: uinteger

Module

sw

Type: string

SW Ver

hw

Type: string

HW Ver

wwn

Type: string

WWN

TABLE_modmacinfo

Mod MAC Info

fexmac

Type: uinteger

Fex

modmac

Type: uinteger

Module

mac

Type: string

MAC

serialnum

Type: string

Serial Num

Command Modes

- /exec

show module supported

show module supported

Syntax Description

show

Show running system information

module

Show module information

supported

Show supported sw-card-types for this chassis

Command Modes

- /exec

show module uptime

show module uptime [ __readonly__ TABLE_uptimeinf slot starttime daysup hoursup minutesup secondsup ]

Syntax Description

show

Show running system information

module

Show module information

uptime

Show how long the module has been up and running

__readonly__

TABLE_uptimeinf

Show uptime info

slot

Type: string

Slot

starttime

Type: date

Start Time

daysup

Type: uinteger

Days Up

hoursup

Type: uinteger

Hours Up

minutesup

Type: uinteger

Minutes Up

secondsup

Type: uinteger

Seconds Up

Command Modes

- /exec

show monitor

show monitor [ __readonly__ TABLE_session session_number state state_reason description ]

Syntax Description

show

Show running system information

monitor

Show Ethernet SPAN information

__readonly__

Read only

TABLE_session

show monitor

session_number

Type: integer

session id

state

State

up  value: 1

down  value: 2

error  value: 3

state_reason

State reason

The session is up  value: 0

No hardware resource  value: 1

No operational src/dst  value: 2

Generic error  value: 3

No sources configured  value: 4

No dest configured  value: 5

No src/dst configured  value: 6

Session admin shut  value: 7

Dst in wrong mode  value: 8

Src in wrong mode  value: 9

No erspan-id specified  value: 10

Multi-dst not allowed  value: 11

No valid VRF  value: 12

No valid IP Address  value: 13

No valid global IP Address  value: 14

ACL capture feature disabled  value: 15

ACL capture resource unavailable  value: 16

ACL capture VDC mismatched  value: 17

SPAN session not supported in F1/F2 only VDC  value: 18

No route to destination IP address  value: 20

ARP not resolved  value: 21

Egress interface not resolved  value: 22

SVI member not retrieved  value: 23

FP route not found  value: 24

Source MAC not retrieved  value: 25

Failed to retrieve .1q tag for egress SI  value: 29

Source switch-id not retrieved  value: 26

Source LID not retrieved  value: 27

Failed to retrieve FPC for egress fex intf  value: 30

Unsupported route (e.g. tunnel, lo)  value: 31

description

Type: string

Session Description

Command Modes

- /exec

show monitor session

show monitor session { all | session_number | range session_range } [brief] [ __readonly__ TABLE_session session_number flow_id state state_reason description type session_mode [sources_rx] + [sources_tx] + [sources_both] + [destinations] + [acl_destinations] + [source_vlans_rx] + [src_ip] + [erspan_id] + [dst_ip] + [origin_ip] + [vrf_name] + [acl_name] + [erspan_ttl] + [erspan_dscp] + [source_vlans_tx] + [source_vlans_both] + [filter_vlans] + [span_mtu] + [span_rate] + [span_sampling] + [tree-id] + [switchid] + [err_desc] + [l3_egress_span] + [fex_ingress_intf] + [sampling_capability] + [mtu_capability] + [rate_limit_cap] + [mcbe] + [switch_id] + [erspan_v3_cap] + [erspan_acl] + [version] + [erspan_granularity] + [erspan_gran_cap] + [erspan_v2_cap] ]

Syntax Description

show

Show running system information

monitor

Show Ethernet SPAN information

session

Show session info

all

All sessions

session_number

Type: integer

min: 1  max: 32

range

Specify a range

session_range

Type: integer-mrange

brief

Brief information

__readonly__

Read only

TABLE_session

show monitor

flow_id

Type: integer

erspan-id

description

Type: string

Session Description

err_desc

Type: string

Error Description

type

Session type

state

State

up  value: 1

down  value: 2

error  value: 3

state_reason

State reason

The session is up  value: 0

No hardware resource  value: 1

No operational src/dst  value: 2

Generic error  value: 3

No sources configured  value: 4

No dest configured  value: 5

No src/dst configured  value: 6

Session admin shut  value: 7

Dst in wrong mode  value: 8

Src in wrong mode  value: 9

No erspan-id specified  value: 10

Multi-dst not allowed  value: 11

No valid VRF  value: 12

No valid IP Address  value: 13

No valid global IP Address  value: 14

ACL capture feature disabled  value: 15

ACL capture resource unavailable  value: 16

ACL capture VDC mismatched  value: 17

SPAN session not supported in F1/F2 only VDC  value: 18

No route to destination IP address  value: 20

ARP not resolved  value: 21

Egress interface not resolved  value: 22

SVI member not retrieved  value: 23

FP route not found  value: 24

Source MAC not retrieved  value: 25

Failed to retrieve .1q tag for egress SI  value: 29

Source switch-id not retrieved  value: 26

Source LID not retrieved  value: 27

Failed to retrieve FPC for egress fex intf  value: 30

Unsupported route (e.g. tunnel, lo)  value: 31

session_mode

Type: string

Session mode

sources_rx

Type: interface

List of ingress sources

sources_tx

Type: interface

List of egress sources

sources_both

Type: interface

List of sources in both directions

span_mtu

Type: uinteger

SPAN MTU value

span_rate

Type: uinteger

SPAN rate limit value

span_sampling

Type: uinteger

SPAN sampling range

destinations

Type: interface

List of destinations

acl_destinations

Type: interface

List of interfaces that wont work for acl capture

dst_ip

Type: ipaddr

ERSPAN destination IP

src_ip

Type: ipaddr

ERSPAN source IP

origin_ip

Type: ipaddr

ERSPAN origin IP at source router

erspan_id

Type: uinteger

ERSPAN ID Value

vrf_name

Type: string

ERSPAN session VRF

acl_name

Type: string

ERSPAN session ACL

erspan_ttl

Type: uinteger

ERSPAN TTL Value

erspan_dscp

Type: uinteger

ERSPAN DSCP Value

source_vlans_rx

Type: vlan-mrange

Source ingress vlan

source_vlans_tx

Type: vlan-mrange

Source egress vlan

source_vlans_both

Type: vlan-mrange

Source vlans in both directions

filter_vlans

Type: vlan-mrange

Filter vlans

tree-id

Type: uinteger

proxy layer2 gateway source tree-id

switchid

Type: uinteger

proxy layer2 gateway source switchid

sampling_capability

Type: uinteger

List of modules that support Sampling

mtu_capability

Type: uinteger

List of modules that support MTU

l3_egress_span

Type: uinteger

List of modules that support L3 Multicast Egress SPAN

fex_ingress_intf

Type: uinteger

List of fex interfaces that wont work for ingress span

rate_limit_cap

Type: uinteger

List of modules that support Rate Limit

mcbe

Type: uinteger

List all modules that support multicast best effort

switch_id

Type: uinteger

erspan_switch-id

erspan_v3_cap

Type: uinteger

List of modules that support erspan version3

erspan_v2_cap

Type: uinteger

List of modules that support erspan version2

erspan_acl

Type: uinteger

List of modules that support ERSPAN ACL filtering

version

Type: uinteger

Erspan source version: v2/v3

erspan_gran_cap

Type: uinteger

List of modules that support the granularity set

erspan_granularity

Type: string

ERSPAN Type III Granularity

Command Modes

- /exec

show mpls label range

show mpls label range [ __readonly__ TABLE_label_range dynamic-min dynamic-max static-min static-max ]

Syntax Description

show

Show running system information

mpls

MPLS configuration commands

label

Label properties

range

Label range

__readonly__

TABLE_label_range

dynamic-min

Type: uinteger

dynamic-max

Type: uinteger

static-min

Type: uinteger

static-max

Type: uinteger

Command Modes

- /exec

show mpls label statistics

show mpls label statistics label [ __readonly__ TABLE_label_stats label packets bytes ]

Syntax Description

show

Show running system information

mpls

Display MPLS status and configuration

label

Show a specific label statistics

statistics

Statistics for the label

label

Type: integer

min: 0  max: 524286

Label

__readonly__

TABLE_label_stats

label

Type: uinteger

Label value

packets

Type: uinteger

No. of packets

bytes

Type: uinteger

No. of bytes

Command Modes

- /exec

show mpls switching

show mpls switching [ labels label [max-label] | interface intf | { ip-addr | ipv4-prefix } [ vrf vrf-name ] | ipv6-prefix [ vrf vrf-name ] | traffic-eng tunnels [cbts] [tunnel-id] | traffic-eng lsp ipv4 [ ingress-addr tunnel-id ] | aggregate [ ipv4 | ipv6 ] [ vrf vrf-name ] | fec { te_if | ipv4_te_lsp | ipv6_te_lsp | ipv4_prefix [ vrf vrf-name ] | ipv6_prefix [ vrf vrf-name ] | deagg [ vrf vrf-name ] } | summary ] [detail] [private] [ vrf vrf-name ] [ __readonly__ TABLE_vrf vrf_name in_label out_label ipv4_prefix ipv6_prefix tunnel_v4_mid_source tunnel_v6_mid_source tunnel_id ext_v4_tunnel_id ext_v6_tunnel_id tunnel_instance deagg_vrf deagg_af tunnel_head out_interface ipv4_next_hop ipv6_next_hop nhlfe_p2p_flag nhlfe_frr_status nhlfe_stale_flag in_packets in_bytes out_packets out_bytes tunnel_v4_mid_dest tunnel_v6_mid_dest ipv4_next_hop ipv6_next_hop ]

Syntax Description

show

Show running system information

mpls

Display MPLS status and configuration

switching

Display the MPLS label switching database

traffic-eng

Show traffic-engineering related entries

ip-addr

Type: ipaddr

Match destination address

ipv4-prefix

Type: ipprefix

Specify an IP prefix/mask

ipv6-prefix

Type: ipv6prefix

Specify an IPv6 prefix/mask

fec

Show FEC information in the ULIB

private

Show more detailed information in the ULIB

labels

Show a specific label-related information

label

Type: integer

min: 0  max: 524286

Low label value

max-label

Type: integer

min: 0  max: 524286

High label value

interface

Match outgoing interface

tunnels

Show TE head-end information

cbts

Show TE head-end CBTS information

lsp

Show TE mid-point information

aggregate

Show aggregate-related information

intf

Type: interface

Specify outgoing interface

ingress-addr

Type: ipaddr

Match TE ingress address

summary

Summarized information

detail

Detailed information

te_if

TE tunnel head-end

ipv4_te_lsp

TE IPv4 LSP midpoint

ipv6_te_lsp

TE IPv6 LSP midpoint

ipv4_prefix

IPv4 prefix

ipv6_prefix

IPv6 prefix

ipv4

Display IPv4 information

ipv6

Display IPv6 information

deagg

De-aggregation

tunnel-id

Type: integer

min: 0  max: 65535

LSP Tunnel ID

vrf

Display per-VRF information

vrf-name

Type: vrf

VRF name (Max Size 32)

__readonly__

TABLE_vrf

vrf_name

Type: string

in_label

Type: uinteger

out_label

Type: uinteger

ipv4_prefix

Type: ipprefix

ipv6_prefix

Type: ipv6prefix

tunnel_v4_mid_source

Type: ipaddr

tunnel_v6_mid_source

Type: ipv6addr

tunnel_v4_mid_dest

Type: ipaddr

tunnel_v6_mid_dest

Type: ipv6addr

tunnel_id

Type: uinteger

ext_v4_tunnel_id

Type: ipaddr

ext_v6_tunnel_id

Type: ipv6addr

tunnel_instance

Type: uinteger

tunnel_head

Type: string

deagg_vrf

Type: string

deagg_af

Type: string

out_interface

Type: string

ipv4_next_hop

Type: ipaddr

ipv6_next_hop

Type: ipv6addr

nhlfe_frr_status

Type: string

nhlfe_stale_flag

Type: string

nhlfe_p2p_flag

Type: string

in_packets

Type: uinteger

in_bytes

Type: uinteger

out_packets

Type: uinteger

out_bytes

Type: uinteger

Command Modes

- /exec

show mpls switching clients

show mpls switching clients [ __readonly__ TABLE_client pib-name pib-index pib-uuid pib-sap stale-time pib-flag stale-due reg-msg conv-msg inv-conv fec-msg fec-add fec-del last-xid fec-ack ]

Syntax Description

show

Show running system information

mpls

Display MPLS status and configuration

switching

Display the MPLS label switching database

clients

Display ULIB client components

__readonly__

TABLE_client

pib-name

Type: string

Name of the client(pib)

pib-index

Type: uinteger

PIB Index

pib-uuid

Type: uinteger

PIB UUID

pib-sap

Type: uinteger

MTS SAP for the pib

stale-time

Type: uinteger

Stale time

pib-flag

Type: uinteger

Flags set by the pib

stale-due

Type: string

Stale timer due in

reg-msg

Type: uinteger

Number of Registration Message

conv-msg

Type: uinteger

Number of Converge Message

inv-conv

Type: uinteger

Number of Invalid Convergence message

fec-msg

Type: uinteger

Number of FEC messages

fec-add

Type: uinteger

Number of FEC Add messages

fec-del

Type: uinteger

Number of FEC delete messages

last-xid

Type: uinteger

Last XID

fec-ack

Type: uinteger

Number of FEC Ack messages sent

Command Modes

- /exec

show mroute

show { l2 | fabricpath } mroute { [vdc-omf] [resolved] | [ vlan vlanid ] { [omf] | [flood] | [ source { srcaddr | v6srcaddr | macsrcaddr } ] [ group { groupaddr | v6groupaddr | macgroupaddr } ] } [resolved] [ ftag ftag-id ] [hex] } [ __readonly__ [hex2] { TABLE_gr [ftag] vlan_id [ v4src v4grp macgrp | v6src v6grp macsrc ] [ omf | flood ] rt-uptime owners num_nh TABLE_nh { nh_if | nh_sw } [stale] [exclude] [svi] flags nh-uptime owner rt_type | done | start } ]

Syntax Description

show

Show running system information

l2

Layer2 information

fabricpath

fabricpath information

mroute

Show multicast route database

vdc-omf

Display vdc omf route

vlan

Show information for a vlan

omf

Show catch-all entry consisting of mroute ports

flood

Display vlan flood route

ftag

Show ftag number

source

Show (s, g) source IP address

group

Show group address

hex

Display switch-ids in hex

vlanid

Type: uinteger

min: 1  max: 4096

Vlan value

ftag-id

Type: uinteger

min: 1  max: 1024

ftag id

groupaddr

Type: ipaddr

Group address

v6groupaddr

Type: ipv6addr

IPv6 Group address

macgroupaddr

Type: string

MAC Group address

srcaddr

Type: ipaddr

Source address

v6srcaddr

Type: ipv6addr

IPv6 source address

macsrcaddr

Type: string

MAC source address

resolved

Resolve switchid nexthops into the underlying interfaces

__readonly__

Read Only

hex2

Type: bool

TABLE_gr

vlan_id

Type: uinteger

min: 1  max: 4096

VLAN

rt-uptime

Type: duration

Time route was created

num_nh

Type: uinteger

Number of next-hops

owners

Type: uinteger

Owners

v4src

Type: ipaddr

IPv4 Multicast traffic source

v4grp

Type: ipaddr

IPv4 Multicast Group address

v6src

Type: ipv6addr

IPv6 Multicast traffic source

v6grp

Type: ipv6addr

IPv6 Multicast Group address

macsrc

Type: string

MAC Multicast traffic source

macgrp

Type: string

MAC Multicast Group address

ftag

Type: uinteger

min: 1  max: 1024

ftag id

omf

Type: bool

Is OMF route

flood

Type: bool

Is flood to vlan route

TABLE_nh

nh_if

Type: interface

The next hop interface

nh_sw

Type: uinteger

min: 1  max: 4096

The next hop switch id

owner

Type: uinteger

Owner

flags

Type: uinteger

flags

nh-uptime

Type: duration

Time nexthop was created

rt_type

Type: uinteger

Route type

stale

Type: bool

Is stale

exclude

Type: bool

exclude from post routing replication

svi

Type: bool

SVI interface

done

Type: uinteger

Done displaying route data

start

Type: bool

Print header

Command Modes

- /exec

show mroute flood vlan

show { l2 | fabricpath } mroute flood vlan vlan_id [ __readonly__ vdc_id if_count TABLE_if if_member ]

Syntax Description

show

Show running system information

l2

Layer2 information

fabricpath

fabricpath information

mroute

Show multicast route database

flood

Display vlan flood route

vlan

Vlan

vlan_id

Type: integer

min: 1  max: 4094

Enter Vlan id

__readonly__

vdc_id

Type: integer

VDC Id

if_count

Type: integer

Number of Interfaces

TABLE_if

if_member

Type: interface

Interface

Command Modes

- /exec

show mroute summary

show { l2 | fabricpath } mroute summary [detail] [ __readonly__ total star_g s_g s_g_no_star_g flood omf TABLE_vlan vlan_id vlan_flood vlan_omf vlan_star_g vlan_s_g vlan_s_g_no_star vlan_total ]

Syntax Description

show

Show running system information

l2

Layer2 information

fabricpath

fabricpath information

mroute

Show multicast route database

summary

Show multicast route database summary

detail

Show per vlan detail

__readonly__

Read Only

total

Type: uinteger

Total number of multicast routes

star_g

Type: uinteger

Total number of multicast (*, g) routes

s_g

Type: uinteger

Total number of multicast (s, g) routes

s_g_no_star_g

Type: uinteger

Number of multicast (s, g) route with no corresponding (*, g)

flood

Type: uinteger

Total number of flood-to-vlan routes

omf

Type: uinteger

Total number of omf routes

TABLE_vlan

vlan_id

Type: uinteger

VLAN ID for summary info

vlan_flood

Type: uinteger

flood routes per vlan

vlan_omf

Type: uinteger

OMF routes per vlan

vlan_star_g

Type: uinteger

(*,G) routes per vlan

vlan_s_g

Type: uinteger

(S,G) routes per VLAN

vlan_s_g_no_star

Type: uinteger

(S,G) routes w/o (*,G) per VLAN

vlan_total

Type: uinteger

Total multicast routes in VLAN

Command Modes

- /exec

show multicast ftag

show { l2 | fabricpath } multicast ftag [ftag-id] [ __readonly__ TABLE_topo id topo_config TABLE_ftag ftag topo_id config ]

Syntax Description

show

Show running system information

l2

Layer2 information

fabricpath

fabricpath information

multicast

Multicast information

ftag

ftag number

ftag-id

Type: uinteger

min: 1  max: 1024

ftag id

__readonly__

Read Only

TABLE_topo

id

Type: string

topo id

topo_config

Type: uinteger

program ftag star route

TABLE_ftag

ftag

Type: uinteger

min: 1  max: 1024

ftag

topo_id

Type: string

topo id

config

Type: uinteger

ftag config

Command Modes

- /exec

show multicast trees

show { l2 | fabricpath } multicast trees [ topo topo-id ] [ ftag ftag-id ] [hex] [ __readonly__ [hex2] { TABLE_swid ftag topo_id sw_id rt-uptime owners num_nh TABLE_nh [preferred] { nh_if | nh_sw } [stale] distance nh-uptime owner flags rt_type | start | done } ]

Syntax Description

show

Show running system information

l2

Layer2 information

fabricpath

fabricpath information

multicast

Multicast information

trees

Show the broadcast/multicast tree database

topo

Show topo instance

ftag

Show ftag number

hex

Display switch-ids in hex

topo-id

Type: uinteger

min: 0  max: 64

topo id

ftag-id

Type: uinteger

min: 1  max: 1024

ftag id

__readonly__

Read Only

hex2

Type: bool

TABLE_swid

sw_id

Type: uinteger

min: 1  max: 4096

switch id

topo_id

Type: uinteger

min: 0  max: 64

topo id

ftag

Type: uinteger

min: 1  max: 1024

ftag id

rt-uptime

Type: duration

Time route was created

num_nh

Type: uinteger

Number of next-hops

owners

Type: uinteger

Owners

TABLE_nh

preferred

Type: bool

Is preferred interface

nh_if

Type: interface

The next hop interface

nh_sw

Type: uinteger

min: 1  max: 4096

The next hop switch id

owner

Type: uinteger

Owner

flags

Type: uinteger

flags

rt_type

Type: uinteger

Route type

nh-uptime

Type: duration

Time nexthop was created

distance

Type: uinteger

admin distance

stale

Type: bool

Is stale

start

Type: bool

done

Type: uinteger

Command Modes

- /exec

show mvpn bgp

show mvpn bgp { mdt-safi | auto-discovery } [ mdt-source src-addr ] [ __readonly__ TABLE_entry bgp_rd mdt_src mdt_grp local ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information Not available in this release.

bgp

Display BGP related information

mdt-safi

Display Auto-discovered BGP MDT-SAFI database

auto-discovery

Display Auto-discovered BGP MDT-SAFI database

mdt-source

Source address of MVPN neighbor

src-addr

Type: ipaddr

Source Address

__readonly__

TABLE_entry

bgp_rd

Type: string

mdt_src

Type: ipaddr

mdt_grp

Type: ipaddr

local

Type: string

Command Modes

- /exec

show mvpn mdt encap

show mvpn mdt encap [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf out_context TABLE_encap encap_index mdt_grp mdt_src mdt_src_if ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information Not available in this release.

mdt

Display MDT information

encap

Display MDT Encap table

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

out_context

Type: string

TABLE_encap

encap_index

Type: uinteger

mdt_grp

Type: ipaddr

mdt_src

Type: ipaddr

mdt_src_if

Type: interface

Command Modes

- /exec

show mvpn mdt route

show mvpn mdt route [detail] [ __readonly__ TABLE_vrf out_context TABLE_mroute src_addr grp_addr ref_count ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information Not available in this release.

mdt

Display MDT information

route

Display MDT route information

detail

Display detailed information

__readonly__

TABLE_vrf

out_context

Type: string

TABLE_mroute

src_addr

Type: ipaddr

grp_addr

Type: ipaddr

ref_count

Type: uinteger

Command Modes

- /exec

show mvpn snmp mib genericTable

show mvpn snmp mib genericTable [mplsVpnVrfName-in] [ __readonly__ TABLE_ciscoMvpnGenericTable mplsVpnVrfName-out ciscoMvpnGenOperStatusChange ciscoMvpnGenOperChangeTime ciscoMvpnGenAssociatedInterfaces ciscoMvpnGenRowStatus ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

genericTable

Show MVPN Generic Table

mplsVpnVrfName-in

Type: vrf

mplsVpnVrfName

__readonly__

TABLE_ciscoMvpnGenericTable

mplsVpnVrfName-out

Type: string

mib table index mplsVpnVrfName

ciscoMvpnGenOperStatusChange

Type: integer

mib object ciscoMvpnGenOperStatusChange

ciscoMvpnGenOperChangeTime

Type: duration

mib object ciscoMvpnGenOperChangeTime

ciscoMvpnGenAssociatedInterfaces

Type: uinteger

mib object ciscoMvpnGenAssociatedInterfaces

ciscoMvpnGenRowStatus

Type: integer

mib object ciscoMvpnGenRowStatus

Command Modes

- /exec

show mvpn snmp mib mvpnBgpMdtUpdateTable

show mvpn snmp mib mvpnBgpMdtUpdateTable [ ciscoMvpnBgpMdtUpdGrpAddrType-in ciscoMvpnBgpMdtUpdateGroup-in ciscoMvpnBgpMdtUpdSrcAddrType-in ciscoMvpnBgpMdtUpdateSource-in ] [ __readonly__ TABLE_ciscoMvpnBgpMdtUpdateTable ciscoMvpnBgpMdtUpdGrpAddrType-out ciscoMvpnBgpMdtUpdateGroup-out ciscoMvpnBgpMdtUpdateRd ciscoMvpnBgpMdtUpdSrcAddrType-out ciscoMvpnBgpMdtUpdateSource-out ciscoMvpnBgpMdtUpdOrigAddrType ciscoMvpnBgpMdtUpdateOriginator ciscoMvpnBgpMdtUpdNhAddrType ciscoMvpnBgpMdtUpdateNexthop ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnBgpMdtUpdateTable

show mib table mvpnBgpMdtUpdateTable

ciscoMvpnBgpMdtUpdGrpAddrType-in

Type: integer

Data MDT Group Address Type

ciscoMvpnBgpMdtUpdateGroup-in

Type: ipaddr

Data MDT group address in the MDT join TLV

ciscoMvpnBgpMdtUpdSrcAddrType-in

Type: integer

MDT mulitcast routing enty source address type

ciscoMvpnBgpMdtUpdateSource-in

Type: ipaddr

Souce addres for the MDT mulitcast routing enty created following the recepit of MDT join TLV

__readonly__

TABLE_ciscoMvpnBgpMdtUpdateTable

ciscoMvpnBgpMdtUpdGrpAddrType-out

Type: integer

mib table index ciscoMvpnBgpMdtUpdGrpAddrType

ciscoMvpnBgpMdtUpdateGroup-out

Type: ipaddr

mib table index ciscoMvpnBgpMdtUpdateGroup

ciscoMvpnBgpMdtUpdateRd

Type: string

mib object ciscoMvpnBgpMdtUpdateRd

ciscoMvpnBgpMdtUpdSrcAddrType-out

Type: integer

mib table index ciscoMvpnBgpMdtUpdSrcAddrType

ciscoMvpnBgpMdtUpdateSource-out

Type: ipaddr

mib table index ciscoMvpnBgpMdtUpdateSource

ciscoMvpnBgpMdtUpdOrigAddrType

Type: integer

mib object ciscoMvpnBgpMdtUpdOrigAddrType

ciscoMvpnBgpMdtUpdateOriginator

Type: ipaddr

mib object ciscoMvpnBgpMdtUpdateOriginator

ciscoMvpnBgpMdtUpdNhAddrType

Type: integer

mib object ciscoMvpnBgpMdtUpdNhAddrType

ciscoMvpnBgpMdtUpdateNexthop

Type: ipaddr

mib object ciscoMvpnBgpMdtUpdateNexthop

Command Modes

- /exec

show mvpn snmp mib mvpnMdtDataTable

show mvpn snmp mib mvpnMdtDataTable [mplsVpnVrfName-in] [ __readonly__ TABLE_ciscoMvpnMdtDataTable mplsVpnVrfName-out ciscoMvpnMdtDataRangeAddrType ciscoMvpnMdtDataRangeAddress ciscoMvpnMdtDataWildcardType ciscoMvpnMdtDataWildcardBits ciscoMvpnMdtDataThreshold ciscoMvpnMdtDataRowStatus ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnMdtDataTable

show mib table mvpnMdtDataTable

mplsVpnVrfName-in

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

__readonly__

TABLE_ciscoMvpnMdtDataTable

mplsVpnVrfName-out

Type: string

mib table index mplsVpnVrfName

ciscoMvpnMdtDataRangeAddrType

Type: integer

mib object ciscoMvpnMdtDefaultAddrType

ciscoMvpnMdtDataRangeAddress

Type: ipaddr

mib object ciscoMvpnMdtDataRangeAddress

ciscoMvpnMdtDataWildcardType

Type: integer

mib object ciscoMvpnMdtDataWildcardType

ciscoMvpnMdtDataWildcardBits

Type: ipaddr

mib object ciscoMvpnMdtDataWildcardBits

ciscoMvpnMdtDataThreshold

Type: integer

mib object ciscoMvpnMdtDataThreshold

ciscoMvpnMdtDataRowStatus

Type: integer

mib object ciscoMvpnMdtDataRowStatus

Command Modes

- /exec

show mvpn snmp mib mvpnMdtDefaultTable

show mvpn snmp mib mvpnMdtDefaultTable [mplsVpnVrfName-in] [ __readonly__ TABLE_ciscoMvpnMdtDefaultTable mplsVpnVrfName-out ciscoMvpnMdtDefaultAddrType ciscoMvpnMdtDefaultAddress ciscoMvpnMdtEncapsType ciscoMvpnMdtDefaultRowStatus ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnMdtDefaultTable

show mib table ciscoMvpnMdtDefaultTable

mplsVpnVrfName-in

Type: vrf

mplsVpnVrfName

__readonly__

TABLE_ciscoMvpnMdtDefaultTable

mplsVpnVrfName-out

Type: string

mib table index mplsVpnVrfName

ciscoMvpnMdtDefaultAddrType

Type: integer

mib object ciscoMvpnMdtDefaultAddrType

ciscoMvpnMdtDefaultAddress

Type: ipaddr

mib object ciscoMvpnMdtDefaultAddress

ciscoMvpnMdtEncapsType

Type: integer

mib object ciscoMvpnMdtEncapsType

ciscoMvpnMdtDefaultRowStatus

Type: integer

mib object ciscoMvpnMdtDefaultRowStatus

Command Modes

- /exec

show mvpn snmp mib mvpnMdtJnRcvTable

show mvpn snmp mib mvpnMdtJnRcvTable [ mplsVpnVrfName-in ciscoMvpnMdtJnRcvGrpAddrType-in ciscoMvpnMdtJnRcvGroup-in ciscoMvpnMdtJnRcvSrcAddrType-in ciscoMvpnMdtJnRcvSource-in ] [ __readonly__ TABLE_ciscoMvpnMdtJnRcvTable mplsVpnVrfName-out ciscoMvpnMdtJnRcvGrpAddrType-out ciscoMvpnMdtJnRcvGroup-out ciscoMvpnMdtJnRcvSrcAddrType-out ciscoMvpnMdtJnRcvSource-out ciscoMvpnMdtJnRcvUpTime ciscoMvpnMdtJnRcvExpTime ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnMdtJnRcvTable

show mib table ciscoMvpnMdtJnRcvTable

mplsVpnVrfName-in

Type: string

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

ciscoMvpnMdtJnRcvGrpAddrType-in

Type: integer

Data MDT group address type

ciscoMvpnMdtJnRcvGroup-in

Type: ipaddr

Data MDT group address in the MDT join TLV

ciscoMvpnMdtJnRcvSrcAddrType-in

Type: integer

Source address type

ciscoMvpnMdtJnRcvSource-in

Type: ipaddr

Souce addres for the MDT mulitcast routing enty created following the recepit of MDT join TLV

__readonly__

TABLE_ciscoMvpnMdtJnRcvTable

mplsVpnVrfName-out

Type: string

mib table index mplsVpnVrfName

ciscoMvpnMdtJnRcvGrpAddrType-out

Type: integer

mib table index ciscoMvpnMdtJnRcvGrpAddrType

ciscoMvpnMdtJnRcvGroup-out

Type: ipaddr

mib table index ciscoMvpnMdtJnRcvGroup

ciscoMvpnMdtJnRcvSrcAddrType-out

Type: integer

mib table index ciscoMvpnMdtJnRcvSrcAddrType

ciscoMvpnMdtJnRcvSource-out

Type: ipaddr

mib table index ciscoMvpnMdtJnRcvSource

ciscoMvpnMdtJnRcvUpTime

Type: duration

mib object ciscoMvpnMdtJnRcvUpTime

ciscoMvpnMdtJnRcvExpTime

Type: duration

mib object ciscoMvpnMdtJnRcvExpTime

Command Modes

- /exec

show mvpn snmp mib mvpnMdtJnSendTable

show mvpn snmp mib mvpnMdtJnSendTable [ mplsVpnVrfName-in ciscoMvpnMdtJnSendGrpAddrType-in ciscoMvpnMdtJnSendGroup-in ciscoMvpnMdtJnSendSrcAddrType-in ciscoMvpnMdtJnSendSource-in ] [ __readonly__ TABLE_ciscoMvpnMdtJnSendTable mplsVpnVrfName-out ciscoMvpnMdtJnSendGrpAddrType-out ciscoMvpnMdtJnSendGroup-out ciscoMvpnMdtJnSendSrcAddrType-out ciscoMvpnMdtJnSendSource-out ciscoMvpnMdtJnSendMdtGroup ciscoMvpnMdtJnSendMdtRefCt ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnMdtJnSendTable

show mib table ciscoMvpnMdtJnSendTable

mplsVpnVrfName-in

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

ciscoMvpnMdtJnSendGrpAddrType-in

Type: integer

Data MDT group address type

ciscoMvpnMdtJnSendGroup-in

Type: ipaddr

Data MDT group address in the MDT join TLV

ciscoMvpnMdtJnSendSrcAddrType-in

Type: integer

Source address type

ciscoMvpnMdtJnSendSource-in

Type: ipaddr

Souce addres for the MDT mulitcast routing enty created following the recepit of MDT join TLV

__readonly__

TABLE_ciscoMvpnMdtJnSendTable

mplsVpnVrfName-out

Type: string

mib table index mplsVpnVrfName

ciscoMvpnMdtJnSendGrpAddrType-out

Type: integer

mib table index ciscoMvpnMdtJnSendGrpAddrType

ciscoMvpnMdtJnSendGroup-out

Type: ipaddr

mib table index ciscoMvpnMdtJnSendGroup

ciscoMvpnMdtJnSendSrcAddrType-out

Type: integer

mib table index ciscoMvpnMdtJnSendSrcAddrType

ciscoMvpnMdtJnSendSource-out

Type: ipaddr

mib table index ciscoMvpnMdtJnSendSource

ciscoMvpnMdtJnSendMdtGroup

Type: ipaddr

mib object ciscoMvpnMdtJnSendMdtGroup

ciscoMvpnMdtJnSendMdtRefCt

Type: uinteger

mib object ciscoMvpnMdtJnSendMdtRefCt

Command Modes

- /exec

show mvpn snmp mib mvpnMrouteMdtTable

show mvpn snmp mib mvpnMrouteMdtTable [ mplsVpnVrfName-in ciscoMvpnMrouteMvrfGrpAddrType-in ciscoMvpnMrouteMvrfGroup-in ciscoMvpnMrouteMvrfSrcAddrType-in ciscoMvpnMrouteMvrfSource-in ciscoMvpnMrouteUpDownStreamInfo-in ] [ __readonly__ TABLE_ciscoMvpnMrouteMdtTable mplsVpnVrfName-out ciscoMvpnMrouteMvrfGrpAddrType-out ciscoMvpnMrouteMvrfGroup-out ciscoMvpnMrouteMvrfSrcAddrType-out ciscoMvpnMrouteMvrfSource-out ciscoMvpnMrouteUpDownStreamInfo-out ciscoMvpnMrouteMdtGrpAddrType ciscoMvpnMrouteMdtGroup ciscoMvpnMrouteMdtType ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnMrouteMdtTable

show mib table mvpnMrouteMdtTable

mplsVpnVrfName-in

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

ciscoMvpnMrouteMvrfGrpAddrType-in

Type: integer

Group address type of multicast routing entry

ciscoMvpnMrouteMvrfGroup-in

Type: ipaddr

Group address of multicast routing entry

ciscoMvpnMrouteMvrfSrcAddrType-in

Type: integer

Source address type

ciscoMvpnMrouteMvrfSource-in

Type: ipaddr

Source address of multicast routing entry

ciscoMvpnMrouteUpDownStreamInfo-in

Type: integer

if PE is Upstream or downstream router for the multcast routing entry

__readonly__

TABLE_ciscoMvpnMrouteMdtTable

mplsVpnVrfName-out

Type: string

mib table index mplsVpnVrfName

ciscoMvpnMrouteMvrfGrpAddrType-out

Type: integer

mib table index ciscoMvpnMrouteMvrfGrpAddrType

ciscoMvpnMrouteMvrfGroup-out

Type: ipaddr

mib table index ciscoMvpnMrouteMvrfGroup

ciscoMvpnMrouteMvrfSrcAddrType-out

Type: integer

mib table index ciscoMvpnMrouteMvrfSrcAddrType

ciscoMvpnMrouteMvrfSource-out

Type: ipaddr

mib table index ciscoMvpnMrouteMvrfSource

ciscoMvpnMrouteUpDownStreamInfo-out

Type: integer

mib table index ciscoMvpnMrouteUpDownStreamInfo

ciscoMvpnMrouteMdtGrpAddrType

Type: integer

mib object ciscoMvpnMrouteMdtGrpAddrType

ciscoMvpnMrouteMdtGroup

Type: ipaddr

mib object ciscoMvpnMrouteMdtGroup

ciscoMvpnMrouteMdtType

Type: integer

mib object ciscoMvpnMrouteMdtType

Command Modes

- /exec

show mvpn snmp mib mvpnMvrfNumber

show mvpn snmp mib mvpnMvrfNumber [ __readonly__ ciscoMvpnMvrfNumber ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables/scalars

mvpnMvrfNumber

Show number of MVRFs

__readonly__

Read Only

ciscoMvpnMvrfNumber

Type: integer

mib object ciscoMvpnMvrfNumber

Command Modes

- /exec

show mvpn snmp mib mvpnNotificationEnable

show mvpn snmp mib mvpnNotificationEnable [ __readonly__ ciscoMvpnNotificationEnable ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables/scalars

mvpnNotificationEnable

Show value of ciscoMvpnNotificationEnable

__readonly__

Read Only

ciscoMvpnNotificationEnable

Type: integer

mib object ciscoMvpnNotificationEnable

Command Modes

- /exec

show mvpn snmp mib mvpnTunnelTable

show mvpn snmp mib mvpnTunnelTable [ifIndex-in] [ __readonly__ TABLE_ciscoMvpnTunnelTable ifIndex-out ciscoMvpnTunnelName ciscoMvpnTunnelMvrf ]

Syntax Description

show

Show running system information

mvpn

Display Multicast VPN information

snmp

show snmp

mib

show mib tables

mvpnTunnelTable

show mib table mvpnTunnelTable

ifIndex-in

Type: integer

Interface Index

__readonly__

TABLE_ciscoMvpnTunnelTable

ifIndex-out

Type: integer

mib table index ifIndex

ciscoMvpnTunnelName

Type: string

mib object ciscoMvpnTunnelName

ciscoMvpnTunnelMvrf

Type: string

mib object ciscoMvpnTunnelMvrf

Command Modes

- /exec

Chapter 14. N Show Commands

- show ntp access-groups

- show ntp authentication-keys

- show ntp authentication-status

- show ntp logging-status

- show ntp peer-status

- show ntp peers

- show ntp rts-update

- show ntp session status

- show ntp source-interface

- show ntp source

- show ntp statistics

- show ntp status

- show ntp trusted-keys

- show nve interface

- show nve peers

- show nve vni

- show nve vxlan-params

- show nxapi

show ntp access-groups

show ntp access-groups [ __readonly__ [ TABLE_accessgroups accesslist [type] ] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

access-groups

Display NTP access groups

__readonly__

TABLE_accessgroups

accessgroups

accesslist

Type: string

accesslist

type

Type: string

type

Command Modes

- /exec

show ntp authentication-keys

show ntp authentication-keys [ __readonly__ [ TABLE_authkeys Authkey [MD5String] ] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

authentication-keys

Display authentication keys

__readonly__

TABLE_authkeys

authentication keys

Authkey

Type: string

authentication key

MD5String

Type: string

password

Command Modes

- /exec

show ntp authentication-status

show ntp authentication-status [ __readonly__ [authentication] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

authentication-status

NTP Authentication Status

__readonly__

authentication

Type: string

authentication enabled/disabled

Command Modes

- /exec

show ntp logging-status

show ntp logging-status [ __readonly__ [loggingstatus] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

logging-status

Display NTP logging status

__readonly__

loggingstatus

Type: string

logging enabled/disabled

Command Modes

- /exec

show ntp peer-status

show ntp peer-status [ __readonly__ [totalpeers] [ TABLE_peersstatus syncmode remote local st poll reach delay [vrf] ] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

peer-status

Show the status for all the server/peers

__readonly__

totalpeers

Type: string

totalpeers

TABLE_peersstatus

peersstatus

syncmode

Type: string

peermode

remote

Type: string

remote addr

local

Type: string

local addr

st

Type: string

stratum

poll

Type: string

ntp poll

reach

Type: string

reach

delay

Type: string

delay

vrf

Type: string

vrf name

Command Modes

- /exec

show ntp peers

show ntp peers [ __readonly__ [ TABLE_peers PeerIPAddress serv_peer conf_flag ] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

peers

Show all the peers.

__readonly__

TABLE_peers

peers

PeerIPAddress

Type: string

peer Ip addr

serv_peer

Type: string

server or peer

conf_flag

Type: string

configured or dynamic

Command Modes

- /exec

show ntp rts-update

show ntp rts-update [ __readonly__ [rtsupdate] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

rts-update

Show if the RTS update is enabled

__readonly__

rtsupdate

Type: string

rts update enabled/disabled

Command Modes

- /exec

show ntp session status

show ntp session status [ __readonly__ [session_status] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

session

Show the session information

status

Show the session status

__readonly__

session_status

Type: string

last session status

Command Modes

- /exec

show ntp source-interface

show ntp source-interface [ __readonly__ [sourceinterface] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

source-interface

Source interface configured

__readonly__

sourceinterface

Type: string

source interface

Command Modes

- /exec

show ntp source

show ntp source [ __readonly__ [sourceip] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

source

Source IP address configured

__readonly__

sourceip

Type: string

source ip addr

Command Modes

- /exec

show ntp statistics

show ntp statistics { [io] | [local] | [memory] | peer { ipaddr { ipv4_0 | ipv6_1 } | name s0 } } [ __readonly__ [ iotimesincereset ioreceivebuffers iofreereceivebuffers iousedreceivebuffers iolowwaterrefills iodroppedpackets ioignoredpackets ioreceivedpackets iopacketssent iopacketsnotsent iointerruptshandled ioreceivedbyint ] [ localsystemuptime localtimesincereset localoldversionpackets localnewversionpackets localunknownversionnumber localbadpacketformat localpacketsprocessed localbadauthentication [localpacketsrejected] ] [ memtimesincereset memtotalpeermemory memfreepeermemory memcallstofindpeer memnewpeerallocations mempeerdemobilizations memhashtablecounts ] [ peeripremotehost peeriplocalinterface peeriptimelastreceived peeriptimeuntilnextsend peeripreachabilitychange peerippacketssent peerippacketsreceived peeripbadauthentication peeripbogusorigin peeripduplicate peeripbaddispersion peeripbadreferencetime peeripcandidateorder ] [ peernameremotehost peernamelocalinterface peernametimelastreceived peernametimeuntilnextsend peernamereachabilitychange peernamepacketssent peernamepacketsreceived peernamebadauthentication peernamebogusorigin peernameduplicate peernameduplicate peernamebaddispersion peernamebadreferencetime peernamecandidateorder ] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

statistics

Show the NTP statistics

io

Show the input-output statistics.

local

Show the counters maintained by the local NTP.

memory

Show the statistics counters related to memory code.

peer

Show the per-peer statistics counter of a peer.

ipaddr

Peer's IP address

ipv4_0

Type: ipaddr

ipv6_1

Type: ipv6addr

name

Peer's Name

s0

Type: string

__readonly__

iotimesincereset

Type: string

time since reset

ioreceivebuffers

Type: string

receive buffers

iofreereceivebuffers

Type: string

free receive buffers

iousedreceivebuffers

Type: string

used receive buffers

iolowwaterrefills

Type: string

low water refills

iodroppedpackets

Type: string

dropped packets

ioignoredpackets

Type: string

ignored packets

ioreceivedpackets

Type: string

received packets

iopacketssent

Type: string

packets sent

iopacketsnotsent

Type: string

packets not sent

iointerruptshandled

Type: string

interrupts handled

ioreceivedbyint

Type: string

received by int

localsystemuptime

Type: string

system up time

localtimesincereset

Type: string

time since reset

localoldversionpackets

Type: string

old version packets

localnewversionpackets

Type: string

new version packets

localunknownversionnumber

Type: string

unknown version number

localbadpacketformat

Type: string

bad packet format

localpacketsprocessed

Type: string

packets processed

localbadauthentication

Type: string

bad authentication

localpacketsrejected

Type: string

packets rejected

memtimesincereset

Type: string

time since reset

memtotalpeermemory

Type: string

total peer memory

memfreepeermemory

Type: string

free peer memory

memcallstofindpeer

Type: string

calls to find peer

memnewpeerallocations

Type: string

new peer allocations

mempeerdemobilizations

Type: string

peer demobilizations

memhashtablecounts

Type: string

hash table counts

peeripremotehost

Type: string

peeripremotehost

peeriplocalinterface

Type: string

peeriplocalinterface

peeriptimelastreceived

Type: string

peeriptimelastreceived

peeriptimeuntilnextsend

Type: string

peeriptimeuntilnextsend

peeripreachabilitychange

Type: string

peeripreachabilitychange

peerippacketssent

Type: string

peerippacketssent

peerippacketsreceived

Type: string

peerippacketsreceived

peeripbadauthentication

Type: string

peeripbadauthentication

peeripbogusorigin

Type: string

peeripbogusorigin

peeripduplicate

Type: string

peeripduplicate

peeripbaddispersion

Type: string

peeripbaddispersion

peeripbadreferencetime

Type: string

peeripbadreferencetime

peeripcandidateorder

Type: string

peeripcandidateorder

peernameremotehost

Type: string

peernameremotehost

peernamelocalinterface

Type: string

peernamelocalinterface

peernametimelastreceived

Type: string

peernametimelastreceived

peernametimeuntilnextsend

Type: string

peernametimeuntilnextsend

peernamereachabilitychange

Type: string

peernamereachabilitychange

peernamepacketssent

Type: string

peernamepacketssent

peernamepacketsreceived

Type: string

peernamepacketsreceived

peernamebadauthentication

Type: string

peernamebadauthentication

peernamebogusorigin

Type: string

peernamebogusorigin

peernameduplicate

Type: string

peernameduplicate

peernamebaddispersion

Type: string

peernamebaddispersion

peernamebadreferencetime

Type: string

peernamebadreferencetime

peernamecandidateorder

Type: string

peernamecandidateorder

Command Modes

- /exec

show ntp status

show ntp status [ __readonly__ [distribution] [operational_state] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

status

Show the NTP distribution status

__readonly__

distribution

Type: string

distribution enabled/disabled

operational_state

Type: string

last operation status

Command Modes

- /exec

show ntp trusted-keys

show ntp trusted-keys [ __readonly__ [ TABLE_trustkeys key ] ]

Syntax Description

show

Show running system information

ntp

Show NTP information

trusted-keys

Display trusted keys

__readonly__

TABLE_trustkeys

trusted keys

key

Type: string

trusted key

Command Modes

- /exec

show nve interface

show nve interface [ nve-if [detail] ] [ __readonly__ TABLE_nve_if if-name if-state encap-type source-if primary-ip secondary-ip [ TABLE_nveif_vni vni mcast vni-state ] ]

Syntax Description

show

Display NVE information

nve

Configure NVE information

interface

Interface

nve-if

Type: interface

NVE interface

detail

Detailed information

__readonly__

TABLE_nve_if

TABLE_nveif_vni

if-name

Type: interface

if-state

Type: string

encap-type

Type: string

source-if

Type: interface

primary-ip

Type: ipaddr

secondary-ip

Type: ipaddr

vni

Type: uinteger

mcast

Type: ipaddr

vni-state

Type: string

Command Modes

- /exec

show nve peers

show nve peers [ [ interface nve-if ] [detail] ] [ __readonly__ TABLE_nve_peers if-name peer-ip peer-state ]

Syntax Description

show

Display NVE information

nve

Configure NVE information

peers

Show peers

interface

Interface

nve-if

Type: interface

NVE interface

detail

Detailed information

__readonly__

TABLE_nve_peers

if-name

Type: interface

peer-ip

Type: ipaddr

peer-state

Type: string

Command Modes

- /exec

show nve vni

show nve vni [ [ vni-id [detail] ] | interface nve-if [detail] ] [ __readonly__ TABLE_nve_vni if-name vni mcast vni-state ]

Syntax Description

show

Display NVE information

nve

Configure NVE information

vni

Virtual Network Identifier

vni-id

Type: integer

Virtual Network Identifier

interface

Interface

nve-if

Type: interface

NVE interface

detail

Detailed information

__readonly__

TABLE_nve_vni

if-name

Type: interface

vni

Type: uinteger

mcast

Type: ipaddr

vni-state

Type: string

Command Modes

- /exec

show nve vxlan-params

show nve vxlan-params

Syntax Description

show

Display NVE information

nve

Configure NVE information

vxlan-params

VxLAN Parameters

Command Modes

- /exec

show nxapi

show nxapi [ __readonly__ operation_status o_status [ configuration_error c_error ] TABLE_listen_on_port l_port ]

Syntax Description

show

Show running system information

nxapi

Show nxapi status

__readonly__

operation_status

run-time information about nxapi

o_status

Type: string

enabled or not

configuration_error

config syntax error

c_error

Type: string

confg syntax error

TABLE_listen_on_port

listen on port table

l_port

Type: string

listen on port

Command Modes

- /exec

Chapter 15. O Show Commands

- show object-group

- show onep

- show onep cli-extensions applications

- show onep error

- show onep history

- show onep statistics

- show onep status

- show onep trace

- show ospfv3

- show ospfv3 border-routers

- show ospfv3 database

- show ospfv3 database database-summary

- show ospfv3 database detail

- show ospfv3 ha

- show ospfv3 interface

- show ospfv3 interface brief

- show ospfv3 lsa-content-changed-list

- show ospfv3 memory

- show ospfv3 neighbors

- show ospfv3 neighbors detail

- show ospfv3 neighbors summary

- show ospfv3 policy statistics

- show ospfv3 request-list

- show ospfv3 retransmission-list

- show ospfv3 route

- show ospfv3 route summary

- show ospfv3 statistics

- show ospfv3 summary-address

- show ospfv3 traffic

- show ospfv3 virtual-links

- show ospfv3 virtual-links brief

- show otv mroute

- show otv route

show object-group

show object-group [name] [ __readonly__ TABLE_ogroup group_type group_name [ TABLE_seqno seqno { _port_op port0_num | _port_range port1_num port2_num | hostaddr | net_ip | mask_ip_addr mask_ip_mask | hostipv6 | net_ipv6 | mask_ipv6_addr mask_ipv6_mask } ] ]

Syntax Description

show

Show running system information

object-group

Show configured ACL object groups

name

Type: string

length: 64

object-group name

__readonly__

group_type

Type: integer

Object group type

group_name

Type: string

Object group name

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

TABLE_ogroup

_port_range

Port range

range  value: 8

Match only packets in the range of port numbers

port0_num

Type: integer

min: 0  max: 65535

Port number

port1_num

Type: integer

min: 0  max: 65535

Port number

port2_num

Type: integer

min: 0  max: 65535

Port number

net_ip

Type: ipprefix

A.B.C.D Network address of object-group member

hostaddr

Type: ipaddr

A.B.C.D Host address

mask_ip_addr

Type: ipaddr

A.B.C.D IP address

mask_ip_mask

Type: ipaddr

A.B.C.D IP address mask

net_ipv6

Type: ipv6prefix

IPv6 Network address of object-group member

hostipv6

Type: ipv6addr

IPv6 Host address

mask_ipv6_addr

Type: ipv6addr

A.B.C.D IP address

mask_ipv6_mask

Type: ipv6addr

A.B.C.D IP address mask

Command Modes

- /exec

show onep

show onep session { all | onep-session-id | rate-limit } [ __readonly__ [ TABLE_sessions ID Username State ReconnectTimer ConnectTime Appname Error ] [ TABLE_buckets Addr Hash Rate Last Current Limit ExtendedLimit MarkCounter Reject Accept ] ]

Syntax Description

show

Show running system information

onep

One Platform

session

One Platform session

all

All sessions

onep-session-id

Type: string

Specific session name

rate-limit

rate limiting feature info

__readonly__

TABLE_sessions

all current sessions of onep

ID

Type: string

the session handler

Username

Type: string

the username

State

Type: string

the state

ReconnectTimer

Type: integer

the reconnect timer

ConnectTime

Type: string

the connect time

Appname

Type: string

the application name

Error

Type: string

possible error message

TABLE_buckets

all rate limit buckets

Addr

Type: string

the remote address

Hash

Type: integer

the hash of the remote address

Rate

Type: integer

the token fill rate

Last

Type: string

the last rate check time

Current

Type: integer

current tokens that are accepted to consume

Limit

Type: integer

the standard limit on tokens

ExtendedLimit

Type: integer

the burst limit on tokens

MarkCounter

Type: integer

the burst tokens to consume

Reject

Type: integer

stats: rejected TCP connections

Accept

Type: integer

stats: accepted TCP connections

show onep cli-extensions applications

show onep cli-extensions applications [ __readonly__ num_applications [ TABLE_applications app_name app_version config_domain ver_specific ] ]

Syntax Description

show

Show running system information

onep

One Platform

cli-extensions

CLI Extensions feature

applications

Onep applications using the CLI Extensions feature

__readonly__

num_applications

Type: uinteger

Number of onep applications

TABLE_applications

Table of onep applications

app_name

Type: string

Onep application name

app_version

Type: string

Onep application version

config_domain

Type: string

Onep config domain

ver_specific

Type: string

Onep application version specific

Command Modes

- /exec

show onep error

show onep error [ __readonly__ [ TABLE_onep_errors Content ] ]

Syntax Description

show

Show running system information

onep

One Platform

error

Error

__readonly__

TABLE_onep_errors

Errors messages

Content

Type: string

error content

Command Modes

- /exec

show onep history

show onep history { archived | all | session { all | onep-session-id } } [ __readonly__ [ TABLE_history Record ] ]

Syntax Description

show

Show running system information

onep

One Platform

history

One Platform history trails

archived

One Platform archived session

session

One Platform session

onep-session-id

Type: string

Specific session name

all

All sessions

__readonly__

TABLE_history

a set of history records

Record

Type: string

an individual history record

show onep statistics

show onep statistics [ session { all | onep-session-id } ] [ __readonly__ [ TABLE_stats_global SessionTotal ActiveSessions LocalDisconnect RemoteDisconnect ErrorDisconnect TotalDisconnects TotalErrors AuthenticateErr DupAppNameErr MemErr SystemErr TotalConnects RejectedConnects AcceptedConnects UnaffectedConnects FailedConnectionIndex SequenceNumber FailureReason ErrorCode FailureTime RemoteHost ] [ TABLE_stats_sessions ID Appname APIIn APIOut BytesIn BytesOut VtyCount Error ] ]

Syntax Description

show

Show running system information

onep

One Platform

statistics

statistics

session

One Platform session

all

All sessions

onep-session-id

Type: string

Specific session name

__readonly__

TABLE_stats_global

global session statistics for onep

SessionTotal

Type: integer

total onep sessions

ActiveSessions

Type: integer

currently active onep sessions

LocalDisconnect

Type: integer

onep sessions locally disconnected

RemoteDisconnect

Type: integer

onep sessions remotely disconnected

ErrorDisconnect

Type: integer

onep sessions errored disconnected

TotalDisconnects

Type: integer

total onep disconnected sessions

TotalErrors

Type: integer

total onep errors

AuthenticateErr

Type: integer

onep authentication errors

DupAppNameErr

Type: integer

onep duplicate application name errors

MemErr

Type: integer

onep memory errors

SystemErr

Type: integer

onep system errors

TotalConnects

Type: integer

total number of TCP connection attempts

RejectedConnects

Type: integer

number of TCP connections rejected by rate limiting

AcceptedConnects

Type: integer

number of TCP connections accepted by rate limiting

UnaffectedConnects

Type: integer

number of TCP connections unaffected by rate limiting

FailedConnectionIndex

Type: integer

Index of the failed connection

SequenceNumber

Type: integer

Sequence number of the failed connection

FailureReason

Type: string

Failure reason of the failed connection

ErrorCode

Type: integer

Error code of the failed connection

FailureTime

Type: string

Failure time of the failed connection

RemoteHost

Type: string

Remote host address of the failed connection

TABLE_stats_sessions

all current sessions of onep

ID

Type: string

the session handler

Appname

Type: string

the application name

APIIn

Type: integer

the API in

APIOut

Type: integer

the API out

BytesIn

Type: string

the Bytes in

BytesOut

Type: string

the Bytes out

VtyCount

Type: integer

the Vty count

Error

Type: string

possible error message

show onep status

show onep status [ __readonly__ operational_status o_status operational_version o_version [ TABLE_transports transport_name status [port] [access_class] [localcert] [remotecert] ] session_max_limit s_max_limit cpu_interval c_interval cpu_fall_threshold c_fall_threshold cpu_rise_threshold c_rise_threshold history_buffer_on h_buffer_on history_buffer_purge h_buffer_purge history_buffer_size h_buffer_size history_syslog h_syslog [ TABLE_service_sets service_set state version ] ]

Syntax Description

show

Show running system information

onep

One Platform

status

status

__readonly__

operational_status

run-time info about onep

o_status

Type: string

status of onep

operational_version

run-time version about onep

o_version

Type: string

version of onep

TABLE_transports

all transports of onep

transport_name

Type: string

the transport name

status

Type: string

the transport status

port

Type: integer

the transport port

access_class

Type: string

the transport access-class

localcert

Type: string

the local certificate of transport

remotecert

Type: string

the remote certificate of transport

session_max_limit

maximum number of sessions allowed

s_max_limit

Type: string

maximum limit

cpu_interval

obsevation interval in seconds

c_interval

Type: string

observation interval

cpu_fall_threshold

falling threshold in percentage

c_fall_threshold

Type: string

falling threshold

cpu_rise_threshold

rising threshold in percentage

c_rise_threshold

Type: string

rising threshold

history_buffer_on

history buffer on

h_buffer_on

Type: string

history buffer on

history_buffer_purge

history buffer purge

h_buffer_purge

Type: string

purge oldest or newest

history_buffer_size

history buffer size

h_buffer_size

Type: string

history buffer size

history_syslog

history syslog

h_syslog

Type: string

history syslog

TABLE_service_sets

all registered service sets of onep

service_set

Type: string

service set name

state

Type: string

service set state

version

Type: string

service set version

Command Modes

- /exec

show onep trace

show onep trace [ __readonly__ [ TABLE_onep_traces Content ] ]

Syntax Description

show

Show running system information

onep

One Platform

trace

Trace

__readonly__

TABLE_onep_traces

all internal traces

Content

Type: string

trace content

Command Modes

- /exec

show ospfv3

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag instance_number cname rid stateful_ha gr_ha [ [gr_planned_only] [gr_notify_period] [gr_grace_period] [gr_state] [gr_last_status] ] [gr_helper_mode] support_tos0_only support_opaque_lsa [low_mem_cond] is_abr is_asbr [max_lsa_non_self_number] [max_lsa_state] [max_lsa_warning_only] [max_lsa_current_non_self_lsa_number] [max_lsa_threshold_pct] [max_lsa_ignore_time] [max_lsa_reset_time] [max_lsa_ignore_count] [max_lsa_current_ignore_count] [max_lsa_ignore_time_left] [max_lsa_reset_time_left] [max_lsa_permanent_ignore] [ TABLE_redist proto [max_lsas] [warning] [threshold] [current_count] ] admin_dist ref_bw spf_start_time spf_hold_time spf_max_time lsa_start_time lsa_hold_time lsa_max_time min_lsa_arr_time lsa_aging_pace spf_max_paths max_metric_adver [ [max_metric_time_left] [max_metric_wait_bgp] [max_metric_timeout] [max_metric_always] [max_metric_sum_lsa] [max_metric_ext_lsa] ] asext_lsa_cnt asext_lsa_crc area_total area_normal area_stub area_nssa act_area_total act_area_normal act_area_stub act_area_nssa no_discard_rt_ext no_discard_rt_int [bfd_enabled] [passive_dflt] [name_lookup] [ TABLE_area aname [backbone_active] [active] age total_intf act_intf passive_intf loopback_intf [gr_nbr_cnt] stub [stub_def_cost] nssa [no_redist] [nssa_trans] no_summary spf_runs last_spf_run_time [rtr_lsa_throt] [ TABLE_range addr masklen state nets advertise [cost] ] [filter_in] [filter_out] lsa_cnt lsa_crc ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_ctx

ptag

Type: string

instance_number

Type: integer

cname

Type: string

rid

Type: ipaddr

stateful_ha

Type: bool

gr_ha

Type: bool

gr_planned_only

Type: bool

gr_notify_period

Type: duration

gr_grace_period

Type: duration

gr_state

active  value: 0

inactive  value: 1

gr_last_status

None  value: 0

Successful  value: 1

Failed (notify period timeout)  value: 2

Failed (grace period timeout)  value: 3

Failed (topology change)  value: 4

Failed (invalid lsid)  value: 5

gr_helper_mode

Type: bool

support_tos0_only

Type: bool

support_opaque_lsa

Type: bool

low_mem_cond

Type: bool

is_abr

Type: bool

is_asbr

Type: bool

max_lsa_non_self_number

Type: uinteger

max_lsa_state

Type: string

max_lsa_warning_only

Type: bool

max_lsa_current_non_self_lsa_number

Type: uinteger

max_lsa_threshold_pct

Type: uinteger

max_lsa_ignore_time

Type: duration

max_lsa_reset_time

Type: duration

max_lsa_ignore_count

Type: uinteger

max_lsa_current_ignore_count

Type: uinteger

max_lsa_ignore_time_left

Type: duration

max_lsa_reset_time_left

Type: duration

max_lsa_permanent_ignore

Type: bool

TABLE_redist

proto

Type: string

max_lsas

Type: integer

warning

Type: string

threshold

Type: integer

current_count

Type: integer

admin_dist

Type: integer

ref_bw

Type: integer

spf_start_time

Type: duration

spf_hold_time

Type: duration

spf_max_time

Type: duration

lsa_start_time

Type: duration

lsa_hold_time

Type: duration

lsa_max_time

Type: duration

min_lsa_arr_time

Type: duration

lsa_aging_pace

Type: integer

spf_max_paths

Type: integer

max_metric_adver

Type: bool

max_metric_time_left

Type: duration

max_metric_wait_bgp

Type: bool

max_metric_timeout

Type: duration

max_metric_always

Type: bool

max_metric_sum_lsa

Type: integer

max_metric_ext_lsa

Type: integer

asext_lsa_cnt

Type: integer

asext_lsa_crc

Type: hex

area_total

Type: integer

area_normal

Type: integer

area_stub

Type: integer

area_nssa

Type: integer

act_area_total

Type: integer

act_area_normal

Type: integer

act_area_stub

Type: integer

act_area_nssa

Type: integer

bfd_enabled

Type: bool

passive_dflt

Type: bool

name_lookup

Type: bool

no_discard_rt_ext

Type: bool

no_discard_rt_int

Type: bool

TABLE_area

aname

Type: string

backbone_active

Type: bool

active

Type: bool

age

Type: duration

total_intf

Type: integer

act_intf

Type: integer

passive_intf

Type: integer

loopback_intf

Type: integer

gr_nbr_cnt

Type: integer

stub

Type: bool

stub_def_cost

Type: integer

nssa

Type: bool

no_redist

Type: bool

nssa_trans

Type: bool

no_summary

Type: bool

spf_runs

Type: integer

last_spf_run_time

Type: duration

rtr_lsa_throt

Type: duration

TABLE_range

addr

Type: ipv6addr

masklen

Type: integer

state

active  value: 0

passive  value: 1

nets

Type: integer

advertise

advertise  value: 0

doNotAdvertise  value: 1

cost

Type: integer

filter_in

Type: string

filter_out

Type: string

lsa_cnt

Type: integer

lsa_crc

Type: hex

Command Modes

- /exec

show ospfv3 border-routers

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] border-routers [all_routes] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_br type addr cost asbr abr area spf_inst [vlink_unresolved] [ TABLE_br_ubest_nh [ubest_nh_addr] [ubest_nh_intf] ] [ TABLE_br_mbest_nh [mbest_nh_addr] [mbest_nh_intf] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

border-routers

Border routers

all_routes

Display all OSPFv3 routes

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_br

type

nopath  value: 0

discard-internal  value: 1

discard-external  value: 2

intra  value: 3

inter  value: 4

type-1  value: 5

nssa type-1  value: 6

type-2  value: 7

nssa type-2  value: 8

addr

Type: ipaddr

cost

Type: uinteger

asbr

Type: bool

abr

Type: bool

area

Type: string

spf_inst

Type: uinteger

vlink_unresolved

Type: bool

TABLE_br_ubest_nh

ubest_nh_addr

Type: ipv6addr

ubest_nh_intf

Type: interface

TABLE_br_mbest_nh

mbest_nh_addr

Type: ipv6addr

mbest_nh_intf

Type: interface

Command Modes

- /exec

show ospfv3 database

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] database [ [ [ [ router | network | intra-area-prefix | inter-area { irouter | iprefix } | nssa-external | area-unknown | [ { link | link-unknown | grace } [interface] ] ] [ area area-id-ip ] ] | external [ tag tag_val ] | as-unknown ] [lsid] [ self-originated | adv-router advid | adv-router-name adv-name ] ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx rid ptag cname [ TABLE_db3_lsa [name] [area] [id] [advrtr] [age] [seqno] [corrupt] [rtr_num_links] [net_num_rtr] [prefix] [inter_rid] [link_if] [intra_ref_type] [intra_ref_lsid] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Link-state Database Summary

router

Display router LSAs

network

Display network LSAs

inter-area

Display inter-area LSAs

iprefix

Display Inter-Area-Prefix LSAs

irouter

Display Inter-Area-Router LSAs

nssa-external

Display NSSA-external LSAs

area-unknown

Display area-scope unknown LSAs

external

Display AS-external LSAs

as-unknown

Display as-scope unknown LSAs

grace

Display Grace LSAs

link

Display Link LSAs

link-unknown

Display link-scope unknown LSAs

interface

Type: interface

OSPF enabled interface

intra-area-prefix

Display Intra-Area-Prefix LSAs

self-originated

Display only self-originated LSAs

lsid

Type: ipaddr

Restrict display by link state ID

adv-router

Restrict display by Advertising router

advid

Type: ipaddr

Advertising router ID

adv-router-name

Restrict display by Advertising router name

adv-name

Type: string

DNS Name of the Advertising router

area

Display only LSA's in this area

area-id-ip

Type: ipaddr

Area Id as an integer or ip address

tag

Restrict display by tag

tag_val

Type: uinteger

min: 1  max: 4294967295

32-bit tag value

__readonly__

TABLE_ctx

rid

Type: ipaddr

ptag

Type: string

cname

Type: string

TABLE_db3_lsa

name

Type: string

area

Type: string

id

Type: ipaddr

advrtr

Type: ipaddr

age

Type: uinteger

seqno

Type: hex

corrupt

Type: bool

rtr_num_links

Type: integer

net_num_rtr

Type: integer

prefix

Type: ipv6prefix

inter_rid

Type: ipaddr

link_if

Type: interface

intra_ref_type

Link-scope unknown  value: 0

Link-Local  value: 1

Grace  value: 2

Area-scope unknown  value: 3

Router  value: 4

Network  value: 5

Inter-Area Prefix  value: 6

Inter-Area Router  value: 7

Group Membership  value: 8

Type-7 AS External  value: 9

Intra-Area Prefix  value: 10

AS-scope unknown  value: 11

Type-5 AS External  value: 12

intra_ref_lsid

Type: ipaddr

Command Modes

- /exec

show ospfv3 database database-summary

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] database database-summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx rid ptag cname [ TABLE_dbsum [ TABLE_dbsum_area area [ TABLE_dbsum_area_lsa area_lsa_name area_lsa_count ] area_lsa_total ] [ TABLE_dbsum_all [ TABLE_dbsum_lsa_all lsa_name lsa_count ] non_self_lsa_total lsa_total ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Link-state Database Summary

database-summary

Summary of database

__readonly__

TABLE_ctx

rid

Type: ipaddr

ptag

Type: string

cname

Type: string

TABLE_dbsum

TABLE_dbsum_area

area

Type: string

TABLE_dbsum_area_lsa

area_lsa_name

Type: string

area_lsa_count

Type: integer

area_lsa_total

Type: integer

TABLE_dbsum_all

TABLE_dbsum_lsa_all

lsa_name

Type: string

lsa_count

Type: integer

non_self_lsa_total

Type: integer

lsa_total

Type: integer

Command Modes

- /exec

show ospfv3 database detail

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] database [ [ [ router | network | intra-area-prefix | inter-area { irouter | iprefix } | nssa-external | area-unknown | [ { link | link-unknown | grace } [interface] ] ] [ area area-id-ip ] ] | external [ tag tag_val ] | as-unknown ] [lsid] [ self-originated | adv-router advid | adv-router-name adv-name ] detail [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx rid ptag cname [ TABLE_db3_lsa [name] [area] [ TABLE_lsdb age maxage wrapping dummy flush_pending type [intf] id advrtr seqno cksum len [corrupt] [rtr_abr] [rtr_asbr] [rtr_translate] [rtr_vlink_end] [rtr_options] [rtr_num_links] [ TABLE_rlsa [rtr_link_type] [rtr_link_metric] [rtr_link_ifid] [rtr_link_nbr_ifid] [rtr_link_nbr_rid] ] [net_options] [ TABLE_nlsa [net_rtr] ] [ia_prefix] [ia_prefix_options] [ia_prefix_metric] [ia_rtr_options] [ia_rtr_metric] [ia_rtr_rid] [asext_prefix] [asext_options] [asext_metric_type2] [asext_metric] [asext_fwd_addr] [asext_tag] [asext_ref_lstype] [asext_ref_lsid] [link_priority] [link_options] [link_laddr] [link_num_prefix] [ TABLE_linklsa [link_prefix] [link_prefix_options] ] [intra_num_prefix] [intra_ref_lstype] [intra_ref_lsid] [intra_ref_advrtr] [ TABLE_iaplsa [intra_prefix] [intra_prefix_options] [intra_prefix_metric] [corrupted_length] ] [tlv_type] [tlv_len] [tlv_data] [tlv_unknown] [gr_interval] [gr_reason] [unknown] [data_len] [data] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

database

Link-state Database Summary

router

Display router LSAs

network

Display network LSAs

inter-area

Display inter-area LSAs

iprefix

Display Inter-Area-Prefix LSAs

irouter

Display Inter-Area-Router LSAs

nssa-external

Display NSSA-external LSAs

area-unknown

Display area-scope unknown LSAs

external

Display AS-external LSAs

as-unknown

Display as-scope unknown LSAs

grace

Display Grace LSAs

link

Display Link LSAs

link-unknown

Display link-scope unknown LSAs

interface

Type: interface

OSPF enabled interface

intra-area-prefix

Display Intra-Area-Prefix LSAs

self-originated

Display only self-originated LSAs

lsid

Type: ipaddr

Restrict display by link state ID

adv-router

Restrict display by Advertising router

advid

Type: ipaddr

Advertising router ID

adv-router-name

Restrict display by Advertising router name

adv-name

Type: string

DNS Name of the Advertising router

area

Display only LSA's in this area

area-id-ip

Type: ipaddr

Area Id as an integer or ip address

tag

Restrict display by tag

tag_val

Type: uinteger

min: 1  max: 4294967295

32-bit tag value

detail

Display LSA in detail

__readonly__

TABLE_ctx

rid

Type: ipaddr

ptag

Type: string

cname

Type: string

TABLE_db3_lsa

name

Type: string

area

Type: string

TABLE_lsdb

age

Type: integer

maxage

Type: bool

wrapping

Type: bool

dummy

Type: bool

flush_pending

Type: bool

type

Type: string

intf

Type: interface

id

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

len

Type: integer

corrupt

Type: bool

rtr_abr

Type: bool

rtr_asbr

Type: bool

rtr_translate

Type: bool

rtr_vlink_end

Type: bool

rtr_options

Type: hex

rtr_num_links

Type: integer

TABLE_rlsa

rtr_link_type

Type: string

rtr_link_metric

Type: integer

rtr_link_ifid

Type: uinteger

rtr_link_nbr_ifid

Type: uinteger

rtr_link_nbr_rid

Type: ipaddr

net_options

Type: hex

TABLE_nlsa

net_rtr

Type: ipaddr

ia_prefix

Type: ipv6prefix

ia_prefix_options

Type: hex

ia_prefix_metric

Type: integer

ia_rtr_options

Type: hex

ia_rtr_metric

Type: integer

ia_rtr_rid

Type: ipaddr

asext_prefix

Type: ipv6prefix

asext_options

Type: hex

asext_metric_type2

Type: bool

asext_metric

Type: integer

asext_fwd_addr

Type: ipv6addr

asext_tag

Type: uinteger

asext_ref_lstype

Link-scope unknown  value: 0

Link-Local  value: 1

Grace  value: 2

Area-scope unknown  value: 3

Router  value: 4

Network  value: 5

Inter-Area Prefix  value: 6

Inter-Area Router  value: 7

Group Membership  value: 8

Type-7 AS External  value: 9

Intra-Area Prefix  value: 10

AS-scope unknown  value: 11

Type-5 AS External  value: 12

asext_ref_lsid

Type: ipaddr

link_priority

Type: integer

link_options

Type: hex

link_laddr

Type: ipv6addr

link_num_prefix

Type: integer

TABLE_linklsa

link_prefix

Type: ipv6prefix

link_prefix_options

Type: integer

intra_num_prefix

Type: integer

intra_ref_lstype

Link-scope unknown  value: 0

Link-Local  value: 1

Grace  value: 2

Area-scope unknown  value: 3

Router  value: 4

Network  value: 5

Inter-Area Prefix  value: 6

Inter-Area Router  value: 7

Group Membership  value: 8

Type-7 AS External  value: 9

Intra-Area Prefix  value: 10

AS-scope unknown  value: 11

Type-5 AS External  value: 12

intra_ref_lsid

Type: ipaddr

intra_ref_advrtr

Type: ipaddr

TABLE_iaplsa

intra_prefix

Type: ipv6prefix

intra_prefix_options

Type: hex

intra_prefix_metric

Type: integer

corrupted_length

Type: bool

tlv_type

Type: integer

tlv_len

Type: integer

tlv_data

Type: integer

tlv_unknown

Type: bool

gr_interval

Type: integer

gr_reason

Type: string

unknown

Type: bool

data_len

Type: integer

data

Type: integer

Command Modes

- /exec

show ospfv3 ha

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] ha [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname stateful pss_restored pss_state gr_enabled gr_grace_period gr_state gr_last_status gr_helper_mode ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

ha

High Availability status

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

stateful

enabled  value: 0

disabled  value: 1

pss_restored

Type: bool

pss_state

Type: string

gr_enabled

Type: bool

gr_grace_period

Type: duration

gr_state

Active  value: 0

Inactive  value: 1

gr_last_status

Type: string

gr_helper_mode

Type: bool

Command Modes

- /exec

show ospfv3 interface

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] interface [ interface | vrf { vrf-name | vrf-known-name | all } ] [private] [ __readonly__ TABLE_ctx ptag cname [ TABLE_intf ifname admin_status proto_status addr [masklen] [inst_id] area [if_cfg] state_str type_str cost [bfd_enabled] index [passive] [mpls] [transmit_delay] [if_priority] [dr_rid] [dr_addr] [bdr_rid] [bdr_addr] [nbr_total] [nbr_flood] [nbr_adjs] [gr_nbr] [hello_interval] [dead_interval] [wait_interval] [rxmt_interval] [hello_timer] [wait_timer] [pacing_timer] [lsu_timer] [lsack_timer] [netlsa_throt_timer] [link_lsa_cnt] [link_lsa_crc] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

interface

OSPF enabled interface

interface

Type: interface

OSPF enabled interface

private

Developer-only statistics

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_intf

ifname

Type: interface

admin_status

up  value: 0

down  value: 1

proto_status

up  value: 0

down  value: 1

addr

Type: ipv6addr

masklen

Type: integer

inst_id

Type: integer

area

Type: string

if_cfg

Type: bool

state_str

UNKNOWN  value: 0

DOWN  value: 1

LOOPBACK  value: 2

WAITING  value: 3

P2P  value: 4

DROTHER  value: 5

BDR  value: 6

DR  value: 7

type_str

UNKNOWN  value: 0

LOOPBACK  value: 1

P2P  value: 2

P2MP  value: 3

NBMA  value: 4

BROADCAST  value: 5

cost

Type: integer

bfd_enabled

Type: bool

index

Type: integer

passive

Type: bool

mpls

Type: bool

transmit_delay

Type: integer

if_priority

Type: integer

dr_rid

Type: ipaddr

dr_addr

Type: ipv6addr

bdr_rid

Type: ipaddr

bdr_addr

Type: ipv6addr

nbr_total

Type: integer

nbr_flood

Type: integer

nbr_adjs

Type: integer

gr_nbr

Type: integer

hello_interval

Type: integer

dead_interval

Type: integer

wait_interval

Type: integer

rxmt_interval

Type: integer

hello_timer

Type: duration

wait_timer

Type: duration

pacing_timer

Type: duration

lsu_timer

Type: duration

lsack_timer

Type: duration

netlsa_throt_timer

Type: duration

link_lsa_cnt

Type: integer

link_lsa_crc

Type: hex

Command Modes

- /exec

show ospfv3 interface brief

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] interface brief [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname intf_count TABLE_intf ifname index area cost state_str nbr_total admin_status ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

interface

OSPF enabled interface

brief

Display summary of OSPFv3 interfaces

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

intf_count

Type: integer

TABLE_intf

ifname

Type: interface

index

Type: uinteger

area

Type: string

cost

Type: uinteger

state_str

UNKNOWN  value: 0

DOWN  value: 1

LOOPBACK  value: 2

WAITING  value: 3

P2P  value: 4

DROTHER  value: 5

BDR  value: 6

DR  value: 7

nbr_total

Type: integer

admin_status

up  value: 0

down  value: 1

Command Modes

- /exec

show ospfv3 lsa-content-changed-list

show [ipv6] ospfv3 [tag] lsa-content-changed-list { ip-addr | neighbor-name } interface [ __readonly__ [ TABLE_ctx ptag cname [ TABLE_lschg nbr_rid intf nbr_addr [ TABLE_lsa [type] [lsid] [advrtr] [seqno] [cksum] [age] ] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

lsa-content-changed-list

LSAs that changed contents

interface

Type: interface

OSPF enabled interface

ip-addr

Type: ipaddr

Neighbor router ID

neighbor-name

Type: string

DNS Name of the neighbor

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_lschg

nbr_rid

Type: ipaddr

intf

Type: interface

nbr_addr

Type: ipv6addr

TABLE_lsa

type

Type: integer

lsid

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

age

Type: uinteger

Command Modes

- /exec

show ospfv3 memory

show [ipv6] ospfv3 [tag] memory [ __readonly__ TABLE_mem ptag byte_total byte_consumed byte_overhead byte_allocated alloc_current alloc_created alloc_failed alloc_free bf_current bf_created bf_failed bf_free bf_byte_consumed bf_32_current bf_32_created bf_32_failed bf_32_free bf_32_byte_consumed slab_current slab_created slab_failed slab_free slab_byte_consumed if_index_alloc_failed nbr_index_alloc_failed ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

memory

Memory usage statistics

__readonly__

TABLE_mem

ptag

Type: string

byte_total

Type: integer

byte_consumed

Type: integer

byte_overhead

Type: integer

byte_allocated

Type: uinteger

alloc_current

Type: integer

alloc_created

Type: integer

alloc_failed

Type: integer

alloc_free

Type: integer

bf_current

Type: integer

bf_created

Type: integer

bf_failed

Type: integer

bf_free

Type: integer

bf_byte_consumed

Type: uinteger

bf_32_current

Type: integer

bf_32_created

Type: integer

bf_32_failed

Type: integer

bf_32_free

Type: integer

bf_32_byte_consumed

Type: uinteger

slab_current

Type: integer

slab_created

Type: integer

slab_failed

Type: integer

slab_free

Type: integer

slab_byte_consumed

Type: integer

if_index_alloc_failed

Type: integer

nbr_index_alloc_failed

Type: integer

Command Modes

- /exec

show ospfv3 neighbors

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] neighbors [ interface [ neighbor | neighbor-name ] | [ neighbor | neighbor-name ] [ vrf { vrf-name | vrf-known-name | all } ] ] [ __readonly__ TABLE_ctx ptag cname nbrcount [ TABLE_nbr rid priority state uptime ifid intf [multiarea] addr ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

neighbors

Neighbor list

interface

Type: interface

OSPF enabled interface

neighbor

Type: ipaddr

Router ID of neighbor

neighbor-name

Type: string

DNS Name of the neighbor

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

nbrcount

Type: integer

TABLE_nbr

rid

Type: ipaddr

priority

Type: integer

state

UNKNOWN  value: 0

DOWN  value: 1

ATTEMPT  value: 2

INIT  value: 3

TWOWAY  value: 4

EXSTART  value: 5

EXCHANGE  value: 6

LOADING  value: 7

FULL  value: 8

uptime

Type: duration

ifid

Type: uinteger

intf

Type: interface

multiarea

Type: bool

addr

Type: ipv6addr

Command Modes

- /exec

show ospfv3 neighbors detail

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] neighbors [interface] [neighbor] detail [ vrf { vrf-name | vrf-known-name | all } ] [private] [ __readonly__ TABLE_ctx ptag cname [ TABLE_nbr rid addr area intf state transition lastchange [bfd_state] [priority] [ifid] [dr] [bdr] [master] [seqno] [dbdallsentacked] [dbdallsent] [dbdallacked] [lsaonreqlist] [lsafromlastreq] [lsreqrxmts] helloptions dbdoptions lastnonhello [deadtimer] [pacingtimer] [dbdrxmtimer] [reqrxmtimer] [lsutimer] [rerxmtimer] [fastrerxmtimer] [lsacktimer] [grtimer] [helpermode] [helpercand] [helperterm] [senddbd] [sendlsreq] [sendlsu] [sendlsurxmt] [sendlsack] [sendlsreqreply] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

neighbors

Neighbor list

interface

Type: interface

OSPF enabled interface

neighbor

Type: ipaddr

Router ID of neighbor

detail

Show detailed neighbor display

private

Developer-only statistics

private

Developer-only statistics

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_nbr

rid

Type: ipaddr

addr

Type: ipv6addr

area

Type: string

intf

Type: interface

state

UNKNOWN  value: 0

DOWN  value: 1

ATTEMPT  value: 2

INIT  value: 3

TWOWAY  value: 4

EXSTART  value: 5

EXCHANGE  value: 6

LOADING  value: 7

FULL  value: 8

transition

Type: integer

lastchange

Type: duration

bfd_state

Type: string

priority

Type: integer

ifid

Type: integer

dr

Type: ipaddr

bdr

Type: ipaddr

master

master  value: 0

slave  value: 1

seqno

Type: integer

dbdallsentacked

Type: bool

dbdallsent

Type: bool

dbdallacked

Type: bool

lsaonreqlist

Type: integer

lsafromlastreq

Type: integer

lsreqrxmts

Type: integer

helloptions

Type: hex

dbdoptions

Type: hex

lastnonhello

Type: duration

deadtimer

Type: duration

pacingtimer

Type: duration

dbdrxmtimer

Type: duration

reqrxmtimer

Type: duration

lsutimer

Type: duration

rerxmtimer

Type: duration

fastrerxmtimer

Type: duration

lsacktimer

Type: duration

grtimer

Type: duration

helpermode

Type: bool

helpercand

Type: bool

helperterm

Type: bool

senddbd

Type: bool

sendlsreq

Type: bool

sendlsu

Type: bool

sendlsurxmt

Type: bool

sendlsack

Type: bool

sendlsreqreply

Type: bool

Command Modes

- /exec

show ospfv3 neighbors summary

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] neighbors [interface] summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname TABLE_intf { ifname | total } down attempt init twoway exstart exchange loading full if_total ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

neighbors

Neighbor list

interface

Type: interface

OSPF enabled interface

summary

Summary of neighbors

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_intf

ifname

Type: interface

total

Type: bool

down

Type: integer

attempt

Type: integer

init

Type: integer

twoway

Type: integer

exstart

Type: integer

exchange

Type: integer

loading

Type: integer

full

Type: integer

if_total

Type: integer

Command Modes

- /exec

show ospfv3 policy statistics

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] policy statistics { redistribute { bgp as | { isis | rip } tag | static | direct | amt } | area area-id-ip filter-list { in | out } } [ vrf { vrf-name | vrf-known-name | all } ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

policy

Display Policy related information

statistics

Display Route Filter statistics

redistribute

Statistics for redistribution

rip

Routing Information Protocol (RIP)

isis

ISO Intermediate-to-Intermediate (IS-IS)

bgp

Border Gateway Protocol (BGP)

as

Type: integer

min: 1  max: 65535

Autonomous system number

static

Static

direct

Directly connected

amt

AMT anycast prefix

area

Configure area properties

area-id-ip

Type: ipaddr

Area Id as an integer or ip address

filter-list

Filter prefixes between OSPF areas

in

Filter networks sent to this area

out

Filter networks sent from this area

Command Modes

- /exec

show ospfv3 request-list

show [ipv6] ospfv3 [tag] request-list { ip-addr | neighbor-name } interface [ __readonly__ [ TABLE_ctx ptag cname [ TABLE_lsreq nbr_rid intf nbr_addr total [ TABLE_lsa [type] [lsid] [advrtr] [seqno] [cksum] [age] ] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

request-list

Link state request list

interface

Type: interface

OSPF enabled interface

ip-addr

Type: ipaddr

Neighbor router ID

neighbor-name

Type: string

DNS Name of the neighbor

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_lsreq

nbr_rid

Type: ipaddr

intf

Type: interface

nbr_addr

Type: ipv6addr

total

Type: integer

TABLE_lsa

type

Type: integer

lsid

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

age

Type: uinteger

Command Modes

- /exec

show ospfv3 retransmission-list

show [ipv6] ospfv3 [tag] retransmission-list { routerid | router-name } interface [ __readonly__ [ TABLE_ctx ptag cname [ TABLE_rxmit nbr_rid intf nbr_addr [timer_running] [timer_due] [ TABLE_lsa [type] [lsid] [advrtr] [seqno] [cksum] [age] ] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

retransmission-list

Link state retransmission list

routerid

Type: ipaddr

Neighbor router ID

router-name

Type: string

DNS Name of the router

interface

Type: interface

OSPF enabled interface

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_rxmit

nbr_rid

Type: ipaddr

intf

Type: interface

nbr_addr

Type: ipv6addr

timer_running

Type: bool

timer_due

Type: duration

TABLE_lsa

type

Type: integer

lsid

Type: ipaddr

advrtr

Type: ipaddr

seqno

Type: hex

cksum

Type: hex

age

Type: uinteger

Command Modes

- /exec

show ospfv3 route

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] route [ ipv6-prefix [longer-prefixes] ] [all_routes] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [hdr_addr] [hdr_masklen] [ TABLE_route addr masklen type in_rib direct [area] [tag] [vlink_unresolved] [ TABLE_route_ubest_nh [ubest_nh_addr] [ubest_nh_intf] [ubest_cost] [distance] [ubest_nh_direct] ] [ TABLE_route_mbest_nh [mbest_nh_addr] [mbest_nh_intf] [mbest_cost] [mbest_nh_direct] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

route

Internal OSPF routes

ipv6-prefix

Type: ipv6prefix

Show single exact match OSPF route

longer-prefixes

Show exact match and more specific routes

all_routes

Display all OSPFv3 routes

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

hdr_addr

Type: ipv6addr

hdr_masklen

Type: integer

TABLE_route

addr

Type: ipv6addr

masklen

Type: integer

type

nopath  value: 0

discard-internal  value: 1

discard-external  value: 2

intra  value: 3

inter  value: 4

type-1  value: 5

nssa type-1  value: 6

type-2  value: 7

nssa type-2  value: 8

unknown  value: 9

in_rib

Type: bool

direct

Type: bool

area

Type: string

tag

Type: uinteger

vlink_unresolved

Type: bool

TABLE_route_ubest_nh

ubest_nh_addr

Type: ipv6addr

ubest_nh_intf

Type: interface

ubest_cost

Type: uinteger

distance

Type: integer

ubest_nh_direct

Type: bool

TABLE_route_mbest_nh

mbest_nh_addr

Type: ipv6addr

mbest_nh_intf

Type: interface

mbest_cost

Type: uinteger

mbest_nh_direct

Type: bool

Command Modes

- /exec

show ospfv3 route summary

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] route [ ipv6-prefix [longer-prefixes] ] summary [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_route total_routes total_paths [ TABLE_route_type path_type path_routes path_paths ] [ TABLE_route_masklen masklen masklen_routes masklen_paths ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

route

Internal OSPF routes

ipv6-prefix

Type: ipv6prefix

Show single exact match OSPF route

longer-prefixes

Show exact match and more specific routes

summary

Show route counts

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_route

total_routes

Type: integer

total_paths

Type: integer

TABLE_route_type

path_type

nopath  value: 0

discard-internal  value: 1

discard-external  value: 2

intra  value: 3

inter  value: 4

type-1  value: 5

nssa type-1  value: 6

type-2  value: 7

nssa type-2  value: 8

unknown  value: 9

path_routes

Type: integer

path_paths

Type: integer

TABLE_route_masklen

masklen

Type: integer

masklen_routes

Type: integer

masklen_paths

Type: integer

Command Modes

- /exec

show ospfv3 statistics

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] statistics [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_stats ptag cname last_clear rid_change dr_elections older_lsa_recv nbr_state_change nbr_dead_postpone nbr_dead_expire nbr_bad_lsreq nbr_seqno_mismatch spf_full spf_summary spf_external spf_extsummary rtr_generate rtr_refresh rtr_flush rtr_other_flush net_generate net_refresh net_flush net_other_flush inter_prefix_generate inter_prefix_refresh inter_prefix_flush inter_prefix_other_flush inter_router_generate inter_router_refresh inter_router_flush inter_router_other_flush asext_generate asext_refresh asext_flush asext_other_flush link_generate link_refresh link_flush link_other_flush intra_prefix_generate intra_prefix_refresh intra_prefix_flush intra_prefix_other_flush unknown_generate unknown_refresh unknown_flush unknown_other_flush limbo_lsa_count limbo_lsa_hwm limbo_lsa_deleted limbo_lsa_revived limbo_runs limbo_lsa_last_time_hwm [limbo_timer] helloq_size helloq_max_size helloq_hwm helloq_drops helloq_last_hwm_time floodq_size floodq_max_size floodq_hwm floodq_drops floodq_last_hwm_time lsdb_add_fail [ TABLE_buffer_detail [buf_size] [buf_size_huge] buf_in_use buf_hwm buf_perm buf_alloc buf_free ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

statistics

Event counters

__readonly__

TABLE_stats

ptag

Type: string

cname

Type: string

last_clear

Type: duration

rid_change

Type: integer

dr_elections

Type: integer

older_lsa_recv

Type: integer

nbr_state_change

Type: integer

nbr_dead_postpone

Type: integer

nbr_dead_expire

Type: integer

nbr_bad_lsreq

Type: integer

nbr_seqno_mismatch

Type: integer

spf_full

Type: integer

spf_summary

Type: integer

spf_external

Type: integer

spf_extsummary

Type: integer

rtr_generate

Type: integer

rtr_refresh

Type: integer

rtr_flush

Type: integer

rtr_other_flush

Type: integer

net_generate

Type: integer

net_refresh

Type: integer

net_flush

Type: integer

net_other_flush

Type: integer

inter_prefix_generate

Type: integer

inter_prefix_refresh

Type: integer

inter_prefix_flush

Type: integer

inter_prefix_other_flush

Type: integer

inter_router_generate

Type: integer

inter_router_refresh

Type: integer

inter_router_flush

Type: integer

inter_router_other_flush

Type: integer

asext_generate

Type: integer

asext_refresh

Type: integer

asext_flush

Type: integer

asext_other_flush

Type: integer

link_generate

Type: integer

link_refresh

Type: integer

link_flush

Type: integer

link_other_flush

Type: integer

intra_prefix_generate

Type: integer

intra_prefix_refresh

Type: integer

intra_prefix_flush

Type: integer

intra_prefix_other_flush

Type: integer

unknown_generate

Type: integer

unknown_refresh

Type: integer

unknown_flush

Type: integer

unknown_other_flush

Type: integer

limbo_lsa_count

Type: integer

limbo_lsa_hwm

Type: integer

limbo_lsa_deleted

Type: integer

limbo_lsa_revived

Type: integer

limbo_runs

Type: integer

limbo_lsa_last_time_hwm

Type: string

limbo_timer

Type: duration

helloq_size

Type: integer

helloq_max_size

Type: integer

helloq_hwm

Type: integer

helloq_drops

Type: integer

helloq_last_hwm_time

Type: string

floodq_size

Type: integer

floodq_max_size

Type: integer

floodq_hwm

Type: integer

floodq_drops

Type: integer

floodq_last_hwm_time

Type: string

lsdb_add_fail

Type: integer

TABLE_buffer_detail

buf_size

Type: integer

buf_size_huge

Type: bool

buf_in_use

Type: integer

buf_hwm

Type: integer

buf_perm

Type: integer

buf_alloc

Type: integer

buf_free

Type: integer

Command Modes

- /exec

show ospfv3 summary-address

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] summary-address [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ [ TABLE_ctx ptag cname rid [ TABLE_sum addr masklen [metric] [tag] [pending] ] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

summary-address

Summary-address redistribution information

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

rid

Type: ipaddr

TABLE_sum

addr

Type: ipv6addr

masklen

Type: integer

metric

Type: integer

tag

Type: uinteger

pending

Type: bool

Command Modes

- /exec

show ospfv3 traffic

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] traffic [ interface [detail] | [detail] | [detail] vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_traf ptag cname last_clear [ifname] pkt_in pkt_out lsu_first_trans lsu_retrans lsu_for_lsreq lsu_nbr_trans throttle_out throttle_out_token throttle_out_ip lsa_ignored lsa_dropped_spf lsa_dropped_gr pkt_drops_in pkt_drops_out pkt_errors_in pkt_errors_out hello_errors_in dbds_errors_in lsreqs_errors_in lsus_errors_in lsacks_errors_in pkt_unknown_in pkt_unknown_out pkt_no_ospf_intf bad_version bad_crc dup_rtr_id dup_src_addr invalid_src_addr invalid_dst_addr non_existing_nbr pkt_passive_intf wrong_area invalid_pkt_len nbr_changed_routerid_ipaddr [bad_auth] [bad_reserved] [pkt_no_vrf] hellos_in dbds_in lsreqs_in lsus_in lsacks_in hellos_out dbds_out lsreqs_out lsus_out lsacks_out [ hellos_in_hq dbds_in_hq lsreqs_in_flq lsus_in_flq lsacks_in_flq lsas_in_dbds_in lsas_in_lsreqs_in lsas_in_lsus_in lsas_in_lsacks_in lsas_in_dbds_out lsas_in_lsreqs_out lsas_in_lsus_out lsas_in_lsacks_out lsas_in_rxmt_lsus_out ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

interface

Type: interface

OSPF enabled interface

detail

Display detailed information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

traffic

Packet counters

__readonly__

TABLE_traf

ptag

Type: string

cname

Type: string

last_clear

Type: duration

ifname

Type: interface

pkt_in

Type: integer

pkt_out

Type: integer

lsu_first_trans

Type: integer

lsu_retrans

Type: integer

lsu_for_lsreq

Type: integer

lsu_nbr_trans

Type: integer

throttle_out

Type: integer

throttle_out_token

Type: integer

throttle_out_ip

Type: integer

lsa_ignored

Type: integer

lsa_dropped_spf

Type: integer

lsa_dropped_gr

Type: integer

pkt_drops_in

Type: integer

pkt_drops_out

Type: integer

pkt_errors_in

Type: integer

pkt_errors_out

Type: integer

hello_errors_in

Type: integer

dbds_errors_in

Type: integer

lsreqs_errors_in

Type: integer

lsus_errors_in

Type: integer

lsacks_errors_in

Type: integer

pkt_unknown_in

Type: integer

pkt_unknown_out

Type: integer

pkt_no_ospf_intf

Type: integer

bad_version

Type: integer

bad_crc

Type: integer

dup_rtr_id

Type: integer

dup_src_addr

Type: integer

invalid_src_addr

Type: integer

invalid_dst_addr

Type: integer

non_existing_nbr

Type: integer

pkt_passive_intf

Type: integer

wrong_area

Type: integer

invalid_pkt_len

Type: integer

nbr_changed_routerid_ipaddr

Type: integer

bad_auth

Type: integer

bad_reserved

Type: integer

pkt_no_vrf

Type: integer

hellos_in

Type: integer

dbds_in

Type: integer

lsreqs_in

Type: integer

lsus_in

Type: integer

lsacks_in

Type: integer

hellos_out

Type: integer

dbds_out

Type: integer

lsreqs_out

Type: integer

lsus_out

Type: integer

lsacks_out

Type: integer

hellos_in_hq

Type: integer

dbds_in_hq

Type: integer

lsreqs_in_flq

Type: integer

lsus_in_flq

Type: integer

lsacks_in_flq

Type: integer

lsas_in_dbds_in

Type: integer

lsas_in_lsreqs_in

Type: integer

lsas_in_lsus_in

Type: integer

lsas_in_lsacks_in

Type: integer

lsas_in_dbds_out

Type: integer

lsas_in_lsreqs_out

Type: integer

lsas_in_lsus_out

Type: integer

lsas_in_lsacks_out

Type: integer

lsas_in_rxmt_lsus_out

Type: integer

Command Modes

- /exec

show ospfv3 virtual-links

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] virtual-links [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname [ TABLE_vlink name nbr_rid if_state transit_area nh_intf nbr_addr [transit_area_stub] [transit_area_nssa] addr [masklen] inst_id area [if_cfg] state_str type_str cost index [passive] [mpls] [transmit_delay] [if_priority] [dr_rid] [dr_addr] [bdr_rid] [bdr_addr] [nbr_total] [nbr_flood] [nbr_adjs] [gr_nbr] [hello_interval] [dead_interval] [wait_interval] [rxmt_interval] [hello_timer] [wait_timer] [pacing_timer] [lsu_timer] [lsack_timer] [netlsa_throt_timer] [link_lsa_cnt] [link_lsa_crc] [state] [transition] [lastchange] [priority] [ifid] [dr] [bdr] [master] [seqno] [dbdallsentacked] [dbdallsent] [dbdallacked] [lsaonreqlist] [lsafromlastreq] [lsreqrxmts] [helloptions] [dbdoptions] [lastnonhello] [deadtimer] [pacingtimer] [dbdrxmtimer] [reqrxmtimer] [lsutimer] [rerxmtimer] [fastrerxmtimer] [lsacktimer] [grtimer] [helpermode] [helpercand] [helperterm] [senddbd] [sendlsreq] [sendlsu] [sendlsurxmt] [sendlsack] [sendlsreqreply] ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

virtual-links

Virtual link information

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

TABLE_vlink

name

Type: string

nbr_rid

Type: ipaddr

if_state

up  value: 0

down  value: 1

transit_area

Type: string

nh_intf

Type: interface

nbr_addr

Type: ipv6addr

transit_area_stub

Type: bool

transit_area_nssa

Type: bool

addr

Type: ipv6addr

masklen

Type: integer

inst_id

Type: integer

area

Type: string

if_cfg

Type: bool

state_str

UNKNOWN  value: 0

DOWN  value: 1

LOOPBACK  value: 2

WAITING  value: 3

P2P  value: 4

DROTHER  value: 5

BDR  value: 6

DR  value: 7

type_str

UNKNOWN  value: 0

LOOPBACK  value: 1

P2P  value: 2

P2MP  value: 3

NBMA  value: 4

BROADCAST  value: 5

cost

Type: integer

index

Type: integer

passive

Type: bool

mpls

Type: bool

transmit_delay

Type: integer

if_priority

Type: integer

dr_rid

Type: ipaddr

dr_addr

Type: ipv6addr

bdr_rid

Type: ipaddr

bdr_addr

Type: ipv6addr

nbr_total

Type: integer

nbr_flood

Type: integer

nbr_adjs

Type: integer

gr_nbr

Type: integer

hello_interval

Type: integer

dead_interval

Type: integer

wait_interval

Type: integer

rxmt_interval

Type: integer

hello_timer

Type: duration

wait_timer

Type: duration

pacing_timer

Type: duration

lsu_timer

Type: duration

lsack_timer

Type: duration

netlsa_throt_timer

Type: duration

link_lsa_cnt

Type: integer

link_lsa_crc

Type: integer

state

unknown  value: 0

down  value: 1

attempt  value: 2

init  value: 3

twoway  value: 4

exstart  value: 5

exchange  value: 6

loading  value: 7

full  value: 8

transition

Type: integer

lastchange

Type: duration

priority

Type: integer

ifid

Type: integer

dr

Type: ipaddr

bdr

Type: ipaddr

master

master  value: 0

slave  value: 1

seqno

Type: integer

dbdallsentacked

Type: bool

dbdallsent

Type: bool

dbdallacked

Type: bool

lsaonreqlist

Type: integer

lsafromlastreq

Type: integer

lsreqrxmts

Type: integer

helloptions

Type: integer

dbdoptions

Type: integer

lastnonhello

Type: duration

deadtimer

Type: duration

pacingtimer

Type: duration

dbdrxmtimer

Type: duration

reqrxmtimer

Type: duration

lsutimer

Type: duration

rerxmtimer

Type: duration

fastrerxmtimer

Type: duration

lsacktimer

Type: duration

grtimer

Type: duration

helpermode

Type: bool

helpercand

Type: bool

helperterm

Type: bool

senddbd

Type: bool

sendlsreq

Type: bool

sendlsu

Type: bool

sendlsurxmt

Type: bool

sendlsack

Type: bool

sendlsreqreply

Type: bool

Command Modes

- /exec

show ospfv3 virtual-links brief

show [ipv6] ospfv3 [tag] [ vrf { vrf-name | vrf-known-name | all } ] virtual-links brief [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_ctx ptag cname vlink_count [ TABLE_vlink nbr_rid vlink_num transit_area cost if_state ] ]

Syntax Description

show

Show running system information

ipv6

Display IPv6 information

ospfv3

Display OSPFv3 status and configuration

tag

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

antipattern: adjacency | all | border-routers | database | database-timers | events | flooding | graceful-restart | hello | interface | internal | lsa-content-changed-list | lsa-generation | memory | mpls | neighbor | neighbors | packets | policy | redist | request-list | retransmission | retransmission-list | route | spf | spf-trigger | statistics | summary-address | traffic | virtual-links | vrf

length: 20

Process tag

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

virtual-links

Virtual link information

brief

Display summary of OSPFv3 virtual links

__readonly__

TABLE_ctx

ptag

Type: string

cname

Type: string

vlink_count

Type: integer

TABLE_vlink

nbr_rid

Type: ipaddr

vlink_num

Type: uinteger

transit_area

Type: string

cost

Type: integer

if_state

up  value: 0

down  value: 1

Command Modes

- /exec

show otv mroute

show otv mroute [ [overlay-if] [ vlan vlan-id ] [ source saddr ] [ group gaddr ] ] + [detail] [startup] [iodcache] [summary] [ __readonly__ TABLE_overlay [if-name] TABLE_mroute vlan-id src-addr grp-addr mask metric uptime [ TABLE_rowner rowner ] nh-count [ TABLE_oif [oif] [site] oif-uptime [ TABLE_oif_owner oif-owner ] ] ]

Syntax Description

show

Show running system information

otv

Display OTV information

mroute

OTV multicast routes only

overlay-if

Type: interface

Overlay interface

vlan

Display routes for a specific VLAN

vlan-id

Type: vlan

Vlan-ID

source

multicast source

saddr

Type: ipaddr

source ipv4 address

group

multicast group

gaddr

Type: ipaddr

group ipv4 address

detail

display details

startup

display startup and all other mroutes

iodcache

display tunnel iods cached for the route

summary

Display summary of multicast routes

__readonly__

TABLE_overlay

if-name

Type: interface

TABLE_mroute

vlan-id

Type: uinteger

src-addr

Type: string

grp-addr

Type: string

mask

Type: string

metric

Type: uinteger

uptime

Type: duration

TABLE_rowner

rowner

Type: string

nh-count

Type: uinteger

TABLE_oif

oif

Type: string

site

Type: uinteger

oif-uptime

Type: duration

TABLE_oif_owner

oif-owner

Type: string

Command Modes

- /exec

show otv route

show otv route [ [ overlay-if [ neighbor-address nipaddr ] ] [ vlan vlan-id ] [mac-address] ] + [summary] [ __readonly__ TABLE_overlay if-name TABLE_route vlan-id mac-addr metric owner next-hop uptime [ TABLE_nexthop next-hop1 ] ]

Syntax Description

show

Show running system information

otv

Display OTV information

route

OTV route or MAC address table

overlay-if

Type: interface

Overlay interface

neighbor-address

Remote neighbor

nipaddr

Type: ipaddr

IPv4 address

vlan

Display routes for a specific VLAN

vlan-id

Type: vlan

Vlan-ID

mac-address

Type: ethernet

MAC Address

summary

Display summary of unicast routes

__readonly__

TABLE_overlay

if-name

Type: interface

TABLE_route

vlan-id

Type: uinteger

mac-addr

Type: string

metric

Type: uinteger

uptime

Type: duration

owner

Type: string

next-hop

Type: string

TABLE_nexthop

next-hop1

Type: string

Command Modes

- /exec

Chapter 16. P Show Commands

- show password secure-mode

- show password strength-check

- show pmap-int-br interface br

- show pmap-int

- show policy-map

- show policy-map interface control-plane

- show policy-map system

- show policy-map type control-plane

- show policy-map type network-qos

- show port-channel capacity

- show port-channel compatibility-parameters

- show port-channel database

- show port-channel load-balance

- show port-channel load-balance forwarding-path

- show port-channel rbh-distribution

- show port-channel summary

- show port-channel traffic

- show port-channel usage

- show port-security

- show port-security address

- show port-security address blocked

- show port-security address interface

- show port-security address nvram

- show port-security detail interface

- show port-security interface

- show port-security multivlan address

- show port-security secure address

- show port-security state

- show port-security traps enable

- show privilege

- show processes (launcher)

- show processes (process)

- show processes cpu

- show processes cpu history

- show processes cpu module

- show processes log

- show processes log details

- show processes log pid

- show processes log vdc-all

- show processes memory

- show processes memory clis

- show processes memory shared

- show processes vdc

- show processes vdc cpu

- show processes vdc log

- show processes vdc log details

- show processes vdc log pid

- show processes vdc memory

show password secure-mode

show password secure-mode

Syntax Description

show

Show running system information

password

Password for the user

secure-mode

secure mode for changing passwords

Command Modes

- /exec

show password strength-check

show password strength-check [ __readonly__ operation_status o_status ]

Syntax Description

show

Show running system information

password

Password for the user

strength-check

Strength check of password

__readonly__

operation_status

run-time information about password strength-check

o_status

operational status of password strength check

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show pmap-int-br interface br

show pmap-int-br interface br [ __readonly__ [ TABLE_ifvlanstr if-vlan-str if-status [in-pmap-qos] [out-pmap-qos] [in-pmap-que] [out-pmap-que] ] ]

Syntax Description

show

Show running system information

pmap-int-br

Show policy maps

interface

Show service policy on interface

br

Brief report of all policies attached to interfaces

TABLE_ifvlanstr

all interfaces xml sessions

if-vlan-str

Type: string

ifindex or vlan id: xml key

__readonly__

if-status

Type: uinteger

Interface/vlan status [active/inactive]: xml key

in-pmap-qos

Type: string

Input QoS Policy-map name: xml key

out-pmap-qos

Type: string

output QoS Policy-map name: xml key

in-pmap-que

Type: string

Input Que Policy-map name: xml key

out-pmap-que

Type: string

Output Que Policy-map name: xml key

Command Modes

- /exec

show pmap-int

show pmap-int { interface [iface-list] [ input | output ] [ type qos-or-q ] | vlan [vlan-list] [ inputx | outputx ] [ type qos ] } [ __readonly__ [stat-en-dis-enum] [ TABLE_ifvlanstr if-vlan-str [iface-str] [vlan-str] [ TABLE_pmap pmap-key pmap-inner-outer in-or-out yqos-or-q [options] pmap-name [stat-status-enum] [snmp-policy-index] [ TABLE_cmap cmap-key [xqos-or-q] match-opts cmap-name [ TABLE_slot slot-key [slot-num] [class-pkts] [class-bytes] [class-off-rate] ] [class-drop-rate] [agg-forward] [class-agg-pkts] [class-agg-bytes] [ TABLE_match match-key [not] [inner] [cos-list] [dscp-list] [precedence-list] [discard-class-list] [exp-list] [qos-group-list] [match-cmap-xqos-or-q] [match-cmap-opts] [match-cmap-name] [match-acl-name] [pkt-len-list] [rtp-port-list] [prot] [input-iface-list] [match-cl-def] [match-pkts] [match-bytes] [match-rate] ] [ TABLE_action action-key [set-inner] [cos] [dscp] [dscp-enum] [prec] [prec-enum] [disc-class] [qos-group] [mpls-experimental-topmost] [mpls-experimental-imposition] [tmap-from] [tmap-to] [tmap-name] [serv-pol-type] [serv-pol-name] [serv-pol-return-inout] [avg-rate-type] [rate-units] [shape-rate] [min-rate-type] [min-rate-units] [shape-min-rate] [max-rate-type] [max-rate-units] [shape-max-rate] [prio-level] [qlim-param-type] [qlim-param-val] [size-units] [qlim-size] [qlim-enum-spec] [rdet-agg] [rdet-mode] [ TABLE_rdet rdet-key [rdet-values] [rdet-min-thresh] [rdet-size-units] [rdet-max-thresh] [rdet-drop-prob] [rdet-weight] [rdet-ecn] [rdet-cap-average] [rdet-burst-opt] [rdet-mesh-opt] ] [bw-units] [bw-rate] [rem-bw-units] [rem-bw-rate] [agg-policer-name] [cir-spec] [bc-spec] [be-spec] [cir-rate-units] [cir] [bc-size-units] [bc] [pir-rate-units] [pir] [be-size-units] [be] [cnf-col-cmap] [exc-col-cmap] [ TABLE_police police-key [conformed-bytes] [conformed-rate] [cnf-act] [exceeded-bytes] [exceeded-rate] [exc-act] [violated-bytes] [violated-rate] [vio-act] [set-type] [enum-spec] [set-val] [ptmap-from] [ptmap-to] [ptmap-name] ] ] [que-dropped-pkts] [que-cur-q-depth-bytes] ] ] ] [display-all] ]

Syntax Description

show

Show running system information

pmap-int

Show policy maps

interface

Show service policy on interface

iface-list

Type: interface-mrange

List of Interface

vlan

802.1Q vlan

vlan-list

Type: integer-mrange

List of vlan ids

input

Input Service policy

output

Output Service policy

inputx

Input Service policy

outputx

Output Service policy

type

Type of policy

qos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

qos

Qos policy

__readonly__

TABLE_ifvlanstr

all interfaces xml sessions

if-vlan-str

Type: string

ifindex or vlan id: xml key

TABLE_pmap

all pmap xml sessions

pmap-key

Type: string

Policy-map name: xml key

TABLE_rdet

all WRED sessions

rdet-key

Type: long

Random-detect minimum threshold: xml key

TABLE_police

all police actions

police-key

Type: uinteger

police actions count: xml key

TABLE_cmap

all cmap xml sessions

cmap-key

Type: string

Class-map name: xml key

TABLE_action

all actions

action-key

Type: uinteger

Actions count: xml key

TABLE_match

all match xml sessions

match-key

Type: uinteger

match count: xml key

TABLE_slot

all slot xml sessions

slot-key

Type: uinteger

slot count: xml key

display-all

Type: integer

Display all kinds of class-maps

stat-en-dis-enum

enable  value: 1

Enable statistics for all policies
disable  value: 2

Disable statistics for all policies

iface-str

Type: string

Interface string

vlan-str

Type: string

Vlan string

in-or-out

input  value: 1

Input policy
output  value: 2

Output policy

yqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

options

Type: uinteger

min: 0  max: 1

match-first option

pmap-name

Type: string

Policy-map name

stat-status-enum

no-stats  value: 2

Disable statistics for this policy

snmp-policy-index

Type: uinteger

SNMP policy index

pmap-inner-outer

Type: uinteger

Inner or Outer policy-map

serv-pol-return-inout

Type: uinteger

Inner or Outer policy-map

cmap-name

Type: string

Class-map name

xqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

match-opts

Type: uinteger

min: 1  max: 2

Type of match in class-map

match-cmap-xqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

match-cmap-opts

Type: uinteger

min: 1  max: 2

Type of match in class-map

not

Type: uinteger

Negate this match result

inner

Type: uinteger

min: 0  max: 1

Specifies if tunnel or inner keywords are mentioned

dscp-list

Type: integer-mrange

List of DSCP values

precedence-list

Type: integer-mrange

List of precedence values

cos-list

Type: integer-mrange

List of class-of-service values

qos-group-list

Type: integer-mrange

List of qos-group values

discard-class-list

Type: integer-mrange

List of discard-class values

exp-list

Type: integer-mrange

List of MPLS exp values

match-cmap-name

Type: string

class-map name

match-acl-name

Type: string

Match class-map name

pkt-len-list

Type: integer-mrange

Packet length multi-range

rtp-port-list

Type: integer-mrange

IP RTP UDP port multi-range

prot

Type: integer

Protocol

input-iface-list

Type: interface-mrange

Input Interface multi-range

match-cl-def

Type: uinteger

Match any criteria for class-default only

class-pkts

Type: long

Number of packets matching a class

class-agg-pkts

Type: long

Number of packets matching a class

class-bytes

Type: long

Number of bytes matching a class

class-agg-bytes

Type: long

Number of bytes matching a class

class-off-rate

Type: long

5 minute offered rate for the class

class-drop-rate

Type: long

5 minute drop rate for the class

match-pkts

Type: long

Number of packets matching a particular match rule in a class

match-bytes

Type: long

Number of bytes matching a particular match rule in a class

match-rate

Type: long

5 minute rate for the particular match rule in a class

serv-pol-type

Type: uinteger

Type of service policy referred to

serv-pol-name

Type: string

Name of policy-map referred to within this policy-map

set-inner

Type: uinteger

min: 0  max: 1

Specifies if tunnel or inner keywords are mentioned

cos

Type: uinteger

min: 0  max: 7

IEEE 802.1Q Class of Service value

dscp

Type: uinteger

min: 0  max: 63

DSCP in IP(v4) and IPv6 packets

dscp-enum

af11  value: 10

AF11 dscp (001010)
af12  value: 12

AF12 dscp (001100)
af13  value: 14

AF13 dscp (001110)
af21  value: 18

AF21 dscp (010010)
af22  value: 20

AF22 dscp (010100)
af23  value: 22

AF23 dscp (010110)
af31  value: 26

AF31 dscp (011010)
af32  value: 28

AF32 dscp (011100)
af33  value: 30

AF33 dscp (011110)
af41  value: 34

AF41 dscp (100010)
af42  value: 36

AF42 dscp (100100)
af43  value: 38

AF43 dscp (100110)
cs1  value: 8

CS1(precedence 1) dscp (001000)
cs2  value: 16

CS2(precedence 2) dscp (010000)
cs3  value: 24

CS3(precedence 3) dscp (011000)
cs4  value: 32

CS4(precedence 4) dscp (100000)
cs5  value: 40

CS5(precedence 5) dscp (101000)
cs6  value: 48

CS6(precedence 6) dscp (110000)
cs7  value: 56

CS7(precedence 7) dscp (111000)
default  value: 0

default dscp (000000)
ef  value: 46

EF dscp (101110)

prec

Type: uinteger

min: 0  max: 7

Precedence in IP(v4) and IPv6 packets

prec-enum

routine  value: 0

Routine precedence (0)
priority  value: 1

Priority precedence (1)
immediate  value: 2

Immediate precedence (2)
flash  value: 3

Flash precedence (3)
flash-override  value: 4

Flash override precedence (4)
critical  value: 5

Critical precedence (5)
internet  value: 6

Internetwork control precedence (6)
network  value: 7

Network control precedence (7)

disc-class

Type: uinteger

min: 0  max: 63

Discard class

qos-group

Type: uinteger

min: 0  max: 99

Qos-group

mpls-experimental-topmost

Type: uinteger

min: 0  max: 7

MPLS Experimental Topmost

mpls-experimental-imposition

Type: uinteger

min: 0  max: 7

MPLS Experimental Imposition

tmap-from

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

tmap-to

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-imposition  value: 13

table map of mpls-imposition type (13)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

tmap-name

Type: string

Table map name

ptmap-from

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

ptmap-to

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-imposition  value: 13

table map of mpls-imposition type (13)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

ptmap-name

Type: string

Table map name

avg-rate-type

Type: uinteger

min: 0  max: 1

Specifies if average shape rate is specified

shape-rate

Type: long

Shape average rate

rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us

min-rate-type

Type: uinteger

min: 0  max: 1

Specifies if minimum shape rate is specified

shape-min-rate

Type: long

Shape minimum rate

min-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us

max-rate-type

Type: uinteger

min: 0  max: 1

Specifies if maximum shape rate is specified

shape-max-rate

Type: long

Shape maximum rate

max-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us

cir-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us, pps

pir-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us, pps

prio-level

Type: uinteger

Priority if specified

qlim-param-type

Type: uinteger

Type of parameter for qlim - cos/prec/dscp/disc class/qosgrp

qlim-param-val

Type: uinteger

Parameter value for qlimit

qlim-size

Type: uinteger

Queue size for qlimit

size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

rdet-size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

bc-size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

be-size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

qlim-enum-spec

Type: uinteger

Weather qlimit parameter is specified in enum or not

rdet-mode

Type: uinteger

Random-detect mode

rdet-agg

Type: uinteger

min: 0  max: 1

Are the params for aggregate flow

rdet-values

Type: integer-mrange

List of class-of-service values for random-detect

rdet-min-thresh

Type: long

Random-detect minimum threshold

rdet-max-thresh

Type: long

Random-detect maximum threshold

rdet-drop-prob

Type: uinteger

Random-detect drop probability

rdet-weight

Type: uinteger

Random-detect queue length weight

rdet-cap-average

Type: uinteger

Random-detect cap-average

rdet-ecn

Type: uinteger

Random-detect ECN

rdet-burst-opt

Type: uinteger

Random-detect burst optimized

rdet-mesh-opt

Type: uinteger

Random-detect mesh optimized

bw-units

Type: uinteger

Bandwidth units

bw-rate

Type: long

Bandwidth rate

rem-bw-units

Type: uinteger

Remaining bandwidth units

rem-bw-rate

Type: uinteger

Remaining bandwidth rate

agg-policer-name

Type: string

Aggregate policer name

cir-spec

Type: uinteger

min: 0  max: 1

Is CIR keyword specified

bc-spec

Type: uinteger

min: 0  max: 1

Is Committed Burst keyword specified

be-spec

Type: uinteger

min: 0  max: 1

Is Extended Burst keyword specified

cir

Type: long

Committed Information Rate

bc

Type: long

Committed Burst Size

pir

Type: long

Peak Information Rate

be

Type: long

Extended Burst Size

cnf-col-cmap

Type: string

Conforming color class-map name

exc-col-cmap

Type: string

Exceeding color class-map name

enum-spec

Type: uinteger

min: 0  max: 1

Is DSCP or PREC enum value specified

cnf-act

Type: uinteger

Conform action (Police)

exc-act

Type: uinteger

Exceed action (Police)

vio-act

Type: uinteger

Violate action (Police)

set-type

Type: uinteger

Type of set in police action

set-val

Type: uinteger

Value of set type in police action

conformed-bytes

Type: long

Conformed byte count

exceeded-bytes

Type: long

Exceeded byte count

violated-bytes

Type: long

Violated byte count

conformed-rate

Type: long

Conformed bit rate

exceeded-rate

Type: long

Exceeded bit rate

violated-rate

Type: long

Violated byte count

que-dropped-pkts

Type: long

Queue Dropped Packets

que-cur-q-depth-bytes

Type: long

Current Queue Depth

agg-forward

Type: uinteger

prints out aggregate forward

slot-num

Type: uinteger

the slot number

Command Modes

- /exec

show policy-map

show policy-map [ [ type qos ] [pmap-name-qos] | type queuing [pmap-name-que] ] [ __readonly__ [display-all] [ TABLE_pmap pmap-key [type-spec] [yqos-or-q] [options] pmap-name-out [desc] [ TABLE_cmap cmap-key [type-cmap-spec] [xqos-or-q] [cmap-name] [ TABLE_action action-key [serv-pol-type] [serv-pol-name] [inner] [cos] [exp-val-imposition] [exp-val-topmost] [dscp-enum] [dscp] [prec-enum] [prec] [disc-class] [qos-group] [tmap-from] [tmap-to] [tmap-name] [avg-rate-type] [rate-units] [shape-rate] [min-rate-type] [min-rate-units] [shape-min-rate] [max-rate-type] [max-rate-units] [shape-max-rate] [prio-level] [qlim-param-type] [qlim-param-val] [ooo] [size-units] [qlim-size] [qlim-enum-spec] [rdet-agg] [rdet-mode] [ TABLE_rdet rdet-key [rdet-values] [rdet-min-thresh] [rdet-size-units] [rdet-max-thresh] [rdet-drop-prob] [rdet-weight] [rdet-cap-average] [rdet-ecn] [rdet-burst-opt] [rdet-mesh-opt] ] [bw-units] [bw-rate] [rem-bw-units] [rem-bw-rate] [agg-policer-name] [cir-spec] [bc-spec] [be-spec] [cir-rate-units] [cir] [bc-size-units] [bc] [pir-rate-units] [pir] [be-size-units] [be] [cnf-col-cmap] [exc-col-cmap] [ TABLE_police police-key [cnf-act] [exc-act] [vio-act] [set-type] [enum-spec] [set-val] [ptmap-from] [ptmap-to] [ptmap-name] ] ] ] ] ]

Syntax Description

show

Show running system information

policy-map

Show policy maps

type

Type of the policy-map

qos

type qos

queuing

type queuing

pmap-name-qos

Type: string

antipattern: type | typ | ty | t

length: 40

policy map name (type qos)

pmap-name-que

Type: string

antipattern: type | typ | ty | t

length: 40

policy map name (type queuing)

__readonly__

display-all

Type: integer

Display all kinds of class-maps

TABLE_pmap

all pmap xml sessions

pmap-key

Type: string

Policy-map name: xml key

TABLE_rdet

all WRED sessions

rdet-key

Type: long

Random-detect minimum threshold: xml key

TABLE_police

all police actions

police-key

Type: uinteger

police actions count: xml key

TABLE_cmap

all cmap xml sessions

cmap-key

Type: string

Class-map name: xml key

TABLE_action

all actions

action-key

Type: uinteger

Actions count: xml key

yqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

options

Type: uinteger

min: 0  max: 1

match-first option

pmap-name-out

Type: string

Policy-map name

desc

Type: string

length: 200

Description string

cmap-name

Type: string

Class-map name

xqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

serv-pol-type

Type: uinteger

Type of service policy referred to

serv-pol-name

Type: string

Name of policy-map referred to within this policy-map

type-spec

Type: uinteger

min: 0  max: 1

Type of policy-map specified or not

type-cmap-spec

Type: uinteger

min: 0  max: 1

Type of class-map specified or not

inner

Type: uinteger

min: 0  max: 1

Specifies if tunnel or inner keywords are mentioned

cos

Type: uinteger

min: 0  max: 7

IEEE 802.1Q Class of Service value

exp-val-imposition

Type: uinteger

min: 0  max: 7

MPLS EXP value of type imposition

exp-val-topmost

Type: uinteger

min: 0  max: 7

MPLS EXP calue of type topmost

dscp

Type: uinteger

min: 0  max: 63

DSCP in IP(v4) and IPv6 packets

dscp-enum

af11  value: 10

AF11 dscp (001010)
af12  value: 12

AF12 dscp (001100)
af13  value: 14

AF13 dscp (001110)
af21  value: 18

AF21 dscp (010010)
af22  value: 20

AF22 dscp (010100)
af23  value: 22

AF23 dscp (010110)
af31  value: 26

AF31 dscp (011010)
af32  value: 28

AF32 dscp (011100)
af33  value: 30

AF33 dscp (011110)
af41  value: 34

AF41 dscp (100010)
af42  value: 36

AF42 dscp (100100)
af43  value: 38

AF43 dscp (100110)
cs1  value: 8

CS1(precedence 1) dscp (001000)
cs2  value: 16

CS2(precedence 2) dscp (010000)
cs3  value: 24

CS3(precedence 3) dscp (011000)
cs4  value: 32

CS4(precedence 4) dscp (100000)
cs5  value: 40

CS5(precedence 5) dscp (101000)
cs6  value: 48

CS6(precedence 6) dscp (110000)
cs7  value: 56

CS7(precedence 7) dscp (111000)
default  value: 0

default dscp (000000)
ef  value: 46

EF dscp (101110)

prec

Type: uinteger

min: 0  max: 7

Precedence in IP(v4) and IPv6 packets

prec-enum

routine  value: 0

Routine precedence (0)
priority  value: 1

Priority precedence (1)
immediate  value: 2

Immediate precedence (2)
flash  value: 3

Flash precedence (3)
flash-override  value: 4

Flash override precedence (4)
critical  value: 5

Critical precedence (5)
internet  value: 6

Internetwork control precedence (6)
network  value: 7

Network control precedence (7)

disc-class

Type: uinteger

min: 0  max: 63

Discard class

qos-group

Type: uinteger

min: 0  max: 3

Qos-group

tmap-from

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

tmap-to

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-imposition  value: 13

table map of mpls-imposition type (13)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

tmap-name

Type: string

Table map name

ptmap-from

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

ptmap-to

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)
uf-cos  value: 6

table map of unified-fabric cos type (6)
fc-up  value: 7

table map of fc-up type (7)
mpls-imposition  value: 13

table map of mpls-imposition type (13)
mpls-topmost  value: 14

table map of mpls-topmost type (14)

ptmap-name

Type: string

Table map name

avg-rate-type

Type: uinteger

min: 0  max: 1

Specifies if average shape rate is specified

shape-rate

Type: long

Shape average rate

rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us

min-rate-type

Type: uinteger

min: 0  max: 1

Specifies if minimum shape rate is specified

shape-min-rate

Type: long

Shape minimum rate

min-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us

max-rate-type

Type: uinteger

min: 0  max: 1

Specifies if maximum shape rate is specified

shape-max-rate

Type: long

Shape maximum rate

max-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us

cir-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us, pps

pir-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us, pps

prio-level

Type: uinteger

Priority if specified

qlim-param-type

Type: uinteger

Type of parameter for qlim - cos/prec/dscp/disc class/qosgrp

qlim-param-val

Type: uinteger

Parameter value for qlimit

qlim-size

Type: uinteger

Queue size for qlimit

size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

rdet-size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

bc-size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

be-size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

qlim-enum-spec

Type: uinteger

Weather qlimit parameter is specified in enum or not

rdet-mode

Type: uinteger

Random-detect mode

rdet-agg

Type: uinteger

min: 0  max: 1

Are the params for aggregate flow

rdet-values

Type: integer-mrange

List of class-of-service values for random-detect

rdet-min-thresh

Type: long

Random-detect minimum threshold

rdet-max-thresh

Type: long

Random-detect maximum threshold

rdet-drop-prob

Type: uinteger

Random-detect drop probability

rdet-weight

Type: uinteger

Random-detect queue length weight

rdet-cap-average

Type: uinteger

Random-detect cap-average

rdet-ecn

Type: uinteger

Random-detect ECN

rdet-burst-opt

Type: uinteger

Random-detect burst optimized

rdet-mesh-opt

Type: uinteger

Random-detect mesh optimized

bw-units

Type: uinteger

Bandwidth units

bw-rate

Type: long

Bandwidth rate

rem-bw-units

Type: uinteger

Remaining bandwidth units

rem-bw-rate

Type: long

Remaining bandwidth rate

agg-policer-name

Type: string

Aggregate policer name

cir-spec

Type: uinteger

min: 0  max: 1

Is CIR keyword specified

bc-spec

Type: uinteger

min: 0  max: 1

Is Committed Burst keyword specified

be-spec

Type: uinteger

min: 0  max: 1

Is Extended Burst keyword specified

cir

Type: long

Committed Information Rate

bc

Type: long

Committed Burst Size

pir

Type: long

Peak Information Rate

be

Type: long

Extended Burst Size

cnf-col-cmap

Type: string

Conforming color class-map name

exc-col-cmap

Type: string

Exceeding color class-map name

enum-spec

Type: uinteger

min: 0  max: 1

Is DSCP or PREC enum value specified

cnf-act

Type: uinteger

Conform action (Police)

exc-act

Type: uinteger

Exceed action (Police)

vio-act

Type: uinteger

Violate action (Police)

set-type

Type: uinteger

Type of set in police action

set-val

Type: uinteger

Value of set type in police action

ooo

Type: uinteger

Out-of-Order

Command Modes

- /exec

show policy-map interface control-plane

show policy-map interface control-plane { [ module slot-no-in [ class cmap-name ] ] | [ class cmap-name [ module slot-no-in ] ] } [ __readonly__ [scale-factor-cmd] pmap-name [ TABLE_cmap cmap-key cmap-name-out opt_any_or_all [ TABLE_match match-key [ access_grp acc_grp_name ] [ redirect opt_match_redirect ] [ exception opt_match_excpt ] [ protocol opt_match_protocol ] + ] [ class-off-rate class-drop-rate class-pkts class-bytes ] [ [set_vld_flg] { cos [inner] cos-val | dscp [tunnel] dscp-val | precedence [tunnel1] prec-val } ] [ threshold level ] [ [policer_show_flags] [ cir opt_kbps_mbps_gbps_pps_cir ] [ percent cir-perc ] [ bc opt_kbytes_mbytes_gbytes_bc ] [ pir opt_kbps_mbps_gbps_pps_pir ] [ percent1 pir-perc ] [ be opt_kbytes_mbytes_gbytes_be ] ] [ TABLE_slot slot-no-out [ [conform-pkts] conform-bytes ] [ opt_drop_transmit_conform | set-cos-transmit set-cos-val | set-dscp-transmit set-dscp-val | set-prec-transmit set-prec-val ] [ [ [exceed-pkts] exceed-bytes ] { opt_drop_transmit_exceed | set dscp1 dscp2 table cir-markdown-map } ] [ [violate-pkts] violate-bytes ] { opt_drop_transmit_violate | set1 dscp3 dscp4 table1 pir-markdown-map } ] ] ]

Syntax Description

show

Show running system information

policy-map

Show policy maps

interface

Show service policy on interface

control-plane

command is for copp policy

module

module number for statistics

class

class-name name

cmap-name

Type: string

Name of the class-map

pmap-name

Type: string

Name of the Policy-map

__readonly__

scale-factor-cmd

Type: string

Scale factor command

TABLE_cmap

all cmap xml sessions

cmap-key

Type: string

Class-map key : XML output

cmap-name-out

Type: string

Name of the output class-map

opt_any_or_all

Enter match-any or match-all

match-any  value: 1

Logical-OR all match statements under this classmap
match-all  value: 2

Logical-AND all match statements under this classmap

TABLE_match

all match xml sessions

match-key

Type: uinteger

Match key : XML output

access_grp

acc_grp_name

Type: string

redirect

opt_match_redirect

Match criteria for redirected packets

dhcp-snoop  value: 3

Match redirected packets for dhcp
arp-inspect  value: 6

Match redirected packets for arp-inspect

exception

opt_match_excpt

Match criteria for exception packets

ip-option  value: 1

Match exception packets for ip-options
ip-icmp-redirect  value: 2

Match exception packets for ip-icmp-redirect
ip-icmp-unreachable  value: 3

Match exception packets for ip-icmp-unreachable
urpf-failure  value: 4

Match exception packets for urpf-failure
second-mrpf-failure  value: 5

Match exception packets for second-mrpf-failure
ttl-failure  value: 6

Match exception packets for ttl-failure
glean  value: 7

Match exception packets for glean
ipv6-option  value: 8

Match exception packets for ipv6-options
ipv6-icmp-redirect  value: 9

Match exception packets for ipv6-icmp-redirect
ipv6-icmp-unreachable  value: 10

Match exception packets for ipv6-icmp-unreachable
mtu-failure  value: 11

Match exception packets for mtu-failure
multicast-rpf-failure  value: 12

Match exception packets for multicast rpf-failure
multicast-directly-connected-sources  value: 13

Match exception packets for multicast directly-connected-sources
ip-municast  value: 14

Match exception packets for ip-municast
ipv6-municast  value: 15

Match exception packets for ipv6-municast
fcoe-fib-miss  value: 16

Match Exception Packets for FCoE FIB Miss
multicast-dest-miss  value: 17

Match Exception Packets for IP Multicast Destination Lookup Miss
multicast-sg-rpf-failure  value: 18

Match exception packets for multicast sg rpf check failure

protocol

opt_match_protocol

Match criteria for protocol packets

arp  value: 1

IP ARP
mpls  value: 13

Multi-protocol Label Switching
otv  value: 17

OTV Overlay IS-IS frames
mpls_exp6  value: 18

MPLS Exp 6

class-pkts

Type: long

Number of packets matching a class

class-bytes

Type: long

Number of bytes matching a class

class-off-rate

Type: long

5 minute offered rate for the class

class-drop-rate

Type: long

5 minute drop rate for the class

set_vld_flg

Type: uinteger

Set valid flag

cos

inner

cos-val

Type: uinteger

Set cos val

dscp

tunnel

dscp-val

Type: uinteger

Set dscp val

precedence

tunnel1

prec-val

Type: uinteger

Set prec val

policer_show_flags

Type: uinteger

Policer show flags

threshold

Type: long

threshold count in bytes

level

Type: integer

syslog severity level

cir

Type: long

Committed Information Rate in bps/kbps/mbps/gbps

opt_kbps_mbps_gbps_pps_cir

Units

pps  value: 8

Packets per second

percent

cir-perc

Type: long

Percent specification for cir

pir

Type: long

Peak Information rate in bps/kbps/mbps/gbps

opt_kbps_mbps_gbps_pps_pir

Units

bps  value: 1

Bits per second
kbps  value: 2

Kilo Bits per second
mbps  value: 3

Mega Bits per second
gbps  value: 4

Giga Bits per second
pps  value: 8

Packets per second

percent1

pir-perc

Type: long

Percent specification for pir

bc

Type: long

Committed Information size in bytes/kbytes/mbytes/packets/ms/us

opt_kbytes_mbytes_gbytes_bc

Units

packets  value: 8

Packets

be

Type: long

Peak Information size in bytes/kbytes/mbytes/packets/ms/us

opt_kbytes_mbytes_gbytes_be

Units

bytes  value: 1

Bytes
kbytes  value: 2

Kilo Bytes
mbytes  value: 3

Mega Bytes
packets  value: 8

Packets
ms  value: 5

Milli seconds
us  value: 6

Micro seconds

TABLE_slot

all slot-num : XML output

slot-no-in

Type: uinteger

min: 1  max: 30

input slot no

slot-no-out

Type: uinteger

output slot no

conform-pkts

Type: long

conform-bytes

Type: long

exceed-pkts

Type: long

exceed-bytes

Type: long

violate-pkts

Type: long

violate-bytes

Type: long

opt_drop_transmit_conform

Set the action

transmit  value: 1

Transmit the packet

set-cos-transmit

set-cos-val

Type: uinteger

Conform action cos val

set-dscp-transmit

set-dscp-val

Type: uinteger

Conform action dscp val

set-prec-transmit

set-prec-val

Type: uinteger

Conform action prec val

opt_drop_transmit_exceed

Set the action

drop  value: 2

Drop the packet
transmit  value: 1

Transmit the packet

set

dscp1

dscp2

table

cir-markdown-map

opt_drop_transmit_violate

Set the action

drop  value: 2

Drop the packet

set1

dscp3

dscp4

table1

pir-markdown-map

Command Modes

- /exec

show policy-map system

show policy-map system [ type { network-qos | queuing [ input | output ] } ] [ __readonly__ display-all desc xpmap-name xcmap-name cos-list qos-group-list protocol pause timeout size-in-bytes xoff-bytes xon-bytes pfc-cos-list cc thresh-units min-thresh max-thresh drop-prob iod mtu [stat-en-dis-enum] [ TABLE_pmap pmap-key pmap-inner-outer in-or-out yqos-or-q [options] pmap-name [stat-status-enum] [ TABLE_cmap cmap-key [xqos-or-q] match-opts cmap-name [ TABLE_match match-key [not] [inner] [cos-list] [match-cmap-xqos-or-q] [match-cmap-opts] [match-cmap-name] ] [ TABLE_action action-key [set-inner] [cos] [serv-pol-type] [serv-pol-name] [serv-pol-return-inout] [prio-level] [qlim-param-type] [qlim-param-val] [size-units] [qlim-size] [qlim-enum-spec] [bw-units] [bw-rate] [rem-bw-units] [rem-bw-rate] ] ] ] ]

Syntax Description

show

Show running system information

policy-map

Show policy maps

type

Type of the policy-map

system

Active policy in the system

network-qos

type network-qos

queuing

type queuing

input

input policy

output

output policy

__readonly__

display-all

Type: integer

Display all network-qos policy-maps

xpmap-name

Type: string

Policy-map name

desc

Type: string

length: 200

Description string

xcmap-name

Type: string

Class-map name

min-thresh

Type: long

Minimum Threshold value

max-thresh

Type: long

Maximum Threshold value

thresh-units

Type: uinteger

Units of threshold - pkts/bytes/kbytes/mbytes/ms/us/perc

drop-prob

Type: uinteger

Drop Probability at Maximum Threshold value

pause

Type: uinteger

Pause value

size-in-bytes

Type: long

Ingress buffer for the no-drop class in bytes

xoff-bytes

Type: long

buffer limit at which the port pauses the peer

xon-bytes

Type: long

buffer limit at which the port resumes the peer

pfc-cos-list

Type: integer-mrange

List of class-of-service values

timeout

Type: uinteger

timeout value

cc

Type: uinteger

congestion control protocol

iod

Type: uinteger

IOD value

mtu

Type: uinteger

MTU value

protocol

Type: integer

protocol

cos-list

Type: integer-mrange

List of class-of-service values

qos-group-list

Type: integer-mrange

List of qos-group values

TABLE_pmap

all pmap xml sessions

pmap-key

Type: string

Policy-map name: xml key

TABLE_cmap

all cmap xml sessions

cmap-key

Type: string

Class-map name: xml key

TABLE_action

all actions

action-key

Type: uinteger

Actions count: xml key

TABLE_match

all match xml sessions

match-key

Type: uinteger

match count: xml key

stat-en-dis-enum

enable  value: 1

Enable statistics for all policies
disable  value: 2

Disable statistics for all policies

in-or-out

input  value: 1

Input policy
output  value: 2

Output policy

yqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

stat-status-enum

no-stats  value: 2

Disable statistics for this policy

options

Type: uinteger

min: 0  max: 1

match-first option

pmap-name

Type: string

Policy-map name

pmap-inner-outer

Type: uinteger

Inner or Outer policy-map

serv-pol-return-inout

Type: uinteger

Inner or Outer policy-map

cmap-name

Type: string

Class-map name

xqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

match-opts

Type: uinteger

min: 1  max: 2

Type of match in class-map

match-cmap-xqos-or-q

qos  value: 1

qos policy
queuing  value: 2

queuing policy

match-cmap-opts

Type: uinteger

min: 1  max: 2

Type of match in class-map

not

Type: uinteger

Negate this match result

inner

Type: uinteger

min: 0  max: 1

Specifies if tunnel or inner keywords are mentioned

cos-list

Type: integer-mrange

List of class-of-service values

match-cmap-name

Type: string

class-map name

serv-pol-type

Type: uinteger

Type of service policy referred to

serv-pol-name

Type: string

Name of policy-map referred to within this policy-map

set-inner

Type: uinteger

min: 0  max: 1

Specifies if tunnel or inner keywords are mentioned

cos

Type: uinteger

min: 0  max: 7

IEEE 802.1Q Class of Service value

prio-level

Type: uinteger

Priority if specified

qlim-param-type

Type: uinteger

Type of parameter for qlim - cos/prec/dscp/disc class/qosgrp

qlim-param-val

Type: uinteger

Parameter value for qlimit

qlim-size

Type: uinteger

Queue size for qlimit

size-units

Type: uinteger

Units of queue size - pkts/bytes/kbytes/mbytes/ms/us/perc

qlim-enum-spec

Type: uinteger

Weather qlimit parameter is specified in enum or not

bw-units

Type: uinteger

Bandwidth units

bw-rate

Type: long

Bandwidth rate

rem-bw-units

Type: uinteger

Remaining bandwidth units

rem-bw-rate

Type: uinteger

Remaining bandwidth rate

Command Modes

- /exec

show policy-map type control-plane

show policy-map type control-plane [expand] [ name pmap-name ] [ __readonly__ [ TABLE_pmap pmap-name1 [ TABLE_cmap cmap-name [opt_any_or_all] [ TABLE_match match_key { [ access_grp acc_grp_name ] | [ redirect opt_match_redirect ] | [ exception opt_match_excpt ] | [ protocol opt_match_protocol ] } ] [ TABLE_set_action set_vld_flg { cos [inner] cos-val | dscp [tunnel] dscp-val | precedence [tunnel1] prec-val } ] [ threshold level ] [ [policer_show_flags] [ cir opt_kbps_mbps_gbps_pps_cir ] [ percent cir-perc ] [ pir opt_kbps_mbps_gbps_pps_pir ] [ percent1 pir-perc ] [ bc opt_kbytes_mbytes_gbytes_bc ] [ be opt_kbytes_mbytes_gbytes_be ] [ opt_drop_transmit_conform | set-cos-transmit set-cos-val | set-dscp-transmit set-dscp-val | set-prec-transmit set-prec-val ] [ opt_drop_transmit_exceed | set dscp1 dscp2 table cir-markdown-map ] [ opt_drop_transmit_violate | set1 dscp3 dscp4 table1 pir-markdown-map ] ] ] ] ]

Syntax Description

show

Show running system information

policy-map

Show policy maps

type

Type of the policy-map

control-plane

command is for copp policy

expand

Display the match-criterias along with class-map

name

policy-map name

pmap-name

Type: string

Name of the Policy-map

__readonly__

TABLE_pmap

Table of policy-map

pmap-name1

Type: string

Name of the Policy-map

TABLE_cmap

Table of class-map

cmap-name

Type: string

Name of the class-map

opt_any_or_all

Enter match-any or match-all

match-any  value: 1

Logical-OR all match statements under this classmap
match-all  value: 2

Logical-AND all match statements under this classmap

TABLE_match

Table of match statement

match_key

Type: uinteger

Match key : XML output

access_grp

acc_grp_name

Type: string

redirect

opt_match_redirect

Match criteria for redirected packets

dhcp-snoop  value: 3

Match redirected packets for dhcp
arp-inspect  value: 6

Match redirected packets for arp-inspect

exception

opt_match_excpt

Match criteria for exception packets

ip-option  value: 1

Match exception packets for ip-options
ip-icmp-redirect  value: 2

Match exception packets for ip-icmp-redirect
ip-icmp-unreachable  value: 3

Match exception packets for ip-icmp-unreachable
urpf-failure  value: 4

Match exception packets for urpf-failure
second-mrpf-failure  value: 5

Match exception packets for second-mrpf-failure
ttl-failure  value: 6

Match exception packets for ttl-failure
glean  value: 7

Match exception packets for glean
ipv6-option  value: 8

Match exception packets for ipv6-options
ipv6-icmp-redirect  value: 9

Match exception packets for ipv6-icmp-redirect
ipv6-icmp-unreachable  value: 10

Match exception packets for ipv6-icmp-unreachable
mtu-failure  value: 11

Match exception packets for mtu-failure
multicast-rpf-failure  value: 12

Match exception packets for multicast rpf-failure
multicast-directly-connected-sources  value: 13

Match exception packets for multicast directly-connected-sources
ip-municast  value: 14

Match exception packets for ip-municast
ipv6-municast  value: 15

Match exception packets for ipv6-municast
fcoe-fib-miss  value: 16

Match Exception Packets for FCoE FIB Miss
multicast-dest-miss  value: 17

Match Exception Packets for IP Multicast Destination Lookup Miss
multicast-sg-rpf-failure  value: 18

Match exception packets for multicast sg rpf check failure

protocol

opt_match_protocol

Match criteria for protocol packets

arp  value: 1

IP ARP
mpls  value: 13

Multi-protocol Label Switching
otv  value: 17

OTV Overlay IS-IS frames
mpls_exp6  value: 18

MPLS Exp 6

TABLE_set_action

Table of set action

set_vld_flg

Type: uinteger

Set valid flag

threshold

Type: long

threshold count in bytes

level

Type: integer

min: 1  max: 7

syslog severity level

cir

Type: long

Committed Information Rate in bps/kbps/mbps/gbps

opt_kbps_mbps_gbps_pps_cir

Units

pps  value: 8

Packets per second

percent

cir-perc

Type: long

Percent specification for cir

pir

Type: long

Peak Information Rate in bps/kbps/mbps/gbps

opt_kbps_mbps_gbps_pps_pir

Units

bps  value: 1

Bits per second
kbps  value: 2

Kilo Bits per second
mbps  value: 3

Mega Bits per second
gbps  value: 4

Giga Bits per second
pps  value: 8

Packets per second

percent1

pir-perc

Type: long

Percent specification for pir

bc

Type: long

Committed Information size in bytes/kbytes/mbytes/packets/ms/us

opt_kbytes_mbytes_gbytes_bc

Units

packets  value: 8

Packets

be

Type: long

Peak Information size in bytes/kbytes/mbytes/packets/ms/us

opt_kbytes_mbytes_gbytes_be

Units

bytes  value: 1

Bytes
kbytes  value: 2

Kilo Bytes
mbytes  value: 3

Mega Bytes
packets  value: 8

Packets
ms  value: 5

Milli seconds
us  value: 6

Micro seconds

opt_drop_transmit_conform

Set the action

transmit  value: 1

Transmit the packet

set-cos-transmit

set-cos-val

Type: uinteger

Conform action cos val

set-dscp-transmit

set-dscp-val

Type: uinteger

Conform action dscp val

set-prec-transmit

set-prec-val

Type: uinteger

Conform action prec val

opt_drop_transmit_exceed

Set the action

drop  value: 2

Drop the packet
transmit  value: 1

Transmit the packet

set

dscp1

dscp2

table

cir-markdown-map

opt_drop_transmit_violate

Set the action

drop  value: 2

Drop the packet

set1

dscp3

dscp4

table1

pir-markdown-map

cos

inner

cos-val

Type: uinteger

Set cos val

dscp

tunnel

dscp-val

Type: uinteger

Set dscp val

precedence

tunnel1

prec-val

Type: uinteger

Set prec val

policer_show_flags

Type: uinteger

Policer show flags

Command Modes

- /exec

show policy-map type network-qos

show policy-map type network-qos [pmap-name-nq] [ __readonly__ display-all desc xpmap-name xcmap-name pause timeout size-in-bytes xoff-bytes xon-bytes pfc-cos-list cc thresh-units min-thresh max-thresh drop-prob iod mtu ]

Syntax Description

show

Show running system information

policy-map

Show policy maps

type

Type of the policy-map

pmap-name-nq

Type: string

antipattern: type | typ | ty | t

length: 40

Policy-map name

network-qos

type network-qos

__readonly__

display-all

Type: integer

Display all network-qos policy-maps

xpmap-name

Type: string

Policy-map name

desc

Type: string

length: 200

Description string

xcmap-name

Type: string

Class-map name

pause

Type: uinteger

Pause value

timeout

Type: uinteger

timeout value

size-in-bytes

Type: long

Ingress buffer for the no-drop class in bytes

xoff-bytes

Type: long

buffer limit at which the port pauses the peer

xon-bytes

Type: long

buffer limit at which the port resumes the peer

pfc-cos-list

Type: integer-mrange

List of class-of-service values

cc

Type: uinteger

congestion control protocol

min-thresh

Type: long

Minimum Threshold value

max-thresh

Type: long

Maximum Threshold value

thresh-units

Type: uinteger

Units of threshold - pkts/bytes/kbytes/mbytes/ms/us/perc

drop-prob

Type: uinteger

Drop Probability at Maximum Threshold value

iod

Type: uinteger

IOD value

mtu

Type: uinteger

MTU value

Command Modes

- /exec

show port-channel capacity

show port-channel capacity [ __readonly__ total used free percentage_used ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

capacity

Capacity information Not available in this release.

__readonly__

total

Type: integer

Total resource

used

Type: integer

Used resource

free

Type: integer

Free resource

percentage_used

Type: integer

Used resource in percentage

Command Modes

- /exec

show port-channel compatibility-parameters

show port-channel compatibility-parameters [ __readonly__ parameter description + ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

compatibility-parameters

Show compatibility parameters

__readonly__

parameter

Type: string

Compatibity parameter

description

Type: string

Parameter description

Command Modes

- /exec

show port-channel database

show port-channel database [ interface if0 ] [ __readonly__ TABLE_interface interface last-membership-update total-ports total-up-ports [first_operational-port] age-of-channel [time-since-last-bundle] [last-bundled-member] [time-since-last-unbundle] [last-unbundled-member] [ TABLE_member port mode port-status ] [protocol] ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

database

Show port-channel database

interface

Specify a port-channel

if0

Type: interface-mrange

__readonly__

TABLE_interface

Port-channel table

interface

Type: interface

Port channel

mode

channel-group mode

on  value: 2

Channel mode is on
active  value: 5

Admin channel mode is active
passive  value: 6

Admin channel mode is passive

last-membership-update

Last membership update

successful  value: 1

Membership update succeeded
unsuccessful  value: 2

Membership update failed

total-ports

Type: integer

Total number of member ports

total-up-ports

Type: integer

Total number of UP member ports

first_operational-port

Type: interface

First operational port

TABLE_member

Member ports info

port

Type: interface

Member port

port-status

Member port status

up  value: 1

Port is up
down  value: 2

Port is down
hot-standy  value: 6

Hot standby port
suspended  value: 5

Suspended port
individual  value: 3

Indivial link
module-removed  value: 7

Module removed

age-of-channel

Type: string

Age of port channel

time-since-last-bundle

Type: string

Time since last port bundled

last-bundled-member

Type: interface

Last bundled member port

time-since-last-unbundle

Type: string

Time since last port un-bundled

last-unbundled-member

Type: interface

Last unbundled member port

protocol

Port channel protocol

lacp  value: 1

LACP

Command Modes

- /exec

show port-channel load-balance

show port-channel load-balance { [ module module ] | fex { fex-range | all } } [ __readonly__ sys-cfg module-cfg + non-ip-val ipv4-val ipv6-val ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

load-balance

Show port-channel load balance

module

slot

module

Type: integer

Specify a module number

fex

FEX devices Not available in this release.

fex-range

Type: integer

min: 100  max: 199

FEX device range

all

Display all configured FEX port-channel LB

__readonly__

sys-cfg

system wide load balance configuraton

destination-mac  value: 1

Destination MAC address
source-mac  value: 2

Source MAC address
source-dest-mac  value: 3

Source & Destination MAC address
destination-ip-vlan  value: 4

Destination IP address and VLAN
destination-ip-gre  value: 17

Destination IP GRE key
source-ip-vlan  value: 5

Source IP address and VLAN
source-ip-gre  value: 16

Source IP GRE key
source-dest-ip-vlan  value: 6

Source & Destination IP address and VLAN
destination-port  value: 7

Destination L4 port
source-port  value: 8

Source L4 port
source-dest-port  value: 9

Source & Destination L4 port
dest-ip-port  value: 10

Destination IP address and L4 port
source-ip-port  value: 11

Source IP address and L4 port
source-dest-ip-port  value: 12

Source & Destination IP address and L4 port
dest-ip-port-vlan  value: 13

Destination IP address, L4 port and VLAN
source-ip-port-vlan  value: 14

Source IP address, L4 port and VLAN
source-dest-ip-port-vlan  value: 15

Source & Destination IP address, L4 port and VLAN
source-dest-ip-gre  value: 18

Source & Destination IP GRE key

module-cfg

per module load balance configuraton

destination-mac  value: 1

Destination MAC address
source-mac  value: 2

Source MAC address
source-dest-mac  value: 3

Source & Destination MAC address
destination-ip-vlan  value: 4

Destination IP address and VLAN
destination-ip-gre  value: 17

Destination IP GRE key
source-ip-vlan  value: 5

Source IP address and VLAN
source-ip-gre  value: 16

Source IP GRE key
source-dest-ip-vlan  value: 6

Source & Destination IP address and VLAN
destination-port  value: 7

Destination L4 port
source-port  value: 8

Source L4 port
source-dest-port  value: 9

Source & Destination L4 port
dest-ip-port  value: 10

Destination IP address and L4 port
source-ip-port  value: 11

Source IP address and L4 port
source-dest-ip-port  value: 12

Source & Destination IP address and L4 port
dest-ip-port-vlan  value: 13

Destination IP address, L4 port and VLAN
source-ip-port-vlan  value: 14

Source IP address, L4 port and VLAN
source-dest-ip-port-vlan  value: 15

Source & Destination IP address, L4 port and VLAN
source-dest-ip-gre  value: 18

Source & Destination IP GRE key

non-ip-val

load balance setting for non-ip traffic

destination-mac  value: 1

Destination MAC address
source-mac  value: 2

Source MAC address
source-dest-mac  value: 3

Source & Destination MAC address
destination-ip-vlan  value: 4

Destination IP address and VLAN
destination-ip-gre  value: 17

Destination IP GRE key
source-ip-vlan  value: 5

Source IP address and VLAN
source-ip-gre  value: 16

Source IP GRE key
source-dest-ip-vlan  value: 6

Source & Destination IP address and VLAN
destination-port  value: 7

Destination L4 port
source-port  value: 8

Source L4 port
source-dest-port  value: 9

Source & Destination L4 port
dest-ip-port  value: 10

Destination IP address and L4 port
source-ip-port  value: 11

Source IP address and L4 port
source-dest-ip-port  value: 12

Source & Destination IP address and L4 port
dest-ip-port-vlan  value: 13

Destination IP address, L4 port and VLAN
source-ip-port-vlan  value: 14

Source IP address, L4 port and VLAN
source-dest-ip-port-vlan  value: 15

Source & Destination IP address, L4 port and VLAN
source-dest-ip-gre  value: 18

Source & Destination IP GRE key

ipv4-val

load balance setting for ipv4 traffic

destination-mac  value: 1

Destination MAC address
source-mac  value: 2

Source MAC address
source-dest-mac  value: 3

Source & Destination MAC address
destination-ip-vlan  value: 4

Destination IP address and VLAN
destination-ip-gre  value: 17

Destination IP GRE key
source-ip-vlan  value: 5

Source IP address and VLAN
source-ip-gre  value: 16

Source IP GRE key
source-dest-ip-vlan  value: 6

Source & Destination IP address and VLAN
destination-port  value: 7

Destination L4 port
source-port  value: 8

Source L4 port
source-dest-port  value: 9

Source & Destination L4 port
dest-ip-port  value: 10

Destination IP address and L4 port
source-ip-port  value: 11

Source IP address and L4 port
source-dest-ip-port  value: 12

Source & Destination IP address and L4 port
dest-ip-port-vlan  value: 13

Destination IP address, L4 port and VLAN
source-ip-port-vlan  value: 14

Source IP address, L4 port and VLAN
source-dest-ip-port-vlan  value: 15

Source & Destination IP address, L4 port and VLAN
source-dest-ip-gre  value: 18

Source & Destination IP GRE key

ipv6-val

load balance setting for ipv6 traffic

destination-mac  value: 1

Destination MAC address
source-mac  value: 2

Source MAC address
source-dest-mac  value: 3

Source & Destination MAC address
destination-ip-vlan  value: 4

Destination IP address and VLAN
destination-ip-gre  value: 17

Destination IP GRE key
source-ip-vlan  value: 5

Source IP address and VLAN
source-ip-gre  value: 16

Source IP GRE key
source-dest-ip-vlan  value: 6

Source & Destination IP address and VLAN
destination-port  value: 7

Destination L4 port
source-port  value: 8

Source L4 port
source-dest-port  value: 9

Source & Destination L4 port
dest-ip-port  value: 10

Destination IP address and L4 port
source-ip-port  value: 11

Source IP address and L4 port
source-dest-ip-port  value: 12

Source & Destination IP address and L4 port
dest-ip-port-vlan  value: 13

Destination IP address, L4 port and VLAN
source-ip-port-vlan  value: 14

Source IP address, L4 port and VLAN
source-dest-ip-port-vlan  value: 15

Source & Destination IP address, L4 port and VLAN
source-dest-ip-gre  value: 18

Source & Destination IP GRE key

Command Modes

- /exec

show port-channel load-balance forwarding-path

show port-channel load-balance forwarding-path { interface ch-id | hgig } { vlan vlan-id | src-mac src-mac | dst-mac dst-mac | src-ip src-ip | dst-ip dst-ip | src-ipv6 src-ipv6 | dst-ipv6 dst-ipv6 | l4-src-port l4-src-port | l4-dst-port l4-dst-port | ethertype ethertype | protocol prot } + [ module module | fex fex-range | hgig-tgid tgid ] + [ source-interface if-id ] [ __readonly__ loadbalance-algorithm algorithm outgoing-port-id port ]

Syntax Description

show

Show running system information

port-channel

Configure port channel parameters

load-balance

Show port-channel load balance

forwarding-path

Packet forwarding information

interface

Specify a port-channel number

ch-id

Type: interface

Port-Channel name

hgig

Higig hashing result (only with RTAG7)

vlan

VLAN of the ingress packet i.e. when available

vlan-id

Type: vlan

src-mac

Source MAC Address

src-mac

Type: ethernet

Source MAC address

dst-mac

Destination MAC Address

dst-mac

Type: ethernet

Destination MAC address

src-ip

Source IPv4 address

src-ip

Type: ipaddr

Source IP address in format i.i.i.i

dst-ip

Destination IPv4 address

dst-ip

Type: ipaddr

Destination IP address in format i.i.i.i

src-ipv6

Source IPv6 address

src-ipv6

Type: ipv6addr

Source IPv6 address in format i:i:i:i:i:i

dst-ipv6

Destination IPv6 address

dst-ipv6

Type: ipv6addr

Destination IPv6 address in format i:i:i:i:i:i

l4-src-port

Source L4 port

l4-src-port

Type: integer

min: 0  max: 65535

Source L4 port

l4-dst-port

Destination l4 port

l4-dst-port

Type: integer

min: 0  max: 65535

Destination L4 port

ethertype

Ethertype of the packet stream

ethertype

Type: hex

source-interface

Source interface - Required paramter

if-id

Type: interface

Interface name

protocol

Protocol

prot

Type: integer

min: 0  max: 65535

module

Module #

module

Type: integer

fex

FEX devices Not available in this release.

fex-range

Type: integer

min: 100  max: 199

FEX device range

hgig-tgid

Higig #

tgid

Type: integer

min: 1024  max: 1071

__readonly__

loadbalance-algorithm

load balance algorithm

algorithm

Type: string

load balance algorithm

outgoing-port-id

outgoing port-id

port

Type: string

outgoing port-id

Command Modes

- /exec

show port-channel rbh-distribution

show port-channel rbh-distribution [ interface if0 ] [ __readonly__ TABLE_channel chan-id port rbh + num_of_buckets ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

rbh-distribution

Show RBH distribution for member ports Not available in this release.

interface

Specify a port-channel interface

if0

Type: interface

__readonly__

TABLE_channel

Port-channel table

chan-id

Type: integer

Channel ID

port

Type: interface

Member port

num_of_buckets

Type: integer

Channel ID

rbh

Type: integer

Channel ID

Command Modes

- /exec

show port-channel summary

show port-channel summary [ interface if0 ] [ __readonly__ TABLE_channel group port-channel layer status type prtcl [ TABLE_member port port-status ] ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

summary

Show port-channel summary

interface

Specify a port-channel

if0

Type: interface

__readonly__

TABLE_channel

Port-channel table

group

Type: integer

Channel group number

port-channel

Type: interface

Port channel

type

Channel type

Auto  value: 1

DCE channel auto mode
Edge  value: 2

DCE channel edge mode
Core  value: 3

DCE channel core mode
Off  value: 0

DCE channel off mode
Eth  value: 4

Ethernet channel type
FC  value: 5

FC channel type
Unknown  value: 0xFF

Unknown channel type

prtcl

Channel protocol

LACP  value: 1

Channel protocol is LACP
NONE  value: 2

No protocol is running

status

Type: _enum

Channel status

layer

Channel layer info

S  value: 2

Channel is L2
R  value: 3

Channel is L3

TABLE_member

Member table

port

Type: interface

Member port

port-status

Member port status

H  value: 6

Hot standby port
P  value: 1

Port is up
D  value: 2

Port is down
s  value: 5

Suspended port
I  value: 3

Individual link
r  value: 7

Module removed

Command Modes

- /exec

show port-channel traffic

show port-channel traffic [ interface if0 ] [ __readonly__ TABLE_channel chanId port rx-ucst tx-ucst rx-mcst tx-mcst rx-bcst tx-bcst ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

traffic

Show port-channel traffic statistics

__readonly__

interface

Specify a port-channel

if0

Type: interface

TABLE_channel

Port-channel table

chanId

Type: integer

Channel ID

port

Type: interface

Member port

rx-ucst

Type: float

Received unicast

tx-ucst

Type: float

Transmitted unicast

rx-mcst

Type: float

Received multicast

tx-mcst

Type: float

Tranmitted multicast

rx-bcst

Type: float

Received broadcast

tx-bcst

Type: float

Transmitted broadcast

Command Modes

- /exec

show port-channel usage

show port-channel usage [ __readonly__ total-channel-number-used used-range-low [used-range-hi] + unused-range-low [unused-range-hi] + ]

Syntax Description

show

Show running system information

port-channel

Show port-channel information

usage

Show port-channel number usage

__readonly__

total-channel-number-used

Type: integer

Total used number of port-channels

used-range-low

Type: integer

Used range low end value

used-range-hi

Type: integer

Used range high end value

unused-range-low

Type: integer

Un-used range low end value

unused-range-hi

Type: integer

Un-used range high end value

Command Modes

- /exec

show port-security

show port-security [ __readonly__ TABLE_eth_port_sec_interfaces secure_port max_secure_addr current_addr security_violation security_action num_val num_elems cmdid_show_index port_state total_addr max_sys_limit ]

Syntax Description

show

Show running system information

port-security

Show secure port information

__readonly__

TABLE_eth_port_sec_interfaces

Displays the secured interfaces

secure_port

Type: interface

Interface Index

max_secure_addr

Type: uinteger

Maximum number of secured MAC addresses

current_addr

Type: uinteger

Number of secured MAC addresses

security_violation

Type: uinteger

Number of security violations

security_action

Security Action Shutdown/Restrict/Protect

shutdown  value: 0

restrict  value: 1

protect  value: 2

num_val

Type: uinteger

Number of Values

num_elems

Type: uinteger

Number of Elements

cmdid_show_index

Type: uinteger

Index for the Interfaces

port_state

Type: uinteger

Port security enabled or disabled

total_addr

Type: uinteger

Total number of secured MAC addresses

max_sys_limit

Type: uinteger

Maximum allowed MACs excluding one per port

Command Modes

- /exec

show port-security address

show port-security address [ __readonly__ TABLE_eth_port_sec_mac_addrs vlan_id mac_addr type if_index remain_age num_elems cmd_addr_index total_addr max_sys_limit ]

Syntax Description

show

Show running system information

port-security

Show secure port information

address

Show secure address

__readonly__

TABLE_eth_port_sec_mac_addrs

Displays the secured MAC addresses

if_index

Type: interface

Interface index

vlan_id

Type: vlan

vlan id

mac_addr

Type: string

mac address

type

static/sticky/dyanmic MAC address

Static_Mac  value: 0x02

Mac type: Static
Sticky_Mac  value: 0x04

Mac type: Sticky
Dynamic_Mac  value: 0x08

Mac type: Dynamic

remain_age

Type: uinteger

Remaining age

num_elems

Type: uinteger

Number of Elements

cmd_addr_index

Type: uinteger

Index for the interface address

total_addr

Type: uinteger

Total number of secured MAC addresses

max_sys_limit

Type: uinteger

Maximum allowed MACs excluding one per port

Command Modes

- /exec

show port-security address blocked

show port-security address blocked [ __readonly__ TABLE_eth_port_sec_mac_addrs vlan_id mac_addr type if_index remain_age num_elems cmd_addr_index total_addr max_sys_limit ]

Syntax Description

show

Show running system information

port-security

Show secure port information

address

Show secure address

blocked

Port Security Blocked macs

__readonly__

TABLE_eth_port_sec_mac_addrs

Displays the secured MAC addresses

if_index

Type: interface

Interface index

vlan_id

Type: vlan

vlan id

mac_addr

Type: string

mac address

type

static/sticky/dyanmic MAC address

Static_Mac  value: 0x02

Mac type: Static
Sticky_Mac  value: 0x04

Mac type: Sticky
Dynamic_Mac  value: 0x08

Mac type: Dynamic
Blocked_Mac  value: 0x40

Mac type: Blocked

remain_age

Type: uinteger

Remaining age

num_elems

Type: uinteger

Number of Elements

cmd_addr_index

Type: uinteger

Index for the interface address

total_addr

Type: uinteger

Total number of secured MAC addresses

max_sys_limit

Type: uinteger

Maximum allowed MACs excluding one per port

Command Modes

- /exec

show port-security address interface

show port-security address interface interface-id [ __readonly__ TABLE_eth_port_sec_mac_addrs vlan_id mac_addr type if_index remain_age num_elems total_addr max_sys_limit first ]

Syntax Description

show

Show running system information

port-security

Show secure port information

address

Show secure address

interface

Show secure interface

interface-id

Type: interface

ethernet

__readonly__

TABLE_eth_port_sec_mac_addrs

Displays the secured MAC addresses

if_index

Type: interface

Interface index

vlan_id

Type: vlan

vlan id

mac_addr

Type: string

mac address

type

Type: integer

static/sticky/dyanmic MAC address

if_index

Type: interface

Interface index

remain_age

Type: uinteger

Remaining age

num_elems

Type: uinteger

Number of Elements

total_addr

Type: uinteger

Total number of secured MAC addresses

max_sys_limit

Type: uinteger

Maximum allowed MACs excluding one per port

first

Type: uinteger

To identify the first entry

Command Modes

- /exec

show port-security address nvram

show port-security address nvram [ __readonly__ TABLE_eth_port_sec_mac_addrs vlan_id mac_addr type if_index remain_age num_elems cmd_addr_index total_addr max_sys_limit ]

Syntax Description

show

Show running system information

port-security

Show secure port information

address

Show secure address

nvram

Port Security NVRAM

__readonly__

TABLE_eth_port_sec_mac_addrs

Displays the secured MAC addresses

if_index

Type: interface

Interface index

vlan_id

Type: vlan

vlan id

mac_addr

Type: string

mac address

type

static/sticky/dyanmic MAC address

Static_Mac  value: 0x02

Mac type: Static
Sticky_Mac  value: 0x04

Mac type: Sticky
Dynamic_Mac  value: 0x08

Mac type: Dynamic

remain_age

Type: uinteger

Remaining age

num_elems

Type: uinteger

Number of Elements

cmd_addr_index

Type: uinteger

Index for the interface address

total_addr

Type: uinteger

Total number of secured MAC addresses

max_sys_limit

Type: uinteger

Maximum allowed MACs excluding one per port

Command Modes

- /exec

show port-security detail interface

show port-security detail interface [ __readonly__ TABLE_eth_port_sec_intf_detail if_index port_security port_status violation_mode aging_time aging_type max_mac_addr total_sec_addrs trap_count addr_aging_enable secure_last_mac_addr sticky_enable secure_last_mac_addr_vlan_id ]

Syntax Description

show

Show running system information

port-security

Show secure port information

detail

Show detailed information about secure interface

interface

Show secure interface

TABLE_eth_port_sec_intf_detail

Displays the secured interface details

__readonly__

if_index

Type: interface

Interface index

port_security

Port Security is Enabled/Disabled

enabled  value: 0

disabled  value: 1

port_status

Secure Up/Down

secure-up  value: 1

secure-down  value: 2

shutdown  value: 0

violation_mode

Shutdown/Restrict/Protect

shutdown  value: 0

restrict  value: 1

protect  value: 2

aging_time

Type: integer

Aging time in minutes

aging_type

Absolute/Inactivity

absolute  value: 0

inactivity  value: 1

max_mac_addr

Type: integer

Maximum number of MAC addresses that can be secured

total_sec_addrs

Type: uinteger

Total number of secured MAC addresses

trap_count

Type: uinteger

Trap Count

addr_aging_enable

Type: integer

Specifies whether address aging is enabled

secure_last_mac_addr

Type: string

Secured last mac address

sticky_enable

Type: integer

Specifies sticky feature is enabled on the port

secure_last_mac_addr_vlan_id

Type: vlan

Indicates the VLAN where the last MAC address seen on this interface

Command Modes

- /exec

show port-security interface

show port-security interface interface-id [ __readonly__ port_security port_status violation_mode aging_time aging_type max_mac_addr total_sec_addrs conf_num_addrs num_sticky_addrs trap_count ]

Syntax Description

show

Show running system information

port-security

Show secure port information

interface

Show secure interface

interface-id

Type: interface

ethernet

__readonly__

port_security

Port Security is Enabled/Disabled

enabled  value: 0

disabled  value: 1

port_status

Secure Up/Down

secure-up  value: 1

secure-down  value: 2

violation_mode

Shutdown/Restrict/Protect

shutdown  value: 0

restrict  value: 1

protect  value: 2

aging_time

Type: uinteger

Aging time in minutes

aging_type

Absolute/Inactivity

absolute  value: 0

inactivity  value: 1

max_mac_addr

Type: uinteger

Configured Maximum

total_sec_addrs

Type: uinteger

Total number of secured MAC addresses

conf_num_addrs

Type: uinteger

Number of configured MAC addresses

num_sticky_addrs

Type: uinteger

Number of sticky MAC addresses

trap_count

Type: uinteger

Trap Count

Command Modes

- /exec

show port-security multivlan address

show port-security multivlan address [ __readonly__ TABLE_eth_port_sec_multi_vlan if_index vlan_id max_sec_mac_addr_count cur_sec_mac_addr_count ]

Syntax Description

show

Show running system information

port-security

Show secure port information

address

Show secure address

multivlan

Show port security information for a particular vlan in a multivlan port

__readonly__

TABLE_eth_port_sec_multi_vlan

Displays the secured MAC addresses

if_index

Type: interface

Interface index

vlan_id

Type: vlan

vlan id

max_sec_mac_addr_count

Type: uinteger

The maximum number of MAC addresses to be secured in the vlan

cur_sec_mac_addr_count

Type: uinteger

Current number of MAC addresses secured in the VLAN

Command Modes

- /exec

show port-security secure address

show port-security secure address [ __readonly__ TABLE_eth_port_sec_if_vlan_secure_mac_addr if_index mac_addr vlan_id mac_addr_type remain_age ]

Syntax Description

show

Show running system information

port-security

Show secure port information

secure

Show detail information about secure address

address

Show secure address

__readonly__

TABLE_eth_port_sec_if_vlan_secure_mac_addr

Displays the secured MAC addresses

if_index

Type: interface

Interface index

mac_addr

Type: string

mac address

vlan_id

Type: vlan

vlan id

mac_addr_type

Type: integer

static/sticky/ MAC address

remain_age

Type: uinteger

Remaining age

Command Modes

- /exec

show port-security state

show port-security state [ __readonly__ status ]

Syntax Description

show

Show running system information

port-security

Port security related command

state

port security state

__readonly__

status

show port-security

enabled  value: 0

disabled  value: 1

Command Modes

- /exec

show port-security traps enable

show port-security traps enable [ __readonly__ snmp_traps_enable ]

Syntax Description

show

Show running system information

port-security

Show secure port information

address

Show secure address

traps

Enable SNMP traps

enable

enable

__readonly__

snmp_traps_enable

Type: uinteger

SNMP traps enable/disable

Command Modes

- /exec

show privilege

show privilege

Syntax Description

show

Show running system information

privilege

Display privilege information

Command Modes

- /exec

show processes (launcher)

show processes { version | threads } [comp-string] [ __readonly__ TABLE_component component-name version buildinfo sourceversion ]

Syntax Description

show

Show running system information

processes

Display process information

version

Display system release information

threads

Threads Info

comp-string

Type: string

Component name for detailed information

__readonly__

Command Modes

- /exec

show processes (process)

show processes [ __readonly__ [ TABLE_processes pid state pc start_cnt tty p_type process ] ]

Syntax Description

show

Show running system information

processes

Show processes

__readonly__

TABLE_processes

all process information

pid

Type: string

process id

state

Type: string

process state

pc

Type: string

pc register

start_cnt

Type: uinteger

TBD

tty

Type: string

TBD

p_type

Type: string

process type

process

Type: string

process name

Command Modes

- /exec

show processes cpu

show processes cpu [sort] [ __readonly__ [ TABLE_process_cpu pid runtime invoked usecs onesec process ] [user_percent] [kernel_percent] [idle_percent] ]

Syntax Description

show

Show running system information

processes

Show processes

cpu

Show processes CPU Info

sort

Show processes CPU Info (Sorted by Cpu Util with time base)

__readonly__

TABLE_process_cpu

all process memory

pid

Type: integer

process id

runtime

Type: uinteger

Runtime

invoked

Type: uinteger

Invoked

usecs

Type: uinteger

usecs

onesec

Type: float

fivesec

process

Type: string

name of the process

user_percent

Type: float

user

kernel_percent

Type: float

kernel

idle_percent

Type: float

idle

Command Modes

- /exec

show processes cpu history

show processes cpu history

Syntax Description

show

Show running system information

processes

Show processes

cpu

Show processes CPU Info

history

Show processes CPU Util History

Command Modes

- /exec

show processes cpu module

show processes cpu module i0 [ __readonly__ [ TABLE_process_cpu pid runtime invoked usecs onesec process ] [user_percent] [kernel_percent] [idle_percent] ]

Syntax Description

show

Show running system information

processes

Show processes

cpu

Show processes CPU Info

module

processes CPU Info

i0

Type: integer

min: 1  max: 18

module number

__readonly__

TABLE_process_cpu

all process memory

pid

Type: integer

process id

runtime

Type: integer

Runtime

invoked

Type: integer

Invoked

usecs

Type: integer

usecs

onesec

Type: float

onesec

process

Type: string

name of the process

user_percent

Type: float

user

kernel_percent

Type: float

kernel

idle_percent

Type: float

idle

Command Modes

- /exec

show processes log

show processes log [ __readonly__ [ TABLE_processes_log vdc process pid normal_exit stack core create_time ] ]

Syntax Description

show

Show running system information

processes

Show processes

log

Show information about process logs

__readonly__

TABLE_processes_log

all processes log

vdc

Type: integer

vdc

process

Type: string

vdc process name

pid

Type: integer

pid

normal_exit

Type: string

process exit

stack

Type: string

stack

core

Type: string

core

create_time

Type: string

log create time

Command Modes

- /exec

show processes log details

show processes log details [ __readonly__ line_in_log_detail line_in_file ]

Syntax Description

show

Show running system information

processes

Show processes

log

Show information about process logs

details

Show detail of all logs with stack

__readonly__

line_in_log_detail

line_in_file

Type: string

each line

Command Modes

- /exec

show processes log pid

show processes log pid i0 [ __readonly__ TABLE_line_in_log_pid line_in_file ]

Syntax Description

show

Show running system information

processes

Show processes

log

Show information about process logs

pid

Show detail log info about a specific process

i0

Type: integer

min: 1  max: 2147483647

pid of the process

__readonly__

TABLE_line_in_log_pid

line_in_file

Type: string

each line

Command Modes

- /exec

show processes log vdc-all

show processes log vdc-all [ __readonly__ [ TABLE_processes_log_vdc_all vdc process pid normal_exit stack core create_time ] ]

Syntax Description

TABLE_processes_log_vdc_all

all processes log vdc all

show

Show running system information

processes

Show processes

log

Show information about process logs

vdc-all

Show information about process logs in all vdc's

__readonly__

vdc

Type: integer

vdc process name

process

Type: string

vdc process name

pid

Type: integer

process id

normal_exit

Type: string

process exit

stack

Type: string

stack

core

Type: string

core

create_time

Type: string

log create time

Command Modes

- /exec

show processes memory

show processes memory [ __readonly__ TABLE_process_memory mem_pid mem_alloc mem_limit mem_used stack_base_ptr process ]

Syntax Description

show

Show running system information

processes

Show processes

memory

Show processes Memory Info

__readonly__

TABLE_process_memory

all process memory

mem_pid

Type: integer

process id

mem_alloc

Type: integer

allocated memory

mem_limit

Type: integer

memory limit

mem_used

Type: integer

memory used

stack_base_ptr

Type: string

stack and base pointer

process

Type: string

name of the process

Command Modes

- /exec

show processes memory clis

show processes memory clis [ shared | private ]

Syntax Description

show

Show running system information

processes

Display process information

memory

Display memory information

clis

shared

Display CLIS shared memory information

private

Display CLIS private memory information

Command Modes

- /exec

show processes memory shared

show processes memory shared [ detail | dynamic ] [ __readonly__ TABLE_process_tag [process-tag-out] [process-memory-share-dynamic-component-str] [process-memory-share-dynamic-shared-memory-str] [process-memory-share-dynamic-current-size-str] [process-memory-share-dynamic-max-size-str] [process-memory-share-dynamic-used-str] [process-memory-share-component-str] [process-memory-share-shared-memory-str] [process-memory-share-size-str] [process-memory-share-used-str] [process-memory-share-available-str] [process-memory-share-ref-str] [process-memory-share-byte-set-address-str] [process-memory-share-byte-set-count-str] [process-memory-share-address-str] [process-memory-share-kbytes-1-str] [process-memory-share-kbytes-2-str] [process-memory-share-kbytes-3-str] [process-memory-share-count-str] [ TABLE_SMMITEM process-memory-share-smr-name ] [ TABLE_SHOWPROC process-memory-share-table-showproc-key [ TABLE_SHOWONEDYNAMIC [process-memory-share-component] [process-memory-share-shared-memory] [process-memory-share-current-size] [process-memory-share-max-size] [process-memory-share-used] ] [ TABLE_ONEITEM [process-memory-share-proc-smr-name] [process-memory-share-smr-addr] [process-memory-share-smr-size] [process-memory-share-smr-star-char] [process-memory-share-smr-empty-char] [process-memory-share-smr-used] [process-memory-share-smr-avail] [process-memory-share-smr-ref-count] [process-memory-share-dynamic-smr-name] ] [ TABLE_ONEITEMDYNAMIC [process-memory-share-dynamic-smr-addr] [process-memory-share-dynamic-smr-size] [process-memory-share-dynamic-plus-char] [process-memory-share-max-mem-size-str] [process-memory-share-dynamic-smr-used] [process-memory-share-dynamic-smr-avail] [process-memory-share-dynamic-smr-ref-count] [process-memory-share-region-smr-name] ] ] [process-memory-share-total-shm-size] [process-memory-share-total-shm-used] [process-memory-share-total-shm-avail] ]

Syntax Description

show

Show running system information

processes

Display process information

memory

Display memory information

shared

Display shared memory info

detail

Display shared memory in bytes instead of default kbytes

dynamic

Display details of dynamic shared memory segments

__readonly__

TABLE_process_tag

process-tag-out

Type: string

process-memory-share-dynamic-component-str

Type: string

process-memory-share-dynamic-shared-memory-str

Type: string

process-memory-share-dynamic-current-size-str

Type: string

process-memory-share-dynamic-max-size-str

Type: string

process-memory-share-dynamic-used-str

Type: string

process-memory-share-component-str

Type: string

process-memory-share-shared-memory-str

Type: string

process-memory-share-size-str

Type: string

process-memory-share-used-str

Type: string

process-memory-share-available-str

Type: string

process-memory-share-ref-str

Type: string

process-memory-share-byte-set-address-str

Type: string

process-memory-share-byte-set-count-str

Type: string

process-memory-share-address-str

Type: string

process-memory-share-kbytes-1-str

Type: string

process-memory-share-kbytes-2-str

Type: string

process-memory-share-kbytes-3-str

Type: string

process-memory-share-count-str

Type: string

TABLE_SMMITEM

process-memory-share-smr-name

Type: string

TABLE_SHOWPROC

process-memory-share-table-showproc-key

Type: string

TABLE_SHOWONEDYNAMIC

process-memory-share-component

Type: string

process-memory-share-shared-memory

Type: integer

process-memory-share-current-size

Type: integer

process-memory-share-max-size

Type: integer

process-memory-share-used

Type: integer

TABLE_ONEITEM

process-memory-share-proc-smr-name

Type: string

process-memory-share-smr-addr

Type: string

process-memory-share-smr-size

Type: integer

process-memory-share-smr-star-char

Type: string

process-memory-share-smr-empty-char

Type: string

process-memory-share-smr-used

Type: integer

process-memory-share-smr-avail

Type: integer

process-memory-share-smr-ref-count

Type: integer

TABLE_ONEITEMDYNAMIC

process-memory-share-dynamic-smr-name

Type: string

process-memory-share-dynamic-smr-addr

Type: string

process-memory-share-dynamic-smr-size

Type: integer

process-memory-share-dynamic-plus-char

Type: string

process-memory-share-max-mem-size-str

Type: string

process-memory-share-dynamic-smr-used

Type: integer

process-memory-share-dynamic-smr-avail

Type: integer

process-memory-share-dynamic-smr-ref-count

Type: integer

process-memory-share-region-smr-name

Type: string

process-memory-share-total-shm-size

Type: integer

process-memory-share-total-shm-used

Type: integer

process-memory-share-total-shm-avail

Type: integer

Command Modes

- /exec

show processes vdc

show processes vdc e-vdc2

Syntax Description

show

Show running system information

processes

Show processes

vdc

Show processes in vdc

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

Command Modes

- /exec

show processes vdc cpu

show processes vdc e-vdc2 cpu

Syntax Description

show

Show running system information

processes

Show processes

vdc

Show processes in vdc

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

cpu

Show processes CPU Info

Command Modes

- /exec

show processes vdc log

show processes vdc e-vdc2 log

Syntax Description

show

Show running system information

processes

Show processes

vdc

Show processes in vdc

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

log

Show information about process logs

Command Modes

- /exec

show processes vdc log details

show processes vdc e-vdc2 log details

Syntax Description

show

Show running system information

processes

Show processes

vdc

Show processes in vdc

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

log

Show information about process logs

details

Show detail of all logs with stack

Command Modes

- /exec

show processes vdc log pid

show processes vdc e-vdc2 log pid i1

Syntax Description

show

Show running system information

processes

Show processes

vdc

Show processes in vdc

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

log

Show information about process logs

pid

Show detail log info about a specific process

i1

Type: integer

min: 1  max: 2147483647

pid of the process

Command Modes

- /exec

show processes vdc memory

show processes vdc e-vdc2 memory

Syntax Description

show

Show running system information

processes

Show processes

vdc

Show processes in vdc

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

memory

Show processes Memory Info

Command Modes

- /exec

Chapter 17. Q Show Commands

- show qos dcbxp incompatibility interface

- show qos dcbxp info

- show qos shared-policer

- show queuing

show qos dcbxp incompatibility interface

show qos dcbxp incompatibility interface iface-num [ __readonly__ pfc mtu lpg rpg bw lfcoe rfcoe liscsi riscsi ]

Syntax Description

show

Show running system information

qos

qos

dcbxp

DCBXP

incompatibility

incompatibility information

interface

incompatibility info for interface

iface-num

Type: interface

Interface

__readonly__

pfc

Type: string

pfc

mtu

Type: uinteger

MTU Value

lpg

Type: string

Local Priority Grouping

rpg

Type: string

Remote Priority Grouping

bw

Type: string

CIN: bandwidth/priority

lfcoe

Type: integer

local fcoe

rfcoe

Type: integer

remote fcoe

liscsi

Type: integer

local iscsi

riscsi

Type: integer

remote iscsi

Command Modes

- /exec

show qos dcbxp info

show qos dcbxp info [ __readonly__ intf pfcr pfcc pgr pgc mtur mtuc fcoer fcoec iscsir iscsic ]

Syntax Description

show

Show running system information

qos

qos

dcbxp

DCBXP

info

information

__readonly__

intf

Type: string

Interface

pfcr

Type: integer

pfc recvd

pfcc

Type: integer

pfc compatible

pgr

Type: integer

pg received

pgc

Type: integer

pg compatible

mtur

Type: integer

mtu received

mtuc

Type: integer

mtu compatible

fcoer

Type: integer

fcoe received

fcoec

Type: integer

fcoe compatible

iscsir

Type: integer

iscsi received

iscsic

Type: integer

iscsi compatible

Command Modes

- /exec

show qos shared-policer

show qos shared-policer [ type qos1 ] [policer-name] [ __readonly__ [ TABLE_policer policer-name2 [cir-spec] [bc-spec] [be-spec] [cir-rate-units] [cir] [bc-size-units] [bc] [pir-rate-units] [pir] [be-size-units] [be] [cnf-col-cmap] [exc-col-cmap] [ TABLE_action action-key [cnf-act] [exc-act] [vio-act] [set-type] [enum-spec] [set-val] [tmap-from] [tmap-to] [tmap-name] ] ] ]

Syntax Description

show

Show running system information

qos

Show qos configurations

shared-policer

Shared policer Not available in this release.

type

Type of shared policer

qos1

type qos

policer-name

Type: string

length: 40

Shared policer name

__readonly__

TABLE_policer

all police xml sessions

policer-name2

Type: string

Policer Name

TABLE_action

all police actions xml sessions

action-key

Type: uinteger

Count

cir-spec

Type: uinteger

min: 0  max: 1

Is CIR keyword specified

bc-spec

Type: uinteger

min: 0  max: 1

Is Committed Burst keyword specified

be-spec

Type: uinteger

min: 0  max: 1

Is Extended Burst keyword specified

cir-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us, pps

pir-rate-units

Type: uinteger

Units of rate - bps, kbps, mbps, gbps, ms, us, pps

bc-size-units

Type: uinteger

Units of size - pkts/bytes/kbytes/mbytes/ms/us/perc

be-size-units

Type: uinteger

Units of size - pkts/bytes/kbytes/mbytes/ms/us/perc

tmap-from

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)

tmap-to

cos  value: 1

table map of cos type (1)
dscp  value: 2

table map of dscp type (2)
prec  value: 3

table map of prec type (3)
qos-grp  value: 5

table map of qos-grp type (4)
dis-cl  value: 4

table map of discard-class type (5)

tmap-name

Type: string

Table map name

cir

Type: long

Committed Information Rate

bc

Type: long

Committed Burst Size

pir

Type: long

Peak Information Rate

be

Type: long

Extended Burst Size

cnf-col-cmap

Type: string

Conforming color class-map name

exc-col-cmap

Type: string

Exceeding color class-map name

enum-spec

Type: uinteger

min: 0  max: 1

Is DSCP or PREC enum value specified

cnf-act

Type: uinteger

Conform action (Police)

exc-act

Type: uinteger

Exceed action (Police)

vio-act

Type: uinteger

Violate action (Police)

set-type

Type: uinteger

Type of set in police action

set-val

Type: uinteger

Value of set type in police action

Command Modes

- /exec

show queuing

show queuing [ interface if_name ] [summary] [ module module ] [ __readonly__ [ TABLE_queuing_interface if_name_str [ TABLE_qosgrp_cfg qosgrp [bandwidth] [priority] [shape-min] [shape-max] [shape-units] ] [ TABLE_qosgrp_egress_stats eq-qosgrp [ TABLE_qosgrp_egress_stats_entry eq-stat-type eq-stat-units eq-uc-stat-value eq-oobfc-uc-stat-value eq-mc-stat-value ] ] [ TABLE_egress_stats_entry ep-stat-type ep-stat-units ep-stat-value ] [ tx-ppp rx-ppp [ TABLE_pfc_stats cos [pfc-qosgrp] tx-pause-state tx-pause-count rx-pause-state rx-pause-count ] ] ] ]

Syntax Description

show

commands to display

queuing

Queuing related information

interface

Interface for displaying queuing config

if_name

Type: interface

interface name

module

Slot/module

module

Type: integer

Slot/module number

summary

summary

__readonly__

if_name_str

Type: string

interface name

TABLE_queuing_interface

Queuing information of an interface

TABLE_qosgrp_cfg

Qos-group configuration

qosgrp

Type: uinteger

Qos-group value

bandwidth

Type: uinteger

WRR bandwidth

priority

Type: uinteger

Priority level

shape-min

Type: long

Minimum shape rate

shape-max

Type: long

Maximum shape rate

shape-units

Type: string

Shape units

TABLE_qosgrp_egress_stats

Qos-group egress statistics

eq-qosgrp

Type: uinteger

Qos-group value

TABLE_qosgrp_egress_stats_entry

Qos-group egress statistics entry

eq-stat-type

Type: string

Qos-group egress statistics type

eq-stat-units

Type: string

Qos-group egress statistics units

eq-uc-stat-value

Type: long

Qos-group egress statstics value for unicast

eq-oobfc-uc-stat-value

Type: long

Qos-group egress statstics value for OOBFC unicast

eq-mc-stat-value

Type: long

Qos-group egress statstics value for multicast

TABLE_egress_stats_entry

Egress port statistics

ep-stat-type

Type: string

Egress port statistics type

ep-stat-units

Type: string

Egress port statistics units

ep-stat-value

Type: long

Egress port statistics value

TABLE_pfc_stats

Per COS PFC statistics

cos

Type: uinteger

PFC COS

pfc-qosgrp

Type: uinteger

Qos-group of the given COS

tx-ppp

Type: long

Number of PPP frames transmitted

rx-ppp

Type: long

Number of PPP frames transmitted

tx-pause-state

Type: string

Tx PFC state of the given COS

tx-pause-count

Type: long

Number of PFC frames transimitted for the given COS

rx-pause-state

Type: string

Rx PFC state of the given COS

rx-pause-count

Type: long

Number of PFC frames received for the given COS

Command Modes

- /exec

Chapter 18. R Show Commands

- show radius-server (radius_tree)

- show radius-server (radius_tree)

- show radius-server directed-request

- show radius-server groups

- show radius-server sorted

- show radius-server statistics

- show redundancy status

- show regexp

- show resource

- show rip

- show rip interface

- show rip memory

- show rip neighbor

- show rip route

- show rip statistics

- show rmon

- show role

- show role feature-group

- show role feature

- show rollback log

- show rollback status

- show route-map

- show route-map pbr-statistics

- show route

- show routing-context

- show routing-privilege

- show routing clients

- show routing hash

- show routing hidden-nh

- show routing ip ipv4 multicast lisp encap __readonly__

- show routing ipv6 clients

- show routing ipv6 hash

- show routing ipv6 hidden-nh

- show routing ipv6 memory estimate

- show routing ipv6 memory statistics

- show routing ipv6 nexthop info

- show routing ipv6 nhlfe

- show routing ipv6 recursive-next-hop

- show routing memory estimate

- show routing memory statistics

- show routing multicast

- show routing multicast clients

- show routing multicast mdt encapsulation

- show routing multicast memory estimate

- show routing nhlfe

- show routing recursive-next-hop

- show routing unresolved-next-hop

- show running-config

- show running-config aaa

- show running-config acllog

- show running-config aclmgr (aclmgr)

- show running-config aclmgr (aclmgr)

- show running-config adjmgr

- show running-config all

- show running-config arp

- show running-config bfd

- show running-config bgp

- show running-config bloggerd

- show running-config callhome

- show running-config cdp

- show running-config cert-enroll

- show running-config cfs

- show running-config clock_manager

- show running-config copp

- show running-config dhcp

- show running-config diagnostic

- show running-config diff

- show running-config eem

- show running-config eigrp

- show running-config eltm

- show running-config exclude

- show running-config exclude fabricpath

- show running-config exclude fex

- show running-config explicit

- show running-config fabricpath

- show running-config fabricpath topology

- show running-config fex

- show running-config glbp

- show running-config hsrp

- show running-config icmpv6

- show running-config igmp

- show running-config interface (clic)

- show running-config interface (clic)

- show running-config interface defaults

- show running-config interface explicit

- show running-config ip

- show running-config ipqos (qosmgr)

- show running-config ipqos (qosmgr)

- show running-config ipv6

- show running-config isis

- show running-config l2pt

- show running-config l3vm

- show running-config ldap

- show running-config license

- show running-config lldp

- show running-config monitor

- show running-config msdp

- show running-config ntp

- show running-config nv overlay

- show running-config ospf

- show running-config ospfv3

- show running-config pim

- show running-config pim6

- show running-config port-security

- show running-config radius

- show running-config res_mgr

- show running-config rip

- show running-config routing multicast

- show running-config rpm

- show running-config rsvp

- show running-config section

- show running-config security

- show running-config snmp

- show running-config spanning-tree

- show running-config tacacs+

- show running-config track

- show running-config udld

- show running-config vdc-all

- show running-config vdc

- show running-config virtual-service

- show running-config vlan (clis)

- show running-config vlan (clis)

- show running-config vlan (vlan_mgr_cli)

- show running-config vlan_mgr

- show running-config vpc

- show running-config vrf

- show running-config vrf default

- show running-config vrrp

- show running-config vshd

- show running-config vtp

show radius-server (radius_tree)

show radius-server host0 [ __readonly__ host1 auth_port acct_port shared_key idle_time test_username test_password ]

Syntax Description

show

Show running system information

radius-server

Show RADIUS configuration information

host0

Type: string

DNS name or IP address

__readonly__

host1

Type: string

DNS name or IP address

auth_port

Type: integer

RADIUS server's port for authentication

acct_port

Type: integer

RADIUS server's port for accounting

shared_key

Type: string

RADIUS shared secret

test_username

Type: string

User name in test packets

test_password

Type: string

User password in test packets

idle_time

Type: integer

Time interval for monitoring the server

Command Modes

- /exec

show radius-server (radius_tree)

show radius-server [ __readonly__ host0 auth_port acct_port shared_key idle_time test_username test_password + ]

Syntax Description

show

Show running system information

radius-server

Show RADIUS configuration information

__readonly__

host0

Type: string

DNS name or IP address

auth_port

Type: integer

RADIUS server's port for authentication

acct_port

Type: integer

RADIUS server's port for accounting

shared_key

Type: string

RADIUS shared secret

test_username

Type: string

User name in test packets

test_password

Type: string

User password in test packets

idle_time

Type: integer

Time interval for monitoring the server

Command Modes

- /exec

show radius-server directed-request

show radius-server directed-request [ __readonly__ radius_directedRequest_status ]

Syntax Description

show

Show running system information

radius-server

Show RADIUS configuration information

directed-request

Show directed server enable configuration

__readonly__

radius_directedRequest_status

status of radius-server directed request

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show radius-server groups

show radius-server groups [s0] [ __readonly__ [num_of_groups] TABLE_group group_name [ TABLE_server server_ip [auth_port] [acct_port] ] [dead_time] [vrf_name] [source_interface] ]

Syntax Description

show

Show running system information

radius-server

Show RADIUS configuration information

groups

Show RADIUS server group configuration information

s0

Type: string

length: 127

RADIUS server group name

__readonly__

num_of_groups

Type: integer

number of groups

TABLE_group

group_name

Type: string

name of the group

TABLE_server

server_ip

Type: string

DNS name or IP address

auth_port

Type: integer

radius server authentication port

acct_port

Type: integer

radius server accounting port

dead_time

Type: integer

Time interval for which the server is marked as dead before sendinga test command

vrf_name

Type: vrf

name of the vrf

source_interface

Type: interface

Interface Description

Command Modes

- /exec

show radius-server sorted

show radius-server sorted [ __readonly__ [global_secretKey] global_timeout retransmissionCount global_deadtime [global_source_intf] [global_idle_time] [global_testUsername] [global_testPassword] server_count [ TABLE_server server_ip [auth_port] [acct_port] [secretKey] [timeout] [retries] ] ]

Syntax Description

show

Show running system information

radius-server

Show RADIUS configuration information

sorted

Show RADIUS servers sorted by name

__readonly__

global_secretKey

Type: string

Global shared secret

global_timeout

Type: integer

Global timeout for tacacs

retransmissionCount

Type: integer

Retransmittion count when there is no server response

global_deadtime

Type: integer

Global deadtime

global_source_intf

Type: string

Radius global source interface

global_idle_time

Type: integer

Radius global idle-time for server monitoring

global_testUsername

Type: string

Username of global test parameters

global_testPassword

Type: string

Password of global test parameters

server_count

Type: integer

Total number of radius servers configured

TABLE_server

server_ip

Type: string

Ip address of the server

auth_port

Type: integer

Authentication port used for this server

acct_port

Type: integer

Accounting Port used for this server

secretKey

Type: string

Shared secret between the server and the tacacs client

timeout

Type: integer

Timeout for this tacacs server

retries

Type: integer

Retry count for individual servers

Command Modes

- /exec

show radius-server statistics

show radius-server statistics host0 [ __readonly__ server_state [ clock_time monitoring_statistics time_in_pstate ndead tt_in_dstate ] auth_statistics auth_failed_transactions auth_succ_transactions auth_req_sent auth_req_timedout auth_resp_no_match auth_resp_not_processed auth_resp_error acct_statistics acct_failed_transactions acct_succ_transactions acct_req_sent acct_req_timedout acct_resp_no_match acct_resp_not_processed acct_resp_error ]

Syntax Description

show

Show running system information

radius-server

Show RADIUS configuration information

statistics

Show RADIUS statistics

host0

Type: string

DNS name or IP address

__readonly__

server_state

Show state of server

alive  value: 2

dead  value: 1

not monitored  value: 3

clock_time

Type: string

Show clock time in terms of hours, minutes and seconds

monitoring_statistics

Monitoring Statistics

time_in_pstate

Type: string

Time in previous state

ndead

Type: uinteger

Number of times dead

tt_in_dstate

Type: string

Total time in dead state

auth_statistics

Authentication Statistics

acct_statistics

Accounting Statistics

auth_failed_transactions

Type: uinteger

Authentication: Failed transactions

auth_succ_transactions

Type: uinteger

Authentication: Successful transactions

auth_req_sent

Type: uinteger

Authentication: Requests sent

auth_req_timedout

Type: uinteger

Authentication: Requests timedout

auth_resp_no_match

Type: uinteger

Authentication: Responses with no matching requests

auth_resp_not_processed

Type: uinteger

Authentication: Responses not processed

auth_resp_error

Type: uinteger

Authentication: Responses containing errors

acct_failed_transactions

Type: uinteger

Accounting: Failed transactions

acct_succ_transactions

Type: uinteger

Accounting: Successful transactions

acct_req_sent

Type: uinteger

Accounting: Requests sent

acct_req_timedout

Type: uinteger

Accounting: Requests timedout

acct_resp_no_match

Type: uinteger

Accounting: Responses with no matching requests

acct_resp_not_processed

Type: uinteger

Accounting: Responses not processed

acct_resp_error

Type: uinteger

Accounting: Responses containing errors

Command Modes

- /exec

show redundancy status

show redundancy status [ __readonly__ rmode_admin rmode_opr this_sup this_sup_rd_st this_sup_sup_st this_sup_int_st oth_sup oth_sup_rd_st oth_sup_sup_st oth_sup_int_st sys_strt_time sys_uptm_days sys_uptm_hrs sys_uptm_mins sys_uptm_secs kern_uptm_days kern_uptm_hrs kern_uptm_mins kern_uptm_secs asup_uptm_days asup_uptm_hrs asup_uptm_mins asup_uptm_secs ]

Syntax Description

redundancy

Show system redundancy status

status

Current redundancy status

__readonly__

rmode_admin

Type: string

rmode_opr

Type: string

this_sup

Type: string

this_sup_rd_st

Type: string

this_sup_sup_st

Type: string

this_sup_int_st

Type: string

oth_sup

Type: string

oth_sup_rd_st

Type: string

oth_sup_sup_st

Type: string

oth_sup_int_st

Type: string

sys_strt_time

Type: string

sys_uptm_days

Type: integer

sys_uptm_hrs

Type: integer

sys_uptm_mins

Type: integer

sys_uptm_secs

Type: integer

kern_uptm_days

Type: integer

kern_uptm_hrs

Type: integer

kern_uptm_mins

Type: integer

kern_uptm_secs

Type: integer

asup_uptm_days

Type: integer

asup_uptm_hrs

Type: integer

asup_uptm_mins

Type: integer

asup_uptm_secs

Type: integer

Command Modes

- /exec

show regexp

show { ip mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | ip bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] all | ip bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 { unicast | multicast } ] } regexp regexp-str [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

regexp

Display routes matching the AS path regular expression

regexp-str

Type: string

Regular expression to match the AS paths

Command Modes

- /exec

show resource

show resource [res-mgr-res-known-name] [ hidden-too | with-flags ] [ __readonly__ TABLE_vdc_resource_local res_name min max used unused free ]

Syntax Description

show

Show running system information

resource

Show resource configuration for VDC

res-mgr-res-known-name

Type: string

Resource name

hidden-too

Also show hidden resources

with-flags

Also show resource flags

__readonly__

Read Only

TABLE_vdc_resource_local

res_name

Type: string

Resource Name

min

Type: uinteger

Resource min configuration

max

Type: uinteger

Resource max configuration

used

Type: uinteger

Resource current usage for this VDC

unused

Type: uinteger

Resource reserved for this VDC but currently not used

free

Type: uinteger

Resource current free for this VDC

Command Modes

- /exec

show rip

show { ip } rip [ instance inst ] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_inst inst-name TABLE_vrf vrf port mcast-grp admin-dist update-tmr expire-tmr garbage-tmr def-metric max-paths def-rt-distrib def-distrib-always process-disabled out-of-mem [ TABLE_afi af TABLE_interface if-name TABLE_redistrib redistributing TABLE_clients pibname policy ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP routing protocol status

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_inst

inst-name

Type: string

TABLE_vrf

vrf

Type: vrf

port

Type: integer

mcast-grp

Type: ipaddr

admin-dist

Type: integer

update-tmr

Type: integer

expire-tmr

Type: integer

garbage-tmr

Type: integer

def-metric

Type: integer

max-paths

Type: integer

def-rt-distrib

Type: bool

def-distrib-always

Type: bool

process-disabled

Type: bool

out-of-mem

Type: bool

TABLE_afi

af

ipv4  value: 1

ipv6  value: 2

TABLE_interface

if-name

Type: interface

TABLE_redistrib

redistributing

Type: bool

TABLE_clients

pibname

Type: string

policy

Type: string

Command Modes

- /exec

show rip interface

show { ip } rip [ instance inst ] interface [interface] [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_inst inst-name TABLE_vrf vrf [ TABLE_inter if-name if-status protocol-up local-only no-addr-conf if-addr if-mask if-metric poison-reverse if-passive route-dist-filter in-policy out-policy [ TABLE_auth auth-ena auth-type auth-keychain ] [ TABLE_detail import-routes periodic-updates trigger-updates out-mcast-request out-ucast-update out-ucast-request in-mcast-update in-mcast-request in-ucast-update in-ucast-request bad-pkt bad-route ] ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP routing protocol status

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

interface

RIP interface

interface

Type: interface

RIP interface

detail

Detailed information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_inst

inst-name

Type: string

TABLE_vrf

vrf

Type: vrf

TABLE_inter

if-name

Type: interface

if-status

Type: string

protocol-up

Type: bool

local-only

Type: bool

no-addr-conf

Type: bool

if-addr

Type: ipaddr

if-mask

Type: integer

if-metric

Type: integer

poison-reverse

Type: bool

if-passive

Type: bool

route-dist-filter

Type: bool

in-policy

Type: string

out-policy

Type: string

TABLE_auth

auth-ena

Type: bool

auth-type

md5  value: 1

text  value: 2

none  value: 3

auth-keychain

Type: string

TABLE_detail

import-routes

Type: integer

periodic-updates

Type: integer

trigger-updates

Type: integer

out-mcast-request

Type: integer

out-ucast-update

Type: integer

out-ucast-request

Type: integer

in-mcast-update

Type: integer

in-mcast-request

Type: integer

in-ucast-update

Type: integer

in-ucast-request

Type: integer

bad-pkt

Type: integer

bad-route

Type: integer

Command Modes

- /exec

show rip memory

show { ip } rip [ instance inst ] memory [ __readonly__ TABLE_inst inst-name type size count hwm slab overhead total TABLE_total total-overhead total-total ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP status and configuration

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

memory

Display RIP memory usage information

__readonly__

TABLE_inst

inst-name

Type: string

type

Type: string

size

Type: integer

count

Type: integer

hwm

Type: integer

slab

Type: integer

overhead

Type: integer

total

Type: integer

TABLE_total

total-overhead

Type: integer

total-total

Type: integer

Command Modes

- /exec

show rip neighbor

show { ip } rip [ instance inst ] neighbor [interface] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_inst inst-name TABLE_vrf vrf numberof-adj dead-timer-seconds TABLE_adj adj-addr if-name last-response-sent last-response-rcvd last-request-sent last-request-rcvd last-response-sent-state last-response-rcvd-state last-request-sent-state last-request-rcvd-state in-bad-packets in-bad-routes ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP status and configuration

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

neighbor

RIP neighbor

interface

Type: interface

RIP interface

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_inst

inst-name

Type: string

TABLE_vrf

vrf

Type: vrf

numberof-adj

Type: integer

dead-timer-seconds

Type: integer

TABLE_adj

adj-addr

Type: ipaddr

if-name

Type: interface

last-response-sent-state

dead  value: 1

never  value: 2

running  value: 3

last-response-sent

Type: duration

last-response-rcvd-state

dead  value: 1

never  value: 2

running  value: 3

last-response-rcvd

Type: duration

last-request-sent-state

dead  value: 1

never  value: 2

running  value: 3

last-request-sent

Type: duration

last-request-rcvd-state

dead  value: 1

never  value: 2

running  value: 3

last-request-rcvd

Type: duration

in-bad-packets

Type: integer

in-bad-routes

Type: integer

Command Modes

- /exec

show rip route

show { ip } rip [ instance inst ] route [ { ipv6-prefix | ip-prefix } [ longer-prefixes | shorter-prefixes ] ] [summary] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_inst inst-name TABLE_vrf vrf [ TABLE_route best-route rt-prefix rt-mask rt-numnh TABLE_nexthop nh-direct nh-redistrib nh-addr nh-interface nh-metric nh-tag nh-state nh-state-timer ] [ TABLE_summary is-summary total-num-rts total-best-rts total-paths TABLE_rtspermask mask-length rts-per-mask ] ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP routing protocol status

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

route

RIP routes

summary

route counts

ipv6-prefix

Type: ipv6prefix

Exact prefix

ip-prefix

Type: ipprefix

Exact prefix

longer-prefixes

exact match and more specific routes

shorter-prefixes

exact match and less specific routes

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_inst

inst-name

Type: string

TABLE_vrf

vrf

Type: vrf

TABLE_route

best-route

Type: bool

rt-prefix

Type: ipaddr

rt-mask

Type: integer

rt-numnh

Type: integer

TABLE_nexthop

nh-direct

Type: bool

nh-redistrib

Type: bool

nh-addr

Type: ipaddr

nh-interface

Type: interface

nh-metric

Type: integer

nh-tag

Type: integer

nh-state

Type: string

nh-state-timer

Type: string

TABLE_summary

is-summary

Type: bool

total-num-rts

Type: integer

total-best-rts

Type: integer

total-paths

Type: integer

TABLE_rtspermask

mask-length

Type: integer

rts-per-mask

Type: integer

Command Modes

- /exec

show rip statistics

show { ip } rip [ instance inst ] statistics [ * | interface ] [ __readonly__ TABLE_inst inst-name TABLE_interface if-name periodic-updates trigger-updates out-mcast-request out-ucast-update out-ucast-request in-mcast-update in-mcast-request in-ucast-update in-ucast-request bad-pkt bad-route ]

Syntax Description

show

Show running system information

ip

Display IP information

rip

Display RIP status and configuration

instance

Process ID

inst

Type: string

pattern: [a-zA-Z0-9_][-a-zA-Z0-9_]*

length: 20

Process ID

statistics

RIP statistics

interface

Type: interface

RIP interface

*

RIP statistics for all interfaces

__readonly__

TABLE_inst

inst-name

Type: string

TABLE_interface

if-name

Type: interface

periodic-updates

Type: integer

trigger-updates

Type: integer

out-mcast-request

Type: integer

out-ucast-update

Type: integer

out-ucast-request

Type: integer

in-mcast-update

Type: integer

in-mcast-request

Type: integer

in-ucast-update

Type: integer

in-ucast-request

Type: integer

bad-pkt

Type: integer

bad-route

Type: integer

Command Modes

- /exec

show rmon

show rmon { alarms | events | hcalarms | info | logs } [ __readonly__ [ TABLE_rmon_alarm alaram-str ascii-buf-str samp-type-str ris-trshod-str fall-trshod-str start-enable-str ] [ TABLE_rmon_event ev-alaram-str ev-desc-str ev-fir-cause last-fired ] [ TABLE_rmon_hcala hc-alaram-str hc-ascii-buf-str hc-sam-ty-str hc-ris-thresh-str hc-fal-thresh-str start-alrm-str fail-attem-str ] [ TABLE_rmon_info max-32-64-ala-str max-conf-32-ala-str max-conf-64-ala-str ] [ TABLE_rmon_log event-id-str rmon-pch [log-buff-str] log-oid ] ]

Syntax Description

show

Show running system information

rmon

Display RMON statistics

alarms

Display the RMON alarm table

events

Display the RMON event table

hcalarms

Display the RMON HC(High Capacity) Alarm table

info

Display the RMON info

logs

Display the RMON event log table

__readonly__

TABLE_rmon_alarm

alaram-str

Type: string

ascii-buf-str

Type: string

samp-type-str

Type: string

ris-trshod-str

Type: string

fall-trshod-str

Type: string

start-enable-str

Type: string

TABLE_rmon_event

ev-alaram-str

Type: string

ev-desc-str

Type: string

ev-fir-cause

Type: string

last-fired

Type: string

TABLE_rmon_hcala

hc-alaram-str

Type: string

hc-ascii-buf-str

Type: string

hc-sam-ty-str

Type: string

hc-ris-thresh-str

Type: string

hc-fal-thresh-str

Type: string

start-alrm-str

Type: string

fail-attem-str

Type: string

TABLE_rmon_info

max-32-64-ala-str

Type: string

max-conf-32-ala-str

Type: string

max-conf-64-ala-str

Type: string

TABLE_rmon_log

event-id-str

Type: string

rmon-pch

Type: string

log-buff-str

Type: string

log-oid

Type: string

Command Modes

- /exec

show role

show role [ name arg3 ] [ __readonly__ TABLE_role role_name role_description [attribute_scope] [permit_vsan] [permit_vlan] [permit_interface] [permit_vrf] TABLE_rule rule_num rule_action { rule_permission | rule_permission_mds } [rule_featuretype] [rule_entity] ]

Syntax Description

show

Show running system information

role

Show role configuration

name

Enter the role name

arg3

Type: userdef

Enter the role name

__readonly__

TABLE_role

role_name

Type: string

role_description

Type: string

attribute_scope

global  value: 0x00000001

local  value: 0x00000002

permit_vsan

Type: bitmap

permit_vlan

Type: bitmap

permit_interface

Type: interface-mrange

permit_vrf

Type: string

TABLE_rule

rule_num

Type: integer

min: 1  max: 256

rule_action

permit  value: 1

deny  value: 2

rule_permission

read  value: 1

read-write  value: 2

command  value: 3

rule_permission_mds

show  value: 11

config  value: 12

clear  value: 13

debug  value: 14

exec  value: 15

rule_featuretype

Type: _enum

rule_entity

Type: string

Command Modes

- /exec

show role feature-group

show role feature-group [ name arg4 ] [detail] [ __readonly__ TABLE_role_feature_group feature_group_name TABLE_role_feature feature_name [ TABLE_role_feature_rule feature_rule ] ]

Syntax Description

show

Show running system information

role

Show role configuration

feature-group

Role feature group

name

Enter the feature-group name

arg4

Type: string

length: 16

Feature-group name

detail

Detailed information including feature rules

__readonly__

TABLE_role_feature_group

feature_group_name

Type: string

TABLE_role_feature

feature_name

Type: string

TABLE_role_feature_rule

feature_rule

Type: string

Command Modes

- /exec

show role feature

show role feature [ name arg5 | detail ] [ __readonly__ TABLE_role_feature feature_name [ TABLE_role_feature_rule feature_rule ] ]

Syntax Description

show

Show running system information

role

Show role configuration

feature

Role feature

name

Enter the feature name

arg5

Type: string

length: 16

Feature name

detail

Detailed information including feature rules

__readonly__

TABLE_role_feature

feature_name

Type: string

TABLE_role_feature_rule

feature_rule

Type: string

Command Modes

- /exec

show rollback log

show rollback log { exec | verify } [ __readonly__ log_entry+ ]

Syntax Description

show

Show running system information

rollback

Show rollback

log

show rollback log

exec

show rollback execution log

verify

show rollback verify log

__readonly__

Read only

log_entry

Type: string

length: 256

log entry from rollback log

Command Modes

- /exec

show rollback status

show rollback status

Syntax Description

show

Show running system information

rollback

show rollback

status

show status of last rollback operation

Command Modes

- /exec

show route-map

show route-map [ route-map-name | route-map-cfg-name ] [ __readonly__ TABLE_rmap name seq action [descript] [continue] [ TABLE_rmap_match match_type match_stmt ] [ TABLE_rmap_set set_type set_stmt ] ]

Syntax Description

show

Show running system information

route-map

Route-map information

route-map-name

Type: string

pattern: [!-~]*

length: 63

Route-map name

route-map-cfg-name

Type: string

Known route-map name

__readonly__

TABLE_rmap

TABLE_rmap_match

TABLE_rmap_set

name

Type: string

seq

Type: uinteger

action

Type: string

descript

Type: string

continue

Type: uinteger

match_type

Type: string

match_stmt

Type: string

set_type

Type: string

set_stmt

Type: string

Command Modes

- /exec

show route-map pbr-statistics

show route-map { pbr_rmap_name | pbr_rmap_cfg_name } pbr-statistics [ __readonly__ tag action seq pbr_pkt_count dflt_rtg_pkt_count ]

Syntax Description

show

Show running system information

route-map

Route-map information

pbr_rmap_name

Type: string

pattern: [!-~]*

length: 63

Route-map name

pbr_rmap_cfg_name

Type: string

Known route-map name

pbr-statistics

PBR statistics

__readonly__

tag

Type: string

action

Type: string

seq

Type: uinteger

pbr_pkt_count

Type: longlong

dflt_rtg_pkt_count

Type: longlong

Command Modes

- /exec

show route

show { l2 | fabricpath } route [ topology { topo_val [ switchid switchid ] | all } | switchid switchid ] [ detail | hex ] + [ __readonly__ line_marker is_hex TABLE_route topo_id ftag_value swid sswid num_paths TABLE_path path_str admin_distance metric time time_detail uuid ]

Syntax Description

show

Show running system information

l2

Layer2 information

fabricpath

fabricpath information

route

Show FabricPath route information

topology

topology

topo_val

Type: uinteger

min: 0  max: 63

topology value

switchid

switchid

switchid

Type: uinteger

min: 0  max: 16383

switchid value

all

all topologies

detail

detail

hex

display in hex

__readonly__

Read Only

line_marker

Type: string

line marker

is_hex

Type: string

print in hex

TABLE_route

Route delimiter

topo_id

Type: uinteger

topo-id value

ftag_value

Type: uinteger

ftag value

swid

Type: uinteger

switch-id

sswid

Type: uinteger

sub-switch id

num_paths

Type: uinteger

num of paths

TABLE_path

Path delimiter

path_str

Type: string

paths

admin_distance

Type: uinteger

admin distance

metric

Type: uinteger

metric

time

Type: uinteger

time

time_detail

Type: uinteger

time_detail

uuid

Type: string

uuid

Command Modes

- /exec

show routing-context

show routing-context

Syntax Description

show

Show running system information

routing-context

Display the current routing context

Command Modes

- /exec

show routing-privilege

show routing-privilege

Syntax Description

show

Show running system information

routing-privilege

Display the current privilege level

Command Modes

- /exec

show routing clients

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ ip | ipv4 ] [unicast] [ topology topology-name ] clients [ client | protocol ] [ __readonly__ TABLE_client client_name pib_index epid [mts_sap] [mts_sap_str] mru_cache_hits mru_cache_misses pib_stale_time pss_created [bad_l3vm_table_refcount] [pib_stale_timer] [ TABLE_nib_node uribtibtype_contextname [all_igp] [self] [all] [unib_notify_mask] routes rnhs labels [convg_req_mask] [convg_send_mask] [utib_state] [pending_timer] [urib_state_invalid] ] [ TABLE_msgs_rcvd urib_mtype_str upib_rcvd ] [ TABLE_msgs_sent urib_mtype_str upib_sent ] ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

topology

Display per-topology information

topology-name

Type: string

topology name

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

clients

Display urib client information

client

Type: string

Display single urib client information

protocol

Type: string

Display single urib client information

__readonly__

TABLE_client

client_name

Type: string

pib_index

Type: hex

epid

Type: integer

mts_sap

Type: integer

mts_sap_str

Type: string

mru_cache_hits

Type: integer

mru_cache_misses

Type: integer

pib_stale_time

Type: integer

pss_created

Type: string

bad_l3vm_table_refcount

Type: integer

pib_stale_timer

Type: string

TABLE_nib_node

uribtibtype_contextname

Type: string

all_igp

Type: string

self

Type: string

all

Type: string

unib_notify_mask

Type: hex

routes

Type: integer

rnhs

Type: integer

labels

Type: integer

convg_req_mask

Type: hex

convg_send_mask

Type: hex

utib_state

Type: string

pending_timer

Type: string

urib_state_invalid

Type: string

TABLE_msgs_rcvd

urib_mtype_str

Type: string

upib_rcvd

Type: integer

TABLE_msgs_sent

urib_mtype_str

Type: string

upib_sent

Type: integer

Command Modes

- /exec

show routing hash

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ ip | ipv4 ] [unicast] [ topology topology-name ] hash source dest [ ip-proto ip-proto ] [ src-port dest-port ] [ in-interface in-interface ] [ module module-id ] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_addrf addrf TABLE_hashpath mcast hashpath hash-val TABLE_prefix ipprefix ucast-nhops mcast-nhops attached TABLE_path ubest mbest ipnexthop ifname pref metric uptime clientname [type] [tag] [stale] [unres] [hidden] [stale-label] ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

hash

Display load-balancing hash information

mpls

MPLS path load-balancing hash information Not available in this release.

ip-prefix

Type: ipprefix

Exact match IP prefix

eos

Set End-of-Stack to 1

source

Type: ipaddr

Source IPv4 address of unicast flow or group address for multicast flow

dest

Type: ipaddr

Destination IPv4 address of unicast flow or source address for multicast flow

v6-source

Type: ipv6addr

Source IPv6 address of unicast flow or group address for multicast flow

v6-dest

Type: ipv6addr

Destination IPv6 address of unicast flow or source address for multicast flow

l2vpn

MPLS path load-balancing hash information Not available in this release.

label

Type: uinteger

min: 1  max: 1048575

remote_vc_label

src-port

Type: integer

min: 1  max: 65535

Source-port

dest-port

Type: integer

min: 1  max: 65535

Destination-port

interface

Display routes with this output interface only

interface

Type: interface

Interface Name

in-interface

Incoming Interface for Packet

in-interface

Type: interface

Interface Name

ip-proto

IP Protocol information for the packet

ip-proto

Type: integer

min: 0  max: 255

IP Protocol information for the packet

module

Module

module-id

Type: integer

min: 1  max: 32

Module

__readonly__

TABLE_vrf

vrf-name-out

Type: vrf

TABLE_addrf

addrf

ipv4  value: 1

TABLE_hashpath

mcast

Type: bool

hashpath

Type: ipaddr

hash-val

Type: integer

TABLE_prefix

ipprefix

Type: ipaddr

ucast-nhops

Type: integer

mcast-nhops

Type: integer

attached

Type: bool

TABLE_path

ubest

Type: bool

mbest

Type: bool

ipnexthop

Type: ipaddr

ifname

Type: interface

pref

Type: integer

metric

Type: integer

uptime

Type: duration

clientname

Type: string

type

unknown  value: 1

value: 2

value: 3

value: 4

rip  value: 5

L1  value: 6

L2  value: 7

intra  value: 8

inter  value: 9

type-1  value: 10

type-2  value: 11

nssa type-1  value: 12

nssa type-2  value: 13

intra  value: 14

inter  value: 15

type-1  value: 16

type-2  value: 17

nssa type-1  value: 18

nssa type-2  value: 19

internal  value: 20

external  value: 21

internal  value: 22

external  value: 23

discard  value: 24

internal  value: 25

external  value: 26

invalid-route-type  value: 27

tag

Type: integer

stale

Type: bool

unres

Type: bool

hidden

Type: bool

stale-label

Type: bool

Command Modes

- /exec

show routing hidden-nh

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ ip | ipv4 ] [unicast] [ topology topology-name ] hidden-nh [ __readonly__ uribtibtype_contextname [utibtibtype_topologyname] TABLE_hidden_nh hidden_nh_uhn_prefix hidden_nh_uhn_mask_len pib rnh rnh_mask_len ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

hidden-nh

Display hidden next-hop information

__readonly__

uribtibtype_contextname

Type: string

utibtibtype_topologyname

Type: string

TABLE_hidden_nh

hidden_nh_uhn_prefix

Type: ipaddr

hidden_nh_uhn_mask_len

Type: integer

pib

Type: string

rnh

Type: ipaddr

rnh_mask_len

Type: integer

Command Modes

- /exec

show routing ip ipv4 multicast lisp encap __readonly__

show routing [ ip | ipv4 ] multicast lisp encap [ __readonly__ mrib-list-encap TABLE_mrib_list_encap encap-index source-rloc dest-rloc ref-count ]

Syntax Description

show

Show running system information

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

lisp

LISP related information

encap

All the encap indices

__readonly__

mrib-list-encap

Type: string

TABLE_mrib_list_encap

encap-index

Type: integer

source-rloc

Type: string

dest-rloc

Type: string

ref-count

Type: integer

Command Modes

- /exec

show routing ipv6 clients

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] ipv6 [unicast] [ topology topology-name ] clients [ client | ipv6-protocol ] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_client client_name pib_index pib_state pib_id multicast_or_unicast_pib mru_cache_hits mru_cache_misses [mts_sap] [mts_sap_str] [bad_l3vm_table_refcount] pib_stale_time [ TABLE_nib_node u6ribtibtype_contextname routes rnhs [ TABLE_notifeee_mask [u6pib_name] [index] ] [u6tib_state] [pending_timer] [u6rib_state_invalid] [u6nib_notifier_all] [ TABLE_notify_rcd notify_rcd_name notify_rcd_handle [notifier_pib_u6pib_index] ] [ TABLE_notifiee_nib notifiee_pib_u6pib_name u6nib_notify_handle ] ] [ TABLE_ready_client_event_queue queue_name queue_count [ TABLE_client_event event use_buf sched resend buf [state] ] ] [ TABLE_buffer_rqst_client_event_queue queue_name queue_count [ TABLE_client_event event use_buf sched resend buf [state] ] ] update_ack_queue_count [ TABLE_update_ack update_ack update_ack_data update_ack_type update_ack_xid ] [ TABLE_route_buffer_used_queue queue_name queue_count [ TABLE_clt_buf clt_buf clt_buf_count clt_buf_xid ] ] [ TABLE_rnh_buffer_used_queue queue_name queue_count [ TABLE_clt_buf clt_buf clt_buf_count clt_buf_xid ] ] [ TABLE_msgs_rcvd u6rib_mtype_str u6pib_rcvd ] [ TABLE_msgs_sent u6rib_mtype_str u6pib_sent ] ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ipv6

Display IPv6 information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

clients

Display u6rib client information

client

Type: string

Display single u6rib client information

ipv6-protocol

Type: string

Display single u6rib client information

__readonly__

TABLE_client

client_name

Type: string

pib_index

Type: integer

pib_state

Type: string

pib_id

Type: hex

multicast_or_unicast_pib

Type: string

mru_cache_hits

Type: integer

mru_cache_misses

Type: integer

mts_sap

Type: integer

mts_sap_str

Type: string

bad_l3vm_table_refcount

Type: integer

pib_stale_time

Type: integer

TABLE_nib_node

u6ribtibtype_contextname

Type: string

routes

Type: integer

rnhs

Type: integer

TABLE_notifeee_mask

u6pib_name

Type: string

index

Type: integer

u6tib_state

Type: string

pending_timer

Type: string

u6rib_state_invalid

Type: bool

u6nib_notifier_all

Type: bool

TABLE_notify_rcd

notify_rcd_name

Type: string

notify_rcd_handle

Type: integer

notifier_pib_u6pib_index

Type: integer

TABLE_notifiee_nib

notifiee_pib_u6pib_name

Type: string

u6nib_notify_handle

Type: integer

TABLE_ready_client_event_queue

queue_name

Type: string

queue_count

Type: integer

TABLE_client_event

event

Type: hex

use_buf

Type: integer

sched

Type: integer

resend

Type: integer

buf

Type: hex

state

Type: string

TABLE_buffer_rqst_client_event_queue

queue_name

Type: string

queue_count

Type: integer

TABLE_client_event

event

Type: hex

use_buf

Type: integer

sched

Type: integer

resend

Type: integer

buf

Type: hex

state

Type: string

update_ack_queue_count

Type: integer

TABLE_update_ack

update_ack

Type: hex

update_ack_data

Type: hex

update_ack_type

Type: integer

update_ack_xid

Type: integer

TABLE_route_buffer_used_queue

queue_name

Type: string

queue_count

Type: integer

TABLE_clt_buf

clt_buf

Type: hex

clt_buf_count

Type: integer

clt_buf_xid

Type: integer

TABLE_rnh_buffer_used_queue

queue_name

Type: string

queue_count

Type: integer

TABLE_clt_buf

clt_buf

Type: hex

clt_buf_count

Type: integer

clt_buf_xid

Type: integer

TABLE_msgs_rcvd

u6rib_mtype_str

Type: string

u6pib_rcvd

Type: integer

TABLE_msgs_sent

u6rib_mtype_str

Type: string

u6pib_sent

Type: integer

Command Modes

- /exec

show routing ipv6 hash

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] ipv6 [unicast] [ topology topology-name ] hash [ mpls ipv6-prefix [eos] ] source dest [ ip-proto ip-proto ] [ src-port dest-port ] [ in-interface in-interface ] [ module module-id ] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_vrf vrf-name-out [hash-type] [mcast] [hashpath] TABLE_prefix ipprefix ucast-nhops mcast-nhops attached TABLE_path [ubest] [mbest] [ipnexthop] [ifname] pref metric uptime clientname [type] [tag] [stale] [hidden] ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ipv6

Display IPv6 information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

hash

Display load-balancing hash information

mpls

MPLS path load-balancing hash information Not available in this release.

ipv6-prefix

Type: ipv6prefix

Exact match IPv6 prefix

eos

Set End-of-Stack to 1

source

Type: ipv6addr

Source address of unicast flow or group address for multicast flow

dest

Type: ipv6addr

Destination address of unicast flow or source address for multicast flow

ip-proto

IP Protocol information for the packet

ip-proto

Type: integer

min: 0  max: 255

IP Protocol information for the packet

src-port

Type: integer

min: 1  max: 65535

Source-port

dest-port

Type: integer

min: 1  max: 65535

Destination-port

in-interface

Incoming Interface for Packet

in-interface

Type: interface

Interface Name

module

Module

module-id

Type: integer

min: 1  max: 32

Module

__readonly__

TABLE_vrf

vrf-name-out

Type: vrf

hash-type

Type: integer

mcast

Type: bool

hashpath

Type: ipaddr

TABLE_prefix

ipprefix

Type: string

ucast-nhops

Type: integer

mcast-nhops

Type: integer

attached

Type: bool

TABLE_path

ubest

Type: bool

mbest

Type: bool

ipnexthop

Type: ipv6addr

ifname

Type: interface

pref

Type: integer

tag

Type: integer

metric

Type: integer

uptime

Type: string

clientname

Type: string

type

Type: string

stale

Type: bool

hidden

Type: bool

Command Modes

- /exec

show routing ipv6 hidden-nh

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] ipv6 [unicast] [ topology topology-name ] hidden-nh [ __readonly__ uribtibtype_contextname TABLE_hidden_nh nh nh-iod hidden_nh_uhn_prefix hidden_nh_uhn_mask_len pib rnh rnh_mask_len ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ipv6

Display IPv6 information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

hidden-nh

Display hidden next-hop information

__readonly__

uribtibtype_contextname

Type: string

TABLE_hidden_nh

nh

Type: string

nh-iod

Type: integer

hidden_nh_uhn_prefix

Type: ipaddr

hidden_nh_uhn_mask_len

Type: integer

pib

Type: string

rnh

Type: ipaddr

rnh_mask_len

Type: integer

Command Modes

- /exec

show routing ipv6 memory estimate

show routing ipv6 [unicast] memory estimate [ routes route-count next-hops nh-count ] [labels] [ __readonly__ curr-max-MB curr-max-routes curr-max-nh inuse-MB inuse-routes inuse-nh conf-max-MB conf-max-routes conf-max-nh [ est-MB est-routes est-nh ] ]

Syntax Description

show

Show running system information

routing

Display routing information

ipv6

Display IPv6 information

unicast

Display unicast information

memory

Display u6rib memory information

estimate

Display u6rib memory estimate

routes

Display u6rib memory estimate for # routes

route-count

Type: integer

min: 1000  max: 1000000

Number of routes

next-hops

Display u6rib memory estimate for # next-hops per route

nh-count

Type: integer

min: 1  max: 64

Number of next-hops per route

labels

When the routes are associated with next hop labels

__readonly__

curr-max-MB

Type: integer

curr-max-routes

Type: integer

curr-max-nh

Type: integer

inuse-MB

Type: integer

inuse-routes

Type: integer

inuse-nh

Type: integer

conf-max-MB

Type: integer

conf-max-routes

Type: integer

conf-max-nh

Type: integer

est-MB

Type: integer

est-routes

Type: integer

est-nh

Type: integer

Command Modes

- /exec

show routing ipv6 memory statistics

show routing ipv6 [unicast] memory statistics [ __readonly__ TABLE_shrd_mem rbuf-alloc rbuf-high-water rbuf-max rbuf-numalloc slbs-alloc slbs-high-water slbs-max slbs-numalloc TABLE_u6rib_slabs slab-name alloc-count max-allocs slab-size TABLE_u6rib_blks slab-blk-name block-count max-blocks slab-count TABLE_u6rib_routes_rnhs ctx-name user-nodes total-nodes elem-size ]

Syntax Description

show

Show running system information

routing

Display routing information

ipv6

Display IPv6 information

unicast

Display unicast routing information

memory

Display u6rib memory information

statistics

Display u6rib memory statistics

__readonly__

TABLE_shrd_mem

TABLE_u6rib_slabs

TABLE_u6rib_blks

TABLE_u6rib_routes_rnhs

ctx-name

Type: string

slab-name

Type: string

slab-blk-name

Type: string

rbuf-alloc

Type: uinteger

rbuf-high-water

Type: uinteger

rbuf-max

Type: uinteger

rbuf-numalloc

Type: uinteger

slbs-alloc

Type: uinteger

slbs-high-water

Type: uinteger

slbs-max

Type: uinteger

slbs-numalloc

Type: uinteger

user-nodes

Type: uinteger

total-nodes

Type: uinteger

elem-size

Type: uinteger

alloc-count

Type: uinteger

max-allocs

Type: uinteger

slab-size

Type: uinteger

block-count

Type: uinteger

max-blocks

Type: uinteger

slab-count

Type: uinteger

Command Modes

- /exec

show routing ipv6 nexthop info

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] ipv6 [unicast] [ topology topology-name ] nexthop info [ vrf { vrf-name | vrf-known-name | vrf-all } ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ipv6

Display IPv6 information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

nexthop

Show the nh_info tree

info

Show the nh_info tree

Command Modes

- /exec

show routing ipv6 nhlfe

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] ipv6 [unicast] [ topology topology-name ] nhlfe [stats] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_vrf vrf-name-out [ nhlfe-owner nhlfe-refcount TABLE_nhlabel nhlabel-index nh-label nhlfe-is-vpn nhlfe-owner-index ] total-entries ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ipv6

Display IPv6 information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

nhlfe

Display NHLFE db

stats

Display statistics

__readonly__

TABLE_vrf

vrf-name-out

Type: vrf

nhlfe-owner

Type: string

nhlfe-refcount

Type: integer

TABLE_nhlabel

nhlabel-index

Type: integer

nh-label

Type: string

nhlfe-is-vpn

Type: string

nhlfe-owner-index

Type: string

total-entries

Type: integer

Command Modes

- /exec

show routing ipv6 recursive-next-hop

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] ipv6 [unicast] [ topology topology-name ] recursive-next-hop [ipv6-addr] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_addrf addrf TABLE_prefix ipprefix uptime TABLE_clients client-req client-pend ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ipv6

Display IPv6 information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

recursive-next-hop

Display recursive next-hop table

ipv6-addr

Type: ipv6addr

Display single recursive virtual next-hop

__readonly__

TABLE_vrf

vrf-name-out

Type: vrf

TABLE_addrf

addrf

ipv6  value: 1

TABLE_prefix

ipprefix

Type: ipv6prefix

uptime

Type: duration

TABLE_clients

client-req

Type: string

client-pend

Type: string

Command Modes

- /exec

show routing memory estimate

show routing [ ip | ipv4 ] [unicast] memory estimate [ routes route-count next-hops nh-count ] [labels] [ __readonly__ current_max_mb current_max_routes urib_max_nh used_mb route_stats_alloc_count nhs configured_max_mb configured_max_routes urib_routes_max_nh [ estimate_mb estimate_routes estimate_nhs estimate_with_mvpn_mb estimate_with_ospf_mb estimate_with_eigrp_mb ] ]

Syntax Description

show

Show running system information

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

memory

Display urib memory information

estimate

Display urib memory estimate

routes

Display urib memory estimate for # routes

route-count

Type: integer

min: 1000  max: 1000000

Number of routes

next-hops

Display urib memory estimate for # next-hops per route

nh-count

Type: integer

min: 1  max: 64

Number of next-hops per route

labels

When the routes are associated with next hop labels

__readonly__

current_max_mb

Type: integer

current_max_routes

Type: integer

urib_max_nh

Type: integer

used_mb

Type: integer

route_stats_alloc_count

Type: integer

nhs

Type: integer

configured_max_mb

Type: integer

configured_max_routes

Type: integer

urib_routes_max_nh

Type: integer

estimate_mb

Type: integer

estimate_routes

Type: integer

estimate_nhs

Type: integer

estimate_with_mvpn_mb

Type: integer

estimate_with_ospf_mb

Type: integer

estimate_with_eigrp_mb

Type: integer

Command Modes

- /exec

show routing memory statistics

show routing [ ip | ipv4 ] [unicast] memory statistics [ __readonly__ TABLE_shrd_mem ubuf-alloc ubuf-high-water ubuf-max ubuf-numalloc rbuf-alloc rbuf-high-water rbuf-max rbuf-numalloc slbs-alloc slbs-high-water slbs-max slbs-numalloc TABLE_urib_slabs slab-name slab-alloc-count slab-max-allocs slab-size TABLE_urib_blks block-name block-count max-blocks blks-count TABLE_urib_routes_rnhs ctx-name user-node total-node elem-size ]

Syntax Description

show

Show running system information

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

memory

Display urib memory information

statistics

Display urib memory statistics

__readonly__

TABLE_shrd_mem

ubuf-alloc

Type: uinteger

ubuf-high-water

Type: uinteger

ubuf-max

Type: uinteger

ubuf-numalloc

Type: uinteger

rbuf-alloc

Type: uinteger

rbuf-high-water

Type: uinteger

rbuf-max

Type: uinteger

rbuf-numalloc

Type: uinteger

slbs-alloc

Type: uinteger

slbs-high-water

Type: uinteger

slbs-max

Type: uinteger

slbs-numalloc

Type: uinteger

TABLE_urib_slabs

slab-name

Type: string

slab-alloc-count

Type: uinteger

slab-max-allocs

Type: uinteger

slab-size

Type: uinteger

TABLE_urib_blks

block-name

Type: string

block-count

Type: uinteger

max-blocks

Type: uinteger

blks-count

Type: uinteger

TABLE_urib_routes_rnhs

ctx-name

Type: string

user-node

Type: uinteger

total-node

Type: uinteger

elem-size

Type: uinteger

Command Modes

- /exec

show routing multicast

show routing [ ip | ipv4 ] multicast { [bitfield] [detail] | rp | [group] summary [ software-forwarded | rpf-failed ] | summary [ count | software-forwarded | rpf-failed ] | { source group | { group [source] | group shared-tree | group source-tree } | shared-tree | source-tree } { [flags] | [detail] | [ summary [ software-forwarded | rpf-failed ] | bitfield ] } } [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name TABLE_addr mcast-addrs bidir uptime pending if-name rpf-nbr internal rpf-nbr-uptime oif-count TABLE_mpib mpib-name stale-route TABLE_oif oif-name oif-uptime mpib-refcount TABLE_oif_mpib oif-mpib-name stale-oif ]

Syntax Description

show

Show running system information

ip

Display IP information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

routing

Display routing information

ipv4

Display IP information

multicast

Display multicast information

summary

Display route counts

shared-tree

Display route for *,G entries

source-tree

Display route for S,G entries

software-forwarded

Display software switched route counts only

rpf-failed

Display RPF failure statistics

rp

Display RP routes (RP, 0.0.0.0/32)

group

Type: ipaddr

Display multicast group/source address for route

source

Type: ipaddr

Display multicast group/source address for route

count

Display route counts only

bitfield

Display bitfield details

detail

Display detailed route attributes

flags

Display detailed route attributes

__readonly__

TABLE_vrf

vrf-name

Type: vrf

TABLE_addr

mcast-addrs

Type: string

bidir

Type: bool

pending

Type: bool

uptime

Type: duration

if-name

Type: interface

rpf-nbr

Type: ipaddr

internal

Type: bool

rpf-nbr-uptime

Type: duration

oif-count

Type: integer

TABLE_mpib

mpib-name

Type: string

stale-route

Type: bool

TABLE_oif

oif-name

Type: string

oif-uptime

Type: duration

mpib-refcount

Type: integer

TABLE_oif_mpib

oif-mpib-name

Type: string

stale-oif

Type: bool

Command Modes

- /exec

show routing multicast clients

show routing [ ip | ipv4 ] multicast clients [client-name] [ __readonly__ TABLE_mpib mpib_name mpib_index mpib_pid mpib_mts_sap mpib_shm stale_timer join_notify prune_notify rpf_notify delete_notify repopulate_notify pending_mpib ssm_owner bidir_owner static_owner shared_only_owner locally_joined_owner external_owner mdt_owner sticky_iif_owner data_created_owner internal_owner prune_owner attached_owner otv_decap_owner secondary_owner encap_index_owner force_punt_owner multi_route_owner notify_sent notify_ack_rcvd notify_fail add_route_req_rcvd add_route_ack_sent add_route_ack_fail delete_route_req_rcvd delete_route_ack_sent delete_route_ack_fail update_route_req_rcvd update_route_ack_sent update_route_ack_fail update_mdt_info_req_rcvd update_mdt_info_ack_sent update_mdt_info_ack_fail mts_update_route_req_rcvd mts_update_route_ack_sent mts_update_route_ack_fail notify_member_count ]

Syntax Description

show

Show running system information

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

clients

Display multicast routing client information

client-name

Type: string

Multicast routing client name

__readonly__

TABLE_mpib

mpib_name

Type: string

mpib_index

Type: uinteger

mpib_pid

Type: uinteger

mpib_mts_sap

Type: uinteger

mpib_shm

Type: string

stale_timer

Type: bool

join_notify

Type: bool

prune_notify

Type: bool

rpf_notify

Type: bool

delete_notify

Type: bool

repopulate_notify

Type: bool

ssm_owner

Type: bool

bidir_owner

Type: bool

static_owner

Type: bool

shared_only_owner

Type: bool

locally_joined_owner

Type: bool

external_owner

Type: bool

mdt_owner

Type: bool

sticky_iif_owner

Type: bool

data_created_owner

Type: bool

internal_owner

Type: bool

prune_owner

Type: bool

attached_owner

Type: bool

otv_decap_owner

Type: bool

secondary_owner

Type: bool

encap_index_owner

Type: bool

force_punt_owner

Type: bool

multi_route_owner

Type: bool

notify_sent

Type: integer

notify_ack_rcvd

Type: integer

notify_fail

Type: integer

add_route_req_rcvd

Type: integer

add_route_ack_sent

Type: integer

add_route_ack_fail

Type: integer

delete_route_req_rcvd

Type: integer

delete_route_ack_sent

Type: integer

delete_route_ack_fail

Type: integer

update_route_req_rcvd

Type: integer

update_route_ack_sent

Type: integer

update_route_ack_fail

Type: integer

update_mdt_info_req_rcvd

Type: integer

update_mdt_info_ack_sent

Type: integer

update_mdt_info_ack_fail

Type: integer

mts_update_route_req_rcvd

Type: integer

mts_update_route_ack_sent

Type: integer

mts_update_route_ack_fail

Type: integer

notify_member_count

Type: integer

pending_mpib

Type: bool

Command Modes

- /exec

show routing multicast mdt encapsulation

show routing [ ip | ipv4 ] multicast mdt encapsulation [detail] [ vrf { vrf-name | vrf-known-name | all } ] [ __readonly__ TABLE_vrf vrf-name TABLE_mdt index group source count delete-pending ]

Syntax Description

show

Show running system information

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

mdt

Multicast Distribution Tree

encapsulation

Encapsulation Information

detail

Display detailed information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display information for all VRFs

__readonly__

TABLE_vrf

vrf-name

Type: vrf

TABLE_mdt

index

Type: integer

group

Type: ipaddr

source

Type: ipaddr

count

Type: integer

delete-pending

Type: bool

Command Modes

- /exec

show routing multicast memory estimate

show routing [ ip | ipv4 ] multicast memory estimate [ groups group-count sources-per-group source-count oifs-per-entry oif-count [ mdt-encap-entries encap-entry-count ] ] [ __readonly__ TABLE_currentmax max-mb max-groups sources-per-group oifs-per-entry TABLE_inuse used-kb alloc-count sources-per-group oifs-per-entry mdt-encap-entry TABLE_configuredmax max-mb max-groups sources-per-group oifs-per-entry TABLE_estimate estimate-mb groups sources-per-group oifs-per-entry mdt-encap-entry ]

Syntax Description

show

Show running system information

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

memory

Display mrib memory information

estimate

Display mrib memory estimate

groups

Display mrib memory estimate for # groups

group-count

Type: integer

min: 1  max: 100000

Number of groups

sources-per-group

Display mrib memory estimate for # sources per group

source-count

Type: integer

min: 1  max: 10000

Number of sources per route

oifs-per-entry

Display mrib memory estimate for # oifs per (S,G) or (*,G) entry

oif-count

Type: integer

min: 1  max: 10000

Number of oifs per entry

mdt-encap-entries

Display mrib memory estimate for # mdt encap entries

encap-entry-count

Type: integer

min: 1  max: 100000

Number of mdt encap entries

__readonly__

TABLE_currentmax

max-mb

Type: integer

max-groups

Type: integer

sources-per-group

Type: integer

oifs-per-entry

Type: integer

TABLE_inuse

used-kb

Type: integer

alloc-count

Type: integer

sources-per-group

Type: integer

oifs-per-entry

Type: integer

mdt-encap-entry

Type: integer

TABLE_configuredmax

max-mb

Type: integer

max-groups

Type: integer

sources-per-group

Type: integer

oifs-per-entry

Type: integer

TABLE_estimate

estimate-mb

Type: integer

groups

Type: integer

sources-per-group

Type: integer

oifs-per-entry

Type: integer

mdt-encap-entry

Type: integer

Command Modes

- /exec

show routing nhlfe

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ ip | ipv4 ] [unicast] [ topology topology-name ] nhlfe [stats] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_vrf vrf-name-out [ nhlfe-owner nhlfe-refcount TABLE_nhlabel nhlabel-index nh-label nhlfe-is-vpn nhlfe-owner-index ] total-entries ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

nhlfe

Display URIB NHLFE db

stats

Display statistics

__readonly__

TABLE_vrf

vrf-name-out

Type: vrf

nhlfe-owner

Type: string

nhlfe-refcount

Type: integer

TABLE_nhlabel

nhlabel-index

Type: integer

nh-label

Type: string

nhlfe-is-vpn

Type: string

nhlfe-owner-index

Type: string

total-entries

Type: integer

Command Modes

- /exec

show routing recursive-next-hop

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ ip | ipv4 ] [unicast] [ topology topology-name ] recursive-next-hop [ip-addr] [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_addrf addrf TABLE_prefix ipprefix uptime TABLE_clients clientname ]

Syntax Description

show

Show running system information

routing

Display routing information

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

topology

Display per-topology information

recursive-next-hop

Display recursive next-hop table

topology-name

Type: string

topology name

ip-addr

Type: ipaddr

Display single recursive virtual next-hop

__readonly__

TABLE_vrf

vrf-name-out

Type: vrf

TABLE_addrf

addrf

ipv4  value: 1

TABLE_prefix

ipprefix

Type: ipprefix

uptime

Type: duration

TABLE_clients

clientname

Type: string

Command Modes

- /exec

show routing unresolved-next-hop

show routing [ vrf { vrf-name | vrf-known-name | vrf-all } ] [ ip | ipv4 ] [unicast] [ topology topology-name ] unresolved-next-hop { [ ip-addr [detail] ] | [summary] } [ vrf { vrf-name | vrf-known-name | vrf-all } ]

Syntax Description

show

Show running system information

routing

Display routing information

unresolved-next-hop

Display unresolved next-hop list

vrf

Display per-VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

<vrf-all>

Display information for all VRFs

ip

Display IP information

ipv4

Display IP information

unicast

Display unicast information

topology

Display per-topology information

topology-name

Type: string

topology name

ip-addr

Type: ipaddr

Display single unresolved next-hop

detail

Display prefixes for unresolved next-hop

summary

Show summary of resolve buffers

Command Modes

- /exec

show running-config

show running-config

Syntax Description

show

Show running system information

running-config

Current operating configuration

Command Modes

- /exec

show running-config aaa

show running-config aaa [all]

Syntax Description

show

show running-cfg

running-config

show running system information

aaa

Display aaa configuration

all

show running config with defaults

Command Modes

- /exec

show running-config acllog

show running-config acllog [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

acllog

show running config for acllog

all

show running config with defaults

Command Modes

- /exec

show running-config aclmgr (aclmgr)

show running-config aclmgr { active-if-config | all-if-config }

Syntax Description

show

Show running system information

running-config

Current operating configuration

aclmgr

show running config for aclmgr

active-if-config

show running config for active-policies

all-if-config

show running config for all-policies

Command Modes

- /exec

show running-config aclmgr (aclmgr)

show running-config aclmgr [ all | inactive-if-config ]

Syntax Description

show

Show running system information

running-config

Current operating configuration

aclmgr

show running config for aclmgr

all

show running config with defaults

inactive-if-config

show running config for inactive-policies

Command Modes

- /exec

show running-config adjmgr

show running-config adjmgr [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

adjmgr

Display adjmgr information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config all

show running-config all

Syntax Description

show

Show running system information

running-config

Current operating configuration

all

Current operating configuration with defaults

Command Modes

- /exec

show running-config arp

show running-config arp [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

arp

Display arp information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config bfd

show running-config bfd [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

bfd

show running config for bfd

all

show running config with defaults

Command Modes

- /exec

show running-config bgp

show running-config bgp [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

bgp

Display bgp information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config bloggerd

show running-config bloggerd [all]

Syntax Description

show

show running-cfg

running-config

show running system information

bloggerd

Display bloggerd configuration

all

show running config with defaults

Command Modes

- /exec

show running-config callhome

show running-config callhome [all]

Syntax Description

show

show running-cfg

running-config

show running system information

callhome

Display callhome configuration

all

show running config with defaults

Command Modes

- /exec

show running-config cdp

show running-config cdp [all]

Syntax Description

show

show running-cfg

running-config

show running system information

cdp

Display cdp configuration

all

show running config with defaults

Command Modes

- /exec

show running-config cert-enroll

show running-config cert-enroll [all]

Syntax Description

show

show running-cfg

running-config

show running system information

cert-enroll

Display certificates configuration

all

show running config with defaults

Command Modes

- /exec

show running-config cfs

show running-config cfs [all]

Syntax Description

show

Show running system information

running-config

Current operation configuration

cfs

Display cfs configurations

all

show running config with defaults

Command Modes

- /exec

show running-config clock_manager

show running-config clock_manager [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

clock_manager

show running config for clock manager

all

show running config with defaults

Command Modes

- /exec

show running-config copp

show running-config copp [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

copp

Control-Plane Policing

all

show running config with defaults

Command Modes

- /exec

show running-config dhcp

show running-config dhcp [all]

Syntax Description

show

Show running system information

running-config

Current operation configuration

dhcp

Display dhcp snoop configurations

all

show running config with defaults

Command Modes

- /exec

show running-config diagnostic

show running-config diagnostic [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

diagnostic

Display diagnostic information

all

Display running config with defaults

Command Modes

- /exec

show running-config diff

show running-config diff

Syntax Description

show

Show running system information

running-config

Current operating configuration

diff

Show the difference between running and startup configuration

Command Modes

- /exec

show running-config eem

show running-config eem

Syntax Description

show

Show running system information

running-config

Show the system running configuration

eem

Show the event manager running configuration

Command Modes

- /exec

show running-config eigrp

show running-config eigrp [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

eigrp

Display eigrp information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config eltm

show running-config eltm

Syntax Description

show

Show running system information

running-config

Current operation configuration

eltm

Display eltm configurations

Command Modes

- /exec

show running-config exclude

show running-config exclude feature-list+

Syntax Description

show

Show running system information

running-config

Current operating configuration

exclude

Exclude running configuration of specified features

feature-list

Exclude features

aaa  value: 111

Exclude running configuration of aaa
acllog  value: 425

Exclude running configuration of acllog
aclmgr  value: 351

Exclude running configuration of aclmgr
callhome  value: 66

Exclude running configuration of callhome
cdp  value: 946

Exclude running configuration of cdp
cert-enroll  value: 169

Exclude running configuration of cert-enroll
cfs  value: 126

Exclude running configuration of cfs
cmp  value: 389

Exclude running configuration of cmp
diagnostic  value: 367

Exclude running configuration of diagnostic
eem  value: 341

Exclude running configuration of event manager
license  value: 106

Exclude running configuration of license
monitor  value: 174

Exclude running configuration of SPAN sessions
ntp  value: 72

Exclude running configuration of NTP
radius  value: 113

Exclude running configuration of radius
rpm  value: 348

Exclude running configuration of rpm
security  value: 55

Exclude running configuration of security
track  value: 379

Exclude running configuration of track
vshd  value: 37

Exclude running configuration of vshd
spanning-tree  value: 171

Exclude running configuration of Spanning-tree
ipqos  value: 377

Exclude running configuration of IPQOS
copp  value: 407

Exclude running configuration of Copp
dhcp  value: 360

Exclude running configuration of DHCP
wccp  value: 494

Exclude running configuration of WCCP
l2pt  value: 745

Exclude running configuration of L2PT
echat  value: 1045

Exclude running configuration of ECHAT

Command Modes

- /exec

show running-config exclude fabricpath

show running-config exclude fabricpath

Syntax Description

show

Show running system information

running-config

Current operating configuration

exclude

Exclude configurations

fabricpath

fabricpath information

Command Modes

- /exec

show running-config exclude fex

show running-config exclude fex [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

exclude

Exclude lines that match

fex

show running config of fex

all

Show running config with defaults

Command Modes

- /exec

show running-config explicit

show running-config explicit

Syntax Description

show

Show running system information

running-config

Current operating configuration

explicit

show explicitly configured running configuration for all interfaces

Command Modes

- /exec

show running-config fabricpath

show running-config fabricpath [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

fabricpath

fabricpath information

all

Show running config with defaults

Command Modes

- /exec

show running-config fabricpath topology

show running-config fabricpath topology [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

fabricpath

fabricpath Module Information

topology

Fabricpath topology Information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config fex

show running-config fex [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

fex

show running config of fex

all

Show running config with defaults

Command Modes

- /exec

show running-config glbp

show running-config glbp [all]

Syntax Description

show

Show running system information

running-config

Show the system running information

glbp

Show GLBP running configuration

all

Show GLBP running configuration defaults

Command Modes

- /exec

show running-config hsrp

show running-config hsrp [all]

Syntax Description

show

Show system information

running-config

System running configuration

hsrp

HSRP running configuration

all

Show HSRP running configuration defaults

Command Modes

- /exec

show running-config icmpv6

show running-config icmpv6 [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

icmpv6

Display icmpv6 information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config igmp

show running-config igmp [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

igmp

Display igmp information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config interface (clic)

show running-config interface [if0] [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

interface

Interface configuration

if0

Type: interface-mrange

interface type and number in module/slot format

all

show running config with defaults

Command Modes

- /exec

show running-config interface (clic)

show running-config interface if0 [membership]

Syntax Description

show

Show running system information

running-config

Current operating configuration

interface

Interface configuration

if0

Type: interface-mrange

interface type and number in module/slot format

membership

Show membership information

Command Modes

- /exec

show running-config interface defaults

show running-config interface if0 defaults

Syntax Description

show

Show running system information

running-config

Current operating configuration

interface

Interface configuration

if0

Type: interface-mrange

interface type and number in module/slot format

defaults

show default running config

Command Modes

- /exec

show running-config interface explicit

show running-config interface if0 explicit

Syntax Description

show

Show running system information

running-config

Current operating configuration

interface

Interface configuration

if0

Type: interface-mrange

interface type and number in module/slot format

explicit

show default running config

Command Modes

- /exec

show running-config ip

show running-config ip [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

ip

Display ip information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config ipqos (qosmgr)

show running-config ipqos { active-if-config | all-if-config }

Syntax Description

show

Show running system information

running-config

Current operating configuration

ipqos

show running config for ipqosmgr

active-if-config

show running config for active-policies

all-if-config

show running config for all-policies

Command Modes

- /exec

show running-config ipqos (qosmgr)

show running-config ipqos [ all | inactive-if-config ]

Syntax Description

show

Show running system information

running-config

Current operating configuration

ipqos

show running config for ipqosmgr

all

show running config with defaults

inactive-if-config

show running config for inactive-policies

Command Modes

- /exec

show running-config ipv6

show running-config ipv6 [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

ipv6

Display ipv6 information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config isis

show running-config isis [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

isis

Display isis information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config l2pt

show running-config l2pt [all]

Syntax Description

show

Show system information

running-config

System running configuration

l2pt

Show running configuration for L2PT

all

Show running configuration for L2PT with defaults

Command Modes

- /exec

show running-config l3vm

show running-config l3vm [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

l3vm

Display l3vm information

all

Display running config with defaults

Command Modes

- /exec

show running-config ldap

show running-config ldap [all]

Syntax Description

show

show running-cfg

running-config

show running system information

ldap

Display ldap configuration

all

show running config with defaults

Command Modes

- /exec

show running-config license

show running-config license [all]

Syntax Description

show

show

running-config

show running system information

license

Display licensing configuration

all

show running config with defaults

Command Modes

- /exec

show running-config lldp

show running-config lldp [all]

Syntax Description

show

show running-cfg

running-config

show running system information

lldp

Display lldp configuration

all

show running config with defaults

Command Modes

- /exec

show running-config monitor

show running-config monitor [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

monitor

Configure Ethernet SPAN sessions

all

show running config with defaults

Command Modes

- /exec

show running-config msdp

show running-config msdp [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

msdp

Display msdp information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config ntp

show running-config ntp [all]

Syntax Description

show

Show information

running-config

Show running system configuration

ntp

Show NTP information

all

Show all NTP running configuration

Command Modes

- /exec

show running-config nv overlay

show running-config nv overlay [all]

Syntax Description

show

Show system information

running-config

System running configuration

nv

NVE running configuration

overlay

NVE running configuration

all

Show NVE running configuration defaults

Command Modes

- /exec

show running-config ospf

show running-config ospf [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

ospf

Display ospf information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config ospfv3

show running-config ospfv3 [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

ospfv3

Display ospfv3 information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config pim

show running-config pim [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

pim

Display pim information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config pim6

show running-config pim6 [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

pim6

Display pim6 information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config port-security

show running-config port-security [all]

Syntax Description

show

show running-cfg

running-config

show running system information

port-security

Display port-security configuration

all

show running config with defaults

Command Modes

- /exec

show running-config radius

show running-config radius [all]

Syntax Description

show

show running-cfg

running-config

show running system information

radius

Display radius configuration

all

show running config with defaults

Command Modes

- /exec

show running-config res_mgr

show running-config res_mgr

Syntax Description

show

Show running system information

running-config

Current operating configuration

res_mgr

Show resource configuration for VDC

Command Modes

- /exec

show running-config rip

show running-config rip [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

rip

Display rip information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config routing multicast

show running-config routing { ip | ipv4 } multicast [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

all

Display running config with defaults clis

Command Modes

- /exec

show running-config rpm

show running-config rpm [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

rpm

Display Route Policy Manager (RPM) information

all

Display running config with defaults

Command Modes

- /exec

show running-config rsvp

show running-config rsvp

Syntax Description

show

Show running system information

running-config

Current operating configuration

rsvp

Display RSVP status

Command Modes

- /exec

show running-config section

show running-config section section

Syntax Description

show

Show running system information

running-config

Current operating configuration

section

show only a particular section of running-config (in format needed for 'merge config' command)

section

Type: string

the section to show, a regular expression, (use a dot for a space)

Command Modes

- /exec

show running-config security

show running-config security [all]

Syntax Description

show

show running-cfg

running-config

show running system information

security

Display security configuration

all

show running config with defaults

Command Modes

- /exec

show running-config snmp

show running-config snmp [all]

Syntax Description

show

show running-cfg

running-config

show running system information

snmp

Display snmp configuration

all

show running config with defaults

Command Modes

- /exec

show running-config spanning-tree

show running-config spanning-tree [ all | interface interface_range ]

Syntax Description

show

Show running system information

running-config

Current operating configuration

spanning-tree

Show spanning tree information

all

all  value: 1

Current operating configuration with defaults

interface

Specify an interface as a target for the command

interface_range

Type: interface-mrange

Command Modes

- /exec

show running-config tacacs+

show running-config "tacacs+" [all]

Syntax Description

show

show running-cfg

running-config

show running system information

tacacs+

Display tacacs configuration

all

show running config with defaults

Command Modes

- /exec

show running-config track

show running-config track [all]

Syntax Description

show

Show running system information

running-config

Show the system running information

track

Show track running configuration

all

Show track running configuration defaults

Command Modes

- /exec

show running-config udld

show running-config udld [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

udld

Show udld configuration

all

show running config with defaults

Command Modes

- /exec

show running-config vdc-all

show running-config vdc-all [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

vdc-all

Display config from all VDC

all

Display config from all VDC including defaults

Command Modes

- /exec

show running-config vdc

show running-config vdc [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

vdc

Show Virtual Device Contexts

all

show running config with defaults

Command Modes

- /exec

show running-config virtual-service

show running-config virtual-service

Syntax Description

show

Show running system information

running-config

Current operating configuration

virtual-service

Show running config for virtualization services

Command Modes

- /exec

show running-config vlan (clis)

show running-config vlan

Syntax Description

show

Show running system information

running-config

Current operating configuration

vlan

Vlan commands

Command Modes

- /exec

show running-config vlan (clis)

show running-config vlan vlan-id

Syntax Description

show

Show running system information

running-config

Current operating configuration

vlan

Vlan commands

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

Command Modes

- /exec

show running-config vlan (vlan_mgr_cli)

show running-config vlan vlan-id

Syntax Description

show

Show running system information

running-config

Current operating configuration

vlan

Vlan commands

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

Command Modes

- /exec

show running-config vlan_mgr

show running-config vlan_mgr

Syntax Description

show

Show running system information

running-config

Current operating configuration

vlan_mgr

Show vlan manager information

Command Modes

- /exec

show running-config vpc

show running-config vpc [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

vpc

show running config for vPC

all

show running config with defaults

Command Modes

- /exec

show running-config vrf

show running-config vrf vrf-cfg-name [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

vrf

Display VRF information

vrf-cfg-name

Type: vrf

antipattern: default

Configurable VRF name

all

Display running config with defaults clis

Command Modes

- /exec

show running-config vrf default

show running-config vrf default [all]

Syntax Description

show

Show running system information

running-config

Current operationg configuration

vrf

Display VRF information

default

Known VRF name

all

Display running config with defaults clis

Command Modes

- /exec

show running-config vrrp

show running-config vrrp [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

vrrp

Display VRRP running configuration

all

show running config with defaults

Command Modes

- /exec

show running-config vshd

show running-config vshd

Syntax Description

show

Show running system information

running-config

Current operating configuration

vshd

Show running config for vshd

Command Modes

- /exec

show running-config vtp

show running-config vtp [all]

Syntax Description

show

Show running system information

running-config

Current operating configuration

vtp

Show running configuration for VTP

all

Show running configuration for VTP with defaults

Command Modes

- /exec

Chapter 19. S Show Commands

- show scheduler config

- show scheduler job

- show scheduler logfile

- show scheduler schedule

- show snmp

- show snmp community

- show snmp context

- show snmp engineID

- show snmp group

- show snmp host

- show snmp mib igmpCacheTable

- show snmp mib igmpInterfaceTable

- show snmp mib pimCandidateRPTable

- show snmp mib pimComponentTable

- show snmp mib pimInterfaceTable

- show snmp mib pimIpMRouteNextHopTable

- show snmp mib pimIpMRouteTable

- show snmp mib pimJoinPruneInterval

- show snmp mib pimNeighborTable

- show snmp mib pimRPSetTable

- show snmp pss

- show snmp roledebug

- show snmp sessions

- show snmp snmpv3stats

- show snmp source-interface

- show snmp trap

- show snmp user

- show sockets buffers

- show sockets client

- show sockets connection

- show sockets keychain-dump

- show sockets performance

- show sockets statistics

- show sockets tcp keychain binding

- show spanning-tree (stp)

- show spanning-tree (stp)

- show spanning-tree interface (stp)

- show spanning-tree interface (stp)

- show spanning-tree mst

- show spanning-tree mst configuration __readonly__

- show spanning-tree mst configuration digest __readonly__

- show spanning-tree mst detail

- show spanning-tree mst interface

- show spanning-tree mst interface detail

- show spanning-tree pathcost method

- show spanning-tree summary

- show spanning-tree summary totals

- show spanning-tree vlan (stp)

- show spanning-tree vlan (stp)

- show spanning-tree vlan (stp)

- show spanning-tree vlan (stp)

- show spanning-tree vlan (stp)

- show sprom

- show sprom fex

- show sprom fex all

- show ssh key

- show ssh server

- show startup-config

- show startup-config aaa

- show startup-config acllog

- show startup-config aclmgr

- show startup-config adjmgr

- show startup-config arp

- show startup-config bfd

- show startup-config bgp

- show startup-config bloggerd

- show startup-config callhome

- show startup-config cdp

- show startup-config cert-enroll

- show startup-config cfs

- show startup-config copp

- show startup-config dhcp

- show startup-config diagnostic

- show startup-config eem

- show startup-config eigrp

- show startup-config eltm

- show startup-config exclude

- show startup-config fabricpath

- show startup-config fabricpath topology

- show startup-config fex

- show startup-config glbp

- show startup-config hsrp

- show startup-config icmpv6

- show startup-config igmp

- show startup-config interface (clic)

- show startup-config interface (clic)

- show startup-config ip

- show startup-config ipqos

- show startup-config ipv6

- show startup-config isis

- show startup-config l2pt

- show startup-config l3vm

- show startup-config ldap

- show startup-config license

- show startup-config lldp

- show startup-config log

- show startup-config monitor

- show startup-config msdp

- show startup-config ntp

- show startup-config nv overlay

- show startup-config ospf

- show startup-config ospfv3

- show startup-config pim

- show startup-config pim6

- show startup-config port-security

- show startup-config radius

- show startup-config rip

- show startup-config routing multicast

- show startup-config rpm

- show startup-config rsvp

- show startup-config security

- show startup-config snmp

- show startup-config tacacs+

- show startup-config track

- show startup-config udld

- show startup-config vdc-all

- show startup-config vdc

- show startup-config virtual-service

- show startup-config vlan (clis)

- show startup-config vlan (clis)

- show startup-config vpc

- show startup-config vrf

- show startup-config vrf default

- show startup-config vrrp

- show startup-config vshd

- show startup-config vtp

- show summary

- show system auto-collect tech-support

- show system cores

- show system error-id

- show system exception-info

- show system inband queuing

- show system kgdb

- show system pss shrink status

- show system redundancy ha status

- show system redundancy status

- show system reset-reason (lcmcli)

- show system reset-reason (lcmcli)

- show system reset-reason fex

- show system reset-reason module

- show system resources (process)

- show system resources (process)

- show system resources module

- show system resources module all

- show system routing mode

- show system srg

- show system standby manual-boot

- show system switchover impact

- show system uptime

- show system verify bios

- show system vlan reserved

show scheduler config

show scheduler config [ __readonly__ [terminal] [feature] [logfilesize] [emailfrom] [emailreplyto] [smtpserver] [port] [usevrf] [ TABLE_userconfig username [password] ] [ TABLE_jobconfig jobdata ] [ TABLE_scheduleconfig schedulename [scheduletype] [ TABLE_jobs status ] [email] ] ]

Syntax Description

show

Show running system information

scheduler

Show scheduler config or data

config

Display scheduler config

__readonly__

terminal

Type: string

logfile terminal

feature

Type: string

name service

logfilesize

Type: string

logfilesize

emailfrom

Type: string

emailfrom

emailreplyto

Type: string

emailreplyto

smtpserver

Type: string

smtpserver

port

Type: string

port

usevrf

Type: string

usevrf

TABLE_userconfig

userconfig

username

Type: string

username

password

Type: string

password

TABLE_jobconfig

job configs

jobdata

Type: string

jobdata

TABLE_scheduleconfig

schedule configs

schedulename

Type: string

schedulename

scheduletype

Type: string

scheduletype

TABLE_jobs

jobs

status

Type: string

status

email

Type: string

email

Command Modes

- /exec

show scheduler job

show scheduler job [ name s0 ] [ __readonly__ [ TABLE_schedulerjobs jobname [jobdata] ] ]

Syntax Description

show

Show running system information

scheduler

Show scheduler config or data

job

Display job information

name

Specify the name of job

s0

Type: string

length: 31

Specify the job name

__readonly__

TABLE_schedulerjobs

schedulerjobs

jobname

Type: string

job name

jobdata

Type: string

job data

Command Modes

- /exec

show scheduler logfile

show scheduler logfile [ __readonly__ [ TABLE_joblog jobname [jobstatus] [schedulename] [scheduleusername] [completiontime] [joboutput] ] ]

Syntax Description

show

Show running system information

scheduler

Show scheduler config or data

logfile

Display scheduler job output log

__readonly__

TABLE_joblog

jobs log

jobname

Type: string

job name

jobstatus

Type: string

job status

schedulename

Type: string

schedulename

scheduleusername

Type: string

scheduleusername

completiontime

Type: string

completiontime

joboutput

Type: string

joboutput

Command Modes

- /exec

show scheduler schedule

show scheduler schedule [ name s0 ] [ __readonly__ [ TABLE_schedules schedulename [scheduleusername] [scheduletype] [starttime] [lastexectime] [lastcompletiontime] [execcount] [jobcount] [ TABLE_jobs jobname [execstatus] ] ] ]

Syntax Description

show

Show running system information

scheduler

Show scheduler config or data

schedule

Display schedule information

name

Specify the name of schedule

s0

Type: string

length: 31

Specify the schedule name

__readonly__

TABLE_schedules

schedules

schedulename

Type: string

Schedule name

scheduleusername

Type: string

schedule username

scheduletype

Type: string

scheduletype

starttime

Type: string

starttime

lastexectime

Type: string

last exec time

lastcompletiontime

Type: string

lastcompletiontime

execcount

Type: string

execcount

jobcount

Type: string

jobcount

TABLE_jobs

jobs

jobname

Type: string

jobname

execstatus

Type: string

execstatus

Command Modes

- /exec

show snmp

show snmp [ __readonly__ sys_contact sys_location snmp_input_packets bad_snmp_version unknown_community_name illegal_community_name encoding_Err req_var_nums alt_var_nums get_req_in getnext_req_in set_req_in noname_pdu_in badval_pdu_in ro_pdu_in genral_err_in get_resp_in unknown_ctx snmp_output_packets trap_pdu toobig_err noname_pdu_out badval_pdu_out genral_err_out get_req_out getnext_req_out set_req_out get_resp_out silent_drops [max_pkt_size] [ TABLE_snmp_community community_name grouporaccess context aclfilter ] [ TABLE_snmp_users user auth priv [ TABLE_groups group ] [engineID] ] tcp_suth_status [ port_mon_status [ policy_name pol_admin_status plo_oper_status pol_port_type [ TABLE_policies counter threshold interval rising_threshold rising_event falling_threshold falling_event pmon_config ] ] ] [protocal_status] [ TABLE_snmp_contexts context_name proto_instanceid vrf topology [ vlan | MST ] ] ]

Syntax Description

show

Show running system information

snmp

show snmp information

__readonly__

Read Only

TABLE_snmp_community

Table that displays the community information

TABLE_snmp_users

Table that displays the user information

TABLE_groups

Table that displays the group information

TABLE_policies

Table that displays the policy information

TABLE_snmp_contexts

Table that displays the context information

sys_contact

Type: string

System Contact

sys_location

Type: string

System Location

snmp_input_packets

Type: string

SNMP input packets

bad_snmp_version

Type: string

bad snmp version in Input SNMP packets

unknown_community_name

Type: string

unknown community name in Input SNMP packets

illegal_community_name

Type: string

Illegal community name in Input SNMP packets

encoding_Err

Type: string

Encoding Errors in Input SNMP packets

req_var_nums

Type: string

number of requested variables

alt_var_nums

Type: string

number of altered variable

get_req_in

Type: string

GET request in Input SNMP packets

getnext_req_in

Type: string

GET-NEXT request in Input SNMP packets

set_req_in

Type: string

SET request in Input SNMP packets

noname_pdu_in

Type: string

NONAME PDU in Input SNMP packets

badval_pdu_in

Type: string

Bad value PDU in Input SNMP packets

ro_pdu_in

Type: string

Read only PDU in Input SNMP packets

genral_err_in

Type: string

Genral Error in Input SNMP packets

get_resp_in

Type: string

Get Response PDU in Input SNMP packets

unknown_ctx

Type: string

Unknown context Name in Input SNMP packets

snmp_output_packets

Type: string

SNMP Output Packets

trap_pdu

Type: string

Trap PDU in Output SNMP Packets

toobig_err

Type: string

Too Big errors in Output SNMP Packets

noname_pdu_out

Type: string

badval_pdu_out

Type: string

NoName PDU in Output SNMP Packets

genral_err_out

Type: string

Genral Error in Output SNMP Packets

get_req_out

Type: string

GET request in Output SNMP Packets

getnext_req_out

Type: string

GET-NEXTrequest in Output SNMP Packets

set_req_out

Type: string

SET request in Output SNMP packets

get_resp_out

Type: string

Get Response PDU in Output SNMP Packets

silent_drops

Type: string

Silent Drop packets

max_pkt_size

Type: string

Maximum packet size

community_name

Type: string

community name

grouporaccess

Type: string

Group name

context

Type: string

contaxt Name

aclfilter

Type: string

Acl filter name

user

Type: string

User name

auth

Type: string

Auth type

priv

Type: string

Priv Type

group

Type: string

Group name

engineID

Type: string

engine id for the user

tcp_suth_status

Type: string

TCP authentication status

port_mon_status

Type: string

Port monitor status

policy_name

Type: string

policy name

pol_admin_status

Type: string

Policy Admin status

plo_oper_status

Type: string

Police oper status

pol_port_type

Type: string

policy port type

counter

Type: string

counters

threshold

Type: string

Threshold

interval

Type: string

Interval

rising_threshold

Type: string

Rising threshold

rising_event

Type: string

Rising Event

falling_threshold

Type: string

Falling threshold

falling_event

Type: string

Falling Event

pmon_config

Type: string

PMON configured

protocal_status

Type: string

Protocal Enable status

context_name

Type: string

context name

proto_instanceid

Type: string

Protocal instance ID

vrf

Type: string

VRF Name

topology

Type: string

Topology

vlan

Type: string

VLAN name

MST

Type: string

MST name

Command Modes

- /exec

show snmp community

show snmp community [ __readonly__ TABLE_snmp_community community_name grouporaccess context aclfilter ]

Syntax Description

show

Show running system information

snmp

show snmp information

community

show snmp community strings

__readonly__

Read Only

TABLE_snmp_community

contains all snmp community names

community_name

Type: string

community name

grouporaccess

Type: string

group or access name

context

Type: string

context name

aclfilter

Type: string

acl filter name

Command Modes

- /exec

show snmp context

show snmp context [ __readonly__ TABLE_snmp_contexts context_name proto_instanceid vrf topology [ vlan | MST ] ]

Syntax Description

show

Show running system information

snmp

show snmp information

context

show snmp context mapping entries

__readonly__

TABLE_snmp_contexts

All SNMP Contexts Entries

context_name

Type: string

SNMP context Name

proto_instanceid

Type: string

Name of the protocol instance

vrf

Type: string

VRF name

topology

Type: string

Name of the Topology

vlan

Type: string

VLAN Name

MST

Type: string

Command Modes

- /exec

show snmp engineID

show snmp engineID [ __readonly__ engineIDHex engineIDDec ]

Syntax Description

show

Show running system information

snmp

show snmp information

engineID

show snmp engineID

__readonly__

engineIDHex

Type: string

SNMP engineID in HEX

engineIDDec

Type: string

SNMP engineID in Decimal

Command Modes

- /exec

show snmp group

show snmp group [ __readonly__ TABLE_role role_name role_description [attribute_scope] [permit_vsan] [permit_vlan] [permit_interface] [permit_vrf] [ TABLE_rule rule_num rule_action { rule_permission | rule_permission_mds } [rule_featuretype] [rule_entity] ] ]

Syntax Description

show

Show running system information

snmp

show snmp information

group

show snmp group

__readonly__

Read Only

TABLE_role

Table displays role

role_name

Type: string

Role Name

role_description

Type: string

Role Description

attribute_scope

Role scope

global  value: 0x00000001

local  value: 0x00000002

permit_vsan

Type: bitmap

permitted vsan

permit_vlan

Type: bitmap

permit_interface

Type: interface-mrange

permit_vrf

Type: string

TABLE_rule

rule_num

Type: integer

min: 1  max: 256

rule_action

permit  value: 1

deny  value: 2

rule_permission

read  value: 1

read-write  value: 2

command  value: 3

rule_permission_mds

show  value: 11

config  value: 12

clear  value: 13

debug  value: 14

exec  value: 15

rule_featuretype

Type: _enum

rule_entity

Type: string

Command Modes

- /exec

show snmp host

show snmp host [ __readonly__ TABLE_host host port version level type secname [ [vrf] [ TABLE_vrf_filters vrf_filter ] [src_intf] ] ]

Syntax Description

show

Show running system information

snmp

show snmp information

host

show snmp hosts

__readonly__

Read Only

TABLE_host

displays the list of hosts configured for snmp requests

TABLE_vrf_filters

displays the host vrf filters

host

Type: string

Host address

port

Type: string

port for thehost ip

version

Type: string

snmp version

level

Type: string

security level

type

Type: string

type of snmp request/response

secname

Type: string

community name for the snmp req/response

vrf

Type: string

VRF Name

vrf_filter

Type: string

vrf filters

src_intf

Type: string

source interface

Command Modes

- /exec

show snmp mib igmpCacheTable

show snmp mib igmpCacheTable [igmpCacheAddress-in] [igmpCacheIfIndex-in] [ __readonly__ TABLE_igmpCacheTable igmpCacheAddress-out igmpCacheIfIndex-out igmpCacheSelf igmpCacheLastReporter igmpCacheUpTime igmpCacheExpiryTime igmpCacheStatus igmpCacheVersion1HostTimer ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

igmpCacheTable

show mib table igmpCacheTable

igmpCacheAddress-in

Type: ipaddr

igmpCacheAddress

igmpCacheIfIndex-in

Type: integer

igmpCacheIfIndex

__readonly__

TABLE_igmpCacheTable

igmpCacheAddress-out

Type: ipaddr

mib table index igmpCacheAddress

igmpCacheIfIndex-out

Type: integer

mib table index igmpCacheIfIndex

igmpCacheSelf

Type: integer

mib object igmpCacheSelf

igmpCacheLastReporter

Type: ipaddr

mib object igmpCacheLastReporter

igmpCacheUpTime

Type: duration

mib object igmpCacheUpTime

igmpCacheExpiryTime

Type: duration

mib object igmpCacheExpiryTime

igmpCacheStatus

Type: integer

mib object igmpCacheStatus

igmpCacheVersion1HostTimer

Type: duration

mib object igmpCacheVersion1HostTimer

Command Modes

- /exec

show snmp mib igmpInterfaceTable

show snmp mib igmpInterfaceTable [igmpInterfaceIfIndex-in] [ __readonly__ TABLE_igmpInterfaceTable igmpInterfaceIfIndex-out igmpInterfaceQueryInterval igmpInterfaceStatus igmpInterfaceVersion igmpInterfaceQuerier igmpInterfaceQueryMaxResponseTime igmpInterfaceQuerierUpTime igmpInterfaceQuerierExpiryTime igmpInterfaceVersion1QuerierTimer igmpInterfaceWrongVersionQueries igmpInterfaceJoins igmpInterfaceProxyIfIndex igmpInterfaceGroups igmpInterfaceRobustness igmpInterfaceLastMembQueryIntvl ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

igmpInterfaceTable

show mib table igmpInterfaceTable

igmpInterfaceIfIndex-in

Type: integer

igmpInterfaceIndex

__readonly__

TABLE_igmpInterfaceTable

igmpInterfaceIfIndex-out

Type: integer

mib table index igmpInterfaceIfIndex

igmpInterfaceQueryInterval

Type: integer

mib object igmpInterfaceQueryInterval

igmpInterfaceStatus

Type: integer

mib object igmpInterfaceStatus

igmpInterfaceVersion

Type: integer

mib object igmpInterfaceVersion

igmpInterfaceQuerier

Type: ipaddr

mib object igmpInterfaceQuerier

igmpInterfaceQueryMaxResponseTime

Type: integer

mib object igmpInterfaceQueryMaxResponseTime

igmpInterfaceQuerierUpTime

Type: duration

mib object igmpInterfaceQuerierUpTime

igmpInterfaceQuerierExpiryTime

Type: duration

mib object igmpInterfaceQuerierExpiryTime

igmpInterfaceVersion1QuerierTimer

Type: duration

mib object igmpInterfaceVersion1QuerierTimer

igmpInterfaceWrongVersionQueries

Type: integer

mib object igmpInterfaceWrongVersionQueries

igmpInterfaceJoins

Type: integer

mib object igmpInterfaceJoins

igmpInterfaceProxyIfIndex

Type: integer

mib object igmpInterfaceProxyIfIndex

igmpInterfaceGroups

Type: integer

mib object igmpInterfaceGroups

igmpInterfaceRobustness

Type: integer

mib object igmpInterfaceRobustness

igmpInterfaceLastMembQueryIntvl

Type: integer

mib object igmpInterfaceLastMembQueryIntvl

Command Modes

- /exec

show snmp mib pimCandidateRPTable

show snmp mib pimCandidateRPTable [pimCandidateRPGroupAddress-in] [pimCandidateRPGroupMask-in] [ __readonly__ TABLE_pimCandidateRPTable pimCandidateRPGroupAddress-out pimCandidateRPGroupMask-out pimCandidateRPAddress pimCandidateRPRowStatus ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimCandidateRPTable

show mib table pimCandidateRPTable

pimCandidateRPGroupAddress-in

Type: ipaddr

pimCandidateRPGroupAddress

pimCandidateRPGroupMask-in

Type: ipaddr

pimCandidateRPGroupMask

__readonly__

TABLE_pimCandidateRPTable

pimCandidateRPGroupAddress-out

Type: ipaddr

mib table index pimCandidateRPGroupAddress

pimCandidateRPGroupMask-out

Type: ipaddr

mib table index pimCandidateRPGroupMask

pimCandidateRPAddress

Type: ipaddr

mib object pimCandidateRPAddress

pimCandidateRPRowStatus

Type: integer

mib object pimCandidateRPRowStatus

Command Modes

- /exec

show snmp mib pimComponentTable

show snmp mib pimComponentTable [pimComponentIndex-in] [ __readonly__ TABLE_pimComponentTable pimComponentIndex-out pimComponentBSRAddress pimComponentBSRExpiryTime pimComponentCRPHoldTime pimComponentStatus ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimComponentTable

show mib table pimComponentTable

pimComponentIndex-in

Type: integer

pimComponentIndex

__readonly__

TABLE_pimComponentTable

pimComponentIndex-out

Type: integer

mib table index pimComponentIndex

pimComponentBSRAddress

Type: ipaddr

mib object pimComponentBSRAddress

pimComponentBSRExpiryTime

Type: duration

mib object pimComponentBSRExpiryTime

pimComponentCRPHoldTime

Type: integer

mib object pimComponentCRPHoldTime

pimComponentStatus

Type: integer

mib object pimComponentStatus

Command Modes

- /exec

show snmp mib pimInterfaceTable

show snmp mib pimInterfaceTable [pimInterfaceIfIndex-in] [ __readonly__ TABLE_pimInterfaceTable pimInterfaceIfIndex-out pimInterfaceAddress pimInterfaceNetMask pimInterfaceMode pimInterfaceDR pimInterfaceHelloInterval pimInterfaceStatus pimInterfaceJoinPruneInterval pimInterfaceCBSRPreference ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimInterfaceTable

show mib table pimInterfaceTable

pimInterfaceIfIndex-in

Type: integer

pimInterfaceIndex

__readonly__

TABLE_pimInterfaceTable

pimInterfaceIfIndex-out

Type: integer

mib table index pimInterfaceIfIndex

pimInterfaceAddress

Type: ipaddr

mib object pimInterfaceAddress

pimInterfaceNetMask

Type: ipaddr

mib object pimInterfaceNetMask

pimInterfaceMode

Type: integer

mib object pimInterfaceMode

pimInterfaceDR

Type: ipaddr

mib object pimInterfaceDR

pimInterfaceHelloInterval

Type: integer

mib object pimInterfaceHelloInterval

pimInterfaceStatus

Type: integer

mib object pimInterfaceStatus

pimInterfaceJoinPruneInterval

Type: integer

mib object pimInterfaceJoinPruneInterval

pimInterfaceCBSRPreference

Type: integer

mib object pimInterfaceCBSRPreference

Command Modes

- /exec

show snmp mib pimIpMRouteNextHopTable

show snmp mib pimIpMRouteNextHopTable [ ipMRouteNextHopGroup-in ipMRouteNextHopSource-in ipMRouteNextHopSourceMask-in ipMRouteNextHopIfIndex-in ipMRouteNextHopAddress-in ] [ __readonly__ TABLE_pimIpMRouteNextHopTable ipMRouteNextHopGroup-out ipMRouteNextHopSource-out ipMRouteNextHopSourceMask-out ipMRouteNextHopIfIndex-out ipMRouteNextHopAddress-out pimIpMRouteNextHopPruneReason ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimIpMRouteNextHopTable

show mib table pimIpMRouteNextHopTable

ipMRouteNextHopGroup-in

Type: ipaddr

ipMRouteNextHopGroup

ipMRouteNextHopSource-in

Type: ipaddr

ipMRouteNextHopSource

ipMRouteNextHopSourceMask-in

Type: ipaddr

ipMRouteNextHopSourceMask

ipMRouteNextHopIfIndex-in

Type: integer

ipMRouteNextHopIfIndex

ipMRouteNextHopAddress-in

Type: ipaddr

ipMRouteNextHopAddress

__readonly__

TABLE_pimIpMRouteNextHopTable

ipMRouteNextHopGroup-out

Type: integer

mib table index ipMRouteNextHopGroup

ipMRouteNextHopSource-out

Type: ipaddr

mib table index pimComponentBSRAddress

ipMRouteNextHopSourceMask-out

Type: duration

mib table index pimComponentBSRExpiryTime

ipMRouteNextHopIfIndex-out

Type: integer

mib table index pimComponentCRPHoldTime

ipMRouteNextHopAddress-out

Type: integer

mib table index pimComponentStatus

pimIpMRouteNextHopPruneReason

Type: integer

mib object pimIpMRouteNextHopPruneReason

Command Modes

- /exec

show snmp mib pimIpMRouteTable

show snmp mib pimIpMRouteTable [ipMRouteGroup-in] [ipMRouteSource-in] [ipMRouteSourceMask-in] [ __readonly__ TABLE_pimIpMRouteTable ipMRouteGroup-out ipMRouteSource-out ipMRouteSourceMask-out pimIpMRouteUpstreamAssertTimer pimIpMRouteAssertMetric pimIpMRouteAssertMetricPref pimIpMRouteAssertRPTBit pimIpMRouteFlags ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimIpMRouteTable

show mib table pimIpMRouteTable

ipMRouteGroup-in

Type: ipaddr

ipMRouteGroup

ipMRouteSource-in

Type: ipaddr

ipMRouteSource

ipMRouteSourceMask-in

Type: ipaddr

ipMRouteSourceMask

__readonly__

TABLE_pimIpMRouteTable

ipMRouteGroup-out

Type: ipaddr

mib table index ipMRouteGroup-out

ipMRouteSource-out

Type: ipaddr

mib table index ipMRouteSource-out

ipMRouteSourceMask-out

Type: ipaddr

mib table index ipMRouteSourceMask-out

pimIpMRouteUpstreamAssertTimer

Type: duration

mib object pimIpMRouteUpstreamAssertTimer

pimIpMRouteAssertMetric

Type: integer

mib object pimIpMRouteAssertMetric

pimIpMRouteAssertMetricPref

Type: integer

mib object pimIpMRouteAssertMetricPref

pimIpMRouteAssertRPTBit

Type: integer

mib object pimIpMRouteAssertRPTBit

pimIpMRouteFlags

Type: string

mib object pimIpMRouteFlags

Command Modes

- /exec

show snmp mib pimJoinPruneInterval

show snmp mib pimJoinPruneInterval [ __readonly__ pimJoinPruneInterval ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimJoinPruneInterval

show mib scalar pimJoinPruneInterval

__readonly__

Read Only

pimJoinPruneInterval

Type: integer

mib object pimJoinPruneInterval

Command Modes

- /exec

show snmp mib pimNeighborTable

show snmp mib pimNeighborTable [pimNeighborAddress-in] [ __readonly__ TABLE_pimNeighborTable pimNeighborAddress-out pimNeighborIfIndex pimNeighborUpTime pimNeighborExpiryTime ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimNeighborTable

show mib table pimNeighborTable

pimNeighborAddress-in

Type: ipaddr

pimNeighborAddress

__readonly__

TABLE_pimNeighborTable

pimNeighborAddress-out

Type: ipaddr

mib table index pimNeighborAddress

pimNeighborIfIndex

Type: integer

mib object pimNeighborIfIndex

pimNeighborUpTime

Type: duration

mib object pimNeighborUpTime

pimNeighborExpiryTime

Type: duration

mib object pimNeighborExpiryTime

Command Modes

- /exec

show snmp mib pimRPSetTable

show snmp mib pimRPSetTable [pimRPSetComponent-in] [pimRPSetGroupAddress-in] [pimRPSetGroupMask-in] [pimRPSetAddress-in] [ __readonly__ TABLE_pimRPSetTable pimRPSetGroupAddress-out pimRPSetGroupMask-out pimRPSetAddress-out pimRPSetHoldTime pimRPSetExpiryTime pimRPSetComponent-out ]

Syntax Description

show

Show running system information

snmp

show snmp

mib

show mib tables

pimRPSetTable

show mib table pimRPSetTable

pimRPSetComponent-in

Type: integer

pimRPSetComponent

pimRPSetGroupAddress-in

Type: ipaddr

pimRPSetGroupAddress

pimRPSetGroupMask-in

Type: ipaddr

pimRPSetGroupMask

pimRPSetAddress-in

Type: ipaddr

pimRPSetAddress

__readonly__

TABLE_pimRPSetTable

pimRPSetGroupAddress-out

Type: ipaddr

mib table index pimRPSetGroupAddress

pimRPSetGroupMask-out

Type: ipaddr

mib table index pimRPSetGroupMask

pimRPSetAddress-out

Type: ipaddr

mib table index pimRPSetAddress

pimRPSetHoldTime

Type: duration

mib object pimRPSetHoldTime

pimRPSetExpiryTime

Type: duration

mib object pimRPSetExpiryTime

pimRPSetComponent-out

Type: integer

mib table index pimRPSetComponent

Command Modes

- /exec

show snmp pss

show snmp pss

Syntax Description

show

Show running system information

snmp

show snmp information

pss

show SNMP pss

Command Modes

- /exec

show snmp roledebug

show snmp roledebug

Syntax Description

show

Show running system information

snmp

show snmp information

roledebug

show SNMP roledebug

Command Modes

- /exec

show snmp sessions

show snmp sessions [ __readonly__ TABLE_session dest ]

Syntax Description

show

Show running system information

snmp

show snmp information

sessions

show snmp sessions

__readonly__

Read Only

TABLE_session

table displays destination

dest

Type: string

destination

Command Modes

- /exec

show snmp snmpv3stats

show snmp snmpv3stats

Syntax Description

show

Show running system information

snmp

show snmp information

snmpv3stats

show SNMP snmpdebug

Command Modes

- /exec

show snmp source-interface

show snmp source-interface [ __readonly__ trap_srcintf informs_srcintf ]

Syntax Description

show

Show running system information

snmp

show snmp information

source-interface

show source-interface through which notifications are sent

__readonly__

Read Only

trap_srcintf

Type: string

Displays the source interface for traps

informs_srcintf

Type: string

Displays the source interface for informs

Command Modes

- /exec

show snmp trap

show snmp trap [ __readonly__ TABLE_snmp_trap trap_type description isEnabled ]

Syntax Description

show

Show running system information

snmp

show snmp information

trap

show snmp traps

__readonly__

Read Only

TABLE_snmp_trap

All snmp traps configured

trap_type

Type: string

Trap Type

description

Type: string

Trap description

isEnabled

Type: string

Trap Enabled Status

Command Modes

- /exec

show snmp user

show snmp user [ s0 [ engineID s1 ] ] [ __readonly__ [ TABLE_snmp_users user auth priv [ TABLE_groups group ] [engineID] ] ]

Syntax Description

show

Show running system information

snmp

show snmp information

user

show SNMPv3 users

s0

Type: string

length: 28

Name of the user

engineID

engineID

s1

Type: string

length: 128

Target's SNMP engineID(colon separated) for SNMPv3 inform

__readonly__

Read Only

TABLE_snmp_users

table displays the snmp users

TABLE_groups

table displays the gropus for specific user

user

Type: string

user name

auth

Type: string

auth type

priv

Type: string

priv type

group

Type: string

group belongs to

engineID

Type: string

engineID for specific user

Command Modes

- /exec

show sockets buffers

show sockets buffers [ [ all count ] [ free count ] ]

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

buffers

Display detailed buffer statistics

all

Dump buffers from ALL list

free

Dump buffers from FREE list

count

Type: integer

Number of buffers to dump

Command Modes

- /exec

show sockets client

show sockets client [ pid pid ] [ tcp | udp | raw ] [detail] [ __readonly__ [ TABLE_total_clients [ socket-type total-clients ] [no-total-clients] ] [ TABLE_cl_sk prefix client-name pid No-of-clients [fast-tcp-mts-ctrl-q] [ cancel-requests cancel-unblocks cancel-misses select-drops select-wakes ] [ TABLE_det [ fd client-id [mts-sap] ] ] [ TABLE_st [soc-calls] [bind-calls] [listen-calls] [accept-calls] [acc-dispat-err] [connect-calls] [connec-dispatch] [recvmsg-dispatch] [recv-dis-nblock] [recvmsg-call] [brecv-dispatch] [fsendmsg-calls] [sendmsg-dispatch] [sendmsg-calls] [msendmsg-calls] [select-calls] [select-dispatch] [select-need-work] [sh-calls] [close-calls] [fcntl-calls] [ioctl-calls] [setsock-calls] [getsock-calls] [getsockname-calls] [getpeer-calls] [fork-calls] [execve-calls] [dup-calls] [can-calls] [can-miss] [can-unblk-sele] [soc-ha-calls] [pfork-client] [read-fd] [write-fd] [read-fd-set] [write-fd-set] [fast-tcp-send-req] [fast-tcp-send-suc] [fast-tcp-ack] ] [ TABLE_sterr [sock-err] [sock-nodev-err] [bind-err] [lis-err] [accept-err] [connect-err] [recvmsg-err] [brcvmsg-err] [fsendmsg-err] [sendmsg-err] [msndmsg-err] [select-err] [sel-nomem-err] [shut-err] [close-err] [fcntl-err] [ioctl-err] [setsoc-err] [getsoc-err] [getsocname-err] [getpeername-err] [fork-err] [execve-err] [dup-err] [psoc-vrf-err] [psoc-nosoc-err] [psoc-sock-null-err] [psoc-socre-err] [pbind-nsock-err] [pbd-getsocaddr] [pbind-sobind-err] [plisten-nsoc-err] [plis-solis-err] [pacc-nsoc-err] [pacc-no-nsoc-err] [pacc-soc-null-err] [pacc-copy-err] [pacc-no-acc-err] [pacc-woublo-err] [pacc-connabo-err] [pacc-cond-wait-err] [pacc-so-err-err] [pacc-err-err] [pcon-no-soc-err] [pcon-ealready-err] [pconn-getsock] [pconn-socon-err] [pconn-einpro-err] [pconn-con-wait-err] [psend-no-soc-err] [psend-inval-iov] [psend-getsoc-err] [psend-msg-ctrl-err] [psend-sockarg-err] [psend-pru-sosend] [precv-nosock-err] [precv-inval-iovlen] [precv-pru-sorecv] [precv-cp-msg-err] [precv-cp-msg-nlen] [precv-cp-data-err] [pbrecv-rcvmsg-err] [pshut-no-soc-err] [psetsoc-val-err] [psetsoc-inv-val] [psetsoc-no-soc-err] [psetsoc-sosetopt] [pgetsoc-no-socerr] [pgetsoc-cp-err] [pgetsoc-val-err] [pgetsoc-sogt-err] [pgtsoc-no-soc-err] [pgtsoc-cp-err] [pgtsoc-pru-soc-err] [pgtsoc-cpout-err] [pgtprne-no-soc-err] [pgtprne-enot-err] [pgtprne-cp-err] [pgtprne-pru-pradd] [pgtprne-cpout-err] [pclose-no-soc-err] [pclose-socnull-err] [pclose-p-cls2-err] [pfcntl-no-soc-err] [pfcntl-soc-null] [pfcntl-enotsup] [pfcntl-einval-err] [pioctl-no-soc-err] [pioctl-enotsup] [pioctl-pru-cntl] [pfork-enomem-err] [pdup-no-soc-err] [pudp-soc-null-err] [ha-nomem-err] [ha-tlv-err] [ha-soc-arg-err] [ha-cli-tlv-err] [ha-pss-upd-err] [ha-no-soc-err] [ha-soc-tlv-err] [ha-soc-pss-upd] [ha-inpcb-tlv] [ha-inpcb-pssky] [ha-ip-mopt-tlv] [ha-ip-mopt-pss] [ha-ip6-mopt-tlv] [ha-ip6-mopt-pss] [ha-tcpcb-tlv] [ha-tcpcb-pss] [ft-tcp-wblock] [ft-send-p-sndmsg] [ft-ack-rcv-no-soc] ] [ TABLE_sp_cl [ can-requests can-unblocks can-misses sel-drops sel-wakes ] ] ] ]

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

client

Display sockets client information

pid

Display specific client process information

pid

Type: integer

min: 1  max: 65535

Display client process <pid>

tcp

Display TCP clients

udp

Display UDP clients

raw

Display RAW clients

detail

Display socket details

__readonly__

TABLE_total_clients

Total no of client sockets

socket-type

Type: string

Sockets type

total-clients

Type: longlong

no-total-clients

Type: longlong

TABLE_cl_sk

Display Client sockets

prefix

Type: string

Prefix to the sockets

client-name

Type: string

Display socket client info

pid

Type: integer

min: 1  max: 65535

Display client process <pid>

No-of-clients

Type: longlong

Number of socket clients

fast-tcp-mts-ctrl-q

Type: uinteger

cancel-requests

Type: uinteger

cancel-unblocks

Type: uinteger

cancel-misses

Type: uinteger

select-drops

Type: uinteger

select-wakes

Type: uinteger

TABLE_det

Display Socket client Details

fd

Type: integer

Client socket fd

client-id

Type: integer

Client socket id

mts-sap

Type: integer

socket mts addr sap

TABLE_st

Sock detail Ctrl statistics

soc-calls

Type: uinteger

bind-calls

Type: uinteger

listen-calls

Type: uinteger

accept-calls

Type: uinteger

acc-dispat-err

Type: uinteger

connect-calls

Type: uinteger

connec-dispatch

Type: uinteger

recvmsg-dispatch

Type: uinteger

recv-dis-nblock

Type: uinteger

recvmsg-call

Type: uinteger

brecv-dispatch

Type: uinteger

fsendmsg-calls

Type: uinteger

sendmsg-dispatch

Type: uinteger

sendmsg-calls

Type: uinteger

msendmsg-calls

Type: uinteger

select-calls

Type: uinteger

select-dispatch

Type: uinteger

select-need-work

Type: uinteger

sh-calls

Type: uinteger

close-calls

Type: uinteger

fcntl-calls

Type: uinteger

ioctl-calls

Type: uinteger

setsock-calls

Type: uinteger

getsock-calls

Type: uinteger

getsockname-calls

Type: uinteger

getpeer-calls

Type: uinteger

fork-calls

Type: uinteger

execve-calls

Type: uinteger

dup-calls

Type: uinteger

can-calls

Type: uinteger

can-miss

Type: uinteger

can-unblk-sele

Type: uinteger

soc-ha-calls

Type: uinteger

pfork-client

Type: uinteger

read-fd

Type: uinteger

write-fd

Type: uinteger

read-fd-set

Type: uinteger

write-fd-set

Type: uinteger

fast-tcp-send-req

Type: uinteger

fast-tcp-send-suc

Type: uinteger

fast-tcp-ack

Type: uinteger

TABLE_sterr

Client Socket Error Statistics

sock-err

Type: uinteger

sock-nodev-err

Type: uinteger

bind-err

Type: uinteger

lis-err

Type: uinteger

accept-err

Type: uinteger

connect-err

Type: uinteger

recvmsg-err

Type: uinteger

brcvmsg-err

Type: uinteger

fsendmsg-err

Type: uinteger

sendmsg-err

Type: uinteger

msndmsg-err

Type: uinteger

select-err

Type: uinteger

sel-nomem-err

Type: uinteger

shut-err

Type: uinteger

close-err

Type: uinteger

fcntl-err

Type: uinteger

ioctl-err

Type: uinteger

setsoc-err

Type: uinteger

getsoc-err

Type: uinteger

getsocname-err

Type: uinteger

getpeername-err

Type: uinteger

fork-err

Type: uinteger

execve-err

Type: uinteger

dup-err

Type: uinteger

psoc-vrf-err

Type: uinteger

psoc-nosoc-err

Type: uinteger

psoc-sock-null-err

Type: uinteger

psoc-socre-err

Type: uinteger

pbind-nsock-err

Type: uinteger

pbd-getsocaddr

Type: uinteger

pbind-sobind-err

Type: uinteger

plisten-nsoc-err

Type: uinteger

plis-solis-err

Type: uinteger

pacc-nsoc-err

Type: uinteger

pacc-no-nsoc-err

Type: uinteger

pacc-soc-null-err

Type: uinteger

pacc-copy-err

Type: uinteger

pacc-no-acc-err

Type: uinteger

pacc-woublo-err

Type: uinteger

pacc-connabo-err

Type: uinteger

pacc-cond-wait-err

Type: uinteger

pacc-so-err-err

Type: uinteger

pacc-err-err

Type: uinteger

pcon-no-soc-err

Type: uinteger

pcon-ealready-err

Type: uinteger

pconn-getsock

Type: uinteger

pconn-socon-err

Type: uinteger

pconn-einpro-err

Type: uinteger

pconn-con-wait-err

Type: uinteger

psend-no-soc-err

Type: uinteger

psend-inval-iov

Type: uinteger

psend-getsoc-err

Type: uinteger

psend-msg-ctrl-err

Type: uinteger

psend-sockarg-err

Type: uinteger

psend-pru-sosend

Type: uinteger

precv-nosock-err

Type: uinteger

precv-inval-iovlen

Type: uinteger

precv-pru-sorecv

Type: uinteger

precv-cp-msg-err

Type: uinteger

precv-cp-msg-nlen

Type: uinteger

precv-cp-data-err

Type: uinteger

pbrecv-rcvmsg-err

Type: uinteger

pshut-no-soc-err

Type: uinteger

psetsoc-val-err

Type: uinteger

psetsoc-inv-val

Type: uinteger

psetsoc-no-soc-err

Type: uinteger

psetsoc-sosetopt

Type: uinteger

pgetsoc-no-socerr

Type: uinteger

pgetsoc-cp-err

Type: uinteger

pgetsoc-val-err

Type: uinteger

pgetsoc-sogt-err

Type: uinteger

pgtsoc-no-soc-err

Type: uinteger

pgtsoc-cp-err

Type: uinteger

pgtsoc-pru-soc-err

Type: uinteger

pgtsoc-cpout-err

Type: uinteger

pgtprne-no-soc-err

Type: uinteger

pgtprne-enot-err

Type: uinteger

pgtprne-cp-err

Type: uinteger

pgtprne-pru-pradd

Type: uinteger

pgtprne-cpout-err

Type: uinteger

pclose-no-soc-err

Type: uinteger

pclose-socnull-err

Type: uinteger

pclose-p-cls2-err

Type: uinteger

pfcntl-no-soc-err

Type: uinteger

pfcntl-soc-null

Type: uinteger

pfcntl-enotsup

Type: uinteger

pfcntl-einval-err

Type: uinteger

pioctl-no-soc-err

Type: uinteger

pioctl-enotsup

Type: uinteger

pioctl-pru-cntl

Type: uinteger

pfork-enomem-err

Type: uinteger

pdup-no-soc-err

Type: uinteger

pudp-soc-null-err

Type: uinteger

ha-nomem-err

Type: uinteger

ha-tlv-err

Type: uinteger

ha-soc-arg-err

Type: uinteger

ha-cli-tlv-err

Type: uinteger

ha-pss-upd-err

Type: uinteger

ha-no-soc-err

Type: uinteger

ha-soc-tlv-err

Type: uinteger

ha-soc-pss-upd

Type: uinteger

ha-inpcb-tlv

Type: uinteger

ha-inpcb-pssky

Type: uinteger

ha-ip-mopt-tlv

Type: uinteger

ha-ip-mopt-pss

Type: uinteger

ha-ip6-mopt-tlv

Type: uinteger

ha-ip6-mopt-pss

Type: uinteger

ha-tcpcb-tlv

Type: uinteger

ha-tcpcb-pss

Type: uinteger

ft-tcp-wblock

Type: uinteger

ft-send-p-sndmsg

Type: uinteger

ft-ack-rcv-no-soc

Type: uinteger

TABLE_sp_cl

Sock specific Ctrl statistics

can-requests

Type: uinteger

can-unblocks

Type: uinteger

can-misses

Type: uinteger

sel-drops

Type: uinteger

sel-wakes

Type: uinteger

Command Modes

- /exec

show sockets connection

show sockets connection [ pid pid | tcp | udp | raw ] [ local { srcIP | srcIP6 } ] [ foreign { dstIP | dstIP6 } ] [detail] [keydetails] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_conn prot tcp-state rcv-count laddr lport faddr fport intf rcv-count snd-count type ttl tos options state iss snd-una snd-nxt snd_wnd irs rcv-nxt rcv-wnd snd-cwnd srtt rtt rttvar krtt rttmin mss dur flags md5-cnt md5-host md5-err rcv-hiwat rcv-lowat rcv-flags snd-hiwat snd-lowat snd-flags tcp-count udp-count raw-count ]

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

connection

Display connection information

pid

Display specific client process connection status

pid

Type: integer

min: 1  max: 65535

Display client process connection status <pid>

tcp

Display all TCP connections

udp

Display all UDP connections

raw

Display all raw connections

local

Display all TCP connections with specified local address

srcIP

Type: ipaddr

Display all TCP connections with specified local address

srcIP6

Type: ipv6addr

Display all TCP connections with specified local address

foreign

Display all TCP connections with specified foreign address

dstIP

Type: ipaddr

Display all TCP connections with specified foreign address

dstIP6

Type: ipv6addr

Display all TCP connections with specified foreign address

detail

Display detailed connection infomation

keydetails

Display md5 key specific details

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

both  value: 3

TABLE_conn

prot

Type: string

tcp-state

Type: string

rcv-count

Type: uinteger

laddr

Type: ipaddr

lport

Type: uinteger

faddr

Type: ipaddr

fport

Type: uinteger

intf

Type: string

snd-count

Type: uinteger

type

Type: string

ttl

Type: uinteger

tos

Type: uinteger

options

Type: string

state

Type: string

iss

Type: uinteger

snd-una

Type: uinteger

snd-nxt

Type: uinteger

snd_wnd

Type: uinteger

irs

Type: uinteger

rcv-nxt

Type: uinteger

rcv-wnd

Type: uinteger

snd-cwnd

Type: uinteger

srtt

Type: uinteger

rtt

Type: uinteger

rttvar

Type: uinteger

krtt

Type: uinteger

rttmin

Type: uinteger

mss

Type: uinteger

dur

Type: uinteger

flags

Type: uinteger

md5-cnt

Type: uinteger

md5-host

Type: string

md5-err

Type: uinteger

rcv-hiwat

Type: uinteger

rcv-lowat

Type: uinteger

rcv-flags

Type: uinteger

snd-hiwat

Type: uinteger

snd-lowat

Type: uinteger

snd-flags

Type: uinteger

tcp-count

Type: uinteger

udp-count

Type: uinteger

raw-count

Type: uinteger

Command Modes

- /exec

show sockets keychain-dump

show sockets keychain-dump

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

keychain-dump

Dump the pss information for keychains

Command Modes

- /exec

show sockets performance

show sockets performance [clear]

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

performance

Display detailed perf statistics

clear

Clear perf statistics

Command Modes

- /exec

show sockets statistics

show sockets statistics [ all | tcp | tcp6 | tcpsum | udp | udp6 | udpsum | raw | raw6 | rawsum ] [ __readonly__ TABLE_vrf vrf-name-out TABLE_afi afi TABLE_stat version rx-total rx-bad-csum rx-bad-offset rx-too-short rx-bad-md5 rx-inseq-pack rx-inseq-bytes rx-dup-pack rx-dup-bytes rx-partdup-pack rx-partdup-bytes rx-oo-pack rx-oo-bytes rx-afterwin-pack rx-afterwin-bytes rx-afterclose-pack rx-winprobe-pack rx-winupdate-pack rx-dupack-pack rx-dupack-unsent-pack rx-ack-pack rx-ack-bytes tx-total tx-urg tx-ctrl tx-data-pack tx-data-bytes tx-reasm-pack tx-reasm-bytes tx-ackonly-pack tx-winprobe-pack tx-winupdate-bytes tx-conn-init tx-conn-accepted tx-conn-estd tx-rxmt-timeout tx-rxmt-timeout-dropped tx-ka-timeout tx-ka-probe tx-ka-drop closed dropped emb-dropped udp-rx-total udp-rx-bad-csum udp-rx-no-csum udp-rx-too-short udp-rx-bad-len udp-rx-no-port udp-rx-no-port-bcast udp-rx-no-port-mcast udp-rx-full-socket-drop udp-tx-total raw-rx-rcvd raw-rx-no-port raw-rx-full-socket-drop raw-tx-sent ]

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

statistics

Display sockets statistics

all

Display TCP/UDP/RAW v4/v6 protocols statistics

tcp

Display TCP v4 protocol statistics

tcp6

Display TCP v6 protocol statistics

tcpsum

Display sum of TCP v4 and TCP v6 protocols statistics

udp

Display UDP v4 protocol statistics

udp6

Display UDP v6 protocol statistics

udpsum

Display sum of UDP v4 and UDP v6 protocols statistics

raw

Display RAW v4 protocol statistics

raw6

Display RAW v6 protocol statistics

rawsum

Display sum of RAW v4 and RAW v6 protocols statistics

__readonly__

TABLE_vrf

vrf-name-out

Type: string

TABLE_afi

afi

ipv4  value: 1

ipv6  value: 2

both  value: 3

TABLE_stat

rx-total

Type: uinteger

rx-bad-csum

Type: uinteger

rx-bad-offset

Type: uinteger

rx-too-short

Type: uinteger

rx-bad-md5

Type: uinteger

rx-inseq-pack

Type: uinteger

rx-inseq-bytes

Type: uinteger

rx-dup-pack

Type: uinteger

rx-dup-bytes

Type: uinteger

rx-partdup-pack

Type: uinteger

rx-partdup-bytes

Type: uinteger

rx-oo-pack

Type: uinteger

rx-oo-bytes

Type: uinteger

rx-afterwin-pack

Type: uinteger

rx-afterwin-bytes

Type: uinteger

rx-afterclose-pack

Type: uinteger

rx-winprobe-pack

Type: uinteger

rx-winupdate-pack

Type: uinteger

rx-dupack-pack

Type: uinteger

rx-dupack-unsent-pack

Type: uinteger

rx-ack-pack

Type: uinteger

rx-ack-bytes

Type: uinteger

tx-total

Type: uinteger

tx-urg

Type: uinteger

tx-ctrl

Type: uinteger

tx-data-pack

Type: uinteger

tx-data-bytes

Type: uinteger

tx-reasm-pack

Type: uinteger

tx-reasm-bytes

Type: uinteger

tx-ackonly-pack

Type: uinteger

tx-winprobe-pack

Type: uinteger

tx-winupdate-bytes

Type: uinteger

tx-conn-init

Type: uinteger

tx-conn-accepted

Type: uinteger

tx-conn-estd

Type: uinteger

tx-rxmt-timeout

Type: uinteger

tx-rxmt-timeout-dropped

Type: uinteger

tx-ka-timeout

Type: uinteger

tx-ka-probe

Type: uinteger

tx-ka-drop

Type: uinteger

closed

Type: uinteger

dropped

Type: uinteger

emb-dropped

Type: uinteger

udp-rx-total

Type: uinteger

udp-rx-bad-csum

Type: uinteger

udp-rx-no-csum

Type: uinteger

udp-rx-too-short

Type: uinteger

udp-rx-bad-len

Type: uinteger

udp-rx-no-port

Type: uinteger

udp-rx-no-port-bcast

Type: uinteger

udp-rx-no-port-mcast

Type: uinteger

udp-rx-full-socket-drop

Type: uinteger

udp-tx-total

Type: uinteger

raw-rx-rcvd

Type: uinteger

raw-rx-no-port

Type: uinteger

raw-rx-full-socket-drop

Type: uinteger

raw-tx-sent

Type: uinteger

version

Type: string

Command Modes

- /exec

show sockets tcp keychain binding

show sockets tcp keychain binding [ __readonly__ TABLE_keychain keychain handle ref_count ]

Syntax Description

show

Show running system information

sockets

Display sockets status and configuration

tcp

TCP information

keychain

Keychain information

binding

Binding information reagarding RPM

__readonly__

TABLE_keychain

all sockets tcp keychains

keychain

Type: string

xml keychain information

handle

Type: hex

xml handle information

ref_count

Type: integer

xml refcount information

Command Modes

- /exec

show spanning-tree (stp)

show spanning-tree [ vlan vlan-id ] { verbosity | active } +

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

verbosity

verbosity

brief  value: 1

Brief summary of interface information
detail  value: 2

Detailed information

active

Report on active interfaces only

Command Modes

- /exec

show spanning-tree (stp)

show spanning-tree [ vlan vlan-id ] [ __readonly__ TABLE_tree tree_id tree_tree_type tree_protocol port_count bridge_mac bridge_priority tree_designated_root tree_designated_root_priority stp_active root_path_cost root_port_if_index root_port_priority root_port_number topology_change topology_change_detected topology_change_count topology_change_time_since_last tc_initiator_if_index bridge_forward_delay bridge_max_age bridge_hello_time max_age hello_time forward_delay hold_time hello_timer topology_change_timer tcn_timer aging_timer disabled blocking listening learning forwarding invalid TABLE_port if_index port_info_tree_id state role port_priority port_number port_protocol port_tree_type path_cost port_designated_root port_designated_root_priority designated_cost designated_bridge designated_bridge_priority designated_port tc_acknowledge forward_transition_count self_looped inconsistency bpdus_in bpdus_out port_fast link_type port_guard bpdu_guard bpdu_filter oper_portfast oper_p2p oper_loopguard oper_bpduguard oper_bpdufilter int_bpdufilter [oper_networkport] forward_delay_timer hold_timer message_age peer dispute pvstsim_inc_timer [boundary] [simulate_pvst_cfg] [simulate_pvst] [prestd] ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

__readonly__

Read Only

TABLE_tree

tree_id

Type: uinteger

Tree Id

tree_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

tree_protocol

Tree Protocol

invalid  value: 0

invalid
default  value: 1

default
ieee  value: 2

ieee
dec  value: 3

dec
ibm  value: 4

ibm
vlan-bridge  value: 5

vlan-bridge
rstp  value: 6

rstp
mstp  value: 7

mstp

port_count

Type: uinteger

Number of Ports in Tree

bridge_mac

Type: ethernet

Bridge Mac

bridge_priority

Type: uinteger

Bridge Priority

tree_designated_root

Type: ethernet

Designated Root Mac

tree_designated_root_priority

Type: uinteger

Designated Root Priority

stp_active

Type: bool

Spanning Tree State

root_path_cost

Type: uinteger

Root Path Cost

root_port_if_index

Type: interface

Root Port

root_port_priority

Type: uinteger

Root Port Priority

root_port_number

Type: uinteger

Root Port Number

topology_change

Type: bool

Topology Change flag is set ?

topology_change_detected

Type: bool

Topology Change detected flag is set ?

topology_change_count

Type: uinteger

Topology Change Count

topology_change_time_since_last

Type: uinteger

Time since last TC

tc_initiator_if_index

Type: interface

Topology Change initiator port

max_age

Type: uinteger

Max Age

hello_time

Type: uinteger

Hello Time

forward_delay

Type: uinteger

Forward delay

bridge_max_age

Type: uinteger

Configured Bridge Max Age

bridge_hello_time

Type: uinteger

Configured Hello Time

bridge_forward_delay

Type: uinteger

Configured Forward Delay

hold_time

Type: uinteger

Configured Hold Time

hello_timer

Type: uinteger

Hello Timer Value

topology_change_timer

Type: uinteger

Topology Change Timer Value

tcn_timer

Type: uinteger

TCN Timer Value

aging_timer

Type: uinteger

Ageing Timer Value

disabled

Type: uinteger

Number of ports Disabled

blocking

Type: uinteger

Number of ports Blocking

listening

Type: uinteger

Number of ports Listening

learning

Type: uinteger

Number of ports Learning

forwarding

Type: uinteger

Number of ports Forwarding

invalid

Type: uinteger

Number of ports Invalid

TABLE_port

if_index

Type: interface

Interface

state

STP Port State

disabled  value: 0

disabled
blocking  value: 1

blocking
listening  value: 2

listening
learning  value: 3

learning
forwarding  value: 4

forwarding
invalid  value: 5

invalid

role

STP Port Role

unknown  value: 0

unknown
alternate  value: 4

alternate
root  value: 2

root
designated  value: 3

designated
backup  value: 5

backup
master  value: 7

master

port_priority

Type: uinteger

Port priority

port_number

Type: uinteger

Port Number

port_info_tree_id

Type: uinteger

Tree Id

port_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

port_protocol

Tree Protocol

invalid  value: 0

invalid
default  value: 1

default
ieee  value: 2

ieee
dec  value: 3

dec
ibm  value: 4

ibm
vlan-bridge  value: 5

vlan-bridge
rstp  value: 6

rstp
mstp  value: 7

mstp

path_cost

Type: uinteger

Cost configured on this port

port_designated_root

Type: ethernet

Designated Root Mac

port_designated_root_priority

Type: uinteger

Designated Root Priority

designated_cost

Type: uinteger

Designated cost

designated_bridge

Type: ethernet

Designated bridge mac

designated_bridge_priority

Type: uinteger

Designated bridge priority

designated_port

Type: uinteger

Designated Port Id

tc_acknowledge

Type: bool

Is topology change acknowledge flag set ?

forward_transition_count

Type: uinteger

Port transitions to Forwarding

self_looped

Type: bool

Is Port self looped ?

inconsistency

Type: uinteger

PVST+ Inconsistency Error Flags

bpdus_in

Type: uinteger

BPDUs received on this stp port

bpdus_out

Type: uinteger

BPDUs send on this stp port

port_fast

Port Fast configured on port

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable
trunk  value: 3

trunk
network  value: 4

network
edge  value: 5

edge

link_type

Link type configured on this port

auto  value: 3

auto
p2p  value: 1

p2p
shared  value: 2

shared

port_guard

Port Guard mode of port

default1  value: 0

default
root  value: 1

root
loop  value: 2

loop
none  value: 3

none

bpdu_guard

Bpdu Guard mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

bpdu_filter

Bpdu Filter mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

oper_portfast

Type: bool

Is portfast enabled ?

oper_p2p

Type: bool

Is port P2P ?

oper_loopguard

Type: bool

Is loopguard enabled ?

oper_bpduguard

Type: bool

Is bpduguard enabled ?

oper_bpdufilter

Type: bool

Is bpdufilter enabled ?

int_bpdufilter

Type: bool

Is internal bpdufilter enabled ?

forward_delay_timer

Type: uinteger

Forward Delay timer

hold_timer

Type: uinteger

Hold Timer

message_age

Type: uinteger

Message age timer

peer

STP protocol of the peer

undetected  value: 0

undetected
stp  value: 1

stp
rstp  value: 2

rstp

dispute

Type: bool

Is port Disputed ?

pvstsim_inc_timer

Type: uinteger

PVST Simulation Inconsistency Hold Timer

boundary

Type: bool

Is port boundary ?

prestd

Type: bool

Is port Pre STD MST ?

simulate_pvst

Type: bool

Is port is pvst simulate mode ?

oper_networkport

Type: bool

Is network port enabled ?

simulate_pvst_cfg

PVST Simulation configured on port

default1  value: 0

default
enabled  value: 1

enabled
disabled  value: 2

disabled
def_enabled  value: 3

enabled by default
def_disabled  value: 4

disabled by default

Command Modes

- /exec

show spanning-tree interface (stp)

show spanning-tree [ vlan vlan-id ] interface interface-id { verbosity | active } +

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

interface

Spanning Tree interface status and configuration

interface-id

Type: interface

verbosity

verbosity

brief  value: 1

Brief summary of interface information
detail  value: 2

Detailed information

active

Report on active instances only

Command Modes

- /exec

show spanning-tree interface (stp)

show spanning-tree [ vlan vlan-id ] interface interface-id [ __readonly__ TABLE_port if_index port_info_tree_id state role port_priority port_number port_protocol port_tree_type path_cost port_designated_root port_designated_root_priority designated_cost designated_bridge designated_bridge_priority designated_port tc_acknowledge forward_transition_count self_looped inconsistency bpdus_in bpdus_out port_fast link_type port_guard bpdu_guard bpdu_filter oper_portfast oper_p2p oper_loopguard oper_bpduguard oper_bpdufilter int_bpdufilter forward_delay_timer hold_timer message_age peer dispute pvstsim_inc_timer prestd boundary simulate_pvst oper_networkport simulate_pvst_cfg ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

interface

Spanning Tree interface status and configuration

interface-id

Type: interface

__readonly__

Read Only

TABLE_port

if_index

Type: interface

Interface

port_info_tree_id

Type: uinteger

Tree Id

state

STP Port State

disabled  value: 0

disabled
blocking  value: 1

blocking
listening  value: 2

listening
learning  value: 3

learning
forwarding  value: 4

forwarding
invalid  value: 5

invalid

role

STP Port Role

unknown  value: 0

unknown
alternate  value: 4

alternate
root  value: 2

root
designated  value: 3

designated
backup  value: 5

backup
master  value: 7

master

port_priority

Type: uinteger

Port priority

port_number

Type: uinteger

Port Number

port_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

port_protocol

Tree Protocol

invalid  value: 0

invalid
default  value: 1

default
ieee  value: 2

ieee
dec  value: 3

dec
ibm  value: 4

ibm
vlan-bridge  value: 5

vlan-bridge
rstp  value: 6

rstp
mstp  value: 7

mstp

path_cost

Type: uinteger

Cost configured on this port

port_designated_root

Type: ethernet

Designated Root Mac

port_designated_root_priority

Type: uinteger

Designated Root Priority

designated_cost

Type: uinteger

Designated cost

designated_bridge

Type: ethernet

Designated bridge mac

designated_bridge_priority

Type: uinteger

Designated bridge priority

designated_port

Type: uinteger

Designated Port Id

tc_acknowledge

Type: bool

Is topology change acknowledge flag set ?

forward_transition_count

Type: uinteger

Port transitions to Forwarding

self_looped

Type: bool

Is Port self looped ?

inconsistency

Type: uinteger

PVST+ Inconsistency Error Flags

bpdus_in

Type: uinteger

BPDUs received on this stp port

bpdus_out

Type: uinteger

BPDUs send on this stp port

port_fast

Port Fast configured on port

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable
trunk  value: 3

trunk
network  value: 4

network
edge  value: 5

edge

link_type

Link type configured on this port

auto  value: 3

auto
p2p  value: 1

p2p
shared  value: 2

shared

port_guard

Port Guard mode of port

default1  value: 0

default
root  value: 1

root
loop  value: 2

loop
none  value: 3

none

bpdu_guard

Bpdu Guard mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

bpdu_filter

Bpdu Filter mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

oper_portfast

Type: bool

Is portfast enabled ?

oper_p2p

Type: bool

Is port P2P ?

oper_loopguard

Type: bool

Is loopguard enabled ?

oper_bpduguard

Type: bool

Is bpduguard enabled ?

oper_bpdufilter

Type: bool

Is bpdufilter enabled ?

int_bpdufilter

Type: bool

Is internal bpdufilter enabled ?

forward_delay_timer

Type: uinteger

Forward Delay timer

hold_timer

Type: uinteger

Hold Timer

message_age

Type: uinteger

Message age timer

peer

STP protocol of the peer

undetected  value: 0

undetected
stp  value: 1

stp
rstp  value: 2

rstp

dispute

Type: bool

Is port Disputed ?

pvstsim_inc_timer

Type: uinteger

PVST Simulation Inconsistency Hold Timer

boundary

Type: bool

Is port boundary ?

prestd

Type: bool

Is port Pre STD MST ?

simulate_pvst

Type: bool

Is port is pvst simulate mode ?

oper_networkport

Type: bool

Is network port enabled ?

simulate_pvst_cfg

PVST Simulation configured on port

default1  value: 0

default
enabled  value: 1

enabled
disabled  value: 2

disabled
def_enabled  value: 3

enabled by default
def_disabled  value: 4

disabled by default

Command Modes

- /exec

show spanning-tree mst

show spanning-tree mst [mst-id] [ __readonly__ TABLE_tree tree_id tree_tree_type tree_protocol port_count bridge_mac bridge_priority tree_designated_root tree_designated_root_priority stp_active root_path_cost root_port_if_index root_port_priority root_port_number topology_change topology_change_detected topology_change_count topology_change_time_since_last tc_initiator_if_index bridge_forward_delay bridge_max_age bridge_hello_time max_age hello_time forward_delay hold_time hello_timer topology_change_timer tcn_timer aging_timer disabled blocking listening learning forwarding invalid ist-master-id-mac ist-master-prio ist-path-cost remaining-hops max-hops txholdcount tree-vlan-map TABLE_port if_index port_info_tree_id state role port_priority port_number port_protocol port_tree_type path_cost port_designated_root port_designated_root_priority designated_cost designated_bridge designated_bridge_priority designated_port tc_acknowledge forward_transition_count self_looped inconsistency bpdus_in bpdus_out port_fast link_type port_guard bpdu_guard bpdu_filter oper_portfast oper_p2p oper_loopguard oper_bpduguard oper_bpdufilter int_bpdufilter [oper_networkport] forward_delay_timer hold_timer message_age peer dispute pvstsim_inc_timer boundary simulate_pvst prestd [designated_ist_master] [designated_ist_master_priority] [designated_ist_cost] [vlan-map] ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

mst

Multiple spanning trees

mst-id

Type: integer-mrange

MST instance range, example: 0-3,5,7-9

__readonly__

Read Only

TABLE_tree

tree_id

Type: uinteger

Tree Id

tree_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

tree_protocol

Tree Protocol

invalid  value: 0

invalid
default  value: 1

default
ieee  value: 2

ieee
dec  value: 3

dec
ibm  value: 4

ibm
vlan-bridge  value: 5

vlan-bridge
rstp  value: 6

rstp
mstp  value: 7

mstp

port_count

Type: uinteger

Number of Ports in Tree

bridge_mac

Type: ethernet

Bridge Mac

bridge_priority

Type: uinteger

Bridge Priority

tree_designated_root

Type: ethernet

Designated Root Mac

tree_designated_root_priority

Type: uinteger

Designated Root Priority

stp_active

Type: bool

Spanning Tree State

root_path_cost

Type: uinteger

Root Path Cost

root_port_if_index

Type: interface

Root Port

root_port_priority

Type: uinteger

Root Port Priority

root_port_number

Type: uinteger

Root Port Number

topology_change

Type: bool

Topology Change flag is set ?

topology_change_detected

Type: bool

Topology Change detected flag is set ?

topology_change_count

Type: uinteger

Topology Change Count

topology_change_time_since_last

Type: uinteger

Time since last TC

tc_initiator_if_index

Type: interface

Topology Change initiator port

max_age

Type: uinteger

Max Age

hello_time

Type: uinteger

Hello Time

forward_delay

Type: uinteger

Forward delay

bridge_max_age

Type: uinteger

Configured Bridge Max Age

bridge_hello_time

Type: uinteger

Configured Hello Time

bridge_forward_delay

Type: uinteger

Configured Forward Delay

hold_time

Type: uinteger

Configured Hold Time

hello_timer

Type: uinteger

Hello Timer Value

topology_change_timer

Type: uinteger

Topology Change Timer Value

tcn_timer

Type: uinteger

TCN Timer Value

aging_timer

Type: uinteger

Ageing Timer Value

disabled

Type: uinteger

Number of ports Disabled

blocking

Type: uinteger

Number of ports Blocking

listening

Type: uinteger

Number of ports Listening

learning

Type: uinteger

Number of ports Learning

forwarding

Type: uinteger

Number of ports Forwarding

invalid

Type: uinteger

Number of ports Invalid

ist-master-id-mac

Type: ethernet

IST Master ID MAC address

ist-master-prio

Type: uinteger

IST Master ID priority

ist-path-cost

Type: uinteger

IST path cost

remaining-hops

Type: uinteger

Remaining hops

max-hops

Type: uinteger

Max Hops

txholdcount

Type: uinteger

TX Hold count

tree-vlan-map

Type: string

Bitmap of vlans mapped to tree

TABLE_port

if_index

Type: interface

Interface

state

STP Port State

disabled  value: 0

disabled
blocking  value: 1

blocking
listening  value: 2

listening
learning  value: 3

learning
forwarding  value: 4

forwarding
invalid  value: 5

invalid

role

STP Port Role

unknown  value: 0

unknown
alternate  value: 4

alternate
root  value: 2

root
designated  value: 3

designated
backup  value: 5

backup
master  value: 7

master

port_priority

Type: uinteger

Port priority

port_number

Type: uinteger

Port Number

port_info_tree_id

Type: uinteger

Tree Id

port_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

port_protocol

Tree Protocol

invalid  value: 0

invalid
default  value: 1

default
ieee  value: 2

ieee
dec  value: 3

dec
ibm  value: 4

ibm
vlan-bridge  value: 5

vlan-bridge
rstp  value: 6

rstp
mstp  value: 7

mstp

path_cost

Type: uinteger

Cost configured on this port

port_designated_root

Type: ethernet

Designated Root Mac

port_designated_root_priority

Type: uinteger

Designated Root Priority

designated_cost

Type: uinteger

Designated cost

designated_bridge

Type: ethernet

Designated bridge mac

designated_bridge_priority

Type: uinteger

Designated bridge priority

designated_port

Type: uinteger

Designated Port Id

tc_acknowledge

Type: bool

Is topology change acknowledge flag set ?

forward_transition_count

Type: uinteger

Port transitions to Forwarding

self_looped

Type: bool

Is Port self looped ?

inconsistency

Type: uinteger

PVST+ Inconsistency Error Flags

bpdus_in

Type: uinteger

BPDUs received on this stp port

bpdus_out

Type: uinteger

BPDUs send on this stp port

port_fast

Port Fast configured on port

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable
trunk  value: 3

trunk
network  value: 4

network
edge  value: 5

edge

link_type

Link type configured on this port

auto  value: 3

auto
p2p  value: 1

p2p
shared  value: 2

shared

port_guard

Port Guard mode of port

default1  value: 0

default
root  value: 1

root
loop  value: 2

loop
none  value: 3

none

bpdu_guard

Bpdu Guard mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

bpdu_filter

Bpdu Filter mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

oper_portfast

Type: bool

Is portfast enabled ?

oper_p2p

Type: bool

Is port P2P ?

oper_loopguard

Type: bool

Is loopguard enabled ?

oper_bpduguard

Type: bool

Is bpduguard enabled ?

oper_bpdufilter

Type: bool

Is bpdufilter enabled ?

int_bpdufilter

Type: bool

Is internal bpdufilter enabled ?

forward_delay_timer

Type: uinteger

Forward Delay timer

hold_timer

Type: uinteger

Hold Timer

message_age

Type: uinteger

Message age timer

peer

STP protocol of the peer

undetected  value: 0

undetected
stp  value: 1

stp
rstp  value: 2

rstp

boundary

Type: bool

Is port boundary ?

simulate_pvst

Type: bool

Is port is pvst simulate mode ?

dispute

Type: bool

Is port Disputed ?

pvstsim_inc_timer

Type: uinteger

PVST Simulation Inconsistency Hold Timer

prestd

Type: bool

Is port Pre STD MST ?

designated_ist_master

Type: ethernet

Ist master mac

designated_ist_master_priority

Type: uinteger

Ist master priority

designated_ist_cost

Type: uinteger

Ist master path cost

vlan-map

Type: string

Bitmap of vlans mapped to port

oper_networkport

Type: bool

Is network port enabled ?

Command Modes

- /exec

show spanning-tree mst configuration __readonly__

show spanning-tree mst configuration [ __readonly__ stp-mode name rev-id Instance_to_vlan_map mst_id vlan_bit_map [pvlan-sync] ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

mst

Multiple spanning trees

configuration

MST current region configuration

__readonly__

Read Only

stp-mode

Spanning Tree operating mode

rapid-pvst  value: 5

Per-Vlan spanning tree mode
mst  value: 4

Multiple spanning tree mode

name

Type: string

Configuration name

rev-id

Type: uinteger

min: 0  max: 65535

Configuration revision number

Instance_to_vlan_map

Instance to vlan mapping Info

mst_id

Type: integer

MST Instance ID

vlan_bit_map

Type: bitmap

VLAN Bitmap

pvlan-sync

Type: string

pvlan synchronization

Command Modes

- /exec

show spanning-tree mst configuration digest __readonly__

show spanning-tree mst configuration digest [ __readonly__ stp-mode name rev-id digest prestd-digest [pvlan-sync] ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

mst

Multiple spanning trees

configuration

MST current region configuration

digest

Display MST configuration digest

__readonly__

Read Only

stp-mode

Spanning Tree operating mode

rapid-pvst  value: 5

Per-Vlan spanning tree mode
mst  value: 4

Multiple spanning tree mode

name

Type: string

Configuration name

rev-id

Type: uinteger

min: 0  max: 65535

Configuration revision number

digest

Type: string

MST region configuration digest

prestd-digest

Type: string

MST region configuration pre-std digest

pvlan-sync

Type: string

pvlan synchronization

Command Modes

- /exec

show spanning-tree mst detail

show spanning-tree mst [mst-id] detail

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

mst

Multiple spanning trees

mst-id

Type: integer-mrange

MST instance range, example: 0-3,5,7-9

detail

Detailed information

Command Modes

- /exec

show spanning-tree mst interface

show spanning-tree mst [mst-id] interface interface-id [ __readonly__ TABLE_port if_index port_info_tree_id state role port_priority port_number port_protocol port_tree_type path_cost port_designated_root port_designated_root_priority designated_cost designated_bridge designated_bridge_priority designated_port tc_acknowledge forward_transition_count self_looped inconsistency bpdus_in bpdus_out port_fast link_type port_guard bpdu_guard bpdu_filter oper_portfast oper_p2p oper_loopguard oper_bpduguard oper_bpdufilter int_bpdufilter forward_delay_timer hold_timer message_age peer dispute prestd boundary simulate_pvst [designated_ist_master] [designated_ist_master_priority] [designated_ist_cost] [vlan-map] [oper_networkport] [pvstsim_inc_timer] ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

mst

Multiple spanning trees

mst-id

Type: integer-mrange

MST instance range, example: 0-3,5,7-9

interface

Spanning Tree interface status and configuration

interface-id

Type: interface

Specify an interface as a target for the command

__readonly__

Read Only

TABLE_port

if_index

Type: interface

Interface

port_info_tree_id

Type: uinteger

Tree Id

state

STP Port State

disabled  value: 0

disabled
blocking  value: 1

blocking
listening  value: 2

listening
learning  value: 3

learning
forwarding  value: 4

forwarding
invalid  value: 5

invalid

role

STP Port Role

unknown  value: 0

unknown
alternate  value: 4

alternate
root  value: 2

root
designated  value: 3

designated
backup  value: 5

backup
master  value: 7

master

port_priority

Type: uinteger

Port priority

port_number

Type: uinteger

Port Number

port_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

port_protocol

Tree Protocol

invalid  value: 0

invalid
default  value: 1

default
ieee  value: 2

ieee
dec  value: 3

dec
ibm  value: 4

ibm
vlan-bridge  value: 5

vlan-bridge
rstp  value: 6

rstp
mstp  value: 7

mstp

path_cost

Type: uinteger

Cost configured on this port

port_designated_root

Type: ethernet

Designated Root Mac

port_designated_root_priority

Type: uinteger

Designated Root Priority

designated_cost

Type: uinteger

Designated cost

designated_bridge

Type: ethernet

Designated bridge mac

designated_bridge_priority

Type: uinteger

Designated bridge priority

designated_port

Type: uinteger

Designated Port Id

tc_acknowledge

Type: bool

Is topology change acknowledge flag set ?

forward_transition_count

Type: uinteger

Port transitions to Forwarding

self_looped

Type: bool

Is Port self looped ?

inconsistency

Type: uinteger

PVST+ Inconsistency Error Flags

bpdus_in

Type: uinteger

BPDUs received on this stp port

bpdus_out

Type: uinteger

BPDUs send on this stp port

port_fast

Port Fast configured on port

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable
trunk  value: 3

trunk
network  value: 4

network
edge  value: 5

edge

link_type

Link type configured on this port

auto  value: 3

auto
p2p  value: 1

p2p
shared  value: 2

shared

port_guard

Port Guard mode of port

default1  value: 0

default
root  value: 1

root
loop  value: 2

loop
none  value: 3

none

bpdu_guard

Bpdu Guard mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

bpdu_filter

Bpdu Filter mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

oper_portfast

Type: bool

Is portfast enabled ?

oper_p2p

Type: bool

Is port P2P ?

oper_loopguard

Type: bool

Is loopguard enabled ?

oper_bpduguard

Type: bool

Is bpduguard enabled ?

oper_bpdufilter

Type: bool

Is bpdufilter enabled ?

int_bpdufilter

Type: bool

Is internal bpdufilter enabled ?

forward_delay_timer

Type: uinteger

Forward Delay timer

hold_timer

Type: uinteger

Hold Timer

message_age

Type: uinteger

Message age timer

peer

STP protocol of the peer

undetected  value: 0

undetected
stp  value: 1

stp
rstp  value: 2

rstp

boundary

Type: bool

Is port boundary ?

simulate_pvst

Type: bool

Is port is pvst simulate mode ?

dispute

Type: bool

Is port Disputed ?

prestd

Type: bool

Is port Pre STD MST ?

designated_ist_master

Type: ethernet

Ist master mac

designated_ist_master_priority

Type: uinteger

Ist master priority

designated_ist_cost

Type: uinteger

Ist master path cost

vlan-map

Type: string

Bitmap of vlans mapped to port

oper_networkport

Type: bool

Is network port enabled ?

pvstsim_inc_timer

Type: uinteger

PVST Simulation Inconsistency Hold Timer

Command Modes

- /exec

show spanning-tree mst interface detail

show spanning-tree mst [mst-id] interface interface-id detail

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

mst

Multiple spanning trees

mst-id

Type: integer-mrange

MST instance range, example: 0-3,5,7-9

detail

Detailed information

interface

Spanning Tree interface status and configuration

interface-id

Type: interface

Specify an interface as a target for the command

Command Modes

- /exec

show spanning-tree pathcost method

show spanning-tree pathcost method

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

pathcost

Show Spanning pathcost options

method

Default pathcost calculation method

Command Modes

- /exec

show spanning-tree summary

show spanning-tree [ vlan vlan-id ] summary [ __readonly__ stp-mode stp_tree_root_info tree_type bridge_mac bridge_priority tree_designated_root tree_designated_root_priority stp_root_bmp_info stp_root_tree_type tree_root_bmp stp_l2gstp_bmp_info stp_l2gstp_tree_type stp_l2gstp_bmp stp_global_info pcost_method oper_pcost_method port_fast bpdu_guard bpdu_filter oper_loopguard bridge_assurance networkport_default simulate_pvst max-hops peer_switch_cfg oper_peer_switch stp_l2gstp_domain_id stp_lite TABLE_tree stp_tree_summary summary_tree_type disabled blocking listening learning forwarding invalid port_count stp_summary_totals total_tree_type disabled blocking listening learning forwarding invalid port_count ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

summary

Summary of port states

__readonly__

Read Only

stp-mode

Spanning Tree operating mode

rapid-pvst  value: 5

Per-Vlan spanning tree mode
mst  value: 4

Multiple spanning tree mode

stp_tree_root_info

Type: uinteger

STP Tree Root info marker

tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

bridge_mac

Type: ethernet

Bridge Mac

bridge_priority

Type: uinteger

Bridge Priority

tree_designated_root

Type: ethernet

Designated Root Mac

tree_designated_root_priority

Type: uinteger

Designated Root Priority

stp_root_bmp_info

Type: uinteger

STP root bitmap info marker

stp_root_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

tree_root_bmp

Type: bitmap

STP tree root bmp

stp_l2gstp_bmp_info

Type: string

L2 Gateway STP bitmap marker

stp_l2gstp_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

stp_l2gstp_bmp

Type: bitmap

L2 Gateway STP bitmap

stp_global_info

Type: uinteger

STP global info marker

pcost_method

Type: uinteger

STP pathcost method

oper_pcost_method

Type: uinteger

STP oper pathcost method

port_fast

Port Fast configured on port

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable
trunk  value: 3

trunk
network  value: 4

network
edge  value: 5

edge

bpdu_guard

Bpdu Guard mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

bpdu_filter

Bpdu Filter mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

oper_loopguard

Type: bool

Is loopguard enabled ?

bridge_assurance

Type: uinteger

Bridge Assurance

networkport_default

Type: uinteger

Network Port default

simulate_pvst

Type: bool

Is port is pvst simulate mode ?

max-hops

Type: uinteger

Max Hops

peer_switch_cfg

Type: uinteger

peer switch configuration status

oper_peer_switch

Type: uinteger

peer switch operational status

stp_l2gstp_domain_id

Type: uinteger

L2 Gateway STP Domain ID

stp_lite

Type: uinteger

STP-Lite

TABLE_tree

stp_tree_summary

Type: uinteger

STP Tree Summary

summary_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

disabled

Type: uinteger

Number of ports Disabled

blocking

Type: uinteger

Number of ports Blocking

listening

Type: uinteger

Number of ports Listening

learning

Type: uinteger

Number of ports Learning

forwarding

Type: uinteger

Number of ports Forwarding

invalid

Type: uinteger

Number of ports Invalid

port_count

Type: uinteger

Number of Ports in Tree

stp_summary_totals

Type: uinteger

Total num STP trees

total_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

disabled

Type: uinteger

Number of ports Disabled

blocking

Type: uinteger

Number of ports Blocking

listening

Type: uinteger

Number of ports Listening

learning

Type: uinteger

Number of ports Learning

forwarding

Type: uinteger

Number of ports Forwarding

invalid

Type: uinteger

Number of ports Invalid

port_count

Type: uinteger

Number of Ports in Tree

Command Modes

- /exec

show spanning-tree summary totals

show spanning-tree summary totals [ __readonly__ stp-mode stp_tree_root_info tree_type bridge_mac bridge_priority tree_designated_root tree_designated_root_priority stp_root_bmp_info stp_root_tree_type tree_root_bmp stp_l2gstp_bmp_info stp_l2gstp_tree_type stp_l2gstp_bmp stp_global_info pcost_method oper_pcost_method port_fast bpdu_guard bpdu_filter oper_loopguard bridge_assurance networkport_default simulate_pvst max-hops peer_switch_cfg oper_peer_switch stp_l2gstp_domain_id stp_lite stp_summary_totals total_tree_type disabled blocking listening learning forwarding invalid port_count ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

summary

Summary of port states

totals

Only show totals

__readonly__

Read Only

stp-mode

Spanning Tree operating mode

rapid-pvst  value: 5

Per-Vlan spanning tree mode
mst  value: 4

Multiple spanning tree mode

stp_tree_root_info

Type: uinteger

STP Tree Root info marker

tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

bridge_mac

Type: ethernet

Bridge Mac

bridge_priority

Type: uinteger

Bridge Priority

tree_designated_root

Type: ethernet

Designated Root Mac

tree_designated_root_priority

Type: uinteger

Designated Root Priority

stp_root_bmp_info

Type: uinteger

STP root bitmap info marker

stp_root_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

tree_root_bmp

Type: bitmap

STP tree root bmp

stp_l2gstp_bmp_info

Type: string

L2 Gateway STP bitmap marker

stp_l2gstp_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

stp_l2gstp_bmp

Type: bitmap

L2 Gateway STP bitmap

stp_global_info

Type: uinteger

STP global info marker

pcost_method

Type: uinteger

STP pathcost method

oper_pcost_method

Type: uinteger

STP oper pathcost method

port_fast

Port Fast configured on port

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable
trunk  value: 3

trunk
network  value: 4

network
edge  value: 5

edge

bpdu_guard

Bpdu Guard mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

bpdu_filter

Bpdu Filter mode configured

default1  value: 0

default
enable  value: 1

enable
disable  value: 2

disable

oper_loopguard

Type: bool

Is loopguard enabled ?

bridge_assurance

Type: uinteger

Bridge Assurance

networkport_default

Type: uinteger

Network Port default

simulate_pvst

Type: bool

Is port is pvst simulate mode ?

max-hops

Type: uinteger

Max Hops

peer_switch_cfg

Type: uinteger

peer switch configuration status

oper_peer_switch

Type: uinteger

peer switch operational status

stp_l2gstp_domain_id

Type: uinteger

L2 Gateway STP Domain ID

stp_lite

Type: uinteger

STP-Lite

stp_summary_totals

Type: uinteger

Total num STP trees

total_tree_type

Tree Type

unknown  value: 0

UNKNOWN
vlan  value: 1

VLAN
mst  value: 2

MST

disabled

Type: uinteger

Number of ports Disabled

blocking

Type: uinteger

Number of ports Blocking

listening

Type: uinteger

Number of ports Listening

learning

Type: uinteger

Number of ports Learning

forwarding

Type: uinteger

Number of ports Forwarding

invalid

Type: uinteger

Number of ports Invalid

port_count

Type: uinteger

Number of Ports in Tree

Command Modes

- /exec

show spanning-tree vlan (stp)

show spanning-tree [ vlan vlan-id ] blockedports

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

blockedports

Show blocked ports

Command Modes

- /exec

show spanning-tree vlan (stp)

show spanning-tree [ vlan vlan-id ] inconsistentports

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

inconsistentports

Show inconsistent ports

Command Modes

- /exec

show spanning-tree vlan (stp)

show spanning-tree [ vlan vlan-id ] bridge [ priority [system-id] ] | show spanning-tree [ vlan vlan-id ] bridge [ detail | brief ] | show spanning-tree [ vlan vlan-id ] bridge [ address | forward-time | hello-time | id | max-age | protocol ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

bridge

Status and configuration of this bridge

address

Mac address of this bridge

forward-time

Forward delay interval

hello-time

Hello time

id

Spanning tree bridge identifier

max-age

Max age

protocol

Spanning tree protocol

brief

Brief summary of the status and configuration output

detail

Detailed of the status and configuration

priority

Bridge priority of this bridge

system-id

Spanning tree priority with system id extension

Command Modes

- /exec

show spanning-tree vlan (stp)

show spanning-tree [ vlan vlan-id ] interface interface-id { cost | inconsistency | edge | priority | rootcost | state }

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

interface

Spanning Tree interface status and configuration

interface-id

Type: interface

cost

Port path cost

inconsistency

Port inconsistency state

edge

Edge Port configuration

priority

Port priority

rootcost

Path cost to root

state

Port spanning tree state

Command Modes

- /exec

show spanning-tree vlan (stp)

show spanning-tree [ vlan vlan-id ] root [ priority [system-id] ] | show spanning-tree [ vlan vlan-id ] root [ address | cost | forward-time | hello-time | id | max-age | port ] | show spanning-tree [ vlan vlan-id ] root [ detail | brief ]

Syntax Description

show

Show running system information

spanning-tree

Show spanning tree information

vlan

VLAN Switch Spanning Trees

vlan-id

Type: vlan-mrange

vlan range, Example: 1,3-5,7,9-11

root

Status and configuration of the root bridge

address

Mac address of this bridge

cost

Path cost from this bridge to the root

forward-time

Forward delay interval

hello-time

Hello time

id

Spanning tree bridge identifier

max-age

Max age

port

Root port

brief

Brief summary of interface information

detail

Detailed information

priority

Bridge priority of this bridge

system-id

Spanning tree priority with system id extension

Command Modes

- /exec

show sprom

show sprom { backplane i0 | module module i1 | xbar santa-cruz-range i2 | powersupply i3 | fan i4 | sup | stby-sup | all } [ __readonly__ cmn_block blk_sig_cb blk_ver_cb blk_length_cb blk_checksum_cb eeprom_size blk_count fru_major_type fru_minor_type oem_string prd_num serial_num part_num part_rev mfg_dev hw_rev mfg_bits eng_use snmp_oid power_consump rma_code clei_code vid sup_specific_block blk_sig_ssb blk_ver_ssb blk_length_ssb blk_checksum_ssb feature_bits hw_changes_bits card_index mac_addresses no_of_macs no_of_epld TABLE_epld epld_name epld_ver port_type_num max_connector_power cooling_reqt amb_temp TABLE_sensor_ssb sensor_num_ssb maj_thres_ssb min_thres_ssb lc_specific_block blk_sig_lc blk_ver_lc blk_length_lc blk_checksum_lc feature_bits hw_changes_bits card_index mac_addresses no_of_macs no_of_epld TABLE_epld epld_name epld_ver port_type_num max_connector_power cooling_reqt amb_temp TABLE_sensor_lc sensor_num_lc maj_thres_lc min_thres_lc ps_specific_block blk_sig_psb blk_ver_psb blk_length_psb blk_checksum_psb feature_bits current_110v current_220v stackmib_oid fan_specific_block blk_sig_fsb blk_ver_fsb blk_length_fsb blk_checksum_fsb feature_bits hw_change_bits stackmib_oid cooling_capacity amb_temp ch_specific_block blk_sig_csb blk_ver_csb blk_length_csb blk_checksum_csb feature_bits hw_changes_bits stackmib_oid mac_addresses no_of_macs oem_enterprise oem_mib_offset max_connector_power temp_sensor_block blk_sig_tsb blk_ver_tsb blk_length_tsb blk_checksum_tsb no_of_sensors TABLE_sensor_tsb sensor_num_tsb maj_thres_tsb min_thres_tsb wwn_specific_block blk_sig_wwnb blk_ver_wwnb blk_length_wwnb blk_checksum_wwnb wwn_usage_bits lic_specific_block blk_sig_licb blk_ver_licb blk_length_licb blk_checksum_licb lic_usage_bits second_serial_block blk_sig_sn2b blk_ver_sn2b blk_length_sn2b blk_checksum_sn2b serial_num_sn2b psu_common_block format_version internal_info_offset chassis_info_offset board_info_offset product_info_offset multirecord_info_offset checksum psu_board_info_block format_version length language_code mfg_date mfg_type mfg_info name_type product_name snum_type snum part_type partnum fruid_type fruid bom_hw_pid_info partnum_rev fab_revision vid clei_len clei eof_marker csum psu_product_info_block format_version length language_code mfg_type mfg_info name_type product_name part_type partnum product_ver_type sw_certification snum_type snum asset_type asset_string fruid_type fruid custom_pinfo partnumrev vid eof_marker csum psu_record_info_block record_type record_info record_len record_csum header_csum record_identifier format_ver standby_pwr_budget psu_class psu_watts ]

Syntax Description

show

Show running system information

sprom

show SPROM contents

backplane

show backplane clock module sprom contents

i0

Type: integer

min: 1  max: 2

please enter instance of backplane sprom

module

show linecard module sprom contents

module

Type: integer

please enter module number

i1

Type: integer

min: 1  max: 4

please enter instance of module sprom

xbar

show xbar fabric sprom contents

santa-cruz-range

Type: integer

please enter the xbar number

i2

Type: integer

min: 1  max: 4

please enter sprom instance number

powersupply

show powersupply sprom contents

i3

Type: integer

min: 1  max: 16

please enter powersupply number

fan

show fan module sprom contents

i4

Type: integer

min: 1  max: 6

please enter fan number

sup

show supervisor sprom contents

stby-sup

show standby supervisor sprom contents

all

show all sproms contents

__readonly__

cmn_block

blk_sig_cb

Type: string

blk_ver_cb

Type: string

blk_length_cb

Type: string

blk_checksum_cb

Type: string

eeprom_size

Type: string

blk_count

Type: string

fru_major_type

Type: string

fru_minor_type

Type: string

oem_string

Type: string

prd_num

Type: string

serial_num

Type: string

part_num

Type: string

part_rev

Type: string

mfg_dev

Type: string

hw_rev

Type: string

mfg_bits

Type: string

eng_use

Type: string

snmp_oid

Type: string

power_consump

Type: string

rma_code

Type: string

clei_code

Type: string

vid

Type: string

ch_specific_block

blk_sig_csb

Type: string

blk_ver_csb

Type: string

blk_length_csb

Type: string

blk_checksum_csb

Type: string

feature_bits

Type: string

hw_changes_bits

Type: string

stackmib_oid

Type: string

mac_addresses

Type: string

no_of_macs

Type: string

oem_enterprise

Type: string

oem_mib_offset

Type: string

max_connector_power

Type: string

sup_specific_block

blk_sig_ssb

Type: string

blk_ver_ssb

Type: string

blk_length_ssb

Type: string

blk_checksum_ssb

Type: string

feature_bits

Type: string

hw_changes_bits

Type: string

card_index

Type: string

mac_addresses

Type: string

no_of_macs

Type: string

no_of_epld

Type: string

TABLE_epld

epld_name

Type: string

epld_ver

Type: string

port_type_num

Type: string

max_connector_power

Type: string

cooling_reqt

Type: string

amb_temp

Type: string

TABLE_sensor_ssb

sensor_num_ssb

Type: string

maj_thres_ssb

Type: string

min_thres_ssb

Type: string

lc_specific_block

blk_sig_lc

Type: string

blk_ver_lc

Type: string

blk_length_lc

Type: string

blk_checksum_lc

Type: string

feature_bits

Type: string

hw_changes_bits

Type: string

card_index

Type: string

mac_addresses

Type: string

no_of_macs

Type: string

no_of_epld

Type: string

TABLE_epld

epld_name

Type: string

epld_ver

Type: string

port_type_num

Type: string

max_connector_power

Type: string

cooling_reqt

Type: string

amb_temp

Type: string

TABLE_sensor_lc

sensor_num_lc

Type: string

maj_thres_lc

Type: string

min_thres_lc

Type: string

ps_specific_block

blk_sig_psb

Type: string

blk_ver_psb

Type: string

blk_length_psb

Type: string

blk_checksum_psb

Type: string

feature_bits

Type: string

current_110v

Type: string

current_220v

Type: string

stackmib_oid

Type: string

fan_specific_block

blk_sig_fsb

Type: string

blk_ver_fsb

Type: string

blk_length_fsb

Type: string

blk_checksum_fsb

Type: string

feature_bits

Type: string

hw_change_bits

Type: string

stackmib_oid

Type: string

cooling_capacity

Type: string

amb_temp

Type: string

temp_sensor_block

blk_sig_tsb

Type: string

blk_ver_tsb

Type: string

blk_length_tsb

Type: string

blk_checksum_tsb

Type: string

no_of_sensors

Type: string

TABLE_sensor_tsb

sensor_num_tsb

Type: string

maj_thres_tsb

Type: string

min_thres_tsb

Type: string

wwn_specific_block

blk_sig_wwnb

Type: string

blk_ver_wwnb

Type: string

blk_length_wwnb

Type: string

blk_checksum_wwnb

Type: string

wwn_usage_bits

Type: string

lic_specific_block

blk_sig_licb

Type: string

blk_ver_licb

Type: string

blk_length_licb

Type: string

blk_checksum_licb

Type: string

lic_usage_bits

Type: string

second_serial_block

blk_sig_sn2b

Type: string

blk_ver_sn2b

Type: string

blk_length_sn2b

Type: string

blk_checksum_sn2b

Type: string

serial_num_sn2b

Type: string

psu_common_block

format_version

Type: string

internal_info_offset

Type: string

chassis_info_offset

Type: string

board_info_offset

Type: string

product_info_offset

Type: string

multirecord_info_offset

Type: string

checksum

Type: string

psu_board_info_block

format_version

Type: string

length

Type: string

language_code

Type: string

mfg_date

Type: string

mfg_type

Type: string

mfg_info

Type: string

name_type

Type: string

product_name

Type: string

snum_type

Type: string

snum

Type: string

part_type

Type: string

partnum

Type: string

fruid_type

Type: string

fruid

Type: string

bom_hw_pid_info

Type: string

partnum_rev

Type: string

fab_revision

Type: string

vid

Type: string

clei_len

Type: string

clei

Type: string

eof_marker

Type: string

csum

Type: string

psu_product_info_block

format_version

Type: string

length

Type: string

language_code

Type: string

mfg_type

Type: string

mfg_info

Type: string

name_type

Type: string

product_name

Type: string

part_type

Type: string

partnum

Type: string

product_ver_type

Type: string

sw_certification

Type: string

snum_type

Type: string

snum

Type: string

asset_type

Type: string

asset_string

Type: string

fruid_type

Type: string

fruid

Type: string

custom_pinfo

Type: string

partnumrev

Type: string

vid

Type: string

eof_marker

Type: string

csum

Type: string

psu_record_info_block

record_type

Type: string

record_info

Type: string

record_len

Type: string

record_csum

Type: string

header_csum

Type: string

record_identifier

Type: string

format_ver

Type: string

standby_pwr_budget

Type: string

psu_class

Type: string

psu_watts

Type: string

Command Modes

- /exec

show sprom fex

show sprom fex i { all | backplane | powersupply i1 }

Syntax Description

show

Show running system information

sprom

SPROM Contents

fex

Fex

i

Type: integer

min: 100  max: 199

Enter FEX identifier

all

Show all SPROM content on this specific FEX only

backplane

Show backplane SPROM content on this fex

powersupply

Show powersupply SPROM content on this fex only

i1

Type: integer

min: 1  max: 2

powersupply module number

Command Modes

- /exec

show sprom fex all

show sprom fex all

Syntax Description

show

Show running system information

sprom

SPROM Contents

fex

Fex

all

Show all SPROM content all FEX

Command Modes

- /exec

show ssh key

show ssh key [ dsa | rsa ] [ __readonly__ TABLE_sessions key_type key_time key_data key_bitcount key_fingerprint ]

Syntax Description

show

Show running system information

ssh

Show SSH information

key

Show ssh keys

dsa

Show dsa ssh keys

rsa

Show rsa ssh keys

__readonly__

TABLE_sessions

ssh key

key_type

Type: string

keys type

key_time

Type: string

timestamp

key_data

Type: string

ssh key data

key_bitcount

Type: string

bitcount

key_fingerprint

Type: string

fingerprint

Command Modes

- /exec

show ssh server

show ssh server [ __readonly__ operation_status o_status ]

Syntax Description

show

Show running system information

ssh

Show SSH information

server

Show whether ssh server is enabled or not

__readonly__

operation_status

run-time information about ssh

o_status

operational status of ssh server

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show startup-config

show startup-config

Syntax Description

show

Show running system information

startup-config

Current startup configuration

Command Modes

- /exec

show startup-config aaa

show startup-config aaa

Syntax Description

show

show startup-cfg

startup-config

show startup system information

aaa

Display aaa configuration

Command Modes

- /exec

show startup-config acllog

show startup-config acllog [all]

Syntax Description

show

Show running system information

startup-config

Displaying the startup configuration

acllog

show startup config for acllog

all

show startup config with defaults

Command Modes

- /exec

show startup-config aclmgr

show startup-config aclmgr [all]

Syntax Description

show

Show running system information

startup-config

Display the startup configuration

aclmgr

show startup config for aclmgr

all

show startup config with defaults

Command Modes

- /exec

show startup-config adjmgr

show startup-config adjmgr [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

adjmgr

Display adjmgr information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config arp

show startup-config arp [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

arp

Display arp information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config bfd

show startup-config bfd [all]

Syntax Description

show

Show system information

startup-config

Display the startup configuration

bfd

show startup config for bfd

all

show startup config with defaults

Command Modes

- /exec

show startup-config bgp

show startup-config bgp [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

bgp

Display bgp information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config bloggerd

show startup-config bloggerd [all]

Syntax Description

show

show startup-cfg

startup-config

show system startup configuration information

bloggerd

Display bloggerd configuration

all

show startup config with defaults

Command Modes

- /exec

show startup-config callhome

show startup-config callhome

Syntax Description

show

show startup-cfg

startup-config

show startup system information

callhome

Display callhome configuration

Command Modes

- /exec

show startup-config cdp

show startup-config cdp [all]

Syntax Description

show

show startup-cfg

startup-config

show system startup configuration information

cdp

Display cdp configuration

all

show startup config with defaults

Command Modes

- /exec

show startup-config cert-enroll

show startup-config cert-enroll

Syntax Description

show

show startup-cfg

startup-config

show startup system information

cert-enroll

Display certificates configuration

Command Modes

- /exec

show startup-config cfs

show startup-config cfs [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

cfs

Display cfs configurations

all

show running config with defaults

Command Modes

- /exec

show startup-config copp

show startup-config copp [all]

Syntax Description

show

Show running system information

startup-config

System startup-config commands

copp

Control-Plane Policing

all

show startup config with defaults

Command Modes

- /exec

show startup-config dhcp

show startup-config dhcp [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

dhcp

Display dhcp snoop configurations

all

show running config with defaults

Command Modes

- /exec

show startup-config diagnostic

show startup-config diagnostic [all]

Syntax Description

show

Show running system information

startup-config

Contents of startup configuration

diagnostic

Diagnostic configuration

all

Display running config with defaults

Command Modes

- /exec

show startup-config eem

show startup-config eem

Syntax Description

show

Show running system information

startup-config

Show the system startup configuration

eem

Show the event manager startup configuration

Command Modes

- /exec

show startup-config eigrp

show startup-config eigrp [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

eigrp

Display eigrp information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config eltm

show startup-config eltm

Syntax Description

show

Show running system information

startup-config

Current startup configuration

eltm

Display eltm configurations

Command Modes

- /exec

show startup-config exclude

show startup-config exclude feature-list+

Syntax Description

show

Show running system information

startup-config

Current startup configuration

exclude

Exclude startup configuration of specified features

feature-list

Exclude features

aaa  value: 111

Exclude startup configuration of aaa
acllog  value: 425

Exclude startup configuration of acllog
aclmgr  value: 351

Exclude startup configuration of aclmgr
callhome  value: 66

Exclude startup configuration of callhome
cdp  value: 946

Exclude startup configuration of cdp
cert-enroll  value: 169

Exclude startup configuration of cert-enroll
cfs  value: 126

Exclude startup configuration of cfs
cmp  value: 389

Exclude startup configuration of cmp
diagnostic  value: 367

Exclude startup configuration of diagnostic
eem  value: 341

Exclude startup configuration of event manager
license  value: 106

Exclude startup configuration of license
monitor  value: 174

Exclude startup configuration of SPAN sessions
ntp  value: 72

Exclude startup configuration of NTP
radius  value: 113

Exclude startup configuration of radius
rpm  value: 348

Exclude startup configuration of rpm
security  value: 55

Exclude startup configuration of security
track  value: 379

Exclude startup configuration of track
vshd  value: 37

Exclude startup configuration of vshd
spanning-tree  value: 171

Exclude startup configuration of Spanning-tree
ipqos  value: 377

Exclude startup configuration of IPQOS
copp  value: 407

Exclude startup configuration of Copp
dhcp  value: 360

Exclude startup configuration of DHCP
wccp  value: 494

Exclude startup configuration of WCCP
l2pt  value: 745

Exclude startup configuration of L2PT
echat  value: 1045

Exclude running configuration of ECHAT

Command Modes

- /exec

show startup-config fabricpath

show startup-config fabricpath

Syntax Description

show

Show running system information

startup-config

System startup-config commands

fabricpath

fabricpath information

Command Modes

- /exec

show startup-config fabricpath topology

show startup-config fabricpath topology [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

fabricpath

fabricpath Module Information

topology

Fabricpath topology Information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config fex

show startup-config fex [all]

Syntax Description

show

Show running system information

startup-config

Display the startup configuration

fex

show startup config of fex

all

Show startup config with defaults

Command Modes

- /exec

show startup-config glbp

show startup-config glbp

Syntax Description

show

Show system information

startup-config

System startup configuration

glbp

GLBP startup configuration

Command Modes

- /exec

show startup-config hsrp

show startup-config hsrp

Syntax Description

show

Show system information

startup-config

System startup configuration

hsrp

HSRP startup configuration

Command Modes

- /exec

show startup-config icmpv6

show startup-config icmpv6 [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

icmpv6

Display icmpv6 information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config igmp

show startup-config igmp [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

igmp

Display igmp information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config interface (clic)

show startup-config interface if0 [membership]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

interface

Interface configuration

if0

Type: interface-mrange

interface type and number in module/slot format

membership

Show membership information

Command Modes

- /exec

show startup-config interface (clic)

show startup-config interface [if0]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

interface

Interface configuration

if0

Type: interface-mrange

interface type and number in module/slot format

Command Modes

- /exec

show startup-config ip

show startup-config ip [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

ip

Display ip information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config ipqos

show startup-config ipqos [all]

Syntax Description

show

Show running system information

startup-config

Display the startup configuration

ipqos

show startup config for ipqosmgr

all

show startup config with defaults

Command Modes

- /exec

show startup-config ipv6

show startup-config ipv6 [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

ipv6

Display ipv6 information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config isis

show startup-config isis [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

isis

Display isis information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config l2pt

show startup-config l2pt [all]

Syntax Description

show

Show system information

startup-config

System startup configuration

l2pt

Show startup configuration for L2PT

all

Show startup configuration for L2PT with defaults

Command Modes

- /exec

show startup-config l3vm

show startup-config l3vm [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

l3vm

Display l3vm information

all

Display running config with defaults

Command Modes

- /exec

show startup-config ldap

show startup-config ldap

Syntax Description

show

show startup-cfg

startup-config

show startup system information

ldap

Display ldap configuration

Command Modes

- /exec

show startup-config license

show startup-config license [all]

Syntax Description

show

show startup-cfg

startup-config

show startup system information

license

Display licensing configuration

all

show startup config with defaults

Command Modes

- /exec

show startup-config lldp

show startup-config lldp [all]

Syntax Description

show

show startup-cfg

startup-config

show system startup configuration information

lldp

Display lldp configuration

all

show startup config with defaults

Command Modes

- /exec

show startup-config log

show startup-config log

Syntax Description

show

Show running system information

startup-config

Current startup configuration

log

Displays execution log of last used ascii startup configuration

Command Modes

- /exec

show startup-config monitor

show startup-config monitor

Syntax Description

show

Show running system information

startup-config

Current startup configuration

monitor

Configure Ethernet SPAN sessions

Command Modes

- /exec

show startup-config msdp

show startup-config msdp [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

msdp

Display msdp information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config ntp

show startup-config ntp [all]

Syntax Description

show

Show information

startup-config

Show startup system configuration

ntp

Show NTP information

all

Show all NTP startup configuration

Command Modes

- /exec

show startup-config nv overlay

show startup-config nv overlay [all]

Syntax Description

show

Show system information

startup-config

System startup configuration

nv

NVE startup configuration

overlay

NVE startup configuration

all

Show NVE config with defaults

Command Modes

- /exec

show startup-config ospf

show startup-config ospf [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

ospf

Display ospf information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config ospfv3

show startup-config ospfv3 [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

ospfv3

Display ospfv3 information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config pim

show startup-config pim [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

pim

Display pim information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config pim6

show startup-config pim6 [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

pim6

Display pim6 information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config port-security

show startup-config port-security [all]

Syntax Description

show

show startup-cfg

startup-config

show startup system information

port-security

Display port-security configuration

all

show running config with defaults

Command Modes

- /exec

show startup-config radius

show startup-config radius

Syntax Description

show

show startup-cfg

startup-config

show startup system information

radius

Display radius configuration

Command Modes

- /exec

show startup-config rip

show startup-config rip [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

rip

Display rip information

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config routing multicast

show startup-config routing { ip | ipv4 } multicast [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display multicast information

all

Display startup config with defaults clis

Command Modes

- /exec

show startup-config rpm

show startup-config rpm [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

rpm

Display Route Policy Manager (RPM) information

all

Display startup config with defaults

Command Modes

- /exec

show startup-config rsvp

show startup-config rsvp

Syntax Description

show

Show running system information

startup-config

Current startup configuration

rsvp

Display RSVP status

Command Modes

- /exec

show startup-config security

show startup-config security

Syntax Description

show

show startup-cfg

startup-config

show startup system information

security

Display security configuration

Command Modes

- /exec

show startup-config snmp

show startup-config snmp [all]

Syntax Description

show

show startup-cfg

startup-config

show startup system information

snmp

Display snmp configuration

all

show running config with defaults

Command Modes

- /exec

show startup-config tacacs+

show startup-config "tacacs+"

Syntax Description

show

show startup-cfg

startup-config

show startup system information

tacacs+

Display tacacs configuration

Command Modes

- /exec

show startup-config track

show startup-config track

Syntax Description

show

Show running system information

startup-config

Show the system startup configuration

track

Show the track startup configuration

Command Modes

- /exec

show startup-config udld

show startup-config udld

Syntax Description

show

Show running system information

startup-config

Current startup configuration

udld

Show udld configuration

Command Modes

- /exec

show startup-config vdc-all

show startup-config vdc-all

Syntax Description

show

Show running system information

startup-config

Current startup configuration

vdc-all

Display config from all VDC

Command Modes

- /exec

show startup-config vdc

show startup-config vdc [all]

Syntax Description

show

Show running system information

startup-config

Current saved configuration

vdc

Show Virtual Device Contexts

all

show startup config with defaults

Command Modes

- /exec

show startup-config virtual-service

show startup-config virtual-service

Syntax Description

show

Show running system information

startup-config

System startup-config commands

virtual-service

Show startup config for virtualization services

Command Modes

- /exec

show startup-config vlan (clis)

show startup-config vlan

Syntax Description

show

Show running system information

startup-config

System startup-config commands

vlan

Vlan commands

Command Modes

- /exec

show startup-config vlan (clis)

show startup-config vlan vlan-id

Syntax Description

show

Show running system information

startup-config

System startup-config commands

vlan

Vlan commands

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

Command Modes

- /exec

show startup-config vpc

show startup-config vpc [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

vpc

show startup config for vPC

all

show running config with defaults

Command Modes

- /exec

show startup-config vrf

show startup-config vrf vrf-cfg-name [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

vrf

Display VRF information

vrf-cfg-name

Type: vrf

antipattern: default

Configurable VRF name

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config vrf default

show startup-config vrf default [all]

Syntax Description

show

Show running system information

startup-config

Current startup configuration

vrf

Display VRF information

default

Known VRF name

all

Display running config with defaults clis

Command Modes

- /exec

show startup-config vrrp

show startup-config vrrp

Syntax Description

show

Show system information

startup-config

System startup configuration

vrrp

VRRP startup configuration

Command Modes

- /exec

show startup-config vshd

show startup-config vshd

Syntax Description

show

Show startup system information

startup-config

Current startup configuration

vshd

Show startup config for vshd

Command Modes

- /exec

show startup-config vtp

show startup-config vtp [all]

Syntax Description

show

Show running system information

startup-config

System startup-config commands

vtp

Show startup configuration for VTP

all

Show startup configuration for VTP with defaults

Command Modes

- /exec

show summary

show { ip mbgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] | ip bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] all | ip bgp [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ] [ ipv4 [ unicast | multicast ] ] } summary [ vrf { vrf-name | vrf-known-name | ALL_VRFS_012345678901234 } ]

Syntax Description

show

Show running system information

ip

Display IP information

bgp

Display BGP status and configuration

mbgp

Display MBGP status and configuration

vrf

Virtual Router Context

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

ALL_VRFS_012345678901234

All VRFs

summary

Display summarized information of BGP state

ipv4

Display BGP information for IPv4 address family

unicast

Display BGP information for unicast address family

multicast

Display BGP information for multicast address family

all

Display BGP information for all address families

Command Modes

- /exec

show system auto-collect tech-support

show system auto-collect tech-support

Syntax Description

show

Show running system information

system

System management commands

auto-collect

Auto collection of information

tech-support

Collect tech-support in case of service causing supervisor reset

Command Modes

- /exec

show system cores

show system cores [ __readonly__ content ]

Syntax Description

show

Show running system information

system

System-related show commands

cores

Displays core transfer option

__readonly__

content

Type: string

Core transfer option

Command Modes

- /exec

show system error-id

show system error-id { list | i0 } [ __readonly__ errorid facility desc ]

Syntax Description

show

Show running system information

system

System-related show commands

error-id

Show description about errors

list

Show description about all error IDs

i0

Type: hex

Show description about specific error

__readonly__

errorid

Type: string

facility

Type: string

desc

Type: string

Command Modes

- /exec

show system exception-info

show system exception-info

Syntax Description

show

Show running system information

system

System-related show commands

exception-info

Show last exception log information

Command Modes

- /exec

show system inband queuing

show system inband queuing { status | statistics } [ __readonly__ [ TABLE_sys_inband_queue_status pm-inband-weigh0 pm-inband-weigh1 pm-inband-weigh2 pm-inband-weigh3 pm-inband-weigh4 ] [ TABLE_sys_inband_queue_stats inband-pkt-unmap inband-pkt-bpdu-queue inband-pkt-map-q0 inband-pkt-map-q1 inband-pkt-map-q2 inband-pkt-map-q3 klm-pkt-map-bpdu klm-pkt-map-arp klm-pkt-map-q0 klm-pkt-map-q1 klm-pkt-map-q2 klm-pkt-map-q3 klm-pkt-map-veobc queue-name TABLE_bpdu_stats pm-recv-pkts pm-drop-pkts pm-congested rcvbuf sndbuf pm-no-drop TABLE_q_stats index-stat i-pm-recv-pkts i-pm-drop-pkts i-pm-congested i-rcvbuf i-sndbuf i-pm-no-drop ] ]

Syntax Description

show

Show running system information

system

System-related show commands

inband

Inband Commands

queuing

Inband Queuing commands

status

Selective Packet Discard Information

statistics

Inband statistics

__readonly__

TABLE_sys_inband_queue_status

system inband queue status

pm-inband-weigh0

Type: integer

pm-inband-weigh1

Type: integer

pm-inband-weigh2

Type: integer

pm-inband-weigh3

Type: integer

pm-inband-weigh4

Type: integer

TABLE_sys_inband_queue_stats

system inband queue stats

inband-pkt-unmap

Type: longlong

inband-pkt-bpdu-queue

Type: longlong

inband-pkt-map-q0

Type: longlong

inband-pkt-map-q1

Type: longlong

inband-pkt-map-q2

Type: longlong

inband-pkt-map-q3

Type: longlong

klm-pkt-map-bpdu

Type: longlong

klm-pkt-map-arp

Type: longlong

klm-pkt-map-q0

Type: longlong

klm-pkt-map-q1

Type: longlong

klm-pkt-map-q2

Type: longlong

klm-pkt-map-q3

Type: longlong

klm-pkt-map-veobc

Type: longlong

queue-name

Type: string

TABLE_bpdu_stats

Bpdu statistics

pm-recv-pkts

Type: integer

pm-drop-pkts

Type: integer

pm-congested

Type: integer

rcvbuf

Type: integer

sndbuf

Type: integer

pm-no-drop

Type: integer

TABLE_q_stats

Bpdu Q statistics

index-stat

Type: integer

i-pm-recv-pkts

Type: integer

i-pm-drop-pkts

Type: integer

i-pm-congested

Type: integer

i-rcvbuf

Type: integer

i-sndbuf

Type: integer

i-pm-no-drop

Type: integer

Command Modes

- /exec

show system kgdb

show system kgdb

Syntax Description

show

Show running system information

system

System-related show commands

kgdb

Displays state of kgdb_enable flag

Command Modes

- /exec

show system pss shrink status

show system pss shrink status [details] [ __readonly__ [summary] [ TABLE_per_vdc vdc_id [ TABLE_detail_events service vdc event ] ] [ TABLE_events service vdc event ] ]

Syntax Description

show

Show running system information

system

System-related show commands

pss

Displays last pss shrink status

shrink

Displays last pss shrink status

status

Displays last pss shrink status

details

Displays last pss shrink status details

__readonly__

summary

Type: string

PSS shrink summary

TABLE_per_vdc

vdc_id

Type: string

VDC id

TABLE_detail_events

PSS shrink events

service

Type: string

Service name

vdc

Type: integer

VDC number

event

Type: string

PSS evnets

TABLE_events

PSS shrink events

service

Type: string

Service name

vdc

Type: integer

VDC number

event

Type: string

PSS evnets

Command Modes

- /exec

show system redundancy ha status

show system redundancy ha status [ __readonly__ [ TABLE_ha_status vdc_id this_sup_internal_state other_sup_internal_state ] ]

Syntax Description

show

Show running system information

system

System-related show commands

redundancy

redundancy status

ha

vdc redundancy status

status

all vdc redundancy status

__readonly__

TABLE_ha_status

HA status for all vdcs

vdc_id

Type: string

vdc id

this_sup_internal_state

Type: string

This Supervisor State

other_sup_internal_state

Type: string

Remote Supervisor State

Command Modes

- /exec

show system redundancy status

show system redundancy status [ __readonly__ rdn_mode_admin rdn_mode_oper this_sup this_sup_rdn_state this_sup_sup_state this_sup_internal_state [other_sup] [other_sup_rdn_state] [other_sup_sup_state] [other_sup_internal_state] ]

Syntax Description

show

Show running system information

system

System-related show commands

redundancy

redundancy status

status

Current redundancy status

__readonly__

readonly

rdn_mode_admin

Type: string

Redundancy Mode Admin

rdn_mode_oper

Type: string

Redundancy Mode Operational

this_sup

Type: string

This Supervisor

this_sup_rdn_state

Type: string

Redundancy State

this_sup_sup_state

Type: string

Supervisor State

this_sup_internal_state

Type: string

Supervisor State

other_sup

Type: string

Other Supervisor

other_sup_sup_state

Type: string

Supervisor State

other_sup_rdn_state

Type: string

Redundancy tate

other_sup_internal_state

Type: string

Supervisor State

Command Modes

- /exec

show system reset-reason (lcmcli)

show system reset-reason s0 santa-cruz-range [ __readonly__ TABLE_xbarreason slot TABLE_rr time reason service version ]

Syntax Description

show

Show running system information

system

System-related show commands

reset-reason

Show last reset reason

s0

Type: xbar-str

Show xbar module reset reason

santa-cruz-range

Type: integer-range

please enter the xbar module number

__readonly__

TABLE_xbarreason

Reset reason info

slot

Type: string

slot

TABLE_rr

reset reason

time

Type: string

time

reason

Type: string

reset reason

service

Type: string

service name

version

Type: string

version

Command Modes

- /exec

show system reset-reason (lcmcli)

show system reset-reason [ __readonly__ TABLE_reason slot TABLE_rr time reason service version ]

Syntax Description

show

Show running system information

system

System-related show commands

reset-reason

Show last reset reason

__readonly__

TABLE_reason

Reset reason info

slot

Type: string

slot

TABLE_rr

reset reason

time

Type: string

time

reason

Type: string

reset reason

service

Type: string

service name

version

Type: string

version

Command Modes

- /exec

show system reset-reason fex

show system reset-reason fex i

Syntax Description

show

Show running system information

system

System-related show commands

reset-reason

Show last reset reason

fex

Show fex last reset reason

i

Type: integer

min: 100  max: 199

Enter FEX identifier

Command Modes

- /exec

show system reset-reason module

show system reset-reason module module [ __readonly__ TABLE_reason slot TABLE_rr time reason service version ]

Syntax Description

show

Show running system information

system

System-related show commands

reset-reason

Show last reset reason

module

Show per module reset-reason code

module

Type: integer-range

please enter module number

__readonly__

TABLE_reason

Reset reason info

slot

Type: string

slot

TABLE_rr

reset reason

time

Type: string

time

reason

Type: string

reset reason

service

Type: string

service name

version

Type: string

version

Command Modes

- /exec

show system resources (process)

show system resources i0

Syntax Description

show

Show running system information

system

System-related show commands

resources

Show system resources

i0

Type: integer

min: 1  max: 60

time interval in seconds

Command Modes

- /exec

show system resources (process)

show system resources [ __readonly__ [load_avg_1min] [load_avg_5min] [load_avg_15min] [processes_total] [processes_running] [cpu_state_user] [cpu_state_kernel] [cpu_state_idle] [ TABLE_cpu_usage cpuid user kernel idle ] [memory_usage_total] [memory_usage_used] [memory_usage_free] [current_memory_status] ]

Syntax Description

show

Show running system information

system

System-related show commands

resources

Show system resources

__readonly__

TABLE_cpu_usage

All Cpu Usage Information

load_avg_1min

Type: float

Load Average 1 Min

load_avg_5min

Type: float

Load Average 5 Min

load_avg_15min

Type: float

Load Average 15 Min

processes_total

Type: integer

Total processes

processes_running

Type: integer

Running Processes

cpu_state_user

Type: float

CPU State User

cpu_state_kernel

Type: float

CPU State Kernel

cpu_state_idle

Type: float

CPU State Idle

cpuid

Type: integer

CPU id

user

Type: float

user time

kernel

Type: float

kernel time

idle

Type: float

idle time

memory_usage_total

Type: uinteger

Memory Usage Total

memory_usage_used

Type: uinteger

Memory Usage Used

memory_usage_free

Type: uinteger

Memory Usage Free

current_memory_status

Type: string

Current Memory Status

Command Modes

- /exec

show system resources module

show system resources [i0] module i1

Syntax Description

show

Show running system information

system

System-related show commands

resources

Show system resources

i0

Type: integer

min: 1  max: 60

time interval in seconds

module

Show system resources for specified module

i1

Type: integer

min: 1  max: 18

module number

Command Modes

- /exec

show system resources module all

show system resources [i0] module all

Syntax Description

show

Show running system information

system

System-related show commands

resources

Show system resources

i0

Type: integer

min: 1  max: 60

time interval in seconds

module

Show system resources for specified module

all

Show system resources for all modules

Command Modes

- /exec

show system routing mode

show system routing mode [ __readonly__ TABLE_system_routing_mode system-routing-mode-desc ]

Syntax Description

show

Show running system information

system

Show system information

routing

Show routing related information

mode

Show mode related information

__readonly__

TABLE_system_routing_mode

the xml system_routing_mode configuration

system-routing-mode-desc

Type: string

system routing mode description

Command Modes

- /exec

show system srg

show system srg

Syntax Description

show

Show running system information

system

System-related show commands

srg

Displays the system SRG

Command Modes

- /exec

show system standby manual-boot

show system standby manual-boot [ __readonly__ content ]

Syntax Description

show

Show running system information

system

System-related show commands

standby

Displays system standby manual boot option

manual-boot

Displays system standby manual boot option

__readonly__

content

Type: string

Displays system standby manual boot option

Command Modes

- /exec

show system switchover impact

show system switchover impact [ uri0 [uri1] ]

Syntax Description

show

Show running system information

system

System-related show commands

switchover

Show the software switchover impact between two images

impact

impact {standby_system_uri} {active_system_uri}

uri0

Type: uri

Enter standby URI

uri1

Type: uri

Enter active URI

Command Modes

- /exec

show system uptime

show system uptime [ __readonly__ sys_st_time sys_up_days sys_up_hrs sys_up_mins sys_up_secs kn_up_days kn_up_hrs kn_up_mins kn_up_secs [as_up_days] [as_up_hrs] [as_up_mins] [as_up_secs] ]

Syntax Description

show

Show running system information

system

System-related show commands

uptime

Show how long the system has been up and running

__readonly__

readonly

sys_st_time

Type: string

System Start Time

sys_up_days

Type: integer

System Uptime Days

sys_up_hrs

Type: integer

System Uptime Hours

sys_up_mins

Type: integer

System Uptime Minutes

sys_up_secs

Type: integer

System Uptime Seconds

kn_up_days

Type: integer

Kernel Uptime Days

kn_up_hrs

Type: integer

Kernel Uptime Hours

kn_up_mins

Type: integer

Kernel Uptime Minutes

kn_up_secs

Type: integer

Kernel Uptime Seconds

as_up_days

Type: integer

Active Sup Uptime Days

as_up_hrs

Type: integer

Active Sup Uptime Hours

as_up_mins

Type: integer

Active Sup Uptime Minutes

as_up_secs

Type: integer

Active Sup Uptime Seconds

Command Modes

- /exec

show system verify bios

show system verify bios { flash i0 [ module module ] | protection i1 [ module1 module1 ] }

Syntax Description

show

Show running system information

system

System-related show commands

verify

Verify commands

bios

Verify bios

flash

verify bios flash or protection status

i0

Type: integer

min: 0  max: 1

Select primary or alternate flash

module

Module number

module

Type: integer-range

Enter module number

protection

verify bios flash or protection status

i1

Type: integer

min: 0  max: 1

Select primary or alternate flash

module1

Module number

module1

Type: integer-range

Enter module number

Command Modes

- /exec

show system vlan reserved

show system vlan reserved [ __readonly__ TABLE_vlan current_reserved_vlan_start current_reserved_vlan_end future_reserved_vlan_start future_reserved_vlan_end ]

Syntax Description

show

Show running system information

system

system wide configuration

vlan

VLAN status

reserved

Show system VLAN allocation

__readonly__

Read Only

TABLE_vlan

current_reserved_vlan_start

Type: uinteger

System current running reserved vlan start

current_reserved_vlan_end

Type: uinteger

System current running reserved vlan end

future_reserved_vlan_start

Type: uinteger

System future running reserved vlan start

future_reserved_vlan_end

Type: uinteger

System future running reserved vlan end

Command Modes

- /exec

Chapter 20. T Show Commands

- show table-map

- show tacacs-server (tacacs_dynamic_tree)

- show tacacs-server (tacacs_dynamic_tree)

- show tacacs-server directed-request

- show tacacs-server groups

- show tacacs-server sorted

- show tacacs-server statistics

- show tech-support

- show tech-support aaa

- show tech-support aclmgr

- show tech-support aclqos

- show tech-support aclqos compressed

- show tech-support adjmgr

- show tech-support all-binary

- show tech-support all

- show tech-support all binary

- show tech-support arp

- show tech-support ascii-cfg

- show tech-support bfd

- show tech-support bgp

- show tech-support biosd

- show tech-support bloggerd-all

- show tech-support bloggerd

- show tech-support bootvar

- show tech-support brief

- show tech-support callhome

- show tech-support cdp

- show tech-support cert-enroll

- show tech-support cfs

- show tech-support cli

- show tech-support clis

- show tech-support clock_manager

- show tech-support commands

- show tech-support copp

- show tech-support details

- show tech-support dhcp

- show tech-support eem

- show tech-support eigrp

- show tech-support eltm

- show tech-support ethpm

- show tech-support fabricpath topology

- show tech-support fips

- show tech-support forwarding l2 unicast

- show tech-support forwarding l3 unicast

- show tech-support forwarding l3 unicast detail

- show tech-support forwarding l3 unicast detail vdc-all

- show tech-support forwarding l3 unicast vdc-all

- show tech-support forwarding multicast

- show tech-support glbp

- show tech-support glbp brief

- show tech-support gold

- show tech-support gpixm

- show tech-support ha

- show tech-support ha standby

- show tech-support hsrp

- show tech-support hsrp brief

- show tech-support icmpv6

- show tech-support im

- show tech-support inband counters

- show tech-support include-time

- show tech-support interface-vlan

- show tech-support ip

- show tech-support ip igmp

- show tech-support ip igmp snooping

- show tech-support ip msdp

- show tech-support ip pim

- show tech-support ip rsvp

- show tech-support ipqos

- show tech-support ipv6

- show tech-support ipv6 pim

- show tech-support isis

- show tech-support issu

- show tech-support l2

- show tech-support l2fm

- show tech-support l2fm clients

- show tech-support l2fm detail

- show tech-support l2fm l2dbg (syscli)

- show tech-support l2fm l2dbg (syscli)

- show tech-support l2pt

- show tech-support l3vm

- show tech-support l3vpn

- show tech-support lacp

- show tech-support ldap

- show tech-support license

- show tech-support lldp

- show tech-support logging

- show tech-support mfwd

- show tech-support module

- show tech-support module all

- show tech-support monitor

- show tech-support monitor erspan

- show tech-support monitorc-all

- show tech-support multicast

- show tech-support mvpn

- show tech-support netstack

- show tech-support netstack detail

- show tech-support npacl

- show tech-support ntp

- show tech-support nve

- show tech-support oim

- show tech-support onep

- show tech-support ospf

- show tech-support ospfv3

- show tech-support page

- show tech-support patch

- show tech-support pfstat

- show tech-support pixm-all

- show tech-support pixm

- show tech-support pixmc-all

- show tech-support pktmgr

- show tech-support platform

- show tech-support pltfm-config

- show tech-support port-channel

- show tech-support port-client-all

- show tech-support port

- show tech-support private-vlan

- show tech-support radius

- show tech-support rip

- show tech-support routing ip unicast

- show tech-support routing ipv6

- show tech-support routing multicast

- show tech-support rpm

- show tech-support sal

- show tech-support security

- show tech-support session-mgr

- show tech-support sksd

- show tech-support smm

- show tech-support snmp

- show tech-support sockets

- show tech-support spm

- show tech-support statsclient

- show tech-support stp

- show tech-support sup-filesys

- show tech-support sysmgr

- show tech-support tacacs+

- show tech-support track

- show tech-support udld

- show tech-support usd-all

- show tech-support vdc

- show tech-support virtual-service

- show tech-support vlan

- show tech-support vpc

- show tech-support vrrp

- show tech-support vrrp brief

- show tech-support vxlan

- show tech-support xbar

- show tech-support xml

- show telnet server

- show terminal

- show time-range

- show track

- show track brief

- show tunnel iftable

- show tunnel inetconfigtable

show table-map

show table-map [ tmap-name | default-tmap-enum-name ] [ __readonly__ [ TABLE_tmap tmap-name [desc] [def-value] [def-copy] [def-ignore] [ TABLE_list frm-list to-val ] ] ]

Syntax Description

show

Show running system information

table-map

Table maps Not available in this release.

TABLE_tmap

all tmap xml sessions

tmap-name

Type: string

length: 40

Show a particular table map

default-tmap-enum-name

cir-markdown-map  value: 1

Exceed color markdown map
pir-markdown-map  value: 2

Violate color markdown map
cos-dscp-map  value: 3

Cos to DSCP Mutation map
cos-precedence-map  value: 4

Cos to IP Precedence Mutation map
cos-discard-class-map  value: 5

Cos to Discard-class Mutation map
dscp-cos-map  value: 6

DSCP to Cos Mutation map
dscp-precedence-map  value: 7

DSCP to IP Precedence Mutation map
dscp-discard-class-map  value: 8

DSCP to Discard-class Mutation map
precedence-cos-map  value: 9

IP Precedence to Cos Mutation map
precedence-dscp-map  value: 10

IP Precedence to DSCP Mutation map
precedence-discard-class-map  value: 11

IP Precedence to Discard-class Mutation map
discard-class-cos-map  value: 12

Discard class to Cos Mutation map
discard-class-dscp-map  value: 13

Discard class to DSCP Mutation map
discard-class-precedence-map  value: 14

Discard class to IP Precedence Mutation map
exp-cos-map  value: 15

exp to cos map

__readonly__

desc

Type: string

length: 200

Description string

def-value

Type: uinteger

min: 0  max: 63

Unspecified entries will default to this value

def-copy

Type: uinteger

min: 0  max: 1

Map unspecified values to equivalent output value

def-ignore

Type: uinteger

min: 0  max: 1

Ignore unspecified values

TABLE_list

table map lists

frm-list

Type: integer-mrange

Original list of values which are to be mapped

to-val

Type: uinteger

min: 0  max: 63

To value

Command Modes

- /exec

show tacacs-server (tacacs_dynamic_tree)

show tacacs-server host0 [ __readonly__ host1 tacacs_port shared_key idle_time test_username test_password ]

Syntax Description

show

Show running system information

tacacs-server

Show TACACS+ configuration information

host0

Type: string

DNS name or IP address

__readonly__

host1

Type: string

DNS name or IP address

tacacs_port

Type: integer

TACACS+ server port

shared_key

Type: string

TACACS+ shared secret

test_username

Type: string

User name in test packets

test_password

Type: string

User password in test packets

idle_time

Type: integer

Time interval for monitoring the server

Command Modes

- /exec

show tacacs-server (tacacs_dynamic_tree)

show tacacs-server [ __readonly__ host0 tacacs_port shared_key idle_time test_username test_password + ]

Syntax Description

show

Show running system information

tacacs-server

Show TACACS+ configuration information

__readonly__

host0

Type: string

DNS name or IP address

tacacs_port

Type: integer

TACACS+ server port

shared_key

Type: string

TACACS+ shared secret

test_username

Type: string

User name in test packets

test_password

Type: string

User password in test packets

idle_time

Type: integer

Time interval for monitoring the server

Command Modes

- /exec

show tacacs-server directed-request

show tacacs-server directed-request [ __readonly__ tacacs_directedRequest_status ]

Syntax Description

show

Show running system information

tacacs-server

Show TACACS+ configuration information

directed-request

Show directed server enable configuration

__readonly__

tacacs_directedRequest_status

status of tacacs-server directed request

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show tacacs-server groups

show tacacs-server groups [s0] [ __readonly__ [num_of_groups] [ TABLE_group group_name [ TABLE_server server_ip [port] ] [dead_time] [vrf_name] [source_interface] ] ]

Syntax Description

show

Show running system information

tacacs-server

Show TACACS+ configuration information

groups

Show TACACS+ server group configuration information

s0

Type: string

length: 127

TACACS+ server group name

__readonly__

num_of_groups

Type: integer

number of groups

TABLE_group

group_name

Type: string

name of the group

TABLE_server

server_ip

Type: string

DNS name or IP address

port

Type: integer

TACACS+ server port

dead_time

Type: integer

Time interval for which the server is marked as dead before sending a test command

vrf_name

Type: vrf

name of the vrf

source_interface

Type: string

Interface Description

Command Modes

- /exec

show tacacs-server sorted

show tacacs-server sorted [ __readonly__ [global_secretKey] global_timeout global_deadtime [global_source_intf] [global_idle_time] [global_testUsername] [global_testPassword] server_count [ TABLE_server server_ip port [secretKey] [timeout] ] ]

Syntax Description

show

Show running system information

tacacs-server

Show TACACS+ configuration information

sorted

Show TACACS+ servers sorted by server name

__readonly__

global_secretKey

Type: string

Global shared secret

global_timeout

Type: integer

Global timeout for tacacs

global_deadtime

Type: integer

Global deadtime

global_source_intf

Type: string

Tacacs global source interface

global_idle_time

Type: integer

Tacacs global idle-time for server monitoring

global_testUsername

Type: string

Username of global test parameters

global_testPassword

Type: string

Password of global test parameters

server_count

Type: integer

Total number of tacacs servers configured

TABLE_server

server_ip

Type: string

Ip address of the server

port

Type: integer

Port used for this server

secretKey

Type: string

Shared secret between the server and the tacacs client

timeout

Type: integer

Timeout for this tacacs server

Command Modes

- /exec

show tacacs-server statistics

show tacacs-server statistics host0 [ __readonly__ server_state [ clock_time monitoring_statistics time_in_pstate ndead tt_in_dstate ] auth_statistics auth_failed_transactions auth_succ_transactions auth_req_sent auth_req_timedout auth_resp_no_match auth_resp_not_processed auth_resp_error autho_statistics autho_failed_transactions autho_succ_transactions autho_req_sent autho_req_timedout autho_resp_no_match autho_resp_not_processed autho_resp_error acct_statistics acct_failed_transactions acct_succ_transactions acct_req_sent acct_req_timedout acct_resp_no_match acct_resp_not_processed acct_resp_error ]

Syntax Description

show

Show running system information

tacacs-server

Show TACACS+ configuration information

statistics

Show TACACS statistics

host0

Type: string

DNS name or IP address

__readonly__

server_state

Show state of server

alive  value: 2

dead  value: 1

not monitored  value: 3

clock_time

Type: string

Show clock time in terms of hours, minutes and seconds

monitoring_statistics

Monitoring Statistics

time_in_pstate

Type: string

Time in previous state

ndead

Type: uinteger

Number of times dead

tt_in_dstate

Type: string

Total time in dead state

auth_statistics

Authentication Statistics

autho_statistics

Authorization Statistics

acct_statistics

Accounting Statistics

auth_failed_transactions

Type: uinteger

Authentication: Failed transactions

auth_succ_transactions

Type: uinteger

Authentication: Successful transactions

auth_req_sent

Type: uinteger

Authentication: Requests sent

auth_req_timedout

Type: uinteger

Authentication: Requests timedout

auth_resp_no_match

Type: uinteger

Authentication: Responses with no matching requests

auth_resp_not_processed

Type: uinteger

Authentication: Responses not processed

auth_resp_error

Type: uinteger

Authentication: Responses containing errors

autho_failed_transactions

Type: uinteger

Authorization: Failed transactions

autho_succ_transactions

Type: uinteger

Authorization: Successful transactions

autho_req_sent

Type: uinteger

Authorization: Requests sent

autho_req_timedout

Type: uinteger

Authorization: Requests timedout

autho_resp_no_match

Type: uinteger

Authorization: Responses with no matching requests

autho_resp_not_processed

Type: uinteger

Authorization: Responses not processed

autho_resp_error

Type: uinteger

Authorization: Responses containing errors

acct_failed_transactions

Type: uinteger

Accounting: Failed transactions

acct_succ_transactions

Type: uinteger

Accounting: Successful transactions

acct_req_sent

Type: uinteger

Accounting: Requests sent

acct_req_timedout

Type: uinteger

Accounting: Requests timedout

acct_resp_no_match

Type: uinteger

Accounting: Responses with no matching requests

acct_resp_not_processed

Type: uinteger

Accounting: Responses not processed

acct_resp_error

Type: uinteger

Accounting: Responses containing errors

Command Modes

- /exec

show tech-support

show tech-support [time-optimized] [forced]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

time-optimized

Gather tech-support faster, requires more memory & disk space

forced

Do not check for standby being present

Command Modes

- /exec

show tech-support aaa

show tech-support aaa

Syntax Description

show

show tech-support

tech-support

Gather information for troubleshooting

aaa

Display aaa information

Command Modes

- /exec

show tech-support aclmgr

show tech-support aclmgr [detail]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

aclmgr

ACL commands

detail

Detailed Tech Support

Command Modes

- /exec

show tech-support aclqos

show tech-support aclqos

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

aclqos

Show information for aclqos technical support

Command Modes

- /exec

show tech-support aclqos compressed

show tech-support aclqos compressed uri0

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

aclqos

Show information for aclqos technical support

compressed

Save compressed aclqos technical support

uri0

Type: uri

Enter filename to store

Command Modes

- /exec

show tech-support adjmgr

show tech-support adjmgr [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

adjmgr

Display Adjmgr information

brief

Brief information

Command Modes

- /exec

show tech-support all-binary

show tech-support all-binary

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

all-binary

Dump tech support for all applications in binary

Command Modes

- /exec

show tech-support all

show tech-support all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

all

Gather detailed information for troubleshooting

Command Modes

- /exec

show tech-support all binary

show tech-support all binary uri0

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

all

Gather detailed information for troubleshooting

binary

Gather tech support for all applications in binary format

uri0

Type: uri

Select destination filesystem to save the binary output (NOTE: The output file name will be automatically generated and cannot be chosen)

Command Modes

- /exec

show tech-support arp

show tech-support arp [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

arp

Display ARP information

brief

Brief information

Command Modes

- /exec

show tech-support ascii-cfg

show tech-support ascii-cfg

Syntax Description

show

Show running system information

tech-support

Show information for technical support personnel

ascii-cfg

Show ascii-cfg information for technical support personnel

Command Modes

- /exec

show tech-support bfd

show tech-support bfd

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

bfd

BFD commands

Command Modes

- /exec

show tech-support bgp

show tech-support bgp [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

bgp

Display BGP status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support biosd

show tech-support biosd

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

biosd

Gather bios install log for trouble shooting

Command Modes

- /exec

show tech-support bloggerd-all

show tech-support bloggerd-all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

bloggerd-all

Gather detailed information for bloggerd troubleshooting from ALL modules

Command Modes

- /exec

show tech-support bloggerd

show tech-support bloggerd

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

bloggerd

Gather detailed information for bloggerd troubleshooting

Command Modes

- /exec

show tech-support bootvar

show tech-support bootvar

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

bootvar

Gather detailed information for bootvar troubleshooting

Command Modes

- /exec

show tech-support brief

show tech-support brief

Syntax Description

show

Show running system summary information

tech-support

Gather information for troubleshooting

brief

Gather summary information for troubleshooting

Command Modes

- /exec

show tech-support callhome

show tech-support callhome

Syntax Description

show

show tech-support

tech-support

Gather information for troubleshooting

callhome

callhome troubleshooting information

Command Modes

- /exec

show tech-support cdp

show tech-support cdp

Syntax Description

show

show running system information

tech-support

Gather information for troubleshooting

cdp

Gather information for CDP trouble shooting

Command Modes

- /exec

show tech-support cert-enroll

show tech-support cert-enroll

Syntax Description

show

show commands

tech-support

Gather information for troubleshooting

cert-enroll

Display certificates information

Command Modes

- /exec

show tech-support cfs

show tech-support cfs [ commands | name cfs-dyn-app-name [commands1] ]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

cfs

Gather detailed information for cfs troubleshooting

commands

CFS show tech commands

name

Gather detailed information of cfs for a specified application

cfs-dyn-app-name

Type: string

length: 60

Registered name of the local application

commands1

CFS application show tech commands

Command Modes

- /exec

show tech-support cli

show tech-support cli

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

cli

Gather information for parser troubleshooting

Command Modes

- /exec

show tech-support clis

show tech-support clis [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

clis

Gather information for CLI Server troubleshooting

brief

Detailed information

Command Modes

- /exec

show tech-support clock_manager

show tech-support clock_manager

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

clock_manager

Gather detailed information for clock manager troubleshooting

Command Modes

- /exec

show tech-support commands

show tech-support commands

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

commands

Show commands executed as part of show tech-support commands

Command Modes

- /exec

show tech-support copp

show tech-support copp

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

copp

Gather information for copp trouble shooting

Command Modes

- /exec

show tech-support details

show tech-support details [space-optimized]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

details

Gather detailed information for troubleshooting

space-optimized

Gather tech-support info. using less memory & disk space

Command Modes

- /exec

show tech-support dhcp

show tech-support dhcp

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

dhcp

Gather detailed information for dhcp troubleshooting

Command Modes

- /exec

show tech-support eem

show tech-support eem

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

eem

Show EEM tech-support information

Command Modes

- /exec

show tech-support eigrp

show tech-support eigrp [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

eigrp

Display EIGRP status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support eltm

show tech-support eltm [detail]

Syntax Description

show

show tech-support

tech-support

Gather information for trouble-shooting

eltm

eltm debug info

detail

Detailed information

Command Modes

- /exec

show tech-support ethpm

show tech-support ethpm

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ethpm

Gather detailed information for ETHPM troubleshooting

Command Modes

- /exec

show tech-support fabricpath topology

show tech-support fabricpath topology [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

fabricpath

Gather detailed information for Fabricpath troubleshooting

topology

Gather detailed information for Topology troubleshooting

brief

Brief information

Command Modes

- /exec

show tech-support fips

show tech-support fips

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

fips

show tech support information for security Not available in this release.

Command Modes

- /exec

show tech-support forwarding l2 unicast

show tech-support forwarding l2 unicast [ module module ]

Syntax Description

show

show tech-support

tech-support

Gather information for trouble-shooting

forwarding

Forwarding debug info

l2

layer 2 debug info

unicast

unicast

module

Slot number

module

Type: integer

min: 1  max: 16

Module Number

Command Modes

- /exec

show tech-support forwarding l3 unicast

show tech-support forwarding l3 unicast [ module module ]

Syntax Description

show

tech-support

tech-support information

forwarding

forwarding debug information

l3

layer 3 debug information

unicast

unicast

module

module

module

Type: integer

module number

Command Modes

- /exec

show tech-support forwarding l3 unicast detail

show tech-support forwarding l3 unicast detail [ module module ]

Syntax Description

show

tech-support

tech-support information

forwarding

forwarding debug information

l3

layer 3 debug information

unicast

unicast

detail

detailed show tech including platform commands

module

module

module

Type: integer

module number

Command Modes

- /exec

show tech-support forwarding l3 unicast detail vdc-all

show tech-support forwarding l3 unicast detail vdc-all [ module module ]

Syntax Description

show

tech-support

tech-support information

forwarding

forwarding debug information

l3

layer 3 debug information

unicast

unicast

detail

detailed show tech including platform commands

vdc-all

vdc-all

module

module

module

Type: integer

module number

Command Modes

- /exec

show tech-support forwarding l3 unicast vdc-all

show tech-support forwarding l3 unicast vdc-all [ module module ]

Syntax Description

show

tech-support

tech-support information

forwarding

forwarding debug information

l3

layer 3 debug information

unicast

unicast

vdc-all

vdc-all

module

module

module

Type: integer

module number

Command Modes

- /exec

show tech-support forwarding multicast

show tech-support forwarding multicast

Syntax Description

show

tech-support

tech-support information

forwarding

forwarding debug information

multicast

multicast

Command Modes

- /exec

show tech-support glbp

show tech-support glbp

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

glbp

Show glbp tech-support information

Command Modes

- /exec

show tech-support glbp brief

show tech-support glbp brief

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

glbp

Show glbp tech-support information

brief

Show glbp tech-support information in brief

Command Modes

- /exec

show tech-support gold

show tech-support gold

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

gold

Show gold tech-support information

Command Modes

- /exec

show tech-support gpixm

show tech-support gpixm

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

gpixm

Gather detailed information for GLOBAL-PIXM troubleshooting

Command Modes

- /exec

show tech-support ha

show tech-support ha [commands]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ha

Gather detailed information for HA troubleshooting

commands

Show commands executed as part of show tech-support ha commands

Command Modes

- /exec

show tech-support ha standby

show tech-support ha standby [commands]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ha

Gather detailed information for HA troubleshooting

standby

Gather detailed information for HA troubleshooting from standby supervisor

commands

Show commands executed as part of show tech-support ha commands

Command Modes

- /exec

show tech-support hsrp

show tech-support hsrp

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

hsrp

Show hsrp tech-support information

Command Modes

- /exec

show tech-support hsrp brief

show tech-support hsrp brief

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

hsrp

Show hsrp tech-support information

brief

Show tech-support information in brief

Command Modes

- /exec

show tech-support icmpv6

show tech-support icmpv6 [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

icmpv6

Display Icmpv6 information

brief

Brief information

Command Modes

- /exec

show tech-support im

show tech-support im

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

im

Gather detailed information for IM troubleshooting

Command Modes

- /exec

show tech-support inband counters

show tech-support inband counters

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

inband

Gather all information about inband data path

counters

Gather all counters in inband data path

Command Modes

- /exec

show tech-support include-time

show tech-support include-time

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

include-time

Gather tech-support and capture time taken to execute each command

Command Modes

- /exec

show tech-support interface-vlan

show tech-support interface-vlan

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

interface-vlan

Gather detailed information for interface-vlan troubleshooting

Command Modes

- /exec

show tech-support ip

show tech-support ip [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Display IP information

brief

Brief information

Command Modes

- /exec

show tech-support ip igmp

show tech-support ip igmp [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Display IP information

igmp

Display IGMP status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support ip igmp snooping

show tech-support ip igmp snooping [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Display IP information

igmp

Display IGMP status and configuration

snooping

IGMP Snooping information

brief

Brief information

Command Modes

- /exec

show tech-support ip msdp

show tech-support ip msdp [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Display IP information

msdp

Display MSDP status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support ip pim

show tech-support ip pim [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Display IP information

pim

PIM global configuration commands

brief

Brief information

Command Modes

- /exec

show tech-support ip rsvp

show tech-support ip rsvp [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Configure IP features

rsvp

RSVP configuration commands

brief

Brief information

Command Modes

- /exec

show tech-support ipqos

show tech-support ipqos [server-only] [all] [snmp]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ipqos

IP QoS Manager

server-only

Dump the tech-support information only from IP QoS Manager server only

all

Dump the tech-support information IP QoS Manager plus brief summary of system

snmp

Dump the tech-support information only from IP QoS Manager server only (SNMP only)

Command Modes

- /exec

show tech-support ipv6

show tech-support ipv6 [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ipv6

Display IPV6 information

brief

Brief information

Command Modes

- /exec

show tech-support ipv6 pim

show tech-support ipv6 pim [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ipv6

Display IPv6 information

pim

PIM6 global configuration commands

brief

Brief information

Command Modes

- /exec

show tech-support isis

show tech-support isis [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

isis

IS-IS events

brief

Brief information

Command Modes

- /exec

show tech-support issu

show tech-support issu [commands]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

issu

Gather detailed information for issu troubleshooting

commands

Show commands executed as part of show tech-support issu command

Command Modes

- /exec

show tech-support l2

show tech-support l2

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

l2

Gather detailed information for layer 2 troubleshooting

Command Modes

- /exec

show tech-support l2fm

show tech-support l2fm

Syntax Description

show

show tech-support

tech-support

Gather information for trouble-shooting

l2fm

l2fm debug info

Command Modes

- /exec

show tech-support l2fm clients

show tech-support l2fm clients [ module module ]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

l2fm

l2fm debug info

clients

debug info of l2fm clients only running on linecard(mtm)

module

Slot number

module

Type: integer

Module Number

Command Modes

- /exec

show tech-support l2fm detail

show tech-support l2fm detail [ module module ]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

l2fm

l2fm debug info

detail

All info related to l2fm

module

Slot number

module

Type: integer

Module Number

Command Modes

- /exec

show tech-support l2fm l2dbg (syscli)

show tech-support l2fm l2dbg [ module module ]

Syntax Description

show

show tech-support

tech-support

Gather information for trouble-shooting

l2fm

l2fm debug info

l2dbg

tech support capturing additional debug info for l2fm(l2dbg)

module

Slot number

module

Type: integer

Module Number

Command Modes

- /exec

show tech-support l2fm l2dbg (syscli)

show tech-support l2fm l2dbg [ module module ]

Syntax Description

show

show tech-support

tech-support

Gather information for trouble-shooting

l2fm

l2fm debug info

l2dbg

tech support capturing additional debug info for l2fm(l2dbg)

module

Slot number Available only in the 9500 series.

module

Type: integer

Module Number

Command Modes

- /exec

show tech-support l2pt

show tech-support l2pt [detail]

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

l2pt

Gather information for l2pt troubleshooting

detail

Show more details

Command Modes

- /exec

show tech-support l3vm

show tech-support l3vm [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

l3vm

Display VRF information

brief

Brief information

Command Modes

- /exec

show tech-support l3vpn

show tech-support l3vpn [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

l3vpn

BGP l3vpn information Not available in this release.

brief

Brief information

Command Modes

- /exec

show tech-support lacp

show tech-support lacp [all]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

lacp

Gather detailed information for LACP component

all

Gather detailed information of LACP and related components

Command Modes

- /exec

show tech-support ldap

show tech-support ldap

Syntax Description

show

show tech-support

tech-support

Gather information for troubleshooting

ldap

Display ldap information

Command Modes

- /exec

show tech-support license

show tech-support license

Syntax Description

show

show commands

tech-support

Gather information for troubleshooting

license

Display licensing information

Command Modes

- /exec

show tech-support lldp

show tech-support lldp

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

lldp

Gather detailed information for LLDP troubleshooting

Command Modes

- /exec

show tech-support logging

show tech-support logging

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

logging

Show information on logging for technical support staff

Command Modes

- /exec

show tech-support mfwd

show tech-support mfwd [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

mfwd

Display MCASTFWD status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support module

show tech-support module module

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

module

Gather info related to a module

module

Type: integer

Enter module number

Command Modes

- /exec

show tech-support module all

show tech-support module all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

module

Gather info related to a module

all

Gather info related to all modules in the system

Command Modes

- /exec

show tech-support monitor

show tech-support monitor

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

monitor

Gather detailed information for monitor troubleshooting

Command Modes

- /exec

show tech-support monitor erspan

show tech-support monitor erspan

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

monitor

Gather detailed information for monitor troubleshooting

erspan

Gather detailed information for erspan session troubleshooting

Command Modes

- /exec

show tech-support monitorc-all

show tech-support monitorc-all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

monitorc-all

Gather detailed information for LC MONITORC troubleshooting

Command Modes

- /exec

show tech-support multicast

show tech-support [ ip | ipv4 ] multicast

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ip

Display IP information

ipv4

Display IP information

multicast

Display V4 Multicast information

Command Modes

- /exec

show tech-support mvpn

show tech-support mvpn [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

mvpn

Display Multicast VPN information Not available in this release.

brief

Brief information

Command Modes

- /exec

show tech-support netstack

show tech-support netstack

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

netstack

Gather information for NETSTACK troubleshooting

Command Modes

- /exec

show tech-support netstack detail

show tech-support netstack detail

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

netstack

Gather information for NETSTACK troubleshooting

detail

Gather detailed information for NETSTACK troubleshooting

Command Modes

- /exec

show tech-support npacl

show tech-support npacl [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

npacl

Display npacl information

brief

Brief npacl information

Command Modes

- /exec

show tech-support ntp

show tech-support ntp

Syntax Description

show

show running system information

tech-support

Gather information for trouble shooting

ntp

Gather information for NTP trouble shooting

Command Modes

- /exec

show tech-support nve

show tech-support nve

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

nve

Display NVE information

Command Modes

- /exec

show tech-support oim

show tech-support oim [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

oim

Display OIM information

brief

Brief OIM information

Command Modes

- /exec

show tech-support onep

show tech-support onep

Syntax Description

show

Show running system information

tech-support

Diagnostic information for technical support

onep

One Platform

Command Modes

- /exec

show tech-support ospf

show tech-support ospf [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ospf

Display OSPF status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support ospfv3

show tech-support ospfv3 [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

ospfv3

Display OSPFv3 status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support page

show tech-support page [time-optimized] [forced]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

page

Page through the output

time-optimized

Gather tech-support faster, requires more memory & disk space

forced

Do not check for standby being present

Command Modes

- /exec

show tech-support patch

show tech-support patch

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

patch

Gather detailed information for patch troubleshooting

Command Modes

- /exec

show tech-support pfstat

show tech-support pfstat

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

pfstat

Gather detailed information for pfstat troubleshooting

Command Modes

- /exec

show tech-support pixm-all

show tech-support pixm-all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

pixm-all

Gather detailed information for PIXM troubleshooting

Command Modes

- /exec

show tech-support pixm

show tech-support pixm

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

pixm

Gather detailed information for vdc-local-PIXM troubleshooting

Command Modes

- /exec

show tech-support pixmc-all

show tech-support pixmc-all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

pixmc-all

Gather detailed information for LC PIXMC troubleshooting

Command Modes

- /exec

show tech-support pktmgr

show tech-support pktmgr [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

pktmgr

Display Packet Manager information

brief

Brief information

Command Modes

- /exec

show tech-support platform

show tech-support platform

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

platform

Get platform related information

Command Modes

- /exec

show tech-support pltfm-config

show tech-support pltfm-config

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

pltfm-config

Gather detailed information for pltfm-config troubleshooting

Command Modes

- /exec

show tech-support port-channel

show tech-support port-channel

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

port-channel

Gather detailed information for port channel troubleshooting

Command Modes

- /exec

show tech-support port-client-all

show tech-support port-client-all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

port-client-all

Gather detailed information for LC port client troubleshooting

Command Modes

- /exec

show tech-support port

show tech-support port

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

port

Gather detailed information for port manager troubleshooting

Command Modes

- /exec

show tech-support private-vlan

show tech-support private-vlan

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

private-vlan

Gather detailed information for private-vlan troubleshooting

Command Modes

- /exec

show tech-support radius

show tech-support radius

Syntax Description

show

show tech-support

tech-support

Gather information for troubleshooting

radius

Display radius information

Command Modes

- /exec

show tech-support rip

show tech-support rip [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

rip

Display RIP routing protocol status

brief

Brief information

Command Modes

- /exec

show tech-support routing ip unicast

show tech-support routing ip unicast [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

routing

Display routing information

ip

Display IP information

unicast

Display unicast routing information

brief

Brief information

Command Modes

- /exec

show tech-support routing ipv6

show tech-support routing ipv6 [unicast] [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

routing

Display routing information

ipv6

Display IPv6 information

unicast

Display unicast routing information

brief

Brief information

Command Modes

- /exec

show tech-support routing multicast

show tech-support routing [ ip | ipv4 ] multicast [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

routing

Display routing information

ip

Display IP information

ipv4

Display IP information

multicast

Display V4 Multicast information

brief

Display brief information

Command Modes

- /exec

show tech-support rpm

show tech-support rpm

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

rpm

Display Route Policy Manager (RPM) information

Command Modes

- /exec

show tech-support sal

show tech-support sal

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

sal

Show SAL tech-support information

Command Modes

- /exec

show tech-support security

show tech-support security

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

security

show tech support information for security

Command Modes

- /exec

show tech-support session-mgr

show tech-support session-mgr

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

session-mgr

Gather information for troubleshooting session manager

Command Modes

- /exec

show tech-support sksd

show tech-support sksd

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

sksd

show tech support information for sksd

Command Modes

- /exec

show tech-support smm

show tech-support smm

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

smm

Shared memory

Command Modes

- /exec

show tech-support snmp

show tech-support snmp

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

snmp

Gather info related to snmp

Command Modes

- /exec

show tech-support sockets

show tech-support sockets [brief]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

sockets

Display sockets status and configuration

brief

Brief information

Command Modes

- /exec

show tech-support spm

show tech-support spm [application] [detail]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

spm

Service Policy Manager

application

Specify an application

wccp  value: 1

otv  value: 2

erspan  value: 3

vlan  value: 5

po  value: 4

cbts  value: 6

lisp  value: 7

detail

Print more details (e.g. messages,etc)

Command Modes

- /exec

show tech-support statsclient

show tech-support statsclient [ module module ]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

statsclient

Gather statsclient tech-support

module

Gather info related to one module

module

Type: integer

Enter module number

Command Modes

- /exec

show tech-support stp

show tech-support stp

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

stp

Gather detailed information for STP troubleshooting

Command Modes

- /exec

show tech-support sup-filesys

show tech-support sup-filesys

Syntax Description

show

Show running system informatiom

tech-support

Gather information for troubleshooting

sup-filesys

File-sys related issue

Command Modes

- /exec

show tech-support sysmgr

show tech-support sysmgr [commands]

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

sysmgr

Gather detailed information for sysmgr troubleshooting

commands

Show commands executed as part of show tech-support sysmgr

Command Modes

- /exec

show tech-support tacacs+

show tech-support "tacacs+"

Syntax Description

show

show tech-support

tech-support

Gather information for troubleshooting

tacacs+

Display tacacs information

Command Modes

- /exec

show tech-support track

show tech-support track

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

track

Show track tech-support information

Command Modes

- /exec

show tech-support udld

show tech-support udld

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

udld

Gather detailed information for udld troubleshooting

Command Modes

- /exec

show tech-support usd-all

show tech-support usd-all

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

usd-all

Gather detailed information for LC USD troubleshooting

Command Modes

- /exec

show tech-support vdc

show tech-support vdc

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

vdc

Gather detailed information for VDC troubleshooting

Command Modes

- /exec

show tech-support virtual-service

show tech-support virtual-service

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

virtual-service

Gather information for virtualization services trouble shooting

Command Modes

- /exec

show tech-support vlan

show tech-support vlan

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

vlan

Gather detailed information for VLAN troubleshooting

Command Modes

- /exec

show tech-support vpc

show tech-support vpc

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

vpc

Gather detailed information for VPC troubleshooting

Command Modes

- /exec

show tech-support vrrp

show tech-support vrrp

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

vrrp

Show information for vrrp technical support

Command Modes

- /exec

show tech-support vrrp brief

show tech-support vrrp brief

Syntax Description

show

Show running system information

tech-support

Gather information for troubleshooting

vrrp

Show information for vrrp technical support

brief

Show information for vrrp technical support in brief

Command Modes

- /exec

show tech-support vxlan

show tech-support vxlan

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

vxlan

VxLAN feature

Command Modes

- /exec

show tech-support xbar

show tech-support xbar

Syntax Description

show

Show running system information

tech-support

Gather information for trouble shooting

xbar

Show xbar tech-support information

Command Modes

- /exec

show tech-support xml

show tech-support xml

Syntax Description

show

show running system information

tech-support

Gather information for trouble shooting

xml

Gather information for xml trouble shooting

Command Modes

- /exec

show telnet server

show telnet server [ __readonly__ operation_status o_status ]

Syntax Description

show

Show running system information

telnet

Show telnet server configuration

server

Show telnet server configuration

__readonly__

operation_status

run-time information about telnet

o_status

operational status of telnet server

disabled  value: 0

enabled  value: 1

Command Modes

- /exec

show terminal

show terminal

Syntax Description

show

Show running system information

terminal

Display terminal configuration parameters

Command Modes

- /exec

show time-range

show time-range [name] [ __readonly__ TABLE_timerange timerange_name active [ TABLE_seqno seqno { absolute [ start_abs_h start_abs_m start_abs_s start_abs_d start_abs_mon start_abs_y ] [ end_abs_h end_abs_m end_abs_s end_abs_d end_abs_mon end_abs_y ] | periodic { Monday | Tuesday | Wednesday | Thursday | Friday | Saturday | Sunday | daily | weekdays | weekend } + start_per_h start_per_m start_per_s [eday] end_per_h end_per_m end_per_s | remark } ] ]

Syntax Description

show

Show running system information

time-range

Define time range entries

name

Type: string

length: 64

Time range name

__readonly__

TABLE_timerange

timerange_name

Type: string

length: 64

active

active

inactive  value: 0

inactive
active  value: 1

active

TABLE_seqno

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

absolute

periodic

remark

Type: string

start_abs_h

Type: integer

min: 0  max: 23

start_abs_m

Type: integer

min: 0  max: 59

start_abs_s

Type: integer

min: 0  max: 59

start_abs_d

Type: integer

min: 1  max: 31

start_abs_mon

Type: integer

min: 1  max: 12

start_abs_y

Type: integer

min: 2000  max: 3000

end_abs_h

Type: integer

min: 0  max: 23

end_abs_m

Type: integer

min: 0  max: 59

end_abs_s

Type: integer

min: 0  max: 59

end_abs_d

Type: integer

min: 1  max: 31

end_abs_mon

Type: integer

min: 1  max: 12

end_abs_y

Type: integer

min: 2000  max: 3000

Monday

Monday

Tuesday

Tuesday

Wednesday

Wednesday

Thursday

Thursday

Friday

Friday

Saturday

Saturday

Sunday

Sunday

daily

Every day of the week

weekdays

Monday thru Friday

weekend

Saturday and Sunday

start_per_h

Type: integer

min: 0  max: 23

start_per_m

Type: integer

min: 0  max: 59

start_per_s

Type: integer

min: 0  max: 59

eday

Day of the week

Monday  value: 1

Monday
Tuesday  value: 2

Tuesday
Wednesday  value: 3

Wednesday
Thursday  value: 4

Thursday
Friday  value: 5

Friday
Saturday  value: 6

Saturday
Sunday  value: 7

Sunday

end_per_h

Type: integer

min: 0  max: 23

end_per_m

Type: integer

min: 0  max: 59

end_per_s

Type: integer

min: 0  max: 59

Command Modes

- /exec

show track

show track [ object-id | interface | ip route | ipv6 routev6 | list boolean and | list boolean or | list threshold weight | list threshold percentage ] [ __readonly__ show_track_start TABLE_track_detail st_obj_id st_obj_type st_obj_instance st_obj_param st_obj_state st_obj_chg_cnt st_last_chg_time st_threshold_info st_track_list_obj st_obj_up_delay st_obj_down_delay st_obj_timer_value show_track_clnt_hdr show_track_clnt_start TABLE_track_clnt_info st_client_name st_client_iface st_client_group_id show_track_clnt_end st_track_list_info show_track_end ]

Syntax Description

show

Negate a command or set its defaults

track

Tracking information

object-id

Type: uinteger

min: 1  max: 500

Tracked object

interface

Interface objects

ip

IPv4 Protocol objects

route

route (ipv4) objects

ipv6

IPv6 Protocol objects

routev6

route (ipv6) objects

list

Tracklist objects

boolean

Boolean Traclist

and

AND boolean objects

or

OR boolean objects

threshold

Threshold parameters

weight

Threshold weight

percentage

Threshold percentage

__readonly__

Read only

show_track_start

Type: uinteger

Show track start

TABLE_track_detail

Track table detail

st_obj_id

Type: uinteger

Object id

st_obj_type

Object Type

interface  value: 0

route  value: 1

v6route  value: 2

Booleanand  value: 3

Booleanor  value: 4

thresholdweight  value: 5

thresholdpercentage  value: 6

st_obj_instance

Type: string

Object instance

st_obj_param

Object parameter

Line-Protocol  value: 0

IP-Routing  value: 1

IPv6-Routing  value: 3

Reachability  value: 2

Booleanandlist  value: 4

Booleanorlist  value: 5

Threshweightlist  value: 6

Threshpercentlist  value: 7

st_obj_state

Object status

UP  value: 1

DOWN  value: 0

st_obj_chg_cnt

Type: uinteger

Count of Object state changes

st_last_chg_time

Type: string

Timestamp of last change

st_threshold_info

Type: string

Threshold Parameters

st_track_list_obj

Type: string

Objects part of this list

show_track_clnt_hdr

Type: uinteger

Tracked by:

show_track_clnt_start

Type: uinteger

Show track client start

TABLE_track_clnt_info

Track client info

st_client_name

Type: string

Tracking client name

st_client_iface

Type: interface

Tracking client interface

st_client_group_id

Type: uinteger

Client group id

show_track_clnt_end

Type: uinteger

End of track client

st_track_list_info

Type: string

Track list info

st_obj_up_delay

Type: uinteger

Delay up notification

st_obj_down_delay

Type: uinteger

Delay down notification

st_obj_timer_value

Type: uinteger

Current value of timer

show_track_end

Type: uinteger

End of Track

Command Modes

- /exec

show track brief

show track [ object-id | interface | ip route | ipv6 routev6 | list boolean and | list boolean or | list threshold weight | list threshold percentage ] brief [ __readonly__ show_track_brf_start show_track_brf_all_begin TABLE_track_brief st_brf_obj_id st_brf_obj_type st_brf_obj_instance st_brf_obj_param st_brf_obj_state st_brf_last_chg_time show_track_brf_end ]

Syntax Description

show

Negate a command or set its defaults

track

Tracking information

object-id

Type: uinteger

min: 1  max: 500

Tracked object

interface

Interface objects

ip

IPv4 Protocol objects

route

route (ipv4) objects

ipv6

IPv6 Protocol objects

routev6

route (ipv6) objects

list

Tracklist objects

boolean

Boolean Traclist

and

AND boolean objects

or

OR boolean objects

threshold

Threshold parameters

weight

Threshold weight

percentage

Threshold percentage

brief

Brief output

__readonly__

Read only

show_track_brf_start

Type: uinteger

Show track brief start

show_track_brf_all_begin

Type: uinteger

Start of all brief

TABLE_track_brief

Track table brief

st_brf_obj_id

Type: uinteger

Object id

st_brf_obj_type

Object Type

interface  value: 0

route  value: 1

v6route  value: 2

Booleanand  value: 3

Booleanor  value: 4

Thresholdweight  value: 5

Thresholdpercent  value: 6

st_brf_obj_instance

Type: string

Object instance

st_brf_obj_param

Object parameter

Line-Protocol  value: 0

IP-Routing  value: 1

IPV6-Routing  value: 3

Reachability  value: 2

Booleanandlist  value: 4

Booleanorlist  value: 5

Threshweightlist  value: 6

Threshpercentlist  value: 7

st_brf_obj_state

Object status

UP  value: 1

DOWN  value: 0

st_brf_last_chg_time

Type: string

Timestamp of last change

show_track_brf_end

Type: uinteger

End of Group

Command Modes

- /exec

show tunnel iftable

show tunnel iftable [ifindex-in] [ __readonly__ TABLE-tunnelIfTable ifindex-out tunnelIfEncapsMethod tunnelIfHopLimit tunnelIfSecurity tunnelIfTOS tunnelIfFlowLabel tunnelIfAddressType tunnelIfLocalInetAddress tunnelIfRemoteInetAddress tunnelIfEncapsLimit ]

Syntax Description

show

Show running system information

tunnel

Show information about Tunnel

iftable

Show tunnel interface table

ifindex-in

Type: integer

Tunnel ifindex

__readonly__

TABLE-tunnelIfTable

Tunnel interface table

ifindex-out

Type: integer

Tunnel ifindex

tunnelIfEncapsMethod

Encapsulation Method

other  value: 1

direct  value: 2

gre  value: 3

minimal  value: 4

l2tp  value: 5

pptp  value: 6

l2f  value: 7

udp  value: 8

atmp  value: 9

msdp  value: 10

sixToFour  value: 11

sixOverFour  value: 12

isatap  value: 13

teredo  value: 14

ipHttps  value: 15

tunnelIfHopLimit

Type: integer

Hop Limit

tunnelIfSecurity

Security

none  value: 1

ipsec  value: 2

other  value: 3

tunnelIfTOS

Type: integer

TOS

tunnelIfFlowLabel

Type: integer

Flow Label

tunnelIfAddressType

Address Type

unknown  value: 0

ipv4  value: 1

ipv6  value: 2

ipv4z  value: 3

ipv6z  value: 4

dns  value: 16

tunnelIfLocalInetAddress

Type: nameorip

Local IP Address

tunnelIfRemoteInetAddress

Type: nameorip

Remote IP Address

tunnelIfEncapsLimit

Type: integer

Encaps Limit

Command Modes

- /exec

show tunnel inetconfigtable

show tunnel inetconfigtable [ tunnelInetConfigAddressType-in [ tunnelInetConfigLocalAddress-in [ tunnelInetConfigRemoteAddress-in [ tunnelInetConfigEncapsMethod-in [tunnelInetConfigID-in] ] ] ] ] [ __readonly__ TABLE-tunnelInetConfigTable tunnelInetConfigAddressType-out tunnelInetConfigLocalAddress-out tunnelInetConfigRemoteAddress-out tunnelInetConfigEncapsMethod-out tunnelInetConfigID-out tunnelInetConfigIfIndex tunnelInetConfigStatus tunnelInetConfigStorageType ]

Syntax Description

show

Show running system information

tunnel

Show information about Tunnel

inetconfigtable

Show inet config table

tunnelInetConfigAddressType-in

Address Type

unknown  value: 0

ipv4  value: 1

ipv6  value: 2

ipv4z  value: 3

ipv6z  value: 4

dns  value: 16

tunnelInetConfigLocalAddress-in

Type: nameorip

Local IP Address

tunnelInetConfigRemoteAddress-in

Type: nameorip

Remote IP Addess

tunnelInetConfigEncapsMethod-in

Encapsulation Method

other  value: 1

direct  value: 2

gre  value: 3

minimal  value: 4

l2tp  value: 5

pptp  value: 6

l2f  value: 7

udp  value: 8

atmp  value: 9

msdp  value: 10

sixToFour  value: 11

sixOverFour  value: 12

isatap  value: 13

teredo  value: 14

ipHttps  value: 15

tunnelInetConfigID-in

Type: integer

Configuration ID

__readonly__

TABLE-tunnelInetConfigTable

Tunnel Inet Config Table

tunnelInetConfigAddressType-out

Address Type

unknown  value: 0

ipv4  value: 1

ipv6  value: 2

ipv4z  value: 3

ipv6z  value: 4

dns  value: 16

tunnelInetConfigLocalAddress-out

Type: nameorip

Local IP Address

tunnelInetConfigRemoteAddress-out

Type: nameorip

Remote IP Addess

tunnelInetConfigEncapsMethod-out

Encapsulation Method

other  value: 1

direct  value: 2

gre  value: 3

minimal  value: 4

l2tp  value: 5

pptp  value: 6

l2f  value: 7

udp  value: 8

atmp  value: 9

msdp  value: 10

sixToFour  value: 11

sixOverFour  value: 12

isatap  value: 13

teredo  value: 14

ipHttps  value: 15

tunnelInetConfigID-out

Type: integer

Configuration ID

tunnelInetConfigIfIndex

Type: integer

If Index

tunnelInetConfigStatus

Row Status

active  value: 1

notInService  value: 2

notReady  value: 3

createAndGo  value: 4

createAndWait  value: 5

destroy  value: 6

tunnelInetConfigStorageType

Storage Type

other  value: 1

volatile  value: 2

nonVolatile  value: 3

permanent  value: 4

readOnly  value: 5

Command Modes

- /exec

Chapter 21. U Show Commands

- show udld

- show udld global

- show udld neighbors

- show ulib process

- show user-account

- show username keypair

- show users

show udld

show udld [if0] [ __readonly__ TABLE_interface interface mib-port-status mib-oper-status mib-aggresive-mode admin-port-mode operational-port-mode current-bidirectional-state current-operational-state message-interval timeout-interval no-multiple-neighbor-detected TABLE_entry entry-number expiration-time device-id neighbor-state device-name port-id neighbor-echo-device-number neighbor-echo-device-name neighbor-echo-port-number neighbor-echo-port-id neighbor-message-interval neighbor-timeout-interval cdp-device-name pkt-xmt-rec-time pc-index ]

Syntax Description

show

Show running system information

udld

UDLD status and configuration on one or all interfaces

if0

Type: interface

Enter an interface name if only one single interface status is desired

__readonly__

TABLE_interface

interface

Type: interface

Interface ID

mib-port-status

Port MIB enable status

enabled  value: 1

udld is enabled on this port
disabled  value: 2

udld is disabled on this port

mib-oper-status

Port MIB Operational status

shutdown  value: 1

this port status is shutdown
indeterminant  value: 2

this port status is indeterminant
bidirectional  value: 3

this port status is bidirectional
notapplicable  value: 4

this port status is not applicable

mib-aggresive-mode

Port MIB aggresive mode

enabled  value: 1

Aggresive mode is enabled on this port
disabled  value: 2

Aggresive mode is disabled on this port

admin-port-mode

Port enable administration configuration setting

unknown  value: 0

udld status unknown
enabled  value: 1

udld is enabled on this port
disabled  value: 2

udld is disabled on this port
enabled-aggressive  value: 3

udld is enabled with aggressive mode this port
device-default  value: 4

udld follows device default on this port

operational-port-mode

Port enable operational state

enabled  value: 1

udld is enabled on this port
disabled  value: 2

udld is disabled on this port
enabled-aggressive  value: 3

udld is enabled w/ aggresive mode on this port

current-bidirectional-state

Current bidirectional state

unknown  value: 0

Neighbor status unknown
unidirectional  value: 1

Neighbor status is unidirectional
bidirectional  value: 2

Neighbor status is bidirectional
txrxloop  value: 3

Neighbor status is in tx-rx loop
mismatch  value: 4

Mismatch with neighbor state reported
echoempty  value: 5

Neighbors echo is empty

current-operational-state

Current operational state

link-up  value: 0

Neighbor status is unidirectional
link-down  value: 1

Neighbor status is bidirectional
detection  value: 2

Neighbor status is in tx-rx loop
advertisement  value: 3

Mismatch with neighbor state reported
disable-port  value: 4

Neighbors echo is empty
disable-link-up  value: 5

Neighbor status unknown
disable-link-down  value: 6

Neighbor status unknown
udld-init  value: 7

Neighbor status unknown
extended-detection  value: 8

Neighbor status unknown

message-interval

Type: integer

UDLD probe messsage interval

timeout-interval

Type: integer

UDLD detection timeout interval

no-multiple-neighbor-detected

Type: string

No multiple neighbor detected

TABLE_entry

Neighbor entry info

entry-number

Type: integer

Neighbor entry number

expiration-time

Type: integer

Expiration time

device-id

Type: integer

Device ID

neighbor-state

Current neighbor state

unknown  value: 0

Neighbor status unknown
unidirectional  value: 1

Neighbor status is unidirectional
bidirectional  value: 2

Neighbor status is bidirectional
tx-rx-loop  value: 3

Neighbor status is in tx-rx loop
neighbor-mismatch  value: 4

Mismatch with neighbor state reported
empty-echo  value: 5

Neighbors echo is empty

device-name

Type: string

Device name

port-id

Type: string

Port ID

neighbor-echo-device-number

Type: integer

Echo device number

neighbor-echo-device-name

Type: string

Echo device name

neighbor-echo-port-number

Type: integer

Echo port number

neighbor-echo-port-id

Type: string

Echo port ID

neighbor-message-interval

Type: integer

UDLD probe messsage interval

neighbor-timeout-interval

Type: integer

UDLD detection timeout interval

cdp-device-name

Type: string

CDP Device name

pkt-xmt-rec-time

Type: string

Last UDLD packet send/recv time

pc-index

Type: string

Port channel index

Command Modes

- /exec

show udld global

show udld global [ __readonly__ udld-global-mode message-interval ]

Syntax Description

show

Show running system information

udld

UDLD protocol

global

UDLD global status and configuration on all interfaces

__readonly__

udld-global-mode

UDLD global configuration setting

enabled  value: 1

udld is gloablly enabled
disabled  value: 2

udld is gloablly disabled
enabled-aggressive  value: 3

udld is gloablly enabled with aggressive mode

message-interval

Type: integer

UDLD probe messsage interval

Command Modes

- /exec

show udld neighbors

show udld neighbors [ __readonly__ TABLE_entry local-port-id neighbor-echo-device-name device-id neighbor-echo-port-id neighbor-state ]

Syntax Description

show

Show running system information

udld

UDLD protocol

neighbors

UDLD neighbor interfaces

__readonly__

TABLE_entry

local-port-id

Type: interface

Local port ID

neighbor-echo-device-name

Type: string

Echo device name

device-id

Type: integer

Device ID

neighbor-echo-port-id

Type: string

Echo port ID

neighbor-state

Current neighbor state

unknown  value: 0

Neighbor status unknown
unidirectional  value: 1

Neighbor status is unidirectional
bidirectional  value: 2

Neighbor status is bidirectional
tx-rx-loop  value: 3

Neighbor status is in tx-rx loop
neighbor-mismatch  value: 4

Mismatch with neighbor state reported
empty-echo  value: 5

Neighbors echo is empty

Command Modes

- /exec

show ulib process

show ulib process [ __readonly__ TABLE_ulib ufdm-state urib-state u6rib-state feature-name feature-state time-left total-bytes ]

Syntax Description

show

Show running system information

ulib

Display ULIB status and configuration

process

ULIB Process information

__readonly__

TABLE_ulib

ufdm-state

Type: string

urib-state

Type: string

State of URIB

u6rib-state

Type: string

State of U6RIB

feature-name

Type: string

Feature's name

feature-state

Type: string

Feature's state

time-left

Type: string

Time left

total-bytes

Type: uinteger

Total Bytes

Command Modes

- /exec

show user-account

show user-account [s0] [ __readonly__ TABLE_template usr_name expire_date TABLE_role role [remote_login] [sshkey_info] TABLE_keys ssh_keys ]

Syntax Description

show

Show running system information

TABLE_template

TABLE_role

TABLE_keys

__readonly__

usr_name

Type: string

Name of the user

expire_date

Type: string

Expiry date for this user account(in YYYY-MM-DD format)

role

Type: string

role/s which the user is to be assigned to

remote_login

Type: string

Remote account information for a remote user

sshkey_info

Type: string

SSH key information of user

ssh_keys

Type: string

SSH key pairs of the user

user-account

Show user information

s0

Type: string

length: 28

User name

Command Modes

- /exec

show username keypair

show username s0 keypair [ __readonly__ TABLE_sessions t_type t_time t_keys t_bitcount t_fingerprint ]

Syntax Description

show

Show running system information

username

Show user information.

keypair

Show SSH keypairs

s0

Type: string

length: 28

user name

__readonly__

TABLE_sessions

username keypair

t_type

Type: string

keys type

t_time

Type: string

timestamp

t_keys

Type: string

ssh key

t_bitcount

Type: string

bitcount

t_fingerprint

Type: string

fingerprint

Command Modes

- /exec

show users

show users [ __readonly__ TABLE_sessions u_name t_terminal t_time t_idle p_pid c_comment ]

Syntax Description

show

Show running system information

users

Show the current users logged in the system

__readonly__

TABLE_sessions

users table

u_name

Type: string

user name

t_terminal

Type: string

terminal

t_time

Type: string

time

t_idle

Type: string

idle

p_pid

Type: integer

pid

c_comment

Type: string

comment

Command Modes

- /exec

Chapter 22. V Show Commands

- show vdc

- show vdc current-vdc

- show vdc fcoe-vlan-range

- show vdc resource (res_mgr)

- show vdc resource (res_mgr)

- show vdc resource template

- show version

- show version compatibility

- show version fex

- show version image

- show version module

- show version module epld

- show virtual-service

- show virtual-service storage pool list

- show virtual-service tech-support

- show virtual-service utilization name

- show virtual-service version

- show vlan-mgr errors

- show vlan-mgr event-history

- show vlan

- show vlan access-list

- show vlan access-map

- show vlan all-ports

- show vlan counters

- show vlan dot1Q tag native

- show vlan filter

- show vlan id

- show vlan id counters

- show vlan id vn-segment

- show vlan mib private-vlan type

- show vlan name

- show vlan private-vlan

- show vlan private-vlan interface host

- show vlan private-vlan interface mapping

- show vlan private-vlan interface mode

- show vlan private-vlan interface trunk

- show vlan private-vlan mapping

- show vlan private-vlan type

- show vlan reserved

- show vlan xbrief

- show vlan xsummary

- show vpc (mcecm)

- show vpc (mcecm)

- show vpc consistency-parameters

- show vpc consistency-parameters vlans

- show vpc orphan-ports

- show vpc peer-keepalive

- show vpc role

- show vpc statistics

- show vpc statistics peer-keepalive

- show vrf

- show vrf interface

- show vrf topology

- show vrrp

- show vrrp bfd-sessions

- show vtp counters

- show vtp datafile

- show vtp domain id

- show vtp interface

- show vtp mibstats

- show vtp password

- show vtp status

- show vtp trunk interface

- show vtp vlan

show vdc

show vdc [e-vdc2] [ feature-set | detail | membership [ all | status | module module ] | shared membership ] [ __readonly__ [detail2] [swmode] TABLE_vdc vdc_id vdc_name state mac hap sw boot_order [ prio prio_per ] [create_time] [reload_count] [restart_count] [restart_time] [restart_reason] vtype lc-support [ TABLE_fs fs_id fs_name ] [ TABLE_port port-list ] ]

Syntax Description

show

Show Virtual Device Contexts

vdc

Show Virtual Device Contexts

e-vdc2

Type: userdef

Enter Virtual Device Context <vdc-id>

detail

Show detailed vdc information

membership

Show vdc interface membership information

shared

Show the shared interfaces in a vdc

membership

Show the shared interfaces in a vdc

module

Show vdc interface membership information for a specific module only

module

Type: integer

Show vdc interface membership information for a specific module only

status

Show vdc related port-status

feature-set

Show vdc feature-set information

all

Show offline modules as well

__readonly__

Read Only

detail2

swmode

Type: string

TABLE_vdc

vdc_id

Type: uinteger

vdc-id

TABLE_port

port-list

Type: interface

port membership for VDC

vdc_name

Type: string

vdc-name

state

Type: string

state

mac

Type: string

mac address for VDC

hap

Type: string

hap policy

sw

Type: string

sw policy

vtype

Type: string

lc-support

Type: string

create_time

Type: date

reload_count

Type: uinteger

restart_count

Type: uinteger

restart_time

Type: date

restart_reason

Type: string

TABLE_fs

fs_id

Type: uinteger

fs id

fs_name

Type: string

boot_order

Type: integer

prio

Type: integer

prio_per

Type: integer

Command Modes

- /exec

show vdc current-vdc

show vdc current-vdc [ __readonly__ mode name ]

Syntax Description

show

Show Virtual Device Contexts

vdc

Show Virtual Device Contexts

current-vdc

Show which vdc you are currently in

__readonly__

Read Only

mode

Type: uinteger

cli mode

name

Type: string

vdc name

Command Modes

- /exec

show vdc fcoe-vlan-range

show vdc fcoe-vlan-range [ __readonly__ fcoe-vdc [fcoe-vlans] [sharing-vdcs] ]

Syntax Description

show

Show Virtual Device Contexts

vdc

Show Virtual Device Contexts

fcoe-vlan-range

vlans reserved for FCoE Not available in this release.

__readonly__

Read Only

fcoe-vdc

Type: uinteger

sharing-vdcs

Type: uinteger

fcoe-vlans

Type: integer-mrange

Command Modes

- /exec

show vdc resource (res_mgr)

show vdc id resource [res-mgr-res-known-name] [ __readonly__ TABLE_vdc_resource_single_vdc res_name min max used unused free ]

Syntax Description

show

Show running system information

vdc

Show Virtual Device Contexts

id

Type: userdef

Enter Virtual Device Context <vdc-id>

resource

Show resource configuration for VDC

res-mgr-res-known-name

Type: string

Resource name

__readonly__

Read Only

res_name

Type: string

Resource Name

min

Type: uinteger

Resource min configuration

max

Type: uinteger

Resource max configuration

used

Type: uinteger

Resource current usage for this VDC

unused

Type: uinteger

Resource reserved for this VDC but currently not used

free

Type: uinteger

Resource current free for this VDC

TABLE_vdc_resource_single_vdc

Command Modes

- /exec

show vdc resource (res_mgr)

show vdc resource [res-mgr-res-known-name] [ detail | hidden-too | with-flags ] + [ __readonly__ TABLE_resource resource_name total_used total_unused total_free total_avail total [ TABLE_vdc_resource_across_vdcs vdc_name min max used unused free ] ]

Syntax Description

show

Show running system information

vdc

Show Virtual Device Contexts

resource

Show resource configuration across VDCs

res-mgr-res-known-name

Type: string

Resource name

detail

Show detail resource configuration

hidden-too

Also show hidden resources

with-flags

Also show resource flags

__readonly__

Read Only

TABLE_resource

resource_name

Type: string

Resource Name

total_used

Type: uinteger

Resource current usage for all VDC

total_unused

Type: uinteger

Resources currently reserved but not used across all VDC

total_free

Type: uinteger

Resource current free for all VDC

total_avail

Type: uinteger

Resource current available across all VDC

total

Type: uinteger

Resources grand total

TABLE_vdc_resource_across_vdcs

vdc_name

Type: string

VDC name

min

Type: uinteger

Resource min configuration

max

Type: uinteger

Resource max configuration

used

Type: uinteger

Resource current usage for this VDC

unused

Type: uinteger

Resource reserved for this VDC but currently not used

free

Type: uinteger

Resource current free for this VDC

Command Modes

- /exec

show vdc resource template

show vdc resource template [res-mgr-template-known-name-all] [ __readonly__ TABLE_template template_name TABLE_resource resource_name min max ]

Syntax Description

show

Show running system information

vdc

Show Virtual Device Contexts

resource

Show resource configuration for VDC

template

Resource template configuration

res-mgr-template-known-name-all

Type: string

pattern: [a-zA-Z0-9_][a-zA-Z0-9_-]*

length: 100

Resource template name

__readonly__

Read Only

TABLE_template

template_name

Type: string

Resource Template Name

TABLE_resource

resource_name

Type: string

Resource Name

min

Type: uinteger

Resource min configuration

max

Type: uinteger

Resource max configuration

Command Modes

- /exec

show version

show version [ __readonly__ header_str bios_ver_str [loader_ver_str] kickstart_ver_str [sys_ver_str] bios_cmpl_time kick_file_name kick_cmpl_time kick_tmstmp [isan_file_name] [isan_cmpl_time] [isan_tmstmp] chassis_id module_id cpu_name memory mem_type proc_board_id host_name bootflash_size [slot0_size] kern_uptm_days kern_uptm_hrs kern_uptm_mins kern_uptm_secs [rr_usecs] [rr_ctime] rr_reason rr_sys_ver rr_service [ TABLE_smu_list install_smu_id+ ] manufacturer ]

Syntax Description

version

Show the software version

__readonly__

header_str

Type: string

bios_ver_str

Type: string

loader_ver_str

Type: string

kickstart_ver_str

Type: string

sys_ver_str

Type: string

bios_cmpl_time

Type: string

kick_file_name

Type: string

kick_cmpl_time

Type: string

kick_tmstmp

Type: string

isan_file_name

Type: string

isan_cmpl_time

Type: string

isan_tmstmp

Type: string

chassis_id

Type: string

module_id

Type: string

cpu_name

Type: string

memory

Type: integer

mem_type

Type: string

proc_board_id

Type: string

host_name

Type: string

bootflash_size

Type: integer

slot0_size

Type: integer

kern_uptm_days

Type: integer

kern_uptm_hrs

Type: integer

kern_uptm_mins

Type: integer

kern_uptm_secs

Type: integer

rr_usecs

Type: integer

rr_ctime

Type: date

rr_reason

Type: string

rr_sys_ver

Type: string

rr_service

Type: string

TABLE_smu_list

install_smu_id

Type: string

manufacturer

Type: string

Command Modes

- /exec

show version compatibility

show version compatibility uri0

Syntax Description

show

Show running system information

version

Show the software version

compatibility

Show the software compatibility matrix with given image

uri0

Type: uri

Enter URI

Command Modes

- /exec

show version fex

show version fex i

Syntax Description

show

Show running system information

version

Show the software version

fex

Show fex software version

i

Type: integer

min: 100  max: 199

Enter FEX identifier

Command Modes

- /exec

show version image

show version image uri0

Syntax Description

show

Show running system information

version

Show the software version

image

Show the software version of a given image

uri0

Type: uri

Enter URI

Command Modes

- /exec

show version module

show version module module [ __readonly__ TABLE_version slot type sw interim bios ]

Syntax Description

show

Show running system information

version

Show the software version

module

Show the software version of a Module

module

Type: integer

Enter module number

__readonly__

TABLE_version

Show version info

slot

Type: uinteger

Slot

type

Type: string

image type

sw

Type: string

SW version

interim

Type: string

SW interim version

bios

Type: string

BIOS version

Command Modes

- /exec

show version module epld

show version module module epld

Syntax Description

show

Show running system information

version

Show the software version

module

Show the software version of a Module

module

Type: integer

Enter module number

epld

Show a module's current EPLD versions

Command Modes

- /exec

show virtual-service

show virtual-service [ list | global | detail [ name virt_serv_name ] | core [ name virt_serv_name_core ] ] [ __readonly__ [ infrastructure_major_version infrastructure_minor_version total_virtual_services_installed total_virtual_services_activated maximum_vcpus_per_virtual_service machine_types_supported machine_types_disabled TABLE_resource_limits media_name quota committed available ] [ TABLE_list name status package_name ] [ TABLE_detail name package_name application_name application_version application_description key_type signing_method licensing_name licensing_version ova_path state disk_reservation memory_reservation cpu_reservation TABLE_attached_devices type name alias ] [ TABLE_core name name_core ] ]

Syntax Description

show

Show running system information

virtual-service

Display virtualization service information

global

Virtual service global information

list

List virtual services

detail

Detailed information

core

Core information

name

Information for a specific virtual service

virt_serv_name

Type: string

pattern: [a-zA-Z0-9_]+

length: 20

Name of a virtual service

virt_serv_name_core

Type: string

pattern: [a-zA-Z0-9_]+

length: 20

Name of a virtual service

__readonly__

Read Only

infrastructure_major_version

Type: uinteger

Infrastructure major version

infrastructure_minor_version

Type: uinteger

Infrastructure minor version

total_virtual_services_installed

Type: uinteger

Total virtual services installed

total_virtual_services_activated

Type: uinteger

Total virtual services activated

maximum_vcpus_per_virtual_service

Type: uinteger

Maximum VCPUs per virtual service

machine_types_supported

Type: string

Machine types supported

machine_types_disabled

Type: string

Machine types disabled

TABLE_resource_limits

Virtual service global resource limits

media_name

Type: string

Resource name

quota

Type: uinteger

Resource Virtualization quota

committed

Type: uinteger

Resource Virtualization committed

available

Type: uinteger

Resource Virtualization available

TABLE_list

Virtual service list table

name

Type: string

Virtual service name

status

Type: string

Virtual service status

package_name

Type: string

Virtual service package name

TABLE_detail

Virtual service detail table

name

Type: string

Virtual service name

package_name

Type: string

Virtual service package name

application_name

Type: string

Name of the application

application_version

Type: string

Version of the application

application_description

Type: string

Description of the application

key_type

Type: string

Virtual service key type

signing_method

Type: string

Method used to sign the package

licensing_name

Type: string

Name of the license

licensing_version

Type: string

Version of the license

ova_path

Type: string

Virtual service OVA path

state

Type: string

Virtual service state

disk_reservation

Type: uinteger

Virtual service disk reservation

memory_reservation

Type: uinteger

Virtual service memory reservation

cpu_reservation

Type: uinteger

Virtual service CPU reservation

TABLE_attached_devices

Attached devices table

type

Type: string

Type of the attached device

name

Type: string

Name of the attached device

alias

Type: string

Alias for the attached device

TABLE_core

Virtual service core table

name

Type: string

Virtual service name

name_core

Type: string

Name of core

Command Modes

- /exec

show virtual-service storage pool list

show virtual-service storage pool list [ __readonly__ [ TABLE_storage pool_name pool_type pool_path ] ]

Syntax Description

show

Show running system information

virtual-service

Display virtualization service storage pool information

storage

Storage information about virtual service

pool

Storage pool information about virtual service

list

List storage pool for virtual service

__readonly__

Read Only

TABLE_storage

Virtual service storage pool list table

pool_name

Type: string

Virtual service storage pool name

pool_type

Type: string

Virtual service storage pool type

pool_path

Type: string

Virtual service storage pool path

Command Modes

- /exec

show virtual-service tech-support

show virtual-service tech-support

Syntax Description

show

Show running system information

virtual-service

Gather information for virtualization services trouble shooting

tech-support

Gather information for trouble shooting

Command Modes

- /exec

show virtual-service utilization name

show virtual-service utilization name virt_serv_name [ __readonly__ [ TABLE_storage name alias rd_bytes wr_bytes rd_requests wr_requests errors capacity used available usage ] [ TABLE_network name alias rx_packets tx_packets rx_bytes tx_bytes rx_drops tx_drops rx_errors tx_errors ] [ TABLE_memory allocation used ] [ TABLE_cpu request actual state ] ]

Syntax Description

show

Show running system information

virtual-service

Display virtualization service utilization information

utilization

Utilization information about virtual service

name

Utilization of a virtual service

virt_serv_name

Type: string

pattern: [a-zA-Z0-9_]+

length: 20

Name of a virtual service

__readonly__

Read Only

TABLE_storage

Virtual service storage utilization

name

Type: string

storage device name

alias

Type: string

storage device alias

rd_bytes

Type: uinteger

Read Bytes

wr_bytes

Type: uinteger

Write Bytes

rd_requests

Type: uinteger

Read requests

wr_requests

Type: uinteger

Write requests

errors

Type: uinteger

errors

capacity

Type: uinteger

Capacity 1k blocks

used

Type: uinteger

Used 1k blocks

available

Type: uinteger

Available 1k blocks

usage

Type: uinteger

Usage

TABLE_network

Virtual service network utilization

name

Type: string

network device name

alias

Type: string

network device alias

rx_packets

Type: uinteger

Received packets

tx_packets

Type: uinteger

Transmitted packets

rx_bytes

Type: uinteger

Received bytes

tx_bytes

Type: uinteger

Transmitted bytes

rx_drops

Type: uinteger

Received drops

tx_drops

Type: uinteger

Transmitted drops

rx_errors

Type: uinteger

Received errors

tx_errors

Type: uinteger

Trnasmitted errors

TABLE_memory

Virtual service memory utilization

allocation

Type: uinteger

Memory allocation

used

Type: uinteger

Memory used

TABLE_cpu

Virtual service cpu utilization

request

Type: uinteger

Requested Application Utilization

actual

Type: uinteger

Actual Application Utilization

state

Type: string

CPU state

Command Modes

- /exec

show virtual-service version

show virtual-service version { installed | name virt_serv_name installed } [ __readonly__ virt_service_name application_name application_version ]

Syntax Description

show

Show running system information

virtual-service

Display virtualization service version information

version

Version information about virtual service

installed

Installed version

name

Version of a virtual service

virt_serv_name

Type: string

pattern: [a-zA-Z0-9_]+

length: 20

Name of a virtual service

__readonly__

Read Only

virt_service_name

Type: string

Virtual service name

application_name

Type: string

Application name

application_version

Type: string

Application version

Command Modes

- /exec

show vlan-mgr errors

show vlan-mgr errors

Syntax Description

show

Show running system information

vlan-mgr

Show vlan manager event history

errors

Show vlan manager errors

Command Modes

- /exec

show vlan-mgr event-history

show vlan-mgr event-history

Syntax Description

show

Show running system information

vlan-mgr

Show vlan manager event history

event-history

Show vlan manager event history

Command Modes

- /exec

show vlan

show vlan [ __readonly__ vlanshowbr-hdr TABLE_vlanbrief vlanshowbr-vlanid vlanshowbr-vlanid-utf vlanshowbr-vlanname vlanshowbr-vlanstate vlanshowbr-shutstate [vlanshowplist-ifidx] vlanshowinfo-mtu-hdr TABLE_mtuinfo vlanshowinfo-vlanid vlanshowinfo-media-type vlanshowinfo-vlanmode [vlanshowrspan-hdr1] [vlanshowrspan-vlantype] [vlanshowrspan-hdr2] [vlanshowrspan-vlanbitmap] [pvlan-hdr] [pvlan-section] [pvlan-stby] show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

__readonly__

Read Only

TABLE_vlanbrief

VLAN brief table format

TABLE_mtuinfo

MTU information table format

vlanshowbr-hdr

Type: uinteger

VLAN brief header

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanid-utf

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanname

Type: string

VLAN brief VLAN name

vlanshowbr-vlanstate

VLAN brief VLAN state

active  value: 1

VLAN Active State
suspend  value: 2

VLAN Suspended State

vlanshowbr-shutstate

VLAN brief shutdown state

shutdown  value: 1

VLAN shut state
noshutdown  value: 2

VLAN no shut state

vlanshowplist-ifidx

Type: interface-mrange

Port list ifindex

vlanshowinfo-mtu-hdr

Type: uinteger

Vlan info mtu header

vlanshowinfo-vlanid

Type: uinteger

Vlan info VLAN ID

vlanshowinfo-media-type

Select media type

enet  value: 1

Vlan type Ethernet

vlanshowinfo-vlanmode

VLAN brief VLAN mode

ce-vlan  value: 0

Classical Ethernet VLAN mode
fabricpath-vlan  value: 1

Fabricpath VLAN mode

vlanshowrspan-hdr1

Type: uinteger

RSPAN VLAN header for one VLAN

vlanshowrspan-hdr2

Type: uinteger

RSPAN VLAN header for multiple VLANs

vlanshowrspan-vlantype

RSPAN VLAN one VLAN rspan or non-rspan

rspan  value: 2

VLAN is RSPAN VLAN
notrspan  value: 1

VLAN is not RSPAN VLAN

vlanshowrspan-vlanbitmap

Type: bitmap

RSPAN VLAN multiple VLANs

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

pvlan-hdr

Type: uinteger

private vlan section

pvlan-section

Type: uinteger

private vlan section

pvlan-stby

Type: uinteger

private vlan section on standby

Command Modes

- /exec

show vlan access-list

show vlan access-list name [inp_seqno] [ __readonly__ TABLE_vacl vacl_name [vacl_seqno] [ TABLE_list ip_ipv6_mac acl_name [ TABLE_seqno seqno { permitdeny [ proto_str | proto | ip | ipv6 ] { src_any | src_ip_prefix | src_ip_addr src_ip_mask | src_ipv6_prefix | src_ipv6_addr src_ipv6_mask | mac_src mac_src_wild | src_addrgrp } [ src_port_op [src_port1_str] src_port1_num [ src_port2_str | src_port2_num ] | src_portgrp ] { dest_any | dest_ip_prefix | dest_ip_addr dest_ip_mask | dest_ipv6_prefix | dest_ipv6_addr dest_ipv6_mask | mac_dest mac_dest_wild | dest_addrgrp } [ dest_port_op [dest_port1_str] dest_port1_num [ dest_port2_str | dest_port2_num ] | dest_portgrp ] [ { icmp_type [icmp_code] | icmp_str } | { icmpv6_type [icmpv6_code] | icmpv6_str } ] [ igmp_type | igmp_type_str ] [ [ precedence | precedence_str ] [ tos | tos_str ] | [ dscp | dscp_str ] ] [log] [capture_session] [fragments] [ plen_op plen1 [plen2] ] [urg] [ack] [psh] [rst] [syn] [fin] [established] [flow_label] [timerange] [ eth_proto | eth_proto_str ] [vlan] [cos] [match_count] | remark } ] ] ]

Syntax Description

show

Show running system information

vlan

Vlan commands

access-list

Vlan access list

name

Type: string

length: 64

List name

inp_seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

vacl_name

Type: string

length: 64

List name

__readonly__

vacl_seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

TABLE_vacl

TABLE_list

ip_ipv6_mac

IP/iIPV6/MAC

ip  value: 9

Display IP information
mac  value: 11

MAC configuration commands
ipv6  value: 10

Configure IPv6 features

acl_name

Type: string

length: 64

Access list name

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

permitdeny

Permit/deny

permit  value: 2

Specify packets to forward
deny  value: 3

Specify packets to reject

proto

Type: uinteger

min: 0  max: 255

A protocol number

TABLE_seqno

proto_str

Type: string

Protocol name

ip

IP

ip  value: 1

IP Protocol

ipv6

IPV6

ipv6  value: 1

IPv6 Protocol

src_any

SRCAny

any  value: 1

Any IP address

dest_any

DESTAny

any  value: 1

Any IP address

src_ip_prefix

Type: ipprefix

Source IP prefix

src_ip_addr

Type: ipaddr

Source IP address

src_ip_mask

Type: ipaddr

Source IP mask

src_ipv6_prefix

Type: ipv6prefix

Source IPv6 prefix

src_ipv6_addr

Type: ipv6addr

Source IP address

src_ipv6_mask

Type: ipv6addr

Source IP mask

mac_src

Type: ethernet

Source MAC address

mac_src_wild

Type: ethernet

Source MAC mask

dest_ip_prefix

Type: ipprefix

Destination IP prefix

dest_ip_addr

Type: ipaddr

Destination IP address

dest_ip_mask

Type: ipaddr

Destination IP mask

dest_ipv6_prefix

Type: ipv6prefix

Destination IPv6 prefix

dest_ipv6_addr

Type: ipv6addr

Destination IP address

dest_ipv6_mask

Type: ipv6addr

Destination IP mask

mac_dest

Type: ethernet

Destination MAC address

mac_dest_wild

Type: ethernet

Destination MAC mask

src_port_op

Source Port operator

lt  value: 4

Match only packets with a lower port number
gt  value: 5

Match only packets with a greater port number
eq  value: 6

Match only packets on a given port number
neq  value: 7

Match only packets not on a given port number
range  value: 8

Match only packets in the range of port numbers

dest_port_op

Destination Port operator

lt  value: 4

Match only packets with a lower port number
gt  value: 5

Match only packets with a greater port number
eq  value: 6

Match only packets on a given port number
neq  value: 7

Match only packets not on a given port number
range  value: 8

Match only packets in the range of port numbers

src_port1_str

Type: string

Source port name

src_port1_num

Type: uinteger

Source port number

src_port2_str

Type: string

Source port name

src_port2_num

Type: uinteger

Source port number

dest_port1_str

Type: string

Destination port name

dest_port1_num

Type: uinteger

Destination port number

dest_port2_str

Type: string

Destination port name

dest_port2_num

Type: uinteger

Destination port number

icmp_type

Type: uinteger

ICMP type

icmp_code

Type: uinteger

ICMP code

icmp_str

Type: string

ICMP message

icmpv6_type

Type: uinteger

ICMP type

icmpv6_code

Type: uinteger

ICMP code

icmpv6_str

Type: string

ICMP message

igmp_type

Type: uinteger

IGMP type

igmp_type_str

Type: string

IGMP type String

precedence

Type: uinteger

precedence

precedence_str

Type: string

precedence string

tos

Type: uinteger

tos

tos_str

Type: string

tos string

dscp

Type: uinteger

dscp

dscp_str

Type: string

dscp string

capture_session

Type: uinteger

min: 1  max: 48

capture session

global_capture_session

Type: uinteger

min: 1  max: 48

capture session

log

Log

enable  value: 1

Log the packet
disable  value: 2

Packet loging disabled

fragments

Fragments

enable  value: 1

Match on fragments
disable  value: 2

No fragment match

urg

URG

enable  value: 1

TCP urg flag set
disable  value: 2

TCP urg flag clear

ack

ACK

enable  value: 1

TCP ack flag set
disable  value: 2

TCP ack flag clear

psh

PSH

enable  value: 1

TCP psh flag set
disable  value: 2

TCP psh flag clear

rst

RST

enable  value: 1

TCP rst flag set
disable  value: 2

TCP rst flag clear

syn

SYN

enable  value: 1

TCP syn flag set
disable  value: 2

TCP syn flag clear

fin

FIN

enable  value: 1

TCP fin flag set
disable  value: 2

TCP fin flag clear

established

ESTABLISHED

enable  value: 1

TCP established connection
disable  value: 2

TCP not established connection

flow_label

Type: uinteger

IPv6 flow label

timerange

Type: string

Time-range

eth_proto

Type: hex

MAC protocol number

eth_proto_str

Type: string

MAC protocol name

vlan

Type: integer

min: 0  max: 4095

VLAN number

cos

Type: integer

min: 0  max: 7

CoS value

match_count

Type: longlong

Number of packets matching the ACL

remark

Type: string

Remark String

statistics

STATISTICS

enable  value: 1

Statistics enabled for ACL
disable  value: 2

Statistics not enabled for ACL

src_addrgrp

Type: string

Source address group

dest_addrgrp

Type: string

Destination address group

src_portgrp

Type: string

Source port group

dest_portgrp

Type: string

Destination port group

plen_op

Source Port operator

lt  value: 4

Match only packets with a lower packet length
gt  value: 5

Match only packets with a greater packet length
eq  value: 6

Match only packets on a given packet length
neq  value: 7

Match only packets not on a given packet length
range  value: 8

Match only packets in the range of packet lengths

plen1

Type: uinteger

Packet length minimum

plen2

Type: uinteger

packet length maximum

Command Modes

- /exec

show vlan access-map

show vlan access-map [name] [ __readonly__ [ TABLE_vacl vacl_name [ TABLE_seqno [seqno] [ ip_ipv6_mac match_name + [action_drop] [action_log] [action_fwd] [action_capture] [ action_redirect intf ] ] [statistics] ] ] ]

Syntax Description

show

Show running system information

vlan

Vlan commands

access-map

List VLAN access maps

name

Type: string

length: 64

List name

vacl_name

Type: string

length: 64

List name

__readonly__

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

TABLE_vacl

TABLE_seqno

seqno

Type: uinteger

min: 1  max: 4294967295

Sequence number

ip_ipv6_mac

IP/iIPV6/MAC

ip  value: 9

Display IP information
mac  value: 11

MAC configuration commands
ipv6  value: 10

Display IPv6 information

match_name

Type: string

length: 64

Access list name

action_drop

DROP

drop  value: 1

DROP action

action_log

LOG

log  value: 1

Log the packet

action_fwd

FWD

forward  value: 1

FWD the packet

action_capture

CAPTURE

capture  value: 1

Capture the packet

action_redirect

REDIRECT

redirect  value: 1

Redirect the packet

intf

Type: interface

Interface traffic is redirected to

statistics

STATISTICS

enable  value: 1

Statistics enabled for Vlan access-list
disable  value: 2

Statistics not enabled for vlan access-list

Command Modes

- /exec

show vlan all-ports

show vlan all-ports [ __readonly__ vlanshowbr-hdr TABLE_vlanbriefallports vlanshowbr-vlanid vlanshowbr-vlanid-utf vlanshowbr-vlanname vlanshowbr-vlanstate vlanshowbr-shutstate [vlanshowplist-ifidx] show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

all-ports

Show all ports on VLAN

__readonly__

Read Only

TABLE_vlanbriefallports

VLAN brief table format

vlanshowbr-hdr

Type: uinteger

VLAN brief header

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanid-utf

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanname

Type: string

VLAN brief VLAN name

vlanshowbr-vlanstate

VLAN brief VLAN state

active  value: 1

VLAN Active State
suspend  value: 2

VLAN Suspended State

vlanshowbr-shutstate

VLAN brief shutdown state

shutdown  value: 1

VLAN shut state
noshutdown  value: 2

VLAN no shut state

vlanshowplist-ifidx

Type: interface-mrange

Port list ifindex

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

Command Modes

- /exec

show vlan counters

show vlan counters [ __readonly__ TABLE_vlancounters vlanshowbr-vlanid [l2_ing_ucast_b] [l2_ing_ucast_p] [l2_ing_mcast_b] [l2_ing_mcast_p] [l2_ing_bcast_b] [l2_ing_bcast_p] [l2_egr_ucast_b] [l2_egr_ucast_p] [l3_ucast_rcv_b] [l3_ucast_rcv_p] ]

Syntax Description

show

Show running system information

vlan

Vlan commands

counters

display counters

__readonly__

Read Only

TABLE_vlancounters

vlan counters table format

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

l2_ing_ucast_b

Type: longlong

L2 Ingress unicast octets

l2_ing_ucast_p

Type: longlong

L2 Ingress unicast packets

l2_ing_mcast_b

Type: longlong

L2 Ingress multicast octets

l2_ing_mcast_p

Type: longlong

L2 Ingress multicast packets

l2_ing_bcast_b

Type: longlong

L2 Ingress broadcast octets

l2_ing_bcast_p

Type: longlong

L2 Ingress broadcast packets

l2_egr_ucast_b

Type: longlong

L2 Egress unicast octets

l2_egr_ucast_p

Type: longlong

L2 Egress unicast packets

l3_ucast_rcv_b

Type: longlong

L3 unicast octets in

l3_ucast_rcv_p

Type: longlong

L3 unicast packets in

Command Modes

- /exec

show vlan dot1Q tag native

show vlan dot1Q tag native [ __readonly__ tag_native_mode ]

Syntax Description

show

Show running system information

vlan

VTP VLAN status

dot1Q

Display dot1q parameters

tag

Display tag parameters

native

Display native vlan tagging

__readonly__

Read Only

tag_native_mode

Native vlan tagging mode

disabled  value: 0

Vlan dot1Q tag native is disabled
enabled  value: 1

Vlan dot1Q tag native is enabled

Command Modes

- /exec

show vlan filter

show vlan filter [ access-map name | vlan vlan ] [ __readonly__ TABLE_vlan_filter name configured_vlans ]

Syntax Description

show

Show running system information

vlan

Vlan commands

filter

Information about VLAN filters

access-map

Show the VLANs where an access-map is applied

name

Type: string

length: 64

List name

vlan

Show the access-map applied to a VLAN

vlan

Type: vlan

VLAN number

__readonly__

TABLE_vlan_filter

configured_vlans

Type: integer-mrange

VLAN numbers

Command Modes

- /exec

show vlan id

show vlan id vlan-id [ __readonly__ vlanshowbr-hdr TABLE_vlanbriefid vlanshowbr-vlanid vlanshowbr-vlanid-utf vlanshowbr-vlanname vlanshowbr-vlanstate vlanshowbr-shutstate [vlanshowplist-ifidx] vlanshowinfo-mtu-hdr TABLE_mtuinfoid vlanshowinfo-vlanid vlanshowinfo-media-type vlanshowinfo-vlanmode [vlanshow-vlanerrbitmap] [vlanshowrspan-hdr1] [vlanshowrspan-vlantype] [vlanshowrspan-hdr2] [vlanshowrspan-vlanbitmap] [pvlan-hdr] [pvlan-id-section] [pvlan-stby] [is-vtp-manageable] [is-internal] [is-reserved] [is-rspan] [is-dynamic-gvrp] show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

__readonly__

Read Only

TABLE_vlanbriefid

VLAN brief table format

TABLE_mtuinfoid

MTU information table format

vlanshowbr-hdr

Type: uinteger

VLAN brief header

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanid-utf

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanname

Type: string

VLAN brief VLAN name

vlanshowbr-vlanstate

VLAN brief VLAN state

active  value: 1

VLAN Active State
suspend  value: 2

VLAN Suspended State

vlanshowbr-shutstate

VLAN brief shutdown state

shutdown  value: 1

VLAN shut state
noshutdown  value: 2

VLAN no shut state

vlanshowplist-ifidx

Type: interface-mrange

Port list ifindex

vlanshowinfo-mtu-hdr

Type: uinteger

Vlan info mtu header

vlanshowinfo-vlanid

Type: uinteger

Vlan info VLAN ID

vlanshowinfo-media-type

Select media type

enet  value: 1

Vlan type Ethernet

vlanshowinfo-vlanmode

VLAN brief VLAN mode

ce-vlan  value: 0

Classical Ethernet VLAN mode
fabricpath-vlan  value: 1

Fabricpath VLAN mode

vlanshow-vlanerrbitmap

Type: bitmap

VLAN error bitmap

vlanshowrspan-hdr1

Type: uinteger

RSPAN VLAN header for one VLAN

vlanshowrspan-hdr2

Type: uinteger

RSPAN VLAN header for multiple VLANs

vlanshowrspan-vlantype

RSPAN VLAN one VLAN rspan or non-rspan

rspan  value: 2

VLAN is RSPAN VLAN
notrspan  value: 1

VLAN is not RSPAN VLAN

vlanshowrspan-vlanbitmap

Type: bitmap

RSPAN VLAN multiple VLANs

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

pvlan-hdr

Type: uinteger

private vlan section

pvlan-id-section

Type: uinteger

private id vlan section

pvlan-stby

Type: uinteger

private vlan section on standby

is-vtp-manageable

Type: bool

VTP Manageable VLAN flag

is-internal

Type: bool

Internal VLAN flag

is-reserved

Type: bool

Reserved VLAN flag

is-rspan

Type: bool

RSPAN VLAN flag

is-dynamic-gvrp

Type: bool

Dynamic GVRP VLAN flag

Command Modes

- /exec

show vlan id counters

show vlan id vlan-id counters [ __readonly__ TABLE_vlancounters vlanshowbr-vlanid [l2_ing_ucast_b] [l2_ing_ucast_p] [l2_ing_mcast_b] [l2_ing_mcast_p] [l2_ing_bcast_b] [l2_ing_bcast_p] [l2_egr_ucast_b] [l2_egr_ucast_p] ]

Syntax Description

show

Show running system information

vlan

Vlan commands

id

VLAN status by VLAN id

counters

display counters

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

__readonly__

Read Only

TABLE_vlancounters

vlan counters table format

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

l2_ing_ucast_b

Type: longlong

L2 Ingress unicast octets

l2_ing_ucast_p

Type: longlong

L2 Ingress unicast packets

l2_ing_mcast_b

Type: longlong

L2 Ingress multicast octets

l2_ing_mcast_p

Type: longlong

L2 Ingress multicast packets

l2_ing_bcast_b

Type: longlong

L2 Ingress broadcast octets

l2_ing_bcast_p

Type: longlong

L2 Ingress broadcast packets

l2_egr_ucast_b

Type: longlong

L2 Egress unicast octets

l2_egr_ucast_p

Type: longlong

L2 Egress unicast packets

Command Modes

- /exec

show vlan id vn-segment

show vlan id vlan-id vn-segment [ __readonly__ vlanshowinfo-segid-hdr TABLE_seginfoid vlanshowinfo-seg-vlanid vlanshowinfo-segment-id show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vn-segment

Show vn-segment mapping

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

__readonly__

Read Only

TABLE_seginfoid

Segment id information table format

vlanshowinfo-segid-hdr

Type: uinteger

Vlan info segment id header

vlanshowinfo-seg-vlanid

Type: uinteger

Vlan info VLAN ID

vlanshowinfo-segment-id

Type: uinteger

Vlan info SEGMENT ID

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

Command Modes

- /exec

show vlan mib private-vlan type

show vlan [ id vlan-id ] mib private-vlan type [ __readonly__ start vlan pvlan-type primary ]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

private-vlan

Private VLAN information

type

Private VLAN type information

mib

mib

__readonly__

Read Only

start

Type: uinteger

Start

vlan

Type: uinteger

vlan

pvlan-type

normal  value: 1

normal
primary  value: 2

Primary PVLAN
isolated  value: 3

Isolated PVLAN
community  value: 4

Community PVLAN

primary

Type: uinteger

associated to primary

Command Modes

- /exec

show vlan name

show vlan name vname [ __readonly__ vlanshowbr-hdr TABLE_vlanbriefname vlanshowbr-vlanid vlanshowbr-vlanid-utf vlanshowbr-vlanname vlanshowbr-vlanstate vlanshowbr-shutstate [vlanshowplist-ifidx] vlanshowinfo-mtu-hdr TABLE_mtuinfoname vlanshowinfo-vlanid vlanshowinfo-media-type vlanshowinfo-vlanmode [vlanshowrspan-hdr1] [vlanshowrspan-vlantype] [vlanshowrspan-hdr2] [vlanshowrspan-vlanbitmap] show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

name

VLAN status by VLAN name

vname

Type: string

length: 128

A VLAN name

__readonly__

Read Only

TABLE_vlanbriefname

VLAN brief table format

TABLE_mtuinfoname

MTU information table format

vlanshowbr-hdr

Type: uinteger

VLAN brief header

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanid-utf

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanname

Type: string

VLAN brief VLAN name

vlanshowbr-vlanstate

VLAN brief VLAN state

active  value: 1

VLAN Active State
suspend  value: 2

VLAN Suspended State

vlanshowbr-shutstate

VLAN brief shutdown state

shutdown  value: 1

VLAN shut state
noshutdown  value: 2

VLAN no shut state

vlanshowplist-ifidx

Type: interface-mrange

Port list ifindex

vlanshowinfo-mtu-hdr

Type: uinteger

Vlan info mtu header

vlanshowinfo-vlanid

Type: uinteger

Vlan info VLAN ID

vlanshowinfo-media-type

Select media type

enet  value: 1

Vlan type Ethernet

vlanshowinfo-vlanmode

VLAN brief VLAN mode

ce-vlan  value: 0

Classical Ethernet VLAN mode
fabricpath-vlan  value: 1

Fabricpath VLAN mode

vlanshowrspan-hdr1

Type: uinteger

RSPAN VLAN header for one VLAN

vlanshowrspan-hdr2

Type: uinteger

RSPAN VLAN header for multiple VLANs

vlanshowrspan-vlantype

RSPAN VLAN one VLAN rspan or non-rspan

rspan  value: 2

VLAN is RSPAN VLAN
notrspan  value: 1

VLAN is not RSPAN VLAN

vlanshowrspan-vlanbitmap

Type: bitmap

RSPAN VLAN multiple VLANs

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

Command Modes

- /exec

show vlan private-vlan

show vlan [ id vlan-id ] private-vlan [ __readonly__ start primary secondary pvlan-type ports ]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

private-vlan

Private VLAN information

__readonly__

Read Only

start

Type: uinteger

Start

primary

Type: uinteger

Primary VLAN

secondary

Type: uinteger

Secondary VLAN

pvlan-type

isolated  value: 1

Isolated PVLAN
community  value: 2

Community PVLAN
primary  value: 3

Primary PVLAN
non-operational  value: 4

Non-operational PVLAN

ports

Type: uinteger

Port list

Command Modes

- /exec

show vlan private-vlan interface host

show vlan private-vlan interface [if] host [ next data ] [ __readonly__ start interface-id secondary-vlan ]

Syntax Description

show

Show running system information

vlan

VLAN status

private-vlan

Private VLAN information

interface

Show interface status and information

if

Type: interface-mrange

Interface id

host

private-vlan host

next

next-entry

data

Type: uinteger

ignore junk value

__readonly__

Read Only

start

Type: uinteger

Start

interface-id

Type: interface

Interface

secondary-vlan

Type: uinteger

Secondary Vlan

Command Modes

- /exec

show vlan private-vlan interface mapping

show vlan private-vlan interface [if] mapping [ __readonly__ start interface-id multi-primary secondary-vlan two-way ]

Syntax Description

show

Show running system information

vlan

VLAN status

private-vlan

Private VLAN information

interface

Show interface status and information

if

Type: interface-mrange

Interface id

mapping

private-vlan mapping

__readonly__

Read Only

start

Type: uinteger

Start

interface-id

Type: interface

Interface

multi-primary

Type: bool

multiple primay capable

secondary-vlan

Type: bitmap

seconadry vlans bitmap

two-way

Type: bool

multiple primay capable

Command Modes

- /exec

show vlan private-vlan interface mode

show vlan private-vlan interface [if] mode [ next data ] [ __readonly__ start interface-id port-mode ]

Syntax Description

show

Show running system information

vlan

VLAN status

private-vlan

Private VLAN information

interface

Show interface status and information

if

Type: interface-mrange

Interface id

mode

private-vlan port mode

next

next-entry

data

Type: uinteger

ignore junk value

__readonly__

Read Only

start

Type: uinteger

Start

interface-id

Type: interface

Interface

port-mode

not-private-vlan  value: 1

private-vlan-host  value: 2

private-vlan-promiscuous  value: 3

private-vlan-trunk  value: 4

Command Modes

- /exec

show vlan private-vlan interface trunk

show vlan private-vlan interface [if] trunk [ __readonly__ start interface-id dynamic-state encap-type native-vlan secondary-vlans normal-vlans dynamic-status encap-oper-type ]

Syntax Description

show

Show running system information

vlan

VLAN status

private-vlan

Private VLAN information

interface

Show interface status and information

if

Type: interface-mrange

Interface id

trunk

pvlan trunk

__readonly__

Read Only

start

Type: uinteger

Start

interface-id

Type: interface

Interface

dynamic-state

Type: uinteger

dynamic state

encap-type

Type: uinteger

encapsulation type

native-vlan

Type: uinteger

native vlan

secondary-vlans

Type: bitmap

secondary vlans

normal-vlans

Type: bitmap

normal vlans

dynamic-status

Type: uinteger

dynamic status

encap-oper-type

Type: uinteger

encap oper type

Command Modes

- /exec

show vlan private-vlan mapping

show vlan [ id vlan-id ] private-vlan mapping [ next data ] [ __readonly__ start vlan-id primary ]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

private-vlan

Private VLAN information

mapping

private-vlan mapping

next

next-entry

data

Type: uinteger

ignore junk value

__readonly__

Read Only

start

Type: uinteger

Start

vlan-id

Type: uinteger

secondary

primary

Type: uinteger

primary-vlan

Command Modes

- /exec

show vlan private-vlan type

show vlan [ id vlan-id ] private-vlan type [ __readonly__ start vlan pvlan-type primary ]

Syntax Description

show

Show running system information

vlan

VLAN status

id

VLAN status by VLAN id

vlan-id

Type: vlan-mrange

VLAN ID 1-3967 or range(s): 1-5, 10 or 2-5,7-19

private-vlan

Private VLAN information

type

Private VLAN type information

__readonly__

Read Only

start

Type: uinteger

Start

vlan

Type: uinteger

vlan

pvlan-type

isolated  value: 1

Isolated PVLAN
community  value: 2

Community PVLAN
primary  value: 3

Primary PVLAN
non-operational  value: 4

Non-operational PVLAN
normal  value: 5

normal

primary

Type: uinteger

associated to primary

Command Modes

- /exec

show vlan reserved

show vlan reserved [ __readonly__ TABLE_reserved ivusage-vlanid ivusage-desc show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

reserved

Internal reserved VLANs

__readonly__

Read Only

TABLE_reserved

Internal reserved VLAN table format

ivusage-vlanid

Type: uinteger

internal vlan usage VLAN id

ivusage-desc

Multicast VLAN start  value: 1

Multicast VLAN start
Multicast VLAN end  value: 2

Multicast VLAN end
Online diagnostics vlan1  value: 3

online diagnostics vlan1
Online diagnostics vlan2  value: 4

online diagnostics vlan2
Online diagnostics vlan3  value: 5

online diagnostics vlan3
Online diagnostics vlan4  value: 6

online diagnostics vlan4
Unused reserved VLAN lower start  value: 7

Unused VLAN lower start
Unused reserved VLAN lower end  value: 8

Unused VLAN lower end
Satellite VLAN  value: 9

Satellite VLAN
Unused reserved VLAN upper start  value: 10

Unused VLAN upper start
Unused reserved VLAN upper end  value: 11

Unused VLAN upper end
Reserved  value: 12

Reserved

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

Command Modes

- /exec

show vlan xbrief

show vlan xbrief [ __readonly__ vlanshowbr-hdr TABLE_vlanbriefxbrief vlanshowbr-vlanid vlanshowbr-vlanid-utf vlanshowbr-vlanname vlanshowbr-vlanstate vlanshowbr-shutstate [vlanshowplist-ifidx] show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

xbrief

All VLAN status in brief

__readonly__

Read Only

TABLE_vlanbriefxbrief

VLAN brief table format

vlanshowbr-hdr

Type: uinteger

VLAN brief header

vlanshowbr-vlanid

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanid-utf

Type: uinteger

VLAN brief VLAN ID

vlanshowbr-vlanname

Type: string

VLAN brief VLAN name

vlanshowbr-vlanstate

VLAN brief VLAN state

active  value: 1

VLAN Active State
suspend  value: 2

VLAN Suspended State

vlanshowbr-shutstate

VLAN brief shutdown state

shutdown  value: 1

VLAN shut state
noshutdown  value: 2

VLAN no shut state

vlanshowplist-ifidx

Type: interface-mrange

Port list ifindex

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

Command Modes

- /exec

show vlan xsummary

show vlan xsummary [ __readonly__ vlansum-vtp-vlan vlansum-ext-vlan vlansum-all-vlan vlansum-max-supported-vlan show-end [true-end] ]

Syntax Description

show

Show running system information

vlan

VLAN status

xsummary

VLAN summary information

__readonly__

Read Only

vlansum-vtp-vlan

Type: uinteger

Show vlan summary Number of normal vlans

vlansum-ext-vlan

Type: uinteger

Show vlan summary Number of extended vlans

vlansum-all-vlan

Type: uinteger

Show vlan summary Total

vlansum-max-supported-vlan

Type: uinteger

Show vlan summary Max supported vlans

show-end

Type: uinteger

Show vlan end marker

true-end

Type: uinteger

Show vlan end marker

Command Modes

- /exec

show vpc (mcecm)

show vpc { vpc-number | brief vpc vpc-number } [ __readonly__ [vpc-hdr] [vpc-is-es] [vpc-not-es] [ TABLE_vpc vpc-id vpc-ifindex vpc-port-state vpc-thru-peerlink vpc-consistency [vpc-consistency-reason] [vpc-consistency-status] up-vlan-bitset es-attr ] vpc-end ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

brief

Brief display of vPC status

vpc-number

Type: integer

min: 1  max: 4096

Enter a Virtual Port Channel number

__readonly__

Read Only

vpc-hdr

Type: string

Start of vPC table

vpc-is-es

Type: string

Flag to indicate vPC+ complex

vpc-not-es

Type: string

Flag to indicate vPC complex

TABLE_vpc

vPC table

vpc-id

Type: uinteger

vPC id

vpc-ifindex

Type: string

vPC ifindex

vpc-port-state

Type: integer

vPC port state

vpc-thru-peerlink

Type: integer

vPC Routing through peerlink

vpc-consistency

vPC global configuration consistency

consistent  value: 1

vPC global configuration consistent
inconsistent  value: 2

vPC global configuration inconsistent
not-applicable  value: 3

vPC configuration not applicable

vpc-consistency-reason

Type: string

vPC consistency reason

vpc-consistency-status

vPC consistency reason

SUCCESS  value: 0x00000000

SUCCESS
INVALID  value: 0x00000001

INVALID
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_DOWN  value: 0x41B7002A

SYSERR_MCECM_MCT_DOWN
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_MCT_DOES_NOT_EXISTS  value: 0x41B7003A

SYSERR_MCECM_MCT_DOES_NOT_EXISTS
SYSERR_MCECM_MCEC_DOES_NOT_EXISTS  value: 0x41B7003B

SYSERR_MCECM_MCEC_DOES_NOT_EXISTS
SYSERR_MCECM_COMPAT_CHK_NOT_DONE  value: 0x41B70042

SYSERR_MCECM_COMPAT_CHK_NOT_DONE
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH  value: 0x402B0027

SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH
SYSERR_PCM_MCEC_LAG_ID_MISMATCH  value: 0x402B0029

SYSERR_PCM_MCEC_LAG_ID_MISMATCH
SYSERR_PCM_INVALID  value: 0x402B0004

SYSERR_PCM_INVALID
SYSERR_PCM_INTERNAL  value: 0x402B0003

SYSERR_PCM_INTERNAL
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_SVI_COMPAT_CHECK_FAILURE  value: 0x410C0021

SYSERR_SVI_COMPAT_CHECK_FAILURE
SYSERR_MCECM_TYPE_CHECK_BYPASSED  value: 0x41B70050

SYSERR_MCECM_TYPE_CHECK_BYPASSED
SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH  value: 0x41B70062

SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH

up-vlan-bitset

Type: string

vPC UP VLAN bitset

es-attr

Type: string

vPC+ attributes

vpc-end

Type: string

End of table

Command Modes

- /exec

show vpc (mcecm)

show vpc [brief] [ __readonly__ vpc-domain-id [vpc-l2mp-switch-id] vpc-peer-status vpc-peer-status-reason vpc-peer-keepalive-status [vpc-peer-l2mp-status] vpc-peer-consistency [vpc-peer-consistency-reason] [vpc-per-vlan-peer-consistency] vpc-peer-consistency-status vpc-type-2-consistency [vpc-type-2-consistency-reason] vpc-type-2-consistency-status vpc-role num-of-vpcs [track-obj] [peer-gateway] [peer-gateway-excluded-vlans] dual-active-excluded-vlans vpc-graceful-consistency-check-status [vpc-auto-recovery-status] [vpc-scale-high-status] [fp-enhanced-load-balancing] [vpc-per-vlan-peer-consistency] vpc-peer-link-hdr [ TABLE_peerlink peer-link-id peerlink-ifindex peer-link-port-state peer-up-vlan-bitset ] vpc-end vpc-hdr [vpc-is-es] [vpc-not-es] [ TABLE_vpc vpc-id vpc-ifindex vpc-port-state vpc-thru-peerlink vpc-consistency [vpc-consistency-reason] [vpc-consistency-status] up-vlan-bitset es-attr ] vpc-end ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

brief

Brief display of vPC status

__readonly__

Read Only

TABLE_peerlink

vPC peerlink table

TABLE_vpc

vPC table

vpc-domain-id

Type: string

vPC domain id

vpc-l2mp-switch-id

Type: uinteger

vPC+ switch ID

vpc-peer-status

vPC peer status

peer-not-configured  value: 1

vPC peer-link not configured
peer-not-found  value: 2

vPC peer not found
peer-ok  value: 3

vPC peer adjacency ok
peer-link-down  value: 4

vPC peer link down

vpc-peer-status-reason

vPC peer status reason

SUCCESS  value: 0x00000000

SUCCESS
SYSERR_MCECM_PEER_UNRCH  value: 0x41B70034

SYSERR_MCECM_PEER_UNRCH
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_ELECTION_ERROR  value: 0x41B70037

SYSERR_MCECM_ELECTION_ERROR
SYSERR_MCECM_OOB_NOT_OPERATIONAL  value: 0x41B7004D

SYSERR_MCECM_OOB_NOT_OPERATIONAL

vpc-peer-keepalive-status

vpc peer keepalive status

disabled  value: 1

vpc peer keepalive disabled
peer-alive  value: 2

vpc peer keepalive received
peer-not-alive  value: 3

vpc peer keepalive not received
peer-alive-domain-mismatch  value: 4

vpc peer keepalive received,domainID mismatch
suspended  value: 5

vpc peer keepalive suspended for ISSU
not-operational  value: 6

vpc peer keepalive not operational
suspended-vrf  value: 7

vpc peer keepalive suspended: invalid vrf
misconfigured  value: 8

vpc peer keepalive misconfigured

vpc-peer-l2mp-status

vPC fabricpath status

unknown  value: 0

vpc fabricpath peer is unknown
alive  value: 1

vpc peer is reachable through fabricpath network
dead  value: 2

vpc peer is unreachable through fabricpath network

vpc-role

vPC role

none-established  value: 0

no role established
primary  value: 2

vPC primary primary
primary-secondary  value: 1

vPC primary secondary
secondary-primary  value: 3

vPC secondary primary
secondary  value: 4

vPC secondary secondary

peer-gateway

Type: integer

Peer gateway status

peer-gateway-excluded-vlans

Type: string

peer-gateway excluded VLANs

dual-active-excluded-vlans

Type: string

dual-active excluded VLANs

fp-enhanced-load-balancing

Type: integer

Fabricpath enhanced load balancing status

num-of-vpcs

Type: string

Number of vPCs configured

track-obj

Type: string

Track object for vPC

vpc-graceful-consistency-check-status

vPC graceful consistency check

enabled  value: 1

vPC graceful consistency check enabled
disabled-user  value: 2

vPC graceful check user disabled
disabled-peer  value: 3

vPC graceful check peer disabled

vpc-consistency

vPC global configuration consistency

consistent  value: 1

vPC global configuration consistent
inconsistent  value: 2

vPC global configuration inconsistent
not-applicable  value: 3

vPC configuration not applicable

vpc-consistency-reason

Type: string

vPC consistency reason

vpc-consistency-status

vPC consistency reason

SUCCESS  value: 0x00000000

SUCCESS
INVALID  value: 0x00000001

INVALID
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_DOWN  value: 0x41B7002A

SYSERR_MCECM_MCT_DOWN
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_MCT_DOES_NOT_EXISTS  value: 0x41B7003A

SYSERR_MCECM_MCT_DOES_NOT_EXISTS
SYSERR_MCECM_MCEC_DOES_NOT_EXISTS  value: 0x41B7003B

SYSERR_MCECM_MCEC_DOES_NOT_EXISTS
SYSERR_MCECM_COMPAT_CHK_NOT_DONE  value: 0x41B70042

SYSERR_MCECM_COMPAT_CHK_NOT_DONE
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH  value: 0x402B0027

SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH
SYSERR_PCM_MCEC_LAG_ID_MISMATCH  value: 0x402B0029

SYSERR_PCM_MCEC_LAG_ID_MISMATCH
SYSERR_PCM_INVALID  value: 0x402B0004

SYSERR_PCM_INVALID
SYSERR_PCM_INTERNAL  value: 0x402B0003

SYSERR_PCM_INTERNAL
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_SVI_COMPAT_CHECK_FAILURE  value: 0x410C0021

SYSERR_SVI_COMPAT_CHECK_FAILURE
SYSERR_MCECM_TYPE_CHECK_BYPASSED  value: 0x41B70050

SYSERR_MCECM_TYPE_CHECK_BYPASSED
SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH  value: 0x41B70062

SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH

vpc-peer-consistency

vPC global configuration consistency

consistent  value: 1

vPC global configuration consistent
inconsistent  value: 2

vPC global configuration inconsistent
not-applicable  value: 3

vPC configuration not applicable

vpc-peer-consistency-reason

Type: string

vPC consistency reason

vpc-peer-consistency-status

vPC consistency reason

SUCCESS  value: 0x00000000

SUCCESS
INVALID  value: 0x00000001

INVALID
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_DOWN  value: 0x41B7002A

SYSERR_MCECM_MCT_DOWN
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_MCT_DOES_NOT_EXISTS  value: 0x41B7003A

SYSERR_MCECM_MCT_DOES_NOT_EXISTS
SYSERR_MCECM_MCEC_DOES_NOT_EXISTS  value: 0x41B7003B

SYSERR_MCECM_MCEC_DOES_NOT_EXISTS
SYSERR_MCECM_COMPAT_CHK_NOT_DONE  value: 0x41B70042

SYSERR_MCECM_COMPAT_CHK_NOT_DONE
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH  value: 0x402B0027

SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH
SYSERR_PCM_MCEC_LAG_ID_MISMATCH  value: 0x402B0029

SYSERR_PCM_MCEC_LAG_ID_MISMATCH
SYSERR_PCM_INVALID  value: 0x402B0004

SYSERR_PCM_INVALID
SYSERR_PCM_INTERNAL  value: 0x402B0003

SYSERR_PCM_INTERNAL
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_SVI_COMPAT_CHECK_FAILURE  value: 0x410C0021

SYSERR_SVI_COMPAT_CHECK_FAILURE
SYSERR_MCECM_TYPE_CHECK_BYPASSED  value: 0x41B70050

SYSERR_MCECM_TYPE_CHECK_BYPASSED
SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH  value: 0x41B70062

SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH

vpc-per-vlan-peer-consistency

vPC per-vlan global configuration consistency

consistent  value: 1

vPC per-vlan global configuration consistent
inconsistent  value: 2

vPC per-vlan global configuration inconsistent

vpc-type-2-consistency

vPC type-2 configuration consistency status

consistent  value: 1

vPC type-2 compat check succeeded
inconsistent  value: 2

vPC type-2 compat check failed

vpc-type-2-consistency-reason

Type: string

vPC type-2 configuration consistency reason

vpc-type-2-consistency-status

vPC type-2 configuration consistency status

SUCCESS  value: 0x00000000

SUCCESS
INVALID  value: 0x00000001

INVALID
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_DOWN  value: 0x41B7002A

SYSERR_MCECM_MCT_DOWN
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_MCT_DOES_NOT_EXISTS  value: 0x41B7003A

SYSERR_MCECM_MCT_DOES_NOT_EXISTS
SYSERR_MCECM_MCEC_DOES_NOT_EXISTS  value: 0x41B7003B

SYSERR_MCECM_MCEC_DOES_NOT_EXISTS
SYSERR_MCECM_COMPAT_CHK_NOT_DONE  value: 0x41B70042

SYSERR_MCECM_COMPAT_CHK_NOT_DONE
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH  value: 0x402B0027

SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH
SYSERR_PCM_MCEC_LAG_ID_MISMATCH  value: 0x402B0029

SYSERR_PCM_MCEC_LAG_ID_MISMATCH
SYSERR_PCM_INVALID  value: 0x402B0004

SYSERR_PCM_INVALID
SYSERR_PCM_INTERNAL  value: 0x402B0003

SYSERR_PCM_INTERNAL
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_SVI_COMPAT_CHECK_FAILURE  value: 0x410C0021

SYSERR_SVI_COMPAT_CHECK_FAILURE
SYSERR_MCECM_TYPE_CHECK_BYPASSED  value: 0x41B70050

SYSERR_MCECM_TYPE_CHECK_BYPASSED
SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH  value: 0x41B70062

SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH

vpc-scale-high-status

vPC scale high status

enabled  value: 1

vPC scale high status enabled
disabled-user  value: 2

vPC scale high status user disabled
disabled-peer  value: 3

vPC scale high status peer disabled

vpc-hdr

Type: string

Start of vPC table

vpc-is-es

Type: string

Flag to indicate vPC+ complex

vpc-not-es

Type: string

Flag to indicate vPC complex

vpc-peer-link-hdr

Type: string

Start of vPC peer-link table

vpc-thru-peerlink

Type: integer

vPC Routing through peerlink

vpc-port-state

Type: integer

vPC port state

vpc-end

Type: string

End of table

vpc-id

Type: uinteger

vPC id

vpc-ifindex

Type: string

vPC ifindex

peer-link-id

Type: uinteger

peer link id

peerlink-ifindex

Type: string

peer link ifindex

peer-link-port-state

Type: integer

peer-link port state

peer-up-vlan-bitset

Type: string

peer link UP VLAN bitset

up-vlan-bitset

Type: string

vPC UP VLAN bitset

es-attr

Type: string

vPC+ attributes

vpc-auto-recovery-status

Type: string

Auto-recovery status

Command Modes

- /exec

show vpc consistency-parameters

show vpc consistency-parameters { global | interface if | vpc vpc-num } [ __readonly__ TABLE_vpc_consistency vpc-param-name vpc-param-type vpc-param-local-val vpc-param-peer-val ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

consistency-parameters

Show vPC Consistency Parameters

global

Global Parameters

interface

Specify interface

vpc-num

Type: integer

min: 1  max: 4096

Enter a Virtual Port Channel number

__readonly__

Read Only

TABLE_vpc_consistency

vPC table

vpc-param-name

Type: string

vpc-param-type

Type: string

vpc-param-local-val

Type: string

vpc-param-peer-val

Type: string

Command Modes

- /exec

show vpc consistency-parameters vlans

show vpc consistency-parameters vlans [ __readonly__ TABLE_vpc_consistency vpc-param-name vpc-param-type [reason_code] [syserr] vpc-pass-vlans [reason_code] ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

consistency-parameters

Show vPC Consistency Parameters

vlans

vlans

__readonly__

Read Only

TABLE_vpc_consistency

vPC table

vpc-param-name

Type: string

vpc-param-type

Type: string

vpc-pass-vlans

Type: string

syserr

Type: string

vPC consistency reason

reason_code

vPC consistency reason

SUCCESS  value: 0x00000000

SUCCESS
INVALID  value: 0x00000001

INVALID
SYSERR_MCECM_COMPAT_FAILED  value: 0x41B7000F

SYSERR_MCECM_COMPAT_FAILED
SYSERR_MCECM_PEER_NOT_CFG  value: 0x41B70025

SYSERR_MCECM_PEER_NOT_CFG
SYSERR_MCECM_MCT_DOWN  value: 0x41B7002A

SYSERR_MCECM_MCT_DOWN
SYSERR_MCECM_MCT_NOT_UP  value: 0x41B70035

SYSERR_MCECM_MCT_NOT_UP
SYSERR_MCECM_MCT_DOES_NOT_EXISTS  value: 0x41B7003A

SYSERR_MCECM_MCT_DOES_NOT_EXISTS
SYSERR_MCECM_MCEC_DOES_NOT_EXISTS  value: 0x41B7003B

SYSERR_MCECM_MCEC_DOES_NOT_EXISTS
SYSERR_MCECM_COMPAT_CHK_NOT_DONE  value: 0x41B70042

SYSERR_MCECM_COMPAT_CHK_NOT_DONE
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED  value: 0x41B70044

SYSERR_MCECM_GLOBAL_COMPAT_CHK_FAILED
SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH  value: 0x402B0027

SYSERR_PCM_MCEC_CHANNEL_MODE_MISMATCH
SYSERR_PCM_MCEC_LAG_ID_MISMATCH  value: 0x402B0029

SYSERR_PCM_MCEC_LAG_ID_MISMATCH
SYSERR_PCM_INVALID  value: 0x402B0004

SYSERR_PCM_INVALID
SYSERR_PCM_INTERNAL  value: 0x402B0003

SYSERR_PCM_INTERNAL
SYSERR_STP_COMPAT_CHECK_FAILURE  value: 0x40DD003A

SYSERR_STP_COMPAT_CHECK_FAILURE
SYSERR_SVI_COMPAT_CHECK_FAILURE  value: 0x410C0021

SYSERR_SVI_COMPAT_CHECK_FAILURE
SYSERR_MCECM_TYPE_CHECK_BYPASSED  value: 0x41B70050

SYSERR_MCECM_TYPE_CHECK_BYPASSED
SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH  value: 0x41B70062

SYSERR_MCECM_LOCAL_PEER_SWITCHID_DOES_NOT_MATCH

Command Modes

- /exec

show vpc orphan-ports

show vpc orphan-ports [ __readonly__ TABLE_orphan_ports vpc-vlan vpc-orphan-ports ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

orphan-ports

Show ports that are not part of vPC but have common VLANs

__readonly__

Read Only

TABLE_orphan_ports

vPC orphan ports table

vpc-vlan

Type: string

vpc-orphan-ports

Type: string

Command Modes

- /exec

show vpc peer-keepalive

show vpc peer-keepalive [ __readonly__ vpc-peer-keepalive-status vpc-keepalive-dest vpc-keepalive-send-interface vpc-keepalive-receive-interface vpc-keepalive-send-tstamp vpc-keepalive-receive-tstamp vpc-peer-keepalive-up-time vpc-keepalive-send-status vpc-keepalive-receive-status vpc-keepalive-lastupdate [vpc-keepalive-dest] vpc-keepalive-interval vpc-keepalive-timeout vpc-keepalive-hold-timeout vpc-keepalive-vrf vpc-keepalive-udp-port vpc-keepalive-tos ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

peer-keepalive

vPC keepalive status

__readonly__

Read Only

vpc-peer-keepalive-status

vpc peer keepalive status

disabled  value: 1

vpc peer keepalive disabled
peer-alive  value: 2

vpc peer keepalive received
peer-not-alive  value: 3

vpc peer keepalive not received
peer-alive-domain-mismatch  value: 4

vpc peer keepalive received,domainID mismatch
suspended  value: 5

vpc peer keepalive suspended for ISSU
not-operational  value: 6

vpc peer keepalive not operational
suspended-vrf  value: 7

vpc peer keepalive suspended: invalid vrf
misconfigured  value: 8

vpc peer keepalive misconfigured

vpc-keepalive-dest

Type: string

vPC keepalive destination ip address

vpc-keepalive-send-status

vPC keepalive send status

Success  value: 1

vPC keepalive send succeeded
Failed  value: 2

vPC keepalive send failed

vpc-keepalive-receive-status

vPC keepalive receive status

Success  value: 1

vPC keepalive receive succeeded
Failed  value: 2

vPC keepalive receive failed

vpc-peer-keepalive-up-time

Type: string

keepalive- alive time

vpc-keepalive-send-tstamp

Type: string

vPC keepalive last send timestamp

vpc-keepalive-send-interface

Type: string

vPC keepalive send interface

vpc-keepalive-receive-tstamp

Type: string

vPC keepalive last receive timestamp

vpc-keepalive-receive-interface

Type: string

vPC keepalive receive interface

vpc-keepalive-lastupdate

Type: string

vPC keepalive last update from peer

vpc-keepalive-interval

Type: integer

vPC keepalive timeout

vpc-keepalive-timeout

Type: integer

vPC keepalive interval

vpc-keepalive-hold-timeout

Type: integer

hold timeout

vpc-keepalive-vrf

Type: string

vrf name

vpc-keepalive-udp-port

Type: integer

udp port

vpc-keepalive-tos

Type: integer

tos value

Command Modes

- /exec

show vpc role

show vpc role [ __readonly__ vpc-peer-status vpc-peer-status-reason [vpc-current-role] [vpc-es-current-role] dual-active-detected vpc-system-mac vpc-system-prio vpc-local-system-mac vpc-local-system-prio ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

role

vPC role status

__readonly__

Read Only

vpc-peer-status

vPC peer status

peer-not-configured  value: 1

vPC peer-link not configured
peer-not-found  value: 2

vPC peer not found
peer-ok  value: 3

vPC peer adjacency ok
peer-link-down  value: 4

vPC peer link down

vpc-peer-status-reason

vPC peer status reason

SUCCESS  value: 0x00000000

SUCCESS
SYSERR_MCECM_PEER_UNRCH  value: 0x41B70034

SYSERR_MCECM_PEER_UNRCH
SYSERR_MCECM_DOMAIN_COMPAT_FAILED  value: 0x41B7003F

SYSERR_MCECM_DOMAIN_COMPAT_FAILED
SYSERR_MCECM_ELECTION_ERROR  value: 0x41B70037

SYSERR_MCECM_ELECTION_ERROR
SYSERR_MCECM_OOB_NOT_OPERATIONAL  value: 0x41B7004D

SYSERR_MCECM_OOB_NOT_OPERATIONAL

vpc-current-role

vPC role

none-established  value: 0

no role established
primary  value: 2

vPC primary primary
primary-secondary  value: 1

vPC primary secondary
secondary-primary  value: 3

vPC secondary primary
secondary  value: 4

vPC secondary secondary

vpc-es-current-role

vPC role

none-established  value: 0

no role established
primary  value: 2

vPC primary primary
primary-secondary  value: 1

vPC primary secondary
secondary-primary  value: 3

vPC secondary primary
secondary  value: 4

vPC secondary secondary

dual-active-detected

Type: integer

Dual active detection status

vpc-system-mac

Type: string

vPC system mac

vpc-local-system-mac

Type: string

vPC local system mac

vpc-system-prio

Type: uinteger

vPC system priority

vpc-local-system-prio

Type: uinteger

vPC local system priority

Command Modes

- /exec

show vpc statistics

show vpc statistics { vpc vpc_num | peer-link }

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

statistics

Statistics

vpc_num

Type: integer

min: 1  max: 4096

Virtual Port Channel number

peer-link

stats for peer-link

Command Modes

- /exec

show vpc statistics peer-keepalive

show vpc statistics peer-keepalive [ __readonly__ vpc-keepalive-counters-tx vpc-keepalive-counters-rx vpc-keepalive-avg-rx-interval vpc-keepalive-peer-state-changes ]

Syntax Description

show

Show running system information

vpc

Virtual Port Channel configuration

statistics

Statistics

peer-keepalive

peer keepalive module related statistics

__readonly__

Read Only

vpc-keepalive-counters-tx

Type: uinteger

tx counters

vpc-keepalive-counters-rx

Type: uinteger

rx counters

vpc-keepalive-avg-rx-interval

Type: uinteger

avg rx interval in ms

vpc-keepalive-peer-state-changes

Type: uinteger

peer state changes

Command Modes

- /exec

show vrf

show vrf [ vrf-name | vrf-known-name | all ] [ order id ] [detail] [passive] [ __readonly__ TABLE_vrf vrf_name vrf_id vrf_state [vrf_reason] [vrf_pend] [ vpnid rd max_routes mid_threshold ] [ TABLE_tib tib_id tib_af tib_nonce tib_state [tib_reason] [tib_pend] ] ]

Syntax Description

show

Show running system information

vrf

Display VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display VRF information for all VRFs

order

Specify ordering

id

Order by ID

detail

Display VRF detail information

passive

Display passive VRF information

__readonly__

TABLE_vrf

TABLE_tib

vrf_name

Type: string

vrf_id

Type: uinteger

vrf_state

Type: string

vrf_reason

Type: string

vrf_pend

Type: bool

vpnid

Type: string

rd

Type: string

max_routes

Type: uinteger

mid_threshold

Type: uinteger

tib_id

Type: uinteger

tib_af

Type: string

tib_nonce

Type: uinteger

tib_state

Type: string

tib_reason

Type: string

tib_pend

Type: bool

Command Modes

- /exec

show vrf interface

show vrf [ vrf-name | vrf-known-name | all ] interface [interface] [ __readonly__ TABLE_if if_name vrf_name { vrf_id | fwd_ref } soo ]

Syntax Description

show

Show running system information

vrf

Display VRF information

vrf-name

Type: vrf

pattern: [-a-zA-Z0-9_:;$#@]*

antipattern: vrf | detail | interface | definition | context | forwarding | member | all | l2-vrf | topology | passive

length: 32

VRF name

vrf-known-name

Type: vrf

Known VRF name

all

Display VRF information for all VRFs

interface

Display interface VRF information

interface

Type: interface

Display interface VRF information

__readonly__

TABLE_if

if_name

Type: string

vrf_name

Type: string

vrf_id

Type: uinteger

fwd_ref

Type: string

soo

Type: string

Command Modes

- /exec

show vrf topology

show vrf topology [ order id ] [detail] [ __readonly__ TABLE_tib vrf_name tib_af tib_name tib_id tib_state [ tib_reason tib_pend ] ]

Syntax Description

show

Show running system information

vrf

Configure VRF parameters

topology

Display topology information

order

Specify ordering

id

Order by ID

detail

Display topology detail information

__readonly__

TABLE_tib

vrf_name

Type: string

tib_af

Type: string

tib_name

Type: string

tib_id

Type: uinteger

tib_state

Type: string

tib_reason

Type: string

tib_pend

Type: bool

Command Modes

- /exec

show vrrp

show vrrp [ [summary] | [ statistics | detail ] [ interface interface_id ] [ vr vr_id ] [ master | backup | init ] + ] [ __readonly__ show_vrrp_start TABLE_vrrp_group sh_if_index sh_group_id sh_group_type sh_group_state sh_group_preempt sh_vip_addr [ TABLE_sec_vip_addr sh_sec_vip_addr ] sh_priority [ sh_cfg_priority sh_fwd_thr_lower sh_fwd_thr_upper ] sh_adv_interval [sh_auth_text] [sh_vmac] [sh_master_router] [ sh_native_track_intf sh_native_track_priotiry ] [ TABLE_vrrp_track sh_track_object_id sh_decrement_priority sh_track_object_state ] [ sh_bfd_status sh_bfd_session ] sh_vrrp_end ]

Syntax Description

show

Show running system information

vrrp

Show vrrp information

summary

Show vrrp summary

statistics

Show vrrp statistics

detail

Show detailed information

interface

Show vrrp info for the interface

interface_id

Type: interface

vr

Show vrrp info for the group

vr_id

Type: integer

min: 1  max: 255

[1-255] enter IPv4 vr group

master

Groups in Master state

backup

Groups in Backup state

init

Groups in Init state

__readonly__

Read only

show_vrrp_start

Type: uinteger

Show vrrp start

TABLE_vrrp_group

Group detail table

sh_if_index

Type: interface

Interface type and number

sh_group_id

Type: uinteger

Group number

sh_group_type

Group type

Unknown  value: 0

IPV4  value: 1

IPV6  value: 2

sh_group_state

VRRP group state

Init  value: 1

Backup  value: 2

Master  value: 3

sh_group_preempt

Group preemption statue

Disable  value: 0

Enable  value: 1

sh_vip_addr

Type: ipaddr

Virtual IP Address

TABLE_sec_vip_addr

Secondary virtual ip address table

sh_sec_vip_addr

Type: ipaddr

Secondary virtual ip address

sh_priority

Type: uinteger

Priority of VRRP group

sh_auth_text

Type: string

Authentication text

sh_cfg_priority

Type: uinteger

Configured priority of VRRP group

sh_fwd_thr_lower

Type: uinteger

Lower forwarding threshold

sh_fwd_thr_upper

Type: uinteger

Upper forwarding threshold

sh_adv_interval

Type: uinteger

Advertisement interval

sh_vmac

Type: string

Virtual MAC

sh_master_router

Type: string

Master router

sh_native_track_intf

Type: interface

Native tracked interface

sh_native_track_priotiry

Type: uinteger

Decrement priority for Native tracking

TABLE_vrrp_track

VRRP tracking table

sh_track_object_id

Type: uinteger

Object id of tracking object

sh_decrement_priority

Type: uinteger

Decrement priority

sh_track_object_state

Tracking object state

DOWN  value: 0

UP  value: 1

sh_bfd_status

BFD status

Disable  value: 0

Enable  value: 1

sh_bfd_session

BFD session status

Active  value: 0

Inactive  value: 1

Deleted  value: 2

State_Unknown  value: 3

sh_vrrp_end

Type: uinteger

Show vrrp end

Command Modes

- /exec

show vrrp bfd-sessions

show vrrp bfd-sessions [ interface interface-id [ to ipaddress ] ] [ __readonly__ TABLE_bfd_sess interface { src_addr | src_addr_v6 } { dst_addr | dst_addr_v6 } session_state ref_count displayed_interface TABLE_groups group_id vrrp_state bfd_status operation time ]

Syntax Description

show

Show running system information

vrrp

Show vrrp information

bfd-sessions

BFD sessions

interface

Groups on this interface

interface-id

Type: interface

Interface

to

To IP address

ipaddress

Type: ipaddr

Sessions to IP address

__readonly__

TABLE_bfd_sess

interface

Type: interface

Interface

src_addr

Type: ipaddr

IPv4 Source address

dst_addr

Type: ipaddr

IPv4 Destination address

src_addr_v6

Type: ipv6addr

IPv6 Source address

dst_addr_v6

Type: ipv6addr

IPv6 Destination address

session_state

Type: string

Session state

ref_count

Type: uinteger

Ref count

displayed_interface

Type: interface

Displayed interface

TABLE_groups

group_id

Type: uinteger

Group id

vrrp_state

Type: string

VRRP STATE

bfd_status

Type: string

BFD STATE

operation

Type: string

Operation

time

Type: string

Time

Command Modes

- /exec

show vtp counters

show vtp counters [ __readonly__ start summary_rx subset_rx request_rx summary_tx subset_tx request_tx num_config_rev_error num_config_digest_error num_v1_summary_error TABLE_pruning_counters if_index join_tx join_rx summary_adv_v1_rx ]

Syntax Description

show

Show running system information

vtp

VTP information

counters

VTP statistics

__readonly__

Read Only

start

Type: uinteger

Start

summary_rx

Type: uinteger

Summary advertisements received

subset_rx

Type: uinteger

Subset advertisements received

request_rx

Type: uinteger

Request advertisements received

summary_tx

Type: uinteger

Summary advertisements transmitted

subset_tx

Type: uinteger

Subset advertisements transmitted

request_tx

Type: uinteger

Request advertisements transmitted

num_config_rev_error

Type: uinteger

Number of config revision errors

num_config_digest_error

Type: uinteger

Number of config digest errors

num_v1_summary_error

Type: uinteger

Number of V1 summary errors

TABLE_pruning_counters

Pruning counters in table format

if_index

Type: interface

Trunk

join_tx

Type: uinteger

Join Transmitted

join_rx

Type: uinteger

Join Received

summary_adv_v1_rx

Type: uinteger

Summary advts received from non-pruning-capable device

Command Modes

- /exec

show vtp datafile

show vtp datafile

Syntax Description

show

Show running system information

vtp

VTP information

datafile

vlan.dat

Command Modes

- /exec

show vtp domain id

show vtp domain id domain-id [ __readonly__ start domain_name oper-mode config_rev last_modified_ip last_modified_time tftp_server tftp_file_path pruning_mode version_in_use oper_pruning_mode ]

Syntax Description

show

Show running system information

vtp

VTP information

domain

VTP administrative domain

id

VTP administrative domain ID

domain-id

Type: uinteger

Domian index(Domain-id)

__readonly__

Read Only

start

Type: uinteger

Start

domain_name

Type: string

VTP Domain Name

oper-mode

VTP Mode

Client  value: 1

VTP Mode Client
Server  value: 2

VTP Mode Server
Transparent  value: 3

VTP Mode Transparent
Off  value: 4

VTP Mode Off

config_rev

Type: uinteger

Configuration Revision

last_modified_ip

Type: string

Configuration last modified by

last_modified_time

Type: string

Configuration last modified at

tftp_server

Type: string

TFTP Server IP Address

tftp_file_path

Type: string

TFTP complete path of the file

pruning_mode

Pruning mode Enabled/Disabled

Enabled  value: 1

Pruning Enabled
Disabled  value: 2

Pruning Disabled

version_in_use

VTP Version in use

V1  value: 1

Version 1
V2  value: 2

Version 2
None  value: 3

No Version
V3  value: 4

Version 4

oper_pruning_mode

Operational Pruning Mode

Enabled  value: 1

Pruning Enabled
Disabled  value: 2

Pruning Disabled

Command Modes

- /exec

show vtp interface

show vtp interface [interface_range] [ __readonly__ start TABLE_vtp_interface if_index status ]

Syntax Description

show

Show running system information

vtp

VTP information

interface

VTP interface status and configuration

interface_range

Type: interface-mrange

Enter interfaces

__readonly__

Read Only

start

Type: uinteger

Start

TABLE_vtp_interface

VTP interface configuration in table format

if_index

Type: interface

Trunk

status

VTP interface status

Enabled  value: 1

VTP Enabled
Disabled  value: 2

VTP Disabled

Command Modes

- /exec

show vtp mibstats

show vtp mibstats [ __readonly__ start summary_rx subset_rx request_rx summary_tx subset_tx request_tx num_config_rev_error num_config_digest_error ]

Syntax Description

show

Show running system information

vtp

VTP information

mibstats

VTP Statistics for MIB

__readonly__

Read Only

start

Type: uinteger

Start

summary_rx

Type: uinteger

Summary advertisements received

subset_rx

Type: uinteger

Subset advertisements received

request_rx

Type: uinteger

Request advertisements received

summary_tx

Type: uinteger

Summary advertisements transmitted

subset_tx

Type: uinteger

Subset advertisements transmitted

request_tx

Type: uinteger

Request advertisements transmitted

num_config_rev_error

Type: uinteger

Number of config revision errors

num_config_digest_error

Type: uinteger

Number of config digest errors

Command Modes

- /exec

show vtp password

show vtp password [ domain domain-id ] [ __readonly__ start passwd password-type secret-key ]

Syntax Description

show

Show running system information

vtp

VTP information

password

VTP password

domain

VTP administrative domain

domain-id

Type: uinteger

Domian index(Domain-id)

__readonly__

Read Only

start

Type: uinteger

Start

passwd

Type: string

length: 64

VTP Domain Password

password-type

Type: uinteger

Password Type (1=plaintxt, 2=hidden)

secret-key

Type: uinteger

Secret Key for the password

Command Modes

- /exec

show vtp status

show vtp status [ __readonly__ start version config_rev max_vlan_supported_local num_current_vlans oper_mode domain_name pruning_mode oper_pruning_mode v2_mode trap_enabled md5_digest last_modified_ip last_modified_time running-version updater_id updater_reason ]

Syntax Description

show

Show running system information

vtp

VTP information

status

VTP domain status

__readonly__

Read Only

start

Type: uinteger

Start

version

Type: uinteger

VTP version

config_rev

Type: uinteger

Configuration Revision

max_vlan_supported_local

Type: uinteger

Maximum VLANs supported locally

num_current_vlans

Type: uinteger

Number of existing VLANs

oper_mode

VTP Mode

client  value: 1

VTP Mode Client
server  value: 2

VTP Mode Server
transparent  value: 3

VTP Mode Transparent
off  value: 4

VTP Mode Off

domain_name

Type: string

VTP Domain Name

pruning_mode

Pruning Mode

enabled  value: 1

Pruning Enabled
disabled  value: 2

Pruning Disabled

oper_pruning_mode

Operational Pruning Mode

enabled  value: 1

Operational Pruning Enabled
disabled  value: 2

Operational Pruning Disabled

v2_mode

VTP v2 Mode

enabled  value: 1

V2 Mode Enabled
disabled  value: 2

V2 Mode Disabled

trap_enabled

trap enabled

enabled  value: 1

Trap Enabled
disabled  value: 2

Trap Disabled

md5_digest

Type: string

MD5 Digest

last_modified_ip

Type: string

Configuration last modified by

last_modified_time

Type: string

Configuration last modified at

running-version

Type: uinteger

VTP Version Running

updater_id

Type: string

Local Updater id

updater_reason

Local Updater id reason

no valid interface found  value: 1

No valid interface found
first layer3 interface found  value: 2

first layer3 interface found

Command Modes

- /exec

show vtp trunk interface

show vtp trunk interface if_index [ __readonly__ start out_if_index join_rx join_tx summary_adv_v1_rx pruning_eligible vlan_joined_tx vlan_joined_rx vtp_enabled ]

Syntax Description

show

Show running system information

vtp

VTP information

trunk

VTP Trunk VLAN

interface

Specify an VTP Trunk interface

if_index

Type: interface

VTP Trunk Port Interface Index

__readonly__

Read Only

start

Type: uinteger

Start

out_if_index

Type: interface

Returned VTP Trunk Port Interface Index

join_rx

Type: uinteger

Join(s) Received

join_tx

Type: uinteger

Join(s) Transmitted

summary_adv_v1_rx

Type: uinteger

Summary advts received from non-pruning-capable device

pruning_eligible

Type: bitmap

Pruning Eligible

vlan_joined_tx

Type: bitmap

Trunk Port TX Vlans Joined

vlan_joined_rx

Type: bitmap

Trunk Port RX Vlans Joined

vtp_enabled

Type: uinteger

VTP Enabled (Yes(1)/No(0))

Command Modes

- /exec

show vtp vlan

show vtp vlan vlan-id [ domain domain-id ] [ __readonly__ start status type vlan_name mtu said ring_number bridge_number stp_type parent_vlan trans_vlan1 trans_vlan2 bridge_type max_are_hop max_ste_hop crf_backup vlan_type_ext ifindex ]

Syntax Description

show

Show running system information

vtp

VTP information

vlan

VTP Domain VLANs

vlan-id

Type: uinteger

VTP VLAN index(VLAN-id)

domain

VTP administrative domain

domain-id

Type: uinteger

Domian index(Domain-id)

__readonly__

Read Only

start

Type: uinteger

Start

status

Type: uinteger

VTP VLAN Status - Operational=0,Suspended=1

type

VTP VLAN Type

Ether  value: 1

VTP VLAN Type - Ethernet
FDDI  value: 2

VTP VLAN Type - FDDI
TR  value: 3

VTP VLAN Type - Token Ring
FDDINET  value: 4

VTP VLAN Type - FDDI NET
TRNET  value: 5

VTP VLAN Type - Token Ring NET

vlan_name

Type: string

VTP VLAN Name

mtu

Type: uinteger

VTP VLAN MTU

said

Type: uinteger

VTP VLAN ID

ring_number

Type: uinteger

VTP VLAN Ring Numeber for FDDI/TR

bridge_number

Type: uinteger

VTP VLAN Bridge Number for FDDI-NET/TR-NET

stp_type

Type: uinteger

VTP VLAN STP Type for FDDI-NET/TR-NET

parent_vlan

Type: uinteger

VTP VLAN Parent VLAN for FDDI/TR

trans_vlan1

Type: uinteger

VTP VLAN Translational VLAN 1

trans_vlan2

Type: uinteger

VTP VLAN Translational VLAN 2

bridge_type

Type: uinteger

VTP VLAN Brdige Type

max_are_hop

Type: uinteger

VTP VLAN Max are-hop count

max_ste_hop

Type: uinteger

VTP VLAN Max ste_hop count

crf_backup

Type: uinteger

VTP VLAN Backup CRF Mode

vlan_type_ext

Type: uinteger

VTP VLAN Type - VTP Managable, Internal, RSPAN, Dynamic GVRP

ifindex

Type: uinteger

VTP VLAN Interface Index

Command Modes

- /exec

Chapter 23. X Show Commands

- show xml server logging configuration

- show xml server status

show xml server logging configuration

show xml server logging configuration

Syntax Description

show

Show running system information

xml

Show xmlagent logging configuration

server

xml agent server

logging

Show logging configuration and contents of logfile

configuration

Show facility logging configuration

Command Modes

- /exec

show xml server status

show xml server status [ __readonly__ operational_status o_status maximum_sessions_configured max_session [ TABLE_sessions session_id user_name start_time sap_id timeout time_remaining_to_timeout ip_addr ] ]

Syntax Description

show

to display xml agent information

xml

xml agent

server

xml agent server

status

display xml agent information

__readonly__

operational_status

run-time info about xml

o_status

operational status of the xml

disabled  value: 0

enabled  value: 1

maximum_sessions_configured

the max session configured

max_session

Type: integer

min: 1  max: 8

max sessions number

TABLE_sessions

all xml sessions

session_id

Type: integer

one xml session id

user_name

Type: string

the xml session user name

start_time

Type: string

the xml session start time

sap_id

Type: integer

the mts sap id

timeout

Type: string

inactivity timeout value

time_remaining_to_timeout

Type: string

time remaining to timeout

ip_addr

Type: string

ip address of the session

Command Modes

- /exec

Preface

This preface includes the following sections:

- Audience

- Documentation Conventions

- Documentation Feedback

- Obtaining Documentation and Submitting a Service Request

Audience

This publication is for network administrators who install, configure, and maintain Cisco Nexus switches.

Documentation Conventions

Command descriptions use the following conventions:

Convention

Description

bold

Bold text indicates the commands and keywords that you enter literally as shown.

Italic

Italic text indicates arguments for which the user supplies the values.

[x]

Square brackets enclose an optional element (keyword or argument).

[x | y]

Square brackets enclosing keywords or arguments separated by a vertical bar indicate an optional choice.

{x | y}

Braces enclosing keywords or arguments separated by a vertical bar indicate a required choice.

[x {y | z}]

Nested set of square brackets or braces indicate optional or required choices within optional or required elements. Braces and a vertical bar within square brackets indicate a required choice within an optional element.

variable

Indicates a variable for which you supply values, in context where italics cannot be used.

string

A nonquoted set of characters. Do not use quotation marks around the string or the string will include the quotation marks.

Examples use the following conventions:

Convention

Description

screen font

Terminal sessions and information the switch displays are in screen font.

boldface screen font

Information you must enter is in boldface screen font.

italic screen font

Arguments for which you supply values are in italic screen font.

< >

Nonprinting characters, such as passwords, are in angle brackets.

[ ]

Default responses to system prompts are in square brackets.

!, #

An exclamation point (!) or a pound sign (#) at the beginning of a line of code indicates a comment line.

Documentation Feedback

To provide technical feedback on this document, or to report an error or omission, please send your comments to . We appreciate your feedback.

Obtaining Documentation and Submitting a Service Request

For information on obtaining documentation, using the Cisco Bug Search Tool (BST), submitting a service request, and gathering additional information, see What's New in Cisco Product Documentation at: Click Here

Subscribe to What’s New in Cisco Product Documentation, which lists all new and revised Cisco technical documentation as an RSS feed and delivers content directly to your desktop using a reader application. The RSS feeds are a free service.