Table of Contents

Messages and Recovery Procedures

AAA Messages

AAA-1

AAA-2

AAA-3

AAA-6

AAM Messages

AAM-2

AAM-3

ACLLOG Messages

ACLLOG-4

ACLLOG-6

ACLMGR Messages

ACLMGR-2

ACLMGR-3

ACLMGR-4

ACLMGR-6

ACLQOS Messages

ACLQOS-SLOT#-0

ACLQOS-SLOT#-2

ACLQOS-SLOT#-3

ACLQOS-SLOT#-4

ACLQOS-SLOT#-5

ACLTCAM Messages

ACLTCAM-2

ACLTCAM-3

ACLTCAM-4

ACLTCAM-6

ACL Messages

ACL-2

ACL-3

ACL-4

ACL-5

ACL-6

AFM Messages

AFM-2

AFM-3

AFM-4

AFM-6

AMM Messages

AMM-SLOT#-0

AMM-SLOT#-2

AMM-SLOT#-6

ASCII-CFG Messages

ASCII-CFG-2

ASCII-CFG-3

ASCII-CFG-6

ASSOC_MGR Messages

ASSOC_MGR-0

ASSOC_MGR-1

ASSOC_MGR-2

ASSOC_MGR-3

ASSOC_MGR-4

ASSOC_MGR-5

ASSOC_MGR-6

ASSOC_MGR-7

BFDC Messages

BFDC-SLOT#-2

BFD Messages

BFD-3

BFD-4

BFD-5

BFD-6

BIOS_DAEMON Messages

BIOS_DAEMON-2

BIOS_DAEMON-5

BIOS_DAEMON-SLOT#-2

BIOS_DAEMON-SLOT#-5

BLOGGERD Messages

BLOGGERD-2

BLOGGERD-3

BLOGGERD-4

BLOGGERD-6

BOOTUP_TEST Messages

BOOTUP_TEST-2

BOOTVAR Messages

BOOTVAR-2

BOOTVAR-3

BOOTVAR-5

BOOTVAR-6

CALLHOME Messages

CALLHOME-2

CALLHOME-3

CALLHOME-6

CARDCLIENT Messages

CARDCLIENT-2

CARDCLIENT-3

CARDCLIENT-SLOT#-2

CDP Messages

CDP-2

CDP-3

CDP-4

CDP-5

CDP-6

CERT_ENROLL Messages

CERT_ENROLL-2

CERT_ENROLL-3

CERT_ENROLL-6

CFS Messages

CFS-2

CFS-3

CFS-4

CFS-6

CLIS Messages

CLIS-5

CLK_MGR Messages

CLK_MGR-2

CLK_MGR-5

CLK_MGR-6

CLOUD Messages

CLOUD-2

CLOUD-3

CLOUD-6

CLUSTER Messages

CLUSTER-2

CLUSTER-5

CMOND Messages

CMOND-2

COPP Messages

COPP-1

COPP-2

COPP-3

COPP-4

COPP-5

COPP-6

COPP-7

CORE-DMON Messages

CORE-DMON-2

CORE-DMON-3

CRDCFG Messages

CRDCFG-2

CRDCFG-3

CRDCFG-SLOT#-2

DCEFIB Messages

DCEFIB-SLOT#-0

DCEFIB-SLOT#-2

DCEFIB-SLOT#-6

DEVICE-ALIAS Messages

DEVICE-ALIAS-2

DEVICE-ALIAS-3

DEVICE-ALIAS-6

DEVICE_TEST Messages

DEVICE_TEST-2

DEVICE_TEST-3

DEVICE_TEST-4

DEVICE_TEST-5

DEVICE_TEST-6

DEV_LOG_SUP Messages

DEV_LOG_SUP-3

DEV_LOG Messages

DEV_LOG-3

DEV_LOG-SLOT#-4

DFTM Messages

DFTM-SLOT#-2

DFTM-SLOT#-3

DHCLIENT Messages

DHCLIENT-2

DHCLIENT-4

DHCLIENT-5

DHCLIENT-6

DHCLIENT-7

DHCP_SNOOP Messages

DHCP_SNOOP-1

DHCP_SNOOP-2

DHCP_SNOOP-3

DHCP_SNOOP-4

DHCP_SNOOP-5

DHCP_SNOOP-6

DIAGCLIENT Messages

DIAGCLIENT-2

DIAGCLIENT-3

DIAGCLIENT-4

DIAGCLIENT-5

DIAGCLIENT-7

DIAGMGR Messages

DIAGMGR-2

DIAGMGR-3

DIAGMGR-4

DIAGMGR-5

DIAGMGR-6

DIAG_PORT_LB Messages

DIAG_PORT_LB-2

DIAG_PORT_LB-3

DIAG_PORT_LB-4

DIAG_PORT_LB-5

DPVM Messages

DPVM-2

DPVM-3

DPVM-4

DPVM-6

DSTATS Messages

DSTATS-2

DSTATS-3

DT_HELPER Messages

DT_HELPER-2

ECHAT Messages

ECHAT-2

ECHAT-3

ECHAT-5

ECHAT-6

ELTMC Messages

ELTMC-SLOT#-2

ELTM Messages

ELTM-2

ELTM-3

ELTM-5

ELTM-6

EOU Messages

EOU-2

EOU-5

EOU-6

EOU-7

EPP Messages

EPP-5

ETH-PORT-SEC Messages

ETH-PORT-SEC-2

ETH-PORT-SEC-3

ETH-PORT-SEC-5

ETHPORT Messages

ETHPORT-2

ETHPORT-3

ETHPORT-4

ETHPORT-5

ETH_PORT_CHANNEL Messages

ETH_PORT_CHANNEL-1

ETH_PORT_CHANNEL-2

ETH_PORT_CHANNEL-3

ETH_PORT_CHANNEL-4

ETH_PORT_CHANNEL-5

ETH_PORT_CHANNEL-6

ETH_PORT_CHANNEL-7

EVMC Messages

EVMC-3

EVMC-4

EVMC-5

EVMED Messages

EVMED-2

EVMED-5

EVMS Messages

EVMS-2

EVMS-4

EVMS-6

EXAMPLE_TEST Messages

EXAMPLE_TEST-5

EXCEPTIONLOG Messages

EXCEPTIONLOG-SLOT#-2

EX_SYSLOG Messages

EX_SYSLOG-0

EX_SYSLOG-1

EX_SYSLOG-2

EX_SYSLOG-3

EX_SYSLOG-4

EX_SYSLOG-5

EX_SYSLOG-6

EX_SYSLOG-7

FCDOMAIN Messages

FCDOMAIN-2

FCDOMAIN-3

FCDOMAIN-4

FCDOMAIN-5

FCDOMAIN-6

FCDOMAIN-7

FCD Messages

FCD-7

FCFWD Messages

FCFWD-3

FCFWD-4

FCFWD-6

FCFWD-SLOT#-2

FCFWD-SLOT#-3

FCFWD-SLOT#-4

FCFWD-SLOT#-6

FCNS Messages

FCNS-2

FCNS-3

FCNS-4

FCNS-6

FCOELC Messages

FCOELC-2

FCOE_MGR Messages

FCOE_MGR-2

FCOE_MGR-5

FCSP-MGR Messages

FCSP-MGR-2

FCS Messages

FCS-2

FCS-3

FCS-4

FCS-5

FCS-6

FEATURE-MGR Messages

FEATURE-MGR-2

FEATURE-MGR-6

FEX Messages

FEX-2

FEX-4

FEX-5

FIB Messages

FIB-SLOT#-0

FIB-SLOT#-1

FIB-SLOT#-2

FIB-SLOT#-3

FIB-SLOT#-4

FIB-SLOT#-6

FICON Messages

FICON-2

FICON-3

FICON-5

FICON-6

FIPS Messages

FIPS-0

FIPS-6

FLOGI Messages

FLOGI-1

FLOGI-2

FLOGI-4

FLOGI-5

FS-DAEMON Messages

FS-DAEMON-2

FS-DAEMON-6

FSCM Messages

FSCM-2

FSPF Messages

FSPF-2

FSPF-3

FSPF-4

FSPF-5

FSPF-6

FSPF-7

HSRP_ENGINE Messages

HSRP_ENGINE-3

HSRP_ENGINE-4

HSRP_ENGINE-5

HSRP_ENGINE-6

ICAM Messages

ICAM-2

ICAM-4

IDEHSD Messages

IDEHSD-1

IDEHSD-2

IDEHSD-3

IDEHSD-5

IDEHSD-6

IDEHSD-7

IFTMC Messages

IFTMC-SLOT#-1

IFTMC-SLOT#-2

IKE Messages

IKE-3

IKE-4

IKE-6

ILC-SPAN Messages

ILC-SPAN-3

IMAGE_DNLD Messages

IMAGE_DNLD-SLOT#-2

IMAGE_DNLD-SLOT#-4

IMAGE_DNLD-SLOT#-5

IMP Messages

IMP-5

IM Messages

IM-3

IM-5

INSTALLER Messages

INSTALLER-1

INSTALLER-5

INTERFACE_VLAN Messages

INTERFACE_VLAN-4

INTERFACE_VLAN-5

IOA_LC Messages

IOA_LC-5

IPFIB Messages

IPFIB-2

IPQOSMGR Messages

IPQOSMGR-2

IPQOSMGR-3

IPQOSMGR-4

IPQOSMGR-5

IPQOSMGR-6

IPS Messages

IPS-2

IPS-3

IPS-4

IPS-5

IPS-6

IPS-7

IPV6 Messages

IPV6-2

IPV6-3

IPV6-4

IPV6-6

IP Messages

IP-1

IP-2

IP-3

IP-4

IP-6

ISNS Messages

ISNS-2

KIM Messages

KIM-2

L2FM Messages

L2FM-0

L2FM-1

L2FM-2

L2FM-3

L2FM-4

L2FM-5

L2FM-6

L2MCAST Messages

L2MCAST-SLOT#-0

L2MCAST-SLOT#-2

L2MCAST-SLOT#-3

L2MCAST-SLOT#-6

LACP Messages

LACP-3

LACP-5

LC-SPAN Messages

LC-SPAN-3

LC_PORT_CHANNEL Messages

LC_PORT_CHANNEL-SLOT#-1

LC_PORT_CHANNEL-SLOT#-3

LDAP Messages

LDAP-2

LDAP-3

LDAP-5

LDAP-6

LIBBASE_SVC Messages

LIBBASE_SVC-2

LIBBASE_SVC-4

LIBBASE_SVC-5

LIBIFMGR Messages

LIBIFMGR-5

LICMGR Messages

LICMGR-0

LICMGR-1

LICMGR-2

LICMGR-3

LICMGR-4

LICMGR-6

LIM Messages

LIM-2

LIM-3

LIM-4

LIM-5

LLDP Messages

LLDP-3

LLDP-5

LLDP-6

M2FIB Messages

M2FIB-SLOT#-0

M2FIB-SLOT#-2

M2FIB-SLOT#-6

M2RIB Messages

M2RIB-0

M2RIB-2

M2RIB-6

MCAST Messages

MCAST-2

MCAST-4

MCAST-5

MCECTEST Messages

MCECTEST-3

MCECTEST-5

MCECTEST-6

MCM Messages

MCM-2

MCM-5

MCM-6

MFDM Messages

MFDM-2

MMODE Messages

MMODE-2

MMODE-3

MMODE-4

MODULE Messages

MODULE-1

MODULE-2

MODULE-3

MODULE-4

MODULE-5

MODULE-6

MONITORC Messages

MONITORC-SLOT#-3

MONITOR Messages

MONITOR-5

MPLS_OAM Messages

MPLS_OAM-5

MPLS_STATIC Messages

MPLS_STATIC-5

MRIB Messages

MRIB-4

MTC_USD Messages

MTC_USD-2

MTC_USD-4

MTC_USD-5

MTC_USD-6

MTM Messages

MTM-SLOT#-0

MTM-SLOT#-1

MTM-SLOT#-2

MTM-SLOT#-3

MTM-SLOT#-4

MTM-SLOT#-5

MTM-SLOT#-6

NAT Messages

NAT-2

NAT-5

NBM Messages

NBM-0

NBM-1

NBM-2

NEUTRON_USD Messages

NEUTRON_USD-0

NEUTRON_USD-2

NEUTRON_USD-3

NEUTRON_USD-4

NEUTRON_USD-6

NFM Messages

NFM-2

NFM-3

NFM-4

NFM-5

NFM-6

NFM-7

NFP Messages

NFP-SLOT#-2

NFP-SLOT#-5

NGOAM Messages

NGOAM-3

NGOAM-4

NGOAM-6

NPV Messages

NPV-2

NPV-3

NPV-4

NPV-5

NPV-6

NPV-7

NSUSD Messages

NSUSD-6

NTP Messages

NTP-2

NTP-3

NTP-6

NVE Messages

NVE-5

OBFL Messages

OBFL-3

ONEP Messages

ONEP-2

ONEP-3

ONEP-4

ONEP-6

OTM Messages

OTM-2

OTM-3

OTM-5

OTM-6

PATCH-INSTALLER Messages

PATCH-INSTALLER-2

PATCH-INSTALLER-3

PHY_USD Messages

PHY_USD-SLOT#-4

PIM Messages

PIM-4

PIXM Messages

PIXM-2

PIXM-3

PIXM-4

PIXM-7

PLATFORM Messages

PLATFORM-0

PLATFORM-1

PLATFORM-2

PLATFORM-3

PLATFORM-4

PLATFORM-5

PLATFORM-6

PLATFORM-7

PLOG_SUP Messages

PLOG_SUP-4

PLOG Messages

PLOG-4

PLSM Messages

PLSM-3

PLSM-6

PLTFM_CONFIG Messages

PLTFM_CONFIG-2

PLTFM_CONFIG-3

PLTFM_CONFIG-4

PLUGIN Messages

PLUGIN-2

PLUGIN-3

POAP Messages

POAP-2

POAP-5

POE Messages

POE-2

POE-3

POE-5

PONG Messages

PONG-5

PORT-CHANNEL Messages

PORT-CHANNEL-1

PORT-CHANNEL-2

PORT-CHANNEL-3

PORT-CHANNEL-4

PORT-CHANNEL-5

PORT-CHANNEL-6

PORT-CHANNEL-7

PORT-PROFILE Messages

PORT-PROFILE-2

PORT-PROFILE-3

PORT-PROFILE-6

PORT-RESOURCES Messages

PORT-RESOURCES-3

PORT-RESOURCES-5

PORT-SECURITY Messages

PORT-SECURITY-2

PORT-SECURITY-3

PORT-SECURITY-4

PORT-SECURITY-6

PORT Messages

PORT-2

PORT-3

PORT-4

PORT-5

PRIVATE_VLAN Messages

PRIVATE_VLAN-2

PRIVATE_VLAN-3

PRIVATE_VLAN-5

PROFILER Messages

PROFILER-0

PROFILER-1

PROFILER-2

PROFILER-3

PROFILER-4

PROFILER-5

PROFILER-6

PROFILER-7

PSSHELPER_GSVC Messages

PSSHELPER_GSVC-2

PSSHELPER_GSVC-7

PSS Messages

PSS-0

PSS-1

PSS-2

PSS-4

PSS-5

PTPLC Messages

PTPLC-3

PTP Messages

PTP-2

PTP-5

PTP-6

PULSE Messages

PULSE-0

PULSE-1

PULSE-2

PULSE-3

PULSE-4

PULSE-5

PULSE-6

PULSE-7

QOS Messages

QOS-2

QOS-3

QOS-4

QOS-6

QUACK_SMC Messages

QUACK_SMC-6

RADIUS Messages

RADIUS-2

RADIUS-3

RADIUS-4

RADIUS-5

RADIUS-6

RES_MGR Messages

RES_MGR-1

RES_MGR-2

RES_MGR-3

RES_MGR-4

RES_MGR-5

RES_MGR-6

RIB Messages

RIB-0

RIB-1

RIB-2

RIB-3

RIB-4

RIB-5

RIB-6

SAL Messages

SAL-5

SCHEDULER Messages

SCHEDULER-2

SCHEDULER-3

SCHEDULER-4

SCHEDULER-6

SECURITYD Messages

SECURITYD-2

SECURITYD-3

SECURITYD-6

SENSOR_USD Messages

SENSOR_USD-2

SENSOR_USD-3

SENSOR_USD-5

SENSOR Messages

SENSOR-0

SENSOR-3

SESSION-MGR Messages

SESSION-MGR-2

SESSION-MGR-3

SESSION-MGR-4

SESSION-MGR-6

SFLOW Messages

SFLOW-3

SFLOW-4

SFLOW-5

SFLOW-6

SFLOW-7

SIM Messages

SIM-2

SIM-3

SIM-4

SIM-5

SISF Messages

SISF-2

SISF-3

SISF-4

SISF-5

SKSD Messages

SKSD-2

SKSD-3

SKSD-4

SKSD-5

SKSD-6

SMARTC Messages

SMARTC-2

SMARTC-3

SMARTC-4

SMARTC-5

SME_CPP Messages

SME_CPP-2

SME_CPP-3

SME_CPP-5

SME_CPP-SLOT#-2

SME_CPP-SLOT#-3

SME_CPP-SLOT#-4

SME_CPP-SLOT#-5

SNMPD Messages

SNMPD-1

SNMPD-2

SNMPD-3

SNMPD-4

SNMPD-5

SNMPD-6

SNMPD-7

SPAN Messages

SPAN-2

SPAN-3

SPAN-5

SPAN-6

STATSCLIENT Messages

STATSCLIENT-2

STATSCLIENT-3

STATSCLIENT-6

STATSINFRA Messages

STATSINFRA-3

STP Messages

STP-2

STP-3

STP-4

STP-6

STRIPCL Messages

STRIPCL-4

STRIPCL-5

SYSMGR Messages

SYSMGR-0

SYSMGR-2

SYSMGR-3

SYSMGR-4

SYSMGR-5

SYSMGR-6

SYSMGR-7

TACACS Messages

TACACS-2

TACACS-3

TACACS-4

TACACS-5

TACACS-6

TAHUSD Messages

TAHUSD-2

TAHUSD-3

TAHUSD-6

TBIRD_CMN_USD Messages

TBIRD_CMN_USD-6

TCAP Messages

TCAP-2

TELEMETRY Messages

TELEMETRY-1

TELEMETRY-2

TELEMETRY-3

TELEMETRY-4

TELEMETRY-5

TELEMETRY-6

TELEMETRY-7

TEMPLATE_MANAGER Messages

TEMPLATE_MANAGER-2

TEMPLATE_MANAGER-3

TEMPLATE_MANAGER-4

TTYD Messages

TTYD-2

TTYD-3

TTYD-4

TTYD-6

TUNNEL Messages

TUNNEL-2

TUNNEL-3

TUNNEL-4

TUNNEL-5

TUNNEL-7

U2RIB Messages

U2RIB-2

U2RIB-3

U2RIB-5

U2RIB-6

UDLD Messages

UDLD-3

UDLD-4

UDLD-5

UFDM Messages

UFDM-2

UFDM-3

UFDM-5

UFDM-6

USBHSD Messages

USBHSD-1

USBHSD-2

USBHSD-3

USBHSD-5

USBHSD-6

USBHSD-7

USDBA Messages

USDBA-6

VDC_MGR Messages

VDC_MGR-2

VDC_MGR-3

VDC_MGR-5

VLAN_MGR Messages

VLAN_MGR-2

VLAN_MGR-3

VLAN_MGR-4

VLAN_MGR-5

VLAN_MGR-6

VMAN Messages

VMAN-2

VMAN-3

VMAN-4

VMAN-5

VMAN-6

VMAN-7

VMM Messages

VMM-2

VMTRACKER Messages

VMTRACKER-2

VMTRACKER-3

VMTRACKER-4

VMTRACKER-5

VNI Messages

VNI-2

VNI-3

VNI-6

VNSEGMENT_MGR Messages

VNSEGMENT_MGR-2

VNSEGMENT_MGR-6

VNTAGC Messages

VNTAGC-5

VNTAG_MGR Messages

VNTAG_MGR-2

VNTAG_MGR-5

VPC Messages

VPC-2

VPC-3

VPC-4

VPC-5

VPC-6

VRRP-CFG Messages

VRRP-CFG-2

VRRP-CFG-3

VRRP-CFG-5

VRRP-ENG Messages

VRRP-ENG-2

VRRP-ENG-3

VRRP-ENG-4

VRRP-ENG-5

VRRP-ENG-6

VSAN Messages

VSAN-2

VSAN-3

VSAN-6

VSHD Messages

VSHD-2

VSHD-3

VSHD-4

VSHD-5

VSHD-7

VTP Messages

VTP-0

VTP-1

VTP-2

VTP-3

VTP-4

VTP-5

VTP-6

VTP-7

WWN Messages

WWN-1

WWN-2

WWN-3

WWN-4

WWN-5

WWN-6

WWN-7

XBAR_CLIENT Messages

XBAR_CLIENT-SLOT#-2

XBAR_CLIENT-SLOT#-3

XBAR_CLIENT-SLOT#-4

XBAR Messages

XBAR-2

XBAR-3

XBAR-4

XBAR-5

XMLMA Messages

XMLMA-2

XMLMA-3

XMLMA-5

XMLMA-6

XMLSA Messages

XMLSA-2

XMLSA-5

XMLSA-6

ZONE Messages

ZONE-2

ZONE-3

ZONE-4

ZONE-5

ZONE-6

Messages and Recovery Procedures

This chapter lists the system messages by facility. Within each facility, the messages are listed by severity levels 0 to 7: 0 is the highest severity level, and 7 is the lowest severity level. Each message is followed by an explanation and a recommended action.

AAA Messages

This section contains the AAA messages.

AAA-1

Error Message  AAA-1-AAA_SESSION_LIMIT_REJECT: aaa request rejected as maximum aaa sessions are in progress

Explanation  Aaa request rejected as the limit for maximum concurrent aaa sessions is reached

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-2

Error Message  AAA-2-AAA_NVRAM_UPGRADE_FAILURE: upgrading of accounting log failed. [chars]

Explanation  Upgrading of accounting log failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  AAA-2-AAA_PROGRAM_EXIT: aaa daemon exiting: [chars]

Explanation  Aaa daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-3

Error Message  AAA-3-AAA_NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

AAA-6

Error Message  AAA-6-AAA_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

AAM Messages

This section contains the AAM messages.

AAM-2

Error Message  AAM-2-ELS_FC2_GL_SINDEX_LOOKUP_FAILED: Failed to lookup global port index for interface [[chars]]

Explanation  Failed to lookup global port index for interface [chars]

Recommended Action  No action is required.

AAM-3

Error Message  AAM-3-ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  AAM process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

Error Message  AAM-3-ASSERTION_FAILED: Failed in File:[chars] Line:[dec]

Explanation  AAM Process assertion failed in File:[chars], at line:[dec]

Recommended Action  No action is required.

ACLLOG Messages

This section contains the ACLLOG messages.

ACLLOG-4

Error Message  ACLLOG-4-ACLLOG_MAXFLOW_REACHED: [chars]

Explanation  Max flow reached in current interval: [chars]

Recommended Action  No action is required.

Error Message  ACLLOG-4-ACLLOG_THRESHOLD: [chars]

Explanation  Threshold Reached for Flow: [chars]

Recommended Action  No action is required.

ACLLOG-6

Error Message  ACLLOG-6-ACLLOG_FLOW_INTERVAL: [chars]

Explanation  Flow info in current alert interval: [chars]

Recommended Action  No action is required.

Error Message  ACLLOG-6-ACLLOG_NEW_FLOW: [chars]

Explanation  New Acllog Flow: [chars]

Recommended Action  No action is required.

ACLMGR Messages

This section contains the ACLMGR messages.

ACLMGR-2

Error Message  ACLMGR-2-ACLMGR_L2_REDIRECTED_PORTS: Redirected port(s) are supported on L2 interface type.

Explanation  Redirected port(s) are supported on L2 interface type.

Recommended Action  No action is required.

Error Message  ACLMGR-2-ACLMGR_NO_ERRDISABLED: [chars] event on interface [chars] ([hex]) allowed to succeed in spite of access-list failure

Explanation  Although an access-list operation failed during a port event, the port event still finished successfully because errdisable is disallowed

Recommended Action  No action is required.

Error Message  ACLMGR-2-EXITING: Exit reason: [chars]

Explanation  The ACLMGR service process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  ACLMGR-2-INITFAIL: ACLMGR Service Init failed: [chars]

Explanation  ACLMGR Service initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  ACLMGR-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The ACLMGR service could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  ACLMGR-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The ACLMGR service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

ACLMGR-3

Error Message  ACLMGR-3-ACLMGR_ACL_OWNER_MISMATCH: The ACL [chars] deleted was in use by [chars]. Please check show running-config for more information.

Explanation  ACL that was in use by another feature was deleted

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_COMMIT_FAIL: Commit failed: [chars]

Explanation  The PPF commit failed

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_DB_LOCK_MSG: ACL database message, reason: [chars], session 0x%llx, type: [chars]

Explanation  ACL PPF database lock acquire/release related message.

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_GSYNC_ERROR: Error occured during global sync of ACL runtime database to standby, reason: [chars] , [chars]

Explanation  ACL snapshot to send the copy of runtime database to standby failed

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_PPF_ERROR: PPF error: [chars]

Explanation  The PPF generated error

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The ACLMGR service has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_STAT_CONSOLIDATION_FAILURE: ACL statistic parsing or consolidation failed

Explanation  A statistic update failed during the parsing or consolidation step; statistics may have been lost

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_VACL_REDIRECTION_DISABLED_REMOVAL: VACL redirection to interface [chars] ([hex]) disabled: the port has been removed

Explanation  A VACL redirection to the port has been deactivated because the port has been removed

Recommended Action  No action is required.

Error Message  ACLMGR-3-ACLMGR_VERIFY_FAIL: Verify failed: [chars]

Explanation  The PPF Verify failed

Recommended Action  No action is required.

Error Message  ACLMGR-3-MTSERROR: [chars]

Explanation  ACLMGR Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

ACLMGR-4

Error Message  ACLMGR-4-ACLMGR_PPF_WARNING: PPF warning: [chars]

Explanation  The PPF generated warning

Recommended Action  No action is required.

Error Message  ACLMGR-4-ACLMGR_VACL_REDIRECTION_DISABLED_PCM: VACL redirection to interface [chars] ([hex]) disabled: the port became a portchannel member

Explanation  A VACL redirection to the port has been temporarily deactivated because it is now a member in a port channel

Recommended Action  No action is required.

Error Message  ACLMGR-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the ACLMGR service and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

ACLMGR-6

Error Message  ACLMGR-6-ACLMGR_PPF_NOTIF: PPF notification: [chars]

Explanation  The PPF generated notification

Recommended Action  No action is required.

Error Message  ACLMGR-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The ACLMGR service on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  ACLMGR-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The ACLMGR service became standby from active mode.

Recommended Action  No action is required.

Error Message  ACLMGR-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The ACLMGR service was unable to send heartbeat to the system manger

Recommended Action  No action is required.

Error Message  ACLMGR-6-SERVICE_UP: Initialized [chars]

Explanation  The ACLMGR service is up and ready The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  ACLMGR-6-SRVEXIT: ACLMGR Service shutting down gracefully

Explanation  ACLMGR Service is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  ACLMGR-6-SWITCHOVER: Switching Over to other Sup.

Explanation  The ACLMGR service has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

ACLQOS Messages

This section contains the ACLQOS messages.

ACLQOS-SLOT#-0

Error Message  ACLQOS-SLOT#-0-ACLQOS_SPAN_EGRESS_RATE_LIMIT_MAX: Configuring span-egress rate limit failed. [chars]

Explanation  Failed to configure span-egress rate limit. No free entry available in ERACL TCAM region.

Recommended Action  No DDTS.

ACLQOS-SLOT#-2

Error Message  ACLQOS-SLOT#-2-ACLQOS_BUFFER_DRAIN_FAILURE: Failed to drain buffers while modifying network qos policy on unit:[dec] slice: [dec]!

Explanation  Failed to drain buffers while modifying network qos policy.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_BURST_DETECT_FPGA_INCOMPATIBLE: Current FPGA image doesn't support microburst detection feature. Please upgrade IOFPGA epld image to version [dec].

Explanation  Current FPGA image doesn't support microburst detection feature.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_BURST_DETECT_OVER_THRESHOLD: Interface [chars] queue [dec] queue-depth is over the configured burst threshold. Please check 'show queuing burst-detect detail' for more information.

Explanation  Queue depth went above configured burst threshold.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_FAILED: ACLQOS failure: [chars]

Explanation  ACLQOS operation failed in the aclqos client

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_INBAND_INTERFACE_FAILURE: Inband interface lif lookup failed ([chars])

Explanation  Inband interface lif lookup failed

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_MALLOC_FAILED: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_OOTR: Tcam resource exhausted: [chars]

Explanation  Tcam resources to program acls exhausted

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_QUEUE_LIMIT_IGNORED_ON_FEX: Queue-limit configuration is being allowed but will not be configured on any connected FEXes.

Explanation  Queue-limit configuration is not supported on FEX.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_QUEUE_LIMIT_MAX: Queue limit is restricted to max available buffers([dec] bytes) on unit [dec].

Explanation  Queue limit is restricted to the max available buffers on the unit.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_TCAM_CARVING_FAILURE: [chars] TCAM region carving crossed the allowed max limits. Please re-adjust the limits using "hardware access-list tcam region .." command and reload the linecard

Explanation  [chars] Tcam is excessively provisioned

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_TCAM_REGION_CREATION_FAILURE: TCAM region creation failed for instance: [dec], Group ID: [dec], reason: [chars]

Explanation  [chars] Tcam region is not properly configured

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-ACLQOS_TCAM_TEMPLATE_FAILURE: TCAM template application has failed with reason: [chars]. Failing the module bring up

Explanation  [chars] Tcam template is not properly applied

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-2-PPF_FAILED: Database failure: [chars]

Explanation  Database operation failed in the aclqos client

Recommended Action  No DDTS.

ACLQOS-SLOT#-3

Error Message  ACLQOS-SLOT#-3-ACLQOS_CC_INVALID: Invalid Congestion Control parameters: [chars]

Explanation  Invalid Congestion Control parameters

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-3-ACLQOS_MCM_ERROR: MCM Message Inconsistent. Please collect MCM and ACLMgr Tech Support for all VDCs

Explanation  MCM Message Inconsistent

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-3-ACLQOS_PAUSE_INVALID: Invalid Pause parameters: [chars]

Explanation  Invalid Pause parameters

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-3-ACLQOS_QUEUING_ERROR: ACL/QoS queuing error: [chars]

Explanation  Internal error in ACL/QoS queuing config

Recommended Action  No DDTS.

ACLQOS-SLOT#-4

Error Message  ACLQOS-SLOT#-4-ACLQOS_ANALYTICS_L4OP_UNSUPPORTED: Analytics TCAM doesnt support port-expansion or LOU allocation. Please modify ACL policy and re-apply

Explanation  Analytics TCAM doesnt support port-expansion or LOU allocation. Please modify ACL policy and re-apply

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_ATOMIC_ERR: [chars]

Explanation  Tcam will be overused, please turn off atomic update

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_BC_OVER_THRESHOLD: Bank Chaining enabled: Inst [dec]'s usage has reached its threshold

Explanation  Tcam is almost full

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_FC_WARNING: Found stale FCoE entry in instance [dec]. VSAN: [dec], SID: [hex], DID: [hex], SI:[dec], SI_MASK:[dec], RW_VSAN: [dec], RW_VSAN_FLAG: [dec], RW_SID: [hex], RW_SID_FLAG: [dec], RW_DID: [hex]. RW_DID_FLAG: [dec] Cleaning it up.

Explanation  Found stale FCoE entry in instance [dec]. VSAN: [dec], SID: 0x[hex], DID: 0x[hex], SI:[dec], SI_MASK:[dec], RW_VSAN:[dec], RW_VSAN_FLAG: [dec], RW_SID: 0x[hex], RW_SID_FLAG:[dec], RW_DID: 0x[hex]. RW_DID_FLAG: [dec] Cleaning it up.

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_MATCH_ALL_MERGE_UPDATE: Warning (match_all merging): [chars]

Explanation  Warning (match_all merging)

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_OPENFLOW_DFLT_MISS_UNSUPP: Openflow default-miss action needs [chars] TCAM region to be configured in double-wide mode

Explanation  Openflow default-miss action specified without configuring TCAM in double-wide mode

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_OVER_THRESHOLD: Inst [dec] Tcam [dec] Bank [dec]'s ([chars]) usage has reached its threshold

Explanation  Tcam is almost full

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_QUEUING_COS2Q_INVALID: ACL/QoS invalid queuing policy because of cos map change: [chars] queue [chars], interface [chars]

Explanation  Attemped to configure an invalid queuing policy

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_QUEUING_INVALID: ACL/QoS invalid queuing policy: [chars]

Explanation  Attemped to configure an invalid queuing policy

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_TAP_AGG_REDIR_INVALID: Redirect action invalid without Tap aggregation enable, interface [chars]

Explanation  Redirect action specified without Tap aggregation enable

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_UNDER_THRESHOLD: Tcam [dec] Bank [dec]'s usage is below the threshold now

Explanation  Tcam's usage is below the threshold

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-4-ACLQOS_WARNING: ACLQOS Warning: [chars]

Explanation  ACLQOS Warnings

Recommended Action  No DDTS.

ACLQOS-SLOT#-5

Error Message  ACLQOS-SLOT#-5-ACLQOS_DISRUPTIVE_IPv6_UPDATE: Disruptive update of IPv6 compression entries

Explanation  Disruptive IPv6 compression entries update

Recommended Action  No DDTS.

Error Message  ACLQOS-SLOT#-5-ACLQOS_MAC_SA_DA_OVERLAP_LOG: MAC [chars] overlap for address(mask) [hex][hex]([hex][hex]) with [hex][hex]([hex][hex]) for hardware instance [dec]

Explanation  MAC SA/DA overlaps with already configured value. Overlapping MAC SA/DA matching is not supported on this platform

Recommended Action  No action is required.

Error Message  ACLQOS-SLOT#-5-ACLQOS_NON_ATOMIC: Non atomic ACL/QoS policy update done for [chars]

Explanation  Non atomic ACL/QoS policy update was done

Recommended Action  No DDTS.

ACLTCAM Messages

This section contains the ACLTCAM messages.

ACLTCAM-2

Error Message  ACLTCAM-2-ACL_TCAM_ADJ_EXHAUSTED: ACLTCAM failed to program route for VSAN: [dec], SID: [chars] DID: [chars], error: [chars].

Explanation  ACLTCAM process experienced a failure while programming route for VSAN [dec] SID [chars] DID [chars] due to resource exhaustion. [chars] is the error code.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_ALMOST_FULL: TCAM close to FULL. [chars] TCAM Usage ([dec]/[dec]) exceeded [dec]% fwd-eng: [dec], [chars]

Explanation  [chars] TCAM usage [dec]/[dec] exceeded [dec] percent on fwd-engine [dec], [chars]

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_CONFIG_READ_FROM_DRIVER_FAILED: [chars] [dec], Error: [hex].

Explanation  Unable to read configuration from forwarding engine ASIC driver. [chars] [dec], Error: 0x[hex].

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_CONFIG_WRITE_TO_DRIVER_FAILED: [chars] [dec], Error: [hex].

Explanation  Unable to write configuration to forwarding engine ASIC driver. [chars] [dec], Error: 0x[hex].

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_FLOW_STATS_READ_FAILED: Hardware flow stats read failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec], Error: [chars]).

Explanation  Hardware flow stats read failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec] Error: [chars]).

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INCONSISTENT_DATABASE: Database found inconsistent.

Explanation  Database found inconsistent.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INCONSISTENT_TCAM_CONTENTS: TCAM contents found inconsistent.

Explanation  TCAM contents are found inconsistent.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INIT_FAILED: Initialization failed for forwarding engine ASIC: [dec], [chars] TCAM.

Explanation  Initialization failed for forwarding engine ASIC [dec], in [chars] TCAM.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_INIT_REGIONS_FAILED: Initialization failed for forwarding engine ASIC: [dec], [chars] TCAM, [chars] Region.

Explanation  Initialization of regions failed for forwarding engine ASIC [dec], in [chars] TCAM, for [chars] Region.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_MALLOC_FAILURE: Memory allocation failed for size [dec].

Explanation  Memory allocation is failed for size [dec] bytes.

Recommended Action  Restart the process.

Error Message  ACLTCAM-2-ACL_TCAM_MTS_FAILURE: MTS operation failed: [chars].

Explanation  MTS operation failed. [chars] is the reason.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_MTS_Q_FULL: MTS queue for SAP [dec] is full

Explanation  MTS queue for SAP [dec] is full

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_MTS_REGISTRATION_FAILED: MTS registration failed for opCode: [dec].

Explanation  MTS registration failed for opCode: [dec].

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_NO_ROUTE: ACLTCAM failed to get route for VSAN: [dec], Rewrite: [chars] DID: [chars] DID MASK: [chars], error: [hex].

Explanation  ACLTCAM process experienced a failure while getting route for VSAN [dec] Rewrite [chars] DID [chars] DID Mask [chars]. [hex] is the error code.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_NO_TCAM_LEFT: ACLTCAM resource exhausted for interface : [chars]

Explanation  ACLTCAM hardware resource is completely used.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PHY_TCAM_READ_FAILED: [chars] read from hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec], Error: [chars]).

Explanation  [chars] read from hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec] Error: [chars]).

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PHY_TCAM_READ_INVALID: Invalid([chars], value: [dec]) TCAM entry read from hardware TCAM (FWD-Engine: [dec], [chars] TCAM, Address: [dec]), Ignoring this entry.

Explanation  Invalid([chars], value: [dec]) TCAM entry from hardware TCAM(FWD-Engine: [dec], [chars] TCAM, Address: [dec]) Ignoring this entry

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PHY_TCAM_WRITE_FAILED: [chars] write to hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec], Error: [chars]).

Explanation  [chars] write to hardware TCAM failed(ASIC: [dec], [chars] TCAM, Address: [dec], Num Entries: [dec] Error: [chars]).

Recommended Action  No action is required.

Error Message  ACLTCAM-2-ACL_TCAM_PSS_FAILURE: Failed to do PSS operation: [chars], reason: [hex].

Explanation  Failed to do PSS operation [chars]. [hex] is the reason.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-PSS_OPEN_FAILED: PSS open failed - [hex].

Explanation  Persistent database handle could not obtained for ACLTCAM. [hex] is the error.

Recommended Action  No action is required.

Error Message  ACLTCAM-2-RECONS_FAILED: Reconstruction of TCAM contents failed during upgrade - [hex].

Explanation  During non-disruptive upgrade, the ACLTCAM contents are not properly reconstructed. [hex] is the error.

Recommended Action  No action is required.

ACLTCAM-3

Error Message  ACLTCAM-3-ACL_TCAM_MTS_Q_LEAK: Possible MTS buffer leak for SAP [dec]

Explanation  Possible MTS buffer leak for SAP [dec]

Recommended Action  No action is required.

Error Message  ACLTCAM-3-REGISTER_FAILED: Could not register to MTS opcode [chars] - error [hex].

Explanation  ACLTCAM process could not register to the notifications mentioned by [chars]. [hex] is the error.

Recommended Action  No action is required.

ACLTCAM-4

Error Message  ACLTCAM-4-ACL_TCAM_BELOW_THRESHOLD: [chars] TCAM usage ([dec]/[dec]) fell below [dec]% fwd-eng: [dec], [chars]

Explanation  [chars] TCAM usage [dec]/[dec] fell below [dec] percent on fwd-engine [dec], [chars]

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_BEYOND_THRESHOLD: [chars] TCAM usage ([dec]/[dec]) exceeded [dec]% fwd-eng: [dec], [chars]

Explanation  [chars] TCAM usage [dec]/[dec] exceeded [dec] percent on fwd-engine [dec], [chars]

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_FLOW_COUNTER_INVALIDATED: Flow counter for flow: vsan: [dec], sid: [hex], did: [hex] with statistics: frames = %llu & bytes = %llu was invalidated due to: [chars]

Explanation  ACLTCAM process invalidated the flow counter for flow VSAN [dec] SID [hex] DID [hex] with collected stats of [dec] frames and [dev] bytes was invalidated because of reason [[chars]].

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_FLOW_COUNTER_VALIDATED: Flow counter for flow: vsan: [dec], sid: [hex], did: [hex] is now valid

Explanation  ACLTCAM process validated the flow counter for flow VSAN [dec] SID [hex] DID [hex].

Recommended Action  No action is required.

Error Message  ACLTCAM-4-ACL_TCAM_MTS_Q_HIGH: MTS queue for SAP [dec] is close to full

Explanation  MTS queue for SAP [dec] is close to full

Recommended Action  No action is required.

ACLTCAM-6

Error Message  ACLTCAM-6-ACL_TCAM_STATUS: Status: [chars].

Explanation  ACLTCAM status is reported as: [chars].

Recommended Action  No action is required.

ACL Messages

This section contains the ACL messages.

ACL-2

Error Message  ACL-2-ACL_HA_FAILURE: Failed to do high availability operation: [chars].

Explanation  Failed to do high availability operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_INIT_FAILED: Initialization failed for ACL: [chars], reason: [hex].

Explanation  Initialization failed for ACL due to [chars], reason: [hex].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_LINECARD_STATUS: Status from linecard: [dec], for module: [chars](ID: [dec]), status : [dec], error_id: [hex], catastrophic: [chars], restart count: [dec].

Explanation  Status from linecard: [dec], for module: [chars](ID: [dec]), status : [dec], error_id: [hex], catastrophic: [chars], restart count: [dec].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_MTS_FAILURE: Failed to do MTS operation: [chars].

Explanation  Failed to do MTS operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_MTS_Q_FULL: MTS queue for SAP [dec] is full

Explanation  MTS queue for SAP [dec] is full

Recommended Action  No action is required.

Error Message  ACL-2-ACL_MTS_REGISTRATION_FAILED: MTS options setting to [hex] failed for opCode: [dec].

Explanation  MTS options setting to [hex] failed for opCode: [dec].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_PENDING_MSG_ARR_FULL: ACL Upgrade Pending Messages Array is Full with [dec] messages. Failing the MTS message with Opc: [dec], RR_TOKEN: [hex]

Explanation  ACL Upgrade Pending Messages Array is Full with [dec] messages. Failing the MTS message with Opc: [dec], RR_TOKEN: [hex]

Recommended Action  No action is required.

Error Message  ACL-2-ACL_PSS_FAILURE: Failed to do PSS operation: [chars], reason: [hex].

Explanation  Failed to do PSS operation [chars]. [hex] is the reason.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec].

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version.

Recommended Action  No action is required.

Error Message  ACL-2-ACL_RUNTIME_FAILURE: [chars] [dec], Error: [hex]

Explanation  ACL runtime failure is reported as [chars] [dec], reason: [hex].

Recommended Action  No action is required.

Error Message  ACL-2-ACL_TCAM_FAILURE: Failed to do TCAM operation: [chars].

Explanation  Failed to do TCAM operation. [chars] is the reason.

Recommended Action  No action is required.

ACL-3

Error Message  ACL-3-ACL_MTS_Q_LEAK: Possible MTS buffer leak for SAP [dec]

Explanation  Possible MTS buffer leak for SAP [dec]

Recommended Action  No action is required.

ACL-4

Error Message  ACL-4-ACL_MTS_Q_HIGH: MTS queue for SAP [dec] is close to full

Explanation  MTS queue for SAP [dec] is close to full

Recommended Action  No action is required.

Error Message  ACL-4-ACL_WARNING: [chars] [dec]

Explanation  ACL warning messages is reported as [chars] [dec].

Recommended Action  No action is required.

ACL-5

Error Message  ACL-5-ACL_ADJ_SHARING_STATUS: Successfully completed "[chars]" on Generation 2 linecards.

Explanation  Successfully completed the command \[chars]\ on Generation 2 linecards.

Recommended Action  No action is required.

ACL-6

Error Message  ACL-6-ACL_DIAG_EVENT_STATUS: [chars] [hex].

Explanation  ACL system health management event status is reported as [chars] [hex].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_E_PORT_EVENT_STATUS: [chars] [chars].

Explanation  ACL xEport event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_FCC_EVENT_STATUS: [chars] [chars].

Explanation  ACL FCC event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_LINECARD_EVENT_STATUS: [chars] [hex].

Explanation  ACL linecard event status is reported as [chars] [dec].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_MCAST_EVENT_STATUS: [chars] [chars].

Explanation  ACL multicast event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_NX_PORT_EVENT_STATUS: [chars] [chars].

Explanation  ACL Nx Port event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_PORT_MODE_EVENT_STATUS: [chars] [chars].

Explanation  ACL portmode event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_RUNTIME_STATUS: [chars] [dec]

Explanation  ACL runtime status is reported as [chars] [dec].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_DEST_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN destination config event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_SPAN_SRC_CONFIG_STATUS: [chars] [chars].

Explanation  ACL SPAN source config event status is reported as [chars] [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_STATUS: ACL Status: [chars].

Explanation  ACL status is reported as [chars].

Recommended Action  No action is required.

Error Message  ACL-6-ACL_UPDATE_SSRAM_QOS_EVENT_STATUS: [chars] [chars].

Explanation  ACL update SSRAM for QoS event status is reported as [chars] [chars].

Recommended Action  No action is required.

AFM Messages

This section contains the AFM messages.

AFM-2

Error Message  AFM-2-AFM_DHCP_NAT_NOT_SUPPORTED: DHCP and NAT cant be supported

Explanation  DHCP and NAT can not be supported together

Recommended Action  No action is required.

Error Message  AFM-2-AFM_DHCP_RACL_NOT_SUPPORTED: RACL and DHCP cant be supported

Explanation  RACL and NAT cannot be supported together

Recommended Action  No action is required.

Error Message  AFM-2-AFM_MCAST_NAT_TABLE_FULL: Unable to find free Nat table entry for programming multicast nat entries

Explanation  Unable to find free Nat table entry for programming multicast nat entries

Recommended Action  No action is required.

Error Message  AFM-2-AFM_MCAST_NAT_TCAM_FULL: Unable to find free tcam index for programming multicast nat entries

Explanation  Unable to find free tcam index for programming multicast nat entries

Recommended Action  No action is required.

Error Message  AFM-2-AFM_TCAM_LOU_FULL: All the LOU are used, entries will get expanded

Explanation  All the LOUS in hardware are used

Recommended Action  No action is required.

Error Message  AFM-2-AFM_TCAM_UTIL_ABOVE_THRESHOLD: [chars] tcam utilization has [chars] the threshold of [dec]% on ASIC id [dec]

Explanation  Particular TCAM utilization has gone above the configured threshold

Recommended Action  No action is required.

Error Message  AFM-2-AFM_TCAM_UTIL_BELOW_THRESHOLD: [chars] tcam utilization has come below the threshold of [dec]% on ASIC id [dec]

Explanation  Particular TCAM utilization has come below the configured threshold

Recommended Action  No action is required.

Error Message  AFM-2-AFM_TCAM_VPC_REDIRECT_ACL_FULL: Unable to find free TCAM entry for programming vPC redirect ACLs

Explanation  Unable to find free TCAM entry for programming vPC redirect ACLs

Recommended Action  No action is required.

AFM-3

Error Message  AFM-3-AFM_ACLLOG_NOT_SUPPORTED: ACL logging is not supported for [chars] on this hardware platform. Only [chars] supported.

Explanation  ACL logging is not supported for this type of ACL on this hardware platform.

Recommended Action  No action is required.

Error Message  AFM-3-AFM_ACL_ENTRIES_NOT_CONFIGURED: Afm - A required TCAM not carved [chars]

Explanation  TCAM entries not programmed

Recommended Action  No action is required.

Error Message  AFM-3-AFM_VERIFY_FAIL: Access control (ACL) policy modification [chars] failed. Configuration changes required to restore functionality.

Explanation  Access control policy change on interface or vlan failed

Recommended Action  No action is required.

AFM-4

Error Message  AFM-4-AFM_MAC_SA_DA_OVERLAP_LOG: MAC [chars] overlap for address(mask) [hex][hex]([hex][hex]) with [hex][hex]([hex][hex]) for hardware instance [dec]

Explanation  MAC SA/DA overlaps with already configured value. Overlapping MAC SA/DA matching is not supported on this platform

Recommended Action  No action is required.

Error Message  AFM-4-AFM_TCAM_THRESHOLD_LOG: TCAM usage is more than [dec] percent for [chars]

Explanation  TCAM usage in the given regions has exceeded the threshold.

Recommended Action  No action is required.

AFM-6

Error Message  AFM-6-AFM_STAT_FETCH_FAILED: Afm statistics fetch failed

Explanation  Afm statistics fetch failed

Recommended Action  No action is required.

AMM Messages

This section contains the AMM messages.

AMM-SLOT#-0

Error Message  AMM-SLOT#-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  AMM failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  AMM-SLOT#-0-TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  AMM failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

AMM-SLOT#-2

Error Message  AMM-SLOT#-2-AMM_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  AMM-SLOT#-2-AMM_RECOVERY_ERROR: Error in Recovery: [chars]

Explanation  AMM failed to recover after a re-start. This is a fatal error.

Recommended Action  No action is required.

AMM-SLOT#-6

Error Message  AMM-SLOT#-6-INITIALIZED: Internal state created [chars]

Explanation  AMM has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

ASCII-CFG Messages

This section contains the ASCII-CFG messages.

ASCII-CFG-2

Error Message  ASCII-CFG-2-ACFG_CONFIGURATION_APPLY_ERROR: Error encountered while Ascii configuration was being applied. Please use "show startup-config log" to view details

Explanation  At least one command failed while Ascii configuration was being applied

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_LIB_INVOKE_ERR: Ascii config library invocation error: [chars]

Explanation  Error encountered while library function was being invoked to display Ascii configuration

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_OPER_FAIL: Operation failed because of [chars]

Explanation  Operation failed

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_ROLLBACK_FAILED: Rollback to checkpoint [chars] Failed, Going to undo the changes (atomic option)

Explanation  Rollback operation failed for atomic option

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_ROLLBACK_UNDO_FAILED: Undo failed for atomic Rollback, Please correct the error manually and retry rollback

Explanation  Undoing the rollback changes (for atomic behavior) Failed

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-ACFG_SYSLOG_INIT_FAILED: Ascii config Syslog Init Error

Explanation  Error encountered while Initializing Syslog for Ascii Config

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CONFIG_REPLAY_STATUS: [chars] Replay [chars].

Explanation  Bootstrap or Ascii Configuration Replay Status info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-CONF_CONTROL: [chars]

Explanation  Configuration restore control info.

Recommended Action  No action is required.

Error Message  ASCII-CFG-2-PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec]

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  ASCII-CFG-2-SYSERR_ACFG_NO_STARTUP_CFG_FILE: [chars]

Explanation  Startup configuration file is empty

Recommended Action  No action is required.

ASCII-CFG-3

Error Message  ASCII-CFG-3-ACFG_MTSERROR: [chars]

Explanation  Ascii-cfg-server (rollback process) encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

ASCII-CFG-6

Error Message  ASCII-CFG-6-ACFG_CHECKPOINT_CLEAR_DATABASE: cleared all the configuration checkpoints

Explanation  Cleared all the configuration checkpoints

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_CHECKPOINT_CREATED: Created configuration checkpoint [chars]

Explanation  Created configuration checkpoint

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_CHECKPOINT_DELETED: Deleted configuration checkpoint [chars]

Explanation  Deleted configuration checkpoint

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_MAX_CHECKPOINTS: Maximum no of checpoints reached, Removing the oldest checkpoint

Explanation  Maximum no.of checkpoints reached, removing the oldest checkpoint

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_ROLLBACK_ATOMIC: Performing configuration rollback to checkpoint [chars] (with atomic option)

Explanation  Performing configuration rollback with atomic option

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_ROLLBACK_BEST: Performing configuration rollback to checkpoint [chars] (with best-effort option)

Explanation  Performing configuration rollback with best-effort option

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-ACFG_ROLLBACK_FIRST_ERR: Performing configuration rollback to checkpoint [chars] (with stop-at-first failure option)

Explanation  Performing configuration rollback with stop-at-first-failure option

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-INFORMATION: [chars]

Explanation  An event happend that affects Acfg-Rollback. [chars] indicates the event

Recommended Action  No action is required.

Error Message  ASCII-CFG-6-PSS_ERR: [chars]

Explanation  An error occurred during an Acfg PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ASSOC_MGR Messages

This section contains the ASSOC_MGR messages.

ASSOC_MGR-0

Error Message  ASSOC_MGR-0-EMERGENCY_MSG: [chars]

Explanation  Association Manager Emergency Message

Recommended Action  Please file the bug for Association Manager Component thro' CDETS

ASSOC_MGR-1

Error Message  ASSOC_MGR-1-ALERT_MSG: [chars]

Explanation  Association Manager Alert Message

Recommended Action  Association Manager Internal Operation Alert

ASSOC_MGR-2

Error Message  ASSOC_MGR-2-CRITICAL_MSG: [chars]

Explanation  Association Manager Critical Message

Recommended Action  No action is required.

ASSOC_MGR-3

Error Message  ASSOC_MGR-3-ERROR_MSG: [chars]

Explanation  Association Manager Error Message

Recommended Action  No action is required.

ASSOC_MGR-4

Error Message  ASSOC_MGR-4-WARN_MSG: [chars]

Explanation  Association Manager Warning Message

Recommended Action  No action is required.

ASSOC_MGR-5

Error Message  ASSOC_MGR-5-NOTIF_MSG: [chars]

Explanation  Association Manager Notification Message

Recommended Action  No action is required.

ASSOC_MGR-6

Error Message  ASSOC_MGR-6-ASSOC_ACTIVATED: Association Activated for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Activated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_CREATED: Association Created for vlan id:[dec] <--> vsan id:[dec]

Explanation  Association Created

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DEACTIVATED: Association Deactivated for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deactivated

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_DELETED: Association Deleted for vlan id: [dec] <--> vsan id: [dec]

Explanation  Association Deleted

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATEFULL_RESTART: Association Manager Statefull Restart

Explanation  Association Manager Stateful Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_MGR_STATELESS_RESTART: Association Manager Stateless Restart

Explanation  Association Manager Stateless Restart

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-ASSOC_OPER_STATUS_CHG: Association status for vlan id: [dec] <--> vsan id: [dec] changed from [chars] to [chars]

Explanation  Association Operational State Change

Recommended Action  No action is required.

Error Message  ASSOC_MGR-6-INFO_MSG: [chars]

Explanation  ASSOC Manager Informational Message

Recommended Action  No action is required.

ASSOC_MGR-7

Error Message  ASSOC_MGR-7-DEBUG_MSG: [chars]

Explanation  Association Manager Debug Message

Recommended Action  No action is required.

BFDC Messages

This section contains the BFDC messages.

BFDC-SLOT#-2

Error Message  BFDC-SLOT#-2-BFDC_GENERAL_FAILURE: General failure. [chars]

Explanation  General failure. This is a critical failure

Recommended Action  No DDTS.

Error Message  BFDC-SLOT#-2-BFDC_MALLOC_FAILED: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No DDTS.

Error Message  BFDC-SLOT#-2-BFDC_MTS_FAILURE: MTS failure. [chars]

Explanation  MTS related failure. This is a critical failure

Recommended Action  No DDTS.

BFD Messages

This section contains the BFD messages.

BFD-3

Error Message  BFD-3-REACHED_CAPACITY_LIMIT: BFD session [chars] creation on interface [chars] failed due to capacity limit [dec]

Explanation  BFD session [chars] creation on interface [chars] failed due to current capacity limit [dec]

Recommended Action  Please remove current bfd sessions to make room for new ones

Error Message  BFD-3-SESSION_ACL_INSTALL_GAVE_UP: BFD session [chars] installation failed due to ACL installation failure interface [chars]

Explanation  BFD session [chars] installation failed due to ACL installation failure interface [chars

Recommended Action  Maximum acl install retries exceeded. Please to free up acl resources

Error Message  BFD-3-SESSION_ACL_REMOVE_GAVE_UP: BFD session [chars] removal failed due to ACL removal failure interface [chars]

Explanation  BFD session [chars] removal failed due to ACL removal failure interface [chars

Recommended Action  Maximum acl removal retries exceeded. Please manually remove bfd sessions

Error Message  BFD-3-SESSION_CREATE_FAIL: Failed to create BFD session to neighbor [chars] over intertface [chars]. Reason [chars]

Explanation  Failed to create BFD session to neighbor [chars] over intertface [chars] Reason [chars]

Recommended Action  SYSLOGDPC_NO_ACTION

BFD-4

Error Message  BFD-4-INVALID_NBR: Attempt to BFD session failed for application [chars].

Explanation  Attempt to BFD session failed for application [chars].

Recommended Action  No action is required.

Error Message  BFD-4-SESSION_DELETE_FAIL: Attempt to delete BFD session for neighbor [chars] failed: Reason [chars] ([hex]).

Explanation  Attempt to delete BFD session for neighbor [chars] failed: Reason [chars] (0x[hex]).

Recommended Action  No action is required.

BFD-5

Error Message  BFD-5-BFD_DISABLED: BFD Disabled

Explanation  BFD Service Disabled

Recommended Action  No action is required.

Error Message  BFD-5-BFD_ENABLED: BFD Enabled

Explanation  BFD Service enabled

Recommended Action  No action is required.

Error Message  BFD-5-SESSION_CREATED: BFD session to neighbor [chars] on interface [chars] has been created

Explanation  BFD session to neighbor [chars] on interface [chars]

Recommended Action  No action is required.

Error Message  BFD-5-SESSION_LOCAL_PARAMS_CHANGE: Local parameter of BFD session [hex] has changed [chars]

Explanation  Local parameter of BFD session 0x[hex] has changed [chars]

Recommended Action  No action is required.

Error Message  BFD-5-SESSION_MOVED: BFD session [hex]: [chars]

Explanation  BFD session 0x[hex]: [chars]

Recommended Action  No action is required.

Error Message  BFD-5-SESSION_NO_RESOURCES: No resource for session to neighbor [chars] on interface [chars]

Explanation  The BFD session can not be created or modified due to lack of resources. No resources for session to neighbor [chars]

Recommended Action  Remove other BFD sessions to free resources for this session

Error Message  BFD-5-SESSION_REMOVED: BFD session to neighbor [chars] on interface [chars] has been removed

Explanation  BFD session to neighbor [chars] on interface [chars]

Recommended Action  No action is required.

Error Message  BFD-5-SESSION_STATE_DOWN: BFD session [chars] to neighbor [chars] on interface [chars] has gone down. Reason: [chars].

Explanation  BFD session [chars] to neighbor [chars] on interface [chars] has gone down. Reason: [chars]. This may be as a result of the forwarding path being down.

Recommended Action  No action is required.

Error Message  BFD-5-SESSION_STATE_UP: BFD session [chars] to neighbor [chars] on interface [chars] is up.

Explanation  BFD session [chars] to neighbor [chars] on interface [chars] is up.

Recommended Action  No action is required.

BFD-6

Error Message  BFD-6-SESSION_ACL_INSTALL_FAILED: BFD session [chars] failed due to missing ACL resources for interface [chars]

Explanation  BFD session [chars] failed due to missing ACL resources for interface [chars]

Recommended Action  No action is required.

Error Message  BFD-6-SESSION_ACL_REMOVE_FAILED: BFD session [chars] removal failed due to missing ACL resources for interface [chars]

Explanation  BFD session [chars] removal failed due to missing ACL resources for interface [chars]

Recommended Action  No action is required.

Error Message  BFD-6-SESSION_ACTIVE_PARAMS_CHANGE: Local parameter of BFD session [hex] has changed [chars]

Explanation  Local parameter of BFD session 0x[hex] has changed [chars]

Recommended Action  No action is required.

BIOS_DAEMON Messages

This section contains the BIOS_DAEMON messages.

BIOS_DAEMON-2

Error Message  BIOS_DAEMON-2-BIOS_DAEMON_FLASH_WARNING: Flash chip not supported by running image. Skipping bios upgrade.

Explanation  BIOS CHIP NOT SUPPORTED

Recommended Action  No action is required.

Error Message  BIOS_DAEMON-2-BIOS_DAEMON_PRI_BOOT_FAIL: System booted from Alternate BIOS Flash

Explanation  Boot from Alternate

Recommended Action  SYSLOGDOC_NOACTION

Error Message  BIOS_DAEMON-2-BIOS_DAEMON_SUP_ERROR: BIOS Sector ([dec]) is write protected

Explanation  BIOS WRITE PROTECTED

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

BIOS_DAEMON-5

Error Message  BIOS_DAEMON-5-BIOS_DAEMON_PRI_BOOT: System booted from Primary BIOS Flash

Explanation  Boot from Primary

Recommended Action  SYSLOGDOC_NOACTION

BIOS_DAEMON-SLOT#-2

Error Message  BIOS_DAEMON-SLOT#-2-BIOS_DAEMON_LC_ERROR: BIOS Sector ([dec]) is write protected

Explanation  BIOS WRITE PROTECTED

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  BIOS_DAEMON-SLOT#-2-BIOS_DAEMON_LC_PRI_BOOT_FAIL: System booted from Alternate BIOS Flash

Explanation  Boot from Alternate

Recommended Action  SYSLOGDOC_NOACTION

BIOS_DAEMON-SLOT#-5

Error Message  BIOS_DAEMON-SLOT#-5-BIOS_DAEMON_LC_PRI_BOOT: System booted from Primary BIOS Flash

Explanation  Boot from Primary

Recommended Action  SYSLOGDOC_NOACTION

BLOGGERD Messages

This section contains the BLOGGERD messages.

BLOGGERD-2

Error Message  BLOGGERD-2-BLOGGERD_SYSLOG_TRANSFER_ERROR_DISABLED: [chars]

Explanation  Blogger Log Transfer has been error disabled

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BLOGGERD-3

Error Message  BLOGGERD-3-BLOGGERD_INVALID_VDC: At [chars]([dec]) Invalid VDC [dec]

Explanation  Invalid VDC ID

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_LOG_DUMP_THROTTLED: VDC [dec] Comp: [chars] Buf_uuid: [dec] Buf_inst: [dec] sap: [chars]. Please collect 'show system internal sdwrap buffers sap [dec] detailed' from module [dec] Wiki: https://and-sw-web.cisco.com/twiki/bin/view/Sw/LogDumpThrottle

Explanation  Log Dump Throttled

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_MOVE_LOGS_SCRIPT_NOT_FOUND: At [chars]([dec]) Move Logs Script Not Found at [chars]

Explanation  Move Log Script Not Found

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_PATH_NOT_FOUND: At [chars]([dec]) Path [chars] NOT found

Explanation  Required Path Not Found

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_CONFIG_PULL_FAILED: At [chars]([dec]) Config Pull Failed. Returned [hex]([chars])

Explanation  Blogger Config Pull Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_MTS_BIND_FAILED: MTS Bind Failed

Explanation  MTS Bind Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_MTS_UNDROP: MTS is not dropped by Node [hex] SAP [dec]

Explanation  MTS not dropped

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_PSS_FAILURE: At [chars]([dec]) Internal PSS Error. Returned: [hex]([chars])

Explanation  PSS Operation Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_SDWRAP_INIT_FAILED: At [chars]([dec]) sdwrap initialization failed. Returned: [hex]([chars])

Explanation  SDWrap Debug Init failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-3-BLOGGERD_SYSLOG_THREAD_CREATE_FAILED: At [chars]([dec]) Thread Creation Failed [hex] errno: [dec]([chars])

Explanation  Thread Creation Failed

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BLOGGERD-4

Error Message  BLOGGERD-4-BLOGGERD_FLOW_CONTROL_ENABLED: Temporarily suspending BloggerD Log Transfer from Modules due to lack of space (available: %ld MB) on Active SUP

Explanation  Flow Control Enabled. Transfer from Modules temporarily suspended

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

Error Message  BLOGGERD-4-BLOGGERD_FLOW_CONTROL_RESET: Revoking temporary Log Transfer Suspension from Modules. Space available now: %ld MB

Explanation  Flow Control Reset. Transfer from Modules re-enabled

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BLOGGERD-6

Error Message  BLOGGERD-6-BLOGGERD_INFO: [chars]

Explanation  Info

Recommended Action  Please collect BloggerD tech support using 'show tech bloggerd-all'

BOOTUP_TEST Messages

This section contains the BOOTUP_TEST messages.

BOOTUP_TEST-2

Error Message  BOOTUP_TEST-2-EOBC_FAIL: Module [dec] has failed test [chars] on EOBC due to error [chars]

Explanation  Online diagnostics EOBC test has failed

Recommended Action  No action is required.

Error Message  BOOTUP_TEST-2-EOBC_SKIP: Module [dec] has failed test [chars] on EOBC due to error [chars]

Explanation  Online diagnostics ManagementPort test has failed

Recommended Action  No action is required.

Error Message  BOOTUP_TEST-2-MGMT_PORT_FAIL: Module [dec] has failed test [chars] on Management Port due to error [chars]

Explanation  Online diagnostics ManagementPort test has failed

Recommended Action  No action is required.

Error Message  BOOTUP_TEST-2-MGMT_PORT_SKIP: Module [dec] has skipped test [chars] on Management Port due to error [chars]

Explanation  Online diagnostics ManagementPort test is skipped

Recommended Action  No action is required.

BOOTVAR Messages

This section contains the BOOTVAR messages.

BOOTVAR-2

Error Message  BOOTVAR-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate memory.

Recommended Action  Check if the system is low on memory, if so reset the switch.

Error Message  BOOTVAR-2-AUTOCOPY_FAILED: Autocopy of file [chars] to standby failed. [chars] (Error-id: [hex])

Explanation  The image deemed to be copied to standby via the auto-copy feature failed.

Recommended Action  Check error id for specified reason.

Error Message  BOOTVAR-2-AUTOSYNC_FAILED: Image autosync failed. Reason: [chars] ([hex])

Explanation  Image synchronization failed.

Recommended Action  Check that there is enough space on the flash, as well as system high availability status.

Error Message  BOOTVAR-2-CONFIG_ERROR: Failed to update boot configuration

Explanation  An error has occurred during the update of the boot configuration files

Recommended Action  Check that there is enough space on the flash, show boot to check the configured image names, show loader internal configuration to compare them with the current bootloader configuration, if they are not coherent do write erase and retry to save the configuration.

Error Message  BOOTVAR-2-IMAGE_NOT_COMPATIBLE: Warning: image [chars] is not compatible with the current platform in SUP [dec]

Explanation  The input image name is not compatible with the current platform.

Recommended Action  Make sure a right image is specified before reboot.

BOOTVAR-3

Error Message  BOOTVAR-3-AUTOCOPY_FAILED_STANDBY_FULL: Autocopy of file [chars] to standby failed due to not enough disk space on standby

Explanation  There is not enough disk space on the standby for the file to be copied.

Recommended Action  Clear space on the standby disk.

Error Message  BOOTVAR-3-INIT_FAILED: Initialization failed: Component [chars]

Explanation  The service failed to start The failure occurs during initialization of the component [chars].

Recommended Action  Show processes to check the status of the other processes, pay attention to the specified component.

Error Message  BOOTVAR-3-LOAD_VERIFY_LIB_FAILED: Fetching library [chars] failed, reason=[chars]

Explanation  Failed to load bootvar specified verification library.

Recommended Action  No action is required.

Error Message  BOOTVAR-3-MODULE_LOCK_FAIL: Unable to get module lock, please don't reload

Explanation  Unable to acquire modlock to prevent user to reload during auto-sync.

Recommended Action  No action is required.

Error Message  BOOTVAR-3-NEIGHBOR_REJECT_AUTOCOPY: auto-copy failed - not supported by neighbor supervisor.

Explanation  Standby supervisor does not support auto-copy, thus failed.

Recommended Action  No action is required.

Error Message  BOOTVAR-3-VERIFY_FAILED: Image [chars] for bootvar [chars] verification failed, reason=[chars]

Explanation  The image set for this bootvar has failed the verification process, this is just a warning.

Recommended Action  Check reason to determine actions.

BOOTVAR-5

Error Message  BOOTVAR-5-AUTOCOPY_SUCCEED: auto-copy of file [chars] to standby supervisor succeed

Explanation  Auto copy of the file succeed, image integrity verified by standby.

Recommended Action  No action is required.

Error Message  BOOTVAR-5-AUTOCOPY_VERIFY_SEND_FAILED: Unable to ask standby to verify file [chars], error = [hex]

Explanation  Upon copied the image to standby, failed to send message to ask standby to verify integrity.

Recommended Action  Turn auto-copy off and back on.

Error Message  BOOTVAR-5-AUTOSYNC_DONE: Image autosync done

Explanation  The image synchronization done successfully.

Recommended Action  No action is required.

Error Message  BOOTVAR-5-AUTOSYNC_REBOOT: Rebooting standby after successful autosync

Explanation  Image autosync has been successful, resetting the standby supervisor to load the new image.

Recommended Action  Check that the standby sup reloads correctly.

Error Message  BOOTVAR-5-AUTOSYNC_START: Starting image autosync. Please wait until completion...

Explanation  The standby-sup has requested the sync of the current image.

Recommended Action  No action is required.

Error Message  BOOTVAR-5-IMAGE_NOTEXISTS_ACTIVE: Warning: image [chars] doesn't exist on active sup

Explanation  The input image name doesn't exist on the active supervisor.

Recommended Action  Check whether the input image name you entered exists and make sure that you have the image on the flash before reboot.

Error Message  BOOTVAR-5-IMAGE_NOTEXISTS: Warning: image [chars] doesn't exist on sup[dec]

Explanation  The input image name doesn't exist on the specified supervisor.

Recommended Action  Check whether the input image name you entered exists and make sure that you have the image on the flash before reboot.

Error Message  BOOTVAR-5-INVALID_NXOS_IMAGE: Warning: This is not a valid NXOS image

Explanation  This is not a valid NXOS image

Recommended Action  Check whether the input image name you entered is valid NXOS image

Error Message  BOOTVAR-5-NEIGHBOR_UPDATE_AUTOCOPY: auto-copy supported by neighbor supervisor, starting...

Explanation  Info log reporting standby's support of auto-copy. Auto-copy is being started.

Recommended Action  No action is required.

BOOTVAR-6

Error Message  BOOTVAR-6-ALREADY_IN_SYNC: Image already in sync

Explanation  No need to update the image on the standby-sup.

Recommended Action  No action is required.

Error Message  BOOTVAR-6-AUTOCOPY_DID_NOT_START: Autocopy of file [chars] to standby did not start. [chars] (Error-id: [hex])

Explanation  Autocopy of the file did not start as the remote copy location does not exist

Recommended Action  No action is required.

Error Message  BOOTVAR-6-CONFIG_UPDATED: Boot configuration updated

Explanation  The boot-loader configuration files have been successfully updated.

Recommended Action  No action is required.

Error Message  BOOTVAR-6-STARTING: Boot configuration initialized

Explanation  The service has successfully started.

Recommended Action  No action is required.

CALLHOME Messages

This section contains the CALLHOME messages.

CALLHOME-2

Error Message  CALLHOME-2-EVENT: [chars]

Explanation  Callhome event [chars] occurred.

Recommended Action  If you have configured your email address to receive callhome notifications, please check your email for more details about this callhome event. If callhome was not enabled, please execute CLI commands relevant to the callhome event to get more information about the error

Error Message  CALLHOME-2-PROGRAM_EXIT: callhome process ending: [chars]

Explanation  Callhome process is exiting with reason [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CALLHOME-3

Error Message  CALLHOME-3-CALLHOME_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CALLHOME-3-CALLHOME_MAX_ALERT_MSG: [chars]

Explanation  [chars]

Recommended Action  Please check the reason for the generation of the callhome messages and rectify the problem

Error Message  CALLHOME-3-EVENT_PROCESS_ERROR: error in processing callhome event [chars] reason:[chars]

Explanation  Error in processing callhome event [chars] reason:[chars]

Recommended Action  Please check your callhome configuration for proper configuration. Please check SMTP server address, email addresses for destination profiles and enable status of callhome. Use "show callhome" commands for displaying configuration.

Error Message  CALLHOME-3-MESSAGE_SIZE_EXCEED: message size for callhome alert:[chars] exceeds maximum limit for destination profile:[chars]

Explanation  Message size for callhome alert:[chars] exceeds maximum limit for destination profile:[chars]

Recommended Action  Please check the maximum message size for the destination profile under question. Increase it if possible to match the maximum limit allowed by your email destinations.

CALLHOME-6

Error Message  CALLHOME-6-NONCRIT_EVENT: [chars]

Explanation  Non-critical Callhome event [chars] occurred.

Recommended Action  If you have configured your email address to receive callhome notifications, please check your email for more details about this callhome event. If callhome was not enabled, please execute CLI commands relevant to the callhome event to get more information about the error

CARDCLIENT Messages

This section contains the CARDCLIENT messages.

CARDCLIENT-2

Error Message  CARDCLIENT-2-CARDCL_CRIT: [chars]

Explanation  CardClient Critical Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-2-FPGA_BOOT_GOLDEN: [chars] booted from Golden

Explanation  CardClient fpga boot status

Recommended Action  No action is required.

Error Message  CARDCLIENT-2-FPGA_BOOT_PRIMARY: [chars] booted from Primary

Explanation  CardClient fpga boot status

Recommended Action  No action is required.

Error Message  CARDCLIENT-2-FPGA_BOOT_STATUS: Unable to retrieve [chars] boot status

Explanation  CardClient fpga boot status

Recommended Action  No action is required.

Error Message  CARDCLIENT-2-ONL: [chars]

Explanation  Online Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-2-REG: [chars]

Explanation  CardClient Console Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-2-SSE: [chars]

Explanation  CardClient Console Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CARDCLIENT-3

Error Message  CARDCLIENT-3-CARDCL_ERR: [chars]

Explanation  CardClient Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-3-CARDCL_INFO: [chars]

Explanation  CardClient Flow Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CARDCLIENT-SLOT#-2

Error Message  CARDCLIENT-SLOT#-2-ERR: [chars]

Explanation  CardClient Remote Syslog msg

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CARDCLIENT-SLOT#-2-IMG_ERR: [chars]

Explanation  CardClient Remote Syslog msg

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CDP Messages

This section contains the CDP messages.

CDP-2

Error Message  CDP-2-INITFAIL: CDP Daemon Initialization failed: [chars]

Explanation  CDP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

CDP-3

Error Message  CDP-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  CDP Daemon is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  CDP-3-GENERROR: [chars]

Explanation  CDP Daemon encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CDP-3-MCASTBINDFAIL: Failed to bind for CDP multicast address on interface [hex] - [chars]

Explanation  An attempt to register for packets destined to the CDP multicast address failed. [dec] identifies the interface [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-3-MTSERROR: [chars]

Explanation  CDP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  CDP-3-PKTRECVFAIL: Failed to receive packet - [chars]

Explanation  Failed to receive packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-3-PKTSENDFAIL: Failed to send packet, interface [hex] - [chars]

Explanation  Failed to send packet. [dec] identifies the interface [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-3-PSSERROR: [chars]

Explanation  CDP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  CDP-3-SOCKBINDFAIL: Failed to bind to raw socket, interface [hex] - [chars]

Explanation  Failed to bind to raw socket. [dec] identifies the interface [char] identifies the reason.

Recommended Action  No action is required.

Error Message  CDP-3-SOCKOPENFAIL: Failed to open socket for receiving raw 802_2 packets - [chars]

Explanation  An attempt to open a socket for receiving raw 802_2 packets failed. [char] identifies the reason.

Recommended Action  No action is required.

CDP-4

Error Message  CDP-4-CDP_PDU_PAYLOAD_TOO_BIG: CDP PDU payload len is too big over [dec], if_index:[hex], payload_len:[dec](ext_hdr:[dec])

Explanation  CDP PDU payload len is too big This is a warning message.

Recommended Action  No action is required.

Error Message  CDP-4-DUPLEX_MISMATCH: Duplex mismatch discovered on [chars], with [chars]

Explanation  Duplex mismatch discovered from the received cdp packet This is a warning message.

Recommended Action  No action is required.

Error Message  CDP-4-NATIVE_VLAN_MISMATCH: Native VLAN mismatch discovered on [chars]([dec]), with [chars]([dec])

Explanation  Native VLAN mismatch discovered This is a warning message.

Recommended Action  No action is required.

CDP-5

Error Message  CDP-5-DISABLED: CDP is disabled

Explanation  CDP is disabled on the device.

Recommended Action  No action is required.

Error Message  CDP-5-ENABLED: CDP is enabled

Explanation  CDP is enabled on the device.

Recommended Action  No action is required.

Error Message  CDP-5-NEIGHBOR_ADDED: Device [chars] discovered of type [chars] with port [chars] on incoming port [chars] with ip addr [chars] and mgmt ip [chars]

Explanation  Discovered a neighbor device. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-5-NEIGHBOR_REMOVED: CDP Neighbor [chars] on port [chars] has been removed

Explanation  Deleted a neighbor device. This is an informational message.

Recommended Action  No action is required.

CDP-6

Error Message  CDP-6-CDPDUP: CDP Daemon Up.

Explanation  CDP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-CDPEXIT: CDP Daemon shutting down gracefully.

Explanation  CDP Daemon is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDISABLE: CDP disabled on port [chars]

Explanation  CDP was disabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTDOWN: A CDP enabled port [chars] went down.

Explanation  A CDP enabled port became un-operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTENABLE: CDP enabled on port [chars]

Explanation  CDP was enabled on a given port. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

Error Message  CDP-6-PORTUP: A CDP enabled port [chars] came up.

Explanation  A CDP enabled port became operational. [chars] is the interface-ID string that identifies the port. This is an informational message.

Recommended Action  No action is required.

CERT_ENROLL Messages

This section contains the CERT_ENROLL messages.

CERT_ENROLL-2

Error Message  CERT_ENROLL-2-CERT_EN_PROGRAM_EXIT: cert_enroll daemon exiting: [chars]

Explanation  Cert_enroll daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CERT_ENROLL-3

Error Message  CERT_ENROLL-3-CERT_EN_ERROR_MESSAGE: [chars]

Explanation  CERT_ENROLL Error Message

Recommended Action  No action is required.

Error Message  CERT_ENROLL-3-CERT_EN_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

CERT_ENROLL-6

Error Message  CERT_ENROLL-6-CERT_EN_MESSAGE: [chars]

Explanation  CERT_ENROLL Message

Recommended Action  No action is required.

CFS Messages

This section contains the CFS messages.

CFS-2

Error Message  CFS-2-CFS_REJECT: CFS reject: [chars]: Switch WWN [chars], ip [chars], reason [chars]

Explanation  CFS reject: [chars] Switch WWN [chars], ip [chars], reason [chars]

Recommended Action  No action is required.

Error Message  CFS-2-EXITING: Exit reason: [chars]

Explanation  The CFS service process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  CFS-2-GENERAL_ERROR: [chars]

Explanation  The CFS service has encountered an critical error. The description of error is [str.]

Recommended Action  No action is required.

Error Message  CFS-2-INITFAIL: CFS Service Init failed: [chars]

Explanation  CFS Service initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  CFS-2-LOCK_FAILED: lock failed for sap [dec] due to internal error.

Explanation  Lock failed due to Unrestricted uncoordinated count is out of sync for sap [dec]

Recommended Action  To recover from this state run command 'cfs internal decrement-unrestricted '

Error Message  CFS-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The CFS service could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CFS-2-MTS_REJECT: Verification failed reject MTS message SAP [dec]:RR-token [hex]

Explanation  This MTS message could have been posted by the previous active running pre 3.x; MTS structure has changed since then hence ignore the MTS message, Source SAP [dec]; RR-token [hex]

Recommended Action  No action is required.

Error Message  CFS-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The CFS service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  CFS-2-VDC_MGR_FAIL: Failed to get a valid switch mac from VDC Manager: [chars]

Explanation  VDC manager did not respond with a proper MAC address. It could have been because of a timeout in MTS received

Recommended Action  No action is required.

CFS-3

Error Message  CFS-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  CFS Service is out of dynamic memory. [chars] specifies the context where the failure occured

Recommended Action  No action is required.

Error Message  CFS-3-APP_MERGE_FAILED: Merge failed for app [chars], local switch wwn [chars], remote switch wwn [chars].Please check 'show cfs merge status name [chars]' for more information

Explanation  The CFS service has detected a merge failure.

Recommended Action  No action is required.

Error Message  CFS-3-CFS_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The CFS service has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  CFS-3-DBERROR: [chars]

Explanation  CFS Service encountered a database error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-FAILURE_RESPONSE: [chars] [hex]

Explanation  CFS Service failed to get response [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-FIPS_TEST_FAILED: FIPS compliance test failed

Explanation  FIPS compliance test failed

Recommended Action  No action is required.

Error Message  CFS-3-GENERROR: [chars]

Explanation  CFS Service encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  CFS-3-LICERR: [chars]

Explanation  CFS Service failed to get license.

Recommended Action  No action is required.

Error Message  CFS-3-MERGE_FAILED: Merge failed for app [chars], local switch wwn [chars],ip [chars], remote switch wwn [chars], ip [chars]

Explanation  The CFS service has detected a merge failure.

Recommended Action  No action is required.

Error Message  CFS-3-MTSERROR: [chars]

Explanation  CFS Service encountered an MTS error. [chars] specifies the context where the error occured.

Recommended Action  No action is required.

Error Message  CFS-3-PSSERROR: [chars]

Explanation  CFS Service encountered a PSS error. [chars] specifies the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-TIMEOUT_ERROR: [chars] [hex]

Explanation  CFS Service encountered a timeout [chars][hex] specify the context where the failure occured.

Recommended Action  No action is required.

Error Message  CFS-3-UNKNOWN_MSG: Recvd. from Node=[dec] SAP=[dec]

Explanation  The CFS service has received an unknown message from [dec]].[dec]. This information is for debugging only.

Recommended Action  No action is required.

CFS-4

Error Message  CFS-4-LICEXP: [chars]

Explanation  CFS Service license is going to expire. [chars] gives the expected time of expiry

Recommended Action  No action is required.

Error Message  CFS-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the CFS service and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

CFS-6

Error Message  CFS-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The CFS service on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  CFS-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The CFS service became standby from active mode.

Recommended Action  No action is required.

Error Message  CFS-6-EXCESSIVE_DELAY: [chars]

Explanation  Excessive time taken for a processing event. The description of the event is [str.]

Recommended Action  No action is required.

Error Message  CFS-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The CFS service was unable to send heartbeat to the system manger

Recommended Action  No action is required.

Error Message  CFS-6-GENERAL_EVENT: [chars]

Explanation  The CFS service has generated an important event. The description of the event is [str.]

Recommended Action  No action is required.

Error Message  CFS-6-INVALID_CHECKSUM: Received packet from peer on if-index([hex]) with corrupted checksum

Explanation  This could be because of errors in the link

Recommended Action  No action is required.

Error Message  CFS-6-INVALID_IF_INDEX: Received packet on if-index([hex]) which is not recognized by CFS

Explanation  The if-index does not match with the if-index used in discovery or we might have already recieved an adjacency cleanup message for this if-index. Check if the if-index is that of the port-channel or a physical if-index

Recommended Action  No action is required.

Error Message  CFS-6-LOGICAL_DISTRIBUTION_INFO: vsan [dec], source wwn [chars], ip [chars] app-id [dec], session-id [dec], user [chars], [chars]

Explanation  Vsan [dec], source wwn [chars], ip [chars], app-id [dec], user [chars], event [chars]

Recommended Action  No action is required.

Error Message  CFS-6-PHY_DISTRIBUTION_INFO: source wwn [chars], ip [chars], app-id [dec], session-id [dec], user [chars], [chars]

Explanation  Source wwn [chars], ip [chars], app-id [dec], session-id [dec], user [chars], event [chars]

Recommended Action  No action is required.

Error Message  CFS-6-PSS_CREATED: [chars] PSS Created

Explanation  One of the persistent information database of CFS service has been recreated

Recommended Action  No action is required.

Error Message  CFS-6-PSS_DESTROYED: [chars] PSS Destroyed

Explanation  One of the persistent information databases of CFS Service has been intentionally destroyed and would be recreated.

Recommended Action  No action is required.

Error Message  CFS-6-REGION_CTX_REMOVED: Region info is deleted for [chars]

Explanation  [chars] is in logical scope. Regions are supported only physical scope applications

Recommended Action  No action is required.

Error Message  CFS-6-SERVICE_UP: Initialized [chars]

Explanation  The CFS service is up and ready to accept client requests The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  CFS-6-SRVCREATED: CFS Service created

Explanation  CFS Service was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  CFS-6-SRVEXIT: CFS Service shutting down gracefully

Explanation  CFS Service is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  CFS-6-SWITCHOVER: Switching Over to other Sup.

Explanation  The CFS service has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

CLIS Messages

This section contains the CLIS messages.

CLIS-5

Error Message  CLIS-5-CLIS_SYSLOG_CMD_REMOVED: Command deleted from the NVDB: [chars]

Explanation  Command removal due to configuration change

Recommended Action  No action is required.

CLK_MGR Messages

This section contains the CLK_MGR messages.

CLK_MGR-2

Error Message  CLK_MGR-2-CLK_MGR_FC2_CRIT: CLK_MGR critical error: [chars]

Explanation  CLK_MGR fc2 clock synchronization critical error

Recommended Action  No action is required.

CLK_MGR-5

Error Message  CLK_MGR-5-CLK_MGR_CLI_CONFIG: CLK_MGR clock is synchronized by [chars] from VDC [dec]

Explanation  CLK_MGR clock is synchronized by [chars] from VDC

Recommended Action  No action is required.

CLK_MGR-6

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_DISABLED: CLK_MGR timestamp checks disabled: [chars]

Explanation  CLK_MGR timestamp checks disabled

Recommended Action  No action is required.

Error Message  CLK_MGR-6-CLK_MGR_TSTAMP_CHKS_ENABLED: CLK_MGR timestamp checks enabled

Explanation  CLK_MGR timestamp checks enabled

Recommended Action  No action is required.

CLOUD Messages

This section contains the CLOUD messages.

CLOUD-2

Error Message  CLOUD-2-PROGRAM_EXIT: cloud-discovery process ending: [chars]

Explanation  Cloud-discovery process is exiting with reason [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CLOUD-3

Error Message  CLOUD-3-CLOUD_CFS_MERGE_OPERATION_FAILED: [chars]

Explanation  [chars1]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_CFS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  CLOUD-3-CLOUD_FEATURE_MANAGER_ERROR: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for error using feature manager and rectify the problem

Error Message  CLOUD-3-CLOUD_PSS_OPERATION_FAILED: [chars] : [chars]

Explanation  [chars1] [chars2]

Recommended Action  Please check the reason for the failure of the pss operation and rectify the problem

CLOUD-6

Error Message  CLOUD-6-CLOUD_DISCOVERY_DONE: discovery over

Explanation  Cloud-discovery started

Recommended Action  Check cloud membership

Error Message  CLOUD-6-CLOUD_DISCOVERY_STARTED: [chars] discovery started

Explanation  Cloud-discovery started

Recommended Action  Check cloud-discovery status after sometime

CLUSTER Messages

This section contains the CLUSTER messages.

CLUSTER-2

Error Message  CLUSTER-2-CLUSTER_ADD_FAIL: Cluster 0x%llx creation failed

Explanation  Cluster Creation Failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_CAP_ADD_FAIL: Failed to add cluster capability [dec]

Explanation  Cluster capability addition failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_CAP_DEL_FAIL: Failed to delete cluster capability [dec]

Explanation  Cluster capability deletion failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_CONF_MGR_FAIL: Configuration manager failed to handle "[chars]" ([dec]) status=[hex]

Explanation  Cluster Config Manager failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_DB_SYNC_FAIL_CLIENT: Client on node 0x%llx for cluster 0x%llx application [dec] dataset [dec] received database synchronization failed, reason="[chars]" from application

Explanation  Cluster database synchronization failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_DB_SYNC_FAIL_MANAGER: Manager on node 0x%llx for cluster 0x%llx application [dec] dataset [dec] received database synchronization failed, reason="[chars]" from server on node 0x%llx

Explanation  Cluster database synchronization failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_DB_SYNC_FAIL_SERVER: Server on node 0x%llx for cluster 0x%llx application [dec] dataset [dec] received database synchronization failed, reason="[chars]" from client on node 0x%llx

Explanation  Cluster database synchronization failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_DB_SYNC_FAIL: Cluster 0x%llx application [dec] dataset [dec] database synchronization failed, reason="[chars]"

Explanation  Cluster database synchronization failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_LEADER_ANNOUNCE: Node 0x%llx is the new Master of cluster 0x%llx of [dec] nodes

Explanation  Leader announcement of cluster

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_LEAVE_REQ_FAIL: Node failed to send LEAVE request to Cluster 0x%llx

Explanation  Failed to send Leave Request

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_LEAVE_RESP_FAIL: Bad response to LEAVE request for Cluster 0x%llx

Explanation  Received Bad Leave response

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_LOCAL_NODE_EXIT: Local Node 0x%llx has left the Cluster 0x%llx Reason:[chars]

Explanation  Node is not part of cluster

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_QUORUM_GAIN: Cluster 0x%llx now has quorum with [dec] nodes

Explanation  Cluster has quorum

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_QUORUM_LOSS: Cluster 0x%llx has lost quorum; number of nodes=[dec]

Explanation  Cluster has lost quorum

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_RGC_TRANSACTION_FAIL: Cluster 0x%llx RGC transaction application=[dec] dataset=[dec] failed reason="[chars]"

Explanation  Cluster RGC transaction failed

Recommended Action  No action is required.

Error Message  CLUSTER-2-CLUSTER_TRANSPORT_FAIL: Cluster 0x%llx transport failed to send message from node 0x%llx to 0x%llx error=[dec]

Explanation  Cluster transport failed to send message

Recommended Action  No action is required.

CLUSTER-5

Error Message  CLUSTER-5-CLUSTER_ADD: Cluster 0x%llx added

Explanation  Cluster Added

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_DISABLED: CLUSTER Disabled

Explanation  CLUSTER Service Disabled

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_ENABLED: CLUSTER Enabled

Explanation  CLUSTER Service Enabled

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_NODE_ADD: Node 0x%llx added to cluster 0x%llx

Explanation  Node added to cluster

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_NODE_JOIN: Node 0x%llx joined cluster 0x%llx

Explanation  Node joined cluster

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_NODE_LEAVE_EXPLICIT: Remote Node 0x%llx has left the Cluster 0x%llx voluntarily

Explanation  Remote Node Left voluntarily

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_NODE_LEAVE: Node 0x%llx not in cluster 0x%llx

Explanation  Node not in cluster

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_NODE_REMOVE: Node 0x%llx removed from cluster 0x%llx

Explanation  Node removed from cluster

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_REMOVE: Cluster 0x%llx removed

Explanation  Cluster removed

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_RX_JOIN_REQ: Node 0x%llx received JOIN request from node=0x%llx

Explanation  Cluster received JOIN request

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_RX_JOIN_RESP: Node 0x%llx received JOIN response from node=0x%llx result="[chars]"

Explanation  Cluster received JOIN response

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_RX_PROBE: Node 0x%llx received PROBE from node=0x%llx

Explanation  Cluster received PROBE message

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_STARTED: CLUSTER 0x%llx Started

Explanation  CLUSTER Started

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_STOPPED: CLUSTER 0x%llx Stopped

Explanation  CLUSTER Stopped

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_TRANSPORT_DOWN: Cluster 0x%llx transport down for node=0x%llx

Explanation  Cluster Transport Connection DOWN

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_TRANSPORT_UP: Cluster 0x%llx transport up for node=0x%llx

Explanation  Cluster Transport Connection UP

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_TX_JOIN_REQ: Node 0x%llx sending JOIN request to node=0x%llx

Explanation  Cluster sending JOIN request

Recommended Action  No action is required.

Error Message  CLUSTER-5-CLUSTER_TX_JOIN_RESP: Node 0x%llx sending JOIN response to node=0x%llx result="[chars]"

Explanation  Cluster sending JOIN request

Recommended Action  No action is required.

CMOND Messages

This section contains the CMOND messages.

CMOND-2

Error Message  CMOND-2-CMOND_ALERT_MSG: [chars]

Explanation  Alert message

Recommended Action  No action is required.

Error Message  CMOND-2-CMOND_ERROR_MSG: [chars]

Explanation  Error message

Recommended Action  No action is required.

COPP Messages

This section contains the COPP messages.

COPP-1

Error Message  COPP-1-COPP_DROPS1: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

COPP-2

Error Message  COPP-2-COPP_DROPS2: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

Error Message  COPP-2-COPP_INIT_FAIL: CoPP Initialization failed: [chars]

Explanation  CoPP Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  COPP-2-COPP_MTS_FAIL: Failed to do MTS operation: [chars]

Explanation  Failed to do MTS operation. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  COPP-2-COPP_NO_POLICY: Control-plane is unprotected.

Explanation  There isn't any policy configured to protect control-plane.

Recommended Action  No action is required.

Error Message  COPP-2-COPP_POLICY: Control-Plane is protected with policy [chars].

Explanation  There is a policy attached to the control-plane.

Recommended Action  No action is required.

Error Message  COPP-2-COPP_PROFILE_DIFF: CoPP Default Profile may have changed, please check the diffs using show copp diff profile prior-ver profile

Explanation  CoPP Default Profile may have changed, please check the diffs using show copp diff profile prior-ver profile

Recommended Action  No action is required.

Error Message  COPP-2-COPP_RATELIMIT_DISABLED: CoPP rate-limit is disabled for all classes. Hence CPU is vulnerable to traffic attacks. Please do "no copp rate-limit disable" as soon as possible

Explanation  CoPP rate-limit is disabled for all classes

Recommended Action  No action is required.

COPP-3

Error Message  COPP-3-COPP_ALLOC_FAIL: Memory allocation failure: [chars]

Explanation  Failed to alloc required memory. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  COPP-3-COPP_DROPS3: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

Error Message  COPP-3-COPP_PPF_FAIL: Error during PPF operation: [chars]

Explanation  Failed to do PPF operation. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  COPP-3-COPP_PSS_FAIL: Error during PSS operation: [chars]

Explanation  Failed to do PSS operation. [chars] explains the reason for the failure.

Recommended Action  No action is required.

COPP-4

Error Message  COPP-4-COPP_DROPS4: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

COPP-5

Error Message  COPP-5-COPP_DISABLED: COPP Disabled

Explanation  COPP Service Disabled

Recommended Action  No action is required.

Error Message  COPP-5-COPP_DROPS5: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

Error Message  COPP-5-COPP_ENABLED: COPP Enabled

Explanation  COPP Service nabled

Recommended Action  No action is required.

Error Message  COPP-5-COPP_INIT: COPP initialized

Explanation  COPP Service Initialized

Recommended Action  No action is required.

COPP-6

Error Message  COPP-6-COPP_DROPS6: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

Error Message  COPP-6-COPP_POLICY_ATTACHED: CoPP policy has been attached to control plane interface.

Explanation  CoPP policy has been attached to control plane interface.

Recommended Action  No action is required.

Error Message  COPP-6-COPP_POLICY_DETACHED: CoPP policy has been detached from control plane interface.

Explanation  CoPP policy has been detached from control plane interface.

Recommended Action  No action is required.

COPP-7

Error Message  COPP-7-COPP_DROPS7: CoPP drops exceed threshold in class: [chars], check show policy-map interface control-plane for more info.

Explanation  There are CoPP drops, [chars] tell which class has dropped packets.

Recommended Action  No action is required.

CORE-DMON Messages

This section contains the CORE-DMON messages.

CORE-DMON-2

Error Message  CORE-DMON-2-MODULE_COREDUMP_DONE: kernel coredump completed on module:[dec]

Explanation  Kernel coredump finishing on a module

Recommended Action  No action is required.

Error Message  CORE-DMON-2-MODULE_COREDUMP_STARTED: kernel coredump started on module:[dec]

Explanation  Kernel coredump starting on a module

Recommended Action  No action is required.

CORE-DMON-3

Error Message  CORE-DMON-3-NO_SPACE: Failed to save core file [chars]. Try removing existing core files.

Explanation  Not enough space to save new core files

Recommended Action  No action is required.

CRDCFG Messages

This section contains the CRDCFG messages.

CRDCFG-2

Error Message  CRDCFG-2-CRDCFG_SRV_CRIT: [chars]

Explanation  CardConfig CRITICAL ERROR

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CRDCFG-3

Error Message  CRDCFG-3-CRDCFG_ERR: [chars]

Explanation  CardConfig error mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CRDCFG-3-CRDCFG_MSG: [chars]

Explanation  CardConfig log mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CRDCFG-3-CRDCFG_SRV_ERR: [chars]

Explanation  CardConfigServer error mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  CRDCFG-3-CRDCFG_SRV_MSG: [chars]

Explanation  CardConfigServer log mesage

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

CRDCFG-SLOT#-2

Error Message  CRDCFG-SLOT#-2-CONFIG_ERR: [chars]

Explanation  CardConfig Failed to find matching cardid, pnum in database

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DCEFIB Messages

This section contains the DCEFIB messages.

DCEFIB-SLOT#-0

Error Message  DCEFIB-SLOT#-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  L2mp unicast fib failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-0-TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  L2mp unicast fib failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

DCEFIB-SLOT#-2

Error Message  DCEFIB-SLOT#-2-DCEFIB_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-2-DCEFIB_RECOVERY_ERROR: Error in Recovery: [chars]

Explanation  L2mp unicast fib failed to recover after a re-start. This is a fatal error.

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-2-U2FIB_ERR: [chars]

Explanation  L2mp unicast fib encountered an error:

Recommended Action  No action is required.

DCEFIB-SLOT#-6

Error Message  DCEFIB-SLOT#-6-INITIALIZED: Internal state created [chars]

Explanation  L2mp unicast fib has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-6-U2FIB_INFO: [chars]

Explanation  L2mp unicast fib notice:

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-6-VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in l2mp unicsat fib was successful.

Recommended Action  No action is required.

Error Message  DCEFIB-SLOT#-6-VDC_REMOVED: VDC [dec] Removed

Explanation  L2mp unicast fib has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

DEVICE-ALIAS Messages

This section contains the DEVICE-ALIAS messages.

DEVICE-ALIAS-2

Error Message  DEVICE-ALIAS-2-ALLOC_FAILED: Memory allocation failed for size:[dec] type:[dec]

Explanation  Memory allocation failed for size [dec] type [dec]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-2-INIT_FAILED: [chars]

Explanation  An error occurred during initialization. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DEVICE-ALIAS-3

Error Message  DEVICE-ALIAS-3-CFS_OPER_FAILED: [chars]

Explanation  An error occurred while performing a CFS operation. [chars] indicates the CFS operation and the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the session. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-COMMIT_FAILED: [chars]

Explanation  An error occurred while committing the database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-COMMIT_REJECTED: [chars]

Explanation  Commit request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the lock. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-LOCK_REJECTED: [chars]

Explanation  Lock request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_ACTIVATION_FAILED: [chars]

Explanation  An error occurred while activating the merged database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_ACTIVATION_REJECTED: [chars]

Explanation  Merge activation request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_FAILED: [chars]

Explanation  An error occurred during merge operation. [chars] indicates the reason for failure.

Recommended Action  Compare device-alias configuration with the other switches in the fabric, resolve the conflicts if any and commit the changes.

Error Message  DEVICE-ALIAS-3-MERGE_MREQ_REJECTED: [chars]

Explanation  MREQ received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_MRESP_REJECTED: [chars]

Explanation  MRESP received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_VALIDATION_FAILED: [chars]

Explanation  An error occurred while validating the merged database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MERGE_VALIDATION_REJECTED: [chars]

Explanation  Merge validation request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-MTS_OPER_FAILED: [chars]

Explanation  An error occurred during MTS operation. [chars] indicates the MTS operation and the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-PSS_OPER_FAILED: [chars]

Explanation  An error occurred during PSS operation. [chars] indicates the PSS operation and the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the lock. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-UNLOCK_REJECTED: [chars]

Explanation  Unlock request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-VALIDATION_FAILED: [chars]

Explanation  An error occurred while validating the database. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-3-VALIDATION_REJECTED: [chars]

Explanation  Validation request received from remote switch is rejected. [chars] indicates the reason for failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DEVICE-ALIAS-6

Error Message  DEVICE-ALIAS-6-CLEAR_FAILED_INFO: [chars]

Explanation  An error occurred while clearing the session. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-COMMIT_FAILED_INFO: [chars]

Explanation  An error occurred while committing the database. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-IMPORT_DEFINITION_CONFLICT: Fcalias [chars] could not be imported due to definition conflict

Explanation  Fcalias [chars] could not be imported due to definition conflict. Either there is already a device-alias configuration present with the same definition OR another VSAN specified in the import VSAN range has an fcalias with the same definition.

Recommended Action  Resolve the conflict and issue the import command again.

Error Message  DEVICE-ALIAS-6-IMPORT_MEMBER_TYPE_CONFLICT: Fcalias [chars] could not be imported due to having unsupported member type

Explanation  Fcalias [chars] could not be imported due to having unsupported member types. Fcalias can be imported only if it has Port WWN based members..

Recommended Action  Make sure that the fcalias has Port WWN based members and issue the import command again.

Error Message  DEVICE-ALIAS-6-IMPORT_NAME_CONFLICT: Fcalias [chars] could not be imported due to name conflict

Explanation  Fcalias [chars] could not be imported due to name conflict. Either there is already a device-alias configuration present with the same name OR another VSAN specified in the import VSAN range has an fcalias with the same name.

Recommended Action  Resolve the conflict and issue the import command again.

Error Message  DEVICE-ALIAS-6-IMPORT_NUM_MEMBERS_CONFLICT: Fcalias [chars] could not be imported due to having unsupported number of members

Explanation  Fcalias [chars] could not be imported due to having unsupported number of members. Fcalias can be imported only if it has exactly one member..

Recommended Action  Make sure that the fcalias has exactly one member and issue the import command again.

Error Message  DEVICE-ALIAS-6-LOCK_FAILED_INFO: [chars]

Explanation  An error occurred while acquiring the lock. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-MERGE_ACTIVATION_FAILED_INFO: [chars]

Explanation  An error occurred while activating the merged database. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-MERGE_VALIDATION_FAILED_BUSY: [chars]

Explanation  Merged database could not be validated as some of the applications returned busy. [chars] indicates information about the application returned busy. There is no user intervention necessary. The validation would be automatically retried after some time.

Recommended Action  No DDTS.

Error Message  DEVICE-ALIAS-6-MERGE_VALIDATION_REJECTED_BUSY: [chars]

Explanation  Merged database received from the remote switch could not be validated as some of the applications returned busy. [chars] indicates information about the application returned busy. There is no user intervention necessary. The validation would be automatically retried after some time.

Recommended Action  No DDTS.

Error Message  DEVICE-ALIAS-6-UNLOCK_FAILED_INFO: [chars]

Explanation  An error occurred while releasing the lock. [chars] indicates the additional information regarding failure.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DEVICE-ALIAS-6-VALIDATION_ABORTED: [chars]

Explanation  Local validation is aborted. [chars] indicates the reason why validation is aborted.

Recommended Action  No DDTS.

DEVICE_TEST Messages

This section contains the DEVICE_TEST messages.

DEVICE_TEST-2

Error Message  DEVICE_TEST-2-ASIC_REG_CHECK_FAIL: Module [dec] has failed test [chars] [dec] times on device [chars] [chars] [dec] [chars] due to error [chars]

Explanation  Online diagnostics ASICRegisterCheck test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-COMPACT_FLASH_FAIL: Module [dec] has failed test [chars] [dec] times on device BootFlash due to error [chars]

Explanation  Online diagnostics BootFlash test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-CRYPTO_DEVICE_FAIL: Module [dec] has failed test [chars] [dec] times on Crypto device due to error [chars]

Explanation  Online diagnostics CryptoDevice test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-EOBC_FAIL: Module [dec] has failed test [chars] on EOBC due to error [chars]

Explanation  Online diagnostics EOBC test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-FAN_MOD_FAIL: Module [dec] has failed test [chars] [dec] times on System Mgmt Bus for chassis [chars] instance [dec] due to error [chars] error number [hex]

Explanation  Online diagnostics SystemMgmtBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-MALLOC_FAILURE: Memory allocation failed

Explanation  Device Test process could not allocate memory

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-MGMT_PORT_SKIP: Module [dec] has skipped test [chars] on Management Port due to error [chars]

Explanation  Online diagnostics ManagementPort test is skipped

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-NVRAM_FAIL: Module [dec] has failed test [chars] [dec] times on device NVRAM due to error [chars]

Explanation  Online diagnostics NVRAM test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-OBFL_FAIL: Module [dec] has failed test [chars] [dec] times on device OBFL due to error [chars]

Explanation  Online diagnostics OBFL test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-POWER_SUPPLY_FAIL: Module [dec] has failed test [chars] [dec] times on System Mgmt Bus for chassis [chars] instance [dec] due to error [chars] error number [hex]

Explanation  Online diagnostics SystemMgmtBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-PWR_MGMT_BUS_FAIL: Module [dec] has failed test [chars] [dec] times on device Power Mgmt Bus on slot [dec] due to error [chars] error number [hex]

Explanation  Online diagnostics PwrMgmtBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-RTC_FAIL: Module [dec] has failed test [chars] [dec] times on device RealTimeClock due to error [chars]

Explanation  Online diagnostics RealTimeClock test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-SPINE_CONTROL_BUS_FAIL: Module [dec] has failed test [chars] [dec] times on device Spine Control Bus on slot [dec] due to error [chars] error number [hex]

Explanation  Online diagnostics SpineControlBus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-STANDBY_LOOPBACK_TEST_FAIL: Module [dec] has failed test [chars] [dec] times on [chars] [dec] due to error [chars]

Explanation  Online diagnostics StandbyFabricLoopback test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-TWOWIRE_STW_FAIL: Module [dec] has failed test [chars] [dec] times on Status Bus on slot [dec] due to error [chars]

Explanation  Online diagnostics Status bus test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-2-USB_FAIL: Module [dec] has failed test [chars] [dec] times on device USB due to error [chars]

Explanation  Online diagnostics USB test has failed

Recommended Action  No action is required.

DEVICE_TEST-3

Error Message  DEVICE_TEST-3-MCE_1HR_FAIL: Module [dec] has exceeded MCE 1 hour correctable threshold of [dec] with [dec] correctable errors for address 0x%llx within 1 an hour.

Explanation  These memory errors are correctable and no functional impact to system behavior. However, excessive correctable memory errors can be an indication of possible hardware fault. Please collect \show tech gold\ and open a Support case for further investigation.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-MCE_24HR_FAIL: Module [dec] has exceeded MCE 24 hour correctable threshold of [dec] with [dec] correctable errors within 24 hours.

Explanation  These memory errors are correctable and no functional impact to system behavior. However, excessive correctable memory errors can be an indication of possible hardware fault. Please collect \show tech gold\ and open a Support case for further investigation.

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_GET_DIAG_VQI_FAIL: Standby test get diag vqi failed due to error [hex]

Explanation  Device Test StandbyLoopback Test failed get vqi

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_GET_SPINE_FAIL: Standby test get spines failed due to error [hex]

Explanation  Device Test StandbyFabricLoopback Test get spine failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_INIT_FAIL: Init for standby test failed due to error [hex]

Explanation  Device Test StandbyFabricLoopback Test failed init process

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_MTS_FAIL: Mts Init for standby test failed due to error [hex]

Explanation  Device Test StandbyFabricLoopback Test failed mts init

Recommended Action  No action is required.

Error Message  DEVICE_TEST-3-STANDBY_TEST_SOCKET_FAIL: Standby test socket error [chars]: [hex]

Explanation  Device Test StandbyFabricLoopback Test Socket error

Recommended Action  No action is required.

DEVICE_TEST-4

Error Message  DEVICE_TEST-4-PRIMARY_BOOTROM_FAIL: Module [dec] has failed test [chars] [dec] times on device Primary BootROM due to error [chars]

Explanation  Online diagnostics PrimaryBootROM test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-SECONDARY_BOOTROM_FAIL: Module [dec] has failed test [chars] [dec] times on device Secondary BootROM due to error [chars]

Explanation  Online diagnostics SecondaryBootROM test has failed

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-THREAD_CREATE_FAIL: Thread creation failed

Explanation  Device Test process could not create threads

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-TIMER_CREATE_FAIL: Timer creation failed

Explanation  Device Test process could not create timer

Recommended Action  No action is required.

Error Message  DEVICE_TEST-4-TIMER_START_FAIL: Timer start failed

Explanation  Device Test process could not start timer

Recommended Action  No action is required.

DEVICE_TEST-5

Error Message  DEVICE_TEST-5-NOTICE_TEST: Memory allocation failed notice

Explanation  Device Test process could not allocate memory

Recommended Action  No action is required.

DEVICE_TEST-6

Error Message  DEVICE_TEST-6-INFO_TEST: Memory allocation failed info

Explanation  Device Test process could not allocate memory

Recommended Action  No action is required.

DEV_LOG_SUP Messages

This section contains the DEV_LOG_SUP messages.

DEV_LOG_SUP-3

Error Message  DEV_LOG_SUP-3-ERROR: [chars]

Explanation  Dev_log_sup encountered an error

Recommended Action  No action is required.

DEV_LOG Messages

This section contains the DEV_LOG messages.

DEV_LOG-3

Error Message  DEV_LOG-3-ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DEV_LOG-SLOT#-4

Error Message  DEV_LOG-SLOT#-4-DEV_LOG_LC_ERROR: [chars]

Explanation  Dev_log_lc encountered an error

Recommended Action  No action is required.

DFTM Messages

This section contains the DFTM messages.

DFTM-SLOT#-2

Error Message  DFTM-SLOT#-2-DFTM_INTF_NOT_FOUND: Interface [chars] not found in DFTM database [chars]

Explanation  DFTM database doesn't have the interface.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_INVALID_FTAG_NUM: DFTM received invalid number of FTags [dec] from M2RIB

Explanation  DFTM recvd invalid number of FTags from M2RIB.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_INVALID_INTF_NUM: DFTM has invalid number of interfaces [dec] in the DB

Explanation  DFTM has invalid number of interfaces in the DB.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_PC_NUM_MEMB_INVALID: DFTM received invalid number of PC members [dec] from ELTM

Explanation  DFTM recvd invalid number of PC members from ELTM.

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-2-DFTM_VLAN_NOT_FOUND: VLAN [dec] not found in DFTM database [chars]

Explanation  DFTM database doesn't have the VLAN.

Recommended Action  No action is required.

DFTM-SLOT#-3

Error Message  DFTM-SLOT#-3-DFTM_BDDB_PROG_FAILED: DFTM failed to program BDDB Entry

Explanation  DFTM failed to program BDDB Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_BDT_PROG_FAILED: DFTM failed to program BD Table Entry

Explanation  DFTM failed to program BD Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_INVALID_PORT_LAYER: Invalid Port Layer Received for interface: [chars]

Explanation  Invalid Port Layer Received for interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_INVALID_PORT_MODE: Invalid Port Mode Received for interface: [chars]

Explanation  Invalid Port Mode Received for interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_INVALID_PORT_TYPE: Invalid Port Type Received for interface: [chars]

Explanation  Invalid Port Type Received for interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_IFIDX_TYPE_ERROR: Failed to get type for interface: [chars]

Explanation  Failed to get type for the interface

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_INVALID_PRIM_SEC_VLAN_REQ: DFTM received prim-sec request for a non-exiting sec vlan [dec] on primary [dec]

Explanation  DFTM recvd prim-sec vlan mapping request for a non-existing sec vlan on prim vlan

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_L2L3CT_PROG_FAILED: DFTM failed to program L2L3 Consistency Table Entry

Explanation  DFTM failed to program L2L3 Consistency Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_MFT_PROG_FAILED: DFTM failed to program Multicast FTag Table Entry

Explanation  DFTM failed to program Multicast Ftag Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_SDT_PROG_FAILED: DFTM failed to program SGT DGT Table Entry

Explanation  DFTM failed to program SGT DGT Table Entry

Recommended Action  No action is required.

Error Message  DFTM-SLOT#-3-DFTM_VTT_PROG_FAILED: DFTM failed to program VLAN Translation Table Entry for vlan [dec], xlt_vlan [dec] on fe [dec]

Explanation  DFTM failed to program VLAN Translation Table

Recommended Action  No action is required.

DHCLIENT Messages

This section contains the DHCLIENT messages.

DHCLIENT-2

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_RECVD_NAK: [chars] - Received DHCP NAK

Explanation  Received DHCP NAK

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_DISCOVER_START: [chars] - DHCLIENT DHCP Discover phase started

Explanation  DHCLIENT DHCP Discover phase started

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FAILURE: [chars]

Explanation  DHCLIENT Failure

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_FLASH_FULL: DHCLIENT bootflash doesn't have enough space (85% FULL)

Explanation  DHCLIENT bootflash doesn't have enough space (85% FULL)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_INITED: [chars] - DHCLIENT process initialized

Explanation  DHCLIENT process initialized

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded DHCLIENT script file

Explanation  Successfully downloaded DHCLIENT script file

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_EXEC_SUCCESS: [chars] - DHCLIENT script execution success

Explanation  DHCLIENT script execution success

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - DHCLIENT script execution started(MD5 not validated)

Explanation  DHCLIENT script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATED: [chars] - DHCLIENT script execution started(MD5 validated)

Explanation  DHCLIENT script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  DHCLIENT-2-DHCLIENT_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - DHCLIENT boot file validation failed

Explanation  DHCLIENT boot file validation failed.

Recommended Action  No action is required.

DHCLIENT-4

Error Message  DHCLIENT-4-DHCLIENT_WARNING: [chars]

Explanation  DHCLIENT Warning

Recommended Action  No action is required.

DHCLIENT-5

Error Message  DHCLIENT-5-DHCLIENT_DISABLED: [chars] - DHCLIENT Disabled

Explanation  DHCLIENT Service Disabled

Recommended Action  No action is required.

Error Message  DHCLIENT-5-DHCLIENT_ENABLED: [chars] - DHCLIENT Enabled

Explanation  DHCLIENT Service nabled

Recommended Action  No action is required.

DHCLIENT-6

Error Message  DHCLIENT-6-DHCLIENT_INFO: [chars]

Explanation  DHCLIENT Info

Recommended Action  No action is required.

DHCLIENT-7

Error Message  DHCLIENT-7-DHCLIENT_DEBUG: [chars]

Explanation  DHCLIENT Debug

Recommended Action  No action is required.

DHCP_SNOOP Messages

This section contains the DHCP_SNOOP messages.

DHCP_SNOOP-1

Error Message  DHCP_SNOOP-1-IPSG_WARN_MSG: Configuring IPSG on the interface will result in IPv6 traffic loss.

Explanation  Configuring IPSG on the interface will result in IPv6 traffic loss.

Recommended Action  No action is required.

DHCP_SNOOP-2

Error Message  DHCP_SNOOP-2-DHCP_SNOOP_PROGRAM_EXIT: [chars]

Explanation  DHCP snoop process did an abnormal exit

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-HWPGMFAILURE: Hardware programming has failed: [chars]

Explanation  Hardware programming has failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-INITFAIL: DHCP Daemon Initialization failed: [chars]

Explanation  DHCP Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-PSSERROR: [chars]

Explanation  DHCP Daemon encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-2-REGPARTREE: Unable to register par tree: [chars]

Explanation  Could not register par tree. [chars] explains the reason for the failure.

Recommended Action  No action is required.

DHCP_SNOOP-3

Error Message  DHCP_SNOOP-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  DHCP Daemon is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-ASSERTION_FAILED: [chars]:[dec]

Explanation  DHCP Snoop process has hit an assert condition at file [chars] line number [dec]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-DHCPDENIEDARP: ARP frame denied due to DHCP snooping binding on interface [chars] vlan [dec] sender mac [chars] sender ip [chars] target mac [chars] target ip [chars].

Explanation  [chars] identifies interface and [dec] identifies the vlan on which ARP packets have been denied. [chars] identifies sender mac and [chars] identifies the sender ip. [chars] identifies the target mac and [chars] identifies the target ip.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-DHCPRATELIMIT: Interface [chars] has been error disabled due to excessive ingress rate [dec] of DHCP packets.

Explanation  [chars] identifies the interface which has been error disabled due to excessive ingress rate [dec].

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-INVDHCPPKTS: Validation errors while processing DHCP packet received on interface [chars] vlan [dec] Reason:[chars]. Dropping the packet

Explanation  Validation errors DHCP packet receieved on the interface [chars] vlan [[dec]]. Reason:[chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6APIINIT_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_api_init [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-IPV6REGISTER_FAILED: [chars]

Explanation  DHCP Snoop process failed to do ipv6_register [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-MTSERROR: [chars]

Explanation  DHCP Daemon encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-PKTDROP: Packet dropped. Reason - [chars]

Explanation  Dropping the packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-PKTRECVFAIL: Failed to receive packet - [chars]

Explanation  Failed to receive packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-PKTSENDFAIL: Failed to send packet, - [chars]

Explanation  Failed to send packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-SETSOCKOPTFAIL: Failed to set socket option - [chars]

Explanation  Failed to set socket option [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-SOCKBINDFAIL: Failed to bind to raw socket - [chars]

Explanation  Failed to bind to socket. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-3-SOCKOPENFAIL: Failed to open socket for receiving DHCP packets - [chars]

Explanation  An attempt to open a socket for receiving DHCP packets failed. [char] identifies the reason.

Recommended Action  No action is required.

DHCP_SNOOP-4

Error Message  DHCP_SNOOP-4-ACL_DENY: [dec] Invalid ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] Invalid ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-DHCP_SNOOPING_DENY: [dec] Invalid ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] Invalid ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-ERROR_DISABLED: Interface [chars] has moved to error disabled state due to excessive rate [dec] of ingress ARP packets

Explanation  Interface [chars] has moved to error disabled state due to excessive rate [dec] of ingress ARP packets

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-INVALID_ARP: [dec] Invalid ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] Invalid ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-SMARTRELAYMAXIPADDR: Smart relay is supported only on first [dec] IP addresses of the interface [chars].

Explanation  There are more than SMARTRELAYMAXIPADDR addresses configured on the interface. [dec] is the number of IP addresses with which smart relay supported [chars] identifies the interface. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-SMARTRELAYMAXLMT: Smart relay MAX limit [dec] reached. All subsequent DHCP packets will be relayed with primary address of inbound interface as relay agent address.

Explanation  Smart relay MAX limit reached. [dec] is the number of smart relay bindings This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-4-SUBNETBCASTRELAYMAXIPADDR: subnet-broadcast relay is supported only on first [dec] IP addresses of the interface [chars].

Explanation  There are more than SUBNETBCASTRELAYMAXIPADDR addresses configured on the interface. [dec] is the number of IP addresses with which subnet-broadcast relay supported [chars] identifies the interface. This is an informational message.

Recommended Action  No action is required.

DHCP_SNOOP-5

Error Message  DHCP_SNOOP-5-ACL_PERMIT: [dec] ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPHOSTADD: A new Host is [chars] connected to interface [chars] in VLAN [dec] and is allocated IP address [chars] for [dec] secs.

Explanation  A Host identified by [chars] has been added. [chars] identifies the interface. [dec] identifies the VLAN. [chars] identifies IP address. [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCPLEASEEXPIRE: Lease expired for host [chars] having IP address [chars] connected to interface [chars] in VLAN [dec] for lease [dec] secs.

Explanation  The lease for host identified by [chars] with IP address [chars] connected to interface [chars] in VLAN [dec] with lease [dec] has expired.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-DHCP_SNOOPING_PERMIT: [dec] ARP messages ([chars]) on [chars], vlan [dec]. ([[chars]/[chars]/[chars]/[chars]/[chars]])

Explanation  Packet-count [dec] ARPs (arp-type [chars]) on interface [chars], vlan [dec]. ([sender-mac [chars]/sender-ip [chars]/ target-mac [chars]/target-ip [chars]/ time-of-day [chars]])

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-VLANDISABLE: DHCP Snooping disabled on vlan [dec]

Explanation  DHCP Snooping was disabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-5-VLANENABLE: DHCP Snooping enabled on vlan [dec]

Explanation  DHCP Snooping was enabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

DHCP_SNOOP-6

Error Message  DHCP_SNOOP-6-DAIVLANDISABLE: DAI disabled on vlan [dec]

Explanation  Dynamic ARP Inspection was disabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DAIVLANENABLE: DAI enabled on vlan [dec]

Explanation  Dynamic ARP Inspection was enabled on a given vlan. [dec] is the VLAN-ID that identifies the vlan. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPBINDSYNC: Binding entry with MAC [chars] interface [chars] VLAN [dec] IP address [chars] and lease time [dec] secs is synced.

Explanation  Binding entry identified by [chars] has been synced. [chars] identifies the interface. [dec] identifies the VLAN. [chars] identifies IP address. [dec] identifies the lease time in secs. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPEXIT: DHCP Daemon shutting down gracefully.

Explanation  DHCP Daemon is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPPERMITTEDARP: ARP frame permitted due to DHCP snooping binding on interface [chars] vlan [dec] sender mac [chars] sender ip [chars] target mac [chars] target ip [chars].

Explanation  [chars] identifies interface and [dec] identifies the vlan on which ARP packets have been permitted. [chars] identifies sender mac and [chars] identifies the sender ip. [chars] identifies the target mac and [chars] identifies the target ip.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPPKTFWD: Gracefully forwarding DHCP packet. Reason: [chars]

Explanation  Gracefully forwarding DHCP packet. reason [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-DHCPUP: DHCP Daemon Up.

Explanation  DHCP Daemon was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INFO: [chars]

Explanation  An event during switchover. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFDISABLE: IP Src Guard disabled on intf [chars]

Explanation  IP Src Guard was disabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-INTFENABLE: IP Src Guard enabled on intf [chars]

Explanation  IP Src Guard was enabled on a given intf. [chars] is the intf-ID string that identifies the intf. This is an informational message.

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-NONDHCPPKTFWD: Non DHCP packet with src port:[dec] dst port:[dec] on intf:[chars] vlan:[dec]. Forwarding on [chars]

Explanation  Non DHCP packet arrived with UDP src/dst ports [dec], [dec] on interface [chars], vlan [dec]. Forwarding the packet on [chars]

Recommended Action  No action is required.

Error Message  DHCP_SNOOP-6-OPT82INSTFAIL: [chars] [chars]

Explanation  Insertion of Option82 suboptions failed. [chars] tells the failure. [chars] explains the reason for failure. This is an informational message.

Recommended Action  No action is required.

DIAGCLIENT Messages

This section contains the DIAGCLIENT messages.

DIAGCLIENT-2

Error Message  DIAGCLIENT-2-DIAG_BOOTUP_COMPLETE: Module <[dec]> Bootup Test <[chars]> has reported <[chars]>

Explanation  Bootup Test completed

Recommended Action  Nothing to be done if the test reports SUCCESS otherwise copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information

Error Message  DIAGCLIENT-2-EEM_ACTION_HM_SHUTDOWN: Test <[chars]> has been disabled as a part of default EEM action

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-PSS_READ_FAILURE: Read from PSS failed on Module <[dec]>

Explanation  Read operation from PSS store failed

Recommended Action  No action is required.

Error Message  DIAGCLIENT-2-PSS_WRITE_FAILURE: Write to PSS failed on Module <[dec]>

Explanation  Write operation on PSS store failed

Recommended Action  No action is required.

DIAGCLIENT-3

Error Message  DIAGCLIENT-3-ONDEMAND_FAIL_EXCESS: Module <[dec]> Test <[chars]> has failed more than <[dec]> number of times

Explanation  Ondemand test has failed more than configured number of times

Recommended Action  Copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information

DIAGCLIENT-4

Error Message  DIAGCLIENT-4-LC_OFFLINE_FOR_CURR_SLOT: Received LC offline event for the current slot:[dec]. Ignoring it

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-4-MTS_SEND_FAILURE: MTS send failed, mts_opc: [chars], dest slot: [dec], dest SAP: [dec], error-id: [hex]

Explanation  MTS send reports failure

Recommended Action  No action is required.

DIAGCLIENT-5

Error Message  DIAGCLIENT-5-CALLOC_FAILURE: Memory allocation failed

Explanation  DiagClient process could not allocate memory

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_ONDEMAND_TEST_FINISH: Module [dec]: Ondemand test [chars] finished

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_ONDEMAND_TEST_START: Module [dec]: Ondemand test [chars] started

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_ONDEMAND_TEST_STOP: Module [dec]: Ondemand test [chars] stopped

Explanation  Informational Syslog

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-DIAG_SCHED_COMPLETE: Module <[dec]> Test <[chars]> has completed Scheduled Testing

Explanation  A scheduled Test was completed

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-ONDEMAND_FAIL: Module <[dec]> Test <[chars]> has failed in Test_Iteration <[chars]>

Explanation  The specified test has reported FAILURE in this Iteration

Recommended Action  No action is required.

Error Message  DIAGCLIENT-5-ONDEMAND_SUCCESS: Module <[dec]> Test <[chars]> has completed successfully in Test_Iteration <[chars]>

Explanation  The specified test has reported SUCCESS in this Iteration

Recommended Action  No action is required.

DIAGCLIENT-7

Error Message  DIAGCLIENT-7-DIAG_HM_FAIL: Module <[dec]> Health Monitoring Test <[chars]> has failed. Please use 'show diagnostic result ' to see test results

Explanation  A Health Monitoring Test has reported failure

Recommended Action  Ensure the line card is firmly in the slot, reseat if necessary, and attempt to run the test again if the line card is not seated properly in the slot. If the line card was properly seated in the slot, copy the error message exactly as it appears on the console, gather the output of show tech-support, and contact your Cisco technical support representative with the gathered information.

Error Message  DIAGCLIENT-7-PER_PORT_TEST_FAIL: Module <[dec]> Test <[chars]> has failed on Ports <[chars]> Please use 'show diagnostic result ' to see test results

Explanation  Per Port Test has failed on the above all ports

Recommended Action  No action is required.

DIAGMGR Messages

This section contains the DIAGMGR messages.

DIAGMGR-2

Error Message  DIAGMGR-2-MTS_SEND_FAILURE: MTS send failed, mts_opc: [chars], dest slot: [dec], dest SAP: [dec], error-id: [hex]

Explanation  MTS send reports failure

Recommended Action  No action is required.

Error Message  DIAGMGR-2-PSS_DELETE_FAILURE: Read from PSS failed on Module <[dec]>

Explanation  Read operation from PSS store failed

Recommended Action  No action is required.

Error Message  DIAGMGR-2-PSS_WRITE_FAILURE: Write to PSS failed on Module <[dec]>

Explanation  Write operation on PSS store failed

Recommended Action  No action is required.

DIAGMGR-3

Error Message  DIAGMGR-3-DIAG_MAJOR_DEFECT: Module <[dec]> Test <[chars]> detected a Major Error Please use 'show diagnostic result ' to see test results

Explanation  A major error was detected during diagnostic testing

Recommended Action  Re-seat the card and retry the test. If the same result occurs after reseating the card and retrying the test, copy the error message exactly as it appears on the screen and gather the output of show tech-support and any other relevant information. Contact your technical support representative with the gathered information.

Error Message  DIAGMGR-3-DIAG_MINOR_DEFECT: Module <[dec]> Test <[chars]> detected a Minor Error Please use 'show diagnostic result ' to see test results

Explanation  A minor error was detected during diagnostic testing

Recommended Action  Re-seat the card and retry the test. If the same result occurs after reseating the card and retrying the test, copy the error message exactly as it appears on the screen and gather the output of show tech-support and any other relevant information. Contact your technical support representative with the gathered information

Error Message  DIAGMGR-3-GET_CURR_SLOT_FAIL: Failed to get the current slot for the process. Error:[chars]

Explanation  The process initialization failed to get the current slot.

Recommended Action  This is an informational message stating that a process initialization failure.

DIAGMGR-4

Error Message  DIAGMGR-4-CURR_SLOT_OFFLINE: Recevied an LC offline event for the current slot:[dec]. Ignoring it

Explanation  The process received an offline event for the slot it is running. Ignoring it.

Recommended Action  This is an informational message stating that an unexpected event has been encountered.

Error Message  DIAGMGR-4-DISRPT_TST_START: Starting Test <[chars]> on Module <[dec]> is Disruptive

Explanation  Starting a Disruptive Test can disturb the system's normal functionality

Recommended Action  Reset target module

Error Message  DIAGMGR-4-FIXED_INTRVL_CHANGED: The users are not allowed to change monitoring interval of Test <[chars]>

Explanation  The specified health monitoring test interval is not user-configurable and therefore cannot be changed

Recommended Action  Nothing. The specific health monitoring interval is not user- configurable by design so nothing can be done to change the interval

DIAGMGR-5

Error Message  DIAGMGR-5-BOOTUP_CONF: Diagnostic Bootup Level: <[chars]>

Explanation  Current Diagnostic BootUp Level being configure or changed

Recommended Action  No action is required.

Error Message  DIAGMGR-5-CALLOC_FAILURE: Memory allocation failure

Explanation  Memory allocation in a call to malloc/calloc has failed

Recommended Action  No action is required.

Error Message  DIAGMGR-5-CHANGE_ALWAYS_HM: Health Monitoring test <[chars]> in Module <[dec]> is a must run and cannot be modified

Explanation  The specified health monitoring test must be run and cannot be disabled

Recommended Action  Nothing. The specific health monitoring test cannot be disabled by design. The system is working properly.

Error Message  DIAGMGR-5-HM_START: Health monitoring test <[chars]> for Module <[dec]>

Explanation  Health Monitoring Test started

Recommended Action  No action is required.

Error Message  DIAGMGR-5-HM_STOP: Disabling health monitoring test <[chars]> for Module <[dec]>

Explanation  Health Monitoring Test has been stopped It can be enabled through the diagnostic monitor..... command

Recommended Action  No action is required.

Error Message  DIAGMGR-5-INTRVL_INCORRECT: Monitoring Interval is less than minimum of [dec] seconds required for Module <[dec]> test <[chars]>

Explanation  Health Monitoring cannot be enabled for the specified test because the interval for the test has been incorrectly set

Recommended Action  The system is working properly and no user action is required. If you want to specify a smaller testing interval, the error message text provides the lowest possible configurable interval for the specified monitoring interval

Error Message  DIAGMGR-5-MODULE_MISSING: Diagnostic command issued on non-existing Module <[dec]>

Explanation  A line card could not be located in a slot where a diagnostic action was requested

Recommended Action  Ensure the targeted line card is properly seated in the specified slot. If the line card is properly seated, ensure the correct slot was indicated in the command-line interface. If the line card is well-seated and the correct slot was specified, copy the error message exactly as it appears on the screen as well as the output of show tech-support and paste the output into a separate file. Contact your technical support representative with the gathered information

Error Message  DIAGMGR-5-NONHM_AS_HM: The Test <[chars]> cannot be used as health monitoring test

Explanation  Non-HM test cannot be scheduled to run as a Health Monitoring test

Recommended Action  No action is required.

DIAGMGR-6

Error Message  DIAGMGR-6-BOOTUP_DIAG_OK: Module <[dec]>: Passed Online Diagnostics

Explanation  The diagnostic tests did not detect any error on the card.

Recommended Action  This is an informational message stating that the line card passed the diagnostic tests.

Error Message  DIAGMGR-6-BOOTUP_TEST_STARTED: Module <[dec]>: Running [chars] Diagnostics

Explanation  Starting bootup testing for above module

Recommended Action  No action is required.

DIAG_PORT_LB Messages

This section contains the DIAG_PORT_LB messages.

DIAG_PORT_LB-2

Error Message  DIAG_PORT_LB-2-FIPS_RANDOM_ERROR: Random Number Generation Failure

Explanation  Random Number genration failed in FIPS module

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-L2ACLREDIRECT_LOOPBACK_TEST_FAIL: Module:[dec] Test:L2ACLRedirect Loopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  L2ACLRedirect Loopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-LCM_RESP_SEND_FAILURE: LC Inserted request response send to Module Manager failed . Error:[chars]

Explanation  Failed to send the response for LC insertion to Module Manager.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-LIF_GET_ERROR: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed to get Diagnostic LIF id

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-MALLOC_FAILURE: [chars]([dec]) Memory allocation failed.

Explanation  Port Loopback test process could not allocate memory

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-PORTLOOPBACK_TEST_FAIL: Module:[dec] Test:PortLoopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  PortLoopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-PROC_INIT_FAILURE: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed in process initialization

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-REWRITE_ENGINE_LOOPBACK_TEST_FAIL: Module:[dec] Test:RewriteEngine Loopback failed [dec] consecutive times. Faulty module:[chars] [chars] Error:[chars]

Explanation  Rewrite Engine Loopback test failed on the module consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-2-SNAKE_TEST_LOOPBACK_TEST_FAIL: Module:[dec] Test:SnakeLoopback failed [dec] consecutive times. Faulty module:[chars] affected ports:[chars] Error:[chars]

Explanation  Snake test failed on the module consecutively

Recommended Action  No action is required.

DIAG_PORT_LB-3

Error Message  DIAG_PORT_LB-3-DIAG_FWD_PATH_SETUP_FAILURE: [chars]. Module:[dec] Error:[chars].

Explanation  Forwarding path setup for port loopback tests failed

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-DIAG_PKT_SEND_FAILURE: [chars]([dec]) [chars]. Error:[chars]

Explanation  Port Loopback test process failed to send loopback packets.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-FSM_LIB_ERROR: [chars]([dec]) [chars]. Error:[chars]

Explanation  Port Loopback test process failed in MTS API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-GET_DIAG_BD_FAIL: [chars]([dec]) Failed to get the BD for Diag VLAN:[dec]. Error:[chars].

Explanation  Failed to get the BD corresponding to the Diag VLAN

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-IFINDEX_LIB_FAILURE: [chars]([dec]) [chars] [chars]:[hex] [chars] [chars]

Explanation  Port Loopback test process failed in if_index library API

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-INVALID_TEST_REQUEST: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed to get test request info.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-INVALID_TEST_RUN: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed to get the current test run information

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-PDB_LIB_API_ERROR: Failed to [chars]. Error:[dec].

Explanation  The port loopback test was not able to get chassis info

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-PIXM_LIB_ERROR: [chars]([dec]) Failed to convert [chars]:[hex] to [chars]. Error:[chars]

Explanation  Port Loopback test process failed to convert port ifindex <-> port index.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-PORT_CLIENT_LIB_ERROR: [chars]([dec]) [chars]. Error:[chars]

Explanation  Port Loopback test process failed in Port Client API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-RESULT_ADD_FAILURE: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed to add the port test result

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-RESULT_SEND_FAILURE: [chars]([dec]) [chars]

Explanation  Port Loopback test process failed to send the test results

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-RW_ENGINE_LOOPBACK_TEST_SPINE_PATH_FAIL: Module:[dec] Test:RewriteEngine Loopback Spine path:[dec] failed [dec] consecutive times. Error:[chars]

Explanation  Rewrite Engine Loopback test failed on the spine path consecutively

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-SOCKET_ERROR: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed in socket operations

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-STATS_LIB_ERROR: [chars]([dec]) [chars]:[dec]

Explanation  Port Loopback test process failed in stats infra lib API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-TEST_RES_SEND_FAIL: Failed to send [chars] test results back to Diagnostics Infrastucture. Error:[chars].

Explanation  The port loopback test was not able to send the test results

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-TIMER_LIB_ERROR: [chars]([dec]) [chars]

Explanation  Port Loopback test process timer handling failure.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-VLAN_ERROR: [chars]([dec]) [chars] Error:[chars]

Explanation  Port Loopback test process failed to get Diagnostic VLAN info

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-VQI_GET_FAIL: Failed to get the Diag VQi from XBM. Error:[chars]

Explanation  Rewrite Engine Loopback test failed to get the Diag VQi from XBAR Mgr

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-3-XBM_CFG_REQ_FAIL: Failed to conigure the XBAR mask while running the RewriteEngineLoopback test. Error:[chars]. Module:[dec] could have gone offline

Explanation  Rewrite Engine Loopback test failed to set the XBAR mask while running the test. The target module could have gone offline

Recommended Action  No action is required.

DIAG_PORT_LB-4

Error Message  DIAG_PORT_LB-4-MTS_LIB_ERROR: [chars]([dec]) [chars]. Warning:[chars]

Explanation  Port Loopback test process failed in MTS API.

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-4-PORT_CFG_REQ_SEND: [chars]([dec]) Failed to send request to configure port ifindex:[dec] for port loopback test

Explanation  Failed to configure/restore the port to do/cleanup port loopback testing

Recommended Action  No action is required.

DIAG_PORT_LB-5

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_DISABLED: DIAG_PORT_LB Disabled

Explanation  DIAG_PORT_LB Service Disabled

Recommended Action  No action is required.

Error Message  DIAG_PORT_LB-5-DIAG_PORT_LB_ENABLED: DIAG_PORT_LB Enabled

Explanation  DIAG_PORT_LB Service nabled

Recommended Action  No action is required.

DPVM Messages

This section contains the DPVM messages.

DPVM-2

Error Message  DPVM-2-ALLOC_FAILED: Memory allocation failed for size:[dec] for [chars]

Explanation  Memory allocation failed for size [dec] for [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-2-DPVM_DUPL_REJECT: [chars]

Explanation  Rejected duplicate pwwn query

Recommended Action  Dpvm overwrite-duplicate-pwwn

DPVM-3

Error Message  DPVM-3-DB_ERR: [chars]

Explanation  An error occured during an DPVM database operation. [chars] indicates the reason for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-3-DDAS_MODE_INVALID: [chars]

Explanation  DDAS mode Invalid. [chars]

Recommended Action  Flip DDAS mode

Error Message  DPVM-3-INIT_FAIL: [chars]

Explanation  An error happened during DPVM Initialization. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-3-MTS_ERR: [chars]

Explanation  An error occured in processing of an MTS message. [chars] indicates the error that occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  DPVM-3-PSS_ERR: [chars]

Explanation  An error occured during an DPVM PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

DPVM-4

Error Message  DPVM-4-ACTIVATION_FAIL: [chars]

Explanation  Activation of DPVM device mappings failed due to [chars]

Recommended Action  Correct the error and reactivate database again

Error Message  DPVM-4-FEATURE_DISABLED: [chars]

Explanation  DPVM is unavailable and disabled now

Recommended Action  No action is required.

DPVM-6

Error Message  DPVM-6-FEATURE_ENABLED: [chars]

Explanation  DPVM is available and enabled now

Recommended Action  No action is required.

Error Message  DPVM-6-INFO: [chars]

Explanation  An event happened that affects DPVM. [chars] indicates the event

Recommended Action  No action is required.

DSTATS Messages

This section contains the DSTATS messages.

DSTATS-2

Error Message  DSTATS-2-PSS_INIT_FAIL: pss initialization failed due to error: [hex]

Explanation  Dstats process pss initialization failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

DSTATS-3

Error Message  DSTATS-3-PSS_CREATE_FAIL: pss create runtime database failed due to error: [hex]

Explanation  Dstats process pss create runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_DELETE_FAIL: pss delete runtime entry key:[hex] failed due to error: [hex]

Explanation  Dstats process pss delete runtime entry key [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_KEY_FAIL: pss set runtime max key failed due to error: [hex]

Explanation  Dstats process pss set runtime max key failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_MAX_VALUE_FAIL: pss set runtime max value failed due to error: [hex]

Explanation  Dstats process pss set runtime max value failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_OPEN_FAIL: pss open runtime database failed due to error: [hex]

Explanation  Dstats process pss open runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_RELOAD_FAIL: pss reload runtime database failed due to error: [hex]

Explanation  Dstats process pss reload runtime database failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_DEBUG_FAIL: pss snapshot runtime debug to uri:[chars] failed due to error: [hex]

Explanation  Dstats process pss snapshot of runtime debug to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_SNAPSHOT_FAIL: pss snapshot runtime to uri:[chars] failed due to error: [hex]

Explanation  Dstats process pss snapshot of runtime to uri [string] failed due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

Error Message  DSTATS-3-PSS_STORE_FAIL: pss store runtime entry key:[hex] val:[hex] failed due to error: [hex]

Explanation  Dstats process pss store runtime entry key [hex] value [hex] failure due to error [hex].

Recommended Action  Collect more information using command 'show flash'. See pss system error codes for reason.

DT_HELPER Messages

This section contains the DT_HELPER messages.

DT_HELPER-2

Error Message  DT_HELPER-2-MALLOC_FAILURE: Memory allocation failed

Explanation  GOLD Test Helper process could not allocate memory

Recommended Action  No action is required.

ECHAT Messages

This section contains the ECHAT messages.

ECHAT-2

Error Message  ECHAT-2-ECHAT_STATUS: TEST: [chars].

Explanation  ECHAT status is reported as [chars].

Recommended Action  No action is required.

ECHAT-3

Error Message  ECHAT-3-ECHAT_INVALID_ADV: Received an invalid advertisement from Jabber ID: [chars].

Explanation  Received an invalid advertisement

Recommended Action  No action is required.

Error Message  ECHAT-3-ECHAT_INVALID_SUMM_POLICY: Received and invalid summarization policy.

Explanation  Summarization policy is invalid

Recommended Action  No action is required.

ECHAT-5

Error Message  ECHAT-5-ECHAT_CE_OFFLINE: Jabber ID [chars] has gone offline.

Explanation  Received presence information

Recommended Action  No action is required.

Error Message  ECHAT-5-ECHAT_CE_ONLINE: Jabber ID [chars] has come online.

Explanation  Received presence information

Recommended Action  No action is required.

Error Message  ECHAT-5-ECHAT_CHANGED_SUMM_POLICY: Summarization policy has been changed.

Explanation  Summarization policy has been changed

Recommended Action  No action is required.

Error Message  ECHAT-5-ECHAT_SEQUENCE_SYNC: Received a sequence number out of sync from Jabber ID: [chars].

Explanation  Received an out of sync sequence number

Recommended Action  No action is required.

ECHAT-6

Error Message  ECHAT-6-ECHAT_TOPO_CHANGE: Topology change caused by advertisement from Jabber ID: [chars].

Explanation  Graph topology has been changed

Recommended Action  No action is required.

ELTMC Messages

This section contains the ELTMC messages.

ELTMC-SLOT#-2

Error Message  ELTMC-SLOT#-2-ELTMC_GENERIC_DEBUG: [chars]

Explanation  Logging some generic debugging info

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTERFACE_INTERNAL_ERROR: Internal error: [chars]:[chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_NOT_FOUND: Interface [chars] not found in ELTM database [chars]

Explanation  ELTM database doesn't have the interface.

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_NOT_SUPP: Interface [chars] not supported by ELTM [chars]

Explanation  ELTM doesn't support the interface for the specified operation

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_TO_LTL: Failed to get LTL for interface [chars] return status [chars]

Explanation  ELTM Failed to get LTL for interface. Packets received on this interface might not be handled correctly by the forwarding engine

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_INTF_TO_SLOT: Failed to get slot for interface [chars] return status [chars]

Explanation  ELTM Failed to get Slot for interface. Port-channels and L2 Learning might be effected

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L2_LIF_ALLOC_FAIL_INTF: Failed to allocate L2 LIF entries in forwarding engine for interfac [chars]

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding for the interface

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L2_LIF_ALLOC_FAIL_VDC: Failed to allocate L2 LIF entries in forwarding engine

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding in this VDC

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L2_LIF_REALLOC_FAIL_INTF: Failed to realloc L2 LIF entries in forwarding engine for interface [chars]

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding for the interface. ISSU failed for certain interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_L3_INGRESS_LIF_ALLOC_FAIL_INTF: Failed to allocate L3 Ingress LIF entries in forwarding engine for interfac [chars]

Explanation  ELTM Failed to allocate L3 Ingress LIF entries in forwarding engine. This will effect Layer 3 forwarding for the interface

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_LDB_REALLOC_FAIL: Failed to realloc LDB in forwarding engine for interface [chars] for non-XL linecard

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. ISSU failed for this VDC. Shutdown the interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_LTL_ISSUE_EXT_COMP: Critical LTL clean-up issue (either ETHPM/PIXM) [chars]

Explanation  LTL didnt get cleaned-up either bcos of ETHPM not sending DELETE or PIXM issuing a duplicate LTL

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_NONXL_LDB_REALLOC_FAIL: Failed to realloc LDB in forwarding engine for certain interfaces for non-XL linecard

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. ISSU failed for this VDC. Shutdown the interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_RSVD_VLAN: Failed to get the reserved vlans. Failed with error [chars]

Explanation  ELTM Failed to get the reserved vlan's. This will effect multicast forwarding on SVI interfaces

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_VDC_LIF_REALLOC_FAIL: Failed to realloc LDB in forwarding engine for vdc [dec]. Reload VDC after config reduction

Explanation  ELTM Failed to allocate L2 LIF entries in forwarding engine. ISSU failed for this VDC. Remove the interfaces and then reload VDC

Recommended Action  No action is required.

Error Message  ELTMC-SLOT#-2-ELTMC_VLAN_INTERNAL_ERROR: Internal error: VLAN [dec]:[chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

ELTM Messages

This section contains the ELTM messages.

ELTM-2

Error Message  ELTM-2-INTERFACE_INTERNAL_ERROR: Internal error: [chars]:[chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTM-2-INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support eltm

Explanation  ELTM hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  ELTM-2-INTF_NOT_FOUND: Interface [chars] not found in ELTM database [chars]

Explanation  ELTM database doesn't have the interface.

Recommended Action  No action is required.

Error Message  ELTM-2-INTF_NOT_SUPP: Interface [chars] not supported by ELTM [chars]

Explanation  ELTM doesn't support the interface for the specified operation

Recommended Action  No action is required.

Error Message  ELTM-2-INTF_TO_LTL: Failed to get LTL for interface [chars] return status [chars]

Explanation  ELTM Failed to get LTL for interface. Packets received on this interface might not be handled correctly by the forwarding engine

Recommended Action  No action is required.

Error Message  ELTM-2-QINQ_TRANSIT_ENABLE: ELTM Failed to set/reset qinq_transit_enable

Explanation  ELTM Failed to set/reset qinq_transit_enable

Recommended Action  No action is required.

ELTM-3

Error Message  ELTM-3-OTV_FEATURE_FAIL: Feature OTV failed : [chars]

Explanation  Error in ELTM while handling feature OTV request from OIM

Recommended Action  No action is required.

ELTM-5

Error Message  ELTM-5-EXT_COMP_ERR: [chars] component error [chars]

Explanation  Recently applied Multicast config on the interface was unsuccessful, so reverting to the old state (before config)

Recommended Action  No action is required.

ELTM-6

Error Message  ELTM-6-SVI_LIF_NOT_PRESENT: [chars]:[chars], collect output of show tech-support eltm/vlan/interface-vlan

Explanation  Mismatch between SVI and vlan-mgr.

Recommended Action  No action is required.

EOU Messages

This section contains the EOU messages.

EOU-2

Error Message  EOU-2-PBACL_APPLICATION_FAILURE: [chars] of host [chars] to/from pbacl group [chars] failed. Error : [chars]

Explanation  Failure of host addition/deletion to/from pbacl group

Recommended Action  Please verify the addition/deletion of the host using the cli "show object-group". If it was a delete request that failed, manual deletion of the host from the group is recommended

EOU-5

Error Message  EOU-5-L2NAC_DISABLED: EOU Disabled

Explanation  Service EOU Disabled

Recommended Action  No action is required.

Error Message  EOU-5-L2NAC_ENABLED: EOU Enabled

Explanation  Service EOU enabled

Recommended Action  No action is required.

EOU-6

Error Message  EOU-6-AAA_DOWN: Default Policy ip: [chars]:retained

Explanation  Policy retained

Recommended Action  No action is required.

Error Message  EOU-6-AUTHTYPE: Authtype: ip: [chars] Authtype:[chars]

Explanation  Authentication type

Recommended Action  No action is required.

Error Message  EOU-6-BAD_PKT: Bad Packet: ip: [chars] Why: [chars]

Explanation  Bad Packet because of reason specified

Recommended Action  No action is required.

Error Message  EOU-6-CTA: CTA: ip: [chars] status(detected/not detected): [chars]

Explanation  CTA detected or not

Recommended Action  No action is required.

Error Message  EOU-6-IDENTITY_MATCH: Identity Match: ip: [chars] Policy: [chars]

Explanation  Identity Matched or not

Recommended Action  No action is required.

Error Message  EOU-6-PBACL_APPLICATION_STATUS: [chars] of host [chars] to/from pbacl group [chars] succeeded

Explanation  Status of host addition/deletion to pbacl group

Recommended Action  No action is required.

Error Message  EOU-6-POLICY: Policy on ip: [chars]: [chars]: [chars]

Explanation  Policy applied

Recommended Action  No action is required.

Error Message  EOU-6-POSTURE: Posture:ip: [chars] Status: [chars], Interface: [chars]

Explanation  Posture of host

Recommended Action  No action is required.

Error Message  EOU-6-SESSION: Session ip: [chars] Action:[chars] , Interface: [chars]

Explanation  Session detected

Recommended Action  No action is required.

Error Message  EOU-6-SOCKET: Service eou on port: [dec]

Explanation  Eou using above port

Recommended Action  No action is required.

Error Message  EOU-6-SQ_EAP_MSG: Status Query: ip: [chars] status: [chars]

Explanation  Status query state

Recommended Action  No action is required.

Error Message  EOU-6-UNKN_EVENT_ERR: Unknow Event Err: ip: [chars] Message: [chars]

Explanation  Error due to unknown event

Recommended Action  No action is required.

Error Message  EOU-6-VERSION_MISMATCH: Eou version mismatch ip: [chars] and version [dec]

Explanation  Eou version mismatch

Recommended Action  No action is required.

EOU-7

Error Message  EOU-7-EOU_DISABLED_INTF: eou disabled on interface [chars]

Explanation  Eou service disabled on interface

Recommended Action  No action is required.

Error Message  EOU-7-EOU_ENABLED_INTF: eou enabled on interface [chars]

Explanation  Eou service enabled on interface

Recommended Action  No action is required.

EPP Messages

This section contains the EPP messages.

EPP-5

Error Message  EPP-5-EPP_FAILURE: Interface [chars] EPP Failure

Explanation  Trunk protocol failed

Recommended Action  'show epp internal event-history err' will indicate the errors encountered

Error Message  EPP-5-EPP_LOOPBACK: Interface [chars] is looped back to the same switch

Explanation  The interface is looped back to another interface on the same switch

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  EPP-5-EPP_TRUNK_PROTOCOL_STATUS: epp trunk protocol is [chars] on switch

Explanation  Epp trunk protocol enabled/disabled on the switch

Recommended Action  No action is required.

ETH-PORT-SEC Messages

This section contains the ETH-PORT-SEC messages.

ETH-PORT-SEC-2

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_ADDR_SEEN: MAC address already secured on peer-switch. Please re-configure after VPC comes up, if this interface is supposed to be a VPC PO

Explanation  Mac already secured on peer

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_MISCONFIG: MAC Addresses present exceed the allowed number of MAC addresses on Port [chars]. Fix the inconsistency on this port.

Explanation  MAC Addresses present exceed the allowed number of MAC addresses.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_REGMAC_ADD_FAIL: Unable to add regmac [chars] for <[chars], vlan [dec]> since it is already registered for <[chars], vlan [dec]>

Explanation  Duplicate regmac detected

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-2-ETH_PORT_SEC_SECURITY_VIOLATION: Triggered violation [chars] on Port [chars]

Explanation  Violation action triggered on port due to security violation.

Recommended Action  No action is required.

ETH-PORT-SEC-3

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_CONFIG_MAC_FAILED: Failed to configure MACs

Explanation  Failed to configure MACs

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_INVALID_VLAN: Invalid VLAN configuration

Explanation  Invalid VLAN configuration

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_PKTSENDFAIL: Failed to send packet, - [chars]

Explanation  Failed to send packet. [char] identifies the reason.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_ANOTHER_PORT: Host [chars] bound to Port [chars] in Vlan [dec] is trying to access Port [chars] in Vlan [dec]

Explanation  Moved the port to violation state due to a mac address seen on one port being seen on another

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_SECURITY_VIOLATION_MAX_MAC_VLAN: Port [chars] moved to [chars] state as host [chars] is trying to access the port in vlan [dec]

Explanation  Moved the port to violation state due to exceeding address count

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_DISABLE: Unable to disable eth_port_sec [chars].

Explanation  Unable to disable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_UNABLE_TO_ENABLE: Unable to enable eth_port_sec [chars].

Explanation  Unable to enable eth_port_sec Service

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-3-ETH_PORT_SEC_VIOL_UPDATE_FAILED: Failed to update violation mode

Explanation  Failed to update violation mode

Recommended Action  No action is required.

ETH-PORT-SEC-5

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_AGE_TIME_EXPIRY: Age Time expired for host [chars] in VLAN [dec] in port [chars]

Explanation  Age time expired for host

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DISABLED: eth_port_sec Disabled on if_index:[hex]

Explanation  Eth_port_sec Service Disabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_DYNAMIC_MAC_ADDRESS_CLEARED: Dynamic MAC addresses for port [chars] cleared

Explanation  Dynamic MAC address for port cleared

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_ENABLED: eth_port_sec Enabled on if_index:[hex]

Explanation  Eth_port_sec Service Enabled

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_ADDITION: A new Host [chars] learnt on Port [chars] in Vlan [dec]

Explanation  A new host is learnt on a port

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_HOST_DELETION: Host [chars] bound to secure port [chars] in Vlan [dec] has been removed

Explanation  A host has been removed

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_INITFAIL: Eth Port Security Initialization failed: [chars]

Explanation  Eth Port Security Initialization failed.[chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  ETH-PORT-SEC-5-ETH_PORT_SEC_MAX_LIMIT_EXCEED: Max Addr per port config cannot be accepted as it will violate the System Max limit. [chars]

Explanation  System wide Max Limit Exceeds

Recommended Action  No action is required.

ETHPORT Messages

This section contains the ETHPORT messages.

ETHPORT-2

Error Message  ETHPORT-2-IF_CRITICAL_FAILURE: (Debug syslog)Critical failure: [chars], [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please follow instructions on the syslog.

Error Message  ETHPORT-2-IF_DOWN_ERROR_DISABLED: Interface [chars] is down (Error disabled. Reason:[chars])

Explanation  The interface encountered an error while configuring it

Recommended Action  Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using a 'shutdown' followed a 'no shutdown' on the interface or removing and re-inserting the fibre optic cable.

Error Message  ETHPORT-2-IF_ERROR_SHUT_LAN_NO_DCX: Shutting lan on interface [chars] that doesn't connect to a DCBX capable adaptor.

Explanation  Shutting lan on interface that doesn't connect to a DCBX capable adaptor.

Recommended Action  No action is required.

Error Message  ETHPORT-2-SEQ_TIMEOUT: Component [chars] timed out on response to opcode [chars] ([chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  ETHPORT-2-SYSLOG_ETHPM_CRITICAL: Critical failure: [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please collect system tech-support

ETHPORT-3

Error Message  ETHPORT-3-IF_DOWN_CHANNEL_ERR_DISABLED: Interface [chars] is down (Channel error disabled)

Explanation  This interface belongs to a PortChannel and the PortChannel is error disabled

Recommended Action  Perform 'shut' and 'no shutdown' on the PortChannel interface that it belongs to

Error Message  ETHPORT-3-IF_ERROR_VLANS_REMOVED: VLANs [chars] on Interface [chars] are removed from suspended state.

Explanation  The VLANs on an interface are being removed from the suspended state

Recommended Action  No action is required.

Error Message  ETHPORT-3-IF_ERROR_VLANS_SUSPENDED: VLANs [chars] on Interface [chars] are being suspended. (Reason: [chars])

Explanation  The VLANs on an interface are being suspended due to some protocol action

Recommended Action  No action is required.

Error Message  ETHPORT-3-IF_SFP_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-3-IF_SFP_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-3-IF_UNSUPPORTED_TRANSCEIVER: Transceiver on interface [chars] is not supported

Explanation  The transceiver for the interface specified in the error message is not a Cisco supported module

Recommended Action  Replace the module with a compatible transceiver. If the transceiver was purchased from Cisco, please contact Cisco TAC to get the transceiver replaced

Error Message  ETHPORT-3-IF_XCVR_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-3-IF_XCVR_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

ETHPORT-4

Error Message  ETHPORT-4-IF_40G_NOT_ADMIN_DOWN: 40G member port [chars] is not in ADMIN DOWN state. Speed change is not allowed

Explanation  Speed change is not allowed. Admin state is not down on 40G member ports

Recommended Action  Please shut all member ports before speed change

Error Message  ETHPORT-4-IF_NON_QUALIFIED_TRANSCEIVER: Non-qualified transceiver on interface [chars] was detected

Explanation  The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action  Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

Error Message  ETHPORT-4-IF_SFP_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-4-IF_XCVR_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  ETHPORT-4-INVALID_MACADDR: Interface [chars] rejected IPv6-embedded mac [chars] config

Explanation  The IPv6 derived mac-address is an invalid one.

Recommended Action  No action is required.

ETHPORT-5

Error Message  ETHPORT-5-IF_ADMIN_UP: Interface [chars] is admin up [chars]

Explanation  Interface is admin up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_BANDWIDTH_CHANGE: Interface [chars],bandwidth changed to [chars] Kbit

Explanation  Bandwidth of the interface (port channel) has changed and this change is updated

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down (Administratively down)

Explanation  Interface has been configured to be administratively down

Recommended Action  Perform 'no shutdown'

Error Message  ETHPORT-5-IF_DOWN_CFG_CHANGE: Interface [chars] is down(Config change)

Explanation  FCIP interface temporarily down due to reconfiguration

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_CHANNEL_ADMIN_DOWN: Interface [chars] is down (Channel admin down)

Explanation  This interface belongs to a PortChannel and the PortChannel is configured to be administratively down

Recommended Action  Perform 'no shutdown' on the PortChannel interface that it belongs to

Error Message  ETHPORT-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS: Interface [chars] is down (Channel membership update in progress)

Explanation  The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel

Recommended Action  Retry the configuration again

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_ADDR_ASSIGN_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to domain id assignment failure)

Explanation  Isolated due to a failure while assigning a domain

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_INVALID_RCF_RECEIVED: Interface [chars] is down (Isolation due to invalid fabric reconfiguration)

Explanation  Invalid RCF received

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_MANAGER_DISABLED: Interface [chars] is down (Isolation due to domain manager disabled)

Explanation  Isolated due to domain manager being disabled

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE: Interface [chars] is down (Isolation due to domain manager other side not responding)

Explanation  Remote end domain manager not responding

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_OTHER_SIDE_EPORT_ISOLATED: Interface [chars] is down (Isolation due to domain other side eport isolated)

Explanation  Isolating this interface due to the remote end being isolated

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to domain overlap)

Explanation  Isolated due to domain overlap

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_ELP_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ELP failure)

Explanation  ELP failed on the interface

Recommended Action  Check the output of 'show port internal info' in the 'ELP failure reason' field

Error Message  ETHPORT-5-IF_DOWN_EPP_FAILURE: Interface [chars] is down (Error Disabled - EPP Failure)

Explanation  Trunk protocol failed

Recommended Action  'show port internal event-history msgs' will indicate the trunk protocol exchanges to determine why it failed

Error Message  ETHPORT-5-IF_DOWN_ESC_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ESC failure)

Explanation  ESC failed on the interface

Recommended Action  Check the output of 'show port internal event-history' to determine the ESC protocol exchanges to determine how it failed

Error Message  ETHPORT-5-IF_DOWN_ETH_IF_DOWN: Interface [chars] is down(Tunnel port src interface down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected, the interface is administratively enabled

Error Message  ETHPORT-5-IF_DOWN_ETH_LINK_DOWN: Interface [chars] is down(Tunnel port src interface link down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected and the remote end is also active

Error Message  ETHPORT-5-IF_DOWN_FCOT_NOT_PRESENT: Interface [chars] is down (FCOT not present)

Explanation  The FCOT has been removed

Recommended Action  Insert an FCOT

Error Message  ETHPORT-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED: Interface [chars] is down (Error disabled - Fcot vendor not supported)

Explanation  Fcot inserted is not a supported one

Recommended Action  Please contact customer support for a list of authorized transceiver vendors

Error Message  ETHPORT-5-IF_DOWN_HW_FAILURE: Interface [chars] is down (Hardware Failure)

Explanation  The module's hardware has failed

Recommended Action  Collect more information about failed module using command 'show module internal all module'

Error Message  ETHPORT-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  The port VSAN has been suspended or deleted

Recommended Action  Assign a new active port VSAN to the interface

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE: Interface [chars] is down (Error disabled - Incompatible admin port mode)

Explanation  The configured mode is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the list of modes supported on this interface

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBBCREDIT: Interface [chars] is down (Error disabled - Incompatible admin port rxbbcredit)

Explanation  The configured receive B2B credit size is not supported

Recommended Action  Get the allowed receive B2B credit size from 'show port internal info'

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBUFSIZE: Interface [chars] is down (Error disabled - Incompatible admin port rxbufsize)

Explanation  The configured receive buffer size is not supported

Recommended Action  Get the allowed receive buffer size from 'show port internal info'

Error Message  ETHPORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED: Interface [chars] is down (Error disabled - Incompatible admin port speed)

Explanation  The configured speed is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the range of speed supported on this interface

Error Message  ETHPORT-5-IF_DOWN_INITIALIZING: Interface [chars] is down (Initializing)

Explanation  The interface is in the process of coming up

Recommended Action  If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

Error Message  ETHPORT-5-IF_DOWN_INTERFACE_REMOVED: Interface [chars] is down (Interface removed)

Explanation  Interface removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_LINK_FAILURE: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  ETHPORT-5-IF_DOWN_LOOPBACK_DIAG_FAILURE: Interface [chars] is down (Diag failure)

Explanation  Diag failed on the interface

Recommended Action  Collect more information about failed interface using command 'attach module' to connect to module

Error Message  ETHPORT-5-IF_DOWN_LOOPBACK_ISOLATION: Interface [chars] is down (Isolation due to port loopback to same switch)

Explanation  The interface is looped back to another interface on the same switch

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  ETHPORT-5-IF_DOWN_MODULE_REMOVED: Interface [chars] is down (module removed)

Explanation  Interface is down because the module was removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_NONE: Interface [chars] is down ([chars])

Explanation  Interface is down with a possible reason.

Recommended Action  Collect more information about port using command 'show port internal info/event-history' to determine why it went down

Error Message  ETHPORT-5-IF_DOWN_NON_PARTICIPATING: Interface [chars] is down (Non participating)

Explanation  The loop port has been put into non participating mode

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_OFFLINE: Interface [chars] is down (Offline)

Explanation  The interface has been placed into the offline state

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_PARENT_ADMIN_DOWN: Interface [chars] is down (Parent interface down)

Explanation  Parent interface is down

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_PARENT_DOWN: Interface [chars] is down (Parent interface is down)

Explanation  The physical link on the parent interface has gone down

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_PEER_CLOSE: Interface [chars] is down(TCP conn. closed by peer)

Explanation  The FCIP peer connected to this interface closed the TCP connection

Recommended Action  This command will provide the peer IP address of this FCIP interface: show interface. Check to see why the peer closed the TCP connection

Error Message  ETHPORT-5-IF_DOWN_PEER_RESET: Interface [chars] is down(TCP conn. reset by peer)

Explanation  TCP connection to the FCIP peer got reset

Recommended Action  The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Check to see why the peer reset the TCP connection

Error Message  ETHPORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface [chars] is down (No operational members)

Explanation  This is a PortChannel interface and all its members are operationally down

Recommended Action  Enable at least one of the PortChannel's members

Error Message  ETHPORT-5-IF_DOWN_PORT_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to port vsan mismatch)

Explanation  Isolated due to a mismatch in the configured port VSAN of the local and remote ends

Recommended Action  Configure the port VSAN of the local and remote interfaces to be the same and perform a 'shutdown' and a 'no shutdown'

Error Message  ETHPORT-5-IF_DOWN_RCF_IN_PROGRESS: Interface [chars] is down (RCF in progress)

Explanation  There is an RCF in progress

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_SOFTWARE_FAILURE: Interface [chars] is down (Port software failure)

Explanation  The software servicing the data path on the port has failed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_SRC_MOD_NOT_ONLINE: Interface [chars] is down(Tunnel source module not online)

Explanation  Module that has the tunnel source port of this FCIP interface is not fully online

Recommended Action  The module that has the tunnel src port is coming online. Please use show mod to find module status

Error Message  ETHPORT-5-IF_DOWN_SRC_PORT_NOT_BOUND: Interface [chars] is down (Tunnel port src interface unbound)

Explanation  Tunnel port source interface unbound

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_SRC_PORT_REMOVED: Interface [chars] is down(Tunnel src port removed)

Explanation  Tunnel source port of this FCIP interface has been removed

Recommended Action  The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode)

Explanation  This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel

Recommended Action  Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed)

Explanation  This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel

Recommended Action  Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED_BY_WWN: Interface [chars] is down (Suspended due to incompatible remote switch WWN)

Explanation  This interface belongs to a PortChannel and remote switch WWN of the interface is different from that of the PortChannel

Recommended Action  Ensure that this interface is connected to the same remote switch as all the other interfaces in the PortChannel

Error Message  ETHPORT-5-IF_DOWN_SUSPENDED: Interface [chars] is down (Suspended)

Explanation  This interface belongs to a PortChannel and has been suspended due to an error while bringing it up

Recommended Action  Perform a 'shutdown' and a 'no shutdown'. If this happens again obtain output of 'show port internal info/event-history' on the interface

Error Message  ETHPORT-5-IF_DOWN_TCP_KEEP_ALIVE_EXPIRED: Interface [chars] is down(TCP conn. closed - Keep alive expired)

Explanation  TCP session to the FCIP peer got closed due to loss of TCP keep alive

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  ETHPORT-5-IF_DOWN_TCP_MAX_RETRANSMIT: Interface [chars] is down(TCP conn. closed - retransmit failure)

Explanation  Interface is down due to maximum retransmission failure

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  ETHPORT-5-IF_DOWN_TCP_PERSIST_TIMER_EXPIRED: Interface [chars] is down(TCP conn. closed - Persist timer expired)

Explanation  TCP session to the FCIP peer closed because TCP persist timer expired

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  ETHPORT-5-IF_DOWN_UPGRADE_IN_PROGRESS: Interface [chars] is down (Linecard upgrade in progress)

Explanation  Upgrade of the linecard software is in progress

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_VRF_UNUSABLE: Interface [chars] is down (Vrf down)

Explanation  The vrf for which this interface is a member is removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to vsan mismatch)

Explanation  This is a trunking interface and the VSANs configured do not match with the VSANs configured on the remote end

Recommended Action  Check the VSANs configured on the local end with the remote end

Error Message  ETHPORT-5-IF_DOWN_ZONE_MERGE_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to zone merge failure)

Explanation  Isolated due to a failure during zone merge

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DOWN_ZONE_REMOTE_NO_RESP_ISOLATION: Interface [chars] is down (Isolation due to remote zone server not responding)

Explanation  Isolated due to remote zone server not responding

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_DUPLEX: Interface [chars], operational duplex mode changed to [chars]

Explanation  Operational duplex mode has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_ERRDIS_RECOVERY: Interface [chars] is being recovered from error disabled state (Last Reason:[chars])

Explanation  Interface is being recovered from error disabled state

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_HARDWARE: Interface [chars], hardware type changed to [chars]

Explanation  There was a change in the hardware characteristic of an interface, such as a transceiver module plugged in or removed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_L2MP_MODE: Interface [chars], l2mp-mode changed to [chars]

Explanation  The l2mp-mode on the port has changed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_PEER_LINK_DELAY_TIMER_OFF: The delay timer for peer-link [chars] has been turned off

Explanation  The bringup delay timer for the peer-link has been turned off as a result of which the peer-link bringup will be resumed

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_PEER_LINK_DELAY_TIMER_ON: The delay timer for peer-link [chars] has been turned on

Explanation  The bringup delay timer for the peer-link is on as a result of which the peer-link bringup will be delayed with the delay indicated by the configured value of the timer. Execute \show vpc\ to find out how much time is remaining

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_RX_FLOW_CONTROL: Interface [chars], operational Receive Flow Control state changed to [chars]

Explanation  Operational receive flow control has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_TRUNK_DOWN: Interface [chars], vlan [chars] down

Explanation  Interface [chars] is trunking, VLANs [chars] are down

Recommended Action  The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface vsan

Error Message  ETHPORT-5-IF_TRUNK_UP: Interface [chars], vlan [chars] up

Explanation  Interface [chars] is trunking, VLANs [chars] are up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_TX_FLOW_CONTROL: Interface [chars], operational Transmit Flow Control state changed to [chars]

Explanation  Operational transmit flow control has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-IF_UP: Interface [chars] is up [chars]

Explanation  Interface is up in mode specified, if applicable

Recommended Action  No action is required.

Error Message  ETHPORT-5-SPEED: Interface [chars], operational speed changed to [chars]

Explanation  Operational speed has changed when link came up

Recommended Action  No action is required.

Error Message  ETHPORT-5-STORM_CONTROL_ABOVE_THRESHOLD: Traffic in port [chars] exceeds the configured threshold [chars]

Explanation  Traffic on specified port is beyond the configured storm-control threshold, and the excess traffic is being dropped

Recommended Action  Identify source of traffic storm

Error Message  ETHPORT-5-STORM_CONTROL_BELOW_THRESHOLD: Traffic in port [chars] has fallen below the configured threshold [chars]

Explanation  Traffic on specified port has returned to within configured storm-control threshold

Recommended Action  No action is required.

Error Message  ETHPORT-5-SYSTEM_INTERFACE_SHUTDOWN: The physical interfaces are being brought down as VDC going into maintenance mode

Explanation  The physical interfaces are being brought down as VDC going into maintenance mode

Recommended Action  No action is required.

ETH_PORT_CHANNEL Messages

This section contains the ETH_PORT_CHANNEL messages.

ETH_PORT_CHANNEL-1

Error Message  ETH_PORT_CHANNEL-1-LC_CFG_FAILURE: configuring module [dec] failed [[chars]]

Explanation  Module configuration failed

Recommended Action  Module will be automatically reset

Error Message  ETH_PORT_CHANNEL-1-MALLOC_FAILED: cannot allocate memory (size [dec])

Explanation  No enough memory

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-1-MAP_PARAM_FAILURE: mapping parameter failed for [chars] [[chars]]

Explanation  Parameter mapping failed

Recommended Action  Specified service is misbehaving; check its status

Error Message  ETH_PORT_CHANNEL-1-MCAST_SEND_FAILURE: failed to send multicast [chars]: [chars]

Explanation  Failed to send a multicast message to all modules, usually because some module went down

Recommended Action  Run show port-channel consistency to check consistency

ETH_PORT_CHANNEL-2

Error Message  ETH_PORT_CHANNEL-2-RESET_MODULE: reset module [dec] for not responding or returning error

Explanation  A module is reset for not responding or returning error

Recommended Action  No action is required.

ETH_PORT_CHANNEL-3

Error Message  ETH_PORT_CHANNEL-3-ADD_REM_MEMBERS_FAILURE: [chars]

Explanation  Some service(s) failed to add or remove ports to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-ALL_DROP_TIMEOUT: Some component(s) (sap:[chars]) timed out on dropping notif:[chars] (for:[chars]); Please collect

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-CLEAR_PORT_CLIENT_STATS_FAILURE: [chars]

Explanation  Failed to clear stats for port [chars] err: [hex] ([chars])

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-COMPAT_CHECK_FAILURE: [chars] is not compatible

Explanation  Compatibility check failed when adding ports to port-channel

Recommended Action  Make sure the compatibility parameters are consistent while adding ports to port-channel, or use force option

Error Message  ETH_PORT_CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-MINLINK_REQ_NOT_MET_DUE_TO_BFD_CHANNEL_REINIT: [chars] does not meet min-link requirement based on BFD state. Reinit port-channel

Explanation  Port-channel does not meet min-link requirement based on BFD state

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-NUM_ACTIVE_PORTS_ERROR: Port-channel:[chars] active_nports [dec]; No member is active; Please collect

Explanation  Port-channel num active ports error

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_HWCFG_FAIL_ERROR: Port-channel:[chars] mbr:[chars] SAP [dec] returned error [chars] for opc [chars]; if lacp port-channel please collect or please collect

Explanation  Port-channel hwcfg fail error

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_INTERNAL_ERROR: Port-channel:[chars] mbr:[chars]; if lacp port-channel please collect or please collect

Explanation  Port-channel internal error

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_PORT_DEL_IN_PC_UP_ERROR: Port-channel:[chars] mbr:[chars]; if lacp port-channel please collect or please collect

Explanation  Port-channel port del in pc_up. Shut resp recvd before bundle member down

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PCM_PORT_DOWN_IN_PC_UP_ERROR: Port-channel:[chars] mbr:[chars]; if lacp port-channel please collect or please collect

Explanation  Port-channel port down in pc_up. No bundle member down

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-PORT_CHANNEL_NOT_FOUND: [chars] is not found

Explanation  Cannot find port-channel in its database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-3-RESOURCE_ALLOC_FAILED_PORT_CHANNEL_DELETED: [chars] deleted

Explanation  Port-channel deleted from running config

Recommended Action  May need to re-configure the port-channel and its members

Error Message  ETH_PORT_CHANNEL-3-RSP_TIMEOUT: Component [chars] timed out on response to opcode:[chars] (for:[chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_MBR_CHANGE_FAILURE: [chars]

Explanation  Some service failed shadow member change to port-channel

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_CREATE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel create

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-SHADOW_PC_DELETE_FAILURE: [chars]

Explanation  Some service failed shadow port-channel delete

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-3-TIMEOUT: timed out after [dec] seconds [type [chars], state [chars]]

Explanation  Some operation timed out

Recommended Action  Run show port-channel consistency to check all module connectivity and consistency

ETH_PORT_CHANNEL-4

Error Message  ETH_PORT_CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars] (different module inserted)

Explanation  Port is removed from a port-channel because a different module was inserted to the same slot

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  ETH_PORT_CHANNEL-4-PORT_CHANNEL_RANGE: The total number of port channels configured in the range exceeds maximum: [dec].

Explanation  The total number of port channels configured in the range exceeds maximum

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-PORT_CHANNEL_RESTORE: The total number of port channels restored: [dec] exceeds maximum: [dec]. This may corrupt TCAM entries. Please reduce port channel number to no greater than maximum.

Explanation  The total number of port channels restored exceeds maximum

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-PORT_INDIVIDUAL: port [chars] is operationally individual

Explanation  The port is operating as an individual link even though it is locally or remotely configured to be part of a port channel

Recommended Action  Check the configuration of the port locally and remotely to ensure that it can operate as part of a port channel

Error Message  ETH_PORT_CHANNEL-4-PORT_NOT_FOUND: port [chars] is not part of port-channel

Explanation  Cannot find the port in port-channel database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-4-UNEXPECTED_RESPONSE: unexpected response [chars] from [chars]

Explanation  Received an unexpected response and discarded

Recommended Action  No action is required.

ETH_PORT_CHANNEL-5

Error Message  ETH_PORT_CHANNEL-5-AUTO_CREATE_FAILURE: [chars] [chars]

Explanation  Auto create process on the port failed

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-FOP_CHANGED: [chars]: first operational port changed from [chars] to [chars]

Explanation  The first operational port in a port-channel is changed

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode

Explanation  Compatibility check failed when adding ports to port-channel

Recommended Action  Make sure the compatibility parameters are consistent between the ports and the port-channel

Error Message  ETH_PORT_CHANNEL-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed

Explanation  Operational compatibility check failed on the port in a port-channel

Recommended Action  Make sure the compatibility parameters are consistent between the ports and the port-channel

Error Message  ETH_PORT_CHANNEL-5-MAX_CHANNEL_DISALLOWED: Module failed to come online because port channel interface greater than [dec] is present

Explanation  The port-channel number configured on the switch is larger than 128

Recommended Action  Delete the set of port channel interface which is greater than 128

Error Message  ETH_PORT_CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_CHANNEL_DELAYED_LACP: [chars]: port-channel is up with member [chars] in delayed-lacp mode

Explanation  Port-channel is up in delayed-lacp mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_CHANNEL_LACP_MODE: [chars]: [chars]

Explanation  Port-channel is coming up in lacp mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_DOWN: [chars]: [chars] is down

Explanation  Port goes down in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_HOT_STANDBY_DOWN: [chars]: hot-standby port [chars] is down

Explanation  Port-channel hot-standby member goes down

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_HOT_STANDBY: [chars]: [chars] goes to hot-standby

Explanation  Port goes to hot-standby in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_INDIVIDUAL_DOWN: individual port [chars] is down

Explanation  Port-channel member operating in individual mode goes down

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_SUSPENDED: [chars]: [chars] is suspended

Explanation  Port is suspended in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_UP: [chars]: [chars] is up

Explanation  Port comes up in a port-channel

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-5-PORT_WAIT_BFD: [chars] waiting for BFD session to get established

Explanation  Port waiting for BFD session establishment

Recommended Action  None

Error Message  ETH_PORT_CHANNEL-5-SUBGROUP_ID_CHANGE: Interface [chars] in port-channel[dec] subgroup-id changed from [dec] to [dec]

Explanation  The port's subgroup-id got changed

Recommended Action  No action is required.

ETH_PORT_CHANNEL-6

Error Message  ETH_PORT_CHANNEL-6-RESYNC: resyncing [chars] with all modules

Explanation  Resync modules with sup after an error or switchover

Recommended Action  No action is required.

ETH_PORT_CHANNEL-7

Error Message  ETH_PORT_CHANNEL-7-GSYNC_DONE: global synchronization is done

Explanation  Port-channel manager finished global synchronization

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-GSYNC_REQ: requesting global synchronization

Explanation  Port-channel manager requested a global synchronization from active sup

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_ACTIVE: started in active mode

Explanation  Port-channel manager started in active mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_DEFAULT: started with default configuration

Explanation  Port-channel manager started with default configuration

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_STANDBY: started in standby mode

Explanation  Port-channel manager started in standby mode

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_STATEFUL: started statefully

Explanation  Port-channel manager started with running configuration

Recommended Action  No action is required.

Error Message  ETH_PORT_CHANNEL-7-START_STATELESS: started statelessly

Explanation  Port-channel manager started with startup configuration

Recommended Action  No action is required.

EVMC Messages

This section contains the EVMC messages.

EVMC-3

Error Message  EVMC-3-MTS_OPERATION_FAILED: [chars]([dec]): [chars]

Explanation  Internal IPC operation failed in Event Manager Client

Recommended Action  No action is required.

EVMC-4

Error Message  EVMC-4-ACTION_CFG_MONITOR_COLLECT: [chars]([dec]): Action configuration disallowed for Monitor Collect Policy

Explanation  Configuring Policy Action for Monitor Collect Policy isnot allowed and hence, has been rejected

Recommended Action  No action is required.

EVMC-5

Error Message  EVMC-5-AVL_CREATE_FAIL: [chars]([dec]): AVL Tree creation failure

Explanation  Event Manager could not initialize local policy store

Recommended Action  No action is required.

Error Message  EVMC-5-MALLOC_FAILURE: [chars]([dec]): Memory allocation failure

Explanation  Event Manager Client process could not allocate memory

Recommended Action  No action is required.

Error Message  EVMC-5-RT_PSS_OP_FAILURE: [chars]([dec]): Failed to [chars]. Error:[chars]

Explanation  Event Manager Client could not access HA store

Recommended Action  No action is required.

EVMED Messages

This section contains the EVMED messages.

EVMED-2

Error Message  EVMED-2-EVMED_PSS_DELETE_FAILURE: Delete from PSS failed

Explanation  Delete from PSS failed

Recommended Action  No action is required.

Error Message  EVMED-2-EVMED_PSS_WRITE_FAILURE: Write to PSS failed

Explanation  Write to PSS failed

Recommended Action  No action is required.

EVMED-5

Error Message  EVMED-5-EVMED_DISABLED: Event Detectors Disabled

Explanation  Event manager event detector service disabled

Recommended Action  No action is required.

Error Message  EVMED-5-EVMED_ENABLED: Event Detectors Enabled

Explanation  Event manager event detector service enabled

Recommended Action  No action is required.

EVMS Messages

This section contains the EVMS messages.

EVMS-2

Error Message  EVMS-2-EVMS_PSS_DELETE_FAILURE: Delete from PSS failed

Explanation  Delete from PSS failed

Recommended Action  No action is required.

Error Message  EVMS-2-EVMS_PSS_WRITE_FAILURE: Write to PSS failed

Explanation  Write to PSS failed

Recommended Action  No action is required.

Error Message  EVMS-2-EVMS_SHOW_POLICY_ALLOC_FAILURE: Insufficient memory: policy information shown will be incomplete

Explanation  Memory allocation failed. so complete requested information is not being shown

Recommended Action  No action is required.

EVMS-4

Error Message  EVMS-4-EVMS_APPLET_NO_ACTION_DEFAULT: WARNING: The default system policy actions are being skipped

Explanation  The default system policy actions are being skipped

Recommended Action  No action is required.

EVMS-6

Error Message  EVMS-6-EVMS_LOGGING_NO_SPACE: logflash full, so deleting first event archive file

Explanation  As the logflash is full, first of the present event archive files is deleted

Recommended Action  No action is required.

EXAMPLE_TEST Messages

This section contains the EXAMPLE_TEST messages.

EXAMPLE_TEST-5

Error Message  EXAMPLE_TEST-5-EXAMPLE_TEST_DISABLED: EXAMPLE_TEST Disabled

Explanation  EXAMPLE_TEST Service Disabled

Recommended Action  No action is required.

Error Message  EXAMPLE_TEST-5-EXAMPLE_TEST_ENABLED: EXAMPLE_TEST Enabled

Explanation  EXAMPLE_TEST Service nabled

Recommended Action  No action is required.

EXCEPTIONLOG Messages

This section contains the EXCEPTIONLOG messages.

EXCEPTIONLOG-SLOT#-2

Error Message  EXCEPTIONLOG-SLOT#-2-LC_EXP_MSG: Linecard exception: [chars] is the affected Port bit map. [dec] Additional information - [chars]

Explanation  LC Exception event.

Recommended Action  No action is required.

EX_SYSLOG Messages

This section contains the EX_SYSLOG messages.

EX_SYSLOG-0

Error Message  EX_SYSLOG-0-EMER_MSG: Emergency Message - [dec]

Explanation  A Dummy emergency message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-1

Error Message  EX_SYSLOG-1-ALERT_MSG: Alert Message - [chars] [dec]

Explanation  A Dummy alert message to test syslogd from ex_syslog. [chars] is the a dummy text. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-2

Error Message  EX_SYSLOG-2-CRIT_MSG: Critical Message - [dec]

Explanation  A Dummy critical message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-3

Error Message  EX_SYSLOG-3-ERR_MSG: Error Message - [dec]

Explanation  A Dummy error message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-4

Error Message  EX_SYSLOG-4-WARNING_MSG: Warning Message - [dec]

Explanation  A Dummy warning message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-5

Error Message  EX_SYSLOG-5-NOTICE_MSG: Notice Message - [dec]

Explanation  A Dummy notice message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-6

Error Message  EX_SYSLOG-6-INFO_MSG: Info Message - [dec]

Explanation  A Dummy info message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

EX_SYSLOG-7

Error Message  EX_SYSLOG-7-DEBUG_MSG: Debug Message - [dec]

Explanation  A Dummy debug message to test syslogd from ex_syslog. [dec] is the message count

Recommended Action  No action is required.

FCDOMAIN Messages

This section contains the FCDOMAIN messages.

FCDOMAIN-2

Error Message  FCDOMAIN-2-DOMS_CONFLICT: Conflict detected: ([dec]) domain ID [dec] WWN [chars]

Explanation  Conflict detected ([dec]) domain ID [dec] with WWN [chars].

Recommended Action  Check which switches have the same WWN and change either one; then change either's domain ID.

Error Message  FCDOMAIN-2-EPORT_ISOLATED: Isolation of interface [chars] (reason: [chars])

Explanation  Fcdomain has isolated interface [chars] (reason: [chars].) Perform a show interface. Based on the reason specified, you might have to ensure domains are adequate and unique in the VSAN and perform a disruptive restart [fcdomain restart disruptive vsan ] or to reinitialize the port.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-FC2BIND_FAILED: Bind to FC2 Service failed

Explanation  Fcdomain has not been able to contact the FC2 module.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-FC2_INITIALIZATION_FAILED: FC initialization sequence failed

Explanation  The fcdomain has not been able to complete the initialization sequence with the Fibre Channel subsystem. fcdomain depends on resources not available at the moment: the switch might be short in memory or some other component might be unable to provide the necessary information to fcdomain.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-FC2_SET_SOCKOPT_DM_SOCK_FAILED: set sockopt to FC2 Service failed

Explanation  Fcdomain has not been able to setsockopt to the FC2 module.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-FCID_PERSISTENT_TBL_COMPLETELY_FULL: FCID persistent table is completely full

Explanation  The FCID persistent table is full. Perform [show fcdomain fcid persistent vsan ] to view the entries currently in the table. No more entries can be saved as persistent FCIDs across reboots.

Recommended Action  Purge stale entries [purge fcdomain fcid] to obtain more free entries OR disable the feature on certain VSANs which are not critical enough [no fcdomain fcid persistent].

Error Message  FCDOMAIN-2-HIGH_PRIORITY_MTSBIND_FAILED: Bind for high priority IPC failed

Explanation  Fcdomain has not been able to contact the Inter Process Communication (IPC) module for its high priority queue.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-INITIALIZATION_FAILED: Initialization sequence failed

Explanation  The fcdomain has not been able to complete the initialization sequence. fcdomain depends on resources not available at the moment: the switch might be short in memory or some other component might be unable to provide the necessary information to fcdomain.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-MTSBIND_FAILED: Bind to IPC failed

Explanation  Fcdomain has not been able to contact the Inter Process Communication (IPC) module.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-MTSREGISTRATION_FAILED: Registration of opcodes with IPC Service failed

Explanation  Fcdomain has not been able to register its messages with the Inter Process Communication (IPC) module.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-MTS_INITIALIZATION_FAILED: IPC initialization sequence failed

Explanation  The fcdomain has not been able to complete the initialization sequence with the IPC (Inter Process Communication) subsystem. fcdomain depends on resources not available at the moment: the switch might be short in memory or some other component might be unable to provide the necessary information to fcdomain.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-MY_NON_VIRTUAL_DOM_CONFLICTS: During VSAN merge detected that the local switch has the same domain ID [dec] and WWN [chars] of another switch

Explanation  It has been detected that the local switch has the same domain ID [dec] and WWN [chars] of another switch.

Recommended Action  Check which switches have the same WWN and change either one; then change either's domain ID.

Error Message  FCDOMAIN-2-NON_VIRTUAL_DOMS_CONFLICTS: During VSAN merge detected conflict between two switches having the same non-virtual domain ID [dec] and the same WWN [chars]

Explanation  It has been detected that two switches have the same non-virtual domain ID [dec] and the same WWN [chars].

Recommended Action  Check which switches have the same WWN and change either one; then change either's domain ID.

Error Message  FCDOMAIN-2-PSSBIND_FAILED: Bind to Persistent Storage Service failed

Explanation  Fcdomain has not been able to contact the Persistent Storage Service (PSS).

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-RDIRJT: Rejected request for domain ID [dec], WWN requestor [chars] reason code [dec] reason_code_expln [dec]

Explanation  An invalid request for domain IDs has been rejected by fcdomain.

Recommended Action  Perform [show fcdomain vsan ] for all the switches in the affected VSAN; if a switch does not have a valid current domain ID, configure preferred domain ID zero, then perform [fcdomain restart vsan ] in the affected VSAN.

Error Message  FCDOMAIN-2-SYSBIND_FAILED: Bind to System Manager service failed

Explanation  Fcdomain has not been able to contact the System Manager.

Recommended Action  No action is required.

Error Message  FCDOMAIN-2-SYSMGR_INITIALIZATION_FAILED: System Manager initialization sequence failed

Explanation  The fcdomain has not been able to complete the initialization sequence with the System Manager. fcdomain depends on resources not available at the moment: the switch might be short in memory or some other component might be unable to provide the necessary information to fcdomain.

Recommended Action  No action is required.

FCDOMAIN-3

Error Message  FCDOMAIN-3-COMMITERRORLOCALINVALIDALLOWEDDOMS: A remote switch attempted to locally apply an illicit allowed domains configuration

Explanation  A remote switch attempted to locally apply an allowed domains configuration that doesn't include all currently assigned domains or the locally configured domain.

Recommended Action  No action is required.

Error Message  FCDOMAIN-3-COMMITERRORREMOTEINVALIDALLOWEDDOMS: A remote switch (domain ID [dec], WWN [chars]) refuses to locally apply the proposed allowed domains

Explanation  The remote switch with domain ID [dec] and WWN [chars] refuses to locally apply the proposed allowed domains probably due to incompatibility with its local configured domain or the domain ID list.

Recommended Action  Check the configuration on the remote switch, and make sure that the proposed allowed domains include it. Also, make sure that the the proposed allowed domains include all the domains in the domain ID list.

Error Message  FCDOMAIN-3-MTSOPENTRX_FAILED: IPC failure (opening of a transaction failed)

Explanation  Fcdomain was not able to open a transaction( HA Purposes.)

Recommended Action  No action is required.

Error Message  FCDOMAIN-3-MTSRECV_FAILED: IPC failure (receiving of a message failed)

Explanation  Fcdomain has not been able to receive a message from the Inter Process Communication (IPC) module.

Recommended Action  Please perform fcdomain restart in the affected VSAN (non disruptive.)

Error Message  FCDOMAIN-3-MTSRESP_FAILED: IPC failure replying to a request message (error [hex])

Explanation  Fcdomain has not been able to reply to a request coming from the Inter Process Communication (IPC) module (error [hex]).

Recommended Action  Please perform fcdomain restart in the affected VSAN (non disruptive).

Error Message  FCDOMAIN-3-MTSSENDREQ_FAILED: IPC failure (sending of a request failed)

Explanation  Fcdomain was not able to send a request using the Inter Process Communication module.

Recommended Action  Please perform [fcdomain restart vsan ] in the affected VSAN (non disruptive.)

Error Message  FCDOMAIN-3-MTSSEND_FAILED: IPC failure (sending of a message (syserr [hex], opc [dec], mtsq [dec], sap.node [hex], sap_addr [dec]) failed)

Explanation  Fcdomain has not been able to send a message to the Message Transactional Service (MTS).

Recommended Action  Please perform [fcdomain restart vsan ] in the affected VSAN (non disruptive).

Error Message  FCDOMAIN-3-MTS_H_RECV_FAILED: IPC failure (receiving of a message failed)

Explanation  Fcdomain has not been able to receive a message from the Inter Process Communication (IPC) module.

Recommended Action  Please perform fcdomain restart in the affected VSAN (non disruptive.)

Error Message  FCDOMAIN-3-NVRAMFAILURE: NVRAM open failed

Explanation  Reading the last assigned runtime domain IDs from Non Volatile RAM (NVRAM) failed.

Recommended Action  Fcdomain is able to continue without access to the Non Volatile RAM (NVRAM.)

Error Message  FCDOMAIN-3-PORT_SUSPENDED: Response (Cmd Code [hex]) for SWILS [hex] intended for [chars] is received on [chars]

Explanation  An FC2 response frame (Command Code [hex]) for SWILS [hex] that was intended for interface [chars] has been received on [chars] instead.

Recommended Action  Check the configuration of both interfaces on the local switch and the interfaces on the other side of their corresponding links. In particular, check whether they should all belong to the same port-channel.

Error Message  FCDOMAIN-3-SDWRAPBIND_FAILED: Bind to debug server failed

Explanation  Fcdomain feature has not been able to contact the debug service. Any problems occurring in the fcdomain feature will not be logged.

Recommended Action  No action is required.

Error Message  FCDOMAIN-3-SDWRAPHISTINIT_FAILED: Initialization of history message list failed.

Explanation  Fcdomain feature has not been able to contact the debug history service. Any problems occurring in the fcdomain feature will not be logged to this debug history.

Recommended Action  No action is required.

Error Message  FCDOMAIN-3-VSAN_MERGE_DETECTED: Merge detected with VSAN [dec] (Common Fabric Name [chars])

Explanation  The local VSAN and VSAN [dec] have the same principal switch [chars], hence are connected in the same logical fabric.

Recommended Action  No action is required.

FCDOMAIN-4

Error Message  FCDOMAIN-4-DM_ALLOWED_DM_LIST_MOD_ON_SUBORDINATE: Allowed domain list for vsan [dec] modified on subordinate switch with fcdomain distribution enabled

Explanation  When distribution is enabled, it is recommended to modify the allow domain list on the principal switch only.

Recommended Action  Abort the current session on the local switch and start a new one on the principal switch.

Error Message  FCDOMAIN-4-FABRICCONFSTARTRCF: Disruptive reconfiguration started

Explanation  A disruptive reconfiguration (RCF phase) of the VSAN has started. This can happen when two or more fabrics merge disruptively, or when the user manually triggers a diruptive reconfiguration of the VSAN.

Recommended Action  No action is required.

Error Message  FCDOMAIN-4-FC2_CORRUPTED: Received malformed FC2 [chars] frame

Explanation  Fcdomain received a malformed FC2-SWILS frame.

Recommended Action  No action is required.

Error Message  FCDOMAIN-4-FCID_PERSISTENT_TBL_ALMOST_FULL: FCID persistent table is almost full

Explanation  Fcdomain has 80% or more of the FCID persistent table full with entries. Perform [show fcdomain fcid persistent vsan ] to view the entries currently in the table.

Recommended Action  Purge stale entries [purge fcdomain fcid] to obtain more free entries.

Error Message  FCDOMAIN-4-SELECTIVE_RESTART_IN_INTEROP: Not all fcdomain optimizations are supported in interop VSANs. Selective-Restart disabled forcefully in VSAN [dec]

Explanation  Selective-restart optimization is not supported in interop VSANs and disabled forcefully in affected VSAN

Recommended Action  No action is required.

FCDOMAIN-5

Error Message  FCDOMAIN-5-DOMAIN_TYPE_IS_PREFERRED: The domain ID type is currently configured as preferred in all the existing VSANs

Explanation  All the currently existing VSANs have the domain ID type configured as preferred. This means that with a low probability the domain ID of the local VSAN might change afer a reconfiguration. A reconfiguration can happen when two or more VSANs are merged or a principal link flaps. A principal link is either an upstream or a downstream link.

Recommended Action  Type [fcdomain domain static vsan ] to configure as static the domain ID type in an existing VSAN.

Error Message  FCDOMAIN-5-FCIDP_DISABLED: FCID persistency feature is currently not enabled in any of the existing VSANs

Explanation  All the currently existing VSANs have the FCID persistency feature disabled.

Recommended Action  Type [fcdomain fcid persistent vsan ] to enable FCID persistency in an existing VSAN. Type [fcdomain fcid persistent global-enable] to automatically enable the FCID persistency feature on all newly created VSANs.

Error Message  FCDOMAIN-5-FCID_PERSISTENT_TBL_HALF_FULL: FCID persistent table is half full

Explanation  Fcdomain has 50% of the FCID persistent table full with entries. Perform [show fcdomain fcid persistent vsan ] to view the entries currently in the table.

Recommended Action  You may want to purge stale entries [purge fcdomain fcid] to obtain more free entries.

Error Message  FCDOMAIN-5-UNKNOWNDOMAININCFSDATAREQUEST: Received CFS Data request from unknown domain [dec].

Explanation  A CFS Data request from the unknown domain [dec] has been received.

Recommended Action  No action is required.

Error Message  FCDOMAIN-5-UNKNOWNDOMAININCFSLOCKREQUEST: Received CFS Lock request from unknown domain [dec].

Explanation  A CFS Lock request from the unknown domain [dec] has been received.

Recommended Action  No action is required.

Error Message  FCDOMAIN-5-UNKNOWNDOMAININCFSRELEASEREQUEST: Received CFS Release request from unknown domain [dec].

Explanation  A CFS Release request from the unknown domain [dec] has been received.

Recommended Action  No action is required.

Error Message  FCDOMAIN-5-UNKNOWNDOMAININUNKNOWNCFSREQUEST: Received CFS request from unknown domain [dec].

Explanation  A CFS request from the unknown domain [dec] has been received.

Recommended Action  No action is required.

FCDOMAIN-6

Error Message  FCDOMAIN-6-BF_STARTED: BF started by [chars]

Explanation  Build Fabric has been started in this VSAN

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-CANNOTFREESINGLEFCID: Impossible to free single FCIDs

Explanation  Impossible to free single FCIDs.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-CLEARLOCKNOTIFICATIONRECEIVED: Implict lock release.

Explanation  Lock has been implicitly released due to a clear session operation.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-DEVICEALREADYOWNSDIFFERENTFCIDS: The device already owns different FCIDs

Explanation  Requested different FCIDs without any freeing in between.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-DOMAINID_INVALID: Local domain ID invalid

Explanation  The local domain ID is invalid.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-DOMAINID_VALID: Local domain ID [dec] available

Explanation  The domain ID [dec] is available.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-DOWNSTREAM_SWITCHED: Downstream interface has been fast-switched from [chars] to [chars]

Explanation  Because of a link failure the downstream interface has been fast-switched from [dec] to [dec].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-EPORT_ALREADY_CREATED: Interface [chars] already created

Explanation  Interface [chars] already created.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-EPORT_ALREADY_DOWN: Interface [chars] is already down

Explanation  Interface [chars] already down.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-EPORT_CLEANUP: Interface [chars] received cleanup request

Explanation  Fcdomain on interface [chars] has received a cleanup request.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-EPORT_CREATED: Creation of interface [chars]

Explanation  Fcdomain is going to create interface [chars].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-EPORT_DOWN: Interface [chars] is down

Explanation  Fcdomain is going to remove interface [chars] from its database.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FABRICCONFSTARTBF: Non disruptive reconfiguration started

Explanation  A non disruptive reconfiguration (BF phase) of the VSAN has started. This can happen when two or more fabrics merge, or when the user manually triggers a non diruptive reconfiguration of the VSAN.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FABRICNAME_INVALID: Fabric name not available

Explanation  Fabric name not available.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FABRICNAME_VALID: Fabric name [chars] available

Explanation  Fabric name [chars] available.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FCIDALREADYFREE: FCIDs already free

Explanation  FCIDs already free.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FCIDNOTSTORED: FCIDs not stored

Explanation  FCIDs not stored.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FCIDP_ENABLED_DOM_TYPE_PREFERRED: FCID persistency is enabled, but the domain ID type is configured as preferred

Explanation  The FCID persistency feature is enabled, but the domain ID type is configured as preferred. This means that with a low probability the domain ID of the local VSAN might change afer a reconfiguration. A reconfiguration can happen when two or more VSANs are merged or a principal link flaps. A principal link is either an upstream or a downstream link. Should the domain ID change, all the FCIDs associated with it would be invalidated.

Recommended Action  Type [fcdomain domain static vsan ] to configure as static the domain ID type in an existing VSAN.

Error Message  FCDOMAIN-6-FCIDS_ASSIGNED: Assigned a sequence of 256 contiguous FCIDs starting from FCID [hex]:[hex]:[hex]

Explanation  Assigned a sequence of 256 contiguous FCIDs starting from FCID [hex]:[hex]:[hex].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FCIDS_FREED: Freed a sequence of 256 contiguous FCIDs starting from FCID [hex]:[hex]:[hex]

Explanation  Freed a sequence of 256 contiguous FCIDs starting from FCID [hex]:[hex]:[hex].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FCID_ASSIGNED: Assigned single FCID [hex]:[hex]:[hex]

Explanation  Assigned single FCID [hex]:[hex]:[hex].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-FCID_FREED: Freed single FCID [hex]:[hex]:[hex]

Explanation  Freed single FCID [hex]:[hex]:[hex].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-INCORRECTDOMAINRANGE: Requested FCIDs with domain field not in expected range

Explanation  Requested FCIDs with domain field not in expected range.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-INCORRECTDOMAIN: Requested FCIDs with domain field different from local domain

Explanation  Requested FCIDs with domain field different from local domain.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-INVALIDARG: Requested FCID of type 00.00.YY, but specifying an entire area

Explanation  Requested FCID of type 00.00.YY, but specifying an entire area.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-MY_SAME_WWN_DIFFERENT_DOMS_CONFLICTS: During VSAN merge detected local WWN [chars] is already in use by another switch (the two switches have different domain IDs: [dec] (local) and [dec])

Explanation  It has been detected that the local switch has the same WWN [chars] of another switch, and that they have different domain IDs: [dec] (local) and [dec].

Recommended Action  Check which switches have the same WWN and change either one.

Error Message  FCDOMAIN-6-NODOMAIN: Local domain not available

Explanation  The local domain is not available yet.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-NOFREEFCID: No free FCIDs

Explanation  No free FCIDs.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-NOTOWNER: Feature [dec] cannot free FCID [dec]:[dec]:[dec] (feature [dec] is the actual owner)

Explanation  Feature UUID [dec] cannot free FCID [dec]:[dec]:[dec] because it is not its owner (UUID actual owner is [dec]).

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-OTHER_SIDE_VIRTUAL_IVR_DOMS_OVERLAPPING: During VSAN merge detected overlap with virtual IVR domain ID [dec] from across the link

Explanation  It has been detected an overlap with the virtual IVR domain ID [dec] from across the link during an attempt to merge the local VSAN.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-PSWSSTARTED: Principal Switch Selection started

Explanation  Fcdomain started a principal switch selection phase to elect a principal switch in this VSAN.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-RCF_STARTED: RCF started by [chars]

Explanation  Reconfigure Fabric has been started in this VSAN

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-REQSINGLEFCIDWITHINRESERVEDRANGE: Requested single FCIDs in area [dec] within the reserved range

Explanation  Requested single FCIDs in area [dec] within the reserved range.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-REQUESTEDFCIDNOTFREE: Requested FCIDs not free

Explanation  Requested FCIDs not free.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-REQUESTEDFCIDRESERVED: Requested reserved FCIDs

Explanation  Requested reserved FCIDs.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-REQUESTEDRESERVEDFCIDMISMATCH: Requested persistent FCIDs, but there is a mismatch

Explanation  Requested persistent FCIDs, but there is a mismatch.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-SAME_WWNS_DIFFERENT_DOMS_CONFLICTS: During VSAN merge detected two switches with same WWN [chars] and different non-virtual domain IDs [dec] and [dec]

Explanation  It has been detected that two switches have the same WWN [chars], but different non-virtual domain IDs: [dec] and [dec].

Recommended Action  Check which switches have the same WWN and change either one.

Error Message  FCDOMAIN-6-TIMER_UNKNOWN: fcdomain has received a notification for an unknown timer expiration

Explanation  A timer unknown to fcdomain has expired.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-UPSTREAM_SWITCHED: Upstream interface has been fast-switched from [chars] to [chars]

Explanation  Because of a link failure the upstream interface has been fast-switched from [dec] to [dec].

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-UUIDNOSPACEFOUND: No available space to store the identity of the requestor the FCIDs

Explanation  No available space to store the identity of the requestor the FCIDs.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-UUIDNOTFOUND: Universal Unique ID (UUID) not found

Explanation  Universal Unique ID (UUID) not found.

Recommended Action  No action is required.

Error Message  FCDOMAIN-6-VIRTUAL_IVR_DOMS_OVERLAPPING: During VSAN merge detected overlap with local virtual IVR domain ID [dec]

Explanation  It has been detected an overlap with the local virtual IVR domain ID [dec] during an attempt to merge the local VSAN.

Recommended Action  No action is required.

FCDOMAIN-7

Error Message  FCDOMAIN-7-EPORT_ALREADY_ISOLATED: Interface [chars] is already isolated or down

Explanation  Fcdomain was going to isolate interface [chars], but the interface is already isolated.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-FABRICCONFCOMPLETEDBF: Non disruptive reconfiguration completed

Explanation  A non disruptive reconfiguration (BF phase) completed. This can happen when two or more fabrics merged, or when the user manually triggered a non diruptive reconfiguration of the VSAN.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-FABRICCONFCOMPLETEDRCF: Disruptive reconfiguration completed

Explanation  A disruptive reconfiguration (RCF phase) of the VSAN has completed. This can happen when two or more fabrics merged disruptively, or when the user manually triggered a diruptive reconfiguration of the VSAN.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-FC2_RETRY: Retransmission of FC2 frame on interface [chars] (Cmd Code: [hex])

Explanation  Fcdomain is retrying an FC2 frame on interface [chars] due to loss/no response. The Command Code of the frame is [hex].

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-FCID_IN_USE_PURGING_FOR_FICON_MGR: FICON needs to purge the persistent FCID table, but at least one FCID is still in use, preventing this purge from completely remove all entries belonging to the VSAN.

Explanation  There may be a problem in the sequence that shuts down all interfaces before fcdomain receives a request from FICON Manager to purge the persistent FCID table.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-FSM_FAILED: FSM transition failed on interface [chars] (current state [chars])

Explanation  Fcdomain state machine generated an invalid event on interface [chars], for which no proper action was defined (current state [chars].)

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-FSM_FORBIDDEN_TRANSITION: fcdomain state machine has hit a forbidden transition

Explanation  Fcdomain state machine has tried to execute a forbidden transition.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-INTERFACERDY: Interface [chars] ready

Explanation  Interface [chars] is ready.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-PREACTIONTYPE_UNKNOWN: fcdomain state machine has hit an unknown pre-action type

Explanation  An undefined pre-action type has been used.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-PSWSCOMPLETED: Principal Switch Selection completed

Explanation  A Principal Switch Selection (PSwS phase) completed.

Recommended Action  No action is required.

Error Message  FCDOMAIN-7-RDIACC: Assigned domain ID [dec], WWN of requestor [chars] (requested domain ID [dec])

Explanation  Domain ID [dec] has been received by VSAN with WWN [chars] (requested domain ID was [dec].)

Recommended Action  No action is required.

FCD Messages

This section contains the FCD messages.

FCD-7

Error Message  FCD-7-SB3_ABTS_EXCHANGE: sb3 aborted exchange [hex] from vsan:[dec] ch:[hex] chi:[hex] ccw:[hex] token:[hex] cmd:[hex] reason:[chars] state:[chars]:[dec]

Explanation  SB3 aborted exchange due to reason given. Aborts are caused by either the channel or control unit detecting a device protocol error. Recovery actions are performed to restore communication. In certain circumstances aborts occur in normal operations.

Recommended Action  No action is required if communication with CUP device is still operational.

Error Message  FCD-7-SB3_UCS_PER_FILE_FN: VSAN:[dec] Unit Check for perform file function, reason: [chars]

Explanation  SB3 failed perform file function. Failure is caused by error in the file main frame sent to director.

Recommended Action  No action is required if communication with CUP device is still operational.

FCFWD Messages

This section contains the FCFWD messages.

FCFWD-3

Error Message  FCFWD-3-ERROR: [chars]

Explanation  Fcfwd encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FCFWD-4

Error Message  FCFWD-4-WARNING: [chars]

Explanation  Fcfwd is generating a relevant notification

Recommended Action  No action is required.

FCFWD-6

Error Message  FCFWD-6-INFO: [chars]

Explanation  An fcfwd event occurred

Recommended Action  No action is required.

FCFWD-SLOT#-2

Error Message  FCFWD-SLOT#-2-FIB_HW_ECMP_AUTO_RECOVERY_DISABLED: ECMP auto recovery disabled.

Explanation  ECMP auto recovery disabled.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_ECMP_AUTO_RECOVERY_ENABLED: ECMP auto recovery enabled, trigger will kick-in if atleast [dec] hardware ECMP path(s) are free.

Explanation  ECMP auto recovery enabled.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_ECMP_FP_ENTRY_EXHAUSION: Hardware MPLS ACL entries exceeded in hardware TCAM, ECMP MPLS forwarding may not work.

Explanation  Hardware ACL resources exhausted

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_ECMP_TABLE_FULL: ECMP hardware table full.

Explanation  ECMP hardware table full condition detected.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_IPV4_TUNNEL_DECAP_TABLE_FULL_CLRD: IPv4 tunnel decap hardware table full exception cleared

Explanation  The Tunnel IPv4 decap table is with in limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_IPV4_TUNNEL_DECAP_TABLE_FULL: IPv4 tunnel decap hardware table full. IP tunnel decapsulation may not work for some GRE/IPinIP traffic

Explanation  The Tunnel V4 decap table is full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_IPV6_TUNNEL_DECAP_TABLE_FULL_CLRD: IPv6 tunnel decap hardware table full exception cleared

Explanation  The Tunnel IPv6 decap table is with in limits.

Recommended Action  Ipfib

Error Message  FCFWD-SLOT#-2-FIB_HW_IPV6_TUNNEL_DECAP_TABLE_FULL: IPv6 tunnel decap hardware table full. IP tunnel decapsulation may not work for some GRE/IPinIP traffic

Explanation  The Tunnel V6 decap table is full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_IP_TUNNEL_DECAP_TABLE_FULL_CLRD: IP TUNNEL decap hardware table full exception cleared

Explanation  The Tunnel decap table is with in limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_IP_TUNNEL_DECAP_TABLE_FULL: IP TUNNEL decap hardware table full. IP tunnel decapsulation may not work for some GRE/IPinIP traffic

Explanation  The Tunnel decap table is full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_MPLS_IIF_ENTRY_EXHAUSION: MPLS L3 IF hardware table full. MPLS forwarding may not work on this linecard

Explanation  MPLS L3 IF hardware table full condition detected

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_MPLS_TUNNEL_TABLE_FULL: MPLS TUNNEL hardware table full. MPLS tunnel encapsulation may not work for IP->MPLS traffic on this linecard

Explanation  MPLS TUNNEL hardware table full condition detected

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_TUNNEL_DMAC_TABLE_FULL: MPLS DMAC hardware table full. MPLS forwarding may not work on this linecard

Explanation  MPLS DMAC hardware table is full. MPLS forwarding may not work on this linecard

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_HW_TUNNEL_ENCAP_TABLE_FULL: MPLS Encap hardware table full. MPLS tunnel encap/decap may not work on this linecard

Explanation  MPLS Encap hardware table is full. MPLS tunnel encap/decap may not work on this linecard

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MCAST_BIDIR_ACL_MISSING_N3K: MCAST-BIDIR TCAM region not carved , use 'hardware profile tcam region mcast-bidir 256' to carve the region.

Explanation  FIB MCAST-BIDIR tcam not carved

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MCAST_BIDIR_ACL_MISSING: mcast-bidir TCAM region not carved on unit: [dec] or failed init. Use 'hardware profile tcam resource template ref-template nfe(T2)/nfe2(TH)' 'mcast_bidir 256.''Apply the service-template'

Explanation  FIB MCAST Bidir tcam not carved

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MCAST_LIMIT_REACHD: Multicast Route Limit Exceeded.

Explanation  The Multicast Route Limit in the host table has reached.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MCAST_LOAD_BALANCING: OIFL Sharing Enabled. Load Balancing for Multicast traffic across groups is not possible.

Explanation  OIFL Sharing Enabled. Load Balancing for Multicast traffic across groups is not possible.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MCAST_REPL_RESOURCE_EXHAUSTION: FIB MCAST replication resource exhaustion

Explanation  FIB MCAST replication resource exhaustion. Failed to program IPMC index [dec] on unit [dec]

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MCAST_TABLE_FULL: Multicast route add failed due to Table full or Hash collision. vrf/vlan [dec] group [chars] source [chars].

Explanation  The multicast route table is full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_MPLS_EGRESS_SW_INDEX_ALLOC_FAILURE: MPLS egress software index alloc failure

Explanation  FIB MPLS egress sw index alloc failure

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXCEP_CLRD: FIB TCAM resource usage exception cleared

Explanation  The TCAM device in the L3 forwarding ASIC is within system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXCEP_LPM_65_TO_127_IPV6_CLRD: FIB TCAM resource usage exception for IPV6 routes in LPM-65_TO_127 cleared

Explanation  The TCAM device in the L3 forwarding ASIC is within system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_HOST_IPV4: FIB TCAM exhausted for IPV4 routes in Host table, IPV4 Host routes will be programmed in LPM table if possible

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV4 entries in host table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_HOST_IPV6: FIB TCAM exhausted for IPV6 routes in Host table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV6 entries in host table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_HOST: FIB TCAM exhausted for IPV4/IPV6 routes in the Host table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV4/IPV6 entries in the host table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_LPM_128_IPV6: FIB TCAM exhausted for IPV6 routes in LPM-128 table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV6 entries in LPM-128 table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_LPM_65_TO_127_IPV6: FIB TCAM exhausted for IPV6 routes in LPM-65_TO_127 table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV6 entries in LPM-65_TO_127 table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_LPM_IPV4: FIB TCAM exhausted for IPV4 routes in LPM table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV4 entries in LPM table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_LPM_IPV6: FIB TCAM exhausted for IPV6 routes in LPM table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV6 entries in LPM table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION_LPM: FIB TCAM exhausted for IPV4/IPV6 routes in the LPM table

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits for IPV4/IPV6 entries in the LPM table.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TCAM_RESOURCE_EXHAUSTION: FIB TCAM exhausted

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TRIE_RESOURCE_EXCEP_CLRD: FIB TRIE resource usage exception cleared

Explanation  The TRIE resources in the L3 forwarding ASIC is within system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TRIE_RESOURCE_EXHAUSTION_LPM_IPV4: FIB TRIE exhausted for IPV4 LPM routes

Explanation  The TRIE tiles in the L3 forwarding ASIC has reached its system limits for IPV4 entries

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TRIE_RESOURCE_EXHAUSTION_LPM_IPV6: FIB TRIE exhausted for IPV6 LPM routes

Explanation  The TRIE tiles in the L3 forwarding ASIC has reached its system limits for IPV6 entries

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-FIB_TUNNEL_DEL_PENDING: Tunnel [hex] delete in-progress, please wait for completion

Explanation  Tunnel interface is deleted but there are still routes depend on it

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-LFIB_HASH_COLLISION: MPLS label create failed due to hash collision for [chars] unit [dec] VRF: [dec], [dec], flags:[hex], Error: [chars]([hex])

Explanation  MPLS Label creation failed due to hash collision

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-MFIB_MAX_ROUTE_LIMIT_REACHED: Maximum number of routes reached.(8192)

Explanation  The maximum number of total (*,G) and (S,G) allowed on the system are 8192. And this limit is reached

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_ADJ_ROLLBACK: Unicast adjacency create failed, rolling back for index: [dec], LIF: [dec], version: [dec], pos: [dec]

Explanation  Unicast Routing route destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_BAD_SW_INDEX: Egress Object destroy: Bad sw-index for Egr-ID: [dec]

Explanation  Unicast Routing route destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_EGRESS_TABLE_EXHAUSTION_CLEARED: Egress Adjacency Table Full exception cleared for unit [dec]

Explanation  The TCAM device in the L3 forwarding ASIC is within system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_EGRESS_TABLE_EXHAUSTION: Egress Adjacency Table Full exception for unit [dec]

Explanation  The TCAM device in the L3 forwarding ASIC has reached its system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_HASH_COLLISION: Unicast host create failed due to hash collision for [chars] unit [dec] VRF: [dec], [chars], flags:[hex], Error: [chars]([hex])

Explanation  Unicast Routing Host route creation failed due to hash collision

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_HOST_CREATE: Unicast host create failed for [chars] unit [dec] VRF: [dec], [chars]/[dec], flags:[hex], intf:[hex], Error: [chars]([dec])

Explanation  Unicast Routing Host route creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_MALLOC_FAIL: Heap memory alloc fail at [chars] ([chars]:[dec]) type [dec] for [dec] bytes

Explanation  Allocated heap has exceeded configured heap size

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_MULTIPATH_EGRESS_CREATE: Unicast Routing ECMP-[dec] for size [dec] creation failed [chars]([dec])

Explanation  Unicast Routing multipath ecmp-group creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_MULTIPATH_EGRESS_MAX_CREATE: Unicast ecmp max size [dec] create fail [chars]([dec]) ([dec] [dec] [hex] [dec])

Explanation  Unicast Routing multipath ecmp-group creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_MULTIPATH_TABLE_EXHAUSTION: Unicast ecmp table exhausted - max index [dec]

Explanation  Unicast Routing multipath ecmp-group creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_ROUTE_CREATE: Unicast route create failed for [chars] unit [dec], VRF: [dec], [chars]/[dec], flags:[hex], intf:[hex], Error: [chars]([dec])

Explanation  Unicast Routing route creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_SA_ROUTE_CREATE: Unicast route create failed in Multicast SA TCAM for [chars] unit [dec], VRF: [dec], [chars]/[dec], flags:[hex], intf:[hex], Error: [chars]([dec])

Explanation  Multicast SA tcam route creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-2-UFIB_VOBJ_ROLLBACK: Unicast vobj create failed, rolling back for index:[dec], num-cnhs: [dec], bcm-nhcount: [dec], ecmp-id: [dec]

Explanation  Unicast Routing route destroy failed

Recommended Action  No action is required.

FCFWD-SLOT#-3

Error Message  FCFWD-SLOT#-3-FIB_MCAST_ROUTE_DELETION_FAILED: FIB MCAST route deletion failed

Explanation  FIB MCAST route deletion failed Failed to delete hw route ([chars], [chars]) vlan [dec] on unit [dec]

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-3-UFIB_BCM_MULTIPATH_EGRESS_DESTROY: Unicast Routing ecmp-group for unit [dec], index [dec] destroy failed [chars]([dec])

Explanation  Unicast Routing multipath ecmp-group destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-3-UFIB_HOST_DESTROY: Unicast host destroy failed for [chars] unit [dec] VRF: [dec], [chars]/[dec], flags:[hex], intf:[hex], Error: [chars]([dec])

Explanation  Unicast Routing host route destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-3-UFIB_MULTIPATH_EGRESS_DESTROY: Unicast Routing ecmp-group for index [dec] destroy failed [chars]([dec])

Explanation  Unicast Routing multipath ecmp-group destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-3-UFIB_ROUTE_DESTROY: Unicast route destroy failed for [chars] unit [dec] VRF: [dec], [chars]/[dec], flags:[hex], intf:[hex], Error: [chars]([dec])

Explanation  Unicast Routing route destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-3-UFIB_V4_EGRESS_CREATE: Unicast IPv4 Egress-create failed for [chars]/[chars], unit [dec], flags [hex], error: [chars]([dec])

Explanation  Unicast Routing next-hop Egress object creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-3-UFIB_V6_EGRESS_CREATE: Unicast IPv6 Egress-create failed for [chars]/[chars], unit [dec], flags [hex], error: [chars]([dec])

Explanation  Unicast Routing next-hop Egress object creation failed

Recommended Action  No action is required.

FCFWD-SLOT#-4

Error Message  FCFWD-SLOT#-4-FIB_HW_ENABLE_MPLS_TCAM_WARNING: MPLS TCAM region not carved , use 'hardware access-list tcam region' to carve a region.

Explanation  Enable MPLS TCAM for MPLS forwarding to work

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-FIB_MCAST_TABLE_ALMOST_FULL: Multicast Route entry table is [dec]% full.

Explanation  The Multicast Route entry table is threshold% full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-FIB_MCAST_TABLE_EXCEEDED_OR_FULL: Multicast Route entry table is [dec] exceeded or full.

Explanation  The Multicast Route entry table is exceeded or full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-FIB_NS_CACHE_FULL: Forwarding cache entries for EOQs is full, some flows will not use EOQ buffers.

Explanation  Cache entries needed for EOQ operation have reached its system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-FIB_TCAM_RESOURCE_WARNING: FIB TCAM usage is at 95 percent

Explanation  The TCAM device in the L3 forwarding ASIC is reaching its system limits.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_BCM_EGRESS_DESTROY: Unicast Routing next-hop for unit [dec], index [dec] destroy failed [chars]([dec])

Explanation  Unicast Routing multipath ecmp-group destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_DEFAULT_ROUTE: Default route created for VRF: [dec], [chars]/[dec], flags:[hex], intf:[hex], ret: [chars]([dec])

Explanation  Unicast Routing route creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_ECMP_PROG: ECMP-id [hex] Mbr-cnt [dec] Intf [hex] Hw-egr-adj [dec]

Explanation  Unicast Routing route creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_EGRESS_CREATE_PORT_INFO_MISSING: Unicast Routing next-hop creation port [dec] error [chars]

Explanation  Unicast Routing next-hop creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_EGRESS_CREATE: Ucast IPv[dec] Egress sw-index [dec] Update in the same buffer as Create, Error!

Explanation  Unicast Routing next-hop creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_EGRESS_DESTROY: Unicast Routing next-hop for index [dec] destroy failed [chars]([dec])

Explanation  Unicast Routing multipath ecmp-group destroy failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_NH_BUFFER_FAILED: Cannot allocate SDK Next-hop buffer of size [dec]

Explanation  Unicast Routing next-hop creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_NUM_EGRESS_CREATE: Flushing [dec] (FIB num-tlvs [dec]) Egress-create/update TLVs

Explanation  Unicast Routing next-hop creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_PIXMC_ERR: Unicast adjacency dmod/dport lookup failed ifindex: [hex], lif:[dec] error [dec] ([chars])

Explanation  Unicast Routing next-hop creation failed

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_PLATFORM_ERR: Unicast get platofrm card-id type failed

Explanation  Unicast Routing failed to get the right fib mode for entry population

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_PLATFORM_TABLE_ID_ERR: Failed to get table id for intf [hex], vrf [dec]

Explanation  Failed to get the table id

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_PLATFORM_VPN_ERR: Reserved / Unsupported vpn id passed, vrf [dec]

Explanation  Reserved / Unsupported vpn id

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-4-UFIB_TABLE_THRESHOLD_REACHED: Unicast Routing [chars] table usage has reached [dec]% threshold

Explanation  Unicast Routing Host/LPM Table usage has reached the threshold value

Recommended Action  No action is required.

FCFWD-SLOT#-6

Error Message  FCFWD-SLOT#-6-FIB_MCAST_TABLE_LESS_THAN_ALMOST_FULL: Multicast Route entry table is now less than [dec]% full.

Explanation  The Multicast Route entry table is now less than threshold% full.

Recommended Action  No action is required.

Error Message  FCFWD-SLOT#-6-UFIB_TABLE_BELOW_THRESHOLD: Unicast Routing [chars] table usage has come below [dec]% threshold

Explanation  Unicast Routing Host/LPM Table usage has come below the threshold value

Recommended Action  No action is required.

FCNS Messages

This section contains the FCNS messages.

FCNS-2

Error Message  FCNS-2-DB_HARD_LIMIT: : [chars]

Explanation  Name server database is full. The max number of entries, [dec], of ports is already present in the database

Recommended Action  No action is required.

Error Message  FCNS-2-DB_SOFT_LIMIT: : [chars]

Explanation  Number of FCNS DB entries should not exceed scale soft limit.

Recommended Action  No action is required.

Error Message  FCNS-2-INIT_FAILURE: : [chars]

Explanation  Fcns initialisation has failed due to [chars].

Recommended Action  No action is required.

Error Message  FCNS-2-NO_RESPONSE: for query [chars] from domain [dec]

Explanation  No response for query [chars] from domain [dec].

Recommended Action  No action is required.

Error Message  FCNS-2-PSS_VERSION_MISMATCH: : for [chars]

Explanation  Version mismatch for pss of type [chars].

Recommended Action  No action is required.

Error Message  FCNS-2-RELOAD_FAILURE: : [chars]

Explanation  Failed to reload information from PSS: [chars].

Recommended Action  No action is required.

FCNS-3

Error Message  FCNS-3-BAD_FRAME: : [chars]

Explanation  Received a bad frame from the network: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-CFG_FAILURE: : [chars]

Explanation  A failure related to fcns configuration: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-CHUNK_FAILURE: : [chars]

Explanation  Chunk memory failure: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-DB_FAILURE: : [chars]

Explanation  A failure occured in fcns database: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-MALLOC_FAILURE: : [chars]

Explanation  Malloc failed: [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-MGMT_SEC_SDB_ERR: [chars] : [chars]

Explanation  Mgmt-security shared-db [chars] : [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCNS-3-MTS_FAILURE: : [chars] [chars]

Explanation  Failure occured trying to do an MTS operation: [chars] [chars].

Recommended Action  No action is required.

Error Message  FCNS-3-PSS_FAILURE: : [chars]

Explanation  Pss failure: [chars].

Recommended Action  No action is required.

FCNS-4

Error Message  FCNS-4-MGMT_SEC_RJT: FC CT Managment request rejected: [chars]. command [hex], from FCID [hex]

Explanation  Mgmt-security has rejected FC CT mgmt Server query: [chars]. command [hex]. from FCID [hex].

Recommended Action  No action is required.

Error Message  FCNS-4-QUERY_NO_RESPONSE: for query [chars] from domain [dec]

Explanation  No response for query [chars] from domain [dec].

Recommended Action  No action is required.

FCNS-6

Error Message  FCNS-6-DB_INFO: : [chars] [hex]

Explanation  Database modification:[chars] for entry [hex].

Recommended Action  No action is required.

Error Message  FCNS-6-MGMT_SERVER_REQ: FCNS received FC CT Mgmt Server [chars]. Command [hex], from FCID [hex]

Explanation  FCNS: received management server FC CT [chars]. Command [hex], from FCID [hex]

Recommended Action  No action is required.

Error Message  FCNS-6-PORT_NAME_MODIFY: FCID: [chars] Modifying pwwn from [chars] to [chars]. Collect fcns/fcr tech-support and logs

Explanation  Port Name for an existing NS entry is being changed

Recommended Action  No action is required.

Error Message  FCNS-6-STATUS_INFO: : [chars]

Explanation  A change in fcns status: [chars].

Recommended Action  No action is required.

FCOELC Messages

This section contains the FCOELC messages.

FCOELC-2

Error Message  FCOELC-2-FCOELC_PSS_RESTORE_FAILED: FCoE-LC PSS Restore operation failed, error: [chars]

Explanation  FCoE-LC PSS Restore operation failed

Recommended Action  No action is required.

FCOE_MGR Messages

This section contains the FCOE_MGR messages.

FCOE_MGR-2

Error Message  FCOE_MGR-2-FCOE_MGR_MODULE_NOT_LICENSED: FCoE Manager Module:[dec] not licensed

Explanation  FCOE_MGR Line Card not licensed

Recommended Action  No action is required.

Error Message  FCOE_MGR-2-FCOE_MGR_PSS_RESTORE_FAILED: FCoE Manager PSS Restore operation failed, error: [chars]

Explanation  FCoE Manager PSS Restore operation failed

Recommended Action  No action is required.

FCOE_MGR-5

Error Message  FCOE_MGR-5-FCOE_MGR_DISABLED: FCOE_MGR Disabled

Explanation  FCOE_MGR Service Disabled

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_ENABLED: FCOE_MGR Enabled

Explanation  FCOE_MGR Service Enabled

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_INFO: [chars]

Explanation  FCoE Manager general info

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_MODULE_LICENSE_CHECKIN: FCoE Manager License Checkin:[dec]

Explanation  FCOE_MGR Line Card license checked in

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_MODULE_LICENSE_CHECKOUT: FCoE Manager License Checkout:[dec]

Explanation  FCOE_MGR Line Card license checked out

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_SOLICITATION_FROM_SAME_MAC: FCoE Manager received Mulicast Solication from same MAC: [chars]

Explanation  FCoE Manager received Mulicast Solication from same MAC

Recommended Action  No action is required.

Error Message  FCOE_MGR-5-FCOE_MGR_VE_DUPLICATE_PEER_MAC: FCoE Manager has already received unicast advertisement from MAC [chars] on a different VE link. Bringing down this link

Explanation  FCoE Manager has already received unicast advertisement from same MAC on a different VE link

Recommended Action  No action is required.

FCSP-MGR Messages

This section contains the FCSP-MGR messages.

FCSP-MGR-2

Error Message  FCSP-MGR-2-DBG_INIT_FAILED: Debug Infrastructure Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-FC2_E_INIT_FAILED: Fibre-Channel Initialization of an E_Port failed ( [chars] )

Explanation  FC-SP Manager has been unable to initialize with the FC-2 E-Port infrastructure.

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-FC2_F_INIT_FAILED: Fibre-Channel Initialization of an F_Port failed ( [chars] )

Explanation  FC-SP Manager has been unable to initialize with the FC-2 F-Port infrastructure.

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-FC2_UNKNOWN_FRM_RECD_CRIT: Received an unexpected/unknown FC-2 frame on [chars]

Explanation  .

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-FCSP_AUTHENT_FAILURE: FC-SP Authentication failure on Port [chars] (FC-SP Failure Reason: [chars] [chars])

Explanation  Fibre-Channel Authentication failure on Port [chars].(Reason Code [chars] Detail [chars]). Please check password configurations and ensure appropriate security modes on this port as well as peer port

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-FCSP_ESP_MISMATCH: ESP parameters mismatch failure on Port [chars] (reason:[chars])

Explanation  Fibre-Channel ESP parameters mismatch with the peer on Port [chars].(Reason: [chars]). Please check ESP configurations on both side of the link and ensure appropriate ESP mode on this port as well as peer port

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-FSMU_INIT_FAILED: State Machine Infrastructure Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-IPC_INIT_FAILED: IPC (Inter Process Communication) Initialization failed ( [chars] )

Explanation  FC-SP Manager has been unable to initialize with the IPC infrastructure.

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-LICENSE_UNAVAILABLE: License:[chars] unavailable, service exiting

Explanation  License of [chars] is unavailable. Service will exit now

Recommended Action  Please install the license file to continue using the feature.

Error Message  FCSP-MGR-2-MEM_FAILED: Memory operations failed File: [chars] Line [dec] for size [hex] bytes

Explanation  .

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-POST_INIT_FAILED: Post-Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

Error Message  FCSP-MGR-2-PSS_INIT_FAILED: PSS Infrastructure Initialization failed ( [chars] )

Explanation  .

Recommended Action  No action is required.

FCS Messages

This section contains the FCS messages.

FCS-2

Error Message  FCS-2-ALLOC_FAILED: Memory allocation failed for size:[dec]

Explanation  Memory allocation failed for size [dec]

Recommended Action  Restart the process

Error Message  FCS-2-CHUNK_ALLOC_FAILED: Chunk memory allocation failed for [chars] chunk

Explanation  Chunk memory allocation failed. [chars] indicates the chunk name

Recommended Action  Restart the process

Error Message  FCS-2-NO_RESPONSE: Retried maximum number of times for [chars] to domain [dec] in VSAN [dec]

Explanation  Maximum number of retires completed for [chars] form domain [dec] in VSAN [dec].

Recommended Action  No action is required.

Error Message  FCS-2-PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec]

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

FCS-3

Error Message  FCS-3-DB_ERR: [chars]

Explanation  An error occurred during an FCS database operation. [chars] indicates the reason for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-FCS_MGMT_SEC_SDB_ERR: [chars] : [chars]

Explanation  FC CT Mgmt Security shared db operation : [chars] : [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-INIT_FAIL: [chars]

Explanation  An error happened during FCS Initialization. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-MTS_API_ERR: [chars] : [chars]

Explanation  An error occurred in send or receive of an MTS message. [chars] indicates the error that occurred and [chars] indicates the error number

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-MTS_ERR: [chars]

Explanation  An error occurred in processing of an MTS message. [chars] indicates the error that occurred

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-NO_MTS_RESP: [chars]

Explanation  There was no response to an MTS request. [chars] indicates details of the MTS message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-NO_REMOTE_RESP: No response for request [chars] from domain [dec] in VSAN [dec]

Explanation  There was no response to an FC2 request. [chars] indicates FCS request [dec] indicates the remote domain and [dec] the VSAN ID

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-OTHER_ERR: [chars]

Explanation  An FCS generic error occurred. [chars] indicates the description of the error

Recommended Action  No action is required.

Error Message  FCS-3-PSS_ERR: [chars]

Explanation  An error occurred during an FCS PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FCS-3-SOCK_ERR: sd: [dec], [chars]

Explanation  An FC-2 Socket error occurred on socket-ID [dec]. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FCS-4

Error Message  FCS-4-FCS_MGMT_SEC_RJT: FC CT Management Server query Rejected: [chars]. from FCID [hex]

Explanation  Mgmt-security has rejected FC CT Management Server query: [chars]. from FCID [hex].

Recommended Action  No action is required.

FCS-5

Error Message  FCS-5-API_FAIL: [chars]: [chars]

Explanation  An API called by FCS failed. [chars] indicates the API name failed and [chars] the reason for failure

Recommended Action  If this message is seen during a cold boot, it means that the queried module came up after FCS and this case can be ignored

Error Message  FCS-5-DB_NOTICE: [chars]

Explanation  An error occurred during an FCS database operation. [chars] indicates the reason for the error

Recommended Action  No action is required.

FCS-6

Error Message  FCS-6-BAD_CT_FRAME: Invalid FCS frame: [chars] received from [hex]

Explanation  An invalid FCS FC-CT frame with [chars] received from FC-ID [hex].

Recommended Action  No action is required.

Error Message  FCS-6-FCS_MGMT_SERVER_REQ: FCS received FC CT Mgmt Server [chars]. Command code [hex], from FCID [hex].

Explanation  FC CT request has been received from Managment Server. It is [chars]. Command code [hex], from FCId [hex]

Recommended Action  No action is required.

Error Message  FCS-6-INFORMATION: [chars]

Explanation  An event happend that affects FCS. [chars] indicates the event

Recommended Action  No action is required.

Error Message  FCS-6-REXMIT_PKT: Retransmitting request [chars] to domain [dec] in VSAN [dec]

Explanation  There was a retransmission of an FC2 request. [chars] indicates FCS request [dec] indicates the remote domain and [dec] the VSAN ID

Recommended Action  No action is required.

FEATURE-MGR Messages

This section contains the FEATURE-MGR messages.

FEATURE-MGR-2

Error Message  FEATURE-MGR-2-FM_AUTOCKPT_FAILED: AutoCheckpoint [chars] failed to be created for reason: [chars] ([hex])

Explanation  AutoCheckpoint with the given name has been created successfully

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-FM_FEATURE_LICENSE_ERROR: license [chars] checkout failure for [chars], error [hex] ([chars])

Explanation  License operation was not successful, check license validity for the feature

Recommended Action  Please contact FM team

Error Message  FEATURE-MGR-2-FM_FEATURE_OP_GENERIC_ERROR: Service [chars] with uuid [dec] ([hex]) encountered error:[hex]([chars]).Disable dependent features or contact service owner for details.

Explanation  Operation was not successful

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FEATURE_OP_TIMEOUT_ERROR: feature [chars] operation failed on response timeout from service: [chars] with uuid ([hex])

Explanation  The error seen at FM and service communication

Recommended Action  Please contact service owner with given uuid and FM team

Error Message  FEATURE-MGR-2-FM_FSET_ADD_CONFCHECK_ERROR: failed to add confcheck [hex] ([chars]) at installing feature-set [chars]

Explanation  Failed to add confcheck at enabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_CFG_ALLOW_ERROR: Potential vdc_mgr issue: the allow request failed [hex] ([chars])

Explanation  Vdc_mgr failed to response the allow request

Recommended Action  Please contact FM/vdc_mgr team

Error Message  FEATURE-MGR-2-FM_FSET_CKPT_ERROR: Checkpoint issue: failed on checkpoint with error [hex] ([chars]) at feature-set [chars]

Explanation  Checkpoint did not response

Recommended Action  Please contact FM/vdc_mgr and rollback team

Error Message  FEATURE-MGR-2-FM_FSET_DISABLE_ERROR: Potential sysmgr issue: disable feature-set [chars] on sup failed with error [hex] ([chars])

Explanation  Some issues while disabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_DISABLE_FEATURES_ERROR: features failed to disable at feature-set [chars] with error [hex] ([chars])

Explanation  Failed to disable feature at disabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_DISABLE_FEATURES_TIMEOUT: Potential [chars] issue: feature [chars] did not complete its disabling

Explanation  Failed to disable feature at disabling feature-set

Recommended Action  Please contact FM/sysmgr team and the feature owner

Error Message  FEATURE-MGR-2-FM_FSET_INSTALL_ERROR: install feature-set [chars] returns error 0X[hex] ([chars])

Explanation  Somes issues during install feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_LCS_DISABLE_ERROR: Potential sysmgr issue: disable feature-set [chars] failed on module [dec] with error [hex] ([chars])

Explanation  Some issues on the lc while disabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_LCS_ENABLE_ERROR: enabling feature-set [chars] on module [dec] returns error 0X[hex] ([chars])

Explanation  Somes issue on the lc while enabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_PRESEQ_REJECT: It rejects pre-sequence due to a service with sap [dec]: [chars]

Explanation  The message seen when an application rejects feature-set disable request

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_SUP_ENABLE_ERROR: enabling feature-set [chars] on sup returns error 0X[hex] ([chars])

Explanation  Some issues during enabling feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_UNGRACEFUL_DISABLE_ERROR: Potential sysmgr issue: ungraceful disable feature-set [chars] failed with error [hex] ([chars])

Explanation  Some issues while ungraceful disable feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_UNGRACEFUL_UNINSTALL_ERROR: Potential sysmgr issue: ungraceful uninstall feature-set [chars] failed with error [hex] ([chars])

Explanation  Some issues while ungraceful uninstall feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_UNINSTALL_ERROR: Potential sysmgr issue: uninstall feature-set [chars] failed with error [hex] ([chars])

Explanation  Some issues while uninstall feature-set

Recommended Action  Please contact FM/sysmgr team

Error Message  FEATURE-MGR-2-FM_FSET_VMM_OP_ERROR: [chars]

Explanation  The error seen at FM and VMM interaction

Recommended Action  Please contact FM/VMM team

Error Message  FEATURE-MGR-2-FM_MPLS_NVE_DEPENDENCY: Feature MPLS Static and NV Overlay can't be configured together

Explanation  Feature MPLS Static and NV Overlay can't be configured togethe

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-FM_MPLS_SR_VPC_DEPENDENCY: Feature MPLS SEGMENT ROUTING and VPC can't be configured together

Explanation  Feature MPLS SEGMENT ROUTING and VPC can't be configured together

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-FM_MPLS_VPC_DEPENDENCY: Feature MPLS Static and VPC can't be configured together

Explanation  Feature MPLS Static and VPC can't be configured together

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-MODULE_FM_DONE: feature manager completed

Explanation  Feature manager completed

Recommended Action  No action is required.

Error Message  FEATURE-MGR-2-MODULE_FM_STARTED: feature manager started

Explanation  Feature manager started

Recommended Action  No action is required.

FEATURE-MGR-6

Error Message  FEATURE-MGR-6-FM_AUTOCKPT_IN_PROGRESS: AutoCheckpoint [chars]'s creation in progress...

Explanation  AutoCheckpoint creation has been requested and it should be in progress

Recommended Action  No action is required.

Error Message  FEATURE-MGR-6-FM_AUTOCKPT_SUCCEEDED: AutoCheckpoint [chars] created successfully

Explanation  AutoCheckpoint with the given name has been created successfully

Recommended Action  No action is required.

Error Message  FEATURE-MGR-6-FM_FCOE_AUTOINSTALL_ON_NOT_ISOLA: auto-install feature-set fcoe on non-isola

Explanation  Auto-install feature-set fcoe could be done on isola only

Recommended Action  Please contact FM team

Error Message  FEATURE-MGR-6-FM_FSET_ENABLED_AT_UNINSTALL: Uninstall aborted because feature set is still enabled in vdc [dec]

Explanation  Feature set is in enabled state

Recommended Action  No action is required.

FEX Messages

This section contains the FEX messages.

FEX-2

Error Message  FEX-2-FEXCONFIG_ON_VPC: A green start is a must after ISSU for VPC config on FPC([hex]) for AA-FEX bringup. Please ignore if you already reloaded the switch after upgrading to version >= 7.0.3(I5)2

Explanation  Green start (post ISSU) is a must to ensure programming correctness before configuring AA-FEXes

Recommended Action  No action is required.

Error Message  FEX-2-FEX_NOT_ONLINE_SUP_ISSU: FEX [dec] did not come online after SUP ISSU

Explanation  FEX did not come online after sup ISSU

Recommended Action  No action is required.

Error Message  FEX-2-FEX_OFFLINE: FEX [dec] has gone OFFLINE

Explanation  FEX has gone OFFLINE

Recommended Action  No action is required.

Error Message  FEX-2-FEX_ONLINE: FEX [dec] has come ONLINE

Explanation  FEX has come ONLINE

Recommended Action  No action is required.

Error Message  FEX-2-FEX_PORT_STATUS_CRIT: Uplink-ID [dec] of Fex [dec] that is connected with [chars] changed its status from [chars] to [chars]

Explanation  Fex [decimal-digit] changed port status

Recommended Action  No action is required.

Error Message  FEX-2-NOHMS_ENV_FEX_OFFLINE: [chars]

Explanation  Fex off-line

Recommended Action  Show inventory

Error Message  FEX-2-NOHMS_ENV_FEX_ONLINE: [chars]

Explanation  Fex on-line

Recommended Action  Show inventory

FEX-4

Error Message  FEX-4-FEX_SCALING_LIMITS_REACHED: You have exceeded the advisable FEX scaling limits.

Explanation  More FEX/FEX ports in the system than recommended by Cisco.

Recommended Action  No action is required.

FEX-5

Error Message  FEX-5-FEX_DISABLED: FEX Disabled

Explanation  FEX Service Disabled

Recommended Action  No action is required.

Error Message  FEX-5-FEX_ENABLED: FEX Enabled

Explanation  FEX Service Enabled

Recommended Action  No action is required.

Error Message  FEX-5-FEX_PORT_STATUS_NOTI: Uplink-ID [dec] of Fex [dec] that is connected with [chars] changed its status from [chars] to [chars]

Explanation  Fex [decimal-digit] changed port status

Recommended Action  No action is required.

Error Message  FEX-5-PINNING_CHANGED: Fex [dec] pinning information is changed

Explanation  Fex pinning information changed

Recommended Action  No action is required.

Error Message  FEX-5-SATMGR_DISABLE_FAILED: Disabling of feature FEX failed. Please remove FEX related configs from interfaces

Explanation  Disabling of FEX feature failed

Recommended Action  No action is required.

FIB Messages

This section contains the FIB messages.

FIB-SLOT#-0

Error Message  FIB-SLOT#-0-EMERG: [chars]

Explanation  Fib caused a system failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-1

Error Message  FIB-SLOT#-1-ALERT: [chars]

Explanation  Fib caused failures in other services

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-1-HW_RESOURCE: [chars]

Explanation  Hardware resources are approaching limit.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-1-HW_RESOURCE: [chars]

Explanation  Hardware resources are approaching limit.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-2

Error Message  FIB-SLOT#-2-CRIT: [chars]

Explanation  Fib encountered a catastrophic error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-3

Error Message  FIB-SLOT#-3-ERR: [chars]

Explanation  Fib encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-3-HW_FAIL: [chars]

Explanation  Failed to program route into the hardware.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-3-NO_MEM: Out of memory

Explanation  Fib does not have enough memory to continue proper operation.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FIB-SLOT#-3-SEND_SUP: Cannot talk to supervisor

Explanation  Fib to supervisor IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-4

Error Message  FIB-SLOT#-4-CPU_HOG: Inactive or busy

Explanation  Either fib was not scheduled to run, or fib was busy, and fib did not service the message or timer queue for an extended period.

Recommended Action  Please perform 'debug fib error', then recreate the operation scenario, to find out more details.

Error Message  FIB-SLOT#-4-WARN: [chars]

Explanation  Fib encountered a possible error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FIB-SLOT#-6

Error Message  FIB-SLOT#-6-FIB_INFO: [chars]

Explanation  Information that a corrective action was taken by FIB

Recommended Action  Message is informational only

FICON Messages

This section contains the FICON messages.

FICON-2

Error Message  FICON-2-E_DUPLICATE_PN_BRINGUP_FAIL: [chars]

Explanation  This port has the same port number assigned to other port in the same FICON VSAN. No more than one port with duplicate port number can be up in each FICON VSAN

Recommended Action  Avoid duplicate number assignment in each FICON VSAN\n

Error Message  FICON-2-E_PN_PA_NOT_IN_BOUND: [chars]

Explanation  Port number or port address in startup-configure is out of bound.

Recommended Action  Change ficon port number assign configuration and save to startup-configure.\n

Error Message  FICON-2-E_SAVE_FILE: [chars]

Explanation  Failed to save file. Possibly due to asymmetric pdcm matrix. Look for retval for actual reason.

Recommended Action  Configure port prohibits in symmetrically.\n

Error Message  FICON-2-SHUTDOWN: FICON Manager process shutting down: [chars]

Explanation  FICON Manager shutting down

Recommended Action  This is a severe error. Provide the reason given in the message\n

FICON-3

Error Message  FICON-3-E_ASSIGN_BINDING_PN_FAIL: [chars]

Explanation  Port number has fcip or port channle binding can not be removed nor changed.

Recommended Action  Remove port number binding of the logical interface first.\n

Error Message  FICON-3-E_ASSIGN_INVALID_PN_PARAM: [chars]

Explanation  Invalid port number parameters in command.

Recommended Action  Check port numbers in the command.\n

Error Message  FICON-3-E_ASSIGN_OVERLAP_PN_FAIL: [chars]

Explanation  Port number assigned to physical and logical can not overlap.

Recommended Action  Check port numbers in the command.\n

Error Message  FICON-3-E_ASSIGN_PN_NOT_DOWN_FAIL: [chars]

Explanation  Only port number assigned to a port in down state can be removed or changed.

Recommended Action  Bring down the port first.\n

Error Message  FICON-3-E_ASSIGN_PROHIBIT_PN_FAIL: [chars]

Explanation  Logical port address can not be prohibited.

Recommended Action  Check port numbers in the command.\n

Error Message  FICON-3-E_DUPLICATE_PN_ASSIGN_WARNING: [chars]

Explanation  This port has the same port number assigned to other port in the same FICON VSAN. No more than one port should have the same port number in each FICON VSAN

Recommended Action  Avoid duplicate number assignment in each FICON VSAN\n

Error Message  FICON-3-E_INVALID_PA_BRINGUP_FAIL: [chars]

Explanation  This port either has an invalid port address assigned or has no port address assigned.

Recommended Action  Assign a valid ficon port number to the port.\n

Error Message  FICON-3-E_PORT_PROHIBIT_BRINGUP_FAIL: [chars]

Explanation  This port has been prohibited. Prohibiting E or TE ports is not allowed. This port can not be configured in E mode or TE mode until the prohibit mask configuration is changed

Recommended Action  Correct the prohibit mask (PDCM) for this port if you wish to bring it up as an E or TE port in a FICON VSAN\n

Error Message  FICON-3-E_UNASSIGN_NO_PN_FAIL: [chars]

Explanation  Only port number already assigned can be removed.

Recommended Action  Check port numbers in the command.\n

Error Message  FICON-3-PDCM_CHANGE_REJ_E_PORT: [chars]

Explanation  The FICON Prohibit Dynamic Connectivity Mask(PDCM) change rejected because an E or TE port is being prohibited. Prohibiting an E or TE port in not allowed

Recommended Action  Correct the prohibit mask (PDCM) for this port if you wish to bring the port up as an E or TE port in a FICON VSAN\n

FICON-5

Error Message  FICON-5-STARTING: FICON Manager process starting

Explanation  FICON Manager process is being started

Recommended Action  No action is required.

FICON-6

Error Message  FICON-6-PDCM_CHANGE: VSAN [dec] port-address [dec] prohibit mask set to [chars]

Explanation  The FICON Prohibit Dynamic Connectivity Mask (PDCM) for this port has changed. VSAN [dec], port address [dec] prohibit mask (PDCM) is now set to [chars]

Recommended Action  No action is required.

Error Message  FICON-6-PORT_SWAP: port number [dec] [dec] swapped

Explanation  FICON portnumbers swapped

Recommended Action  No action is required.

Error Message  FICON-6-VSAN_DISABLED: FICON disabled on VSAN [dec]

Explanation  FICON has been disabled on the given VSAN

Recommended Action  No action is required.

Error Message  FICON-6-VSAN_ENABLED: FICON enabled on VSAN [dec]

Explanation  FICON has been enabled on the given VSAN

Recommended Action  No action is required.

FIPS Messages

This section contains the FIPS messages.

FIPS-0

Error Message  FIPS-0-FIPS_POST_CLEANUP_FAILED: Error cleaning up keys in FIPS mode : [chars]

Explanation  FIPS cleanup failed [chars]

Recommended Action  No action is required.

Error Message  FIPS-0-SET_FIPS_MODE_FAILED: Error when setting FIPS mode : [chars]

Explanation  FIPS mode failed [chars]

Recommended Action  No action is required.

FIPS-6

Error Message  FIPS-6-SET_FIPS_MODE: FIPS mode is [chars] for service [chars]

Explanation  FIPS mode is changed [chars] [chars]

Recommended Action  No action is required.

FLOGI Messages

This section contains the FLOGI messages.

FLOGI-1

Error Message  FLOGI-1-MSG_FDISC_REJECT_TOO_MANY_LOGINS: [VSAN [dec], Interface [chars]] FDISC rejected - this interface has reached the max num of N-Ports ([dec])

Explanation  An FDISC was rejected because the F-Port has reached the maximum allowed number of devices.

Recommended Action  Check the configuration of the NPIV device connected to the port.

Error Message  FLOGI-1-MSG_FLOGI_REJECT_FCID_ERROR: [VSAN [dec], Interface [chars]] (pwwn: [chars]) FLOGI rejected - FCID allocation failed with error [hex].

Explanation  An FLOGI was rejected because the FCID allocation failed.

Recommended Action  Check the fcid-interop configuration, purge the persistency table and check the output of "show flogi database details" and see if any of the "A area FCID allocation" entries can be turned to single fcid allocation as per Configuration Guide

Error Message  FLOGI-1-MSG_FLOGI_REJECT_TOO_MANY_LOGINS: [VSAN [dec], Interface [chars]] FLOGI rejected - this interface has reached the max num of NL-Ports ([dec])

Explanation  An FLOGI was rejected because the FL-Port has reached the maximum allowed number of devices.

Recommended Action  Reduce the number of devices on the loop

Error Message  FLOGI-1-MSG_NPIV_NOT_SUPPORTED_WITH_TRUNKING: [VSAN [dec], Interface [chars]] NPIV not supported - on this platform, NPIV is not supported on trunking interfaces

Explanation  The N_Port requested NPIV, but this platform does not support NPIV on trunking F_Ports.

Recommended Action  Disable NPIV, or move the N_Port to a switch that supports NPIV on trunking F_Ports

FLOGI-2

Error Message  FLOGI-2-MSG_FLOGI_REJECT_NO_ACL_TCAM_AVAILABLE: [VSAN [dec], Interface [chars]] FLOGI rejected - ACLTCAM resource exausted

Explanation  An FLOGI was rejected because the ACLTCAM hardware resource is completely used.

Recommended Action  Reduce the number of nodes.

FLOGI-4

Error Message  FLOGI-4-MSG_VF_FLOGI_FROM_NON_CISCO_OUI: [VSAN [dec], Interface [chars]] FLOGI with VF bit set from OUI [hex]:[hex]:[hex] (nwwn: [chars])

Explanation  This interface received an FLOGI with VF bit set from a non CISCO OUI; in this release Virtual Fabrics are not supported on interfaces connected to third-party devices

Recommended Action  Set the trunk mode of this interface to off

FLOGI-5

Error Message  FLOGI-5-MSG_FLOGI_DROP_DUE_TO_SUSPENDED_VSAN: [VSAN [dec], Interface [chars]] FLOGI (pwwn: [chars]) has been dropped because the VSAN is suspended on this trunking interface

Explanation  The switch received an FLOGI from a trunking interface on a VSAN which has been suspended; the FLOGI frame has been dropped.

Recommended Action  To bring up the VSAN again on the trunking port, remove it from the allowed VSAN list and add it again

Error Message  FLOGI-5-MSG_FLOGI_DUPLICATE_WWPN: [VSAN [dec], Interface [chars]] FLOGI (pwwn: [chars]) has been dropped because the host has a duplicate WWPN

Explanation  The switch received an FLOGI from the interface, which has a duplicate PWWN value.

Recommended Action  No action is required.

Error Message  FLOGI-5-MSG_IF_REINIT_ALPA_CONFLICT: [VSAN [dec], Interface [chars]] FL/TL interface [chars] re-initialized as ALPA - PWWN map conflict occurred.

Explanation  The FL/TL interface is re-initialized as ALPA used by device conflicts with an existing FLOGI session after the Loop Initialization Protocol (LIP). All the devices will re-login with new ALPA and PWWN mapping

Recommended Action  No action is required.

Error Message  FLOGI-5-MSG_PORT_LOGGED_IN: [VSAN [dec], Interface [chars]] Nx Port [chars] with FCID [chars] logged IN.

Explanation  Nx port logged in with the specified information.

Recommended Action  No action is required.

Error Message  FLOGI-5-MSG_PORT_LOGGED_OUT: [VSAN [dec], Interface [chars]] Nx Port [chars] logged OUT.

Explanation  Nx port logged out. The following commands will help determine why this Nx port logged out: 'show interface, show VSAN, show module'

Recommended Action  No action is required.

FS-DAEMON Messages

This section contains the FS-DAEMON messages.

FS-DAEMON-2

Error Message  FS-DAEMON-2-FSD_ENOSPC_BOOTFLASH: Due to insufficient space, [chars] image could not be copied to standby bootflash. [chars] image is not present on standby. Please copy \'[chars]\' manually.

Explanation  Move system images from RAM to bootflash to free up some memory

Recommended Action  Please remove some unnecessary files on bootflash using \'delete\' CLI command and copy images from active supervisor or from remote location

FS-DAEMON-6

Error Message  FS-DAEMON-6-FSD_ENOSPC_LOGFLASH: System logflash usage has reached [dec]%. You may delete some old files on logflash to free up space

Explanation  System logflash space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on logflash

Error Message  FS-DAEMON-6-FSD_ENOSPC_ROOT: System root usage has reached [dec]%. You may delete some old files from root or /var/log to free up space

Explanation  System root space is almost full

Recommended Action  Use 'clear core archived' or 'delete' CLI to free up space on root dir or /var/log

Error Message  FS-DAEMON-6-FSD_ENOSPC_TMP: System temporary directory usage has reached [dec]%.

Explanation  System /tmp space usage.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  FS-DAEMON-6-FSD_REEXPORT_NFS: Re-exported NFS mounts

Explanation  Exported NFS mounts are not visible in kernel and had to be reexported

Recommended Action  Please use 'show system internal flash' to make sure there are no Stale NFS handles

FSCM Messages

This section contains the FSCM messages.

FSCM-2

Error Message  FSCM-2-FABRIC_START_CFG_MGR_PROGRAM_EXIT: Fabric Start Cfg Mgr daemon exiting: [chars]

Explanation  FABRIC_START_CFG_MGR daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

FSPF Messages

This section contains the FSPF messages.

FSPF-2

Error Message  FSPF-2-SHUTDOWN: Routing daemon shutting down : [chars]

Explanation  FSPF routing daemon is shutting down because of [chars] reason.

Recommended Action  This is a severe bug. Provide the reason provided and the log files for FSPF.

FSPF-3

Error Message  FSPF-3-BAD_FC2_PKT: Received bad FC2 packet on interface [chars] : [chars]

Explanation  FSPF received a bad FC2 packet on [chars] interface , error description is [chars].

Recommended Action  FSPF daemon has received a bad FC frame. Provide the output of 'debug fc2 pkt '.

Error Message  FSPF-3-CHECKSUM_FAIL: Checksum test failed for LSR domain [dec]

Explanation  Periodic database checksum test failed for LSR for domain [dec]

Recommended Action  This indicates that the internal database got corrupted because of some memory corruption bug. Provide output of 'show fspf database '. May need to power cycle the switch

Error Message  FSPF-3-FC2_PROC_ERR: Error in processing [chars] packet on interface [chars], Error = [chars]

Explanation  An error occurred in processing a [chars] FC2 packet on [chars] interface. The internal error code is [chars].

Recommended Action  Turn on 'debug fspf error' to get more information. Make sure there is no misconfiguration of FSPF parameters on the two ends of the interface. Provide output of 'show fspf vsan x' 'show fspf vsan x interface' and 'debug fspf fc pkt ' for the specific interface

Error Message  FSPF-3-FLOOD_ERR: Error in flooding the local LSR , Error = [chars]

Explanation  FSPF had an error in flooding the local LSR , error description is [chars].

Recommended Action  Provide output of 'debug fspf flood' , 'debug fspf error'. If error is reported in transmitting packet check if interface is up and turn on 'debug fc2 error'

Error Message  FSPF-3-HELLO_MISMATCH: Mismatch in [chars] in the Hello packet on interface [chars]

Explanation  There is a mismatch in the [chars] entry in the hello packet received on interface [chars]. The packet will be dropped.

Recommended Action  Check the configuration of hello or dead interval on the switches on the two ends of the interface to see if there is a mismatch.

Error Message  FSPF-3-INTF_TIMER_ERR: Error in processing interface timer event [chars] for interface [chars] , error = [chars]

Explanation  FSPF had an error in processing timer event for interface chars, error is [chars].

Recommended Action  Provide output of 'debug fspf error'

Error Message  FSPF-3-IPC_PROC_ERR: Error in processing IPC message : Opcode = [dec], Error code = [hex]

Explanation  FSPF had an error in processing message of [dec] opcode , the internal error code is [dec].

Recommended Action  Possibly some wrong IPC message is received by FSPF . Provide output of 'debug fspf mts pkt' and 'debug fspf error ' trace.

Error Message  FSPF-3-LOCK_FAIL: FSPF failure in gaining lock

Explanation  There is a software failure in gaining lock of the shared resource between FSPF threads.

Recommended Action  Provide output of 'debug fspf all '

Error Message  FSPF-3-MTS_MSG_BEFORE_GSYNC: FSPF in standby received MTS message opcode = [hex] before GSYNC

Explanation  FSPF in standby received an MTS message of opcode [dec] before receiving the GSYNC message.

Recommended Action  Provide output of 'debug fspf mts pkt '

Error Message  FSPF-3-RIB_ERR: Error in RIB : [chars]

Explanation  FSPF had an error in interacting with RIB, error description is [chars].

Recommended Action  Check if rib application is running using 'show processes'. Provide output of 'debug fspf route' and RIB debug traces.

Error Message  FSPF-3-ROUTE_COMPUTE_ERR: Error in computing or sending routes : Error = [chars]

Explanation  FSPF had an error in computing routes , error description is [chars].

Recommended Action  Provide the error code and output of 'debug fspf error' and 'debug fspf route' if problem is reproducible

Error Message  FSPF-3-UNLOCK_FAIL: FSPF failure in releasing lock

Explanation  There is a software failure in releasing lock of the shared resource between FSPF threads.

Recommended Action  Provide output of 'debug fspf all '

Error Message  FSPF-3-VSAN_TIMER_ERR: Error in processing VSAN timer event [chars], error description = [chars]

Explanation  FSPF had an internal error in processing timer event , error description is [chars].

Recommended Action  Provide output of 'debug fspf error'

FSPF-4

Error Message  FSPF-4-FC2_DOWN_INTF: Received FC2 packet on DOWN interface [chars]

Explanation  FSPF received a FC2 packet on inactive interface [chars] .

Recommended Action  This message may be printed for the first FSPF packet when an interface is brought up. If the message is seen continuously check if FSPF is disabled on one end for the interface or the VSAN. Otherwise check 'show interface ' output to see if interface is physically up only on one side. Also check if there is any error message printed for IPC_PROC_ERR

Error Message  FSPF-4-FC2_DOWN_VSAN: Received FC2 packet on inactive vsan

Explanation  FSPF received a FC2 packet on inactive vsan.

Recommended Action  If message seen continuously check if FSPF is disabled on the VSAN Investigate if VSAN is active and valid domain has been assigned on the switch Also check if IPC_PROC_ERR message is printed in the syslog

Error Message  FSPF-4-ILLEGAL_FSM_EVENT: Illegal FSM event for state [chars] in interface [chars]

Explanation  An illegal protocol event has occurred for the FSPF state machine. The old state was [chars] for the interface [chars].

Recommended Action  It is possible to get this message if some protocol packet gets dropped but the it should recover and move back to FULL state. Do 'show fspf interface' to check the state of the interface. If it is stuck in state other than FULL provide output of 'debug fspf event' and 'debug fspf fc pkt ' for the interfaces involved.

Error Message  FSPF-4-LSR_DROPPED: [chars], Dropping LSR [dec] received on interface [chars]

Explanation  A LSR packet is dropped due to [chars] reason. LSR belonged to domain [dec] and was received on interface [chars].

Recommended Action  Provide the reason given for dropping the LSR and output of 'debug fspf fc pkt' If the reason is checksum failure investigate possible packet corruption or truncation

Error Message  FSPF-4-LSR_MIN_LS_ARRIVAL: Packet arrived before MIN_LS_ARRIVAL, Dropping LSR [dec] on interface [chars]

Explanation  A LSR packet is dropped as it arrived before MIN_LS_ARRIVAL. LSR belonged to domain [dec] and was received on interface [chars].

Recommended Action  This can occur in transient situation and protocol recovers by retransmitting the LSR. If the message is seen continuously provide output of 'debug fspf flood ' , 'debug fspf retrans' and 'debug fspf error '. The message may be seen more often when interoperating with other vendors

Error Message  FSPF-4-LSU_RX_INIT: Dropping LSU received in state INIT on interface [chars]

Explanation  A LSU packet is dropped as interface [char] is in INIT state when it received the LSU.

Recommended Action  This can occur in some transient situation. If the problem persists provide output of 'show fspf vsan x interface' and 'debug fspf fc pkt ' and 'debug fspf event vsan x'

FSPF-5

Error Message  FSPF-5-STARTING: Routing daemon started

Explanation  FSPF routing daemon has been started.

Recommended Action  No action is required.

FSPF-6

Error Message  FSPF-6-ADD_LSR: New LSR added for domain [dec]

Explanation  A new LSR is added to the database for domain [dec] .

Recommended Action  No action is required.

Error Message  FSPF-6-DELETE_LSR: LSR deleted for domain [dec]

Explanation  The LSR for domain [dec] is deleted from the database.

Recommended Action  No action is required.

Error Message  FSPF-6-INTF_OPER_DOWN: Down on interface [chars]

Explanation  FSPF has become operationally down on interface [chars].

Recommended Action  No action is required.

Error Message  FSPF-6-INTF_OPER_UP: Up on interface [chars]

Explanation  FSPF has become operational on interface [chars].

Recommended Action  No action is required.

Error Message  FSPF-6-MAX_AGE: LSR [dec] reached Maxage

Explanation  The LSR for domain [dec] reached the maximum age and will be deleted from all the connected switches .

Recommended Action  No action is required.

Error Message  FSPF-6-ROLLOVER: Rolling over the incarnation number of Local LSR

Explanation  The incarnation number of local LSR reached the maximum value and is rolling over.

Recommended Action  No action is required.

Error Message  FSPF-6-SELF_ORIGINATED: Received local LSR with higher incarnation number

Explanation  A LSR for the local domain was received with incarnation number higher than the one in database. This situation should only occur initially on a topology change. If this situation persists the domain assignment of switches may not be unique

Recommended Action  If this message is received continuously check if domain assignment is unique in the fabric.

Error Message  FSPF-6-STATE_CREATED: Internal state created [chars]

Explanation  FSPF has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  FSPF-6-VSAN_OPER_DOWN: Down on vsan

Explanation  FSPF has become operationally down on VSAN.

Recommended Action  No action is required.

Error Message  FSPF-6-VSAN_OPER_UP: Up with local domain [dec]

Explanation  FSPF has started with local domain [dec].

Recommended Action  No action is required.

FSPF-7

Error Message  FSPF-7-ROUTE_THREAD_STARTED: Thread number [dec] started

Explanation  Route computation thread number [dec] has been started for FSPF.

Recommended Action  No action is required.

HSRP_ENGINE Messages

This section contains the HSRP_ENGINE messages.

HSRP_ENGINE-3

Error Message  HSRP_ENGINE-3-BFD_GLOBAL_SESSION_REMOVAL_ERROR: Failed to remove all the HSRP-BFD sessions([hex] [hex]), Refer logs

Explanation  Refer logs for more details

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_IF_SESSION_REMOVAL_ERROR: Failed to remove few HSRP-BFD sessions([hex] [hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_SESSION_ADD_ERROR: Failed to add few HSRP-BFD sessions([hex] [hex]), Refer logs

Explanation  TRefer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_SESSION_CREATION_ERROR: Failed to create BFD session information([hex] [hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BFD_SESSION_REMOVAL_ERROR: Failed to remove few HSRP-BFD sessions([hex] [hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BUNDLE_ASID_REG_FAIL: Switch-id:[dec] DRAP registration failed for bundle:[dec].

Explanation  DRAP registration failure

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BUNDLE_LPSS_FAIL: LPSS [chars] for bundle:[dec] failed.

Explanation  Libanycast ADD/DEL is failing

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-BUNDLE_VLAN_DOWN: Vlan [dec] DOWN for Bundle [dec], Traffic for group [dec] will be lost on this node.

Explanation  If any of the Vlan for the bundle goes down, then bundle remains UP untill the last Vlan of the bundle also goes down, this results into traffic loss for Vlans which are down but bundle is UP.

Recommended Action  User can shut the bundle on this node, so that all traffic coming to this node can be switched to other anycast nodes

Error Message  HSRP_ENGINE-3-ERROR_IN_ADD_VIP_TO_U6RIB: Failed to Add VIP [chars] to U6RIB (errno [hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-ERROR_IN_DEL_VIP_FROM_U6RIB: Failed to delete VIP [chars] from U6RIB (errno [hex]), Refer logs

Explanation  Refer logs for more details.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-MASTER_CFG_UNNUMBERED: Interface [chars] has been moved as Unnumbered, for Master Hsrp Ipv4 grp [dec] traffic will be dropped

Explanation  MASTER HSRP group configs are not supported on an unnumbered interface

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-3-NOSOCKET: Unable to open socket

Explanation  The system was unable to initialize an IP connection for the Hot Standby protocol.

Recommended Action  Make sure that there is at least one interface configured to run IP.

Error Message  HSRP_ENGINE-3-VIP_ADD_FAILED1: Falied to retain Address on interface [chars] Grp [dec] address [chars] is already assigned to, or overlaps with, an address on interface [chars] address removed.

Explanation  The HSRP virtual IP address cannot be reapplied as as it is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Verify that the reported IP address is not present on the device/vdc in the same vrf. If its not present, collect show tech-support netstack detail and show tech-support hsrp.

Error Message  HSRP_ENGINE-3-VIP_ADD_FAILED2: Falied to retain Address on interface [chars] Grp [dec] address [chars] is already assigned to, or overlaps with, an address on another interface or application address removed.

Explanation  The HSRP virtual IP address cannot be reapplied as as it is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Verify that the reported IP address is not present on the device/vdc in the same vrf. If its not present, collect show tech-support netstack detail and show tech-support hsrp.

HSRP_ENGINE-4

Error Message  HSRP_ENGINE-4-BADAUTH2: Bad authentication from [chars]

Explanation  Two routers participating in HSRP disagree on the valid authentication string.

Recommended Action  Use the HSRP authentication command to repair the HSRP authentication discrepancy between the local system and the one whose IP address is reported.

Error Message  HSRP_ENGINE-4-BADAUTH: Bad authentication from [chars], group [dec], remote state [chars]

Explanation  Two routers participating in HSRP disagree on the valid authentication string.

Recommended Action  Use the HSRP authentication command to repair the HSRP authentication discrepancy between the local system and the one whose IP address is reported.

Error Message  HSRP_ENGINE-4-BUNDLE_GROUP_NOTEXIST: Group [dec] not found on Intf [chars] for Bundle [dec], Traffic for this group will be lost on this node.

Explanation  If any of the groups for the bundle are missing due to misconfig and the bundle is UP, this results into traffic loss for groups which are not configured.

Recommended Action  User need to configure the missing groups for the bundle on this node

Error Message  HSRP_ENGINE-4-DIFFVIP1: [chars] Grp [dec] active routers virtual IP address [chars] is different to the locally configured address [chars]

Explanation  The HSRP virtual IP address contained in the Hello message from the Active router is different to that configured locally.

Recommended Action  Check the configuration on all HSRP routers.

Error Message  HSRP_ENGINE-4-DUPADDR: Duplicate address %i on [chars], sourced by %e

Explanation  The IP address in an HSRP message received on the interface is the same as the router's own IP address. This may be because of misconfiugration, or because of a malfunctioning switch

Recommended Action  Check the configurations on all the HSRP routers, and make sure that any switches you have are functioning properly.

Error Message  HSRP_ENGINE-4-DUPVIP1: [chars] Grp [dec] address [chars] is already assigned to a HSRP group on this interface

Explanation  The HSRP virtual IP address contained in the Hello message cannot be learnt as it is already assigned to a different HSRP group.

Recommended Action  Check the configuration on all HSRP routers.

Error Message  HSRP_ENGINE-4-DUPVIP2: [chars] Grp [dec] address [chars] is already assigned on this interface

Explanation  The HSRP virtual IP address contained in the Hello message cannot be learnt as it is already assigned to this interface.

Recommended Action  Check the configuration on all HSRP routers.

Error Message  HSRP_ENGINE-4-DUPVIP3: [chars] Grp [dec] address [chars] is already assigned to, or overlaps with, an address on another interface or application

Explanation  The HSRP virtual IP address contained in the Hello message cannot be learnt as it is already assigned to, or overlaps with, an address on another interface or application.

Recommended Action  Check the configuration on all HSRP routers.

HSRP_ENGINE-5

Error Message  HSRP_ENGINE-5-ACTIVEROUTERPRIORITY: Interface [chars] [chars] Grp [dec] Active router priority changed to [dec]

Explanation  The priority of the Active router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-ACTIVE_CHANGE: Interface [chars] [chars] Grp [dec] Active router is [chars]

Explanation  The Active router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-AUTOCONFIG_VIPLEARN: Interface [chars] grp [dec] learnt autoconfig virtual ip address [chars]

Explanation  The local router has generate virtual ip address

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-BUNDLE_DOWN_REASON: Cannot bringup bundle <[dec]:[chars]>, Reason: [chars]

Explanation  Display the reason why bundle is down

Recommended Action  Address the reason why the bundle is down

Error Message  HSRP_ENGINE-5-BUNDLE_STATE_CHANGE: Bundle State change from: [chars] To: [chars].

Explanation  Bundle State change

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-GRPSTATECHANGE: Interface [chars] [chars] Grp [dec] state changed from [chars] to [chars] reason [chars]

Explanation  The HSRP router has changed state

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-MACADDRESS_CHANGE: Interface [chars] [chars] Grp [dec] mac-address changed to [chars]

Explanation  The mac address of the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-MASTER_NAME_CHNGD: Master Name conflict for grp [dec], using default

Explanation  Name conflict between two master, later will fallback to default

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-PRIORITY: Interface [chars] [chars] Grp [dec] priority changed to [dec]

Explanation  The current priority of the HSRP group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-STANDBYROUTERPRIORITYCHANGE: Interface [chars] [chars] Grp [dec] Standby router priority changed to [dec]

Explanation  The priority of the Standby router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-STANDBY_CHANGE: Interface [chars] [chars] Grp [dec] Standby router is [chars]

Explanation  The Standby router for the group has changed.

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-TIMER: Interface [chars] [chars] Grp [dec] [chars] timer changed to [dec] [chars]

Explanation  The hello/hold timer value for the HSRP group has changed

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-5-VIPLEARN: Interface [chars] [chars] Grp [dec] learnt virtual ip address [chars]

Explanation  The local router has learnt virtual ip address from the incoming HSRP packet.

Recommended Action  No action is required.

HSRP_ENGINE-6

Error Message  HSRP_ENGINE-6-STATECHANGE2: [chars] [chars] Grp [dec] state moving from [chars]

Explanation  The router has changed state

Recommended Action  No action is required.

Error Message  HSRP_ENGINE-6-STATECHANGE: [chars] [chars] Grp [dec] state move to [chars]

Explanation  The router has changed state

Recommended Action  No action is required.

ICAM Messages

This section contains the ICAM messages.

ICAM-2

Error Message  ICAM-2-ICAM_LICENSE_EXPIRED: iCAM License: NETWORK_SERVICES_PKG license or grace-period has expired.

Explanation  License or grace-period license has expired. iCAM will be disabled.

Recommended Action  Take steps to renew NETWORK_SERVICES_PKG license.

Error Message  ICAM-2-ICAM_LICENSE_MISSING_COPY_RS: iCAM license: NETWORK_SERVICES_PKG license is missing.

Explanation  License missing after NXOS version upgrade. iCAM config will be removed.

Recommended Action  Acquire license or grace-period permission.

Error Message  ICAM-2-ICAM_LICENSE_MISSING_ISSU: iCAM license: NETWORK_SERVICES_PKG license is missing.

Explanation  License missing after ISSU. iCAM config will be removed.

Recommended Action  Acquire license or grace-period permission.

Error Message  ICAM-2-ICAM_LICENSE_MISSING: iCAM license: NETWORK_SERVICES_PKG license is missing.

Explanation  License required to enable iCAM. iCAM config will be removed.

Recommended Action  Acquire license or grace-period permission.

Error Message  ICAM-2-LOGFLASH_NOT_AVAILABLE: iCAM storage: Logflash not available or not enough space. History data will not be persistent.

Explanation  Logflash is not available or there is not enough space to store iCAM database. History data will not be persistent across switch reload.

Recommended Action  Disable iCAM feature, install logflash or free up space in logflash, and re-enable iCAM feature.

Error Message  ICAM-2-LOGFLASH_REMOVED: iCAM storage: Logflash is removed or no longer available. History data will not be accessible and future data will not be persistent.

Explanation  Logflash is no longer available. Database moved to non-persistent storage. History data will not be persistent across switch reload.

Recommended Action  Disable iCAM feature, install/replace logflash, and re-enable iCAM feature.

ICAM-4

Error Message  ICAM-4-ICAM_LICENSE_EXPIRING: iCAM License: NETWORK_SERVICES_PKG license expires in [dec] days [dec] hours [chars] seconds.

Explanation  License or grace-period expiration warning. Prepare for feature disable.

Recommended Action  Take steps to renew license.

Error Message  ICAM-4-ISSU_PRE_UPGRADE_TIMEOUT: ISSU: pre-upgrade timed out, reason: [chars].

Explanation  See the reason.

Recommended Action  Try again with the upgrade.

IDEHSD Messages

This section contains the IDEHSD messages.

IDEHSD-1

Error Message  IDEHSD-1-MANUAL_FORMAT: logflash needs to be formatted

Explanation  Logflash is not accessible; use \format logflash:\ to format it

Recommended Action  No action is required.

IDEHSD-2

Error Message  IDEHSD-2-AUTO_FORMAT: logflash auto-format [chars]

Explanation  Logflash auto-format event

Recommended Action  No action is required.

Error Message  IDEHSD-2-DISK_BUSY_FAILED: Cannot umount [chars],

Explanation  The specified disk interface is in use it can not be un mounted, The user may experience file system correuption

Recommended Action  Make sure slot0 is not being used either by mounting or by any command and re-insert the disk again

Error Message  IDEHSD-2-DISK_FSCK_FAIL: file system check returned error on slot [dec]

Explanation  Flash fliesyetm may be corrupted, the flash was taken while it was being accessed

Recommended Action  Reformat the extarnal flash

Error Message  IDEHSD-2-DISK_MOUNT_FAIL: disk mount unsuccessful on [chars]

Explanation  Unknown flash filesystem or not cleanly un mounted

Recommended Action  Use vfat flash only and make sure external slot is not being accessed then re-insert flash

Error Message  IDEHSD-2-DISK_RESCAN_FAIL: disk rescan unsuccessful on [chars]

Explanation  Flash fliesyetm was not cleanly un mounted

Recommended Action  Make sure external slot is not being accessed and re-inset the flash

Error Message  IDEHSD-2-DISK_UMOUNT_FAIL: disk umount unsuccessful for [chars]

Explanation  Flash fliesyetm is busy the system could noy un-mount it

Recommended Action  Make sure external slot is not being accessed and re-inset the flash

Error Message  IDEHSD-2-FORK: fork failed ([chars] process)

Explanation  The flash daemon failed to fork

Recommended Action  No action is required.

Error Message  IDEHSD-2-INTERNAL_ERROR: Internal Error [dec]

Explanation  The flash daemon interface returns error

Recommended Action  Restart the idehsd deamon

Error Message  IDEHSD-2-MOUNT: [chars] online

Explanation  Flash daemon mounting slot

Recommended Action  No action is required.

Error Message  IDEHSD-2-UMOUNT: [chars] offline

Explanation  Flash daemon un mounting slot

Recommended Action  No action is required.

Error Message  IDEHSD-2-USB_SWAP: USB insertion or removal detected

Explanation  USB swap event

Recommended Action  No action is required.

IDEHSD-3

Error Message  IDEHSD-3-DEVICEOPEN_FAILED: device open failed. Component [chars]

Explanation  The flash daemon device open failed The failure is due to the sub-component [chars]

Recommended Action  No action is required.

IDEHSD-5

Error Message  IDEHSD-5-DISK_SWAP: [chars] [chars]

Explanation  Compach flash swap event

Recommended Action  No action is required.

IDEHSD-6

Error Message  IDEHSD-6-DISK_BUSY: trying to un mount disk [chars]

Explanation  Flash daemon trying to umount busy slot

Recommended Action  No action is required.

Error Message  IDEHSD-6-DISK_EVENT: slot [dec] [chars]

Explanation  Flash daemon found a disk hotswap handler event

Recommended Action  No action is required.

Error Message  IDEHSD-6-IDEHSD_INFO: [chars]

Explanation  Flash daemon informational message

Recommended Action  No action is required.

Error Message  IDEHSD-6-IOCTL: ioctl: [chars] returns [dec]

Explanation  Flash daemon trying to umount busy slot

Recommended Action  No action is required.

Error Message  IDEHSD-6-STARTING: deamon started

Explanation  The compact flash swap daemon successfully started

Recommended Action  No action is required.

IDEHSD-7

Error Message  IDEHSD-7-IDEHSD_TRACE: [chars]() [chars]:[dec] disk=[dec]

Explanation  Flash daemon debug message to trace code path

Recommended Action  No action is required.

IFTMC Messages

This section contains the IFTMC messages.

IFTMC-SLOT#-1

Error Message  IFTMC-SLOT#-1-IFTMC_GENERIC_ERROR: [chars]

Explanation  [chars]

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-1-IFTMC_MPLS_SUBINTF_WARNING: Please enable mpls on main interface also, for subinterface mpls forwarding to work

Explanation  MPLS on subinterface cannot work without enabling on main interface. Please configure on main interface too.

Recommended Action  No action is required.

IFTMC-SLOT#-2

Error Message  IFTMC-SLOT#-2-ELTMC_INTERFACE_INTERNAL_ERROR: Internal error: [chars]:[chars], collect output of show tech-support eltm

Explanation  IFTMC hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support eltm

Explanation  IFTMC hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_INTF_NOT_FOUND: Interface [chars] not found in IFTMC database [chars]

Explanation  IFTMC database doesn't have the interface.

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_INTF_NOT_SUPP: Interface [chars] not supported by IFTMC [chars]

Explanation  IFTMC doesn't support the interface for the specified operation

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_INTF_TO_LTL: Failed to get LTL for interface [chars] return status [chars]

Explanation  IFTMC Failed to get LTL for interface. Packets received on this interface might not be handled correctly by the forwarding engine

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_INTF_TO_SLOT: Failed to get slot for interface [chars] return status [chars]

Explanation  IFTMC Failed to get Slot for interface. Port-channels and L2 Learning might be effected

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_INVALID_FTAG_NUM: IFTMC received INVALID Number of FTAGs in the message.. [chars]

Explanation  IFTMC Failed: Received INVALID Ftags

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_L2_LIF_ALLOC_FAIL_INTF: Failed to allocate L2 LIF entries in forwarding engine for interfac [chars]

Explanation  IFTMC Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding for the interface

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_L2_LIF_ALLOC_FAIL_VDC: Failed to allocate L2 LIF entries in forwarding engine

Explanation  IFTMC Failed to allocate L2 LIF entries in forwarding engine. This will effect Layer 2 and Layer 3 forwarding in this VDC

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_L3_INGRESS_LIF_ALLOC_FAIL_INTF: Failed to allocate L3 Ingress LIF entries in forwarding engine for interfac [chars]

Explanation  IFTMC Failed to allocate L3 Ingress LIF entries in forwarding engine. This will effect Layer 3 forwarding for the interface

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_RSVD_VLAN: Failed to get the reserved vlans. Failed with error [chars]

Explanation  IFTMC Failed to get the reserved vlan's. This will effect multicast forwarding on SVI interfaces

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_VLAN_INTERNAL_ERROR: Internal error: VLAN [dec]:[chars], collect output of show tech-support eltm

Explanation  IFTMC hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-ELTMC_VSAN_INTERNAL_ERROR: Internal error: VSAN [dec]:[chars], collect output of show tech-support eltm

Explanation  IFTMC hit a internal error. Collect show tech-support eltm for futher analysis.

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-IFTMC_FCOE_FEATURE_REQ_FAIL: FCOE feature request for interface [chars] cannot be processed

Explanation  FCOE feature request cannot be processed with ILM sharing, failure status does not get returned to calling app. Possible ACLQOS verify/commit fail prior to this feature request.

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-IFTMC_RES_ALLOC_FAIL: IFTMC resource allocation failure: [chars]

Explanation  IFTMC failed resource allocation

Recommended Action  No action is required.

Error Message  IFTMC-SLOT#-2-IFTMC_RSVD_VLAN: FEX_RESERVED_VLAN_ERR: [chars]

Explanation  VLAN_MGR SDB call returned FAILURE for FEX

Recommended Action  No action is required.

IKE Messages

This section contains the IKE messages.

IKE-3

Error Message  IKE-3-CRYPTO_INIT_ERROR: IKEv2 crypto init error: [chars]

Explanation  Crypto initialization error

Recommended Action  No action is required.

Error Message  IKE-3-ENABLE_ERROR: Unable to store enable flag in configuration (error-id [hex]).

Explanation  Service failed to store the enable flag in configuration. As a result, it will exit

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IKE-3-FIPS_MODE_ERROR: Could not set FIPS mode

Explanation  The FIPS mode could not be set by IKE

Recommended Action  No action is required.

Error Message  IKE-3-IKE_PROGRAM_EXIT: [chars]

Explanation  IKE process did an abnormal exit

Recommended Action  No action is required.

Error Message  IKE-3-MAX_HALF_CONN_LIMIT_REACHED: IKEv1 : Exceeded the limit for number of half open Phase 1 connections

Explanation  The number of half open connections has exceeded the maximum limit

Recommended Action  No action is required.

Error Message  IKE-3-PHASE1_NEGOTIATION_FAILED: IKEv1: Phase 1 negotiation failed for peer [chars]

Explanation  IKE policy negotiation failed for peer [chars].

Recommended Action  No action is required.

Error Message  IKE-3-PHASE1_PROPOSAL_MISMATCH: IKEv1: No matching phase 1 proposal found for peer [chars]

Explanation  There is a IKE policy mismatch for the peer.

Recommended Action  No action is required.

Error Message  IKE-3-PHASE2_NEGOTIATION_FAILED: IKEv1: Phase 2 negotiation failed for peer [chars]

Explanation  IPsec policy negotiation failed for peer [chars].

Recommended Action  No action is required.

Error Message  IKE-3-PHASE2_PROPOSAL_MISMATCH: IKEv1: No matching phase 2 proposal found for peer [chars]

Explanation  There is a IPsec policy mismatch for the peer.

Recommended Action  No action is required.

Error Message  IKE-3-UNSUPPORTED_EXCHANGE: IKEv1: Unsupported exchange [dec] received from [chars]

Explanation  A unsupported IKE exchange type [digits] was received from [chars]

Recommended Action  No action is required.

IKE-4

Error Message  IKE-4-INVALID_PAYLOAD_APPEAR: IKEv2 received message (from [chars]) with payload ([chars]) appeared in [chars]([chars])

Explanation  Received a payload in an inappropriate exchange

Recommended Action  No action is required.

Error Message  IKE-4-MESSAGE_ERROR: IKEv2 message (from [chars]) message error: [chars]

Explanation  Received a malformed message which doesn't adhere to the protocol

Recommended Action  No action is required.

Error Message  IKE-4-PARSING_ERROR: IKEv2 message (from [chars]) parsing error: [chars]

Explanation  Received a malformed message which can not be parsed appropriately

Recommended Action  No action is required.

Error Message  IKE-4-UNKNOWN_PAYLOAD: IKEv2 received message (from [chars]) with un-recognized payload ([chars])

Explanation  Received an invalid payload

Recommended Action  No action is required.

Error Message  IKE-4-UNSUPPORT: [chars] is not supported (message from [chars])

Explanation  Received something unsupported

Recommended Action  No action is required.

IKE-6

Error Message  IKE-6-POLL_START_DONE: IKE is exiting since it is not enabled

Explanation  IKE is exiting since it is not enabled in the configuration

Recommended Action  No action is required.

ILC-SPAN Messages

This section contains the ILC-SPAN messages.

ILC-SPAN-3

Error Message  ILC-SPAN-3-ERROR: [chars]

Explanation  Ilc_span_mgr encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

IMAGE_DNLD Messages

This section contains the IMAGE_DNLD messages.

IMAGE_DNLD-SLOT#-2

Error Message  IMAGE_DNLD-SLOT#-2-ADDON_IMG_DNLD_FAILED: Module image download process failed. [chars]

Explanation  Addon image download to module failed. This module is not operational until an addon image has been successfully installed.

Recommended Action  Verify the location and version of your module image. Use the install module cli command to download a new module image.

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_COMPLETE: Module image download process. [chars]

Explanation  Image download completed. Module image is being installed.

Recommended Action  No action is required.

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_FAILED: Module image download process. [chars]

Explanation  Image download failed. Module may be inoperable.

Recommended Action  Use show module cli command to verify the state of this module. Retry image download with install module cli command.

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_FILE_SYSTEM_CHECK_ERROR: File System check failed: [chars]

Explanation  File system consistency check failed

Recommended Action  File-system repair is needed using fsck

Error Message  IMAGE_DNLD-SLOT#-2-IMG_DNLD_STARTED: Module image download process. [chars]

Explanation  Image download started. Module image downloads are non-disruptive to module operation.

Recommended Action  No action is required.

IMAGE_DNLD-SLOT#-4

Error Message  IMAGE_DNLD-SLOT#-4-IMG_DNLD_FILE_SYSTEM_RECREATION: [chars]. Partition was erased and successfully recreated.

Explanation  File system checking and recreation if necessary for \/images\.

Recommended Action  No action is required.

IMAGE_DNLD-SLOT#-5

Error Message  IMAGE_DNLD-SLOT#-5-ADDON_IMG_DNLD_COMPLETE: Addon module image download process completed. [chars]

Explanation  Addon image download to module has completed.The module should now be installing this new image.

Recommended Action  This message is informational only.

Error Message  IMAGE_DNLD-SLOT#-5-ADDON_IMG_DNLD_STARTED: Addon module image download process started. [chars]

Explanation  Addon image download to module has started. This is a disruptive download and this module will be inoperable until this download process is complete.

Recommended Action  This message is informational only.

Error Message  IMAGE_DNLD-SLOT#-5-ADDON_IMG_DNLD_SUCCESSFUL: Addon module image download and install process successful. [chars]

Explanation  Addon image download and install to module is successful.

Recommended Action  Use the show module cli command to verify the module's operational status.

IMP Messages

This section contains the IMP messages.

IMP-5

Error Message  IMP-5-IMP_DISABLED: IMP Disabled

Explanation  IMP Service Disabled

Recommended Action  No action is required.

Error Message  IMP-5-IMP_ENABLED: IMP Enabled

Explanation  IMP Service nabled

Recommended Action  No action is required.

IM Messages

This section contains the IM messages.

IM-3

Error Message  IM-3-IM_IF_FEATURE_BIND_FAILURE: Interface feature bind failed [chars]

Explanation  Interface feature bind failed, so applications in that feature set may not behave correctly.

Recommended Action  No action is required.

Error Message  IM-3-IM_LC_OFFLINE_ERROR: LC Offline could not be sent to vdc:[dec]

Explanation  LC Offline was not relayed to some vdc, so applications may not behave correctly.

Recommended Action  No action is required.

Error Message  IM-3-IM_RESP_ERROR: Component [chars] opcode:[chars] in vdc:[dec] returned error:[chars]

Explanation  Some component returned an error.

Recommended Action  No action is required.

Error Message  IM-3-IM_SEQ_ERROR: Error ([chars]) while communicating with component [chars] opcode:[chars] (for:[chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  No action is required.

IM-5

Error Message  IM-5-IM_DEMUX_ERROR: [chars]

Explanation  Demux function returned error

Recommended Action  No action is required.

Error Message  IM-5-IM_INTERNAL_ERROR: [chars]

Explanation  Internal error occurred

Recommended Action  No action is required.

Error Message  IM-5-IM_MGMT_INTF_STATE: [chars] [chars]

Explanation  Management interface state changed.

Recommended Action  No action is required.

Error Message  IM-5-IM_UNKNOWN_INTERFACE: [chars]

Explanation  Interface is not supported or not found

Recommended Action  No action is required.

INSTALLER Messages

This section contains the INSTALLER messages.

INSTALLER-1

Error Message  INSTALLER-1-UPGRADE_EXCEEDED_DOWNTIME: Switch control plane down more than 80 seconds.

Explanation  This message indicates that control plane was down for more than 80 seconds.

Recommended Action  No action is required.

INSTALLER-5

Error Message  INSTALLER-5-UPGRADE_ABORTED: System upgrade aborted.

Explanation  This message indicates that system wide upgrade has aborted.

Recommended Action  No action is required.

Error Message  INSTALLER-5-UPGRADE_COMPLETED: System upgrade completed.

Explanation  This message indicates system wide upgrade has completed.

Recommended Action  No action is required.

Error Message  INSTALLER-5-UPGRADE_INITIATED: System upgrade initiated.

Explanation  System wide upgrade has been initiated by the user.

Recommended Action  No action is required.

Error Message  INSTALLER-5-UPGRADE_LOW_SPACE: System upgrade stopped. Please [chars]

Explanation  This message indicates that memory available to perform issu is low.

Recommended Action  No action is required.

Error Message  INSTALLER-5-UPGRADE_STOPPED: System upgrade stopped.

Explanation  This message indicates that system wide upgrade has been stopped by the user.

Recommended Action  No action is required.

INTERFACE_VLAN Messages

This section contains the INTERFACE_VLAN messages.

INTERFACE_VLAN-4

Error Message  INTERFACE_VLAN-4-SVI_IF_CONFIG_DELETED_NOTIF_DELAYED_DROPPED: Interface VLAN Delete Notification Not Processed on Time by SAP [dec] ([chars])

Explanation  This SAP took long time in processing Interface VLAN delete notification and caused timeout

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-4-SVI_IF_CONFIG_REMOVED_NOTIF_DELAYED_DROPPED: Interface VLAN Remove Notification Not Processed on Time by SAP [dec] ([chars])

Explanation  This SAP took long time in processing Interface VLAN remove notification and caused timeout

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-4-SVI_VLAN_DOES_NOT_EXIST: Vlan [dec] does not exist

Explanation  Vlan not created before assignment

Recommended Action  Interface-vlan

Error Message  INTERFACE_VLAN-4-SVI_WARN_SVI_UP_IN_NON_ROUTABLE_VDC: Interface VLAN [dec] is being kept up in non-routable VDC. Reason: management configuration enabled. Please disable all the routing protocols

Explanation  Keeping Interface VLAN up in non-routable VDC may cause potenital traffic blackhole

Recommended Action  No action is required.

INTERFACE_VLAN-5

Error Message  INTERFACE_VLAN-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down(Administratively Down)

Explanation  Interface has been configured to be administratively down

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-IF_DOWN_ERROR_DISABLED: Interface [chars] is down. Reason [dec]

Explanation  The interface encountered an error while configuring it

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  Interface VLAN has been suspended or deleted

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_DISABLED: SVI Disabled

Explanation  SVI Service Disabled

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_ENABLED: SVI Enabled

Explanation  SVI Service Enabled

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_GET_MAC_FAILED: Failed to acquire MAC address for SVI [hex]

Explanation  SVI failed to acquire MAC address

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_INIT: SVI intialization failed with error [hex]

Explanation  SVI initialziation error

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_IOD_RELEASE_ERROR_RESPONSE: IM failed to release SVI IOD error [hex]

Explanation  IM failed to release SVI IOD

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_MTS_SEND_FAILURE: MTS send failure for opcode [dec], error [hex]

Explanation  SVI encountered an error in with MTS message

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_MTS_TIME_OUT: MTS send timed out

Explanation  SVI did not recieve response for mts message

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_RSRVD_VLAN_FAILED: Failed to get list of reserved vlans [hex]

Explanation  SVI failed to get the list reserved vlans

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for SVI

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-SVI_SEC_VLAN_FAILED: Failed to get list of secondary vlans [hex]

Explanation  SVI failed to get the list of secondary vlans

Recommended Action  No action is required.

Error Message  INTERFACE_VLAN-5-UPDOWN: Line Protocol on Interface [chars], changed state to [chars]

Explanation  Line protocol status changed for an interface

Recommended Action  No action is required.

IOA_LC Messages

This section contains the IOA_LC messages.

IOA_LC-5

Error Message  IOA_LC-5-IOA_DISABLED: IOA Disabled

Explanation  IOA Service Disabled

Recommended Action  No action is required.

Error Message  IOA_LC-5-IOA_ENABLED: IOA Enabled

Explanation  IOA Service nabled

Recommended Action  No action is required.

IPFIB Messages

This section contains the IPFIB messages.

IPFIB-2

Error Message  IPFIB-2-FIB_HW_ECMP_ADJ_CREATE_FAILURE: ECMP hardware programming failed.

Explanation  Programming of ECMP adjacency in hardware failed. Programming only one next-hop.

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_HW_ECMP_AUTO_RECOVERY_COMPLETE: ECMP auto recovery completed. [dec] v4 and [dec] v6 routes recovered.

Explanation  ECMP auto recovery process completed.

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_HW_ECMP_AUTO_RECOVERY_PARTIAL_COMPLETE: ECMP auto recovery partially completed. [dec] v4 and [dec] v6 routes recovered.

Explanation  ECMP auto recovery process completed. Routes were recovered partially

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_HW_ECMP_AUTO_RECOVERY_START: ECMP auto recovery start.

Explanation  ECMP auto recovery process started.

Recommended Action  No action is required.

Error Message  IPFIB-2-FIB_WEIGHTED_ROUTES_NOT_SUPPORTED: Weighted Routes are not supported in Resilient Mode. Disable using CLI:"no hardware profile ecmp resilient"

Explanation  Weighted Routes are not supported in Resilient Mode.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_BELOW_FULL: Tcam resource is available in IPSG tcam region[[dec]/[dec]].

Explanation  Can add new TCAM entries. tcam resource is available.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_BELOW_THRESHOLD: IPSG tcam region's usage has been below its threshold [dec]% [[dec]/[dec]].

Explanation  Less than 90 percent of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_FULL: No resource available in IPSG tcam region[[dec]/[dec]].IPSG tcam is full.

Explanation  Cannot add new TCAM entries. All entries are used.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TAHOE_TCAM_SIZE_OVER_THRESHOLD: IPSG tcam region's usage has reached its threshold [dec]% [[dec]/[dec]].

Explanation  More than 90 percent of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_BELOW_FULL: Tcam resource is available in IPSG tcam region[[dec]/[dec]] on instance [dec] of Slot [dec].

Explanation  Can add new TCAM entries. tcam resource is available.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_BELOW_THRESHOLD: IPSG tcam region's usage has been below its threshold [dec]% [[dec]/[dec]] on instance [dec] of Slot [dec]

Explanation  Less than 90 percet of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_FULL: No resource available in IPSG tcam region[[dec]/[dec]] on instance [dec] of Slot [dec].IPSG tcam is full.

Explanation  Cannot add new TCAM entries. All entries are used.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_OVER_THRESHOLD: IPSG tcam region's usage has reached its threshold [dec]% [[dec]/[dec]] on instance [dec] of Slot [dec]

Explanation  More than 90 percet of entries are used in TCAM IPSG region

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-IPFIB_IPSG_TCAM_SIZE_ZERO: IPSG tcam region is not configured. Please configure IPSG TCAM region and retry

Explanation  Cannot add TCAM entries. IPSG TCAM region is not configured.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-LFIB_MAX_LABEL_STACK_LIMIT_REACHED: Max Label count exceeded, truncating the label stack

Explanation  Max limit for number of labels in the stack exceeded hence pruning extra labels.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_BIDIR_GENERIC_ERROR: Unexpected confition verified. [chars] . Please collect mifib logs

Explanation  Generic bidir error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_MAX_BIDIR_GRP_RANGE_REACHED: Num of BiDir group ranges installed [dec] has reached maximum Bidir group range limit. Please correct the Bidir config to be within limit

Explanation  Num of maximum Bidir group ranges supported exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_MAX_BIDIR_ROUTES_REACHED_EXPAND: Num of BiDir routes installed exceeded max allowed [dec] while expanding ([chars]/[dec]). Please correct the Bidir config to be within limit

Explanation  Num of maximum Bidir routes supported exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_MAX_BIDIR_ROUTES_REACHED: Num of BiDir routes installed exceeded max allowed [dec] . Please correct the Bidir config to be within limit

Explanation  Num of maximum Bidir routes supported exceeded

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_NON_SSM_TO_SSM_CONV: Converting Routes from Non-SSM to SSM. Please run "clear ip mroute *".

Explanation  Converting Routes from Non-SSM to SSM. Clear all routes

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-MFIB_SSM_TO_BIDIR_CONV: Converting Routes from SSM to Bidir. Please run "clear ip mroute *".

Explanation  Converting Routes from SSM to Bidir. Clear all routes

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_MCINFO_TILE_DEPTH_EMPTY: MCINFO TILE DEPTH is empty

Explanation  MCINFO TILE DEPTH is empty.

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_GRP_CREATE: Multicast IPv4 (*,G) create failed for [chars]

Explanation  Multicast group creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_GRP_UPDATE: Multicast IPv4 (*,G) update failed for [chars]

Explanation  Multicast group update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_INVALID_ARGUMENT: Multicast IPv4 invalid argument for (*,[chars])

Explanation  Multicast invalid argument

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCAST_DA_TCAM_FULL: Multicast DA TCAM resource exhaustion ([chars])

Explanation  Multicast DA TCAM FULL

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCAST_SA_TCAM_FULL: Multicast SA TCAM resource exhaustion ([chars])

Explanation  Multicast SA TCAM FULL

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCINFO_L2PTR: Multicast IPv4 get mcinfo l2ptr failed for ([chars],[chars])

Explanation  Multicast mcinfo l2ptr error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCINFO_LOC: Multicast IPv4 mcinfo get location failed for ([chars],[chars])

Explanation  Multicast mcinfo get loc error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_MCINFO_WRITE: Multicast IPv4 mcinfo programming failed for ([chars],[chars])

Explanation  Multicast mcinfo creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SG_CREATE: Multicast IPv4 (S,G) create failed for ([chars],[chars])

Explanation  Multicast (S,G) creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SG_PGM: Multicast IPv4 (S,G) programming failed for ([chars],[chars])

Explanation  Multicast (S,G) programming failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SG_UPDATE: Multicast IPv4 (S,G) update failed for ([chars],[chars])

Explanation  Multicast (S,G) update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_SRC_CREATE: Multicast IPv4 source create failed for [chars]/[dec]

Explanation  Multicast S/32 creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_TABLE_FULL: Multicast S/32 or G/32 create failed for ([chars],[chars]) due to hash collision

Explanation  Insert failed due to hash collision

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V4_TCAM_INVALID_INDEX: Multicast IPv4 invalid tcam index for (*,[chars])

Explanation  Multicast invalid tcam index

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_GRP_CREATE: Multicast IPv6 (*,G) create failed for [chars]

Explanation  Multicast group creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_GRP_UPDATE: Multicast IP64 (*,G) update failed for [chars]

Explanation  Multicast group update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_INVALID_ARGUMENT: Multicast IPv6 invalid argument for (*,[chars])

Explanation  Multicast invalid argument

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_MCINFO_L2PTR: Multicast IPv6 get mcinfo l2ptr failed for ([chars],[chars])

Explanation  Multicast mcinfo l2ptr error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_MCINFO_LOC: Multicast IPv6 mcinfo get location failed for ([chars],[chars])

Explanation  Multicast mcinfo get loc error

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_MCINFO_WRITE: Multicast IPv6 mcinfo programming failed for ([chars],[chars])

Explanation  Multicast mcinfo creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SG_CREATE: Multicast IPv6 (S,G) create failed for ([chars],[chars])

Explanation  Multicast (S,G) creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SG_PGM: Multicast IPv6 (S,G) programming failed for ([chars],[chars])

Explanation  Multicast (S,G) programming failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SG_UPDATE: Multicast IPv6 (S,G) update failed for ([chars],[chars])

Explanation  Multicast (S,G) update failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_SRC_CREATE: Multicast IPv6 source create failed for [chars]/[dec]

Explanation  Multicast S/128 creation failed

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_TABLE_FULL: Multicast S/128 or G/128 create failed for ([chars],[chars]) due to hash collision

Explanation  Insert failed due to hash collision

Recommended Action  No action is required.

Error Message  IPFIB-SLOT#-2-TAH_MFIB_V6_TCAM_INVALID_INDEX: Multicast IPv6 invalid tcam index for (*,[chars])

Explanation  Multicast invalid tcam index

Recommended Action  No action is required.

IPQOSMGR Messages

This section contains the IPQOSMGR messages.

IPQOSMGR-2

Error Message  IPQOSMGR-2-QOSMGR_DCBXP_PFC_CMP_FAIL_MSG: [chars] - qos config [chars] not compatible with the peer

Explanation  Port_id [chars] has qos config [chars] which is incompatible with the peer.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_FCOE_POLICY_NOT_REMOVED: Policy [chars] is attached to interfaces. Hence not removed.

Explanation  Policy is not removed as service policy referenced it

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_HA_FAILURE: Failed to do high availability operation: [chars].

Explanation  Failed to do high availability operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_INIT_FAILED: Initialization failed for QoS Manager: [chars], reason: [hex].

Explanation  Initialization failed for QoS Manager due to [chars], reason: [hex].

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_LLFC_APPLY_FAILURE_BUFFER_FULL: Unable to apply flow-control configuraiton on interface: [chars] due to \'[chars]\'. Please manually remove the configuration

Explanation  Failed to apply flow-control configuration on Port_id [chars] due to error [chars]

Recommended Action  Manually delete flow-control configuration on the port to keep the config accurate

Error Message  IPQOSMGR-2-QOSMGR_LLFC_APPLY_FAILURE: Unable to apply flow-control configuraiton on interface: [chars] due to \'[chars]\'.

Explanation  Failed to apply flow-control configuration on Port_id [chars] due to error [chars]

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_MTS_FAILURE: Failed to do MTS operation: [chars].

Explanation  Failed to do MTS operation. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_MTS_REGISTRATION_FAILED: MTS options setting to [hex] failed for opCode: [dec].

Explanation  MTS options setting to [hex] failed for opCode: [dec].

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_NETWORK_QOS_POLICY_CHANGE: Policy [chars] is now active

Explanation  [chars] is the new active network-qos policy

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_PSS_FAILURE: Failed to do PSS operation: [chars], reason: [hex].

Explanation  Failed to do PSS operation [chars]. [hex] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-2-QOSMGR_PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec].

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version.

Recommended Action  No action is required.

IPQOSMGR-3

Error Message  IPQOSMGR-3-QOSMGR_CONFIG_ERROR: Configuration error: [chars].

Explanation  Configuration error. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-3-QOSMGR_NVDC_PFF_ERROR: PPF verify/commit failed in vdc [dec] error: [hex] for global qos command

Explanation  For global qos command, PPF verify/commit failed in vdc [dec] with reason [hex].

Recommended Action  No action is required.

Error Message  IPQOSMGR-3-QOSMGR_PPF_ERROR: PPF library error: [chars].

Explanation  PPF library errors. [chars] is the reason.

Recommended Action  No action is required.

IPQOSMGR-4

Error Message  IPQOSMGR-4-QOSMGR_ING_QUEUING_DCBX_WARNING: Input direction queuing config is being allowed for FCoE/DCBX exchange but will not be applied.

Explanation  Input direction Queuing config is unsupported on N9K but config is being allowed for DCBX compatibility with peer.

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_LC_ERROR_MSG: Linecard [dec] returned an error: [chars]

Explanation  Linecard [dec] returned an error message which is reported as [chars].

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_POLICIES_PRESENT_ON_DELETED_VLANS: Some VLANs (id: [chars]) which are getting deleted now are still having qos service-policy attached. These policies will be effective only when the VLANs get created again.

Explanation  VLAN(s) [chars] is(are) getting deleted now. This is an informationsl message to notify that qos service-policies are present when the vlan is deleted. If the service-policies are not needed, please detach them from the vlans

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_PPF_WARNING: PPF library warning: [chars].

Explanation  PPF library warning. [chars] is the reason.

Recommended Action  No action is required.

Error Message  IPQOSMGR-4-QOSMGR_WARNING_MSG: [chars] [dec]

Explanation  QOSMGR warning messages is reported as [chars] [dec].

Recommended Action  No action is required.

IPQOSMGR-5

Error Message  IPQOSMGR-5-QOSMGR_LC_STAT_SESSION_ERROR_MSG: Linecard [dec] returned the following error for [chars] session: [chars].

Explanation  Linecard [dec] returned an error message for session of type [chars] which is reported as [chars]. This message may be seen during linecard reload if there is an active session going on.

Recommended Action  No action is required.

IPQOSMGR-6

Error Message  IPQOSMGR-6-QOSMGR_DCBXP_CMP_FAIL_MSG: [chars] - qos config [chars] not compatible with the peer

Explanation  Dcbxp warning: Port_id [chars] has qos config [chars] which is incompatible with the peer.

Recommended Action  No action is required.

Error Message  IPQOSMGR-6-QOSMGR_INFO: QOSMGR Info: [chars].

Explanation  QOSMGR info is reported as [chars].

Recommended Action  No action is required.

Error Message  IPQOSMGR-6-QOSMGR_STATUS: QOSMGR Status: [chars].

Explanation  QOSMGR status is reported as [chars].

Recommended Action  No action is required.

IPS Messages

This section contains the IPS messages.

IPS-2

Error Message  IPS-2-ISCSI_IPS_INIT: IPS initialization of [chars] [chars]

Explanation  IPS initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

IPS-3

Error Message  IPS-3-DUP_IPV4_ADDR_DETECTED: duplicate IP address ([chars]) sent from link address ([chars])

Explanation  Duplicate IPv4 address is configured in the network

Recommended Action  No action is required.

Error Message  IPS-3-FCIP_FTA_ACCEL_CHAIN_ABORTED: Exch Aborted FC oxid [hex] My oxid [hex] State [chars] Event [chars] CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec] (Internal [hex]:[hex])

Explanation  FTA Exch being aborted

Recommended Action  Informational no action required

Error Message  IPS-3-FCIP_FTA_DATA_SENSE: Sense data with ERA [hex] sent to CH FCID: [hex] CHI: [hex] from FCIP CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  Sense data with ERA sent

Recommended Action  SYSLOGDOC_CONTACT_TAC

Error Message  IPS-3-FCIP_FTA_ERA_35: ERA 0x35 presented to CH FCID: [hex] CHI: [hex] from FCIP CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP got an ERA 35

Recommended Action  SYSLOGDOC_CONTACT_TAC

Error Message  IPS-3-FCIP_FTA_ERA_38: ERA 0x38 received CH FCID: [hex] CHI: [hex] from FCIP CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec] at tape capacity: [dec] MB

Explanation  FCIP got an ERA 38

Recommended Action  SYSLOGDOC_CONTACT_TAC

Error Message  IPS-3-FCIP_FTA_LOCATE_RBID_MISMATCH: Permanent Error due to Locate RBID Mismatch, CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP-FTA got a Permanent Error

Recommended Action  Informational no action required

Error Message  IPS-3-FCIP_FTA_PERM_ERR: Permanent Error, ERA [hex] rcvd CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec] sense_byte[2,6]: [[hex], [hex]]

Explanation  FCIP-FTA got a Permanent Error

Recommended Action  Informational no action required

Error Message  IPS-3-FCIP_FTA_RETRY_ERROR: [chars] retries [dec] FC oxid [hex] My oxid [hex] State [chars] Event [chars] CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FTA Command timed out

Recommended Action  Informational no action required

Error Message  IPS-3-FCIP_LINK_STAT_LOSS_OF_SYNC: [chars]: Loss of Sync ([chars])

Explanation  FCIP Link Failed with Loss of Sync.

Recommended Action  No action is required.

Error Message  IPS-3-IPS_CRYPTO_FIPS_FAILED: IPS module [dec] has failed FIPS tests. FIPS info - [chars]

Explanation  FIPS error occurred in the IPS module.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-IPS_EGRESS_PERR: Parity error on dma-bridge egress. Count: [dec]

Explanation  Parity error occured in dma-bridge egress direction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-IPS_FIPS_MODE_ERROR: IPS FIPS error: [chars]

Explanation  IPS module FIPS mode error

Recommended Action  No action is required.

Error Message  IPS-3-IPS_FIPS_TEST_FAILED: IPS FIPS compliance test failed

Explanation  IPS FIPS compliance test failed

Recommended Action  No action is required.

Error Message  IPS-3-IPS_INGRESS_PERR: Parity error on dma-bridge ingress. Count: [dec]

Explanation  Parity error occured in dma-bridge ingress direction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the CFS lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_COMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while commiting the cfs config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_CONFIG_FAILED: [chars]; [chars]

Explanation  An error occurred while distributing the CFS config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the CFS lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_ACTIVATION_FAILED: [chars]; [chars]

Explanation  An error occurred while activating merged configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_CLEARED: [chars]

Explanation  Merge cleared, reason: [chars]

Recommended Action  No action is required.

Error Message  IPS-3-ISLB_CFS_MERGE_COMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while commiting the cfs merge config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_CONFIG_FAILED: [chars]; [chars]

Explanation  An error occurred while distributing the CFS merge config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_FAILED: [chars]; [chars]

Explanation  An error occurred while merging the iSLB CFS fabrics. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_PRECOMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while precommiting merge data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_MERGE_REQ_REJECTED: [chars]

Explanation  Merge requested rejected, reason: [chars]

Recommended Action  No action is required.

Error Message  IPS-3-ISLB_CFS_MERGING_CONFIG_DB_FAILED: [chars]; [chars]

Explanation  An error occurred while merging the config data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_PRECOMMIT_FAILED: [chars]; [chars]

Explanation  An error occurred while precommiting data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_PWWN_RESV_CLAIM_FAILED: [chars]

Explanation  PWWN reservation claim failed. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_PWWN_RESV_RELEASE_FAILED: [chars]

Explanation  PWWN reservation release failed. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the CFS lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_CFS_VRRP_DIST_FAILED: [chars]

Explanation  An error occurred while distributing the VRRP CFS runtime data. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_ZONE_ACTIVATION_FAILED: iSLB zoneset activation returned [hex] for VSAN [dec]

Explanation  ISLB zoneset activation failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  IPS-3-ISLB_ZONE_ACTIVATION_RETRY: iSLB zoneset activation returned [hex] for VSAN [dec]

Explanation  ISLB zoneset activation failed. Zone server busy.

Recommended Action  Retry the iSLB zonest activation.

Error Message  IPS-3-ISLB_ZONE_NO_ACTIVE_ZONESET: iSLB zoneset activation returned [hex] for VSAN [dec]

Explanation  ISLB zoneset activation failed. No active zoneset.

Recommended Action  Activate a zoneset in the specified VSAN and retry

Error Message  IPS-3-RED_PACKET_DROPS: Congestion detected on GigabitEthernet port (buffer pool size: [dec])

Explanation  Congestion detected on GigabitEthernet port due to RED threshold limit

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

IPS-4

Error Message  IPS-4-FCIP_FTA_CFG_MISMATCH: [chars]: Mismatch in FCIP Ficon Tape Acceleration configuration with peer

Explanation  The FCIP Ficon Tape Acceleration configuration does not match with peer's configuration

Recommended Action  Fix the FCIP Ficon Tape Acceleration configuration to be consistent with the peer

Error Message  IPS-4-FCIP_FTA_VSAN_UPDATE_WARNING: FCIP FICON tape acceleration VSAN update had an error ([chars]) on interface [chars] causing a flap of the interface

Explanation  The FCIP FICON tape acceleration VSAN configuration experienced an error when disabling and enabling the VSAN over the FCIP tunnel. The FCIP tunnel was disabled and re-enabled as a result of this error to ensure data integrity.

Recommended Action  No action is required.

Error Message  IPS-4-FCIP_LICENSE_BIND_FAILED: Bind failed for [chars] due to [chars] for license failure; configuration accepted but bind failed

Explanation  The FCIP configuration was accepted, but the FCIP interface did not bind to a physical interface because the appropriate license was not available. If a license becomes available in the future, this FCIP interface will bind to a physical interface automatically.

Recommended Action  Check the license state with "show license usage" and acquire the necessary FCIP license

Error Message  IPS-4-FCIP_XRCE_LICENSE_FAILED: XRC Acceleration deactivated due to license failure

Explanation  The XRC Acceleration configuration was accepted, but will remain inactive until a valid license is available. When the appropriate license is installed, XRC accelaration will be activated.

Recommended Action  Check the license state with "show license usage" and acquire the necessary XRC_ACCL license

Error Message  IPS-4-FCIP_XRCE_LICENSE_INSTALLED: XRC Acceleration activated due to valid license

Explanation  The XRC Acceleration configuration is activated as a valid license has been installed.

Recommended Action  No action is required.

IPS-5

Error Message  IPS-5-FCIP_BIND_FAILED: Bind failed for [chars] due to [chars] for [chars]

Explanation  FCIP/ISCSI Interface bind to Ethernet port failed

Recommended Action  No action is required.

Error Message  IPS-5-FCIP_BPORT_KEEPALIVES_NOT_SUPPORTED: Bport Keepalives not supported for FCIP [chars]

Explanation  Bport Keepalives not supported in this release

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_BPORT_NOT_SUPPORTED: Bport not supported for FCIP [chars]

Explanation  Bport not supported in this releas

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_ALREADY_OFF: FTA Already Off, [chars] VSAN: [dec]

Explanation  FTA Already Off

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_ALREADY_ON: FTA Already ON, [chars] VSAN: [dec]

Explanation  FTA Already ON

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_CB_DOWN: FTA [chars] is DOWN

Explanation  FTA is DOWN

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_CB_UP: FTA [chars], is UP

Explanation  FTA is UP

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_DISBAND_GRP_CMD: Disband Group message processed PGID: [chars] CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP Disbanded a Group

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_EST_GRP_CMD: Path Group establised for PGID: [chars] CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP established a Path Group

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_NPORT_PATH_RSCN_CLNUP_PASS1: RSCN Cleanup Pass1 [chars] FCID1: [hex] FCID2: [hex] VSAN: [dec]

Explanation  Doing RSCN Cleanup, Pass 1

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_NPORT_PATH_RSCN_CLNUP_PASS2: RSCN Cleanup Pass2 [chars] FCID1: [hex] FCID2: [hex] VSAN: [dec]

Explanation  Doing RSCN Cleanup, Pass 2

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_RESIGN_GRP_CMD: Resign group processed for PGID: [chars] CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP Resigned a Group

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_RESP_3490: 3490 device discovered by FCIP CH FCID: [hex] CHI: [hex] device at CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  Device type discovered is 3490

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_RESP_3590: 3590 device discovered by FCIP CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  Device type discovered is 3590

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_RESP_NOT_TAPE: Non-tape device discovered by FCIP CH FCID: [hex] CHI: [hex] device at CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP discovered a non-tape device

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_TURN_OFF_LAST_VSAN: FTA turned off for the Last VSAN, [chars] VSAN: [dec]

Explanation  FTA turned off for the Last Vsan

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_TURN_OFF_NONLAST_VSAN: FTA turned off for the Non-Last VSAN, [chars] VSAN: [dec]

Explanation  FTA turned off for the Non-Last Vsan

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_TURN_ON: Turn ON FTA, [chars] VSAN: [dec]

Explanation  FTA turned ON

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTA_WARNING: FTA Warning :[chars]

Explanation  Generic FTA Warning

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_FTRA_CFG_MISMATCH: [chars]: Mismatch in FCIP FICON Tape Read Accelerator configuration with peer

Explanation  The FCIP FICON Tape Read Accelerator configuration does not match with peer's configuration

Recommended Action  Fix the FCIP FICON Tape Read Accelerator configuration to be consistent with the peer

Error Message  IPS-5-FCIP_IF_CR_DEL: Interface [chars] [chars]

Explanation  FCIP Interface was Created or Deleted

Recommended Action  No action is required.

Error Message  IPS-5-FCIP_MODE1_CHANGED_TO_MODE2: Changing mode1 compression to mode2 for [chars], on a MSM/SSN-16 linecard

Explanation  Change mode1 compression to mode2 on a MSM/SSN-16 linecard

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_NUM_TCP_CONNS_MISMATCH: [chars]: configured for 2 tcp connections but currently operating with 1 connection

Explanation  Number of configured tcp connections don't match number of connections currently up

Recommended Action  No action is required.

Error Message  IPS-5-FCIP_PEER_CAVIUM: Peer FCIP [chars] is a MSM/SSN-16 linecard

Explanation  Peer linecard is a MSM/SSN-16

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_PEER_NON_CAVIUM: Peer FCIP [chars] is a non MSM/SSN-16 linecard

Explanation  Peer linecard is non MSM/SSN-16

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_RA_CFG_MISMATCH: [chars]: Mismatch in FCIP Tape Read Acceleration capability with peer

Explanation  The FCIP Tape Read Acceleration capability does not match with peer's configuration

Recommended Action  Fix the FCIP Tape Read Acceleration capability to be consistent with the peer

Error Message  IPS-5-FCIP_SF_NOT_SUPPORTED: Special-Frame not supported for FCIP [chars]

Explanation  Spl-Frame not supported in this release

Recommended Action  Informational no action required

Error Message  IPS-5-FCIP_TA_CFG_MISMATCH: [chars]: Mismatch in FCIP Tape Acceleration configuration with peer

Explanation  The FCIP Tape Acceleration configuration does not match with peer's configuration

Recommended Action  Fix the FCIP Tape Acceleration configuration to be consistent with the peer

Error Message  IPS-5-FCIP_TA_ITL_MISMATCH: [chars]: Mismatch in FCIP Write/Tape Acceleration software capability with peer

Explanation  The FCIP Write/Tape Acceleration software capability does not match with peer's software capability

Recommended Action  Fix the FCIP software to be consistent with the peer

Error Message  IPS-5-FCIP_TSTAMP_CHK_FAILED: [chars]: Timestamp check failed on ingressing frames

Explanation  Timestamp between local and remote side exceeds the configured tolerance

Recommended Action  No action is required.

Error Message  IPS-5-FCIP_UNBIND_FAILED: UNBIND failed for [chars] due to [chars] for [chars]

Explanation  FCIP/ISCSI Interface UNBIND from Ethernet port failed

Recommended Action  No action is required.

Error Message  IPS-5-FCIP_WA_CFG_MISMATCH: [chars]: Mismatch in FCIP Write Acceleration configuration with peer

Explanation  The FCIP Write Acceleration configuration does not match with peer's configuration

Recommended Action  Fix the FCIP Write Acceleration configuration to be consistent with the peer

Error Message  IPS-5-FCIP_WA_XFER_RDY_ERR: [chars]: FCIP Write Acceleration received XFER-RDY after exhcange cleanup. Host [hex] Target [hex]

Explanation  FCIP Write/Tape Acceleration received XFER-RDY after exchange cleanup

Recommended Action  No action is required.

Error Message  IPS-5-FCIP_XRCE_CFG_MISMATCH: [chars]: Mismatch in FCIP XRC Emulator configuration with peer

Explanation  The FCIP XRC Emulator configuration does not match with peer's configuration

Recommended Action  Fix the FCIP XRC Emulator configuration to be consistent with the peer

Error Message  IPS-5-IPS_IPACL_LOG_MSG: [chars]

Explanation  Details of the packet dropped due to ACLs

Recommended Action  No action is required.

Error Message  IPS-5-IPS_MGR_FEATURE_ENABLE: ips:[dec] iscsi:[dec] fcip:[dec] iscsi-intf-vsan:[dec] ips-lc:[dec]

Explanation  IPS Manager feature enabled/disabled

Recommended Action  No action is required.

Error Message  IPS-5-IPS_TCP_PORT_IN_USE: Cannot bringup interface [chars], local port already in use

Explanation  FCIP and iSCSI interface are trying to use the same local port, please use different ports

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_BAD_DATA_DIGEST_CRC: iSCSI ingress data digest error from initiator [chars] alias [chars] S_ID [hex] to D_ID [hex]

Explanation  ISCSI Ingress Data Digest CRC failed

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_CONN_DOWN_BATCH: [chars]: [dec] iSCSI sessions failed in last [chars], reason: [chars]

Explanation  Number of iSCSI session down during the last time interval

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_CONN_DOWN: [chars]: iSCSI session down from initiator [chars] alias [chars] ip [chars] to target [chars], reason: [chars]

Explanation  ISCSI session goes down

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_CONN_UP: [chars]: iSCSI session up from initiator [chars] alias [chars] ip [chars] to target [chars]

Explanation  ISCSI session comes up and reaches Full-Feature phase

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_PORT_FAILOVER: [chars]: iSCSI initiator [chars] alias [chars] ip [chars] target [chars]. FC session failed over to port [chars]

Explanation  FC session for the iSCSI session failed over to newly active port

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_SB_GET_TGT: iSCSI SB get [dec] targets, initiator [chars] alias [chars] ip [chars]

Explanation  ISCSI FCNS query response

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_SESSION_CREATE_FAILURE: [chars]: iSCSI Session initiator [chars] target [chars] create failed. [chars]

Explanation  ISCSI Session Create failed

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_SESSION_CREATE_REDIRECT: [chars]: iSCSI Session initiator [chars] target [chars] redirected to [chars]/[chars]

Explanation  ISCSI Session Create redirected

Recommended Action  No action is required.

Error Message  IPS-5-ISCSI_SESSION_REDIRECT_TIMEOUT: iSCSI Session initiator [chars] to [chars] redirected to [chars] timeout

Explanation  ISCSI Session Redirect timeout

Recommended Action  No action is required.

Error Message  IPS-5-ISLB_CFS_SESSION_CLEARED: CFS Session Cleared

Explanation  CFS Session Cleared by user

Recommended Action  No action is required.

Error Message  IPS-5-LRTP_HDR_FCID_MISMATCH: LRTP header s_id([hex]) d_id([hex]) do not match Inner header s_id([hex]) d_id([hex]) Initiator ([chars]) Target([chars])

Explanation  The s_id and/or the d_id field in the frame's LRTP header does not match the s_id or d_id field in the inner header

Recommended Action  No action is required.

Error Message  IPS-5-PORT_IPCFG_FAILED: Cannot configure IP address for interface [chars]

Explanation  Cannot configure IPS port IP address

Recommended Action  No action is required.

Error Message  IPS-5-SB_MGR_CORE_FAILED: Ethernet Processing core [chars] failed due to [chars]

Explanation  Ethernet Processing Core failed

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_ENTITY_ID_MISMATCH: [chars]: special frame profile ID mismatch

Explanation  Special frame received and destination profile ID does not match local profile ID

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_FABRIC_WWN_MISMATCH: [chars]: special frame fabric wwn mismatch

Explanation  Special frame received and source/destination fabric wwn does not match local destination/ source fabric wwn

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_IF_ADMIN_DOWN: [chars]: special frame received if down

Explanation  Special frame received and interface is admin down

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_IF_NOT_ENABLED: [chars]: special frame not enabled

Explanation  Special frame received and interface special frame configuration is disabled

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_INVALID_NONCE: [chars]: special frame response has invalid nonce for FCIP

Explanation  Special frame response has a different nonce than was originally sent in the special frame

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_NOT_RECV: [chars]: special frame was not received by passive-side FCIP

Explanation  Special frame was not received by the passive-side of the FCIP TCP tunnel within given time period

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_RESP_MISMATCH: [chars]: special frame response has byte mismatch for FCIP

Explanation  Special frame response has a mismiatch in one of the bytes from what was sent from the FCIP special frame sender

Recommended Action  No action is required.

Error Message  IPS-5-SFRAME_RESP_NOT_RECV: [chars]: special frame response was not received by active-side FCIP

Explanation  Special frame response was not received by the active-side of the FCIP TCP tunnel within given time period

Recommended Action  No action is required.

IPS-6

Error Message  IPS-6-FCIP_FTA_READ_ACCEL_STARTED: Read Acceleration started for CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP-FTA Read Acceleration started

Recommended Action  Informational no action required

Error Message  IPS-6-FCIP_FTA_READ_ACCEL_STOPPED: Read Acceleration stopped for CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec] due to [chars] after [dec] MB reads

Explanation  FCIP-FTA Read Acceleration stopped

Recommended Action  Informational no action required

Error Message  IPS-6-FCIP_FTA_WRITE_ACCEL_STARTED: Write Acceleration started for CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec]

Explanation  FCIP-FTA Write Acceleration started

Recommended Action  Informational no action required

Error Message  IPS-6-FCIP_FTA_WRITE_ACCEL_STOPPED: Write Acceleration stopped for CH FCID: [hex] CHI: [hex] CU FCID [hex] CUI: [hex] DA [hex] VSAN: [dec] due to [chars] after [dec] MB writes

Explanation  FCIP-FTA Write Acceleration stopped

Recommended Action  Informational no action required

IPS-7

Error Message  IPS-7-ISCSI_FCNS_QUERY_REQ: return [hex], wait [dec], VSAN [dec], Init: [chars]

Explanation  ISCSI FCNS query

Recommended Action  No action is required.

Error Message  IPS-7-ISCSI_FCNS_QUERY_RESP: result [hex], [dec] targets, wait [dec], Init: [chars]

Explanation  ISCSI FCNS query response

Recommended Action  No action is required.

Error Message  IPS-7-ISCSI_NEW_FCNS_QUERY_REQ: return [hex], VSANs [chars], Init: [chars]

Explanation  ISCSI FCNS query

Recommended Action  No action is required.

Error Message  IPS-7-ISCSI_NEW_FCNS_QUERY_RESP: result [hex], [dec] entries, [dec] targets, [dec] total targets Init: [chars]

Explanation  ISCSI FCNS query response

Recommended Action  No action is required.

Error Message  IPS-7-ISNS_SVR_ERR_RESPONSE: iSNS server returned following error code on iSNS request for interface [chars] : [dec]

Explanation  ISNS server returned an error for register/deregister request. For select error codes iSNS client would retry and re-register all target nodes corresponding to the interface

Recommended Action  No action is required.

IPV6 Messages

This section contains the IPV6 messages.

IPV6-2

Error Message  IPV6-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The IP Configuration Manager failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

IPV6-3

Error Message  IPV6-3-FILE_WRITE_FAILED: Writing to file [chars] failed - error: [chars]

Explanation  Writing to a file failed probably due to no space.

Recommended Action  Ipv6

Error Message  IPV6-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

IPV6-4

Error Message  IPV6-4-DAD_FAILED_EVENT: Duplicate address detection failed for [chars] on [chars]

Explanation  Duplicate address detection for IP address failed.

Recommended Action  Ipv6

IPV6-6

Error Message  IPV6-6-CONFIG_EVENT: IP Configuration Msg: [chars]

Explanation  Configuration message that needs to be logged.

Recommended Action  No action is required.

Error Message  IPV6-6-INTERFACE_DELETED: The interface [chars] has been deleted

Explanation  The specified interface has been deleted. The service will delete all the configuration on that interface.

Recommended Action  No action is required.

Error Message  IPV6-6-INTERFACE_EVENT: IP address [chars] [chars] on interface [chars]

Explanation  The IP address [chars] has been successfully [chars] on the interface [chars].

Recommended Action  No action is required.

Error Message  IPV6-6-ROUTE_NOT_ACTIVE: The [chars] is not active

Explanation  The specified route is successfully configured but currently is not active.

Recommended Action  Check that the route is correct and the outgoing interface is operationally up.

Error Message  IPV6-6-STARTING: IP configuration Manager started

Explanation  The IP Configuration Manager service has successfully started.

Recommended Action  No action is required.

IP Messages

This section contains the IP messages.

IP-1

Error Message  IP-1-DHCP_CLIENT_FAILED: dhcp-client failed to get the ip address

Explanation  Dhcp-client failed to get the ip from server, probably due to server lease unavailability or cable disconnectivity .

Recommended Action  Ip

IP-2

Error Message  IP-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The IP Configuration Manager failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

IP-3

Error Message  IP-3-FILE_WRITE_FAILED: Writing to file [chars] failed - error: [chars]

Explanation  Writing to a file failed probably due to no space.

Recommended Action  Ip

Error Message  IP-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

IP-4

Error Message  IP-4-DAD_FAILED_EVENT: Duplicate address detected for [chars] on [chars]

Explanation  Duplicate address detected for IP address.

Recommended Action  Ip

IP-6

Error Message  IP-6-CONFIG_EVENT: IP Configuration Msg: [chars]

Explanation  Configuration message that needs to be logged.

Recommended Action  No action is required.

Error Message  IP-6-DHCP_CLIENT_SUCCESS: dhcp_client got ip address:[chars],netmask:[chars] for mgmt interface,got from server:[chars]

Explanation  Dhcp-client is able to get the ip address from server,

Recommended Action  No action is required.

Error Message  IP-6-INTERFACE_DELETED: The interface [chars] has been deleted

Explanation  The specified interface has been deleted. The service will delete all the configuration on that interface.

Recommended Action  No action is required.

Error Message  IP-6-INTERFACE_EVENT: IP address [chars] [chars] on interface [chars]

Explanation  The IP address [chars] has been successfully [chars] on the interface [chars].

Recommended Action  No action is required.

Error Message  IP-6-ROUTE_NOT_ACTIVE: The [chars] is not active

Explanation  The specified route is successfully configured but currently is not active.

Recommended Action  Check that the route is correct and the outgoing interface is operationally up.

Error Message  IP-6-STARTING: IP configuration Manager started

Explanation  The IP Configuration Manager service has successfully started.

Recommended Action  No action is required.

ISNS Messages

This section contains the ISNS messages.

ISNS-2

Error Message  ISNS-2-ISNS_CFS_OPERATION_FAILED: iSNS CFS [chars] failed

Explanation  ISNS CFS operation failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  ISNS-2-ISNS_INIT: iSNS initialization of [chars] [chars]

Explanation  ISNS initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

KIM Messages

This section contains the KIM messages.

KIM-2

Error Message  KIM-2-KIM_BIND_MOUNT_FAILED: Bind mount of /proc/self/ns/net from pid [dec] for namespace [chars] failed with errno [dec] ([chars])

Explanation  NS bind mount failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_GET_LNX_IFINDEX_FAILED: Failed to get linux ifindex for interface [chars] (ifindex [dec]). err: [dec] errno: [dec] (sock: [dec])

Explanation  Get of linux ifindex failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_GET_RSVD_VLAN_FAILED: Failed to get the reserved vlan range

Explanation  Get of reserved vlan range failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_MOUNT_BIND_FAILED: mount --bind of [chars] failed with errno: [dec] ([chars])

Explanation  Mount bind failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_MOUNT_SHARED_FAILED: mount --make-shared of [chars] failed with errno: [dec] ([chars])

Explanation  Mount shared failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_NS_CREATE_FAILED: Failed to create a new network namespace "[chars]". errno: [dec] ([chars])

Explanation  Namespace creation failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_NS_FILE_NOT_PRESENT: Namespace file [chars] doesn't exist. access returned errno: [dec] ([chars])

Explanation  NS file not present

Recommended Action  No action is required.

Error Message  KIM-2-KIM_NS_OPEN_FAILED: Open of [chars] failed with errno: [dec] ([chars])

Explanation  NS file open failed

Recommended Action  No action is required.

Error Message  KIM-2-KIM_UNLINK_NETNS_FAILED: Unlink of namespace file [chars] from pid [dec] failed with errno: [dec] ([chars])

Explanation  NS unlink failed

Recommended Action  No action is required.

L2FM Messages

This section contains the L2FM messages.

L2FM-0

Error Message  L2FM-0-L2FM_CLI_INITIALIZATION_FAILED: CLI library initialization failed!

Explanation  Failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  L2FM-0-L2FM_VDC_GWMAC_GET_FAILED: Failed to get gwmac for VDC

Explanation  Failed to get gwmac for VDC.

Recommended Action  No action is required.

Error Message  L2FM-0-L2FM_WRITE_TO_PSS_FAILED_IN_PREVIOUS_INCARNATION: PSS Write Failed in pervious incarnation. Stateful restart not possible

Explanation  PSS Write Failed in pervious incarnation. Stateful restart not possible

Recommended Action  No action is required.

L2FM-1

Error Message  L2FM-1-L2FM_MAX_NUM_CONFIGURABLE_MACS_EXCEEDED: Error: Number of configurable MACs exceeded [dec]. Unable to program the MAC.

Explanation  Cannot program more than 16 user configured MACs

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_ORIB_SENDS_INCORRECT_IFIDX: Incorrect ifidx received from Orib. Please check mac [chars] vlan [dec]

Explanation  L2fm has received a mac insert/delete from Orib with incorrect ifidx. Please check otv mac entries

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_OWNER_NOT_FOUND: Error : fe owner not found for mac entry [chars] in age notif sent from slot = [dec], fe = [dec]

Explanation  L2fm has received an age notification from the linecard but does not have the mac owner in its database

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_SDB_NOT_FLUSHED: Error : [dec] mac entries have not flushed from l2fm sdb

Explanation  Due to an internal error l2fm has not written mac entries to its sdb

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_SMAC_DUP_FOUND: Duplicate static mac found in secondary vlan. P-VLAN:[dec] S-VLAN:[dec] MAC:[chars]

Explanation  Duplicate static mac found in secondary vlan. P-VLAN:[dec] S-VLAN:[dec] MAC:[chars]

Recommended Action  No action is required.

Error Message  L2FM-1-L2FM_WRITE_TO_PSS_FAILED: Failed to write to PSS err [chars]

Explanation  Failed to write to PSS err [chars]

Recommended Action  No action is required.

L2FM-2

Error Message  L2FM-2-CONSISTENCY_CHECK_L2: CC_L2: Consistency Check: [chars]

Explanation  Status of show consistency-checker l2 command

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_AGING_TIME_SET_FAILED: Failed to set age time [dec] for vlan [dec]

Explanation  Failed to set age time [dec] for vlan [dec].

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_CFS_OUT_OF_ORDER: Error: Received Message for STATIC MAC INSERT/DELETE as Out Of Order from vpc peer due to congestion. Please check mac programming for Router macs.Flap interface-vlans if necessary to correct the programming

Explanation  Messages over peer-link could be received out of order due to congestion

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_GLBL_AGING_TIME_SET_FAILED: Failed to set global age time [dec]

Explanation  Failed to set global age time [dec]

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_HASH_ENTRY_REMOVAL_FAILED: Hash entry (%px) removal failed, vlan [dec], mac [chars], hash index [dec]

Explanation  Hash entry removal failed. Please collect show tech-support l2fm and console logs

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_INVALID_PORT_NUM: Invalid port num [dec], max_ports [dec]

Explanation  Invalid port num. Please check the card config for this card and collect show tech-support l2fm

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_INVALID_SLOT_NUM: Invalid slot num [dec], max_slots [dec]

Explanation  Invalid slot num. Please check the card config for this card and collect show tech-support l2fm

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_FLAP_DISABLE_LEARN_N3K: Loops detected in the network for mac [chars] among ports [chars] and [chars] vlan [dec] - Disabling dynamic learning notifications for a period between 120 and 240 seconds on vlan [dec]

Explanation  System detected loops in the network - administration intervention may be required to avoid this problem in future

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_FLAP_RE_ENABLE_LEARN_N3K: Re-enabling dynamic learning on vlan [dec]

Explanation  Re enabling learning on all interfaces after disable period expired

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_INSERT_FAILURE_REDUCED: Re-enabling Mac Learn

Explanation  Re-enabling Mac Learn, more space available after hw insert failure

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_INSERT_FAILURE_RE_ENABLE: Re-enabling Mac Learn after [dec] seconds

Explanation  Re-enabling Mac Learn, [dec] seconds after hw insert failure

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_INSERT_FAILURE: L2 HW table insert failure - no further MAC addresses can be installed. Disabling Mac Learn

Explanation  L2 HW table insert failure - no further MAC addresses could be programmed - Disabling Mac Learn until there is sufficient capacity

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_LIMIT_REACHED: L2 HW table reached its capacity - no further MAC addresses can be installed. Disabling Mac Learn

Explanation  L2 HW table reached its capacity - no further MAC addresses could be programmed - Disabling Mac Learn until there is sufficient capacity

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_HW_LIMIT_REDUCED: Re-enabling Mac Learn

Explanation  Re-enabling Mac Learn as there is sufficient L2 HW capacity

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_LIMIT_REACHED: Unicast station table dynamic capacity reached (supported limit [dec])

Explanation  System station table reached its capacity - no further MAC addresses could be programmed - administration intervention may be required to avoid this problem in future

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_MAC_MOVE_PORT_DOWN: Loops detected in the network for mac [chars] among ports [chars] and [chars] vlan [dec] - Port [chars] Disabled on loop detection

Explanation  System detected loops in the network - administration intervention may be required to avoid this problem in future

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  L2FM-2-L2FM_PEER_ID_INVALID: Invalid peer id, source [chars]

Explanation  Peer id is zero, which is invalid. Please collect show tech-support nve as well

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_PPF_FAILED: L2FM Policy failure: [chars]

Explanation  Policy operation failed in l2fm

Recommended Action  No DDTS.

Error Message  L2FM-2-L2FM_UPDATE_LOST_HINTS: mac [hex]:[hex]:[hex]:[hex]:[hex]:[hex] updated by slot [dec] fe_index [dec], from [hex] to [hex], with [hex] new hints and loosing %08 old_hints. stack trace: [chars]

Explanation  An update from MTM looks inconsistent with the previous state

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_VPC_FAST_CONVERGENCE_NOTIFICATION: vpc fast-convergence is not supported in this release

Explanation  Vpc fast-convergence is not supported in this release. It will be supported in future releases.

Recommended Action  No action is required.

Error Message  L2FM-2-L2FM_VXLAN_MAC_MOVE_PORT_DOWN: Loops detected in the network for mac [chars] between NVE and [chars] on vlan [dec] - Port [chars] Disabled on loop detection

Explanation  System detected loops in the network - administration intervention may be required to avoid this problem in future

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

L2FM-3

Error Message  L2FM-3-L2FM_GET_VLAN_SEGMENT_ID_FAILED: Error: Get vlan_segment_id failed for vlan [dec], rc [chars], segment_id [dec]

Explanation  Failed to get the vlan_segment_id. Please collect show tech-support vlan as well

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_MAC_FLAP_DISABLE_LEARN: Disabling learning in vlan [dec] for 120s due to too many mac moves

Explanation  MAC(s) in vlan [dec] have moved too many times. Disabling learning for 120s.

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_MAC_FLAP_RE_ENABLE_LEARN: Re-enabling learning in vlan [dec]

Explanation  Re-enabling learning in vlan [dec] after 120s timer.

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_PEER_ID_CREATE_REQUEST_FAILED: Error: Peer id create request failed for [chars], rc [chars], segment_id [dec]

Explanation  Peer id create request failed. Please collect show tech-support nve as well

Recommended Action  No action is required.

Error Message  L2FM-3-L2FM_PEER_ID_DELETE_REQUEST_FAILED: Error: Peer id delete request failed for [chars], rc [chars], segment_id [dec]

Explanation  Peer id delete request failed. Please collect show tech-support nve as well

Recommended Action  No action is required.

L2FM-4

Error Message  L2FM-4-L2FM_MAC_MOVE2: Mac [chars] in vlan [dec] has moved between [chars] to [chars]

Explanation  Mac [string] in vlan [dec] has moved between [string] and [string]

Recommended Action  No action is required.

Error Message  L2FM-4-L2FM_MAC_MOVE: Mac [chars] in vlan [dec] has moved from [chars] to [chars]

Explanation  Mac [string] in vlan [dec] has moved from [string] to [string]

Recommended Action  No action is required.

L2FM-5

Error Message  L2FM-5-L2FM_MAX_NUM_MACS_EXCEEDED: Warn: Number of mac entries approaching 75% HW limit. Please run l2 consistency-checker to check inconsistencies

Explanation  Number of mac entries approaching HW limit.

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_VLAN_MODE_CHANGE_TO_NON_CONV: Vlan [dec] has been internally changed to non conversational mode on SVI CREATE

Explanation  Change vlan learning mode to non conversational mode on SVI CREATE

Recommended Action  No action is required.

Error Message  L2FM-5-L2FM_VLAN_MODE_REVERTED_BACK: Vlan [dec] has been internally changed to user configured learning mode on SVI DELETE. Mac entries installed non-optimally due to SVI up will get removed from all FEs once ages out

Explanation  Change vlan learning mode to user configured value on SVI DELETE

Recommended Action  No action is required.

L2FM-6

Error Message  L2FM-6-L2FM_DYN_MAC_INS_FAILED: Dynamic mac insertion failure!fail_cnt: [dec] Slot:[dec]

Explanation  Failed to insert dynamic macs fail_cnt:[dec] for Slot:[Slot]

Recommended Action  No action is required.

Error Message  L2FM-6-L2FM_MAC_TABLE_THRESHOLD_NOTIFICATION: Station table reached [dec]% of the total capacity (num entries [dec], total limit [dec])

Explanation  Station table capacity utilization message as per configured threshold values

Recommended Action  No action is required.

L2MCAST Messages

This section contains the L2MCAST messages.

L2MCAST-SLOT#-0

Error Message  L2MCAST-SLOT#-0-L2MCAST_CLI_INIT_FAILED: CLI library initialization failed!

Explanation  L2MCAST failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-0-L2MCAST_TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  L2MCAST failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

L2MCAST-SLOT#-2

Error Message  L2MCAST-SLOT#-2-L2MCAST_MAC_FULL_LC: Failed to insert entry in MAC table for FE [dec] swidx [dec] ([hex]) with err ([chars]). To avoid possible multicast traffic loss, disable OMF. Use the configuration CLI: "no ip igmp snooping optimise-multicast-flood"

Explanation  Failed to program the MAC table. MAC table line full for this entry

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-2-L2MCAST_VLAN_NOT_FOUND: VLAN [dec] not found in L2MCAST database!

Explanation  L2MCAST failed to find VLAN [dec] in its database. L2 MAC learning & aging on VLAN [dec] may be affected.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-2-L2MCAST: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

L2MCAST-SLOT#-3

Error Message  L2MCAST-SLOT#-3-L2MCAST_HW_INSTALL_FAIL: Hw install failed for vlan [dec] ([dec], [chars], [chars]) entry!

Explanation  L2MCAST failed to insert bd, g, s entry in hardware. Igmp snooping may not be effective on vlan for that group and source

Recommended Action  No action is required.

L2MCAST-SLOT#-6

Error Message  L2MCAST-SLOT#-6-L2MCAST_INITIALIZED: Internal state created [chars]

Explanation  L2MCAST has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in L2MCAST was successful.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_REMOVED: VDC [dec] Removed

Explanation  L2MCAST has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_VLAN_CREATED: VLAN [dec] created

Explanation  L2MCAST has added VLAN [dec].

Recommended Action  No action is required.

Error Message  L2MCAST-SLOT#-6-L2MCAST_VDC_VLAN_REMOVED: VLAN [dec] removed from VDC [dec]

Explanation  L2MCAST has successfully removed VLAN [dec] from VDC [dec].

Recommended Action  No action is required.

LACP Messages

This section contains the LACP messages.

LACP-3

Error Message  LACP-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  LACP-3-LACP_SUSPEND_HALF_DUPLEX_PORT: Port [chars] is in half duplex mode. suspend port

Explanation  LACP is not supported in half duplex mode. Suspend port

Recommended Action  No action is required.

Error Message  LACP-3-LACP_SUSPEND_MINLINK: LACP port [chars] of port-channel [chars] is suspended as min-link requirement not met.

Explanation  LACP suspend ports due to min-link

Recommended Action  No action is required.

Error Message  LACP-3-LACP_UPGRADE_READY_FAILED: Upgrade ready failed.

Explanation  Upgrade ready event failed because atleast one port channel member is in intermediate state.

Recommended Action  No action is required.

Error Message  LACP-3-PACKET_TRANSMIT_ERR: [chars]: Could not send LACP packet err=[dec]

Explanation  There was an error in sending LACP packet

Recommended Action  No action is required.

Error Message  LACP-3-SYN_COLL_DIS_EN: [chars] [[chars]]: SYNC, COLLECT and DISTRIBUTE flags enabled too early by partner

Explanation  Potential interop issue. Partner system seems to have enabled sync as well collecting or distributing flags too early even before actor has selected an aggregator

Recommended Action  No action is required.

Error Message  LACP-3-SYSTEM_MAC_ERR: [chars]: Could not get system mac[[chars]]

Explanation  There was an error in acquiring system mac from VDC Mgr

Recommended Action  No action is required.

LACP-5

Error Message  LACP-5-LACP_DISABLED: LACP Disabled

Explanation  LACP Service Disabled

Recommended Action  No action is required.

Error Message  LACP-5-LACP_DOES_NOT_MEET_MINLINK_REQ: LACP port-channel [chars] is brought down as min-link requirement not met.

Explanation  LACP port-channel down as min-link requirement not met

Recommended Action  No action is required.

Error Message  LACP-5-LACP_ENABLED: LACP Enabled

Explanation  LACP Service Enabled

Recommended Action  No action is required.

Error Message  LACP-5-LACP_MEETS_MINLINK_REQ: LACP port-channel [chars] meets min-link requirement. Reint port-channel

Explanation  LACP port-channel meets min-link requirement

Recommended Action  No action is required.

Error Message  LACP-5-LACP_RATE_FAST_NOT_RECOMENDED: 'lacp rate fast' not recomended if 'vpc peer-link' configured.

Explanation  Can cause traffic outage

Recommended Action  No action is required.

Error Message  LACP-5-LACP_REMOTE_NOTIFY_SUCCESS: Remote notify event.

Explanation  Remote notify event was successful.

Recommended Action  No action is required.

Error Message  LACP-5-LACP_REMOTE_PDU_SEND: Pre/Post ISSU hello sent.

Explanation  Remote notify event was successful.

Recommended Action  No action is required.

Error Message  LACP-5-LACP_SUSPEND_INDIVIDUAL: LACP port [chars] of port-channel [chars] not receiving any LACP BPDUs suspending (individual) port

Explanation  LACP suspend individual ports

Recommended Action  No action is required.

Error Message  LACP-5-LACP_UPGRADE_READY_SUCCESS: Upgrade ready successful.

Explanation  Upgrade ready event is successful as all port channel members are in steady state.

Recommended Action  No action is required.

Error Message  LACP-5-PORT_PRIORITY_CHANGED: [chars]: LACP port priority changed from [dec] to [dec]

Explanation  LACP port priority has been changed

Recommended Action  No action is required.

Error Message  LACP-5-SYSTEM_PRIORITY_CHANGED: LACP system priority changed from [hex] to [hex]

Explanation  LACP system priority has been changed

Recommended Action  No action is required.

LC-SPAN Messages

This section contains the LC-SPAN messages.

LC-SPAN-3

Error Message  LC-SPAN-3-ERROR: [chars]

Explanation  Lc_span_mgr encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LC_PORT_CHANNEL Messages

This section contains the LC_PORT_CHANNEL messages.

LC_PORT_CHANNEL-SLOT#-1

Error Message  LC_PORT_CHANNEL-SLOT#-1-MALLOC_FAILED: cannot allocate memory (size [dec])

Explanation  No enough memory

Recommended Action  No action is required.

LC_PORT_CHANNEL-SLOT#-3

Error Message  LC_PORT_CHANNEL-SLOT#-3-LC_PORT_CHANNEL_IDXMAP_FAILURE: could not lookup port index for interface [chars]

Explanation  Could not look up port index

Recommended Action  No action is required.

LDAP Messages

This section contains the LDAP messages.

LDAP-2

Error Message  LDAP-2-LDAP_PROGRAM_EXIT: LDAP daemon exiting: [chars]

Explanation  LDAP daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LDAP-3

Error Message  LDAP-3-LDAP_ERROR_MESSAGE: [chars]

Explanation  LDAP Error Message

Recommended Action  No action is required.

LDAP-5

Error Message  LDAP-5-LDAP_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Ldap server monitor status change

Recommended Action  No action is required.

Error Message  LDAP-5-LDAP_SERVER_STATUS: [chars] server [chars] with port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Ldap server status change

Recommended Action  No action is required.

LDAP-6

Error Message  LDAP-6-LDAP_MESSAGE: [chars]

Explanation  LDAP Message

Recommended Action  No action is required.

LIBBASE_SVC Messages

This section contains the LIBBASE_SVC messages.

LIBBASE_SVC-2

Error Message  LIBBASE_SVC-2-IT_NEXUS_MAX_INTERFACE_LIMIT_REACHED: [chars] cannot be bound for site [chars], as the interfaces reached the maximum flow limit

Explanation  IT Load Balancing failed

Recommended Action  No action is required.

Error Message  LIBBASE_SVC-2-LOG_ERR_BASE_SVC_TOM_ABORTED: SME Cluster [chars] Message Id: [hex] aborted

Explanation  An SME Cluster Message was aborted by the Cluster process

Recommended Action  No action is required.

LIBBASE_SVC-4

Error Message  LIBBASE_SVC-4-FCR_VER2_NOT_ENABLED: FCR Version2 is not enabled. May affect flows. Please enable fc-redirect version2

Explanation  FCR Version2 not enabled

Recommended Action  No action is required.

LIBBASE_SVC-5

Error Message  LIBBASE_SVC-5-FLOW_NOT_ALLOWED: Flow [chars] <-> [chars] disallowed in multiple clusters

Explanation  Flow creation failed

Recommended Action  No action is required.

Error Message  LIBBASE_SVC-5-IT_NEXUS_FAILURE: [chars]. [chars] bind failure. Reason: [chars]: [hex]

Explanation  IT Nexus bind failed

Recommended Action  No action is required.

Error Message  LIBBASE_SVC-5-IT_NEXUS_OPTIMUM_INTERFACE_LIMIT_REACHED: Interface [chars] exceeded the optimum flow limit

Explanation  Iterface Flow Limit

Recommended Action  No action is required.

LIBIFMGR Messages

This section contains the LIBIFMGR messages.

LIBIFMGR-5

Error Message  LIBIFMGR-5-ALL_COUNTERS_CLEARED: All interface counters cleared by user

Explanation  All interface counters cleared by user.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  LIBIFMGR-5-INTF_COUNTERS_CLEARED: Interface [chars]counters cleared by user

Explanation  Interface counters cleared by user.

Recommended Action  LOG_STD_SH_TECH_ACTION

LICMGR Messages

This section contains the LICMGR messages.

LICMGR-0

Error Message  LICMGR-0-LOG_LIC_GRACE_EXPIRED: Grace period expired for feature [chars].

Explanation  Unlicensed feature [chars] has exceeded it's grace time period. Applications using will be shut down immediately.

Recommended Action  Please install the license file to continue using the feature.

LICMGR-1

Error Message  LICMGR-1-LOG_LIC_LICENSE_EXPIRED: Evaluation license expired for feature [chars].

Explanation  The named feature has exceeded it's evaluation time period. Applications using the license will be shut down after a grace period.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-1-LOG_LIC_LICENSE_EXPIRY_WARNING_ALERT: Evaluation license for feature [chars] will expire in [dec] days.

Explanation  Feature [chars] has very limited time for expiry. Feature will expire in [dec] days and will be shut down.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-1-LOG_LIC_NO_LIC_ALERT: No license(s) present for feature [chars]. Application(s) running in grace-period and will be shut down in [dec] days.

Explanation  Feature [chars] has not been licensed. The feature will work for a grace period of [dec] days after which application(s) using the feature will be shut down.

Recommended Action  Please install the license file to continue using the feature.

LICMGR-2

Error Message  LICMGR-2-LOG_LICAPP_EXPIRY_WARNING: Application [chars] evaluation license [chars] expiry in [dec] days.

Explanation  Application [chars1] will exceed it's evaluation time period in [dec] days and will be shut down after a grace period unless a permanent license for feature [chars2] is installed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LICAPP_NO_LIC: Application [chars] running without [chars] license, shut down in [dec] days.

Explanation  Application [chars1] has not been licensed. The application will work for a grace period of [dec] days after which it will be shut down unless a license file for feature [chars2] is installed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_EXIT: License manager exiting: [chars]

Explanation  License manager exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-2-LOG_LIC_INVALID_SERVER_LINE: License file [chars] contains invalid "SERVER" line. Contact TAC

Explanation  Invalid SERVER line in license file.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-2-LOG_LIC_NO_LIC: No license(s) present for feature [chars]. Application(s) shut down in [dec] days.

Explanation  Feature [chars] has not been licensed. The feature will work for a grace period of [dec] days after which application(s) using the feature will be shut down.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_NO_OE_LICENSE: Missing license to run NXOS on open environment platform, will be shut down in [dec] days.

Explanation  Open environment platform requires a license to run NXOS. Please get a license and instal it. Features will not be able to function properly, the box will shut down after few days unless licensed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-2-LOG_LIC_NVRAM_DISABLED: Licensing NVRAM is not available. Grace period will be disabled: [chars]

Explanation  The Supervisor NVRAM block may have a hardware problem and may need to be replaced

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-2-LOG_LIC_VENDOR_DOWN: License file contains invalid "SERVER" line. Vendor daemon down

Explanation  Vendor daemon is down

Recommended Action  Licensing

LICMGR-3

Error Message  LICMGR-3-LOG_LIC_FILE_MISSING: License file(s) missing for feature [chars].

Explanation  One or more license files for feature [chars] are missing and must be reinstalled.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-3-LOG_LIC_INVALID_HOSTID: Invalid license hostid VDH=[chars] for feature [chars].

Explanation  Feature [chars2] has a license with an invalid license hostid VDH=[chars1]. This can occur if a supervisor card with licensed features for one switch is installed on another switch.

Recommended Action  No action is required.

Error Message  LICMGR-3-LOG_LIC_MESSAGE_ERROR: could not handle message: [chars] of type [dec] from addr [dec]:[dec].

Explanation  Could not handle a IPC message [chars] of type [dec1] sent by a component running on node [dec2] with sap [dec3].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-3-LOG_LIC_SERVER_DOWN: License Server Down [dec]

Explanation  A connection to the license server was lost.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  LICMGR-3-LOG_LIC_SPROM_LIC: Feature [chars] issued [dec] licenses without a valid license file.

Explanation  Feature [chars] has been licensed [dec] times without a valid license file. This means one or more license files are missing for feature [chars] and must be reinstalled.

Recommended Action  Please install the license file to continue using the feature.

Error Message  LICMGR-3-LOG_LIC_TOO_MANY_LIC: Only [dec] licenses are supported for [chars] feature, where as [dec] licenses are installed.

Explanation  More licenses are installed than allowed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

LICMGR-4

Error Message  LICMGR-4-LOG_LIC_LICENSE_EXPIRY_WARNING: Evaluation license for feature [chars] will expire in [dec] days.

Explanation  Feature [chars] will exceed it's evaluation time period in [dec] days and will be shut down.

Recommended Action  Please install the license file to continue using the feature.

LICMGR-6

Error Message  LICMGR-6-LOG_CHECKPOINT_CREATED: auto checkpoint [chars] created during license expiry.

Explanation  When a license expires, auto checkpoint is created to prevent configuration loss.

Recommended Action  Rollback can be done to the created checkpoint when a new license is installed.

Error Message  LICMGR-6-LOG_LIC_FEATURE_CLEARED: Cleared [dec] license(s) for feature [chars].

Explanation  Uninstalled [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature removal.

Error Message  LICMGR-6-LOG_LIC_FEATURE_INSTALLED: Installed [dec] license(s) for feature [chars].

Explanation  Installed [dec] license(s) for feature [chars].

Recommended Action  Use the 'show license usage' command to verify this license feature installation.

Error Message  LICMGR-6-LOG_LIC_LICENSE_CLEARED_ALL: Cleared all licenses.

Explanation  Cleared all license files.

Recommended Action  No action is required.

Error Message  LICMGR-6-LOG_LIC_LICENSE_CLEARED: Cleared license file [chars].

Explanation  Uninstalled the named license file.

Recommended Action  Use the 'show license' command to verify this license removal.

Error Message  LICMGR-6-LOG_LIC_LICENSE_INSTALLED: Installed license file [chars].

Explanation  Installed the named license file.

Recommended Action  Use the 'show license' command to verify this license installation.

LIM Messages

This section contains the LIM messages.

LIM-2

Error Message  LIM-2-IF_CRITICAL_FAILURE: (Debug syslog)Critical failure: [chars], [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please follow instructions on the syslog.

Error Message  LIM-2-IF_DOWN_ERROR_DISABLED: Interface [chars] is down (Error disabled. Reason:[chars])

Explanation  The interface encountered an error while configuring it

Recommended Action  Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using a 'shutdown' followed a 'no shutdown' on the interface or removing and re-inserting the fibre optic cable.

Error Message  LIM-2-IF_DOWN_LINK_FAILURE_CRIT: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  LIM-2-SEQ_TIMEOUT: Component [chars] timed out on response to opcode [chars] ([chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  LIM-2-SYSLOG_LIM_CRITICAL: Critical failure: [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please collect system tech-support

LIM-3

Error Message  LIM-3-IF_DOWN_CHANNEL_ERR_DISABLED: Interface [chars] is down (Channel error disabled)

Explanation  This interface belongs to a PortChannel and the PortChannel is error disabled

Recommended Action  Perform 'shut' and 'no shutdown' on the PortChannel interface that it belongs to

Error Message  LIM-3-IF_ERROR_VLANS_REMOVED: VLANs [chars] on Interface [chars] are removed from suspended state.

Explanation  The VLANs on an interface are being removed from the suspended state

Recommended Action  No action is required.

Error Message  LIM-3-IF_ERROR_VLANS_SUSPENDED: VLANs [chars] on Interface [chars] are being suspended. (Reason: [chars])

Explanation  The VLANs on an interface are being suspended due to some protocol action

Recommended Action  No action is required.

Error Message  LIM-3-IF_SFP_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  LIM-3-IF_SFP_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  LIM-3-IF_UNSUPPORTED_TRANSCEIVER: Transceiver on interface [chars] is not supported

Explanation  The transceiver for the interface specified in the error message is not a Cisco supported module

Recommended Action  Replace the module with a compatible transceiver. If the transceiver was purchased from Cisco, please contact Cisco TAC to get the transceiver replaced

Error Message  LIM-3-IF_XCVR_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  LIM-3-IF_XCVR_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

LIM-4

Error Message  LIM-4-IF_NON_QUALIFIED_TRANSCEIVER: Non-qualified transceiver on interface [chars] was detected

Explanation  The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action  Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

Error Message  LIM-4-IF_SFP_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  LIM-4-IF_XCVR_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

LIM-5

Error Message  LIM-5-IF_ADMIN_UP: Interface [chars] is admin up [chars]

Explanation  Interface is admin up

Recommended Action  No action is required.

Error Message  LIM-5-IF_BANDWIDTH_CHANGE: Interface [chars],bandwidth changed to [chars] Kbit

Explanation  Bandwidth of the interface (port channel) has changed and this change is updated

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down (Administratively down)

Explanation  Interface has been configured to be administratively down

Recommended Action  Perform 'no shutdown'

Error Message  LIM-5-IF_DOWN_CFG_CHANGE: Interface [chars] is down(Config change)

Explanation  FCIP interface temporarily down due to reconfiguration

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_CHANNEL_ADMIN_DOWN: Interface [chars] is down (Channel admin down)

Explanation  This interface belongs to a PortChannel and the PortChannel is configured to be administratively down

Recommended Action  Perform 'no shutdown' on the PortChannel interface that it belongs to

Error Message  LIM-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS: Interface [chars] is down (Channel membership update in progress)

Explanation  The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel

Recommended Action  Retry the configuration again

Error Message  LIM-5-IF_DOWN_DOMAIN_ADDR_ASSIGN_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to domain id assignment failure)

Explanation  Isolated due to a failure while assigning a domain

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_DOMAIN_INVALID_RCF_RECEIVED: Interface [chars] is down (Isolation due to invalid fabric reconfiguration)

Explanation  Invalid RCF received

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_DOMAIN_MANAGER_DISABLED: Interface [chars] is down (Isolation due to domain manager disabled)

Explanation  Isolated due to domain manager being disabled

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE: Interface [chars] is down (Isolation due to domain manager other side not responding)

Explanation  Remote end domain manager not responding

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_DOMAIN_OTHER_SIDE_EPORT_ISOLATED: Interface [chars] is down (Isolation due to domain other side eport isolated)

Explanation  Isolating this interface due to the remote end being isolated

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to domain overlap)

Explanation  Isolated due to domain overlap

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_ELP_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ELP failure)

Explanation  ELP failed on the interface

Recommended Action  Check the output of 'show port internal info' in the 'ELP failure reason' field

Error Message  LIM-5-IF_DOWN_EPP_FAILURE: Interface [chars] is down (Error Disabled - EPP Failure)

Explanation  Trunk protocol failed

Recommended Action  'show port internal event-history msgs' will indicate the trunk protocol exchanges to determine why it failed

Error Message  LIM-5-IF_DOWN_ESC_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ESC failure)

Explanation  ESC failed on the interface

Recommended Action  Check the output of 'show port internal event-history' to determine the ESC protocol exchanges to determine how it failed

Error Message  LIM-5-IF_DOWN_ETH_IF_DOWN: Interface [chars] is down(Tunnel port src interface down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected, the interface is administratively enabled

Error Message  LIM-5-IF_DOWN_ETH_LINK_DOWN: Interface [chars] is down(Tunnel port src interface link down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected and the remote end is also active

Error Message  LIM-5-IF_DOWN_FCOT_NOT_PRESENT: Interface [chars] is down (FCOT not present)

Explanation  The FCOT has been removed

Recommended Action  Insert an FCOT

Error Message  LIM-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED: Interface [chars] is down (Error disabled - Fcot vendor not supported)

Explanation  Fcot inserted is not a supported one

Recommended Action  Please contact customer support for a list of authorized transceiver vendors

Error Message  LIM-5-IF_DOWN_HW_FAILURE: Interface [chars] is down (Hardware Failure)

Explanation  The module's hardware has failed

Recommended Action  Collect more information about failed module using command 'show module internal all module'

Error Message  LIM-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  The port VSAN has been suspended or deleted

Recommended Action  Assign a new active port VSAN to the interface

Error Message  LIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE: Interface [chars] is down (Error disabled - Incompatible admin port mode)

Explanation  The configured mode is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the list of modes supported on this interface

Error Message  LIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBBCREDIT: Interface [chars] is down (Error disabled - Incompatible admin port rxbbcredit)

Explanation  The configured receive B2B credit size is not supported

Recommended Action  Get the allowed receive B2B credit size from 'show port internal info'

Error Message  LIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBUFSIZE: Interface [chars] is down (Error disabled - Incompatible admin port rxbufsize)

Explanation  The configured receive buffer size is not supported

Recommended Action  Get the allowed receive buffer size from 'show port internal info'

Error Message  LIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED: Interface [chars] is down (Error disabled - Incompatible admin port speed)

Explanation  The configured speed is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the range of speed supported on this interface

Error Message  LIM-5-IF_DOWN_INITIALIZING: Interface [chars] is down (Initializing)

Explanation  The interface is in the process of coming up

Recommended Action  If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

Error Message  LIM-5-IF_DOWN_INTERFACE_REMOVED: Interface [chars] is down (Interface removed)

Explanation  Interface removed

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_LINK_FAILURE: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  LIM-5-IF_DOWN_LOOPBACK_DIAG_FAILURE: Interface [chars] is down (Diag failure)

Explanation  Diag failed on the interface

Recommended Action  Collect more information about failed interface using command 'attach module' to connect to module

Error Message  LIM-5-IF_DOWN_LOOPBACK_ISOLATION: Interface [chars] is down (Isolation due to port loopback to same switch)

Explanation  The interface is looped back to another interface on the same switch

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  LIM-5-IF_DOWN_MODULE_REMOVED: Interface [chars] is down (module removed)

Explanation  Interface is down because the module was removed

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_NONE: Interface [chars] is down ([chars])

Explanation  Interface is down with a possible reason.

Recommended Action  Collect more information about port using command 'show port internal info/event-history' to determine why it went down

Error Message  LIM-5-IF_DOWN_NON_PARTICIPATING: Interface [chars] is down (Non participating)

Explanation  The loop port has been put into non participating mode

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_OFFLINE: Interface [chars] is down (Offline)

Explanation  The interface has been placed into the offline state

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_PARENT_ADMIN_DOWN: Interface [chars] is down (Parent interface down)

Explanation  Parent interface is down

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_PEER_CLOSE: Interface [chars] is down(TCP conn. closed by peer)

Explanation  The FCIP peer connected to this interface closed the TCP connection

Recommended Action  This command will provide the peer IP address of this FCIP interface: show interface. Check to see why the peer closed the TCP connection

Error Message  LIM-5-IF_DOWN_PEER_RESET: Interface [chars] is down(TCP conn. reset by peer)

Explanation  TCP connection to the FCIP peer got reset

Recommended Action  The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Check to see why the peer reset the TCP connection

Error Message  LIM-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface [chars] is down (No operational members)

Explanation  This is a PortChannel interface and all its members are operationally down

Recommended Action  Enable at least one of the PortChannel's members

Error Message  LIM-5-IF_DOWN_PORT_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to port vsan mismatch)

Explanation  Isolated due to a mismatch in the configured port VSAN of the local and remote ends

Recommended Action  Configure the port VSAN of the local and remote interfaces to be the same and perform a 'shutdown' and a 'no shutdown'

Error Message  LIM-5-IF_DOWN_RCF_IN_PROGRESS: Interface [chars] is down (RCF in progress)

Explanation  There is an RCF in progress

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_SOFTWARE_FAILURE: Interface [chars] is down (Port software failure)

Explanation  The software servicing the data path on the port has failed

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_SRC_MOD_NOT_ONLINE: Interface [chars] is down(Tunnel source module not online)

Explanation  Module that has the tunnel source port of this FCIP interface is not fully online

Recommended Action  The module that has the tunnel src port is coming online. Please use show mod to find module status

Error Message  LIM-5-IF_DOWN_SRC_PORT_NOT_BOUND: Interface [chars] is down (Tunnel port src interface unbound)

Explanation  Tunnel port source interface unbound

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_SRC_PORT_REMOVED: Interface [chars] is down(Tunnel src port removed)

Explanation  Tunnel source port of this FCIP interface has been removed

Recommended Action  The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

Error Message  LIM-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode)

Explanation  This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel

Recommended Action  Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  LIM-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed)

Explanation  This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel

Recommended Action  Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  LIM-5-IF_DOWN_SUSPENDED_BY_WWN: Interface [chars] is down (Suspended due to incompatible remote switch WWN)

Explanation  This interface belongs to a PortChannel and remote switch WWN of the interface is different from that of the PortChannel

Recommended Action  Ensure that this interface is connected to the same remote switch as all the other interfaces in the PortChannel

Error Message  LIM-5-IF_DOWN_SUSPENDED: Interface [chars] is down (Suspended)

Explanation  This interface belongs to a PortChannel and has been suspended due to an error while bringing it up

Recommended Action  Perform a 'shutdown' and a 'no shutdown'. If this happens again obtain output of 'show port internal info/event-history' on the interface

Error Message  LIM-5-IF_DOWN_TCP_KEEP_ALIVE_EXPIRED: Interface [chars] is down(TCP conn. closed - Keep alive expired)

Explanation  TCP session to the FCIP peer got closed due to loss of TCP keep alive

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  LIM-5-IF_DOWN_TCP_MAX_RETRANSMIT: Interface [chars] is down(TCP conn. closed - retransmit failure)

Explanation  Interface is down due to maximum retransmission failure

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  LIM-5-IF_DOWN_TCP_PERSIST_TIMER_EXPIRED: Interface [chars] is down(TCP conn. closed - Persist timer expired)

Explanation  TCP session to the FCIP peer closed because TCP persist timer expired

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  LIM-5-IF_DOWN_UPGRADE_IN_PROGRESS: Interface [chars] is down (Linecard upgrade in progress)

Explanation  Upgrade of the linecard software is in progress

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_VRF_UNUSABLE: Interface [chars] is down (Vrf down)

Explanation  The vrf for which this interface is a member is removed

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to vsan mismatch)

Explanation  This is a trunking interface and the VSANs configured do not match with the VSANs configured on the remote end

Recommended Action  Check the VSANs configured on the local end with the remote end

Error Message  LIM-5-IF_DOWN_ZONE_MERGE_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to zone merge failure)

Explanation  Isolated due to a failure during zone merge

Recommended Action  No action is required.

Error Message  LIM-5-IF_DOWN_ZONE_REMOTE_NO_RESP_ISOLATION: Interface [chars] is down (Isolation due to remote zone server not responding)

Explanation  Isolated due to remote zone server not responding

Recommended Action  No action is required.

Error Message  LIM-5-IF_DUPLEX: Interface [chars], operational duplex mode changed to [chars]

Explanation  Operational duplex mode has changed when link came up

Recommended Action  No action is required.

Error Message  LIM-5-IF_ERRDIS_RECOVERY: Interface [chars] is being recovered from error disabled state (Last Reason:[chars])

Explanation  Interface is being recovered from error disabled state

Recommended Action  No action is required.

Error Message  LIM-5-IF_HARDWARE: Interface [chars], hardware type changed to [chars]

Explanation  There was a change in the hardware characteristic of an interface, such as a transceiver module plugged in or removed

Recommended Action  No action is required.

Error Message  LIM-5-IF_L2MP_MODE: Interface [chars], l2mp-mode changed to [chars]

Explanation  The l2mp-mode on the port has changed

Recommended Action  No action is required.

Error Message  LIM-5-IF_RX_FLOW_CONTROL: Interface [chars], operational Receive Flow Control state changed to [chars]

Explanation  Operational receive flow control has changed when link came up

Recommended Action  No action is required.

Error Message  LIM-5-IF_TRUNK_DOWN: Interface [chars], vlan [chars] down

Explanation  Interface [chars] is trunking, VLANs [chars] are down

Recommended Action  The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface vsan

Error Message  LIM-5-IF_TRUNK_UP: Interface [chars], vlan [chars] up

Explanation  Interface [chars] is trunking, VLANs [chars] are up

Recommended Action  No action is required.

Error Message  LIM-5-IF_TX_FLOW_CONTROL: Interface [chars], operational Transmit Flow Control state changed to [chars]

Explanation  Operational transmit flow control has changed when link came up

Recommended Action  No action is required.

Error Message  LIM-5-IF_UP: Interface [chars] is up [chars]

Explanation  Interface is up in mode specified, if applicable

Recommended Action  No action is required.

Error Message  LIM-5-SPEED: Interface [chars], operational speed changed to [chars]

Explanation  Operational speed has changed when link came up

Recommended Action  No action is required.

Error Message  LIM-5-STORM_CONTROL_ABOVE_THRESHOLD: Traffic in port [chars] exceeds the configured threshold [chars]

Explanation  Traffic on specified port is beyond the configured storm-control threshold, and the excess traffic is being dropped

Recommended Action  Identify source of traffic storm

Error Message  LIM-5-STORM_CONTROL_BELOW_THRESHOLD: Traffic in port [chars] has fallen below the configured threshold [chars]

Explanation  Traffic on specified port has returned to within configured storm-control threshold

Recommended Action  No action is required.

LLDP Messages

This section contains the LLDP messages.

LLDP-3

Error Message  LLDP-3-DETECT_MULTIPLE_PEERS: Multiple peers detected on [chars]

Explanation  Multiple peers detected on an interface

Recommended Action  No action is required.

Error Message  LLDP-3-INVALID_DCBXP_RECEIVED: Received an invalid DCBXP on [chars]

Explanation  Received an invalid DCBXP on an interface

Recommended Action  No action is required.

Error Message  LLDP-3-INVALID_LLDP_RECEIVED: Received an invalid LLDP on [chars]

Explanation  Received an invalid LLDP on an interface

Recommended Action  No action is required.

Error Message  LLDP-3-LLDP_INTERNAL_ERROR: LLDP internal error: [chars]

Explanation  Internal error is encountered

Recommended Action  No action is required.

LLDP-5

Error Message  LLDP-5-LLDP_DISABLED: LLDP Disabled

Explanation  LLDP Service Disabled

Recommended Action  No action is required.

Error Message  LLDP-5-LLDP_ENABLED: LLDP Enabled

Explanation  LLDP Service Enabled

Recommended Action  No action is required.

Error Message  LLDP-5-SERVER_ADDED: Server with Chassis ID [chars] Port ID [chars] management address [chars] discovered on local port [chars] in vlan [dec] with enabled capability [chars]

Explanation  A new peer is discovered

Recommended Action  No action is required.

Error Message  LLDP-5-SERVER_REMOVED: Server with Chassis ID [chars] Port ID [chars] on local port [chars] has been removed

Explanation  A peer is removed

Recommended Action  No action is required.

LLDP-6

Error Message  LLDP-6-DETECT_REMOTE_CHANGE: Remote change detected on [chars]

Explanation  Remote change detected on an interface

Recommended Action  No action is required.

Error Message  LLDP-6-DETECT_REMOTE_DCBXP_CHANGE: Remote DCBXP change detected on [chars]

Explanation  Remote DCBXP change detected on an interface

Recommended Action  No action is required.

M2FIB Messages

This section contains the M2FIB messages.

M2FIB-SLOT#-0

Error Message  M2FIB-SLOT#-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  M2FIB failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-0-TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  M2FIB failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

M2FIB-SLOT#-2

Error Message  M2FIB-SLOT#-2-M2FIB_MAC_TBL_PRGMING: Failed to program the mac table on FE [dec] for group: FTAG [dec], ([dec] (BD [dec]), *, [chars]). Error: [chars]. To avoid multicast traffic loss, disable OMF using the CLI: "no ip igmp snooping optimise-multicast-flood"

Explanation  Failed to program the mac table. This is a critical failure please check m2fib errored transactions

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-2-M2FIB_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-2-VLAN_NOT_FOUND: M2fib recvd invalid vlan!

Explanation  M2FIB failed to process the route update as the vlan recvd was invalid

Recommended Action  No action is required.

M2FIB-SLOT#-6

Error Message  M2FIB-SLOT#-6-INITIALIZED: Internal state created [chars]

Explanation  M2FIB has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-6-VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in M2FIB was successful.

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-6-VDC_REMOVED: VDC [dec] Removed

Explanation  M2FIB has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-6-VDC_VLAN_CREATED: VLAN [dec] created in VDC [dec]

Explanation  M2FIB has added VLAN [dec] in VDC [dec].

Recommended Action  No action is required.

Error Message  M2FIB-SLOT#-6-VDC_VLAN_REMOVED: VLAN [dec] removed from VDC [dec]

Explanation  M2FIB has successfully removed VLAN [dec] from VDC [dec].

Recommended Action  No action is required.

M2RIB Messages

This section contains the M2RIB messages.

M2RIB-0

Error Message  M2RIB-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  M2RIB failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

M2RIB-2

Error Message  M2RIB-2-FLOOD_PROG_ERR1: Prev:[chars], Collect console logs and output of show tech-support m2rib

Explanation  M2RIB has hit flood prog error. Collect output of show tech-support m2rib for further analysis

Recommended Action  No action is required.

Error Message  M2RIB-2-FLOOD_PROG_ERR2: Curr:[chars], Collect console logs and output of show tech-support m2rib

Explanation  M2RIB has hit flood prog error. Collect output of show tech-support m2rib for further analysis

Recommended Action  No action is required.

Error Message  M2RIB-2-IPC_PROCESSING_ERR: Error in processing IPC message : Opcode = [dec], Error code = [hex]

Explanation  M2RIB encountered an error in processing an MTS message. The error and message are specified in the error message

Recommended Action  No action is required.

Error Message  M2RIB-2-M2RIB_INIT: M2RIB initialization of [chars] [chars]

Explanation  M2RIB initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  M2RIB-2-MFDM_API_ERROR: ERROR PROG FLOOD ROUTES: Status:[chars] Msg_Ref_State:[hex] Prev_Count:[dec] Curr_Count:[dec] Prev_Msg:[hex] Curr_Msg:[hex], Collect output of show tech-support m2rib

Explanation  MFDM returned Failure for flood programming. Collect output of show tech-support m2rib for further analysis

Recommended Action  No action is required.

Error Message  M2RIB-2-MFDM_TIMEOUT_ERR: M2RIB timed out waiting for MFDM: Transaction: %p, Transaction entry: [chars]

Explanation  Transaction timer for the message sent from M2RIB to MFDM has expired. Ack not received from MFDM.

Recommended Action  No action is required.

M2RIB-6

Error Message  M2RIB-6-INITIALIZED: Internal state created [chars]

Explanation  M2RIB has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  M2RIB-6-SERVICE_UP: Initialized [chars]

Explanation  M2RIB line 2.

Recommended Action  No action is required.

MCAST Messages

This section contains the MCAST messages.

MCAST-2

Error Message  MCAST-2-SHUTDOWN: Process shutting down: [chars]

Explanation  Mcast is shutting down

Recommended Action  The action depends on the situation. The multicast process can shut down gracefully because of a system restart (in which case no action needs to take place) or because of a failure. The message associated with the syslog should be self explanatory to understand the reason for the shutdown. If the process is able to restart properly, there is no immediate harm for the system stability and the suggested action is to report the syslog event together with an explanation of the operations most recently performed on the system.

MCAST-4

Error Message  MCAST-4-ERROR: [chars]

Explanation  Mcast encountered a generic error

Recommended Action  No action is required.

MCAST-5

Error Message  MCAST-5-BAD_MSG: Received bad message: [chars]

Explanation  Mcast has received a malformed/unrecognized message

Recommended Action  No action is required.

Error Message  MCAST-5-START: Process has been started

Explanation  Mcast has been started

Recommended Action  No action is required.

MCECTEST Messages

This section contains the MCECTEST messages.

MCECTEST-3

Error Message  MCECTEST-3-ASSERTION_FAILED: [chars]

Explanation  MCECTEST has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INIT_FAIL: [chars]

Explanation  MCECTEST Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-INTERNAL_ERR: [chars]

Explanation  MCECTEST encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  MCECTEST-3-MTS_ERR: [chars]

Explanation  MCECTEST encountered an MTS error due to [chars]

Recommended Action  No action is required.

MCECTEST-5

Error Message  MCECTEST-5-MCECTEST_DISABLED: MCECTEST Disabled

Explanation  MCECTEST Service Disabled

Recommended Action  No action is required.

Error Message  MCECTEST-5-MCECTEST_ENABLED: MCECTEST Enabled

Explanation  MCECTEST Service enabled

Recommended Action  No action is required.

MCECTEST-6

Error Message  MCECTEST-6-INTERNAL_INFO: [chars]

Explanation  MCECTEST got an internal info [chars]

Recommended Action  No action is required.

MCM Messages

This section contains the MCM messages.

MCM-2

Error Message  MCM-2-MCM_CRITICAL_ERROR: Internal Critical Error

Explanation  Some critical error

Recommended Action  No action is required.

Error Message  MCM-2-MCM_REPLICATION_DISABLED: Proxy layer-3 modules are not available for replication. Proxy layer-3 multicast replication is disabled.

Explanation  Replication is disabled

Recommended Action  No action is required.

Error Message  MCM-2-MCM_REQ_RESP_ERROR: Error ([hex]: [chars]) while communicating with component :[chars], opcode: [chars] (for: [chars])

Explanation  Error in request-response handshake

Recommended Action  No action is required.

Error Message  MCM-2-MCM_ROUTING_DISABLED: Proxy layer-3 modules are not available for routing. Proxy layer-3 forwarding is disabled.

Explanation  Routing is disabled

Recommended Action  No action is required.

MCM-5

Error Message  MCM-5-MCM_SDB_UPDATE_FAILED: sdb update failed with ret_val [dec]

Explanation  SDB updated failed for MCM

Recommended Action  No action is required.

MCM-6

Error Message  MCM-6-MCM_REPLICATION_ENABLED: Proxy layer-3 modules are UP and available for replication. Proxy layer-3 multicast replication is enabled.

Explanation  Replication is enabled

Recommended Action  No action is required.

Error Message  MCM-6-MCM_ROUTING_ENABLED: Proxy layer-3 modules are UP and available for routing. Proxy layer-3 forwarding is enabled.

Explanation  Routing is enabled

Recommended Action  No action is required.

MFDM Messages

This section contains the MFDM messages.

MFDM-2

Error Message  MFDM-2-DI_REUSE: LTL node exists with DI [hex] oiflist_index [hex] type [dec] and same DI returned for oiflist_index [hex] type [dec] Please collect show tech-support forwarding multicast and show tech-support pixm.

Explanation  PIXM returned duplicate DI.

Recommended Action  No action is required.

Error Message  MFDM-2-DOWNLOAD_TIMEOUT: Download of L2/L3 route databases timed out : download_in_progress_slots [hex] for database [chars] [chars] [chars]

Explanation  Download of L2/L3 route databases timed out. Download triggered by VMM insert request.

Recommended Action  No action is required.

Error Message  MFDM-2-INTERNAL_ERROR: MFDM-[chars] Internal error : show system internal mfdm errors for more information

Explanation  MFDM PD hit a internal error. show system internal mfdm errors for futher analysis.

Recommended Action  No action is required.

Error Message  MFDM-2-MAX_OIFS_LIMIT_REACHED: A route or more in your system has more than [dec] oifs that is the max currently supported. This may lead to inconsistencies between MRIB and MFIB since the route will not be updated in HW. Plese reduce the scale

Explanation  Received route with too many OIFs

Recommended Action  No action is required.

Error Message  MFDM-2-MFDM_NVE_DSG_VP_LIMIT_REACHED: All available NVE DSG VPs ([dec]) are used. Failed to allocate VP for group [chars], oif [chars]. Please reduce the VxLAN multicast group scale

Explanation  There are too many OIFs for VXLAN DSG entries

Recommended Action  No action is required.

Error Message  MFDM-2-MFDM_UNSUPPORTED_BIDIR_GROUP_AS_DROP_RT: Incorrect bidir group range learnt/configured on the system([chars]/[dec]). 224/4 cannot be configured as bidir grp range. Please change your config accordingly for forwarding to work properly

Explanation  Received drop route as bidir group range

Recommended Action  No action is required.

Error Message  MFDM-2-MFDM_UNSUPPORTED_BIDIR_GROUP_RANGE: Incorrect bidir group range learnt/configured on the system([chars]/[dec]). The shortest supported mask for bidir group ranges on this platform is /[dec]. Please change your config accordingly for forwarding to work properly

Explanation  Received bidir group range with mask too short

Recommended Action  No action is required.

Error Message  MFDM-2-REF_OUTOFSYNC: In Decrement ltl_node ref_count: [dec] is less than count: [dec] passed in for DI: [hex], oiflist_index: [hex], type: [dec]. Possible PI/PD refcount out-of-sync. Please collect show tech-support forwarding multicast and show tech-support pixm.

Explanation  MFDM PI/PD refcount out-of-sync

Recommended Action  No action is required.

MMODE Messages

This section contains the MMODE messages.

MMODE-2

Error Message  MMODE-2-MODE_CHANGED: System changed to "[chars]" mode.

Explanation  The system changed to [chars] mode.

Recommended Action  No action is required.

Error Message  MMODE-2-MODE_CHANGE_WARN: System will be moved to "[chars]" mode in [dec] minutes

Explanation  The system will be automatically changed to normal mode.

Recommended Action  No action is required.

Error Message  MMODE-2-MODE_SNAPSHOT_ERROR: Creation of [chars] snapshot failed. Please check bootflash space.

Explanation  Creation of [chars] snapshot failed, check to see if bootflash has enough space to create snapshot.

Recommended Action  No action is required.

MMODE-3

Error Message  MMODE-3-ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  Mmode process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

Error Message  MMODE-3-ASSERTION_FAILED: Failed in file:[chars] line:[dec]

Explanation  Mmode process assertion failed in File:[chars], at line:[dec]

Recommended Action  No action is required.

MMODE-4

Error Message  MMODE-4-MISSING_COMMAND_NAME: The command "[chars]" does not have command name and may cause mmode to work incorrectly.

Explanation  The command does not have command name defined in its command definition file.

Recommended Action  If the command is to be configured with mmode, the developer must define its command name.

Error Message  MMODE-4-MODE_SNAPSHOT_DONE: The after_maintenance snapshot is complete and available for comparison

Explanation  The after_maintenance snapshot done after moving to normal mode is complete and available.

Recommended Action  No action is required.

MODULE Messages

This section contains the MODULE messages.

MODULE-1

Error Message  MODULE-1-MOD_PORT_TYPE_CHANGE_FC_INFO: Please enable feature-set fcoe-npv to change port type to fc. If already done please ignore

Explanation  Port type fc will work only after enabling feature-set fcoe-npv. To convert ports to FC, please enable feature-set fcoe-npv

Recommended Action  Install feature-set fcoe-np followed by feature-set fcoe-npv. If already done no further action is required. Ports will come up in FC mode

MODULE-2

Error Message  MODULE-2-LCM_PRE_UPGRADE_GENERAL_FAIL: Pre upgrade message fails seq [dec]

Explanation  Pre upgrade message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_DONE_GENERAL_FAIL: Upgrade done message fails SAP [chars]

Explanation  Upgrade ready message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_OVER_FAIL: Upgrade over message returned [dec] [hex] for SAP [chars]

Explanation  Upgrade done message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_READY_FAIL: Upgrade ready message returned [dec] [hex] for SAP [chars]

Explanation  Upgrade ready message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPGRADE_READY_GENERAL_FAIL: Upgrade ready message fails SAP [chars]

Explanation  Upgrade ready message failed.

Recommended Action  No action is required.

Error Message  MODULE-2-LCM_UPG_DBG_LOG: Sending upgrade [chars] request to service [chars] for slot [dec].

Explanation  LCM sent upgrade request for the sap mentioned.

Recommended Action  No action is required.

Error Message  MODULE-2-MOD_DIAG_FAIL: Module [dec] (Serial number: [chars]) reported failure [chars] due to [chars] in device [chars] (device error [hex])

Explanation  The module in slot [decimal digit] reported a failure in the runtime diagnostic. Module manager is going to power cycle the module.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_DNLD_FAIL: Image download failed for module [dec] (Serial number: [chars])

Explanation  Module [decimal digit] failed to download a new image from the supervisor.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_FAILURE: Re-initializing module [dec] (Serial number: [chars]) failed. Received lc_failed from sap [chars] failure reason [hex]

Explanation  Module [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all module '.

Error Message  MODULE-2-MOD_FAIL: Initialization of module [dec] (Serial number: [chars]) failed

Explanation  Module [decimal digit] reported a failure during the initialization phase and will be powered down.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all module '.

Error Message  MODULE-2-MOD_MAJORSWFAIL: Module [dec] (Serial number: [chars]) reported a critical failure in service [chars]

Explanation  A critical failure in service [string] happened at module [decimal digit] is going to reset the module [decimal digit].

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_MINORSWFAIL: Module [dec] (Serial number: [chars]) reported a failure in service [chars]

Explanation  A non-critical failure in service [string] happened at module [decimal digit] is not going to reset the module [decimal digit].

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_NOT_ALIVE: Module [dec] not responding... resetting (Serial number: [chars])

Explanation  Module [decimal digit] is not replying to the hello message: module manager is then going to reset the module.

Recommended Action  No action is required.

Error Message  MODULE-2-MOD_REGFAILED: Registration failed for module [dec]

Explanation  Module [decimal digit] sent the registration message notifying a failure.

Recommended Action  Collect module internal information by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_SOMEPORTS_FAILED: Module [dec] (Serial number: [chars]) reported failure on ports [chars] ([chars]) due to [chars] in device [chars] (device error [hex])

Explanation  Module [decimal digit] reported a failure in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-2-MOD_UNKNOWN: Module type [[dec]] in slot [dec] is not supported

Explanation  The software card id of module [decimal digit] is not supported by the supervisor.

Recommended Action  Collect information about the module by issuing the commands 'show module internal all module [decimal digit]'

Error Message  MODULE-2-XBAR_DIAG_FAIL: Xbar [dec] (Serial number: [chars]) reported failure [chars] due to [chars] in device [chars] (device error [hex])

Explanation  The xbar in slot [decimal digit] reported a failure in the runtime diagnostic. Module manager is going to power cycle the module.

Recommended Action  Collect information about the module by issuing the command 'show module internal all xbar [decimal digit]'.

Error Message  MODULE-2-XBAR_FAILURE: Re-initializing xbar [dec] (Serial number: [chars]) failed. Received lc_failed from sap [chars] failure reason [hex]

Explanation  Xbar [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all xbar '.

Error Message  MODULE-2-XBAR_FAIL: Initialization of xbar [dec] (Serial number: [chars]) failed

Explanation  Xbar [decimal digit] reported a failure during the initialization phase and will be powered down.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all xbar '.

Error Message  MODULE-2-XBAR_SOMEPORTS_FAILED: Xbar [dec] (Serial number: [chars]) reported failure on ports [chars] ([chars]) due to [chars] in device [chars] (error [hex])

Explanation  Xbar [decimal digit] reported a failure in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all xbar [decimal digit]'.

Error Message  MODULE-2-XBAR_UNKNOWN: Xbar type [[dec]] in slot [dec] is not supported

Explanation  The software card id of xbar [decimal digit] is not supported by the supervisor.

Recommended Action  Collect information about the module by issuing the commands 'show module internal all xbar [decimal digit]'

MODULE-3

Error Message  MODULE-3-LCM_SEQ_ERROR: Error ([chars]) for slot:[dec] while communicating with component [chars] opcode:[chars] (for:[dec])

Explanation  LCM encountered an error while executing a sequence for a module.

Recommended Action  No action is required.

Error Message  MODULE-3-LCM_SYSLOG_ERR: [chars]

Explanation  LCM encountered an error while processing a message for module.

Recommended Action  No action is required.

Error Message  MODULE-3-MOD_SRG_NOT_COMPATIBLE: Module [dec] (Serial number: [chars]) firmware is not compatible with supervisor, downloading new image

Explanation  The software version of module [decimal digit] is not supported by the supervisor.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

MODULE-4

Error Message  MODULE-4-MOD_IMG_VER_MISMATCH: Module [dec] (Serial number: [chars]) image version mismatch with supervisor, mage version in the linecard is [chars] Image version in the sup is [chars] download image with same version as supervisor

Explanation  The software version of module [decimal digit] should match the software version in supervisor.

Recommended Action  Download image in module with the same version as supervisor

Error Message  MODULE-4-MOD_WARNING: Module [dec] (Serial number: [chars]) reported warning [chars] due to [chars] in device [chars] (device error [hex])

Explanation  Module [decimal digit] reported a warning in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all module [decimal digit]'.

Error Message  MODULE-4-XBAR_WARNING: Xbar [dec] (Serial number: [chars]) reported warning [chars] due to [chars] in device [chars] (device error [hex])

Explanation  Xbar [decimal digit] reported a warning in the runtime diagnostic due to failure in some of the ports.

Recommended Action  Collect information about the module by issuing the command 'show module internal all xbar [decimal digit]'.

MODULE-5

Error Message  MODULE-5-ACTIVE_SUP_OK: Supervisor [dec] is active (Serial number: [chars])

Explanation  Module [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-LCM_MODULE_UPGRADE_END: Upgrade of module [dec] ended

Explanation  Upgrade of the module has ended.

Recommended Action  No action is required.

Error Message  MODULE-5-LCM_MODULE_UPGRADE_START: Upgrade of module [dec] started

Explanation  Upgrade of the module has been started by installer

Recommended Action  No action is required.

Error Message  MODULE-5-MOD_OK: Module [dec] is online (Serial number: [chars])

Explanation  Module [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-MOD_REINIT: Re-initializing module [dec] (Serial number: [chars])

Explanation  Module [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all module '.

Error Message  MODULE-5-MOD_RESTART: Module [dec] is restarting after image download

Explanation  Module [decimal digit] completed image download and is restarting.

Recommended Action  No action is required.

Error Message  MODULE-5-MOD_STARTUP_CFG_MISMATCH: The startup configuration cannot be applied to a different module type for module [dec] (Serial number: [chars]). [chars] module is replacing [chars].

Explanation  The startup configuration for module [decimal digit] contains information about a different type of module instead of containing information about the current one.

Recommended Action  No action is required.

Error Message  MODULE-5-STANDBY_SUP_OK: Supervisor [dec] is standby

Explanation  Module [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-XBAR_OK: Xbar [dec] is online (Serial number: [chars])

Explanation  Xbar [decimal digit] is ready to be configured and be able to switch traffic.

Recommended Action  No action is required.

Error Message  MODULE-5-XBAR_REINIT: Re-initializing xbar [dec] (Serial number: [chars])

Explanation  Xbar [decimal digit] reported a failure during the initialization phase and will be rebooted.

Recommended Action  Collect information about the module by issuing the commands 'show module_internal all xbar '.

MODULE-6

Error Message  MODULE-6-MOD_PURGE_CONFIG: Purging the configuration for module [dec]

Explanation  Notification is being sent to remove the module configurations.

Recommended Action  No action is required.

Error Message  MODULE-6-MOD_REG_OK: Registration succeeded for module [dec]

Explanation  Module [decimal digit] sent a successful registration message.

Recommended Action  No action is required.

MONITORC Messages

This section contains the MONITORC messages.

MONITORC-SLOT#-3

Error Message  MONITORC-SLOT#-3-MONITORC_FAILED: MONITORC failure: [chars]

Explanation  Span session programming failed with no H/W resource

Recommended Action  No DDTS.

MONITOR Messages

This section contains the MONITOR messages.

MONITOR-5

Error Message  MONITOR-5-ETH_SPAN_INBAND_RES: Inband resource allocation error for VDC: [dec]

Explanation  Inband resouce not allocated to VDC

Recommended Action  No action is required.

Error Message  MONITOR-5-ETH_SPAN_SESSION_CREATED: Session [dec] created

Explanation  A new span session has been created.

Recommended Action  No action is required.

Error Message  MONITOR-5-ETH_SPAN_SESSION_DELETED: Session [dec] deleted

Explanation  Session has been deleted.

Recommended Action  No action is required.

Error Message  MONITOR-5-ETH_SPAN_SESSION_DOWN: Session [dec] is down. Reason "[chars]"

Explanation  Session is down, no further traffic will be spanned.

Recommended Action  No action is required.

Error Message  MONITOR-5-ETH_SPAN_SESSION_ERROR: Session [dec] is having error. Reason "[chars]"

Explanation  The session is experiencing a problem.

Recommended Action  Delete the session and try to reconfigure it

Error Message  MONITOR-5-ETH_SPAN_SESSION_UP: Session [dec] is up.

Explanation  Session is up now. You can monitor Spanned traffic at the destination ports

Recommended Action  No action is required.

MPLS_OAM Messages

This section contains the MPLS_OAM messages.

MPLS_OAM-5

Error Message  MPLS_OAM-5-INITFAIL: MPLS OAM Daemon Initialization failed: [chars]

Explanation  MPLS OAM Daemon Initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  MPLS_OAM-5-LSPV_DISABLED: LSPV Disabled

Explanation  MPLS_LSPV Service Disabled

Recommended Action  No action is required.

Error Message  MPLS_OAM-5-LSPV_ENABLED: LSPV Enabled

Explanation  MPLS_LSPV Service nabled

Recommended Action  No action is required.

MPLS_STATIC Messages

This section contains the MPLS_STATIC messages.

MPLS_STATIC-5

Error Message  MPLS_STATIC-5-MPLS_STATIC_DISABLED: MPLS_STATIC Disabled

Explanation  MPLS_STATIC Service Disabled

Recommended Action  No action is required.

Error Message  MPLS_STATIC-5-MPLS_STATIC_ENABLED: MPLS_STATIC Enabled

Explanation  MPLS_STATIC Service enabled

Recommended Action  No action is required.

MRIB Messages

This section contains the MRIB messages.

MRIB-4

Error Message  MRIB-4-NBM_TOKEN_ALLOCATION_FAILED: No tokens available for new group [chars]

Explanation  No tokens available for new group [chars]

Recommended Action  No action is required.

MTC_USD Messages

This section contains the MTC_USD messages.

MTC_USD-2

Error Message  MTC_USD-2-ADJ_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  System adjacency table reached percent limit of its capacity

Recommended Action  No action is required.

Error Message  MTC_USD-2-ADJ_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  System adjacency table now below percent limit of its capacity

Recommended Action  No action is required.

Error Message  MTC_USD-2-MAC_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  System Station table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-MAC_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  System Station table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-MULTICAST_LPM_TBL_100_PERCENT_LIMIT: [chars]

Explanation  Multicast lpm table reached 100 percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-MULTICAST_LPM_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  Multicast lpm table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-MULTICAST_LPM_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  Multicast lpm table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-SYSTEM_MSG: [chars]

Explanation  MTC USD system

Recommended Action  No action is required.

Error Message  MTC_USD-2-UNICAST_LPM_IPV6_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  Unicast lpm ipv6 table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-UNICAST_LPM_IPV6_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  Unicast lpm ipv6 table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-UNICAST_LPM_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  Unicast lpm table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-UNICAST_LPM_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  Unicast lpm table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_HOST_LPM_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  Warp host lpm table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_HOST_LPM_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  Warp host lpm table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_MCST_LPM_TBL_100_PERCENT_LIMIT: [chars]

Explanation  Warp multicast lpm table reached 100 percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_MCST_LPM_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  Warp multicast lpm table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_MCST_LPM_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  Warp multicast lpm table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  System Station table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  System Station table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_UCST_LPM_TBL_ABOVE_PERCENT_LIMIT: [chars]

Explanation  Warp unicast lpm table reached percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTC_USD-2-WARP_UCST_LPM_TBL_BELOW_PERCENT_LIMIT: [chars]

Explanation  Warp unicast lpm table now below percent limit of its capacity

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

MTC_USD-4

Error Message  MTC_USD-4-WARN_MSG: [chars]

Explanation  MTC USD warning

Recommended Action  No action is required.

MTC_USD-5

Error Message  MTC_USD-5-BUFFER_MONITOR_THRESHOLD_REACHED: [chars]

Explanation  System buffer histogram reached configured threshold

Recommended Action  No action is required.

Error Message  MTC_USD-5-LATENCY_MONITOR_AVG_THRESHOLD_EXCEEDED: [chars]

Explanation  System latency avg threshold exceeded configured threshold

Recommended Action  No action is required.

Error Message  MTC_USD-5-LATENCY_MONITOR_MAX_THRESHOLD_EXCEEDED: [chars]

Explanation  System latency max threshold exceeded configured threshold

Recommended Action  No action is required.

Error Message  MTC_USD-5-STORM_PKT_SUPPRESS_DROPPED: [chars]

Explanation  Storm pkt suppress dropped

Recommended Action  No action is required.

Error Message  MTC_USD-5-STORM_PKT_SUPPRESS_DROP_STOPPED: [chars]

Explanation  Storm pkt suppress drop stopped

Recommended Action  No action is required.

MTC_USD-6

Error Message  MTC_USD-6-INFO_MSG: [chars]

Explanation  MTC USD info

Recommended Action  No action is required.

MTM Messages

This section contains the MTM messages.

MTM-SLOT#-0

Error Message  MTM-SLOT#-0-CLI_INIT_FAILED: CLI library initialization failed!

Explanation  MTM failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-0-FE_TIMER_EXPIRED: FE timer expired for fe [dec]!

Explanation  Driver has failed to respond to MTM request within MTM_FE_TO_TIMER_INTERVAL.This is a fatal error.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-0-TIMER_INIT_FAILED: Timer subsystem initialization failed!

Explanation  MTM failed to initialize timer library. This is a fatal error.

Recommended Action  No action is required.

MTM-SLOT#-1

Error Message  MTM-SLOT#-1-L2_USD_REQ_FAILED: Failed to send request to the L2 ASIC driver.

Explanation  Failed to send request to L2 ASIC driver.

Recommended Action  No action is required.

MTM-SLOT#-2

Error Message  MTM-SLOT#-2-FE_MAC_TABLE_LINE_FULL: Failed to insert static mac as MAC table line is full for FE [dec]!

Explanation  Static mac insert failed due to line full condition.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-HWIDX_TO_IF_FAILED_SUMMARY: Failed to get interface for hardware index for [dec] entries

Explanation  Failed to get interface for hardware Index for [dec] entries

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-IF_TO_HWIDX_FAILED_SUMMARY: Failed to get hardware index for interface Index for [dec] entries.

Explanation  Failed to get hardware index for interface Index for [dec] entries.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-L2_WARP_MODE_ENABLE: L2 warp mode enabled

Explanation  Warp mode re-enabled for layer 2

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTM-SLOT#-2-L2_WARP_TBL_FULL_DISABLE_MODE: [chars]

Explanation  Hardware L2 Warp table reached its capacity. Warp mode will be disabled and no further mac addresses can be programmed in the L2 warp table

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  MTM-SLOT#-2-MTM_BUFFERS_FULL: MTM buffers are full for unit [dec]. MAC tables might be inconsistent. Pls use l2 consistency-checker to verify.

Explanation  MTM buffers are full. So some hardware notifications might not be synced to L2FM. Pls use l2 consistency-checker to verify.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-MTM_MEM_ALLOC: Memory allocation failed. [chars]

Explanation  Memory allocation failed. This is a critical failure

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-MULTICAST_SOURCE_MAC_LEARNT: Inserted dynamically learnt multicast source mac [chars] in vlan [dec]!. Please issue 'show hardware mac address table' to observe them and 'clear mac address-table dynamic multicast-entries' to delete the same

Explanation  Multicast mac address: [hex] sent as source mac in a packet and was learnt in the Mac Table. Please execute: clear mac address-table dynamic multicast-entries

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-STATIC_MATCH: Failed to program static match registers for [chars].

Explanation  Failed to program the required registers in L2 ASIC for [chars].

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-STP_BPDU_MATCH: Failed to program static match registers for BPDU matching.

Explanation  Failed to program the required registers in L2 ASIC for BPDU matching. BPDUs will not be received by Spanning tree.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-2-VLAN_NOT_FOUND: VLAN [dec] not found in MTM database!

Explanation  MTM failed to find VLAN [dec] in its database. L2 MAC learning & aging on VLAN [dec] may be affected.

Recommended Action  No action is required.

MTM-SLOT#-3

Error Message  MTM-SLOT#-3-L2_TABLE_FULL: L2 Table FULL. MAC Insert might fail.

Explanation  L2 Table is FULL. The mac might not be inserted into hardware.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-3-MAC_INSERT_FAILURE: MAC Insert Failed for [chars] in vlan [dec].

Explanation  MAC INSERT Failed the specified MAC/vlan.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-3-MTM_L2_TABLE_FULL: L2 Table FULL. MAC Insert Failed for [hex]:[hex]:[hex]:[hex]:[hex]:[hex] in vlan [dec].

Explanation  MAC INSERT Failed because L2 Table is FULL. Check SDK errors in MTM INFO.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-3-MTM_STATION_TBL_FULL: Resource GWMAC tbl is full in Hardware. Unable to install GWMAC [chars] on vlan [dec]

Explanation  Number of GWMACs configured is more than Hardware limit. Check MTM global info for HW limits.

Recommended Action  No action is required.

MTM-SLOT#-4

Error Message  MTM-SLOT#-4-MTM_NS_CACHE_FULL: Forwarding cache entries for EOQs is full, some flows will not use EOQ buffers.

Explanation  Cache entries needed for EOQ operation have reached its system limits.

Recommended Action  No action is required.

MTM-SLOT#-5

Error Message  MTM-SLOT#-5-AGEGRP_ALLOC_FAILED: Age group allocation for age [dec] failed.

Explanation  Age group allocation for age [dec] failed. The total number of allocated age group has reached system limits.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-5-ALL0_LRN_DISABLE_FAIL: Failed to program static match register to disable learning all 0 MAC.

Explanation  Failed to program the required registers in L2 ASIC to disable learning all 0 MAC.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-5-FE_LEARN_DISABLE: Disabling learning on all L2 ports in unit [dec].

Explanation  Disabling learning on all L2 ports of the unit.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-5-FE_LEARN_ENABLE: Re-enabling learning on all L2 ports in unit [dec].

Explanation  Re-enabling learning on all L2 ports of the unit.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-5-L2_TABLE_TCAM_NEAR_FULL: L2 Overflow TCAM Table nearly FULL.

Explanation  The L2 overflow TCAM table for the specified unit is 90\% FULL

Recommended Action  No action is required.

MTM-SLOT#-6

Error Message  MTM-SLOT#-6-INITIALIZED: Internal state created [chars]

Explanation  MTM has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

Error Message  MTM-SLOT#-6-VDC_CREATED: VDC [dec] created

Explanation  Request to create VDC [dec] in MTM was successful.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-6-VDC_REMOVED: VDC [dec] Removed

Explanation  MTM has successfully removed VDC [dec] from its databases.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-6-VDC_VLAN_CREATED: VLAN [dec] created in VDC [dec]

Explanation  MTM has added VLAN [dec] in VDC [dec].

Recommended Action  No action is required.

Error Message  MTM-SLOT#-6-VDC_VLAN_REMOVED: VLAN [dec] removed from VDC [dec]

Explanation  MTM has successfully removed VLAN [dec] from VDC [dec].

Recommended Action  No action is required.

Error Message  MTM-SLOT#-6-VMAC_ADD: Installing VMAC [hex]:[hex]:[hex]:[hex]:[hex]:[hex] in vlan [dec].

Explanation  Installing VMAC in the hardware because of FHRP protocol state change.

Recommended Action  No action is required.

Error Message  MTM-SLOT#-6-VMAC_DEL: Remvoing VMAC [hex]:[hex]:[hex]:[hex]:[hex]:[hex] in vlan [dec].

Explanation  Removing VMAC in the hardware because of FHRP protocol state change.

Recommended Action  No action is required.

NAT Messages

This section contains the NAT messages.

NAT-2

Error Message  NAT-2-HW_PROG_FAILED: Hardware programming for NAT failed:[chars]([dec])

Explanation  NAT software encountered an error while programming the hardware to do NAT translation

Recommended Action  No action is required.

Error Message  NAT-2-TEST_ERROR: [chars] :[hex]

Explanation  NAT testing error:[string] and error: [hex]

Recommended Action  No action is required.

NAT-5

Error Message  NAT-5-NAT_LOG_DISABLED: [chars] license not installed or expired

Explanation  NAT needs license to run

Recommended Action  No action is required.

Error Message  NAT-5-NAT_LOG_ENABLED: [chars] license installed

Explanation  NAT needs license to run

Recommended Action  No action is required.

NBM Messages

This section contains the NBM messages.

NBM-0

Error Message  NBM-0-PMN_CLI_INITIALIZATION_FAILED: CLI library initialization failed!

Explanation  Failed to initialize CLI infrastructure\'s backend library. This is a fatal error.

Recommended Action  No action is required.

NBM-1

Error Message  NBM-1-PMN_LOG_ERR: NBM error: [chars]

Explanation  NBM Error which needs attention

Recommended Action  No action is required.

Error Message  NBM-1-PMN_WRITE_TO_PSS_FAILED: Failed to write to PSS err [chars]

Explanation  Failed to write to PSS err [chars]

Recommended Action  No action is required.

NBM-2

Error Message  NBM-2-PMN_FLOWS_ACTIVE: Flows are active. Tokens are not recalculated for iod [dec]

Explanation  Tokens recalculation is not allowed when flows are active

Recommended Action  No action is required.

NEUTRON_USD Messages

This section contains the NEUTRON_USD messages.

NEUTRON_USD-0

Error Message  NEUTRON_USD-0-I2C_DEV_INIT_FAIL: [chars]

Explanation  I2C device initialaisation failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-RETIMER_INIT_FAIL_SFP: [chars]

Explanation  Retimer initialisation failure for SFP

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-RETIMER_INIT_FAIL_TRIDENT: [chars]

Explanation  Retimer initialisation failure for Trident

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-RETIMER_INIT_FAIL: [chars]

Explanation  Retimer initialisation failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-0-USD_DRV_INIT_FAIL: [chars]

Explanation  USD driver init failure

Recommended Action  No action is required.

NEUTRON_USD-2

Error Message  NEUTRON_USD-2-GET_SFP_INFO_FAIL: front-port [dec], Failed to get SFP installed info

Explanation  Failed to get the SFP installed info

Recommended Action  No action is required.

Error Message  NEUTRON_USD-2-I2C_INIT_FAIL: Failed to initialize I2C device, inst=[hex], device=[hex] reg=[hex] value=[hex]

Explanation  Initialisation of the I2C device failed

Recommended Action  Please remove and insert the tranciever. If problem persists contact TAC

Error Message  NEUTRON_USD-2-I2C_READ_FAIL: i2c read failed bus=[dec], inst=[dec], cmd=[dec], err=[dec]

Explanation  I2C read access failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-2-I2C_WRITE_FAIL_AT_INIT: Failed to write I2C device,inst=[hex],device=[hex] reg=[hex] value=[hex]

Explanation  Write to the I2C device failure

Recommended Action  Please remove and insert the tranciever. If problem persists contact TAC

Error Message  NEUTRON_USD-2-I2C_WRITE_FAIL: i2c write failed bus=[dec], inst=[dec], cmd=[dec], err=[dec]

Explanation  I2C write access failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-2-UNKNOWN_INT: unknown interrupt:[dec]

Explanation  Unknown interrupt

Recommended Action  No action is required.

Error Message  NEUTRON_USD-2-USD_ISR_FAIL: usd_init_isr_hdlr failed irq=[dec] error = [dec]

Explanation  ISR initialisation failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-2-WRONG_MICROCODE: [chars]

Explanation  Wrong Neutron microcode version

Recommended Action  No action is required.

NEUTRON_USD-3

Error Message  NEUTRON_USD-3-I2C_ACCESS_FAIL1: I2C access failed for port [dec]

Explanation  I2C access failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-3-I2C_ACCESS_FAIL_XCVR_FCOT: I2C access failed port[dec] reg_addr [hex], inst=[hex]

Explanation  I2C access failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-3-I2C_ACCESS_FAIL: failed to access I2C addr=[hex], inst=[hex], port=[dec], cmd=[dec]

Explanation  I2C device access failure

Recommended Action  No action is required.

Error Message  NEUTRON_USD-3-NULL_PORT_PTR: [chars]

Explanation  Null port pointer

Recommended Action  No action is required.

Error Message  NEUTRON_USD-3-RETIMER_CHANNEL_FAIL: slot_num [dec], front-port [dec]

Explanation  Failed to turn on retimer for channel

Recommended Action  No action is required.

Error Message  NEUTRON_USD-3-RX_RETIMER_FAIL: [chars]

Explanation  Setting RX retimer fail

Recommended Action  No action is required.

Error Message  NEUTRON_USD-3-SFP_INSERT: Port [dec] SFP is inserted

Explanation  SFP inserted to port

Recommended Action  No action is required.

NEUTRON_USD-4

Error Message  NEUTRON_USD-4-I2C_INVALID_PARAM: Invalid bit type [dec] parameter

Explanation  Invalid access bit type for I2C device

Recommended Action  No action is required.

NEUTRON_USD-6

Error Message  NEUTRON_USD-6-BYPASS_NEUTRON: [chars]

Explanation  Bypassing Neutron

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-NEUTRON_CLN: [chars]

Explanation  Set neutron chip for CLN

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-NEUTRON_QI: [chars]

Explanation  Set neutron chip for QI

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-SFP_REMOVE: Port [dec] SFP is removed

Explanation  SFP removed from port

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-SFP_STATE_CHNG1: port [dec] SFP state change from absent to present

Explanation  SFP state change

Recommended Action  No action is required.

Error Message  NEUTRON_USD-6-SFP_STATE_CHNG2: port [dec] SFP state change from present to absent

Explanation  SFP state change

Recommended Action  No action is required.

NFM Messages

This section contains the NFM messages.

NFM-2

Error Message  NFM-2-COMMIT_FAIL: Commit failed: client [hex], [chars]

Explanation  The DDB commit failed

Recommended Action  No action is required.

Error Message  NFM-2-DDB_FAILURE: DDB failure: [chars]

Explanation  A DDB generated failure

Recommended Action  No action is required.

Error Message  NFM-2-EXITING: Exit reason: [chars]

Explanation  The NFM service process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  NFM-2-INIT_FAIL: NFM Service Init failed: [chars] error [hex]

Explanation  NFM Service initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  NFM-2-MALLOC_ERROR: Function [chars]: Size [dec] bytes

Explanation  The NFM service could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFM-2-PSS_ERROR: [chars]: PSS ret. val=[dec]

Explanation  The NFM service encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  NFM-2-VERIFY_FAIL: Verify failed - Client [hex], Reason: [chars], Interface: [chars]

Explanation  The DDB Verify failed

Recommended Action  No action is required.

NFM-3

Error Message  NFM-3-DDB_ERROR: DDB error: [chars]

Explanation  The DDB generated error

Recommended Action  No action is required.

Error Message  NFM-3-FEATURE_MANAGER_ERROR: [chars]: An error occurred processing a Feature Manager msg - error [chars]

Explanation  An error occurred while processing a message from FEATURE Manager

Recommended Action  No action is required.

Error Message  NFM-3-HANDLE_IN_USE: [chars]: name: [chars]

Explanation  The NFM service encountered a handle that was in use while reading a persistent storage database.

Recommended Action  No action is required.

Error Message  NFM-3-INVALID_HANDLE: [chars]: handle =[hex]

Explanation  The NFM service encountered an invalid handle in a persistent storage database.

Recommended Action  No action is required.

Error Message  NFM-3-MONITOR_NOT_FOUND: Monitor with handle [hex] from source [hex]

Explanation  An Export Msg from a Linecard contained an invalid Monitor handle

Recommended Action  No action is required.

Error Message  NFM-3-MTS_ERROR: NFM encountered the following MTS error: [chars]

Explanation  NFM Service encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  NFM-3-NFM_CONFIG_ERROR: [chars]

Explanation  L2 Netflow config is applied on Port-channel with F1 Line Cards only - error

Recommended Action  No action is required.

Error Message  NFM-3-NFM_DDB_ERROR: DDB error: [chars]

Explanation  The DDB generated error

Recommended Action  No action is required.

Error Message  NFM-3-PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The NFM service has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  NFM-3-VLAN_PARSE_ERROR: [chars]: An error occurred processing a VLAN Mgr Parse msg [hex]

Explanation  An error occurred while processing a message from VLAN Manager

Recommended Action  No action is required.

NFM-4

Error Message  NFM-4-DDB_WARNING: DDB warning: [chars]

Explanation  The DDB generated warning

Recommended Action  No action is required.

Error Message  NFM-4-LICENSE_EXPIRED: The License has expired.

Explanation  The NFM service requires a License to run and exits when the License expires.

Recommended Action  No action is required.

Error Message  NFM-4-NFM_DDB_WARNING: DDB warning: [chars]

Explanation  The DDB generated warning

Recommended Action  No action is required.

Error Message  NFM-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the NFM service and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

NFM-5

Error Message  NFM-5-FEATURE_DISABLED: Feature '[chars]' is Disabled.

Explanation  NetFlow/Analytics Feature is Disabled.

Recommended Action  No action is required.

Error Message  NFM-5-FEATURE_ENABLED: Feature '[chars]' is Enabled.

Explanation  NetFlow/Analytics Feature is Enabled.

Recommended Action  No action is required.

NFM-6

Error Message  NFM-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The NFM service on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  NFM-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The NFM service became standby from active mode.

Recommended Action  No action is required.

Error Message  NFM-6-DDB_NOTIF: DDB notification: [chars]

Explanation  The DDB generated notification

Recommended Action  No action is required.

Error Message  NFM-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The NFM service was unable to send heartbeat to the system manger

Recommended Action  No action is required.

Error Message  NFM-6-NFM_DDB_NOTIF: DDB notification: [chars]

Explanation  The DDB generated notification

Recommended Action  No action is required.

Error Message  NFM-6-SERVICE_UP: Initialized [chars]

Explanation  The NFM service is up and ready The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  NFM-6-SRV_EXIT: NFM Service shutting down gracefully

Explanation  NFM Service is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  NFM-6-SWITCH_OVER: Switching Over to other Sup.

Explanation  The NFM service has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

NFM-7

Error Message  NFM-7-DEBUG: [chars]

Explanation  Debug information is being sent to syslog

Recommended Action  No action is required.

NFP Messages

This section contains the NFP messages.

NFP-SLOT#-2

Error Message  NFP-SLOT#-2-NF_ACL_ERR: [chars]([dec]): acl error. [chars]

Explanation  Acl error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_DDB_ERR: [chars]([dec]): ddb error.[chars] [hex]

Explanation  Ddb error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_ERR: [chars]([dec]): nfp error. [chars]

Explanation  Nfp error occured

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NFP-SLOT#-2-NF_FIB_ERR: [chars]([dec]): fib error. [chars]

Explanation  Fib error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NDE_ERR: [chars]([dec]): nde error. [chars]

Explanation  Nde error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_NFM_ERR: [chars]([dec]): nfm error. [chars]

Explanation  Nfm error

Recommended Action  No DDTS.

Error Message  NFP-SLOT#-2-NF_QOS_ERR: [chars]([dec]): qos error. [chars]

Explanation  Qos error

Recommended Action  No DDTS.

NFP-SLOT#-5

Error Message  NFP-SLOT#-5-NF_INFO: [chars]

Explanation  Info

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NGOAM Messages

This section contains the NGOAM messages.

NGOAM-3

Error Message  NGOAM-3-EVENT_ASYNC_LOOPBACK_CONN_LOST: Connectivity Lost for session [dec]

Explanation  Last async request failed for the specified session

Recommended Action  No action is required.

Error Message  NGOAM-3-EVENT_DEST_UNREACH: Received Destination Unreachable notification message from switch id [dec] for switch id [dec].

Explanation  Notification received that destination is unreachable

Recommended Action  No action is required.

Error Message  NGOAM-3-EVENT_LOOPBACK_MTU_ERROR: MTU exceeded msg received from [chars]

Explanation  Received an ICMP error msg indicating MTU exceeded

Recommended Action  No action is required.

Error Message  NGOAM-3-EVENT_PT_TR_MTU_ERROR: MTU exceeded msg for TR/PT received from [chars]

Explanation  Received an ICMP error msg indicating MTU exceeded

Recommended Action  No action is required.

Error Message  NGOAM-3-NVE_ACL_INSTALL_FAIL: ACL couldn't be installed for request [dec].

Explanation  ACL install failed

Recommended Action  No action is required.

NGOAM-4

Error Message  NGOAM-4-ENTER_SESSION: [chars]

Explanation  Notification of Looback response received for a session.

Recommended Action  No action is required.

Error Message  NGOAM-4-EVENT_ASYNC_LOOPBACK_RESP: Received Loopback Response from [chars] for sender handle [dec]

Explanation  Received a response for the async loopback request

Recommended Action  No action is required.

Error Message  NGOAM-4-EVENT_INVALID_TLV: Received invalid TLV notification message from switch id [dec] for switch id [dec]

Explanation  Notification received of packet with invalid TLV

Recommended Action  No action is required.

Error Message  NGOAM-4-EVENT_PARAMETER_PROB: Received Parameter problem notification message from switch id [dec] for switch id [dec]

Explanation  Notification received of packet with parameter problem

Recommended Action  No action is required.

Error Message  NGOAM-4-EVENT_TEST_CRC_FAIL: Received test crc failure notification message from switch id [dec] for switch id [dec]

Explanation  Notification received of packet with test crc failure

Recommended Action  No action is required.

Error Message  NGOAM-4-EVENT_TTL_EXPIRY: Received Fabricpath TTL Expiry notification message from switch id [dec] for switch id [dec].

Explanation  Notification received packet with TTL expiry

Recommended Action  No action is required.

Error Message  NGOAM-4-EVENT_VLAN_UNKNOWN: Received Fabricpath VLAN unknown notification message from switch id [dec] for switch id [dec].

Explanation  Notification received packet with VLAN unknown

Recommended Action  No action is required.

Error Message  NGOAM-4-EXIT_SESSION: [chars]

Explanation  Notification of connectivity loss for a Looback session.

Recommended Action  No action is required.

Error Message  NGOAM-4-MTRACE_ACL_INSTALL_FAIL: ACL couldn't be installed for request [dec].

Explanation  ACL install failed

Recommended Action  No action is required.

Error Message  NGOAM-4-MTS_SEND_FAILED: MTS send to NGOAM failed

Explanation  MTS send to NGOAM failed

Recommended Action  No action is required.

Error Message  NGOAM-4-PKT_TOO_LARGE: Packet being sent to NGOAM too large, size = [dec].

Explanation  Packet being sent too large

Recommended Action  No action is required.

Error Message  NGOAM-4-SESSION_ERROR: [chars]

Explanation  Notification of connectiviy issue for oam packet

Recommended Action  No action is required.

Error Message  NGOAM-4-U6RIB_INIT_FAIL: U6rib init failed - V6 functionality will be disabled

Explanation  U6rib init failed

Recommended Action  No action is required.

NGOAM-6

Error Message  NGOAM-6-HMAC_AUTH_FAILED: Pathtrace requesting ifstats has HMAC check failed

Explanation  Pathtrace HMAC check failed

Recommended Action  No action is required.

NPV Messages

This section contains the NPV messages.

NPV-2

Error Message  NPV-2-CFS_PEER_LOST_WITHIN_SESSION: CFS peer with switch wwn [chars] was lost in the middle of an active CFS session. Abort the CFS session and re-enter the configuration changes

Explanation  Due to port flaps, link outages, switch restart etc. a CFS peer switch of NPV was lost. The current configuration changes would not be applied to this peer until the peer merges with this switch. The CFS merge may fail if the configuration at the lost peer conflicts with the changes made in this session. It is recommended that the user abort this CFS session using ivr abort command and then re-enter the configuration changes.

Recommended Action  No action is required.

Error Message  NPV-2-NPV_DISABLE_FAILED: NPV could not disabled : [chars] [chars]

Explanation  NPM could not disabled due to the reason specified. Please try again.

Recommended Action  No action is required.

Error Message  NPV-2-NPV_ENABLE_FAILED: NPV could not enabled : [chars] [chars]

Explanation  NPM could not enabled due to the reason specified. Please try again.

Recommended Action  No action is required.

Error Message  NPV-2-NPV_EXITED: NPV process exited in file [chars] at Line [chars]:[chars]

Explanation  NPM process encountered a critical error as specified, and so NPV process cannot continue.

Recommended Action  No action is required.

NPV-3

Error Message  NPV-3-ACL_UPDATE_FAILED: [chars]

Explanation  ACL update request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-CFS_INVALID_PAYLOAD_RECEIVED: NPV received invalid payload from CFS

Explanation  NPV process received invalid payload from CFS.

Recommended Action  No action is required.

Error Message  NPV-3-CLEAR_FAILED: [chars]

Explanation  An error occurred while clearing the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_FAILED: [chars]

Explanation  An error occurred while committing configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_PARTIALLY_FAILED: [chars]

Explanation  An error occurred while committing configuration. Configuration could not be committed on some switches. The reason for the failure : [chars]. Configuration can be inconsistent in the fabric.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-COMMIT_REJECTED: [chars]

Explanation  Commit request received from remote switch is rejected. The reason for the failure: [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-FC2_SEND_FAILED: [chars]

Explanation  NPV process could send an FC2 message.

Recommended Action  No action is required.

Error Message  NPV-3-F_RJT_SENT: [chars]

Explanation  NPV process sent an F_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-INTERNAL_ERROR: Internal error: [chars]

Explanation  NPV process encountered a general error, one that does not fall in any of the categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  NPV-3-LCP_PROGRAMMING_FAILED: [chars]

Explanation  LCP programming request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-LOCK_FAILED: [chars]

Explanation  An error occurred while acquiring the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-LS_RJT_RCVD: [chars]

Explanation  NPV process received an LS_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-LS_RJT_SENT: [chars]

Explanation  NPV process sent an LS_RJT frame.

Recommended Action  No action is required.

Error Message  NPV-3-MALLOC_FAILED: [chars]

Explanation  NPV process could not allocate memory

Recommended Action  No action is required.

Error Message  NPV-3-MERGE_ACTIVATION_FAILED: [chars]

Explanation  An error occurred while activating merged configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-MERGE_FAILED: [chars]

Explanation  An error occurred while merging configuration. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  NPV-3-MTS_SEND_FAILED: [chars]

Explanation  NPV process could not send an MTS message.

Recommended Action  No action is required.

Error Message  NPV-3-NPIV_DISABLE_FAILED: [chars]

Explanation  NPIV feature could not be disabled.

Recommended Action  No action is required.

Error Message  NPV-3-NPIV_NOT_SUPPORTED: [chars]

Explanation  Nexus 9000 platform supports FCOE-NPV only. So, NPIV feature has no meaning in this platform

Recommended Action  No action is required.

Error Message  NPV-3-NPV_CFS_IPV4_ENABLE_FAILED: CFS IPv4 distribution enable failed because [chars]

Explanation  NPV CFS distribution might not work. Try enabling it again on the command line. Make sure cfs distribution is enabled.

Recommended Action  No action is required.

Error Message  NPV-3-NPV_UPLINK_UNSTABLE: [chars]

Explanation  Atleast one of the external interface is unstable. Loadbalancing across uplink requires stable links

Recommended Action  No action is required.

Error Message  NPV-3-PORT_BRINGUP_FAILED: [chars]

Explanation  NPV process has failed to bringup the port

Recommended Action  No action is required.

Error Message  NPV-3-PORT_REINIT_FAILED: [chars]

Explanation  Port reinit request initiated by the NPV process has failed

Recommended Action  No action is required.

Error Message  NPV-3-UNLOCK_FAILED: [chars]

Explanation  An error occurred while releasing the lock. The reason for the failure : [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

NPV-4

Error Message  NPV-4-NPV_NPIV_NOT_ENABLED_ON_UPSTREAM_SWITCH: [chars]

Explanation  This syslog is printed when the external interface fails to come up due to NPIV feature not enabled on the upstream switch.

Recommended Action  Verify and enable NPIV feature in upstream switch.

Error Message  NPV-4-NPV_PORT_VSAN_MISMATCH_ON_UPSTREAM_LINK: [chars]

Explanation  This syslog is printed when the external interface fails to come up due to upstream port VSAN mis-match with the upstream switch.

Recommended Action  Make sure port VSAN is same on both sides of this external link

NPV-5

Error Message  NPV-5-ASSERTION_FAILED: Unexpected assertion failure in File [chars] at Line [dec]

Explanation  An assertion failed in NPV code

Recommended Action  No action is required.

Error Message  NPV-5-FLEXATTACH_VPWWN_AUTO_ASSIGNED: A virtual port WWN [chars] has been automatically assigned to interface [chars]

Explanation  The virtual port WWN will be used as port WWN for devices logging in on this interface.

Recommended Action  No action is required.

Error Message  NPV-5-FLEXATTACH_VPWWN_MANUALLY_ASSIGNED: A virtual port WWN [chars] has been manually assigned to interface [chars]

Explanation  The virtual port WWN will be used as port WWN for devices logging in on this interface.

Recommended Action  No action is required.

Error Message  NPV-5-FLEXATTACH_VPWWN_UNASSIGNED: The virtual port WWN has been unassigned from interface [chars]

Explanation  The physical port WWN will be used as port WWN for devices logging in on this interface.

Recommended Action  No action is required.

Error Message  NPV-5-FRAME_DISCARDED: [chars]

Explanation  NPV process discarded an FC2 frame.

Recommended Action  No action is required.

Error Message  NPV-5-NPV_LOAD_BALANCE_REINIT: Server ports reinitialized : [chars]

Explanation  Server ports are reinitialized to balance the loads on the external interfaces.

Recommended Action  No action is required.

Error Message  NPV-5-UNEXPECTED_EVENT: [chars]

Explanation  NPV process has received an unexpected event in the current state.

Recommended Action  No action is required.

NPV-6

Error Message  NPV-6-ABTS_SENT: [chars]

Explanation  NPV process sent an ABTS frame.

Recommended Action  No action is required.

Error Message  NPV-6-ELS_CMD_SENT_TO_CORE: [chars]

Explanation  NPV process sent an ELS frame to the core switch.

Recommended Action  No action is required.

Error Message  NPV-6-ELS_CMD_SENT_TO_SRV: [chars]

Explanation  NPV process sent an ELS frame to the server.

Recommended Action  No action is required.

Error Message  NPV-6-EXT_IF_SELECTED: [chars]

Explanation  NPV process has selected an external interface to forward either all frames received on a server interface or frames received from a specific port WWN.

Recommended Action  No action is required.

Error Message  NPV-6-FABRIC_PROXY_LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame to the device as the corresponding external interface went down.

Recommended Action  No action is required.

Error Message  NPV-6-FDISC_RCVD: [chars]

Explanation  NPV process received an FDISC frame.

Recommended Action  No action is required.

Error Message  NPV-6-FDISC_SENT: [chars]

Explanation  NPV process sent an FDISC frame to the core switch.

Recommended Action  No action is required.

Error Message  NPV-6-FLOGI_RCVD: [chars]

Explanation  NPV process received an FLOGI frame.

Recommended Action  No action is required.

Error Message  NPV-6-INTERNAL_FLOGI_SENT: [chars]

Explanation  NPV process sent an internal FLOGI frame to the core switch on an external interface.

Recommended Action  No action is required.

Error Message  NPV-6-LOGO_RCVD: [chars]

Explanation  NPV process received a LOGO frame.

Recommended Action  No action is required.

Error Message  NPV-6-LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame.

Recommended Action  No action is required.

Error Message  NPV-6-LS_ACC_RCVD: [chars]

Explanation  NPV process received an LS_ACC frame.

Recommended Action  No action is required.

Error Message  NPV-6-LS_ACC_SENT: [chars]

Explanation  NPV process sent an LS_ACC frame.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_NOTIF_RCVD: [chars]

Explanation  NPV process received an MTS notification.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_NOTIF_SENT: [chars]

Explanation  NPV process sent an MTS notification.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_REQ_RCVD: [chars]

Explanation  NPV process received an MTS request.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_REQ_SENT: [chars]

Explanation  NPV process sent an MTS request.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_RESP_RCVD: [chars]

Explanation  NPV process received an MTS response.

Recommended Action  No action is required.

Error Message  NPV-6-MTS_RESP_SENT: [chars]

Explanation  NPV process sent an MTS response.

Recommended Action  No action is required.

Error Message  NPV-6-NPIV_DISABLED: [chars]

Explanation  NPIV feature has been disabled.

Recommended Action  No action is required.

Error Message  NPV-6-NPIV_ENABLED: [chars]

Explanation  NPIV feature has been enabled.

Recommended Action  No action is required.

Error Message  NPV-6-NPV_ENABLE_DISABLE_IN_PROGRESS: [chars]

Explanation  NPV feature enable/disable is in progress. This syslog is printed at the beginning of various significant phases.

Recommended Action  No action is required.

Error Message  NPV-6-NPV_LOAD_BALANCE_TIMER_START: (Re)starting automatic load balancing timer for [dec] seconds

Explanation  Timer started for upon external interface up or server interface down. When the timer goes off some of the server interfaces may be reinitialized to evenly distribute the server interfaces amongst the eligible external interfaces.

Recommended Action  No action is required.

Error Message  NPV-6-SERVER_PROXY_LOGO_SENT: [chars]

Explanation  NPV process sent a LOGO frame to the core switch as the server interface went down.

Recommended Action  No action is required.

NPV-7

Error Message  NPV-7-CFS_REQ_RCVD: [chars]

Explanation  CFS request is received. The WWN of the switch originated this request and the rr-token of the request are provided in the syslog message.

Recommended Action  No action is required.

Error Message  NPV-7-CFS_RESP_SENT: [chars]

Explanation  CFS response is sent. The rr-token of the corresponding request and the status are provided in the syslog message

Recommended Action  No action is required.

NSUSD Messages

This section contains the NSUSD messages.

NSUSD-6

Error Message  NSUSD-6-NSAUSD_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

NTP Messages

This section contains the NTP messages.

NTP-2

Error Message  NTP-2-NTP_SYSLOG_CRIT_ERR: : [chars]

Explanation  NTP syslog Critial Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_INIT_FAIL: : [chars] [chars]

Explanation  NTP Initialization Failed: [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-2-NTP_SYSLOG_NO_RESP_FROM_LC: from LC[dec] for [chars]

Explanation  NTP did not receive response from the linecard for the request sent.

Recommended Action  No action is required.

NTP-3

Error Message  NTP-3-NTP_SYSLOG_ALLOC_FAIL: : [chars]

Explanation  NTP syslog allocation failed : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR_EXT: : [chars] [chars]

Explanation  NTP syslog Error Exit : [chars] [dec].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_ERR: : [chars]

Explanation  NTP syslog Error : [chars].

Recommended Action  No action is required.

Error Message  NTP-3-NTP_SYSLOG_MTS_ERR: : [chars]

Explanation  NTP MTS Error : [chars].

Recommended Action  No action is required.

NTP-6

Error Message  NTP-6-NTP_SYSLOG_CREATED: : [chars]; Slot No: [dec]

Explanation  NTP syslog created : [chars] [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_EXIT: : [chars]

Explanation  NTP syslog Exit : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_LOGGING: : [chars]

Explanation  NTP logging : [chars].

Recommended Action  No action is required.

Error Message  NTP-6-NTP_SYSLOG_WARN: : [chars]

Explanation  NTP syslog Warning : [chars].

Recommended Action  No action is required.

NVE Messages

This section contains the NVE messages.

NVE-5

Error Message  NVE-5-BFD_CC_STATE_CHANGE: BFD CC [chars] for bfd-neighbor [chars]

Explanation  A bfd cc state change has happened. This is most likely due to a configuration change.

Recommended Action  No action is required.

Error Message  NVE-5-VDC_MAC_G_STATUS: [chars] to get router-mac, current value [chars]

Explanation  Information on events related to getting router-mac

Recommended Action  No action is required.

OBFL Messages

This section contains the OBFL messages.

OBFL-3

Error Message  OBFL-3-ERROR: [chars]

Explanation  Obfl_encountered an error

Recommended Action  No action is required.

ONEP Messages

This section contains the ONEP messages.

ONEP-2

Error Message  ONEP-2-GET_BUFFER: Onepsync ISSU client failed to get buffer for message. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client failed to get buffer space for building a negotiation message. A negotiation message cannot be sent to the standby device. If a problem occurs with the ISSU session negotiation, the standby device cannot be brought up properly.

Recommended Action  LOG_STD_SH_CMD_ACTION( show logging and show checkpoint client)

Error Message  ONEP-2-INIT: Onepsync ISSU client initialization failed to [chars]. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client could not be initialized. This initialization failure must be addressed before in-service software upgrade or downgrade can be performed successfully. If you do not address this failure, there will be downtime during software upgrade or downgrade.

Recommended Action  LOG_STD_ACTION

Error Message  ONEP-2-NE_PSS_32_ERR: ONEP [chars] configuration mismatch: Network Element([dec]) / PSS([dec])

Explanation  The Network Element and Persistent Storage for the running-config are out of sync. If no other error has occurred, the Network Element configuration will take precedence.

Recommended Action  LOG_STD_SH_CMD_ACTION( Try reconfiguring the item, possibly using the [no] form to restore a default value if a new one doesn't take. The 'show running-config' command should be used to see if this error persists.)

Error Message  ONEP-2-NE_PSS_STRING_ERR: ONEP [chars] configuration mismatch: Network Element([chars]) / PSS([chars])

Explanation  The Network Element and Persistent Storage for the running-config are out of sync. If no other error has occurred, the Network Element configuration will take precedence.

Recommended Action  LOG_STD_SH_CMD_ACTION( Try reconfiguring the item, possibly using the [no] form to restore a default value if a new one doesn't take. The 'show running-config' command should be used to see if this error persists.)

Error Message  ONEP-2-SEND_NEGO_FAILED: Onepsync ISSU client failed to send negotiation message. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client failed to send a session negotiation message to the peer device. If a problem occurs with the ISSU session negotiation, the standby device cannot be brought up properly.

Recommended Action  LOG_STD_SH_CMD_ACTION( show logging and show checkpoint client)

Error Message  ONEP-2-SESSION_NEGO_FAIL_START: Failed to start Onepsync ISSU session negotiation. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client failed to start session negotition. If a problem occurs with the ISSU session start, the standby device cannot be brought up properly.

Recommended Action  LOG_STD_SH_CMD_ACTION( show issu session )

Error Message  ONEP-2-SESSION_REGISTRY: Onepsync ISSU client failed to register session information. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client failed to register session information. If a problem occurs with the ISSU session registration, the standby device cannot be brought up properly.

Recommended Action  LOG_STD_SH_CMD_ACTION( show issu capability entries and show issu session and show issu negotiated capability )

ONEP-3

Error Message  ONEP-3-AUTHEN_ERR: [[chars]]: Authentication/authorization failed. [chars]

Explanation  The session authentication has failed

Recommended Action  LOG_STD_SH_CMD_ACTION( Check user's credentials are matched against the AAA/local users configured on the Netwk Element.)

Error Message  ONEP-3-BUSY_ERR: [[chars]]: The requested resource is currently busy. [chars].

Explanation  The usage of the resource has exceeded the configured threshold value

Recommended Action  LOG_STD_SH_CMD_ACTION( Check the current resource usage and configured resource threshold. cpu threshold rising falling interval Retry the operation if resource usage is below the threshold.)

Error Message  ONEP-3-DISABLED_ERR: [[chars]]: [chars] is disabled.

Explanation  The requested service set is in disabled state. All the service requests for that service set will be rejected.

Recommended Action  LOG_STD_SH_CMD_ACTION( Make sure the service set is enabled. connectedapps service set )

Error Message  ONEP-3-DUPLICATE_ERR: [[chars]]: Requested entity [chars] already exists.

Explanation  The connection request to the network element already exists

Recommended Action  LOG_STD_SH_CMD_ACTION( Make sure the uniqueness of the application name. One session per application is allowed on a network element.)

Error Message  ONEP-3-INVALID_SESSION: Onepsync ISSU client does not have a valid registered session.

Explanation  The Onepsync ISSU client does not have a valid registered session.

Recommended Action  LOG_STD_SH_CMD_ACTION( show issu capability entries and show issu session and show issu negotiated capability )

Error Message  ONEP-3-LISP_DISABLED_ERR: [[chars]]: [chars] is disabled.

Explanation  The requested service set is in disabled state. All the service requests for that service set will be rejected.

Recommended Action  LOG_STD_SH_CMD_ACTION( Make sure the service set is enabled. connectedapps service set lisp)

Error Message  ONEP-3-MSG_NOT_OK: Onepsync ISSU client 'Message Type [dec]' is not compatible

Explanation  The Onepsync ISSU client received an incompatible message from the peer device. The message cannot be processed.

Recommended Action  LOG_STD_SH_CMD_ACTION( show issu message group and show issu session and show issu negotiated version )

Error Message  ONEP-3-MSG_SIZE: Onepsync ISSU client failed to get the MTU for Message Type [dec]. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client failed to calculate the MTU for the specified message. The Onepsync ISSU client is not able to send the message to the standby device.

Recommended Action  LOG_STD_SH_CMD_ACTION( show issu message group and show issu session and show issu negotiated version )

Error Message  ONEP-3-SESSION_UNREGISTRY: Onepsync ISSU client failed to unregister session information. Error: [dec] ([chars])

Explanation  The Onepsync ISSU client failed to unregister session information.

Recommended Action  LOG_STD_SH_CMD_ACTION( show issu session and show issu negotiated capability )

Error Message  ONEP-3-VERSION_ERR: [[chars]]: ONE-P version incompatible between client and network element. [chars]

Explanation  The ONE-P client service set version is incompatible with the one installed on the network element

Recommended Action  LOG_STD_SH_CMD_ACTION( Make sure the version running on the client side is compatible with the one installed on the network element )

ONEP-4

Error Message  ONEP-4-CLEAR_TEXT_TRANSPORT_WARN: [[chars]]: Clear text transport being enabled. This is not recommended for production environment. [chars]

Explanation  Clear text transport being enabled. This is not recommended for production environment.

Recommended Action  LOG_STD_SH_CMD_ACTION( Please configure secure transport, such as TLS.)

Error Message  ONEP-4-ONEP_DISABLED: ONEP feature is administratively disabled, terminated [[dec]] connected application(s)

Explanation  Administrator has disabled ONEP feature while application sessions were active. All active sessions have been terminated. To enable ONEP again use \'feature onep\' command in configuration mode.

Recommended Action  LOG_STD_SH_CMD_ACTION( No action is required if this was deliberate operation. To enable ONEP again use \'feature onep\' command in configuration mode.)

ONEP-6

Error Message  ONEP-6-CONNECT: [[chars]]: ONEP session [chars] has connected.

Explanation  A new ONEP session has been established with network element.

Recommended Action  LOG_STD_SH_CMD_ACTION( No action is required if this is an authorized session.)

Error Message  ONEP-6-DISCONNECT: [[chars]]: ONEP session [chars]

Explanation  ONEP session has been disconnected. A disconnect can happen when application has finished execution or there was a problem during execution including issue with network transport. If reconnect timer is configured, Network Element will wait for application to reconnect within configured time before cleaning up session resources.

Recommended Action  LOG_STD_SH_CMD_ACTION( No action is required if it is a expected disconnected. Use show tech-support onep to collect logs from Network Element)

Error Message  ONEP-6-HISTORY: [chars]

Explanation  This syslog message is used to display onePK history messages when the 'history syslog' onep command is enabled.

Recommended Action  LOG_STD_SH_CMD_ACTION( No action is required. Use 'no history syslog' at the onep configuration prompt to turn off this logging if desired.)

Error Message  ONEP-6-RECONNECT: [[chars]]: ONEP session [chars] has reconnected.

Explanation  ONEP session has been reconnected after being disconnected temporarly. This disconnect can happen due to intermittent network connectivity issues.

Recommended Action  LOG_STD_SH_CMD_ACTION( No action is required if this is an authorized session.)

Error Message  ONEP-6-SS_DISABLED: ONEP: [chars]

Explanation  The service set has been set to a disabled state. All service requests for that service set will be rejected.

Recommended Action  LOG_STD_SH_CMD_ACTION( If the disablement was intentional, no action is required. If not, then enable the service set: onep service set )

Error Message  ONEP-6-SS_ENABLED: ONEP: [chars]

Explanation  The service set has been set to an enabled state. The features of the service set will be available for use.

Recommended Action  LOG_STD_SH_CMD_ACTION( If the enablement was intentional, no action is required.)

OTM Messages

This section contains the OTM messages.

OTM-2

Error Message  OTM-2-OTM_EEM_FAIL: OTM failed to register with EEM

Explanation  OTM process failed to register with eem, exiting now

Recommended Action  No action is required.

OTM-3

Error Message  OTM-3-OTM_ERROR: [chars] [chars]

Explanation  [chars1][chars2]

Recommended Action  No action is required.

OTM-5

Error Message  OTM-5-OTM_OBJECT_STATUS: Status of tracking object [dec] changed to [chars]

Explanation  Status of tracking object [dec] changed to [chars]

Recommended Action  No action is required.

Error Message  OTM-5-OTM_OBJ_ADD: : Tracking object [dec] configured, status of the object [chars]

Explanation  Tracking Object [dec] configured, status of the object [chars]

Recommended Action  No action is required.

OTM-6

Error Message  OTM-6-OTM_EXITED: OTM process exited

Explanation  OTM process is terminated

Recommended Action  No action is required.

Error Message  OTM-6-OTM_OBJ_REM: : Tracking object [dec] removed

Explanation  Tracking Object [dec] removed

Recommended Action  No action is required.

Error Message  OTM-6-OTM_STARTED: OTM process started

Explanation  OTM process is up and running

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_START: Client started tracking object [dec]

Explanation  Client has started tracking object [dec]

Recommended Action  No action is required.

Error Message  OTM-6-OTM_TRACK_STOP: Client stopped tracking object [dec]

Explanation  Client has stopped tracking object [dec]

Recommended Action  No action is required.

PATCH-INSTALLER Messages

This section contains the PATCH-INSTALLER messages.

PATCH-INSTALLER-2

Error Message  PATCH-INSTALLER-2-LOG_PATCH_INSTALLER_EXIT: Patch Installer exiting: [chars]

Explanation  Patch Installer exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

PATCH-INSTALLER-3

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_ID_FILE_ERR: Error opening patch installer id file

Explanation  Could not open the file for storing patch installer request ids

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_IMAGE_FILE_OPEN_ERR: Error opening image name file [chars] for patch installer

Explanation  Could not open the file to get the name of the image

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_IMAGE_FILE_READ_ERR: Error reading image name file [chars] for patch installer

Explanation  Could not read the name of the image

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_LOG_FILE_ERR: Error opening patch installer log file

Explanation  Could not open the log file for logging \show install\ commands

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_OP_FAILED: Package Install operation: [chars] , operation ID: [dec], failed with error: [dec] ([chars]) at: [chars]

Explanation  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Recommended Action  Patch_installer

Error Message  PATCH-INSTALLER-3-PATCH_INSTALLER_REPO_SIZE_INCREASE_ERR: Error increasing patch reposize.Using old repo size.

Explanation  There was an error while trying to increase the patch repo size

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PATCH-INSTALLER-3-PATCH_SUPERCEDED: The following patches will get superceded: [chars]

Explanation  List of superceded patches

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

PHY_USD Messages

This section contains the PHY_USD messages.

PHY_USD-SLOT#-4

Error Message  PHY_USD-SLOT#-4-LOG_PHY_FW_UPGRADE: Extended firware upgrade started

Explanation  Extended line card firmware upgrade started.

Recommended Action  No action is required.

Error Message  PHY_USD-SLOT#-4-LOG_PHY_ISSU_LINK_ST_CHNG: Port [dec]: link state during ISSU

Explanation  Port Link status changed while perfoming an In Service System Upgrade. Disabling the port.

Recommended Action  No action is required.

PIM Messages

This section contains the PIM messages.

PIM-4

Error Message  PIM-4-NBM_TOKEN_ALLOCATION_FAILED: No tokens available for new group [chars]

Explanation  No tokens available for new group [chars]

Recommended Action  No action is required.

PIXM Messages

This section contains the PIXM messages.

PIXM-2

Error Message  PIXM-2-PIXM_SYSLOG_MESSAGE_TYPE_CRIT: [chars]

Explanation  PIXM has encountered a critical error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-3

Error Message  PIXM-3-PIXM_SYSLOG_MESSAGE_TYPE_ERR: [chars]

Explanation  PIXM has encountered a error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-4

Error Message  PIXM-4-PIXM_SYSLOG_MESSAGE_TYPE_WARNING: [chars]

Explanation  PIXM has encountered a warning-level error

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PIXM-7

Error Message  PIXM-7-PIXM_SYSLOG_MESSAGE_TYPE_DEBUG: [chars]

Explanation  This is a debug output from PIXM

Recommended Action  Please collect PIXM tech support using 'show tech pixm-all' and 'show tech pixmc-all'

PLATFORM Messages

This section contains the PLATFORM messages.

PLATFORM-0

Error Message  PLATFORM-0-CHASSIS_CLKSWITCH: Hardware clock switched to redundant clock-[dec]

Explanation  Clock module on chassis deteted a failure and switched to redundant clock module.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-0-CHASSIS_CLKSWRESET: Switch reset due to clock switch

Explanation  Chassis clock source has failed and system will be reset. System will automatically start using redundant clock module.

Recommended Action  Please refer to the platform document on clock modules.

Error Message  PLATFORM-0-CHASSIS_CLKSW_MODULE_RESET: Modules reset due to clock switch

Explanation  Chassis clock source has switched and all Vegas line cards will be reset. System will automatically continue using redundant clock module.

Recommended Action  Please refer to the platform document on clock modules.

Error Message  PLATFORM-0-FAIL_REMOVED: Fan module removed. Fan[dec] has been absent for [dec] seconds

Explanation  Fan module is removed. This could lead to temperature alarms.

Recommended Action  Replace the fan module ASAP.

Error Message  PLATFORM-0-MOD_TEMPMAJALRM: [chars] reported Major temperature alarm. Sensor=[dec] Temperature=[dec] MajThreshold=[dec]

Explanation  Module in slot [decimal digit] exceeded major temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-MOD_TEMPSHUTDOWN: [chars] powered down due to major temperature alarm for Sensor [dec].

Explanation  Module in slot [decimal digit] shutdown due to temperature exceeding major threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-MOD_TEMPWARMALRM: [chars] reported Warm temperature alarm. Sensor=[dec] Temperature=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] exceeded warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-PFM_EMERGENCY: [chars]

Explanation  Platform Emergency

Recommended Action  No action is required.

Error Message  PLATFORM-0-SUP_SPROM_ERROR: Unable to read SPROM for Sup in slot [dec]

Explanation  The supervisor in slot [decimal digit] was not able to read its SPROM.

Recommended Action  No action is required.

Error Message  PLATFORM-0-SUP_WRONGSLOTNUM: Supervisor powered up in WRONG SLOT:[dec] (Serial number [chars])

Explanation  The supervisor is comming up in wrong slot [decimal digit].

Recommended Action  No action is required.

Error Message  PLATFORM-0-SYS_LC_DRIVER_LOAD_FAILED: Failed to load linecard module drivers

Explanation  Failed to load drivers.

Recommended Action  Image is possibly corrupt. Try to load a different image.

Error Message  PLATFORM-0-SYS_NO_SHUTDOWN_FAN_DIR_MISMATCH: PS/Fan-Tray Fan dir mismatch is detected - System auto shutdown is disabled. Rectify mismatch to avoid system malfunction.

Explanation  Mismatch in direction between fan and ps module. System will not shutdown

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_RESET: [chars] System shutdown in [dec] seconds

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN_FAN_DIR_MISMATCH: PS/Fan-Tray Fan dir mismatch is detected - System will shutdown in [dec] minutes if mismatch is not rectified

Explanation  System shutdown in [decimal digit] seconds due to mismatch in direction between fan and ps module.

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN_FAN_REMOVAL: System shutdown in [dec] seconds due to fan removal

Explanation  System shutdown in [decimal digit] seconds due to removal of fan module.

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN_MDS9124_FAN_FAIL: System shutdown in [dec] seconds due to less than 4 fans operating.

Explanation  System shutdown in [decimal digit] seconds due to less than 4 fans operating.

Recommended Action  Please perform a 'show env fan' to collect more information.

Error Message  PLATFORM-0-SYS_SHUTDOWN: System shutdown in [dec] seconds due to major temperature alarm

Explanation  System shutdown in [decimal digit] seconds due to temperature exceeding major threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-0-SYS_SUP_DRIVER_LOAD_FAILED: Failed to load supervisor module drivers

Explanation  Failed to load drivers.

Recommended Action  Image is possibly corrupt. Try to load a different image

Error Message  PLATFORM-0-XBAR_CARD_CLK_FAIL: Xbar card in slot:[dec] (Serial number [chars]) encountered clock failure

Explanation  The xbar in slot [decimal digit] encountered clock failure.

Recommended Action  No action is required.

Error Message  PLATFORM-0-XBAR_CARD_INCOMPAT_CHASSIS: Xbar card in slot:[dec] (Part number [chars]) Incompatible with backplane chassis Part Num:[chars]

Explanation  The xbar in slot [decimal digit] is incompatible with backplane chassis.

Recommended Action  No action is required.

Error Message  PLATFORM-0-XBAR_WRONGSLOTNUM: Xbar powered up in WRONG SLOT:[dec] (Serial number [chars])

Explanation  The xbar in slot [decimal digit] powered up in wrong slot.

Recommended Action  No action is required.

PLATFORM-1

Error Message  PLATFORM-1-FABRIC_SWITCH_FAN_FAIL: Less than 4 required fans operating.

Explanation  Fan module has failed leaving less than 4 total fans operating. Fan needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-FAN_FAIL: Fan module Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-PFM_ALERT: [chars]

Explanation  Platform Alert

Recommended Action  No action is required.

Error Message  PLATFORM-1-PS_SINGLE_INPUT: Both power inputs are connected for Power supplies, remove single-input configuration for optimal power usage

Explanation  Current power supply redundancy mode may not be optimal

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-1-XBAR_PWRDENY: Xbar [dec] can not be powered up due to insufficient power (Serial number [chars])

Explanation  Available power in power supplies is not sufficient to power up the xbar

Recommended Action  You can verify available power and current usage using command 'show env power'. Please refer to power supply document on how to increase power supply capacity.

PLATFORM-2

Error Message  PLATFORM-2-9134_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-9134_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-ACTIVE_SUP_LESS_MEMORY: Active Sup and Standby Sup are different model. Replace Sup in slot [dec] with same memory config for continued redundancy post switchover

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  PLATFORM-2-CASA_FAN_FAIL: Fan module [dec] Failed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-CASA_FAN_OK: Fan module [dec] ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-CHASSIS_CLKMODFAULTY: Chassis clock module [dec] faulty

Explanation  Clock module on chassis is faulty or has been removed.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-CHASSIS_CLKMODOK: Chassis clock module [dec] ok

Explanation  Clock module on chassis is functioning properly.

Recommended Action  No action is required.

Error Message  PLATFORM-2-CHASSIS_CLKSRC: Current chassis clock source is clock-[dec]

Explanation  The current chassis clock source is [decimal digit].

Recommended Action  No action is required.

Error Message  PLATFORM-2-FANLET_FAN_FAIL: Failed Fanlets for Fan [dec] ([chars] fan) : [chars]

Explanation  The specified fanlets have failed. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_FAIL: Fan module [dec] ([chars] fan) Failed/Removed

Explanation  Fan module has failed and needs to be replaced. This can lead to overheating and temperature alarms.

Recommended Action  Please perform a 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-FANMOD_FAN_OK: Fan module [dec] ([chars] fan) ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_OK: Fan module ok

Explanation  Fan module is ok

Recommended Action  No action is required.

Error Message  PLATFORM-2-FAN_REMOVED: Fan module [dec] (Serial number [chars]) [chars] removed

Explanation  Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-2-INSUFFICIENT_MAC: Ran out of Mac address to program management port on all the non-default VDCs

Explanation  Could not program the mac address for the management port of all the VDCs

Recommended Action  No action is required.

Error Message  PLATFORM-2-MEMORY_ALERT_RECOVERED: Memory Status Alert : [chars]

Explanation  Memory alert event received

Recommended Action  None

Error Message  PLATFORM-2-MEMORY_ALERT: Memory Status Alert : [chars]. Usage [chars]% of Available Memory

Explanation  Memory alert event received

Recommended Action  None

Error Message  PLATFORM-2-MODULE_EJECTOR_POLICY_DISABLED: Ejector based shutdown disabled for Module [dec] [chars]. Please close all the ejectors to enable ejector based shutdown

Explanation  Ejector based shutdown has been disabled

Recommended Action  Close all the ejectors to enable ejector based shutdown

Error Message  PLATFORM-2-MODULE_EJECTOR_POLICY_ENABLED: All Ejectors closed for module [dec]. Ejector based shutdown enabled

Explanation  Ejector based shutdown has been enabled

Recommended Action  None

Error Message  PLATFORM-2-MOD_ALL_PARTIAL_LC_PWRDN_FABRIC_MODE: Partially connected line-card modules powered down due to configured fabric mode

Explanation  Partially line-card modules in switch are powered down because of configured fabric mode

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' , 'show system fabric-mode' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one partially connected fabric module has to be online for partially connected line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PARTIAL_LC_PWRDN_NOFM: Partially connected line-card modules powered down due to no connectivity with existing fabric modules

Explanation  Partially line-card modules in switch are powered down because of no connectivity to exisiting fabric modules

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one partially connected fabric module has to be online for partially connected line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PWRDN_NOFM: All line-card modules powered down due to non-availability of fabric modules

Explanation  All line-card modules in switch are powered down because all fabric modules are offline

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one fabric module has to be online for line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PWRDN_NOSC: All fabric, line-card modules powered down due to non-availability of system controller modules

Explanation  All fabric, line-card modules in switch are powered down because all system controller modules are offline

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one system-controller module has to be online for fabric, line-card modules to function

Error Message  PLATFORM-2-MOD_ALL_PWRDN_NOXBAR: All modules powered down due to non-availability of xbar modules

Explanation  All modules in switch are powered down because all xbar modules are offline

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors. Atleast one xbar module has to be for modules to function

Error Message  PLATFORM-2-MOD_DETECT: Module [dec] detected (Serial number [chars]) Module-Type [chars] Model [chars]

Explanation  A new module in slot [decimal digit] is detected.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_PRESENT: Detected the presence of Module [dec]

Explanation  A new module in slot [decimal digit] is inserted.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_PWRDENY: Module [dec] can not be powered up due to insufficient power (Serial number [chars])

Explanation  Available power in power supplies is not sufficient to power up the module

Recommended Action  You can verify available power and current usage using command 'show env power'. Please refer to power supply document on how to increase power supply capacity.

Error Message  PLATFORM-2-MOD_PWRDN: Module [dec] powered down (Serial number [chars])

Explanation  The module in slot [decimal digit] is powered down.

Recommended Action  Please perform a 'show module', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors.

Error Message  PLATFORM-2-MOD_PWRFAIL_EJECTORS_OPEN: All ejectors open, Module [dec] will not be powered up (Serial number [chars])

Explanation  The module can not be powered up because all the ejectors are open

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-MOD_PWRFAIL: Module [dec] failed to power up (Serial number [chars])

Explanation  The module in slot [decimal digit] failed to power up

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and to collect more information.

Error Message  PLATFORM-2-MOD_PWRIDPROMFAIL: Module [dec] failed to power up due to IDPROM read error

Explanation  The module can not be powered up due to IDPROM read error

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom module [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-MOD_PWRIDPROM_SW_CARD_ID_UNKNOWN: Module [dec] failed to power up. (Unknown card. Could not get software-card-id)

Explanation  The module can not be powered up due to missing SWID in core-plugin for this CARDID

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom module [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-MOD_PWRUP_FM: Modules powered up due to fabric-module availability

Explanation  Modules powered up because atleast one fabric module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP_PARTIAL_FM: Partially connected line-card modules powered up due to available connectivity with fabric-modules

Explanation  Partially connected line-card modules powered up because atleast one fabric module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP_SC: Modules powered up due to system-controller module availability

Explanation  Modules powered up because atleast one system-controller module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP_XBAR: Modules powered up due to xbar availability

Explanation  Modules powered up because atleast one xbar module is online

Recommended Action  No action needed

Error Message  PLATFORM-2-MOD_PWRUP: Module [dec] powered up (Serial number [chars])

Explanation  The module in slot [decimal digit] is powered up.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_REMOVE: Module [dec] removed (Serial number [chars])

Explanation  The module in slot [decimal digit] has been removed.

Recommended Action  No action is required.

Error Message  PLATFORM-2-MOD_TEMPMAJOR2WARM: [chars] recovered from minor temperature alarm. Warm alarm pending. Sensor=[dec] Temperature=[dec] MajTheshold=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMAJOR_OK: [chars] recovered from major temperature alarm. Sensor=[dec] Temperature=[dec] MajThreshold=[dec]

Explanation  Module in slot [decimal digit] major temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMINALRM: [chars] reported minor temperature alarm. Sensor=[dec] Temperature=[dec] MinThreshold=[dec]

Explanation  Module in slot [decimal digit] has exceeded minor temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPMINOR2WARM: [chars] recovered from minor temperature alarm. Warm alarm pending. Sensor=[dec] Temperature=[dec] MinTheshold=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPOK: [chars] recovered from minor temperature alarm. Sensor=[dec] Temperature=[dec] MinThreshold=[dec]

Explanation  Module in slot [decimal digit] minor temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPRECOVER: [chars] recovered from major temperature alarm. Minor temperature alarm pending. Sensor=[dec] Temperature=[dec] MajThreshold=[dec] MinThresh=[dec]

Explanation  Module in slot [decimal digit] recovered from major temperature threshold. Minor threshold still exceeded.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-MOD_TEMPWARM_OK: [chars] recovered from warm temperature alarm. Sensor=[dec] Temperature=[dec] WarmThreshold=[dec]

Explanation  Module in slot [decimal digit] warm temperature threshold.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-2-PFM_CRITICAL: [chars]

Explanation  Platform Critical

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_FATW_BUS_SWITCH_FAIL: Backplane two wire [chars] bus connection fault detected but failed to perform bus switchover(BUS_A to BUS_B)

Explanation  Could not access some modules using BUS_A, but can access using BUS_B

Recommended Action  Please perform a 'show platform internal err'

Error Message  PLATFORM-2-PFM_FATW_BUS_SWITCH: Backplane two wire [chars] bus connection or device fault caused bus switchover(BUS_A to BUS_B)

Explanation  Could not access some modules using BUS_A, but can access using BUS_B

Recommended Action  Please perform a 'show platform internal err'

Error Message  PLATFORM-2-PFM_IMG_CMPT_FAIL: Image version is not supported in this chassis.

Explanation  This image version is not supported in this chassis.

Recommended Action  Sup-platform

Error Message  PLATFORM-2-PFM_LC_BOOT_DEV_ABSENT: No bootflash found in Module [dec]

Explanation  No bootflash found.

Recommended Action  Try to put in a bootflash in the module and try again.

Error Message  PLATFORM-2-PFM_LC_BOOT_DEV_FAIL: Bootflash access error in Module [dec]

Explanation  Bad bootflash/corrupted filesystem.

Recommended Action  Try to put in a known good bootflash in the module and try again.

Error Message  PLATFORM-2-PFM_LC_MOD_POWERED_DOWN: Module [dec] Powered Down. Module is not supported in this chassis. (Chassis Incompatible card)

Explanation  Module Powered Down, because Module is not supported in this chassis. (Chassis Incompatible card)

Recommended Action  Please perform a 'show module' to see the Power Down reason.

Error Message  PLATFORM-2-PFM_LC_NETBOOT_FAIL: Netboot for Module [dec] failed

Explanation  Netboot failed.

Recommended Action  Try to replace the BIOS in the module.

Error Message  PLATFORM-2-PFM_LC_REGISTRATION_FAIL: Could not register with Module [dec]

Explanation  Module registration failed.

Recommended Action  Try to replace the module.

Error Message  PLATFORM-2-PFM_LC_STATUS: Module [dec] powered up with [dec] status

Explanation  Status for the module that failed registration.

Recommended Action  Try to replace the module.

Error Message  PLATFORM-2-PFM_LOW_MEMORY_CONDITION: Module [dec] is running low on memory. %ld percent used

Explanation  Supervisor is running low on memory

Recommended Action  Switchover

Error Message  PLATFORM-2-PFM_MODULE_POWER_OFF_TRIGGER: Power-off [chars] due to [chars] policy trigger

Explanation  Policy trigger initiated a module poweroff

Recommended Action  None

Error Message  PLATFORM-2-PFM_MODULE_POWER_OFF: Manual power-off of [chars] from Command Line Interface

Explanation  User initiated a module power-off from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_MODULE_POWER_ON: Manual power-on of [chars] from Command Line Interface

Explanation  User initiated a module power-on from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_MODULE_RESET: Manual restart of Module [dec] from Command Line Interface

Explanation  User initiated a module reload from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_NETBOOT_DISABLE: Netboot for supervisor module in slot [dec] is disabled due to incompatible platform

Explanation  Standby supervisor failed to powerup.

Recommended Action  Try to replace the standby supervisor.

Error Message  PLATFORM-2-PFM_PREP_DEEP_SLEEP: Supervisor module in slot [dec] preparing to enter deep sleep mode

Explanation  Deep sleep mode initiated by the Connectivity Management Processor (CMP) for this supervisor

Recommended Action  No action is required.

Error Message  PLATFORM-2-PFM_PWR_MGMT_EPLD_VER_MISMATCH: Module [dec] Pwr Mgmt Epld (Version-[dec]) needs to be upgraded

Explanation  Using a wrong version of Epld version can result in unexplainable behaviour

Recommended Action  Upgrade Power Managment EPLD

Error Message  PLATFORM-2-PFM_STDBY_POWERUP_FAIL: standby supervisor failed to powerup

Explanation  Standby supervisor failed to powerup.

Recommended Action  Try to replace the standby supervisor.

Error Message  PLATFORM-2-PFM_SYSTEM_RESET_TRIGGER: System restart due to [chars] policy trigger

Explanation  Policy/trigger initiated a system reload

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYSTEM_RESET: Manual system restart from Command Line Interface

Explanation  User initiated a system reload from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYSTEM_SHUTDOWN_TRIGGER: System shutdown due to [chars] policy trigger

Explanation  Policy/trigger initiated a system shutdown

Recommended Action  None

Error Message  PLATFORM-2-PFM_SYS_RESET_IMG_CMPT_FAIL: *********ERROR:System reset due to unsupported image version********

Explanation  System reset is triggered because of unsupported image version in this chassis.

Recommended Action  Sup-platform

Error Message  PLATFORM-2-PFM_XBAR_RESET: Manual restart of Xbar [dec] from Command Line Interface

Explanation  User initiated a xbar reload from the CLI

Recommended Action  None

Error Message  PLATFORM-2-PLUGIN_ABSENT: Module in slot[dec] (sw_card_id=[dec]) has missing plugin

Explanation  Plugin not loaded, The LC cannot be poweredup

Recommended Action  Load the associated plugin

Error Message  PLATFORM-2-PS_ABSENT: Power supply [dec] is absent/shutdown, ps-redundancy might be affected

Explanation  Power Supply is absent.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_CAPACITY_CHANGE: Power supply PS[dec] changed its capacity. possibly due to On/Off or power cable removal/insertion (Serial number [chars])

Explanation  Detected power supply capacity change.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_CAPACITY_DIFFER: Detected power supplies with differing capacity. It is recommended to have same capacity for both powersupplies otherwise it may cause service disruptions

Explanation  Detected a power supply that has differing capacity than an the otherpower supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_DETECT: Power supply [dec] detected but shutdown (Serial number [chars])

Explanation  Power Supply is detected but shutdown.

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FAIL: Power supply [dec] failed or shut down (Serial number [chars])

Explanation  Power Supply has failed or has been shutdown

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information. Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_FANFAIL: Fan in Power supply [dec] failed

Explanation  Fan module in the Power Supply has failed

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_FANOK: Fan in Power supply [dec] ok

Explanation  Fan module in the Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_MISMATCH: Detected power supply [chars]. This reduces the redundant power available to the system and can cause service disruptions (Serial number [chars])

Explanation  Detected a new power supply that has reduced capacity than an existing power supply.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc. Please perform 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_OK: Power supply [dec] ok (Serial number [chars])

Explanation  Power Supply is ok.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_PWR_INPUT_MISSING: Power supply [dec] present but all AC/DC inputs are not connected, power redundancy might be affected

Explanation  Power Supply is present but not at full capacity.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_RED_MODE_CHG: Power supply operational redundancy mode changed to [chars]

Explanation  Power supply redundancy mode changed notification

Recommended Action  Please perform a 'show environment power' and 'show platform internal info' to collect more information.

Error Message  PLATFORM-2-PS_RED_MODE_RESTORED: Power redundancy operational mode changed to configured mode

Explanation  Power Supply redundancy mode changes.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_REMOVE_LAST: Unexpected removal of last power supply [dec]. (Serial number [chars])

Explanation  Unexpected removal the only power supply in the system.

Recommended Action  Power supply unit may be faulty. Contact CISCO to replace the unit.

Error Message  PLATFORM-2-PS_REMOVE: Power supply [dec] removed (Serial number [chars])

Explanation  Power Supply is removed.

Recommended Action  No action is required.

Error Message  PLATFORM-2-PS_UNKNOWN: Detected an unknown power supply [dec] for CISCO Multilayer Switch (Serial number [chars])

Explanation  Unable to determine power supply type. Default power supply types will be assumed.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-PS_UNSUPPORTED: Detected an unsupported power supply [dec] [chars] for CISCO Multilayer Switch (Serial number [chars])

Explanation  This power supply is not supported for the CISCO Multilayer Switches.

Recommended Action  Please refer to power supply document on increasing decreasing power supply capacity, configuring power supplies, etc.

Error Message  PLATFORM-2-SUP_UNSUPPORTED: Unsupported card detected in supervisor slot [dec] powered down

Explanation  The module in slot [decimal digit] has been powered down.

Recommended Action  No action is required.

Error Message  PLATFORM-2-SYS_IDPROMBAD_RECOVER_FAIL: Chassis IDPROM [dec] data re-initialization Un-successful. Data is invalid

Explanation  Chassis IDPROM [decimal digit] re-initialization was unsuccessful. Data is invalid.

Recommended Action  Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and collect more information.

Error Message  PLATFORM-2-SYS_IDPROMBAD_RECOVER_PASS: Chassis IDPROM [dec] data re-initialized successfully

Explanation  Chassis IDPROM [decimal digit] invalid data was succesfully re-initialized to valid.

Recommended Action  Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and verify the information.

Error Message  PLATFORM-2-SYS_IDPROMBAD: Chassis IDPROM [dec] data invalid

Explanation  Chassis IDPROM [decimal digit] contains invalid data.

Recommended Action  Please perform a 'show sprom module [decimal digit] 1' to read module IDPROM contents and collect more information.

Error Message  PLATFORM-2-XBAR_DETECT: Xbar [dec] detected (Serial number [chars])

Explanation  A new xbar in slot [decimal digit] is detected.

Recommended Action  No action is required.

Error Message  PLATFORM-2-XBAR_EJECTOR_POLICY_DISABLED: Ejector based shutdown disabled for Xbar [dec][chars]. Please close all the ejectors to enable ejector based shutdown

Explanation  Ejector based shutdown has been disabled

Recommended Action  Close all the ejectors to enable ejector based shutdown

Error Message  PLATFORM-2-XBAR_EJECTOR_POLICY_ENABLED: All Ejectors closed for Xbar [dec]. Ejector based shutdown enabled

Explanation  Ejector based shutdown has been enabled

Recommended Action  None

Error Message  PLATFORM-2-XBAR_PWRFAIL_EJECTORS_OPEN: All ejectors open, Xbar [dec] will not be powered up (Serial number [chars])

Explanation  The xbar can not be powered up because all the ejectors are open

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-2-XBAR_REMOVE: Xbar [dec] removed (Serial number [chars])

Explanation  The xbar in slot [decimal digit] has been removed.

Recommended Action  No action is required.

PLATFORM-3

Error Message  PLATFORM-3-EJECTOR_STAT_CHANGED: Ejectors' status in slot [dec] has changed, [chars] Ejector is [chars], [chars] Ejector is [chars]

Explanation  Ejector status has changed

Recommended Action  None

Error Message  PLATFORM-3-MOD_BRINGUP_MULTI_LIMIT: Giving up after multiple attempts were made to bring up the Module [dec], (Serial number [chars])

Explanation  The module can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-MOD_PWRFAIL_MULTI: Module [dec] failed to power up multiple times (Serial number [chars])

Explanation  The module can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-PFM_ERROR: [chars]

Explanation  Platform Error

Recommended Action  No action is required.

Error Message  PLATFORM-3-SINGLE_EJECTOR_STAT_CHANGED: Ejectors' status in slot [dec] has changed, Ejector is [chars]

Explanation  Ejector status has changed

Recommended Action  None

Error Message  PLATFORM-3-XBAR_BRINGUP_MULTI_LIMIT: Giving up after multiple attempts were made to bring up the Xbar [dec], (Serial number [chars])

Explanation  The module can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contXBA ents to collect more information.

Error Message  PLATFORM-3-XBAR_PWRFAIL_MULTI: Xbar [dec] failed to power up multiple times (Serial number [chars])

Explanation  The xbar can not be powered up even after three attempts

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-XBAR_PWRFAIL: Xbar [dec] failed to power up (Serial number [chars])

Explanation  The xbar in slot [decimal digit] failed to power up

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and to collect more information.

Error Message  PLATFORM-3-XBAR_PWRIDPROMFAIL: Xbar [dec] failed to power up due to IDPROM read error

Explanation  The xbar can not be powered up due to IDPROM read error

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

Error Message  PLATFORM-3-XBAR_PWRIDPROM_SW_CARD_ID_UNKNOWN: Xbar [dec] failed to power up. (Unknown card. Could not get software-card-id)

Explanation  The xbar can not be powered up due to missing SWID in core-plugin for this CARDID

Recommended Action  Please perform a 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' 'show sprom xbar [dec] [dec]' to read module IDPROM contents to collect more information.

PLATFORM-4

Error Message  PLATFORM-4-MOD_TEMPACCESSFAIL: [chars] temperature sensor [dec] access failed

Explanation  Module in slot [decimal digit] unable to access temperature sensor.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-4-MOD_TEMPFAIL: [chars] temperature sensor [dec] failed

Explanation  Module in slot [decimal digit] contains a faulty temperature sensor.

Recommended Action  Please perform a 'show env temperature' to collect more information.

Error Message  PLATFORM-4-PFM_FAN_FLTR_STATUS: Fan Filter status: [chars]

Explanation  Fan Filter status: Present/Absent

Recommended Action  Please perform a 'show platform internal info.

Error Message  PLATFORM-4-PFM_PS_RED_MODE_CHG: Power redundancy configured mode changed to [chars]

Explanation  Power redundancy mode changed

Recommended Action  Please perform a 'show platform internal info.

Error Message  PLATFORM-4-PFM_WARNING: [chars]

Explanation  Platform Warning

Recommended Action  No action is required.

PLATFORM-5

Error Message  PLATFORM-5-FAN_DETECT: Fan module [dec] (Serial number [chars]) [chars] detected

Explanation  Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FAN_STATUS: Fan module [dec] (Serial number [chars]) [chars] current-status is [chars]

Explanation  Fan module changed status

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_DETECT: Fex [dec] Fan Module [dec] detected

Explanation  Fex Fan module is detected

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_FAN_REMOVE: Fex [dec] Fan Module [dec] removed

Explanation  Fex Fan module is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_FOUND: Fex [dec] Power Supply [dec] found (Serial number [chars])

Explanation  Fex power supply is found

Recommended Action  No action is required.

Error Message  PLATFORM-5-FEX_PS_REMOVE: Fex [dec] Power Supply [dec] removed (Serial number [chars])

Explanation  Fex power supply is removed

Recommended Action  No action is required.

Error Message  PLATFORM-5-MOD_STATUS: [chars] current-status is [chars]

Explanation  Module in slot [decimal digit] changed status.

Recommended Action  No action is required.

Error Message  PLATFORM-5-PFM_NOTICE: [chars]

Explanation  Platform Notice

Recommended Action  No action is required.

Error Message  PLATFORM-5-POE_DISABLING: The only 1100W power supply is shutdown, Disabling POE.

Explanation  No 1100W power supply to support POE

Recommended Action  No action is required.

Error Message  PLATFORM-5-PS_FOUND: Power supply [dec] found (Serial number [chars])

Explanation  Power Supply is detected.

Recommended Action  No action is required.

Error Message  PLATFORM-5-PS_STATUS: PowerSupply [dec] current-status is [chars] [chars]

Explanation  Module in slot [decimal digit] changed status.

Recommended Action  No action is required.

Error Message  PLATFORM-5-XBAR_PWRDN: Xbar [dec] powered down (Serial number [chars])

Explanation  The xbar in slot [decimal digit] is powered down.

Recommended Action  Please perform a 'show module xbar', 'show platform internal all module [decimal digit]' and 'show module internal all module [decimal digit]' to collect more information if you suspect module has been powered down due to errors.

Error Message  PLATFORM-5-XBAR_PWRUP: Xbar [dec] powered up (Serial number [chars])

Explanation  The xbar in slot [decimal digit] is powered up.

Recommended Action  No action is required.

PLATFORM-6

Error Message  PLATFORM-6-PFM_FAN_SPEED: [chars]

Explanation  Fan Speed: For Zones

Recommended Action  Please perform a 'show platform internal info.

Error Message  PLATFORM-6-PFM_INFO: [chars]

Explanation  Platform Info

Recommended Action  No action is required.

PLATFORM-7

Error Message  PLATFORM-7-PFM_CLOCK_UPD_FAIL: Clock update failed due to context-switch delay of [dec] msec

Explanation  System shutdown in [decimal digit] seconds.

Recommended Action  Please perform a 'show env temperature' to collect more information.

PLOG_SUP Messages

This section contains the PLOG_SUP messages.

PLOG_SUP-4

Error Message  PLOG_SUP-4-PLOG_SUP_EXIT: Persistent Logger encountered an error [dec].

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

PLOG Messages

This section contains the PLOG messages.

PLOG-4

Error Message  PLOG-4-PLOG_LC_EXIT: Persistent Logger encountered an error [dec]

Explanation  Persistent Logger encountered an error

Recommended Action  No action is required.

PLSM Messages

This section contains the PLSM messages.

PLSM-3

Error Message  PLSM-3-EDP_ERR: Interface [chars] in Error Disabled Policy(EDP) state Check : show interface status error policy [detail]

Explanation  Error Disabled Policy State for a interface.

Recommended Action  None

PLSM-6

Error Message  PLSM-6-SEQ_INFO: EDP State Cleared for interface [chars] vlans [chars]

Explanation  EDP State cleared for a interface.

Recommended Action  None

PLTFM_CONFIG Messages

This section contains the PLTFM_CONFIG messages.

PLTFM_CONFIG-2

Error Message  PLTFM_CONFIG-2-PC_ACL_TCAM_REGION_CARVING_NOT_SUPPORTED: Carving of TCAM region [chars] not supported on this platform. Please remove any unsupported region carving from startup config.

Explanation  [chars] Carving of tcam region not supported on switch

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-2-PC_ACL_TCAM_REGION_CARVING_WARNING_CRIT: [chars].

Explanation  [chars] TCAM region carving warning

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-2-PC_ACL_TCAM_REGION_NO_CARVING_NOT_SUPPORTED: Negation of TCAM region [chars] carving not allowed in startup config. Please remove any such carving configs from startup.

Explanation  [chars] Negation of TCAM region carving not allowed in startup

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-2-PC_ACL_TCAM_REGION_VALIDATION_FAILED: Validation of TCAM region carving failed with reason: [chars]. Please ensure tcam carving config is valid in startup config

Explanation  [chars] Validation of TCAM region carving failed

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-2-PC_FAILED: PLTFM_CONFIG failure: [chars]

Explanation  PLTFM_CONFIG operation failed in pltfm_config

Recommended Action  No DDTS.

PLTFM_CONFIG-3

Error Message  PLTFM_CONFIG-3-PC_ACL_LOU_COMMIT_RESPONSE_FAIL_LOG: LOU threshold commit failed.

Explanation  LOU threshold response to commit failed.

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-3-PC_ACL_LOU_COMMIT_TIMEOUT_LOG: LOU threshold commit timed out.

Explanation  LOU threshold response to commit timed out.

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-3-PC_ACL_LOU_VERIFY_RESPONSE_FAIL_LOG: LOU threshold verification failed, aborting operation.

Explanation  LOU threshold response to verify failed, so sending abort msg to all LC aclqos.

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-3-PC_ACL_LOU_VERIFY_TIMEOUT_LOG: LOU threshold verification timed out, aborting operation.

Explanation  LOU threshold response to verify timed out, so sending abort msg to all LC aclqos.

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-3-PC_HW_QOS_VERIFY_RESPONSE_FAIL_LOG: hardware qos verification failed, aborting operation.

Explanation  Hardware qos response to verify failed, so sending abort msg to all LC aclqos.

Recommended Action  No action is required.

PLTFM_CONFIG-4

Error Message  PLTFM_CONFIG-4-PC_ACL_TCAM_REGION_CARVE_BIG_SLICE: TCAM region of big slice [[dec]] allocated for tcam region [[chars]]. TCAM region of small slice is not available

Explanation  [chars] Tcam region of big slice allocated

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-4-PC_ACL_TCAM_REGION_CARVING_WARNING: [chars].

Explanation  [chars] TCAM region carving warning

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-4-PC_ACL_TCAM_TEMPLATE_INCOMP: TCAM template [[chars]] does not match the card type of [[dec]]. Using default tcam region settings for card [[dec]]

Explanation  [chars] Tcam template incompatible with card

Recommended Action  No action is required.

Error Message  PLTFM_CONFIG-4-PC_MODULE_SE_RL_RESET: span-egress rate-limit: [chars]

Explanation  Span-egress rate-limit value per module reset to system span-egress rate-limit

Recommended Action  No DDTS.

Error Message  PLTFM_CONFIG-4-XL_LICENSE_MIX_NOTIFY: Mixed use of non-XL with XL modules in the same VDC may limit common resources to non-XL capacity.

Explanation  This is a reminder that mixing non-XL and XL modules in the same VDC may limit XL modules to the capacity of non-XL modules.

Recommended Action  No action is required.

PLUGIN Messages

This section contains the PLUGIN messages.

PLUGIN-2

Error Message  PLUGIN-2-LOAD_REQUEST_FAILED_ON_STANDBY: Load request failed on standby. rc ([hex])

Explanation  Load request failed on standby

Recommended Action  No action is required.

Error Message  PLUGIN-2-NOTIFY_MSG_FAILURE: Plugin notify message ([chars]) returned failure (rc [hex])

Explanation  Plugin notify message returned failure.

Recommended Action  No action is required.

Error Message  PLUGIN-2-NO_MEMORY: Memory allocation failed (size [dec])

Explanation  The service failed to allocate memory.

Recommended Action  No action is required.

Error Message  PLUGIN-2-PLUGIN_EXTRACT_FAILED_ON_STANDBY: Plugin extraction failed on standby. rc ([hex])

Explanation  Plugin extraction failed on standby

Recommended Action  No action is required.

Error Message  PLUGIN-2-PLUGIN_LOAD_INTERNAL_ERROR: Plugin has internal error during load operation. Reason: [chars]

Explanation  Plugin has internal error

Recommended Action  No action is required.

Error Message  PLUGIN-2-PLUGIN_UNLOAD_INTERNAL_ERROR: Plugin has internal error during unload operation. Reason: [chars]

Explanation  Plugin has internal error

Recommended Action  No action is required.

Error Message  PLUGIN-2-SEND_NOTIFY_MSG_FAILED: Failed to send plugin notify message ([chars]). Reason: [chars]

Explanation  Failed to send plugin notify message

Recommended Action  No action is required.

Error Message  PLUGIN-2-UNEXPECTED_LOAD_SYNC: Received unexpected plugin load sync. Current plugin request ([dec])

Explanation  Standby received load sync and current standby does not have an outstanding load request

Recommended Action  No action is required.

Error Message  PLUGIN-2-UNEXPECTED_UNLOAD_SYNC: Received unexpected plugin unload sync. Current plugin request ([dec])

Explanation  Standby received unload sync and current standby does not have an outstanding unload request

Recommended Action  No action is required.

Error Message  PLUGIN-2-UNLOAD_REQUEST_FAILED_ON_STANDBY: Unload request failed on standby. rc ([hex])

Explanation  Unload request failed on standby

Recommended Action  No action is required.

Error Message  PLUGIN-2-UPDATE_SYS_INFO_FAILED: Failed to update system information ([chars])

Explanation  Failed to update system information

Recommended Action  No action is required.

PLUGIN-3

Error Message  PLUGIN-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]/[dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

POAP Messages

This section contains the POAP messages.

POAP-2

Error Message  POAP-2-POAP_DHCP_DISCOVER_RECVD_NAK: [chars] - Received DHCP NAK

Explanation  Received DHCP NAK

Recommended Action  No action is required.

Error Message  POAP-2-POAP_DHCP_DISCOVER_START: [chars] - POAP DHCP Discover phase started

Explanation  POAP DHCP Discover phase started

Recommended Action  No action is required.

Error Message  POAP-2-POAP_FAILURE_READ_MODINFO: [chars] - Failure to read module info

Explanation  POAP failure to read module info

Recommended Action  No action is required.

Error Message  POAP-2-POAP_FAILURE: [chars] - [chars]

Explanation  POAP failure

Recommended Action  No action is required.

Error Message  POAP-2-POAP_INFO: [chars] - [chars]

Explanation  POAP Info

Recommended Action  No action is required.

Error Message  POAP-2-POAP_INITED: [chars] - POAP process initialized

Explanation  POAP process initialized

Recommended Action  No action is required.

Error Message  POAP-2-POAP_RELOAD_DEVICE: [chars] - Reload device

Explanation  POAP reload device.

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_DOWNLOADED: [chars] - Successfully downloaded POAP script file

Explanation  Successfully downloaded POAP script file

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_EXEC_SUCCESS: [chars] - POAP script execution success

Explanation  POAP script execution success

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_NOT_VALIDATED: [chars] - POAP script execution started(MD5 not validated)

Explanation  POAP script execution started(MD5 not validated)

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_VALIDATED: [chars] - POAP script execution started(MD5 validated)

Explanation  POAP script execution started(MD5 validated)

Recommended Action  No action is required.

Error Message  POAP-2-POAP_SCRIPT_STARTED_MD5_VALIDATION_FAIL: [chars] - POAP boot file validation failed

Explanation  POAP boot file validation failed.

Recommended Action  No action is required.

POAP-5

Error Message  POAP-5-POAP_DISABLED: [chars] - POAP Disabled

Explanation  POAP Service Disabled

Recommended Action  No action is required.

Error Message  POAP-5-POAP_ENABLED: [chars] - POAP Enabled

Explanation  POAP Service nabled

Recommended Action  No action is required.

POE Messages

This section contains the POE messages.

POE-2

Error Message  POE-2-POED_POWER_POLICE: [chars]

Explanation  Powerd device connected to a PoE port is drawing more power than allowed power

Recommended Action  No action is required.

POE-3

Error Message  POE-3-POED_INTERNAL_ERROR: [chars]

Explanation  An unexpected internal software error occured

Recommended Action  No action is required.

Error Message  POE-3-POED_POWER_HW_FAULT: [chars]

Explanation  There is a hw fault on a PoE port

Recommended Action  No action is required.

POE-5

Error Message  POE-5-POED_DISABLED: POED Disabled

Explanation  POED Service Disabled

Recommended Action  No action is required.

Error Message  POE-5-POED_ENABLED: POED Enabled

Explanation  POED Service Enabled

Recommended Action  No action is required.

Error Message  POE-5-POED_PD_CONNECTED: [chars]

Explanation  A PD has been detected on a PoE port

Recommended Action  No action is required.

Error Message  POE-5-POED_PD_DISCONNECTED: [chars]

Explanation  A PD has been disconnected from a PoE port

Recommended Action  No action is required.

Error Message  POE-5-POED_POWER_ADJUST: [chars]

Explanation  PD on a PoE port has altered its power consumption

Recommended Action  No action is required.

Error Message  POE-5-POED_POWER_DENIED: [chars]

Explanation  Power has been denied to a PoE device

Recommended Action  No action is required.

Error Message  POE-5-POED_POWER_GOOD: [chars]

Explanation  Power delivered to the device successfully

Recommended Action  No action is required.

Error Message  POE-5-POED_POWER_LOG: [chars]

Explanation  Power log

Recommended Action  No action is required.

Error Message  POE-5-POED_POWER_REMOVED: [chars]

Explanation  Power has been removed on a PoE port

Recommended Action  No action is required.

Error Message  POE-5-POED_POWER_SUPPLY_MODE_CHANGE: [chars]

Explanation  Power supply mode has been changed

Recommended Action  No action is required.

PONG Messages

This section contains the PONG messages.

PONG-5

Error Message  PONG-5-PONG_DISABLED: Pong Manager disabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_ENABLED: Pong Manager enabled

Explanation  Pong Service Enabled

Recommended Action  No action is required.

Error Message  PONG-5-PONG_INJECTED: Pong packet injected

Explanation  Pong packet injected

Recommended Action  No action is required.

PORT-CHANNEL Messages

This section contains the PORT-CHANNEL messages.

PORT-CHANNEL-1

Error Message  PORT-CHANNEL-1-LC_CFG_FAILURE: configuring module [dec] failed [[chars]]

Explanation  Module configuration failed

Recommended Action  Module will be automatically reset

Error Message  PORT-CHANNEL-1-MALLOC_FAILED: cannot allocate memory (size [dec])

Explanation  No enough memory

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-1-MAP_PARAM_FAILURE: mapping parameter failed for [chars] [[chars]]

Explanation  Parameter mapping failed

Recommended Action  Specified service is misbehaving; check its status

Error Message  PORT-CHANNEL-1-MCAST_SEND_FAILURE: failed to send multicast [chars]: [chars]

Explanation  Failed to send a multicast message to all modules, usually because some module went down

Recommended Action  Run show port-channel consistency to check consistency

Error Message  PORT-CHANNEL-1-PC_BUNDLE_ID_NOT_CORRECT: [chars] : PC Bundle ([dec]) not equal to expected value ([dec]). Flapping the port-channel

Explanation  Bundle of pc is not equal to port-channel id minus one, flap of the port-channel is performed

Recommended Action  Flap of the port-channel was done since bundle was not equal to expected value. Check is PC traffic is restored fine.

PORT-CHANNEL-2

Error Message  PORT-CHANNEL-2-AUTO_CREATE_DISABLED: [chars] has been deprecated; [chars] [chars]

Explanation  Auto create port-channel is deprecated and disabled

Recommended Action  Convert the auto created channel to presistent by doing port-channel persistent

Error Message  PORT-CHANNEL-2-RESET_MODULE: reset module [dec] for not responding or returning error

Explanation  A module is reset for not responding or returning error

Recommended Action  No action is required.

PORT-CHANNEL-3

Error Message  PORT-CHANNEL-3-COMPAT_CHECK_FAILURE: [chars] is not compatible

Explanation  Compatibility check failed when adding ports to port-channel

Recommended Action  Make sure the compatibility parameters are consistent while adding ports to port-channel, or use force option

Error Message  PORT-CHANNEL-3-GENERAL_ERROR: [chars]

Explanation  General error

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-LC_CFG_TIMEOUT_ENTRY_PORT_ERR_DISABLE: Failed to send LC config due to timeout, Port [chars] Err disabled

Explanation  Failed to send a lc_config message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-LC_CFG_UCAST_FAILED_PORT_ERR_DISABLE: Failed to send LC config unicast msg, Port [chars] Err disabled

Explanation  Failed to send a lc_config unicast message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-LC_CFG_UCAST_SEND_FAILURE: Failed to send LC config Unicast msg to slot [dec] node [hex] sap [dec]: [chars]. Resetting LineCard

Explanation  Failed to send a lc_config unicast message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-PORT_CHANNEL_NOT_FOUND: [chars] is not found

Explanation  Cannot find port-channel in its database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-3-TIMEOUT: timed out after [dec] seconds [type [chars], state [chars]]

Explanation  Some operation timed out

Recommended Action  Run show port-channel consistency to check all module connectivity and consistency

PORT-CHANNEL-4

Error Message  PORT-CHANNEL-4-PORT_CFG_DELETED: [chars] removed from [chars]

Explanation  Port is removed from a port-channel because different module was inserted or module config purged

Recommended Action  You lost some ports from port-channel, check if you want to add ports in the new module to the same port-channel.

Error Message  PORT-CHANNEL-4-PORT_INDIVIDUAL: port [chars] is operationally individual

Explanation  The port is operating as an individual link even though it is locally or remotely configured to be part of a port channel

Recommended Action  Check the configuration of the port locally and remotely to ensure that it can operate as part of a port channel

Error Message  PORT-CHANNEL-4-PORT_NOT_FOUND: port [chars] is not part of port-channel

Explanation  Cannot find the port in port-channel database, which indicates an inconsistency with an external component

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-4-RACE_WARN: [chars]

Explanation  Warning of possible race condition

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-4-UNEXPECTED_RESPONSE: unexpected response [chars] from [chars]

Explanation  Received an unexpected response and discarded

Recommended Action  No action is required.

PORT-CHANNEL-5

Error Message  PORT-CHANNEL-5-AUTO_CREATE_FAILURE: [chars] [chars]

Explanation  Auto create process on the port failed

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-CREATED: [chars] created

Explanation  A port-channel is created

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-DELETED: [chars] deleted

Explanation  A port-channel is deleted

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-FOP_CHANGED: [chars]: first operational port changed from [chars] to [chars]

Explanation  The first operational port in a port-channel is changed

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-MAX_CHANNEL_DISALLOWED: Module failed to come online because port channel interface greater than [dec] is present

Explanation  The port-channel number configured on the switch is larger than 128

Recommended Action  Delete the set of port channel interface which is greater than 128

Error Message  PORT-CHANNEL-5-PORT_ADDED: [chars] added to [chars]

Explanation  Ports are added to a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_DOWN: [chars]: [chars] is down

Explanation  Port goes down in a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_REMOVED: [chars] removed from [chars]

Explanation  Ports are removed from a port-channel

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-5-PORT_UP: [chars]: [chars] is up

Explanation  Port comes up in a port-channel

Recommended Action  No action is required.

PORT-CHANNEL-6

Error Message  PORT-CHANNEL-6-RESYNC: resyncing [chars] with all modules

Explanation  Resync modules with sup after an error or switchover

Recommended Action  No action is required.

PORT-CHANNEL-7

Error Message  PORT-CHANNEL-7-GSYNC_DONE: global synchronization is done

Explanation  Port-channel manager finished global synchronization

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-GSYNC_REQ: requesting global synchronization

Explanation  Port-channel manager requested a global synchronization from active sup

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_ACTIVE: started in active mode

Explanation  Port-channel manager started in active mode

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_DEFAULT: started with default configuration

Explanation  Port-channel manager started with default configuration

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_STANDBY: started in standby mode

Explanation  Port-channel manager started in standby mode

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_STATEFUL: started statefully

Explanation  Port-channel manager started with running configuration

Recommended Action  No action is required.

Error Message  PORT-CHANNEL-7-START_STATELESS: started statelessly

Explanation  Port-channel manager started with startup configuration

Recommended Action  No action is required.

PORT-PROFILE Messages

This section contains the PORT-PROFILE messages.

PORT-PROFILE-2

Error Message  PORT-PROFILE-2-IF_REFRESH_FAILED: Interface Database Refresh failed for [chars]

Explanation  Interface Database Refresh failed

Recommended Action  No action is required.

Error Message  PORT-PROFILE-2-INTERFACE_CMD_FAILURE: Inherit of port-profile [chars] on [chars] has failed with reason: [chars]

Explanation  Executing specific cmd on interface failed

Recommended Action  No action is required.

Error Message  PORT-PROFILE-2-INTERFACE_QUARANTINED: Interface [chars] has been quarantined due to [chars]

Explanation  Interface has been quarantined

Recommended Action  No action is required.

PORT-PROFILE-3

Error Message  PORT-PROFILE-3-ASSERTION_FAILED: Failed in File:[chars] Line:[dec]

Explanation  PPM Process assertion failed in File:[chars], at line:[dec]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-CREATE_IF_FAILED: Running-config collection Failed for intf range [chars]

Explanation  Running-config collection failed for :[chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-IF_APPLY_FAILED: Config Apply Failed

Explanation  Config Apply Failed

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-INTERFACE_NO_SHUTDOWN_FAILED: Interface no shutdown failed for [chars] after profile re-inherit

Explanation  Interface could not be unshut after profile re-inherit

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-INTERFACE_SHUTDOWN_FAILED: Interface shutdown failed for [chars] after failure to apply commands

Explanation  Interface could not be shutdown after failure to apply commands

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PPM_ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  SDM process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_CREATE_FAILED: Port-profile [chars] creattion failed with error "[chars]"

Explanation  Port-profile:[chars] creation failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_DEINHERIT_FAILED: Port-profile [chars] de-inherit failed with error "[chars]" on [chars]

Explanation  Port-profile:[chars] de-inherit failed with [:chars] on [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_DELETE_FAILED: Port-profile [chars] is deletion failed with error "[chars]"

Explanation  Port-profile:[chars] deletion failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_DISABLE_FAILED: Port-profile [chars] disable failed with error "[chars]"

Explanation  Port-profile:[chars] disable failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_ENABLE_FAILED: Port-profile [chars] enable failed with error "[chars]"

Explanation  Port-profile:[chars] enable failed with [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-3-PROFILE_INHERIT_FAILED: Port-profile [chars] inherit failed with error "[chars]" on [chars]

Explanation  Port-profile:[chars] inherit failed with [:chars] on [:chars]

Recommended Action  No action is required.

PORT-PROFILE-6

Error Message  PORT-PROFILE-6-KEY_STRING_EMPTY: A command '[chars]' with no command name defined in the definition file can cause PPM to handle it incorrectly

Explanation  Parsing null key as part of 'show running-config' is not correct

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_CREATED: Port-profile [chars] is created successfully

Explanation  Port-profile:[chars] is created

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_DEINHERITED: Port-profile [chars] is de-inherited successfully on [chars]

Explanation  Port-profile:[chars] is de-inherited on [:chars]

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_DELETED: Port-profile [chars] is deleted successfully

Explanation  Port-profile:[chars] is deleted

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_DISABLED: Port-profile [chars] is disabled successfully

Explanation  Port-profile:[chars] is disabled

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_ENABLED: Port-profile [chars] is enabled successfully

Explanation  Port-profile:[chars] is enabled

Recommended Action  No action is required.

Error Message  PORT-PROFILE-6-PROFILE_INHERITED: Port-profile [chars] is inherited successfully on [chars]

Explanation  Port-profile:[chars] is inherited on [:chars]

Recommended Action  No action is required.

PORT-RESOURCES Messages

This section contains the PORT-RESOURCES messages.

PORT-RESOURCES-3

Error Message  PORT-RESOURCES-3-PRM_MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  No action is required.

PORT-RESOURCES-5

Error Message  PORT-RESOURCES-5-INVALID_PORT_ACTIV_PKG_LICENSE_FILE_INSTALLED: Invalid on demand port activation license file is installed for module [dec] (number of port licenses = [dec])

Explanation  Interfaces may not acquire port activation licenes during installation

Recommended Action  Install a valid port activation license file

PORT-SECURITY Messages

This section contains the PORT-SECURITY messages.

PORT-SECURITY-2

Error Message  PORT-SECURITY-2-ALLOC_FAILED: Memory allocation failed for size:[dec] for [chars]

Explanation  Memory allocation failed for size [dec] for [chars]

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-2-FEATURE_DISABLED: Feature [chars] disabled due to [chars]

Explanation  Feature [chars] is unavailable and will be disabled now

Recommended Action  Please install the correct license and reenable

Error Message  PORT-SECURITY-2-INIT_FAILURE: : [chars]

Explanation  FC Management initialisation has failed due to [chars].

Recommended Action  No action is required.

PORT-SECURITY-3

Error Message  PORT-SECURITY-3-BINDING_CONFLICT: [chars]

Explanation  An already logged in device is in conflict with the PSM active binding configurations. [chars] indicates the WWN of the login entity, interface

Recommended Action  For port-security, the auto-learn feature can be used with activation to prevent this. This violating device or switch will be logged out

Error Message  PORT-SECURITY-3-BINDING_VIOLATION: [chars]

Explanation  A login happend that violates PSM binding configurations [chars] indicates the WWN of the login entity

Recommended Action  Only entries in the activated database of PSM can login. Change the config and activate it again

Error Message  PORT-SECURITY-3-CFS_NOTIF_ERR: [chars]

Explanation  An error occurred during the processing of a CFS notification. [chars] indicates the actual cause for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-DB_ERR: [chars]

Explanation  An error occurred during an PSM database operation. [chars] indicates the reason for the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-EFMD_FC2_OPER_FAILED: [chars]

Explanation  EFMD fc2 operation failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-EFMD_INIT_FAILED: [chars]

Explanation  EFMD init failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-EFMD_MERGE_UNKNOWN_FORMAT: [chars]

Explanation  Received a corrupted EFMD Request Packet

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-FCID_CONV_ERR: : [chars]

Explanation  FC Management pwwn to fcid conversion has failed due to [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-INIT_FAIL: [chars]

Explanation  An error happened during PSM Initialization. [chars] indicates the reason for failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-LEARNT_BINDING_CONFLICT: [chars]

Explanation  An already logged in device that is learnt during activation is in conflict with the PSM active binding configurations. [chars] indicates the WWN of the login entity, interface

Recommended Action  Copy the active-db to config-db and reactivate. Not doing so could result in unexpected login rejects later on that interface.

Error Message  PORT-SECURITY-3-MAX_LIMIT_CROSSED: [chars]

Explanation  MGMT_SEC: Max Limit for the config has exceeded.[chars]

Recommended Action  No action is required.

Error Message  PORT-SECURITY-3-MS_DB_ERR: : [chars]

Explanation  FC Management db operation has failed due to [chars].

Recommended Action  No action is required.

Error Message  PORT-SECURITY-3-MS_DISABLE_ERR: [chars]

Explanation  An error occurred during an FC Management disable operation. [chars] indicates the operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-MS_ENABLE_ERR: [chars]

Explanation  An error occurred during an FC Management enable operation. [chars] indicates the operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-MTS_ERR: [chars]

Explanation  An error occurred in processing of an MTS message. [chars] indicates the error that occurred

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-PSS_ERR: [chars]

Explanation  An error occurred during an PSM PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-PSS_VER_FAIL: PSS file [chars] has version [dec].[dec].[dec], expected version [dec].[dec].[dec]

Explanation  There was a mismatch in the PSS version. [chars] indicates the PSS service, [dec].[dec].[dec] its current version number and [dec].[dec].[dec] the expected version

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-SDB_ERR: [chars]

Explanation  An error occurred during an FC Management sdb operation. [chars] indicates the operation that caused the error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PORT-SECURITY-3-SDB_UPDATE_ERR: : [chars]

Explanation  FC Management update has failed due to [chars].

Recommended Action  No action is required.

PORT-SECURITY-4

Error Message  PORT-SECURITY-4-ACTIVATION_FAIL: [chars]

Explanation  Activation of bindings failed due to [chars]

Recommended Action  Correct the error and reactivate it again

Error Message  PORT-SECURITY-4-MAX_LIMIT_REACHED: [chars]

Explanation  MGMT_SEC: Max Limit for the config has reached.[chars]

Recommended Action  No action is required.

Error Message  PORT-SECURITY-4-PSS_WARN: [chars]

Explanation  A failure occurred during a PSM PSS operation. [chars] indicates the PSS operation that caused the error

Recommended Action  No action is required.

PORT-SECURITY-6

Error Message  PORT-SECURITY-6-INFO: [chars]

Explanation  An event happend that affects PSM. [chars] indicates the event

Recommended Action  No action is required.

Error Message  PORT-SECURITY-6-MGMT_SEC_INFO: [chars]

Explanation  An event happend that affects FC Management. [chars] indicates the event

Recommended Action  No action is required.

PORT Messages

This section contains the PORT messages.

PORT-2

Error Message  PORT-2-IF_DOWN_ERROR_DISABLED: Interface [chars] is down (Error disabled) [chars] [chars]

Explanation  The interface encountered an error while configuring it. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using following commands 'config terminal', 'interface [char]', 'shutdown', 'no shutdown' on the interface or removing and re-inserting the fibre optic cable

Error Message  PORT-2-IF_DOWN_LINK_FAILURE_CRIT: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

PORT-3

Error Message  PORT-3-IF_SFP_ALARM: Interface [chars], [chars] [chars] [chars]

Explanation  There was an alarm on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  PORT-3-IF_TRANSCEIVER_READ_ERROR: Transceiver read error for interface [chars] [chars] [chars]

Explanation  Transceiver eeprom read failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Remove and insert the SFP back again. If the problem persists check if the transceiver is supported using the command: show interface transceiver. Please contact customer support to resolve the condition

Error Message  PORT-3-IF_UNSUPPORTED_TRANSCEIVER: Transceiver for interface [chars] is not supported

Explanation  Transceiver is not from an authorized vendor

Recommended Action  This command will determine the transceiver being used: show interface transceiver. Please contact customer support for a list of authorized transceiver vendors

PORT-4

Error Message  PORT-4-IF_NON_QUALIFIED_TRANSCEIVER: Non-qualified transceiver on interface [chars] was detected

Explanation  The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action  Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

Error Message  PORT-4-IF_SFP_CLK_RATE_ERROR: SFP clock rate error for interface [chars] [chars] [chars]

Explanation  SFP clock rate mismatch/failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Remove the SFP and insert a new one with a different frequency type. If the problem persists check if the transceiver is supported using the command: show interface transceiver. Please contact customer support to resolve the condition

Error Message  PORT-4-IF_SFP_WARNING: Interface [chars], [chars] [chars] [chars]

Explanation  There was an warning on the transceiver module. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  PORT-4-IF_TRUSTSEC_VIOLATION: Interface [chars] encountered port security violation [chars] [chars]

Explanation  The port has detected port security violation. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check port security configs on interface

PORT-5

Error Message  PORT-5-EC_DISABLED_AS_LICENSE_NOT_PRESENT: Extended credit feature has been disabled as Enterprise Package license could not be checked out

Explanation  The Enterprise Package license is not available, so the extened credit feature has been disabled even though it was present in startup config

Recommended Action  Install the Enterprise Package license and re-enable the extended credit feature

Error Message  PORT-5-IF_BRINGUP_ALLOWED_FCOT_CHECKSUM_ERR: Interface [chars] is allowed to come up even with SFP checksum error [chars] [chars]

Explanation  SFP checksum on this interface failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Try to replace the SFP on this interface

Error Message  PORT-5-IF_BRINGUP_FAILED_ALL_ZERO_PEER_WWN_RCVD: Interface [chars], is not allowed to come up (received as all zeros wwn from peer [chars] [chars]

Explanation  Check peer interface configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_BRINGUP_NOT_ALLOWED_PORT_CONFIG_FAILURE: Interface [chars] is not allowed to be operational due to port config failure for reason: [chars] ([hex]) [chars] [chars]

Explanation  Check interface configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Try to change the configuration on the interface with the current available hardware capability

Error Message  PORT-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down (Administratively down) [chars] [chars]

Explanation  Interface has been configured to be administratively down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform the following commands to bring up the interface: 'config terminal', 'interface [char]', 'no shutdown'

Error Message  PORT-5-IF_DOWN_BIT_ERR_RT_THRES_EXCEEDED: Interface [chars] is down (Error disabled - bit error rate too high) [chars] [chars]

Explanation  The port has detected too high bit error rate in frames received from attached device. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the attached device; replace it if needed

Error Message  PORT-5-IF_DOWN_BUNDLE_MISCFG: Interface [chars] is down (Isolation due to channel mis-configuration on local or remote switch) [chars] [chars]

Explanation  One port across a link is part of a PortChannel while the other is not. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  While adding or deleting a member port from a PortChannel, both ports across the link should be added/deleted. No operation should be performed on either ports until they are both added/deleted.

Error Message  PORT-5-IF_DOWN_CFG_CHANGE: Interface [chars] is down(Config change) [chars] [chars]

Explanation  FCIP interface temporarily down due to reconfiguration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_CHANNEL_ADMIN_DOWN: Interface [chars] is down (Channel admin down) [chars] [chars]

Explanation  This interface belongs to a PortChannel and the PortChannel is configured to be administratively down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform the following commands on the PortChannel interface to which it belongs to bring the interface up: 'config terminal', 'interface [char]', 'shutdown', 'no shutdown'

Error Message  PORT-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS: Interface [chars] is down (Channel membership update in progress) [chars] [chars]

Explanation  The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Retry the configuration again

Error Message  PORT-5-IF_DOWN_DENIED_DUE_TO_PORT_BINDING: Interface [chars] is down(Suspended due to port binding) [chars] [chars]

Explanation  The F port is suspended due to being denied by port binding. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the port binding database to allow the host port to log in.

Error Message  PORT-5-IF_DOWN_DOMAIN_ADDR_ASSIGN_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to domain id assignment failure) [chars] [chars]

Explanation  Isolated due to a failure while assigning a domain. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_ID_MISMATCH_ISOLATION: Interface [chars] is isolated (configured fcdomain ID is different from runtime config) [chars] [chars]

Explanation  The runtime fcdomain ID does not equal the static configured fcdomain ID. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the fcdomain ID configuration matches the runtime config.

Error Message  PORT-5-IF_DOWN_DOMAIN_INVALID_RCF_RECEIVED: Interface [chars] is down (Isolation due to invalid fabric reconfiguration) [chars] [chars]

Explanation  Invalid RCF received. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_MANAGER_DISABLED: Interface [chars] is down (Isolation due to domain manager disabled) [chars] [chars]

Explanation  Isolated due to domain manager being disabled. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE: Interface [chars] is down (Isolation due to domain manager other side not responding) [chars] [chars]

Explanation  Remote end domain manager not responding. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_NOT_ALLOWED_ISOLATION: Interface [chars] is isolated (domain not allowed) [chars] [chars]

Explanation  There aren't enough allowed domains to merge the VSANs across the link. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that all assigned domain id's are in the configured allowed domains on both sides of the link.

Error Message  PORT-5-IF_DOWN_DOMAIN_OTHER_SIDE_EPORT_ISOLATED: Interface [chars] is down (Isolation due to domain other side eport isolated) [chars] [chars]

Explanation  Isolating this interface due to the remote end being isolated. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to domain overlap) [chars] [chars]

Explanation  Isolated due to domain overlap. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_DPVM_VSAN_NOT_FOUND: Interface [chars] is down (dynamic vsan not present) [chars] [chars]

Explanation  The specified dynamic vsan is not configured on this switch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the dynamic vsan.

Error Message  PORT-5-IF_DOWN_DPVM_VSAN_SUSPENDED: Interface [chars] is down (dynamic vsan in suspended state) [chars] [chars]

Explanation  The specified dynamic vsan is in suspended state. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Un-suspend the dynamic vsan.

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_CLASSF_PARAM_ERR: Interface [chars] is down (Isolation due to ELP failure: class F param error) [chars] [chars]

Explanation  ELP failed on the interface due to class F param error. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_CLASSN_PARAM_ERR: Interface [chars] is down (Isolation due to ELP failure: class N param error) [chars] [chars]

Explanation  ELP failed on the interface due to class N param error. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_PAYLOAD_SIZE: Interface [chars] is down (Isolation due to ELP failure: invalid payload size)

Explanation  ELP failed on the interface due to invalid payload size

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_PORT_NAME: Interface [chars] is down (Isolation due to ELP failure: invalid port name) [chars] [chars]

Explanation  ELP failed on the interface due to invalid port name. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_SWITCH_NAME: Interface [chars] is down (Isolation due to ELP failure: invalid switch name) [chars] [chars]

Explanation  ELP failed on the interface due to invalid switch name. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_INVALID_TX_BBCREDIT: Interface [chars] is down (Isolation due to ELP failure: loopback detected) [chars] [chars]

Explanation  ELP failed on the interface due to loopback connection detected. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Connect to a port on another switch and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_LOOPBACK_DETECTED: Interface [chars] is down (Isolation due to ELP failure: invalid transmit B2B credit) [chars] [chars]

Explanation  ELP failed on the interface due to invalid transmit B2B credit. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_RATOV_EDTOV_MISMATCH: Interface [chars] is down (Isolation due to ELP failure: R_A_TOV or E_D_TOV mismatch) [chars] [chars]

Explanation  ELP failed on the interface due to R_A_TOV or E_D_TOV mismatch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure R_A_TOV and E_D_TOV values correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_REVISION_MISMATCH: Interface [chars] is down (Isolation due to ELP failure: revision mismatch) [chars] [chars]

Explanation  ELP failed on the interface due to revision mismatch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_UNKNOWN_FLOW_CTL_CODE: Interface [chars] is down (Isolation due to ELP failure: invalid flow control code) [chars] [chars]

Explanation  ELP failed on the interface due to invalid flow control code. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION_UNKNOWN_FLOW_CTL_PARAM: Interface [chars] is down (Isolation due to ELP failure: invalid flow control param) [chars] [chars]

Explanation  ELP failed on the interface due to invalid flow control param. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the attached switchport correctly and try again

Error Message  PORT-5-IF_DOWN_ELP_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ELP failure) [chars] [chars]

Explanation  ELP failed on the interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the output of 'show port internal info' in the 'ELP failure reason' field

Error Message  PORT-5-IF_DOWN_EPP_FAILURE: Interface [chars] is down (Error Disabled - EPP Failure) [chars] [chars]

Explanation  Trunk protocol failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  'show port internal event-history msgs' will indicate the trunk protocol exchanges to determine why it failed

Error Message  PORT-5-IF_DOWN_ESC_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ESC failure) [chars] [chars]

Explanation  ESC failed on the interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the output of 'show port internal event-history' to determine the ESC protocol exchanges to determine how it failed

Error Message  PORT-5-IF_DOWN_ETH_IF_DOWN: Interface [chars] is down(Tunnel port src interface down) [chars] [chars]

Explanation  Ethernet link to which the FCIP interface is bound is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the ethernet cable is connected, the interface is administratively enabled

Error Message  PORT-5-IF_DOWN_ETH_LINK_DOWN: Interface [chars] is down(Tunnel port src interface link down) [chars] [chars]

Explanation  Ethernet link to which the FCIP interface is bound is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the ethernet cable is connected and the remote end is also active

Error Message  PORT-5-IF_DOWN_FABRIC_BIND_FAILURE: Interface [chars] is down(Isolation due to fabric bind failure) [chars] [chars]

Explanation  Fabric binding failed on this port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the fabric binding database to ensure that the remote port is allowed to connect to this port

Error Message  PORT-5-IF_DOWN_FCOT_NOT_PRESENT: Interface [chars] is down (FCOT not present) [chars] [chars]

Explanation  The FCOT has been removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Insert an FCOT

Error Message  PORT-5-IF_DOWN_FCOT_REMOVED: Interface [chars] is down (FCOT has been removed) [chars] [chars]

Explanation  The FCOT has been removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Insert an FCOT

Error Message  PORT-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED: Interface [chars] is down (Error disabled - FCOT vendor not supported) [chars] [chars]

Explanation  FCOT inserted is not a supported one. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please contact customer support for a list of authorized transceiver vendors

Error Message  PORT-5-IF_DOWN_FCSP_AUTHENT_FAILURE: Interface [chars] is down (FC-SP authentication failure) [chars] [chars]

Explanation  The port failed FC-SP authentication with its peer. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the FC-SP configuration.

Error Message  PORT-5-IF_DOWN_FICON_BEING_ENABLED: Interface [chars] is down(FICON being enabled) [chars] [chars]

Explanation  FICON is being enabled on the port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please wait. This might take a while

Error Message  PORT-5-IF_DOWN_FICON_NOT_ENABLED: Interface [chars] is down(Error disabled - FICON not enabled) [chars] [chars]

Explanation  FICON not enabled on port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please enable FICON on port

Error Message  PORT-5-IF_DOWN_FICON_VSAN_DOWN: Interface [chars] is down(FICON vsan down) [chars] [chars]

Explanation  FICON is being enabled on the port VSAN of this port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This is an intermediary state, whereby the port VSAN of the port is being enabled to be a FICON VSAN.

Error Message  PORT-5-IF_DOWN_HW_FAILURE: Interface [chars] is down (Hardware Failure) [chars] [chars]

Explanation  The module's hardware has failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about failed module using command 'show module internal all module'

Error Message  PORT-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive) [chars] [chars]

Explanation  The port VSAN has been suspended or deleted. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Assign a new active port VSAN to the interface

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE: Interface [chars] is down (Error disabled - Incompatible admin port mode) [chars] [chars]

Explanation  The configured mode is not supported on this interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform a 'show port internal info' to determine the list of modes supported on this interface

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBBCREDIT: Interface [chars] is down (Error disabled - Incompatible admin port rxbbcredit) [chars] [chars]

Explanation  The configured receive B2B credit size is not supported. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Get the allowed receive B2B credit size from 'show port internal info'

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBUFSIZE: Interface [chars] is down (Error disabled - Incompatible admin port rxbufsize) [chars] [chars]

Explanation  The configured receive buffer size is not supported. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Get the allowed receive buffer size from 'show port internal info'

Error Message  PORT-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED: Interface [chars] is down (Error disabled - Incompatible admin port speed) [chars] [chars]

Explanation  The configured speed is not supported on this interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform a 'show port internal info' to determine the range of speed supported on this interface

Error Message  PORT-5-IF_DOWN_INITIALIZING: Interface [chars] is down (Initializing) [chars] [chars]

Explanation  The interface is in the process of coming up. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

Error Message  PORT-5-IF_DOWN_INTERFACE_REMOVED: Interface [chars] is down (Interface removed) [chars] [chars]

Explanation  Interface removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_INVALID_ATTACHMENT: Interface [chars] is down(Invalid attachment) [chars] [chars]

Explanation  The peer port does not have the compatible security attributes. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please ensure that the peer port has compatible security attributes as the local port.

Error Message  PORT-5-IF_DOWN_INVALID_CONFIG: Interface [chars] is down(Error disabled - Possible PortChannel misconfiguration) [chars] [chars]

Explanation  The local and peer port have a PortChannel membership misconfiguration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that both the local and peer ports are either both members of the same PortChannel or are not both part of PortChannel

Error Message  PORT-5-IF_DOWN_INVALID_FABRIC_BINDING: Interface [chars] is down(Invalid fabric binding exchange) [chars] [chars]

Explanation  Fabric binding failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check fabric binding database

Error Message  PORT-5-IF_DOWN_LINK_FAILURE: Interface [chars] is down (Link failure [chars]) [chars] [chars]

Explanation  The physical link has gone down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  PORT-5-IF_DOWN_LOCALLY_DISRUPTIVE_RECONFIGURATION: Interface [chars] is down (fcdomain applied a locally disruptive reconfiguration) [chars] [chars]

Explanation  Fcdomain applied a locally disruptive reconfiguration (local domain became invalid. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_LOOPBACK_DIAG_FAILURE: Interface [chars] is down (Diag failure) [chars] [chars]

Explanation  Diag failed on the interface. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about failed interface using command 'attach module' to connect to module

Error Message  PORT-5-IF_DOWN_LOOPBACK_ISOLATION: Interface [chars] is down (Isolation due to port loopback to same switch) [chars] [chars]

Explanation  The interface is looped back to another interface on the same switch. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  PORT-5-IF_DOWN_MODULE_REMOVED: Interface [chars] is down (module removed) [chars] [chars]

Explanation  Interface is down because the module was removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_NONE: Interface [chars] is down (None) [chars] [chars]

Explanation  There is no apparent reason the interface is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Collect more information about port using command 'show port internal all interface [char]' to determine why it went down

Error Message  PORT-5-IF_DOWN_NON_PARTICIPATING: Interface [chars] is down (Non participating) [chars] [chars]

Explanation  The loop port has been put into non participating mode. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_NOS_RCVD: Interface [chars] is down (NOS received) [chars] [chars]

Explanation  The physical link has gone down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  PORT-5-IF_DOWN_NO_TRUNK_OPER_VSANS_ISOLATION: Interface [chars] is down(Isolation due to no common vsans with peer on trunk) [chars] [chars]

Explanation  The trunk port is isolated as there are no common VSANs to be brought up with the peer port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check that there are common VSANs configured and allowed to come up between the ports.

Error Message  PORT-5-IF_DOWN_OFFLINE: Interface [chars] is down (Offline) [chars] [chars]

Explanation  The interface has been placed into the offline state. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_OHMS_EXTERNAL_LB_TEST: Interface [chars] is down(Loopback test) [chars] [chars]

Explanation  Loopback tests. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please wait. This might take a while

Error Message  PORT-5-IF_DOWN_OLS_RCVD: Interface [chars] is down (OLS received) [chars] [chars]

Explanation  The physical link has gone down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  PORT-5-IF_DOWN_PARENT_ADMIN_DOWN: Interface [chars] is down (Parent interface down) [chars] [chars]

Explanation  Parent interface is down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_PEER_CLOSE: Interface [chars] is down(TCP conn. closed by peer) [chars] [chars]

Explanation  The FCIP peer connected to this interface closed the TCP connection. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This command will provide the peer IP address of this FCIP interface: show interface. Check to see why the peer closed the TCP connection

Error Message  PORT-5-IF_DOWN_PEER_RESET: Interface [chars] is down(TCP conn. reset by peer) [chars] [chars]

Explanation  TCP connection to the FCIP peer got reset. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Check to see why the peer reset the TCP connection

Error Message  PORT-5-IF_DOWN_PORT_ACT_LICENSE_NOT_AVAILABLE: Interface [chars] is not allowed to come up (port activation license not available [chars] [chars]

Explanation  Assign a port activation license to this port or install additional port activation licenses as needed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_PORT_BIND_FAILURE: Interface [chars] is down(Isolation due to port bind failure) [chars] [chars]

Explanation  Port binding failed on this port. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the port binding database to ensure that the remote port is allowed to connect to this port

Error Message  PORT-5-IF_DOWN_PORT_BLOCKED: Interface [chars] is down(Port blocked due to FICON) [chars] [chars]

Explanation  The port has been blocked by FICON configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please unblock the port in FICON configuration.

Error Message  PORT-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface [chars] is down (No operational members) [chars] [chars]

Explanation  This is a PortChannel interface and all its members are operationally down. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Enable at least one of the PortChannel's members

Error Message  PORT-5-IF_DOWN_PORT_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to port VSAN mismatch) [chars] [chars]

Explanation  Isolated due to a mismatch in the configured port VSAN of the local and remote ends. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Configure the port VSAN of the local and remote interfaces to be the same and perform a 'shutdown' and a 'no shutdown'

Error Message  PORT-5-IF_DOWN_RCF_IN_PROGRESS: Interface [chars] is down (RCF in progress) [chars] [chars]

Explanation  There is an RCF in progress. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_SOFTWARE_FAILURE: Interface [chars] is down (Port software failure) [chars] [chars]

Explanation  The software servicing the data path on the port has failed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_SRC_MOD_NOT_ONLINE: Interface [chars] is down(Tunnel source module not online) [chars] [chars]

Explanation  Module that has the tunnel source port of this FCIP interface is not fully online. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The module that has the tunnel src port is coming online. Please use show mod to find module status

Error Message  PORT-5-IF_DOWN_SRC_PORT_NOT_BOUND: Interface [chars] is down (Tunnel port src interface unbound) [chars] [chars]

Explanation  Tunnel port source interface unbound. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_SRC_PORT_REMOVED: Interface [chars] is down(Tunnel src port removed) [chars] [chars]

Explanation  Tunnel source port of this FCIP interface has been removed. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

Error Message  PORT-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode) [chars] [chars]

Explanation  This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  PORT-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed) [chars] [chars]

Explanation  This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  PORT-5-IF_DOWN_SUSPENDED_BY_WWN: Interface [chars] is down (Suspended due to incompatible remote switch WWN) [chars] [chars]

Explanation  This interface belongs to a PortChannel and remote switch WWN of the interface is different from that of the PortChannel. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Ensure that this interface is connected to the same remote switch as all the other interfaces in the PortChannel

Error Message  PORT-5-IF_DOWN_SUSPENDED: Interface [chars] is down (Suspended) [chars] [chars]

Explanation  This interface belongs to a PortChannel and has been suspended to to an error while bringing it up. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  In most cases, you can recover using following commands 'config terminal', 'interface [char]', 'shutdown', 'no shutdown' on the interface. If this happens again obtain output of 'show port internal all interface [char]' on the interface

Error Message  PORT-5-IF_DOWN_TCP_KEEP_ALIVE_EXPIRED: Interface [chars] is down(TCP conn. closed - Keep alive expired) [chars] [chars]

Explanation  TCP session to the FCIP peer got closed due to loss of TCP keep alive. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  PORT-5-IF_DOWN_TCP_MAX_RETRANSMIT: Interface [chars] is down(TCP conn. closed - retransmit failure) [chars] [chars]

Explanation  Interface is down due to maximum retransmission failure. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  PORT-5-IF_DOWN_TCP_PERSIST_TIMER_EXPIRED: Interface [chars] is down(TCP conn. closed - Persist timer expired) [chars] [chars]

Explanation  TCP session to the FCIP peer closed because TCP persist timer expired. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  PORT-5-IF_DOWN_TOO_MANY_INTR: Interface [chars] is down (Error disabled - too many interrupts) [chars] [chars]

Explanation  The port has received too many interrupts in the hardware. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the attached device; replace it if needed

Error Message  PORT-5-IF_DOWN_TOO_MANY_INVALID_FLOGIS: Interface [chars] is down(Suspended due to too many invalid flogis [chars] [chars]

Explanation  The port is suspended due to receiving a large number of invalid FLOGI's. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Please check the HBA and perform a shut, followed by no shut on the port.

Error Message  PORT-5-IF_DOWN_UPGRADE_IN_PROGRESS: Interface [chars] is down (Linecard upgrade in progress) [chars] [chars]

Explanation  Upgrade of the linecard software is in progress. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_VIRTUAL_IVR_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to virtual IVR domain overlap) [chars] [chars]

Explanation  Isolated due to virtual IVR domain overlap. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to vsan mismatch) [chars] [chars]

Explanation  This is a trunking interface and the VSANs configured do not match with the VSANs configured on the remote end. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Check the VSANs configured on the local end with the remote end

Error Message  PORT-5-IF_DOWN_ZONE_MERGE_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to zone merge failure) [chars] [chars]

Explanation  Isolated due to a failure during zone merge. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_DOWN_ZONE_REMOTE_NO_RESP_ISOLATION: Interface [chars] is down (Isolation due to remote zone server not responding) [chars] [chars]

Explanation  Isolated due to remote zone server not responding. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_PORT_GUARD_DOWN: Interface [chars] is down ([chars]) [chars] [chars]

Explanation  The interface is down due to port guard configuration. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  Perform a shut followed by no shut to bring up the interface

Error Message  PORT-5-IF_PORT_QUIESCE_FAILED: Interface [chars] port quiesce failed due to failure reason: [chars] ([hex])

Explanation  There may be few packet drops due to this failure

Recommended Action  No action is required.

Error Message  PORT-5-IF_PSS_DUPLICATE_KEY: Duplicate key found for Interface [chars]

Explanation  Duplicate pss key detected

Recommended Action  No action is required.

Error Message  PORT-5-IF_TRUNK_DOWN: Interface [chars], vsan [chars] is down ([chars]) [chars] [chars]

Explanation  Interface [chars] is trunking, VSAN [chars] is down with reason in (). [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface VSAN

Error Message  PORT-5-IF_TRUNK_UP: Interface [chars], vsan [chars] is up [chars] [chars]

Explanation  Interface [chars] is trunking, VSAN [chars] is up. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-IF_UP: Interface [chars] is up [chars] [chars] [chars]

Explanation  Interface is up in mode specified, if applicable. [optionally if the port belongs to port-channel, the port-channel number to which the port belongs will be displayed and if interface description is configured, the interface description is displayed]

Recommended Action  No action is required.

Error Message  PORT-5-MODULE_BRINGUP_NOT_ALLOWED: Not allowing module [dec] to come up for reason: [chars] ([hex])

Explanation  Module is not allowed to be operational due to the current system state

Recommended Action  Use command "show module recovery-steps" and follow the steps described

Error Message  PORT-5-MODULE_INDEX_RESTORE_ERROR: Error in restoring indices for module [dec]: reason [chars] ([hex])

Explanation  Restore of module index may fail due to overlap of indices

Recommended Action  No action is required.

Error Message  PORT-5-MODULE_UNLIMITED_OSM_SEQ_FAILED: Enable/Disable of unlimited oversubscription failed for module [dec]

Explanation  Interfaces of the module may be in indeterminate state

Recommended Action  Reload the module

PRIVATE_VLAN Messages

This section contains the PRIVATE_VLAN messages.

PRIVATE_VLAN-2

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_DOWN_FAILED: Failed to bring down the association between [dec] & [dec]

Explanation  Association bringdown failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ASSOC_UP_FAILED: Failed to bring up the association between [dec] & [dec]

Explanation  Association bringup failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_MTS_SEND_FAILED: MTS send failed while communicating with ELTM.

Explanation  ELTM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ELTM_TIMED_OUT: ELTM timed out while configuring hardware.

Explanation  ELTM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_ETHPM_TIMED_OUT: ETHPM timed out while configuring/unconfiguring hardware

Explanation  ETHPM timed out

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_ASSOCIATE_PRIMARY_WITH_SECONDARY_VLAN: Failed to bring up the association between [dec] & [dec]

Explanation  Association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_REMOVE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring down the association between [dec] & [dec]

Explanation  Fail to remove association between primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_COMMUNICATE_VLAN_ASSOCIATION_TO_ELTM: Failed to bring up the association between [dec] & [dec]

Explanation  Failed to associate primary and secondary vlan due to an error returned by eltm manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_FAIL_TO_REMOVE_ASSOCIATION_BETWEEN_PRIMARY_AND_SECONDARY_VLAN: Failed to bring down the association between [dec] & [dec]

Explanation  Removing association between primary and secondary vlan failed due to an error returned by vlan manager

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_HW_ERROR: Error [hex] occurred for ifindex [hex] while programming hardware: [chars]

Explanation  Hardware Configuration Error

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_MTS_SEND_FAILED: MTS send failed while communicating with PIXM

Explanation  PIXM MTS send failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-2-PVLAN_PIXM_TIMED_OUT: PIXM timed out while configuring hardware.

Explanation  PIXM timed out

Recommended Action  No action is required.

PRIVATE_VLAN-3

Error Message  PRIVATE_VLAN-3-PVLAN_ASSOC_SDB_UPDATE_FAILED: Failed to update SDB while [chars] association for vlan [dec]

Explanation  SDB Update failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_IN_USE: PVLAN [dec] in use by interface [chars], please do "no switchport access vlan" or "no switchport private-vlan host-association"

Explanation  PVLAN in use

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_NOT_PRIMARY_VLAN: VLAN [dec] is not a primary vlan. Invalid operation.

Explanation  We cant remove association from secondary vlan

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_SEC_VLAN_NOT_EXIST: VLAN [dec] is not associated with primary VLAN [dec]

Explanation  This secondary vlan is not associated with primary vlan

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-3-PVLAN_VLANMGR_FAILURE: Cannot restore association operational state. Failed to communicate with VLAN manager

Explanation  Restoring association operational status failed

Recommended Action  No action is required.

PRIVATE_VLAN-5

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLED: PVLAN Disabled

Explanation  PVLAN Service Disabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_DISABLE_FAILED: Disabling of private-vlan failed. Either shutdown these ports or remove the ports that are in switchport mode private-vlan: [chars]

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_ENABLED: PVLAN Enabled

Explanation  PVLAN Service Enabled

Recommended Action  No action is required.

Error Message  PRIVATE_VLAN-5-PVLAN_VTP_DISABLE_FAILED: Either remove all private-vlans from VTP domain or change VTP to transparent mode

Explanation  Disabling of private-vlan failed

Recommended Action  No action is required.

PROFILER Messages

This section contains the PROFILER messages.

PROFILER-0

Error Message  PROFILER-0-EMERGENCY_MSG: [chars]

Explanation  Profiler Emergency Message

Recommended Action  Please file the bug for Profiler Library Component thro' CDETS

PROFILER-1

Error Message  PROFILER-1-ALERT_MSG: [chars]

Explanation  Profiler Alert Message

Recommended Action  Profiler Internal Operation Alert

PROFILER-2

Error Message  PROFILER-2-CRITICAL_MSG: [chars]

Explanation  Profiler Critical Message

Recommended Action  No action is required.

PROFILER-3

Error Message  PROFILER-3-ERROR_MSG: [chars]

Explanation  Profiler Error Message

Recommended Action  No action is required.

PROFILER-4

Error Message  PROFILER-4-WARN_MSG: [chars]

Explanation  Profiler Warning Message

Recommended Action  No action is required.

PROFILER-5

Error Message  PROFILER-5-NOTIF_MSG: [chars]

Explanation  Profiler Notification Message

Recommended Action  No action is required.

PROFILER-6

Error Message  PROFILER-6-INFO_MSG: [chars]

Explanation  Profiler Informational Message

Recommended Action  No action is required.

PROFILER-7

Error Message  PROFILER-7-DEBUG_MSG: [chars]

Explanation  Profiler Debug Message

Recommended Action  No action is required.

PSSHELPER_GSVC Messages

This section contains the PSSHELPER_GSVC messages.

PSSHELPER_GSVC-2

Error Message  PSSHELPER_GSVC-2-PSS_HELPER_MTS_FAIL: Failed to do MTS operation: [chars].

Explanation  Failed to do MTS operation. [chars] is the reason.

Recommended Action  Reload module to recover

PSSHELPER_GSVC-7

Error Message  PSSHELPER_GSVC-7-PSS_HELPER_BADFLAG: PSS Helper: [chars]

Explanation  PSSHelper received a bad flag for bind/unbind request

Recommended Action  No action is required.

PSS Messages

This section contains the PSS messages.

PSS-0

Error Message  PSS-0-PSS_NO_MORE_PAGES: [chars]: needs more working pages

Explanation  Service needs more working page buffers

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PSS-0-PSS_NO_MORE_RSM_PAGES: [chars]: needs more rsm pages

Explanation  Service needs more rsm page buffers

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  PSS-0-PSS_READ_DATA_FAILURE: [chars]: failed to read data to [chars] block [dec]: [chars]

Explanation  PSS cannot read data

Recommended Action  No action is required.

Error Message  PSS-0-PSS_SYNC_DATA_FAILURE: [chars]: failed to sync data to [chars]: [chars]

Explanation  PSS cannot sync data due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_SYNC_LOG_FAILURE: [chars]: failed to sync log: [chars]

Explanation  PSS cannot sync log due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_UNKNOWN_LOG: [chars]: unknown log type [hex] at offset [dec]

Explanation  Unknown logging entry found

Recommended Action  No action is required.

Error Message  PSS-0-PSS_WRITE_DATA_FAILURE: [chars]: failed to write data to [chars] block [dec]: [chars]

Explanation  PSS cannot write data due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_WRITE_FAILURE: [chars]: failed to write data: [chars]

Explanation  PSS cannot write data due to filesystem or disk error

Recommended Action  No action is required.

Error Message  PSS-0-PSS_WRITE_LOG_FAILURE: [chars]: failed to write log: [chars]

Explanation  PSS cannot write log due to filesystem or disk error

Recommended Action  No action is required.

PSS-1

Error Message  PSS-1-PSS_INVALID_MAGIC: [chars]: database [chars] has invalid magic number [hex]

Explanation  PSS found a corrupted database with invalid magic number

Recommended Action  No action is required.

Error Message  PSS-1-PSS_META_READ_ERROR: [chars]: cannot read meta page from [chars]: [chars]

Explanation  PSS cannot read meta page of a database

Recommended Action  No action is required.

Error Message  PSS-1-PSS_STAT_ERROR: [chars]: cannot stat [chars]: [chars]

Explanation  PSS cannot do fstat on a database

Recommended Action  No action is required.

Error Message  PSS-1-PSS_VERSION_MISMATCH: [chars]: found version mismatch in [chars]

Explanation  PSS found a database whose format it cannot interpret due to version mismatch

Recommended Action  The image upgrade was not done properly; write erase should cure it as a last step

PSS-2

Error Message  PSS-2-PSS_ERROR: [chars]

Explanation  PSS error log

Recommended Action  No action is required.

Error Message  PSS-2-PSS_INFRACONVERT: [chars]

Explanation  Error in libinfraconvert during pss conversion

Recommended Action  No action is required.

Error Message  PSS-2-PSS_INVALID_SIZE: [chars]: database [chars] ([chars]) has invalid size %ld (block size [dec])

Explanation  PSS found a database with invalid size - probably due to a crash

Recommended Action  No action is required.

Error Message  PSS-2-PSS_MISSING_FILE: [chars]: database [chars] missing [chars] file

Explanation  PSS database is incomplete; probably due to a crash

Recommended Action  No action is required.

Error Message  PSS-2-PSS_RECOVERY_FAILED: [chars]: failed to recover [chars]

Explanation  PSS recovery failed

Recommended Action  No action is required.

PSS-4

Error Message  PSS-4-PSS_CLEANUP: [chars]: cleaning up [chars]

Explanation  PSS removed a leftover or corrupted file

Recommended Action  No action is required.

Error Message  PSS-4-PSS_RECOVERY_ENDED: [chars]: recovered [chars] successfully

Explanation  PSS recovery finished

Recommended Action  No action is required.

Error Message  PSS-4-PSS_RECOVERY_STARTED: [chars]: recovering [chars]: [dec] valid transactional records

Explanation  PSS started recovery of previous aborted transaction

Recommended Action  No action is required.

PSS-5

Error Message  PSS-5-PSS_CONVERT_FORMAT: [chars]: converting pss format: [chars]

Explanation  PSS format is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_CONVERT_LAYOUT: [chars]: converting pss layout: [chars] (params [dec]/[dec]/[dec] -> [dec]/[dec]/[dec])

Explanation  PSS layout is being converted

Recommended Action  No action is required.

Error Message  PSS-5-PSS_SHRINK: [chars]: shrinking pss: [chars]

Explanation  PSS is being shrunk to remove free space

Recommended Action  No action is required.

Error Message  PSS-5-SDB_CLOSED_AT_COMMIT: [chars]: sdb [chars] is closed: token [dec] is not committed

Explanation  Publisher received SDB commit but sdb was already closed

Recommended Action  No action is required.

PTPLC Messages

This section contains the PTPLC messages.

PTPLC-3

Error Message  PTPLC-3-PTPLC_PORT_CFG_FAILED: Configuration failed on port [hex], [chars]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

Error Message  PTPLC-3-PTPLC_PTP_INTF_CONFIG_ERROR: Failed to configure PTP/PONG on port [dec]: [hex], [chars]

Explanation  PTP interface configuration error

Recommended Action  No action is required.

PTP Messages

This section contains the PTP messages.

PTP-2

Error Message  PTP-2-PTP_GM_CHANGE: Grandmaster clock has changed from [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] to [hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex]:[hex] for the PTP protocol

Explanation  PTP GM changed

Recommended Action  No action is required.

Error Message  PTP-2-PTP_INTF_DISABLED: PTP on interface [chars] is now DISABLED

Explanation  PTP is disabled on the interface

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SEND_FOLLOWUP: NOT sending FOLLOW_UP on interface:[chars]

Explanation  PTP not sending followup on interface

Recommended Action  No action is required.

Error Message  PTP-2-PTP_NO_SUPPORT_100G: PTP is NOT supported on 100G interface,remove ptp config on this intf for better time-sync

Explanation  PTP not supported on 100G intf

Recommended Action  No action is required.

Error Message  PTP-2-PTP_TIMESYNC_LOST: Lose sync with master clock

Explanation  PTP lose sync with master clock

Recommended Action  No action is required.

PTP-5

Error Message  PTP-5-PTP_DISABLED: PTP disabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

Error Message  PTP-5-PTP_DOMAIN_CHANGE: PTP domain changed to [dec]

Explanation  PTP domain changed

Recommended Action  No action is required.

Error Message  PTP-5-PTP_ENABLED: PTP enabled

Explanation  PTP Service Enabled

Recommended Action  No action is required.

PTP-6

Error Message  PTP-6-PTP_ANNOUNCE_INTERVAL_CHANGE: PTP announce interval for [hex] changed to [dec]

Explanation  PTP announce interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_ANNOUNCE_TIMEOUT_CHANGE: PTP announce timeout interval for [hex] changed to [dec]

Explanation  PTP announce timeout interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_DELAY_REQ_INTERVAL_CHANGE: PTP delay-req interval for [hex] changed to [dec]

Explanation  PTP delay-req interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY1_CHANGE: PTP priority1 changed to [dec]

Explanation  PTP priority1 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_PRIORITY2_CHANGE: PTP priority2 changed to [dec]

Explanation  PTP priority2 changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_SYNC_INTERVAL_CHANGE: PTP sync interval for [hex] changed to [dec]

Explanation  PTP sync interval for [chars] changed

Recommended Action  No action is required.

Error Message  PTP-6-PTP_TIMESYNC_REG_CHANGE: PTP time-sync register changed

Explanation  PTP time-sync reg change

Recommended Action  No action is required.

Error Message  PTP-6-PTP_VLAN_CHANGE: PTP vlan for [hex] changed to [dec]

Explanation  PTP vlan for [chars] changed

Recommended Action  No action is required.

PULSE Messages

This section contains the PULSE messages.

PULSE-0

Error Message  PULSE-0-EMERGENCY_MSG: [chars]

Explanation  Pulse Emergency Message

Recommended Action  Please file the bug for Pulse Library Component thro' CDETS

PULSE-1

Error Message  PULSE-1-ALERT_MSG: [chars]

Explanation  Pulse Alert Message

Recommended Action  Pulse Internal Operation Alert

PULSE-2

Error Message  PULSE-2-CRITICAL_MSG: [chars]

Explanation  Pulse Critical Message

Recommended Action  No action is required.

PULSE-3

Error Message  PULSE-3-ERROR_MSG: [chars]

Explanation  Pulse Error Message

Recommended Action  No action is required.

PULSE-4

Error Message  PULSE-4-WARN_MSG: [chars]

Explanation  Pulse Warning Message

Recommended Action  No action is required.

PULSE-5

Error Message  PULSE-5-NOTIF_MSG: [chars]

Explanation  Pulse Notification Message

Recommended Action  No action is required.

PULSE-6

Error Message  PULSE-6-INFO_MSG: [chars]

Explanation  Pulse Informational Message

Recommended Action  No action is required.

PULSE-7

Error Message  PULSE-7-DEBUG_MSG: [chars]

Explanation  Pulse Debug Message

Recommended Action  No action is required.

QOS Messages

This section contains the QOS messages.

QOS-2

Error Message  QOS-2-EXITING: Exit reason: [chars]

Explanation  The QOS Manager process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  QOS-2-GENERAL_ERROR: [chars]

Explanation  The QOS Manager has encountered an critical error. The description of error is [str.].

Recommended Action  No action is required.

Error Message  QOS-2-INITFAIL: QoS Manager Initialization failed: [chars]

Explanation  QoS Manager initialization failed. [chars] explains the reason for the failure.

Recommended Action  No action is required.

Error Message  QOS-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The QOS Manager could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  QOS-2-PSS_ERROR: [chars]: PSS returned value=[dec]

Explanation  The QOS Manager encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  QOS-2-STDOUT_ROTATE_FAILURE: Failed to rotate stdout file: [chars]

Explanation  The QOS Manager has failed to rotate its current stdout file with filename [str.]. The file size could grow beyond its maximum limit.

Recommended Action  No action is required.

QOS-3

Error Message  QOS-3-ALLOCFAIL: Heap Memory allocation failed: [chars]

Explanation  QoS Manager is out of dynamic memory. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-DBERROR: [chars]

Explanation  QoS Manager encountered a database error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-E_PORT_ACL_FAILURE: Failed to [chars] QOS ACL for interface [chars] (ACL return code=[hex])

Explanation  The QOS Manager has failed to program or erase QoS related ACL when an E-Port came up or went down for interface [str.]. The error code returned by ACL module is [int.].

Recommended Action  No action is required.

Error Message  QOS-3-FAILURE_RESPONSE: [chars] [hex]

Explanation  QoS Manager failed to get response [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-GENERROR: [chars]

Explanation  QoS Manager encountered a general error, one that does not fall in any of the above categories. [chars] describes the error and its context.

Recommended Action  No action is required.

Error Message  QOS-3-LICERR: [chars]

Explanation  QoS Manager failed to get license.

Recommended Action  No action is required.

Error Message  QOS-3-MTSERROR: [chars]

Explanation  QoS Manager encountered an MTS error. [chars] specifies the context where the error occurred.

Recommended Action  No action is required.

Error Message  QOS-3-PSSERROR: [chars]

Explanation  QoS Manager encountered a PSS error. [chars] specifies the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-QOS_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The QOS Manager has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

Error Message  QOS-3-TIMEOUT_ERROR: [chars] [hex]

Explanation  QoS Manager encountered a timeout [chars][hex] specify the context where the failure occurred.

Recommended Action  No action is required.

Error Message  QOS-3-UNKNOWN_MSG: Received from Node=[dec] SAP=[dec]

Explanation  The QOS Manager has received an unknown message from [dec]].[dec]. This information is for debugging only.

Recommended Action  No action is required.

QOS-4

Error Message  QOS-4-LICEXP: [chars]

Explanation  QoS Manager license is going to expire. [chars] gives the expected time of expiry.

Recommended Action  No action is required.

Error Message  QOS-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the QOS Manager and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

QOS-6

Error Message  QOS-6-BECAME_ACTIVE: Became ACTIVE from standby mode.

Explanation  The QOS Manager on the standby supervisor became active and it is ready to serve client requests.

Recommended Action  No action is required.

Error Message  QOS-6-BECAME_STDBY: Became STANDBY from active mode.

Explanation  The QOS Manager became standby from active mode.

Recommended Action  No action is required.

Error Message  QOS-6-DISABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has disabled marking of time-critical control traffic as high-priority traffic. Priority of such traffic is now not altered by QoS Manager.

Recommended Action  No action is required.

Error Message  QOS-6-ENABLED_UP_MARKING: [chars]

Explanation  The QoS Manager has enabled marking of time-critical control traffic as high-priority traffic.

Recommended Action  No action is required.

Error Message  QOS-6-EXCESSIVE_DELAY: [chars]

Explanation  Excessive time taken for a processing event. The description of the event is [str.].

Recommended Action  No action is required.

Error Message  QOS-6-E_PORT_ACL_SUCCESS: Successfully [chars] QOS ACL for interface [chars]

Explanation  The QOS Manager has successfully programmed or erased QoS related ACL when an E-Port came up or went down for interface [str.].

Recommended Action  No action is required.

Error Message  QOS-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The QOS Manager was unable to send heartbeat to the system manager.

Recommended Action  No action is required.

Error Message  QOS-6-GENERAL_EVENT: [chars]

Explanation  The QOS Manager has generated an important event. The description of the event is [str.].

Recommended Action  No action is required.

Error Message  QOS-6-MGRCREATED: QoS Manager created

Explanation  QoS Manager was created successfully and is up and running. This is an informational message.

Recommended Action  No action is required.

Error Message  QOS-6-MGREXIT: QoS Manager shutting down gracefully

Explanation  QoS Manager is shutting down gracefully. This is an informational message.

Recommended Action  No action is required.

Error Message  QOS-6-PSS_CREATED: [chars] PSS Created

Explanation  One of the persistent information database of QOS Manager has been recreated.

Recommended Action  No action is required.

Error Message  QOS-6-PSS_DESTROYED: [chars] PSS Destroyed

Explanation  One of the persistent information databases of QoS Manager has been intentionally destroyed and would be recreated.

Recommended Action  No action is required.

Error Message  QOS-6-SERVICE_UP: Initialized [chars]

Explanation  The QOS Manager is up and ready to accept client requests The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  QOS-6-SWITCHOVER: Switching Over to other Supervisor.

Explanation  The QOS Manager has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

Error Message  QOS-6-UNKNOWNMTS: QoS Manager received an unexpected message

Explanation  QoS Manager received an unexpected message.

Recommended Action  No action is required.

QUACK_SMC Messages

This section contains the QUACK_SMC messages.

QUACK_SMC-6

Error Message  QUACK_SMC-6-QUACK_LIB_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

RADIUS Messages

This section contains the RADIUS messages.

RADIUS-2

Error Message  RADIUS-2-RADIUS_NO_AUTHEN_INFO: ASCII authentication not supported

Explanation  ASCII authentication not supported.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RADIUS-2-RADIUS_PROGRAM_EXIT: RADIUS daemon exiting: [chars]

Explanation  RADIUS daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RADIUS-3

Error Message  RADIUS-3-RADIUS_ERROR_MESSAGE: [chars]

Explanation  RADIUS Error Message

Recommended Action  No action is required.

RADIUS-4

Error Message  RADIUS-4-RADIUS_WARNING: [chars]

Explanation  RADIUS Warning

Recommended Action  No action is required.

RADIUS-5

Error Message  RADIUS-5-RADIUS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Radius server monitor status change

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_NOTIFICATION: [chars]

Explanation  RADIUS Notification

Recommended Action  No action is required.

Error Message  RADIUS-5-RADIUS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Radius server status change

Recommended Action  No action is required.

RADIUS-6

Error Message  RADIUS-6-RADIUS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  RADIUS-6-RADIUS_MESSAGE: [chars]

Explanation  RADIUS Message

Recommended Action  No action is required.

RES_MGR Messages

This section contains the RES_MGR messages.

RES_MGR-1

Error Message  RES_MGR-1-RES_MGR_HA_ERR: RES_MGR Error: HA sync message received for resource [dec] which does not exist

Explanation  RES_MGR Received HA msg for resource which does not exist Please check standby status and restart standby to recover

Recommended Action  No action is required.

RES_MGR-2

Error Message  RES_MGR-2-RES_MGR_CONFLICTING_RESOURCE_KEYS: RES_MGR Critical Error: The [chars] resource key [dec] from node [dec] is conflicting with other nodes.

Explanation  The user should try and release the conflicting resource.

Recommended Action  No action is required.

Error Message  RES_MGR-2-RES_MGR_CRIT: RES_MGR Critical: [chars]

Explanation  RES_MGR generic critical condition

Recommended Action  No action is required.

Error Message  RES_MGR-2-RES_MGR_HA_PSS_ERR: RES_MGR Error: HA sync message received for resource [dec] with wrong pss type [dec]

Explanation  RES_MGR Received HA msg for resource which does not exist Please check standby status and restart standby to recover

Recommended Action  No action is required.

RES_MGR-3

Error Message  RES_MGR-3-RES_MGR_RES_ALREADY_EXCEEDED: RES_MGR Error: The VDC [dec] is currently already using more [chars] resources (total: [dec]) than the desired new maximum limit ([dec])

Explanation  A \limit-resource\ command was issued such that a VDC would be a forbidden state if we obeyed, having already allocated more resources than the new maximum limit

Recommended Action  No action is required.

Error Message  RES_MGR-3-RES_MGR_RES_MAX_LOWER_THAN_MIN: RES_MGR Error: The maximum limit for [chars] resources is not allowed to be less than the minimum limit

Explanation  A \limit-resource\ command was issued such that the desired maximum limit was lower than the desired minimum limit

Recommended Action  No action is required.

Error Message  RES_MGR-3-RES_MGR_RES_TOO_HIGH: RES_MGR Error: Limits for [chars] resources are not allowed to be set as high

Explanation  A \limit-resource\ command was issued such that a desired limit couldn't be satisfied because of static policies

Recommended Action  No action is required.

Error Message  RES_MGR-3-RES_MGR_RES_UNAVAIL: RES_MGR Error: Missing [dec] [chars] resources currently available to satisfy the minimum limit requested for vdc [dec]

Explanation  A \limit-resource\ command was issued such that the desired minimum limit couldn't be satisfied with the currently available resources

Recommended Action  No action is required.

RES_MGR-4

Error Message  RES_MGR-4-RES_MGR_MAX_ALLOWED_VDCS_HAS_DECREASED: RES_MGR Warning: The maximum number of allowed VDCs has decreased from [dec] to [dec] since binary config was saved.

Explanation  When startup config was saved, more VDCs were allowed in the system.

Recommended Action  No action is required.

Error Message  RES_MGR-4-RES_MGR_RES_ALREADY_EXCEEDED_BUT_NOT_ENFORCED: RES_MGR Warning: The VDC [dec] is currently already using more [chars] resources (total: [dec]) than the desired new maximum limit ([dec]) You may experience some route loss upon switchover, when the new limits will actually take effect.

Explanation  A \limit-resource\ command was issued such that a VDC may not have enough memory for holding the current amount of routing entries when the new limits will be enforced upon switchover

Recommended Action  No action is required.

Error Message  RES_MGR-4-RES_MGR_SC_PSS_PCW_NETADMIN: RES_MGR Notification: Performing partial config write for resource [chars] in vdc [dec]

Explanation  A \copy running-config startup-config\ command was issued from a local admin resource limits for the specified resource in the specified vdc had to be saved as a side-effect of it

Recommended Action  No action is required.

Error Message  RES_MGR-4-RES_MGR_SC_PSS_PCW: RES_MGR Notification: Performing partial config write for resource [chars]

Explanation  A \copy running-config startup-config\ command was issued from another VDC resource limits for the specified resource had to be saved as part of it

Recommended Action  No action is required.

Error Message  RES_MGR-4-RES_MGR_UNEXPECTED_MSG_LEN: RES_MGR Warning: The size of this message was expected to be [dec] ([dec] keys of [dec] size with a [dec] bytes header) and instead was [dec].

Explanation  A message of unexpected length was received.

Recommended Action  No action is required.

Error Message  RES_MGR-4-RES_MGR_VLAN_RESERVED_RANGE_UNAVAILABLE: RES_MGR Warning: System is running with limited functionality due to restricted reserved vlan range 3968-4047 should be 3968-4096.

Explanation  User should delete VLANS in range 4048-4093 and use following command: system vlan 3968 reserve

Recommended Action  No action is required.

RES_MGR-5

Error Message  RES_MGR-5-RES_MGR_DISABLED: RES_MGR Disabled

Explanation  RES_MGR Service Disabled

Recommended Action  No action is required.

Error Message  RES_MGR-5-RES_MGR_ENABLED: RES_MGR Enabled

Explanation  RES_MGR Service Enabled

Recommended Action  No action is required.

RES_MGR-6

Error Message  RES_MGR-6-RES_MGR_CONDITION_VERIFIED: RES_MGR info: error [hex] [[chars]] during sysmgrcb_vdc_handshake_done() for vdc [dec]

Explanation  RES_MGR is spotting some issue when VDC got created

Recommended Action  No action is required.

RIB Messages

This section contains the RIB messages.

RIB-0

Error Message  RIB-0-EMERG: [chars]

Explanation  Rib caused a system failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RIB-1

Error Message  RIB-1-ALERT: [chars]

Explanation  Rib caused failures in other services

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-1-LCM_FIB_ERR: RIB failed LC insertion

Explanation  RIB stopped linecard from coming online due to error received from FIB during merge operation

Recommended Action  Check RIB error logs to see error received from FIB

RIB-2

Error Message  RIB-2-CRIT: [chars]

Explanation  Rib encountered a catastrophic error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RIB-3

Error Message  RIB-3-ERR: [chars]

Explanation  Rib encountered an error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-FIB_EXIT: fib exited

Explanation  Fib had exited and may not continue operation

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-MISS_APPS: Missing response from service

Explanation  Service not responding to rib

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-3-NO_MEM: Out of memory

Explanation  Rib does not have enough memory to continue proper operation.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-SEND_FIB: Cannot talk to fib

Explanation  Rib to fib IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-SEND_SNMP: Cannot respond to snmp

Explanation  Rib to snmp IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  RIB-3-SEND_STANDBY: Cannot talk to standby rib

Explanation  Lost a rib-fib transaction log due to IPC failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

RIB-4

Error Message  RIB-4-CPU_HOG: Inactive or busy

Explanation  Either rib was not scheduled to run, or rib was busy, and rib did not service the message or timer queue for an extended period.

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-4-DUP_FIB: Duplicate response from fib

Explanation  Rib ignored duplicate response from fib

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-4-LATE_FIB: Late response from fib

Explanation  Rib ignored late response from fib

Recommended Action  Please perform 'debug rib error', then recreate the operation scenario, to find out more details.

Error Message  RIB-4-PC_LIMIT: PC number greater than 128 (ignored by RIB)

Explanation  Rib ignored pc > 128 for multicast

Recommended Action  Please use PC number < 128

Error Message  RIB-4-WARN: [chars]

Explanation  Rib ignored the unexpected condition

Recommended Action  Please perform 'debug rib all', then recreate the operation scenario, to find out more details.

RIB-5

Error Message  RIB-5-NOTE: [chars]

Explanation  Rib does not support this operation

Recommended Action  Please perform 'debug rib all', then recreate the operation scenario, to find out more details.

RIB-6

Error Message  RIB-6-INFO: [chars]

Explanation  Rib event occurred

Recommended Action  No action is required.

SAL Messages

This section contains the SAL messages.

SAL-5

Error Message  SAL-5-SAL_DISABLED: SAL Disabled

Explanation  SAL Service Disabled

Recommended Action  No action is required.

Error Message  SAL-5-SAL_ENABLED: SAL Enabled

Explanation  SAL Service nabled

Recommended Action  No action is required.

SCHEDULER Messages

This section contains the SCHEDULER messages.

SCHEDULER-2

Error Message  SCHEDULER-2-SCH_SYSLOG_MALLOC_ERR: Out of memory: [chars]

Explanation  Process memory exhausted. Possible memory leak.

Recommended Action  Contact TAC

Error Message  SCHEDULER-2-SCH_SYSLOG_MTS_ERR: MTS error: [chars]

Explanation  MTS operation failure

Recommended Action  Contact TAC

Error Message  SCHEDULER-2-SCH_SYSLOG_PSS_SNAPSHOT_ERR: Source URI:[chars] Destination URI:[chars] errcode:[dec]

Explanation  Error while performing snapshot I/O to PSS

Recommended Action  Contact TAC

Error Message  SCHEDULER-2-SCH_SYSLOG_SDWRAP_ERR: Debug infrastructure initialization failed: [chars]

Explanation  Debug infrastructure failed to initialize

Recommended Action  Contact TAC

SCHEDULER-3

Error Message  SCHEDULER-3-SCH_ERR: [chars]

Explanation  Scheduler error

Recommended Action  No action is required.

Error Message  SCHEDULER-3-SCH_SYSLOG_FILE_ERR: [chars] Error:[chars]

Explanation  File handling error

Recommended Action  No action is required.

Error Message  SCHEDULER-3-SCH_SYSLOG_PSS_ERR: Purpose:[chars] URI:[chars] Error:[dec]

Explanation  Error while performing I/O to PSS

Recommended Action  Contact TAC

Error Message  SCHEDULER-3-SCH_SYSLOG_USER_ERR: Description: Failed to execute job for user id [chars] Error:[dec]

Explanation  Error while attempting to execute job for user. Possibly, the user is removed from the system.

Recommended Action  Ensure the user exists. Make sure he is not a remotely authenticated user.

SCHEDULER-4

Error Message  SCHEDULER-4-SCH_WARN: [chars]

Explanation  Scheduler warning

Recommended Action  No action is required.

SCHEDULER-6

Error Message  SCHEDULER-6-SCH_MSG: [chars]

Explanation  Scheduler Message

Recommended Action  No action is required.

SECURITYD Messages

This section contains the SECURITYD messages.

SECURITYD-2

Error Message  SECURITYD-2-FEATURE_ENABLE_DISABLE: User [chars] has [chars] the feature [chars]

Explanation  User has enabled or disabled the feature

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_BYPASS_SELF_TEST_STATUS: FIPS Bypass self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRNG_SELF_TEST_STATUS: FIPS CRNG self-test status : [chars]

Explanation  Status of FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_CRYPTO_SELF_TEST_STATUS: FIPS [chars] Crypto self-test status : [chars]

Explanation  Status of FIPS [chars] self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_IMAGE_INTEGRITY_SELF_TEST_STATUS: FIPS Image Integrity self-test status : [chars]

Explanation  Status of FIPS [chars] self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_ERROR_MSG: [chars]

Explanation  Fips post Error Message

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_MAINTENANCE: FIPS Test failed. Moving to maintenance mode

Explanation  FIPS Test failed. Moving to maintenance mode

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POST_TEST_FAILED: FIPS crypto-test failure : [dec]

Explanation  FIPS crytpo-test failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TESTS_STATUS: FIPS power-up self-test status: [chars]

Explanation  Status FIPS self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_POWERUP_SELF_TEST_STATUS: FIPS [chars] power-up self-test status : [chars]

Explanation  Status of FIPS [chars] power-up self-test [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-FIPS_SELF_TEST_FAILED: FIPS self-test failure : [chars] : [chars]

Explanation  FIPS self-test failed [chars] for service [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-2-INVALID_ADMIN_PASSWD: User admin has NULL password. Copy r s aborted

Explanation  User admin has NULL password. Copy r s aborted

Recommended Action  No action is required.

Error Message  SECURITYD-2-PROGRAM_EXIT: security/accounting daemon exiting: [chars]

Explanation  Security/accounting daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SECURITYD-3

Error Message  SECURITYD-3-NVRAMFAILURE: nvram failure

Explanation  Nvram can not be read/written to. Hence accounting log can not be stored there

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SECURITYD-6

Error Message  SECURITYD-6-ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  SECURITYD-6-CHANGE_PASSWD: changing passwd for [chars]

Explanation  Changing passwd for [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-DELETE_STALE_USER_ACCOUNT: deleting expired user account:[chars]

Explanation  Deleting expired user account of [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET_FAILED: Error when setting FIPS mode : [chars]

Explanation  FIPS mode failed [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_MODE_SET: FIPS mode is [chars] for service [chars]

Explanation  FIPS mode is changed [chars] [chars]

Recommended Action  No action is required.

Error Message  SECURITYD-6-FIPS_POST_INFO_MSG: [chars]

Explanation  Fips post Information Message

Recommended Action  No action is required.

SENSOR_USD Messages

This section contains the SENSOR_USD messages.

SENSOR_USD-2

Error Message  SENSOR_USD-2-SNSM_SYSLOG_INIT_FAILED: Sensor Mgr Initialization failed. Component [chars]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-2-SNSM_SYSLOG_SHUTDOWN: Sensor Mgr process shutting down: [chars]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-2-SNSM_SYSYLOG_ALLOC_MEMORY: Sensor Mgr Memory allocation failed

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

SENSOR_USD-3

Error Message  SENSOR_USD-3-MSG_SNSM_SYS_MEM_ALOC_FAILURE: Sensor Mgr Error in allocing mem: [dec], Error code = [dec]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_API_CALL_FAILURE: Sensor Mgr Error in [chars] call errno=[dec]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYSLOG_BAD_MTS_MSG: Sensor Mgr Received bad MTS message: [dec]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYSLOG_MTS_PROCESS_ERROR: Sensor Mgr Error in processing MTS message: [dec], Error code = [hex]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYS_DEQUE_PENDING_QUE_FAILURE: Sensor Mgr Error in Dequing pend Que: %p, Error code = [hex]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYS_ENQUE_PENDING_QUE_FAILED: Sensor Mgr Error in queuing to pending queue: %p, Error code = [hex]

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

Error Message  SENSOR_USD-3-SNSM_SYS_MTS_RECV_FAILURE: Sensor Mgr Error in receving MTS mesg

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

SENSOR_USD-5

Error Message  SENSOR_USD-5-SNSM_SYSLOG_STARTING: Sensor Mgr process started

Explanation  Sensor Manager syslog message

Recommended Action  No action is required.

SENSOR Messages

This section contains the SENSOR messages.

SENSOR-0

Error Message  SENSOR-0-DC3_SENSOR_MSG: [chars]

Explanation  SENSOR log emergency message

Recommended Action  No action is required.

SENSOR-3

Error Message  SENSOR-3-DC3_SENSOR_MSG1: [chars]

Explanation  SENSOR log message

Recommended Action  No action is required.

SESSION-MGR Messages

This section contains the SESSION-MGR messages.

SESSION-MGR-2

Error Message  SESSION-MGR-2-DB_UNLOCK_FAILED: Failed to unlock the database for session:[chars]

Explanation  Session-Manager failed to unlock the database for session: [chars]

Recommended Action  No action is required.

SESSION-MGR-3

Error Message  SESSION-MGR-3-CSM_CFS_SEND_FAILED: CFS send failed. Error: '[chars]' '([hex])'

Explanation  CFS send status

Recommended Action  No action is required.

Error Message  SESSION-MGR-3-CSM_SP_DEL_FAILED: Switch-profile delete failed: '[chars]'

Explanation  Switch-profile deletion

Recommended Action  No action is required.

Error Message  SESSION-MGR-3-CSM_SP_PEER_TIMEOUT: Peer timed-out in sending next request

Explanation  Peer timeout

Recommended Action  No action is required.

Error Message  SESSION-MGR-3-SSN_ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  Session-mgr process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

SESSION-MGR-4

Error Message  SESSION-MGR-4-CSM_COMMIT_FAILED: Commit failed for switch-profile '[chars]' Session Type: '[chars]'

Explanation  Commit failed for the switch-profile

Recommended Action  Please identify the cause of the error and fix it

Error Message  SESSION-MGR-4-CSM_CREATE_CHECKPOINT_FAILED: Create-checkpoint failed: Name:'[chars]', retval: '[hex]'

Explanation  Create-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_DELETE_PROFILE_FAILED: Switch-profile deletion failed switch-profile '[chars]' Session type:'[chars]'

Explanation  Switch-profile deletion failed for the switch-profile

Recommended Action  Please identify the cause of the error and fix it

Error Message  SESSION-MGR-4-CSM_DEL_CHECKPOINT_FAILED: Del-checkpoint failed: Name:'[chars]'

Explanation  Del-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_FILE_BASED_ROLLBACK_FAILED: File-based rollback failed: Switch profile:'[chars]'

Explanation  File-based rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_PEER_INFO_NOT_FOUND: Peer [chars] is not yet configured in the switch-profile '[chars]'

Explanation  This peer is not yet configured in the switch-profile

Recommended Action  Please configure the peer in the switch-profile

Error Message  SESSION-MGR-4-CSM_ROLLBACK_FAILED: Rollback failed: Switch profile:'[chars]'

Explanation  Rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-4-CSM_VERIFY_FAILED: Verification failed for switch-profile '[chars]' Session type: '[chars]'

Explanation  Verification failed for the switch-profile

Recommended Action  Please identify the cause of the error and fix it

Error Message  SESSION-MGR-4-ISSU_FAILED: [chars] :[hex]

Explanation  Session manager failed ISSU because of:[string] and error: [hex]

Recommended Action  No action is required.

SESSION-MGR-6

Error Message  SESSION-MGR-6-CSM_CREATE_CHECKPOINT_SUCCESS: Create-checkpoint success: Name:'[chars]', checkpoint_id: '[dec]'

Explanation  Create-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_DEL_CHECKPOINT_SUCCESS: Delete-checkpoint successful: Name:'[chars]'

Explanation  Del-checkpoint status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_FILE_BASED_ROLLBACK_SUCCESS: File-based rollback successful: Switch profile:'[chars]'

Explanation  File-based rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_LOCAL_SESSION_COMPLETE: [chars]: Name '[chars]' Type:'[chars]' Subtype:'[chars]' Local status:'[chars]'

Explanation  Completed local session info

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_ROLLBACK_SUCCESS: Rollback successful: Switch profile:'[chars]'

Explanation  Rollback status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SESSION_COMPLETE: [chars]: Name '[chars]' Type:'[chars]' Subtype:'[chars]' Local status:'[chars]' Peer:'[chars]' Peer status:'[chars]'

Explanation  Completed session info

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SESSION_INIT: Initiating a session. [chars]: Profile name:'[chars]' Type:'[chars]' Subtype:'[chars]' Peer [chars]

Explanation  Iniitating a session

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_DELETE_IN_PROGRESS: Switch-profile delete in progress: switch-profile: '[chars]'

Explanation  Switch-profile delete status

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_DEL_SUCCESS: Switch-profile delete succeeded: '[chars]'

Explanation  Switch-profile deletion

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_LOCAL_DELETE: [chars]: Name '[chars]' Type:'[chars]' Subtype:'[chars]' Peer:'[chars]'

Explanation  Received switch-profile delete local-config

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_PEER_ADD: Received peer-add for peer-ip: '[chars]'

Explanation  Peer addition

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_PEER_DEL: Received peer-delete for peer-wwn: '[chars]'

Explanation  Peer deletion

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_SP_REMOTE_PEER_DELETE: Peer has been unconfigured on remote switch: Peer-ip: '[chars]'

Explanation  Received peer delete from remote switch

Recommended Action  No action is required.

Error Message  SESSION-MGR-6-CSM_UNKNOWN_SESSION_TYPE: Attempt to initiate unknown session. Profile name:'[chars]' Type:'[dec]' Subtype:'[dec]' Peer:'[chars]'

Explanation  Iniitating a session

Recommended Action  No action is required.

SFLOW Messages

This section contains the SFLOW messages.

SFLOW-3

Error Message  SFLOW-3-NO_MBUF: Failed to allocate mbuf [chars]

Explanation  The sFlow process has run out of network buffers

Recommended Action  No action is required.

Error Message  SFLOW-3-SFLOW_AGENT_LOG_ERR: sFlow agent error: [chars]

Explanation  SFlow agent error

Recommended Action  No action is required.

Error Message  SFLOW-3-SFLOW_LOG_ERR: [chars]

Explanation  SFlow error

Recommended Action  No action is required.

SFLOW-4

Error Message  SFLOW-4-SFLOW_LOG_WARN: [chars]

Explanation  SFlow warning

Recommended Action  No action is required.

SFLOW-5

Error Message  SFLOW-5-SFLOW_DISABLED: SFLOW Disabled

Explanation  SFLOW Service Disabled

Recommended Action  No action is required.

Error Message  SFLOW-5-SFLOW_ENABLED: SFLOW Enabled

Explanation  SFLOW Service nabled

Recommended Action  No action is required.

SFLOW-6

Error Message  SFLOW-6-SFLOW_LOG_INFO: [chars]

Explanation  SFlow info

Recommended Action  No action is required.

SFLOW-7

Error Message  SFLOW-7-SFLOW_LOG_DEBUG: [chars]

Explanation  SFlow debug

Recommended Action  No action is required.

SIM Messages

This section contains the SIM messages.

SIM-2

Error Message  SIM-2-IF_CRITICAL_FAILURE: (Debug syslog)Critical failure: [chars], [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please follow instructions on the syslog.

Error Message  SIM-2-IF_DOWN_ERROR_DISABLED: Interface [chars] is down (Error disabled. Reason:[chars])

Explanation  The interface encountered an error while configuring it

Recommended Action  Collect more information about failed interface using command 'show port internal all interface [char]'. In most cases, you can recover using a 'shutdown' followed a 'no shutdown' on the interface or removing and re-inserting the fibre optic cable.

Error Message  SIM-2-IF_DOWN_LINK_FAILURE_CRIT: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  SIM-2-SEQ_TIMEOUT: Component [chars] timed out on response to opcode [chars] ([chars])

Explanation  Some component did not respond to a request in stipulated time.

Recommended Action  None

Error Message  SIM-2-SIM_TXN_EVSEQ_TIMER_EXPIRED: evseq [chars] timed out for transaction [chars] sap [chars] opcode [chars]

Explanation  Sim evseq timer expired

Recommended Action  No action is required.

Error Message  SIM-2-SIM_TXN_ROLLBACK_STARTED: from original transaction [chars] to rollback transaction [chars]

Explanation  Sim rollback started

Recommended Action  No action is required.

Error Message  SIM-2-SYSLOG_SIM_CRITICAL: Critical failure: [chars]

Explanation  There was a critical failure in the component.

Recommended Action  Please collect system tech-support

SIM-3

Error Message  SIM-3-IF_DOWN_CHANNEL_ERR_DISABLED: Interface [chars] is down (Channel error disabled)

Explanation  This interface belongs to a PortChannel and the PortChannel is error disabled

Recommended Action  Perform 'shut' and 'no shutdown' on the PortChannel interface that it belongs to

Error Message  SIM-3-IF_ERROR_VLANS_REMOVED: VLANs [chars] on Interface [chars] are removed from suspended state.

Explanation  The VLANs on an interface are being removed from the suspended state

Recommended Action  No action is required.

Error Message  SIM-3-IF_ERROR_VLANS_SUSPENDED: VLANs [chars] on Interface [chars] are being suspended. (Reason: [chars])

Explanation  The VLANs on an interface are being suspended due to some protocol action

Recommended Action  No action is required.

Error Message  SIM-3-IF_SFP_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  SIM-3-IF_SFP_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  SIM-3-IF_UNSUPPORTED_TRANSCEIVER: Transceiver on interface [chars] is not supported

Explanation  The transceiver for the interface specified in the error message is not a Cisco supported module

Recommended Action  Replace the module with a compatible transceiver. If the transceiver was purchased from Cisco, please contact Cisco TAC to get the transceiver replaced

Error Message  SIM-3-IF_XCVR_ALARM: Interface [chars], [chars]

Explanation  There was an alarm on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  SIM-3-IF_XCVR_ERROR: Interface [chars], [chars]

Explanation  There was an error on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

SIM-4

Error Message  SIM-4-IF_NON_QUALIFIED_TRANSCEIVER: Non-qualified transceiver on interface [chars] was detected

Explanation  The transceiver for the interface specified has not been qualified on this platform for this software release

Recommended Action  Replace the module with a supported transceiver. Contact Cisco TAC to get platform transceiver qualification details

Error Message  SIM-4-IF_SFP_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

Error Message  SIM-4-IF_XCVR_WARNING: Interface [chars], [chars]

Explanation  There was an warning on the transceiver module

Recommended Action  Please do show interface transceiver details to obtain more information

SIM-5

Error Message  SIM-5-IF_ADMIN_UP: Interface [chars] is admin up [chars]

Explanation  Interface is admin up

Recommended Action  No action is required.

Error Message  SIM-5-IF_BANDWIDTH_CHANGE: Interface [chars],bandwidth changed to [chars] Kbit

Explanation  Bandwidth of the interface (port channel) has changed and this change is updated

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_ADMIN_DOWN: Interface [chars] is down (Administratively down)

Explanation  Interface has been configured to be administratively down

Recommended Action  Perform 'no shutdown'

Error Message  SIM-5-IF_DOWN_CFG_CHANGE: Interface [chars] is down(Config change)

Explanation  FCIP interface temporarily down due to reconfiguration

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_CHANNEL_ADMIN_DOWN: Interface [chars] is down (Channel admin down)

Explanation  This interface belongs to a PortChannel and the PortChannel is configured to be administratively down

Recommended Action  Perform 'no shutdown' on the PortChannel interface that it belongs to

Error Message  SIM-5-IF_DOWN_CHANNEL_MEMBERSHIP_UPDATE_IN_PROGRESS: Interface [chars] is down (Channel membership update in progress)

Explanation  The interface belongs to a PortChannel and a configuration is being attempted on the interface while there is a configuration in progress on the PortChannel

Recommended Action  Retry the configuration again

Error Message  SIM-5-IF_DOWN_DOMAIN_ADDR_ASSIGN_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to domain id assignment failure)

Explanation  Isolated due to a failure while assigning a domain

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_DOMAIN_INVALID_RCF_RECEIVED: Interface [chars] is down (Isolation due to invalid fabric reconfiguration)

Explanation  Invalid RCF received

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_DOMAIN_MANAGER_DISABLED: Interface [chars] is down (Isolation due to domain manager disabled)

Explanation  Isolated due to domain manager being disabled

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_DOMAIN_MAX_RETRANSMISSION_FAILURE: Interface [chars] is down (Isolation due to domain manager other side not responding)

Explanation  Remote end domain manager not responding

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_DOMAIN_OTHER_SIDE_EPORT_ISOLATED: Interface [chars] is down (Isolation due to domain other side eport isolated)

Explanation  Isolating this interface due to the remote end being isolated

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_DOMAIN_OVERLAP_ISOLATION: Interface [chars] is down (Isolation due to domain overlap)

Explanation  Isolated due to domain overlap

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_ELP_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ELP failure)

Explanation  ELP failed on the interface

Recommended Action  Check the output of 'show port internal info' in the 'ELP failure reason' field

Error Message  SIM-5-IF_DOWN_EPP_FAILURE: Interface [chars] is down (Error Disabled - EPP Failure)

Explanation  Trunk protocol failed

Recommended Action  'show port internal event-history msgs' will indicate the trunk protocol exchanges to determine why it failed

Error Message  SIM-5-IF_DOWN_ESC_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to ESC failure)

Explanation  ESC failed on the interface

Recommended Action  Check the output of 'show port internal event-history' to determine the ESC protocol exchanges to determine how it failed

Error Message  SIM-5-IF_DOWN_ETH_IF_DOWN: Interface [chars] is down(Tunnel port src interface down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected, the interface is administratively enabled

Error Message  SIM-5-IF_DOWN_ETH_LINK_DOWN: Interface [chars] is down(Tunnel port src interface link down)

Explanation  Ethernet link to which the FCIP interface is bound is down

Recommended Action  Ensure that the ethernet cable is connected and the remote end is also active

Error Message  SIM-5-IF_DOWN_FCOT_NOT_PRESENT: Interface [chars] is down (FCOT not present)

Explanation  The FCOT has been removed

Recommended Action  Insert an FCOT

Error Message  SIM-5-IF_DOWN_FCOT_VENDOR_NOT_SUPPORTED: Interface [chars] is down (Error disabled - Fcot vendor not supported)

Explanation  Fcot inserted is not a supported one

Recommended Action  Please contact customer support for a list of authorized transceiver vendors

Error Message  SIM-5-IF_DOWN_HW_FAILURE: Interface [chars] is down (Hardware Failure)

Explanation  The module's hardware has failed

Recommended Action  Collect more information about failed module using command 'show module internal all module'

Error Message  SIM-5-IF_DOWN_INACTIVE: Interface [chars] is down (Inactive)

Explanation  The port VSAN has been suspended or deleted

Recommended Action  Assign a new active port VSAN to the interface

Error Message  SIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_MODE: Interface [chars] is down (Error disabled - Incompatible admin port mode)

Explanation  The configured mode is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the list of modes supported on this interface

Error Message  SIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBBCREDIT: Interface [chars] is down (Error disabled - Incompatible admin port rxbbcredit)

Explanation  The configured receive B2B credit size is not supported

Recommended Action  Get the allowed receive B2B credit size from 'show port internal info'

Error Message  SIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_RXBUFSIZE: Interface [chars] is down (Error disabled - Incompatible admin port rxbufsize)

Explanation  The configured receive buffer size is not supported

Recommended Action  Get the allowed receive buffer size from 'show port internal info'

Error Message  SIM-5-IF_DOWN_INCOMPATIBLE_ADMIN_SPEED: Interface [chars] is down (Error disabled - Incompatible admin port speed)

Explanation  The configured speed is not supported on this interface

Recommended Action  Perform a 'show port internal info' to determine the range of speed supported on this interface

Error Message  SIM-5-IF_DOWN_INITIALIZING: Interface [chars] is down (Initializing)

Explanation  The interface is in the process of coming up

Recommended Action  If the interface is stuck in this state for a while, check the output of 'show port internal event-history' to determine what it is waiting for

Error Message  SIM-5-IF_DOWN_INTERFACE_REMOVED: Interface [chars] is down (Interface removed)

Explanation  Interface removed

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_LINK_FAILURE: Interface [chars] is down (Link failure)

Explanation  The physical link has gone down

Recommended Action  Ensure that the cable is connected and the remote end is not shut down

Error Message  SIM-5-IF_DOWN_LOOPBACK_DIAG_FAILURE: Interface [chars] is down (Diag failure)

Explanation  Diag failed on the interface

Recommended Action  Collect more information about failed interface using command 'attach module' to connect to module

Error Message  SIM-5-IF_DOWN_LOOPBACK_ISOLATION: Interface [chars] is down (Isolation due to port loopback to same switch)

Explanation  The interface is looped back to another interface on the same switch

Recommended Action  Check the connectivity of this interface and ensure that it is connected to another switch

Error Message  SIM-5-IF_DOWN_MODULE_REMOVED: Interface [chars] is down (module removed)

Explanation  Interface is down because the module was removed

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_NONE: Interface [chars] is down ([chars])

Explanation  Interface is down with a possible reason.

Recommended Action  Collect more information about port using command 'show port internal info/event-history' to determine why it went down

Error Message  SIM-5-IF_DOWN_NON_PARTICIPATING: Interface [chars] is down (Non participating)

Explanation  The loop port has been put into non participating mode

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_OFFLINE: Interface [chars] is down (Offline)

Explanation  The interface has been placed into the offline state

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_PARENT_ADMIN_DOWN: Interface [chars] is down (Parent interface down)

Explanation  Parent interface is down

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_PEER_CLOSE: Interface [chars] is down(TCP conn. closed by peer)

Explanation  The FCIP peer connected to this interface closed the TCP connection

Recommended Action  This command will provide the peer IP address of this FCIP interface: show interface. Check to see why the peer closed the TCP connection

Error Message  SIM-5-IF_DOWN_PEER_RESET: Interface [chars] is down(TCP conn. reset by peer)

Explanation  TCP connection to the FCIP peer got reset

Recommended Action  The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Check to see why the peer reset the TCP connection

Error Message  SIM-5-IF_DOWN_PORT_CHANNEL_MEMBERS_DOWN: Interface [chars] is down (No operational members)

Explanation  This is a PortChannel interface and all its members are operationally down

Recommended Action  Enable at least one of the PortChannel's members

Error Message  SIM-5-IF_DOWN_PORT_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to port vsan mismatch)

Explanation  Isolated due to a mismatch in the configured port VSAN of the local and remote ends

Recommended Action  Configure the port VSAN of the local and remote interfaces to be the same and perform a 'shutdown' and a 'no shutdown'

Error Message  SIM-5-IF_DOWN_RCF_IN_PROGRESS: Interface [chars] is down (RCF in progress)

Explanation  There is an RCF in progress

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_SOFTWARE_FAILURE: Interface [chars] is down (Port software failure)

Explanation  The software servicing the data path on the port has failed

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_SRC_MOD_NOT_ONLINE: Interface [chars] is down(Tunnel source module not online)

Explanation  Module that has the tunnel source port of this FCIP interface is not fully online

Recommended Action  The module that has the tunnel src port is coming online. Please use show mod to find module status

Error Message  SIM-5-IF_DOWN_SRC_PORT_NOT_BOUND: Interface [chars] is down (Tunnel port src interface unbound)

Explanation  Tunnel port source interface unbound

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_SRC_PORT_REMOVED: Interface [chars] is down(Tunnel src port removed)

Explanation  Tunnel source port of this FCIP interface has been removed

Recommended Action  The src interface with ip address that matches the ip address of the bound entity is removed. This happens normally due to the module on which the src interface exists is removed

Error Message  SIM-5-IF_DOWN_SUSPENDED_BY_MODE: Interface [chars] is down (Suspended due to incompatible mode)

Explanation  This interface belongs to a PortChannel and operational mode of the interface is different from that of the PortChannel

Recommended Action  Change the mode and the trunking mode of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  SIM-5-IF_DOWN_SUSPENDED_BY_SPEED: Interface [chars] is down (Suspended due to incompatible speed)

Explanation  This interface belongs to a PortChannel and operational speedode of the interface is different from that of the PortChannel

Recommended Action  Change the speed of the PortChannel from 'auto' and check to ensure that the remote end of the interface also belongs to the same PortChannel

Error Message  SIM-5-IF_DOWN_SUSPENDED_BY_WWN: Interface [chars] is down (Suspended due to incompatible remote switch WWN)

Explanation  This interface belongs to a PortChannel and remote switch WWN of the interface is different from that of the PortChannel

Recommended Action  Ensure that this interface is connected to the same remote switch as all the other interfaces in the PortChannel

Error Message  SIM-5-IF_DOWN_SUSPENDED: Interface [chars] is down (Suspended)

Explanation  This interface belongs to a PortChannel and has been suspended due to an error while bringing it up

Recommended Action  Perform a 'shutdown' and a 'no shutdown'. If this happens again obtain output of 'show port internal info/event-history' on the interface

Error Message  SIM-5-IF_DOWN_TCP_KEEP_ALIVE_EXPIRED: Interface [chars] is down(TCP conn. closed - Keep alive expired)

Explanation  TCP session to the FCIP peer got closed due to loss of TCP keep alive

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  SIM-5-IF_DOWN_TCP_MAX_RETRANSMIT: Interface [chars] is down(TCP conn. closed - retransmit failure)

Explanation  Interface is down due to maximum retransmission failure

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  SIM-5-IF_DOWN_TCP_PERSIST_TIMER_EXPIRED: Interface [chars] is down(TCP conn. closed - Persist timer expired)

Explanation  TCP session to the FCIP peer closed because TCP persist timer expired

Recommended Action  This may be due to loss of IP connectivity. The following commands will provide the IP address of the peer and the route used connect to this FCIP peer: show interface, show ip route. Please do a trace route to check the connectivity to the peer using command:traceroute ipaddr

Error Message  SIM-5-IF_DOWN_UPGRADE_IN_PROGRESS: Interface [chars] is down (Linecard upgrade in progress)

Explanation  Upgrade of the linecard software is in progress

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_VRF_UNUSABLE: Interface [chars] is down (Vrf down)

Explanation  The vrf for which this interface is a member is removed

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_VSAN_MISMATCH_ISOLATION: Interface [chars] is down (Isolation due to vsan mismatch)

Explanation  This is a trunking interface and the VSANs configured do not match with the VSANs configured on the remote end

Recommended Action  Check the VSANs configured on the local end with the remote end

Error Message  SIM-5-IF_DOWN_ZONE_MERGE_FAILURE_ISOLATION: Interface [chars] is down (Isolation due to zone merge failure)

Explanation  Isolated due to a failure during zone merge

Recommended Action  No action is required.

Error Message  SIM-5-IF_DOWN_ZONE_REMOTE_NO_RESP_ISOLATION: Interface [chars] is down (Isolation due to remote zone server not responding)

Explanation  Isolated due to remote zone server not responding

Recommended Action  No action is required.

Error Message  SIM-5-IF_DUPLEX: Interface [chars], operational duplex mode changed to [chars]

Explanation  Operational duplex mode has changed when link came up

Recommended Action  No action is required.

Error Message  SIM-5-IF_ERRDIS_RECOVERY: Interface [chars] is being recovered from error disabled state (Last Reason:[chars])

Explanation  Interface is being recovered from error disabled state

Recommended Action  No action is required.

Error Message  SIM-5-IF_HARDWARE: Interface [chars], hardware type changed to [chars]

Explanation  There was a change in the hardware characteristic of an interface, such as a transceiver module plugged in or removed

Recommended Action  No action is required.

Error Message  SIM-5-IF_L2MP_MODE: Interface [chars], l2mp-mode changed to [chars]

Explanation  The l2mp-mode on the port has changed

Recommended Action  No action is required.

Error Message  SIM-5-IF_RX_FLOW_CONTROL: Interface [chars], operational Receive Flow Control state changed to [chars]

Explanation  Operational receive flow control has changed when link came up

Recommended Action  No action is required.

Error Message  SIM-5-IF_TRUNK_DOWN: Interface [chars], vlan [chars] down

Explanation  Interface [chars] is trunking, VLANs [chars] are down

Recommended Action  The following commands will help determine why this VSAN is down on this interface: show interface, show port internal info interface VSAN, show port internal event-history interface vsan

Error Message  SIM-5-IF_TRUNK_UP: Interface [chars], vlan [chars] up

Explanation  Interface [chars] is trunking, VLANs [chars] are up

Recommended Action  No action is required.

Error Message  SIM-5-IF_TX_FLOW_CONTROL: Interface [chars], operational Transmit Flow Control state changed to [chars]

Explanation  Operational transmit flow control has changed when link came up

Recommended Action  No action is required.

Error Message  SIM-5-IF_UP: Interface [chars] is up [chars]

Explanation  Interface is up in mode specified, if applicable

Recommended Action  No action is required.

Error Message  SIM-5-SPEED: Interface [chars], operational speed changed to [chars]

Explanation  Operational speed has changed when link came up

Recommended Action  No action is required.

Error Message  SIM-5-STORM_CONTROL_ABOVE_THRESHOLD: Traffic in port [chars] exceeds the configured threshold [chars]

Explanation  Traffic on specified port is beyond the configured storm-control threshold, and the excess traffic is being dropped

Recommended Action  Identify source of traffic storm

Error Message  SIM-5-STORM_CONTROL_BELOW_THRESHOLD: Traffic in port [chars] has fallen below the configured threshold [chars]

Explanation  Traffic on specified port has returned to within configured storm-control threshold

Recommended Action  No action is required.

SISF Messages

This section contains the SISF messages.

SISF-2

Error Message  SISF-2-PSS_OP: [chars] [chars]

Explanation  A PSS operation was performed

Recommended Action  This is an informationnal message

Error Message  SISF-2-SISF_INIT_FAIL: [chars] [chars] : [chars]

Explanation  An error occurred during initialization

Recommended Action  LOG_STD_ACTION

SISF-3

Error Message  SISF-3-INTERNAL: Internal error, [chars]

Explanation  An internal software error occurred.

Recommended Action  LOG_STD_ACTION

SISF-4

Error Message  SISF-4-DATA_GLEAN_NOTIF_RECEIVED: No binding for [chars]

Explanation  A data packet notification has been received because a snooping policy with the data glean option is configured and the Source address of the packet is not currently in the Binding Table.

Recommended Action  There are valid scenarios where the binding \n could not be learned (e.g. control packet was lost) \n or the binding is lost (e.g. switch reboot). \n Conversely, it could also be the case that an unauthorized \n Source Address is trying to generate traffic, in which case \n this should be investigated further to determine if the host \n on this particular interface needs to be disconnected.

Error Message  SISF-4-ENTRY_BLOCKED: Entry blocked [chars]

Explanation  An attempt to install an entry in the IPv6 binding table was blocked. This can be due to a conflicting entry or maximum number of entries reached

Recommended Action  If the maximum table size is reached, consider increasing it.\n If a conflicting entry already exist, this maybe an attempt \n to steal address ownership. You should investigate which host\n is connected on the interface and wether it should be disconnected

Error Message  SISF-4-IP_THEFT: IP Theft [chars]

Explanation  A duplicate IP address has been detected (IP theft) and blocked This can be due to a configuration error on end-device, an intentional IP theft or an IP movind too quickly

Recommended Action  If the existing entry is REACHABLE in the binding table, and it moved to a new port \n consider reducing the REACHABLE timer \n otherwise it is either an attack or a configuration issue that must be resolved

Error Message  SISF-4-MAC_THEFT: MAC Theft [chars]

Explanation  A duplicate MAC address has been detected (MAC theft) and blocked This can be due to a configuration error on end-device, an intentional MAC theft or MAC moving too quickly

Recommended Action  If the existing entry is REACHABLE in the binding table, and it moved to a new port \n consider reducing the REACHABLE timer \n otherwise it is either an attack or a configuration issue that must be resolved

Error Message  SISF-4-MAC__AND_IP_THEFT: MAC_AND_IP Theft [chars]

Explanation  A duplicate MAC and IP address has been detected (MAC_AND_IP theft) and blocked This can be due to a configuration error on end-device, an intentional MAC_AND_IP theft or MAC moving too quickly

Recommended Action  If the existing entry is REACHABLE in the binding table, and it moved to a new port \n consider reducing the REACHABLE timer \n otherwise it is either an attack or a configuration issue that must be resolved

Error Message  SISF-4-PAK_DROP: Message dropped [chars]

Explanation  A message was dropped because one of the IPv6 first-hop security features said so

Recommended Action  Look at the reason. It can either be a valid drop and the \n could go up to disconnect the host attached to the interface, \n or the policy configured on this interface is too severed \n and should be amended

Error Message  SISF-4-RESOLUTION_VETO: Resolution vetoed [chars]

Explanation  IPv6 Neighbor Discovery (ND) was about to resolve a target destination. SISF Destguard has vetoed this because the target is known not to be on-link.

Recommended Action  A low rate of vetoed resolutions is not serious. \n If there is a high rate of vetos this might suggest that \n the link is under attack. Investigate the source of the \n packets driving these resolution requests

SISF-5

Error Message  SISF-5-ENTRY_CHANGED: Entry changed [chars]

Explanation  An entry was changed in the binding table

Recommended Action  This is an informationnal message

Error Message  SISF-5-ENTRY_CREATED: Entry created [chars]

Explanation  An entry was created in the binding table

Recommended Action  This is an informationnal message

Error Message  SISF-5-ENTRY_DELETED: Entry deleted [chars]

Explanation  An entry was created in the binding table

Recommended Action  This is an informationnal message

Error Message  SISF-5-ENTRY_MAX_ORANGE: Reaching 80% of max adr allowed per [chars]

Explanation  A client is approaching red zone and might soon \n be blocked. The maximum value configured may be too low \n and you should consider increasing it. Or some of this client addresses are \n stale and you could clear them

Recommended Action  Sisf

SKSD Messages

This section contains the SKSD messages.

SKSD-2

Error Message  SKSD-2-SKSD_CRYPT_SERVICE_CRIT: Encryption-Service: [chars]

Explanation  Encryption Service critical errors.

Recommended Action  No action is required.

SKSD-3

Error Message  SKSD-3-SKSD_CRYPT_SERVICE_ERR: Encryption-Service: [chars]

Explanation  Encryption Service errors.

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_INIT_ERROR: Could not initialize FIPS mode : [chars]

Explanation  FIPS mode initialization error

Recommended Action  No action is required.

Error Message  SKSD-3-SKSD_FIPS_MODE_SELFTEST: FIPS POST for [chars] [chars]

Explanation  FIPS Selftest Result

Recommended Action  No action is required.

SKSD-4

Error Message  SKSD-4-SKSD_CRYPT_SERVICE_WARN: Encryption-Service: [chars]

Explanation  Encryption Service warnings.

Recommended Action  No action is required.

SKSD-5

Error Message  SKSD-5-SKSD_CRYPT_SERVICE_NOTICE: Encryption Service: [chars]

Explanation  Encryption Service updates.

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_EXIT: Keystore Application Exiting: [chars]

Explanation  Keystore Program exiting

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_FUNC: Keystore Operation: [chars]

Explanation  Keystore Event upon a receiving a request

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_INIT: Hardware Keystore Init done

Explanation  Hardware Keystore Init completed

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW_RESET: Hardware Reset :[chars]

Explanation  Hardware Reset

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_HW: Smartcard :[chars]

Explanation  Smartcard Presence

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_INIT: Keystore Application Init: [chars]

Explanation  Keystore Program Init

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_ADD: Key added

Explanation  Key added to keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_KEY_DELETE: Key deleted

Explanation  Key deleted from keystore

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_MKEY_INSTALL: Installing a Master Key on the smartcard(s)

Explanation  Installing a new Master Key on the smartcard(s)

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SUP_STATE: Supervisor card new state: [dec]

Explanation  Supervisor state change

Recommended Action  No action is required.

Error Message  SKSD-5-SKSD_SW_INIT: Software Keystore Init done

Explanation  Software Keystore Init completed

Recommended Action  No action is required.

SKSD-6

Error Message  SKSD-6-SKSD_CRYPT_SERVICE_INFO: Encryption Service: [chars]

Explanation  Encryption Service informational updates.

Recommended Action  No action is required.

SMARTC Messages

This section contains the SMARTC messages.

SMARTC-2

Error Message  SMARTC-2-APBR_CORRUPT: RISE APBR: in Corrupt State, RS IP: [chars], port: [dec], Proto: [dec], nhop IP: [chars], slot ID: [dec], vlan: [dec]. Reason: [chars].

Explanation  RMAP

Recommended Action  ACL cannot be completely deleted.

Error Message  SMARTC-2-DISCOVERY_CHANNEL_DOWN: service '[chars]' is down (slot id [dec]), Reason: [chars]

Explanation  See reason string in the error message with the following possibilities: 1. Error in bootstrap/health-monitoring response. 2. Timed out while waiting for bootstrap/health-monitoring response. 3. Failed to send bootstrap/health-monitorying message. 4. Control VLAN interface is not operational. 5. RISE interface [chars] is not operational. 6. RISE interface [chars] does not have control VLAN [dec] as trunk member. 7. Control VLAN ([dec]) interface does not have valid IP. 8. RISE port channel po [dec] has no member ports. 9. Failed to send vlan-group. 10. RISE IP [chars] is already assigned to another service, slot id [dec].

Recommended Action  Take corrective action per the reason

Error Message  SMARTC-2-LICENSE_EXPIRED: SmartChannel License: license grace-period expired. Please install NETWORK_SERVICES_PKG.

Explanation  License or grace-period has expired.

Recommended Action  Take steps to renew license. Feature will be disabled.

Error Message  SMARTC-2-LICENSE_MISSING_COPY_RS: SmartChannel license missing: NETWORK_SERVICES_PKG. Removing RISE config.

Explanation  SmartChannel license missing after NXOS version upgrade. Previous version ran RISE without a license.

Recommended Action  Acquire license or grace-period permission.

Error Message  SMARTC-2-LICENSE_MISSING_ISSU: SmartChannel license missing: NETWORK_SERVICES_PKG. Removing RISE config.

Explanation  SmartChannel license missing after ISSU. Previous version ran RISE without a license.

Recommended Action  Acquire license or grace-period permission.

Error Message  SMARTC-2-LICENSE_MISSING: SmartChannel license missing: NETWORK_SERVICES_PKG

Explanation  License does not exist when attempting to enable RISE feature.

Recommended Action  Acquire license or grace-period permission.

Error Message  SMARTC-2-SMARTC_LICENSE_EXPIRED: SmartChannel License: license grace-period expired. Please install NETWORK_SERVICES_PKG.

Explanation  License or grace-period has expired.

Recommended Action  Take steps to renew license. Feature will be disabled.

Error Message  SMARTC-2-SMARTC_LICENSE_MISSING: Feature SmartChannel license missing: NETWORK_SERVICES_PKG

Explanation  License does not exist when attempting to enable SmartChannel feature.

Recommended Action  Acquire license or grace-period permission.

SMARTC-3

Error Message  SMARTC-3-APBR_ACLMGR_ERROR: RISE APBR: ACL was not [chars], apbr payload: [chars].

Explanation  Acl was not created/deleted.

Recommended Action  Check TCAM resource limit, and the sys admin.

Error Message  SMARTC-3-APBR_INGRESS_INT_NOT_FOUND: RISE APBR: can't find the ingress interface for RS IP: [chars].

Explanation  7K cannot find a route to the real server.

Recommended Action  Check real server network reachablity in the current switch.

Error Message  SMARTC-3-APBR_PURGE_ERROR: RISE APBR: Purge failure, slot id: [dec].

Explanation  PBR entries for RISE cannot be deleted cleanly.

Recommended Action  Manually delete pbr entries.

Error Message  SMARTC-3-APBR_RPM_ERROR: RISE APBR: RPM returns internal error, rpm resp msg: [chars], apbr payload: [chars].

Explanation  Rmap step was not completed.

Recommended Action  Check TCAM resource limit, or rmap collision on the same interface, and the sys admin.

Error Message  SMARTC-3-RHI_ROUTE_ISSUE: RISE RHI: slot [dec] route [chars] cannot be [chars]. Reason:[chars].

Explanation  URIB dropped this RHI request. See reason string with the following possibilities: 1. SVI for data vlan [dec] does not exist. 2. SVI for data vlan [dec] is down. 3. urib issues.

Recommended Action  Take corrective action per the reason.

SMARTC-4

Error Message  SMARTC-4-APBR_MAX_LIMIT: RISE APBR: Reached max apbr entries [dec] per RISE. slot id: [dec].

Explanation  PBR entries for RISE cannot be deleted cleanly.

Recommended Action  Manually delete pbr entries.

Error Message  SMARTC-4-APBR_PBR_DISABLED: RISE APBR: feature PBR Disabled.

Explanation  APBR will not function correctly without pbr feature.

Recommended Action  Manually enable pbr feature.

Error Message  SMARTC-4-ISSU_PRE_UPGRADE_TIMEOUT: RISE ISSU: pre-upgrade timed out, reason: [chars].

Explanation  See the reason.

Recommended Action  Try again with the upgrade.

Error Message  SMARTC-4-ISSU_UNEXPECTED_SLOT_MSG: RISE ISSU: unexpected msg from slot [dec], opcode: [dec].

Explanation  Application should not send msg during ISSU. iSCM will ignore.

Recommended Action  No action is required.

Error Message  SMARTC-4-LICENSE_EXPIRING: SmartChannel License: NETWORK_SERVICES_PKG license expires in [dec] days [dec] hours [chars]econds.

Explanation  License or grace-period expiration warning.

Recommended Action  Take steps to renew license. Prepare for feature disable.

SMARTC-5

Error Message  SMARTC-5-NAM_CLI_ISSUE_CARD_ID: Module [dec] card type is NOT NAM!

Explanation  See the reason.

Recommended Action  Check show module to see which module is NAM.

Error Message  SMARTC-5-NAM_CLI_ISSUE_SC_ONLINE: Module [dec] not in SC_ONLINE

Explanation  See the reason.

Recommended Action  Check show module to see if app state is OK.

Error Message  SMARTC-5-NAM_CLI_ISSUE_SVC: Service cannot be found for the given module [dec]

Explanation  See the reason.

Recommended Action  Check the module using show service nam summary.

Error Message  SMARTC-5-TRANSPORT_ISSUE: RISE Transport: slot [dec] failed to send, reason : [chars].

Explanation  See the reason.

Recommended Action  Check the network connectivity and the appliance status.

SME_CPP Messages

This section contains the SME_CPP messages.

SME_CPP-2

Error Message  SME_CPP-2-IT_NEXUS_MAX_INTERFACE_LIMIT_REACHED: [chars] cannot be bound as the interfaces reached the maximum IT Nexus limit

Explanation  IT Load Balancing failed

Recommended Action  No action is required.

Error Message  SME_CPP-2-LOG_ERR_SME_CTRL_LUN_PATH_MISCONFIG: Control LUN [chars] behind Host PWWN [chars] Tgt PWWN [chars] LUN Id [chars] has some lun paths that are not configured.

Explanation  A single lun with multiple paths has some non configured paths. Please configure all lun paths.

Recommended Action  No action is required.

Error Message  SME_CPP-2-LOG_ERR_SME_DIFF_LUN_MISCONFIG: Lun [chars] and [chars] behind Host PWWN [chars] Tgt PWWN [chars] LUN Id [chars] configured as one device.

Explanation  Two different luns configured as one device. Please fix configuration.

Recommended Action  No action is required.

Error Message  SME_CPP-2-LOG_ERR_SME_LICENSE_EXPIRED: SME License expired - Disabling [chars]

Explanation  SAN Media Encryption License expired/not present - Disabling SME

Recommended Action  No action is required.

Error Message  SME_CPP-2-LOG_ERR_SME_TAPE_LUN_PATH_MISCONFIG: Tape Drive [chars] behind Host PWWN [chars] Tgt PWWN [chars] LUN Id [chars] has some lun paths that are not configured.

Explanation  A single lun with multiple paths has some non configured paths. Please configure all lun paths.

Recommended Action  No action is required.

Error Message  SME_CPP-2-LOG_ERR_SME_TOM_ABORTED: SME Cluster [chars] Message Id: [hex] aborted

Explanation  An SME Cluster Message was aborted by the Cluster process

Recommended Action  No action is required.

Error Message  SME_CPP-2-LOG_WARN_SME_LICENSE_GRACE: No SME License. Feature will be shut down after a grace period of approximately [dec] days

Explanation  SAN Media Encryption feature on grace period. Please acquire actual license.

Recommended Action  No action is required.

Error Message  SME_CPP-2-SME_INIT_FAILED: Initialization failed for SME: [chars], Reason: [hex]

Explanation  Initialization failed for SME

Recommended Action  No action is required.

SME_CPP-3

Error Message  SME_CPP-3-LOG_ERR_SME_DBSYBC_REJECT: SME Database Synchronization [chars] for a New Cluster (Id 0x%llx) Rejected; Reason - [chars].

Explanation  A switch can be part of only one SME cluster

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_CAPACITY_NOT_SUPPORTED: The capacity of media for disk DG: [chars] CD NAME: [chars] (0x%Lx) less than signature metadata size [hex]

Explanation  Disk size less than sme disk reserved area

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_DP_CNODE_NOT_FOUND: crypto disk data preparation for (DG: [chars] CD NAME: [chars]) could not find cnode ([chars] if_index: [hex])

Explanation  The data preparation failed since crypto node assigned for data prepration is not found

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_DP_CNODE_OVERLOAD: crypto disk data preparation for (DG: [chars] CD NAME: [chars]) could not be assgined a crypto node ([chars] if_index: [hex]) due to max limit. current active sessions: [dec]

Explanation  The data preparation failed since crypto node is already handling maximum number of data preparation sessions

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_KMC_NAME_MISMATCH: The KMC DG: [chars] and CD NAME: [chars] corresponding to VID: [chars] PID: [chars] DID: [chars] doesnt match cdisk DG: [chars] and CD NAME: [chars]

Explanation  The discovered vendor id information not match the cryptodisk

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_KMC_VPD_FIXED: The VPD of cdisk DG: [chars] CD NAME: [chars] has been changed to VPD in KMC VID: [chars] PID: [chars] DID: [chars] and old VPD of disk has been removed

Explanation  The vendor id information has been modified to be consistent with KMC

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_KMC_VPD_MISMATCH: The VID:[chars] PID:[chars] DID: [chars] of cdisk DG: [chars] CD NAME: [chars] does not match VPD in KMC VPD: [chars] PID: [chars] DID: [chars]

Explanation  The discovered vendor id information not match the cryptodisk

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_LUN_PATH_AUTH_FAIL1: ITL HPWWN: [chars] TPWWN: [chars] LUN Id: [chars] VPD mismatch disk. Disk VPD VID: [chars] PID: [chars] DID: [chars] ITL VID: [chars] PID: [chars] DID: [chars]

Explanation  The given path does not belong to the configured disk

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_LUN_PATH_AUTH_FAIL2: ITL HPWWN: [chars] TPWWN: [chars] LUN Id: [chars] VID: [chars] PID: [chars] DID: [chars] belongs to a different cdisk DG: [chars] CD NAME: [chars]

Explanation  The given path does not belong to the configured disk

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_LUN_PATH_AUTH_FAIL3: CFG ITL HPWWN: [chars] TPWWN: [chars] LUN Id: [chars] VID: [chars] PID: [chars] DID: [chars] doesnt belong to DG: [chars] CD NAME: [chars] whose VID: [chars] PID: [chars] DID: [chars]

Explanation  The given path does not belong to the disk

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_LUN_PATH_AUTH_FAIL4: CFG ITL HPWWN: [chars] TPWWN: [chars] LUN Id: [chars] of DG: [chars] CD: [chars] has VID: [chars] PID: [chars] DID: [chars] belonging to DG: [chars] CD NAME: [chars]

Explanation  The given path does not belong to the disk

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_DISK_UNEXP_SIG_CHANGE: The signature found on media for disk DG: [chars] CD NAME: [chars] does not match expected signature. Signature changed unexpectedly putting disk in failed state

Explanation  Signature on disk has changed unexpectedly

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_INTF_MISMATCH_CLUSTER_PARAMS: SME interface [chars] part of cluster [chars] with ID [chars] and security mode [dec], but the DPP has state from a previous instance of a cluster [chars] with ID [chars] and security mode [dec].

Explanation  DPP has persistent state about a previous cluster membership incarnation, but the interface is part of a different cluster.

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_INTF_MISMATCH_CRYPTO_NODE_CERTIFICATE2: but the DPP has a different certificate (len [dec] fingerprint [chars]).

Explanation  DPP has persistent state about a previous cluster membership with a different crypto node identity.

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_INTF_MISMATCH_CRYPTO_NODE_CERTIFICATE: SME interface [chars] part of cluster [chars] with ID [chars] as a crypto node [chars] with certificate (len [dec] fingerprint [chars]), ..

Explanation  DPP has persistent state about a previous cluster membership with a different crypto node identity.

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_INTF_MISMATCH_CRYPTO_NODE_PARAMS: SME interface [chars] part of cluster [chars] with ID [chars] as a crypto node [chars], but the DPP is identified as [chars].

Explanation  DPP has persistent state about a previous cluster membershipon a different switch or module.

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_ERR_SME_IT_NEX_USED_FOR_DP: IT CL: [chars] H: [chars] T: [chars] VSAN: [dec] has PATH lunid: [chars] for disk (dg: [chars] cd: [chars]) so rediscover not issued

Explanation  The IT nexus is currently in use by data preparation so rediscover not permitted since it disrupts data preparation. Please stop data preparation first

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_CDISK_DP_FAILED: SME cdisk ([chars]) data preparation failed ([chars]), disk-group ([chars]), cluster (name [chars], id %llx)

Explanation  SME cdisk data preperation failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_DISK_ASL_FAILED: [chars]

Explanation  SME KMC disk asl token generation failed for the given device discovery info

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KEY_CREATE_FAILED: Key creation ([chars]) failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME key creation failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_DELETE_ALL_KEYS_FAILED: Delete all keys in cluster failed to KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC delete keys failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_DELETE_KEYS_FAILED: Delete keys for [chars] failed to KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC delete keys failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_KEEPALIVE_FAILED: Keepalive to KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC keepalive failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_KEY_ENTITY_LOOKUP_FAILED: Key ([chars]) lookup from KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC key lookup failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_KEY_LOOKUP_FAILED: Key ([chars]) lookup from KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC key lookup failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_KEY_UPDATE_FAILED: Key updates ([chars]) to KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC key updates failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_KMC_MODIFY_DISK_STATUS_FAILED: Key ([chars]) update disk status in KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC disk status update failed

Recommended Action  No action is required.

Error Message  SME_CPP-3-LOG_SME_REPLACE_SMARTCARD_ABORT: Replace smartcard process (type [chars]) aborted [chars] with reason ([chars]) in SME cluster (name [chars], id %llx)

Explanation  SME KMC connection up

Recommended Action  No action is required.

Error Message  SME_CPP-3-SME_DISK_INPUT_KEY_SIGNATURE_MISMATCH: sme input key and signature mismatch dg:[chars] cd:[chars] input guid:[chars] clone guid:[chars] signature guid:[chars] clone guid:[chars]

Explanation  Sme input key and signature mismatch

Recommended Action  No action is required.

Error Message  SME_CPP-3-SME_DISK_UNCFG_LUN_HAS_SIG: An unconfigured lun vpd: [chars] [chars] [chars] has crypto signature. Please configure in SME to manage encryption

Explanation  Signature found on a unconfigured lun

Recommended Action  No action is required.

Error Message  SME_CPP-3-SME_FIPS_MODE_ERROR: SME FIPS error: [chars]

Explanation  SME module FIPS mode error

Recommended Action  No action is required.

Error Message  SME_CPP-3-SME_MAX_CLUSTERS_LIMIT_EXCEEDED: SME maximum clusters limit of [dec] exceeded

Explanation  The maximum sme clusters limit exceeded

Recommended Action  No action is required.

SME_CPP-5

Error Message  SME_CPP-5-IT_NEXUS_OPTIMUM_INTERFACE_LIMIT_REACHED: Interface [chars] exceeded the optimum IT Nexus limit

Explanation  Iterface Flow Limit

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_ERR_SME_INTF_MISMATCH_NOT_PART_OF_ANY_CLUSTER: SME interface [chars] not part of any cluster, but the DPP has state from a previous instance of a cluster [chars] with ID [chars].

Explanation  DPP has persistent state about a previous cluster membership incarnation, but the interface is not part of any cluster.

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_ERR_SME_INTF_MISMATCH_NOT_PROVISIONED: SME is not provisioned on slot [dec], but the DPP has state from a previous instance as a crypto node [chars] of a cluster [chars] with ID [chars].

Explanation  DPP has persistent state about a previous cluster membership incarnation, but the switch has not provisioned the interface for SME.

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_CDISK_DP_SUCCESS: SME cdisk ([chars]) data preparation succeeded, disk-group ([chars]), cluster (name [chars], id %llx)

Explanation  SME cdisk data preperation succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_CLUSTER_INTF_ADDED: SME interface now part of cluster [chars] with ID [chars] as a crypto node [chars] and certificate (len [dec] fingerprint [chars]).

Explanation  Interface added to cluster successfully

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_CLUSTER_INTF_REMOVED: SME interface now removed from cluster [chars] with ID [chars] as a crypto node [chars] and certificate (len [dec] fingerprint [chars]).

Explanation  Interface removed from cluster successfully

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_INTERFACE_DOWN: SME Interface ([chars]) DOWN

Explanation  SAN Interface was brought down

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_INTERFACE_UP: SME Interface ([chars]) is UP

Explanation  SAN Interface was brought up

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_IT_NEXUS_FAILURE: [chars]. [chars] bind failure. Reason: [chars]: [hex]

Explanation  SME IT Nexus bind failed

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KEY_CREATE_SUCCESS: Key created ([chars]) successfully in SME cluster (name [chars], id %llx)

Explanation  SME key creation succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_CONNECTION_DOWN: Connection to KMC server [chars] is down with reason ([chars]) from local switch in SME cluster (name [chars], id %llx)

Explanation  SME KMC connection down

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_CONNECTION_INIT_FAIL: Connection initialization to KMC server [chars] from local switch in SME cluster (name [chars], id %llx) failed with error ([chars])

Explanation  SME KMC connection initialization failed

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_CONNECTION_INIT_PASS: Connection initialization to KMC server [chars] from local switch in SME cluster (name [chars], id %llx) succeeded

Explanation  SME KMC connection initialization succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_CONNECTION_UP: Connection to KMC server [chars] is up from local switch in SME cluster (name [chars], id %llx)

Explanation  SME KMC connection up

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_DELETE_ALL_KEYS_SUCCESS: Delete all keys in cluster to KMC server succeeded, SME cluster (name [chars], id %llx)

Explanation  SME KMC delete keys succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_DELETE_KEYS_SUCCESS: Delete keys for [chars] to KMC server succeeded, SME cluster (name [chars], id %llx)

Explanation  SME KMC delete keys succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_KEY_ENTITY_LOOKUP_NOKEY: Key ([chars]) lookup from KMC server failed with error ([chars]), SME cluster (name [chars], id %llx)

Explanation  SME KMC key lookup resulted in no key

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_KEY_ENTITY_LOOKUP_SUCCESS: Key ([chars]) lookup from KMC server succeeded, SME cluster (name [chars], id %llx)

Explanation  SME KMC key lookup succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_KEY_LOOKUP_SUCCESS: Key ([chars]) lookup from KMC server succeeded, SME cluster (name [chars], id %llx)

Explanation  SME KMC key lookup succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_KEY_UPDATE_SUCCESS: Key updates ([chars]) to KMC server succeeded, SME cluster (name [chars], id %llx)

Explanation  SME KMC key updates succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_KMC_MODIFY_DISK_STATUS_SUCCESS: Key ([chars]) update disk status in KMC server succeeded, SME cluster (name [chars], id %llx)

Explanation  SME KMC disk status update succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_MASTER_KEY_REKEYED: Master Key rekeyed successfully in SME cluster (name [chars], id %llx)

Explanation  SME Master Key rekeyed

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_REPLACE_SMARTCARD_COMMIT: Replace smartcard process (type [chars]) committed [chars] in SME cluster (name [chars], id %llx)

Explanation  SME KMC connection up

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_REPLACE_SMARTCARD_START: Replace smartcard process (type [chars]) initiated [chars] in SME cluster (name [chars], id %llx)

Explanation  SME KMC connection up

Recommended Action  No action is required.

Error Message  SME_CPP-5-LOG_SME_TAPE_VOLUME_GROUP_REKEYED: Tape volume group ([chars]) rekeyed successfully in SME cluster (name [chars], id %llx)

Explanation  SME Master Key rekeyed

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_DISABLED: SME Disabled

Explanation  SME Service Disabled

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_DISK_DP_WAIT_KMC: crypto disk data preparation (DG: [chars] CD NAME: [chars]) is waiting KMC validation of VPD

Explanation  The data preparation is waiting for validation of VPD with KMC

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_DISK_DP_WAIT_PATH_ADD: crypto disk data preparation (DG: [chars] CD NAME: [chars]) is waiting paths to be added

Explanation  The data preparation is waiting for paths to be added to the crypto disk

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_DISK_DP_WAIT_PATH_CFG: crypto disk data preparation (DG: [chars] CD NAME: [chars]) is waiting for the path (fabric: [chars] hwwn: 0x%Lx twwn: 0x%Lx vsan: [dec] lun_id: [chars]) to be added

Explanation  The data preparation is waiting for discovered path to be added

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_DISK_DP_WAIT_PATH_DISC: crypto disk data preparation (DG: [chars] CD NAME: [chars]) is waiting for configured path (fabric: [chars] hwwn: 0x%Lx twwn: 0x%Lx vsan: [dec] lun_id: [chars]) to be discovered

Explanation  The data preparation is waiting for configured path to be discovered

Recommended Action  No action is required.

Error Message  SME_CPP-5-SME_ENABLED: SME Enabled

Explanation  SME Service nabled

Recommended Action  No action is required.

SME_CPP-SLOT#-2

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_DEVICE_MISCONFIG: Different configured Devices under same physical LUN - Old Cluster Name:[chars] New Cluster Name:[chars] Old Group Name:[chars] New Group Name:[chars] Old Device Name:[chars] New Device Name:[chars]

Explanation  Different configured devices under same physical LUN

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_ITL_MISCONFIG: Different physical LUNs under same Tape Device - Device Name:[chars] Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:[chars] Serial Num:[chars] Serial Num:[chars]

Explanation  Different physical LUNs under same Tape Device

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_LUN_MISCONFIG: Different physical LUNs under same ITL - Old Serial Num:[chars] New Serial Num:[chars]

Explanation  Different physical LUNs under same ITL

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_TAPE_BYPASS_ENC_DISABLED_BY_USER: BYPASS Encryption disabled by USER- WRITES will be FAILED for partly written tape, PLEASE REWIND THE TAPE - Cluster:[chars] BKGRP Name:[chars] Tape Device:[chars] Serial Num:[chars]

Explanation  WRITES for this Tape will FAIL, REWIND the TAPE

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_TAPE_BYPASS_ENC: Bypassing encryption for partly written tape - Cluster:[chars] Tape Device:[chars] Serial Num:[chars] Barcode:[chars]

Explanation  This tape is currently not being encrypted

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_TAPE_CTH_FAIL: Bypassing encryption for current tape on failed CTH verification - Cluster:[chars] Tape Device:[chars] Serial Num:[chars]

Explanation  This tape is currently not being encrypted because CTH verification has failed in DPP

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-2-LOG_ERR_SME_TAPE_KEY_ERR: Getting tape keys from SUP failed - Cluster:[chars] Tape Device:[chars] Serial Num:[chars]

Explanation  There was a failure retrieving keys from SUP for this tape

Recommended Action  No action is required.

SME_CPP-SLOT#-3

Error Message  SME_CPP-SLOT#-3-DISK_WRITE_SIGNATURE_FAILED: [chars] Lun [chars] SigLBA 0x%Lx isapi [hex] scsi [hex] sense/asc/ascq [hex]/[hex]/[hex]

Explanation  ITL write signature IO failure, please check status

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISC_TIMEOUT: Module:[dec] Host-Target:[chars]

Explanation  Discovery on this IT Nexus is taking too long, please check status

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_CAP_CHANGED: capacity changed for lun VID: [chars] PID: [chars] DID: [chars] previous max_lba: 0x%Lx blk_sz: [dec] discovered max_lba: [hex] blk_sz: [dec] on ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx

Explanation  The capacity of the disk seems to have changed

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_CPP_ITL_MISCONFIG: Disk ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx has been misconfigured under a non disk lun

Explanation  Disk ITL has been misconfigured under non disk lun

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_CPP_IT_MISCONFIG: Tape device has been misconfigured under disk IT nexus [chars] hence skipping discovery of ITLs under this IT nexus

Explanation  Remove misconfigured disk path under the tape device

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_CRYPTO_UPDATE_ITL_AUTH_FAIL: ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx with discovered VID: [chars] PID: [chars] DID: [chars] marked by SUP as failed authentication

Explanation  SUP detected authentication failure on path

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_ENTITY_INVALID: disk entity index invalid from KMC (cluster: [chars] DG: [chars] CD NAME: [chars] VID: [chars] PID: [chars] DID: [chars]

Explanation  KMC returned an invalid disk entity index

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_INVALID_CAPACITY: Disk capacity not supported.IT nexus:[chars] LUN Id:0x%Lx VID: [chars] PID : [chars] max_lba=[hex] max_lba64=0x%Lx

Explanation  The reported disk capacity is zero

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_ITL_CREATE_VPD_MISMATCH: ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx VID: [chars] PID: [chars] DID: [chars] doesnt match cdisk DG: [chars] CD NAME: [chars] VID: [chars] PID: [chars] DID: [chars]

Explanation  The configured path does not belong to this disk

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_ITL_MISCONFIG: ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx part of DG: [chars] CD NAME: [chars] is misconfigured as the ITL VPD VID: [chars] PID: [chars] DID: [chars] belongs to a different cdisk DG: [chars] CD NAME: [chars]

Explanation  The configured path does not belong to this disk

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_KEY_INVALID: (CLUSTER: [chars] DG: [chars] CD NAME: [chars] keytype: [dec] keyguid: [chars] invalid

Explanation  KMC returned an invalid disk key

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_KMC_VERIFY_PENDING: cluster: [chars] DG: [chars] CD NAME: [chars] VID: [chars] PID: [chars] DID: [chars]

Explanation  Vpd of the discovered path pending verification with KMC

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_MISCONFIG: A disk device misconfiguration under disk config - Device Name:[chars] Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:%Lx

Explanation  A disk device misconfigured under disk config

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_PHYENCRYPT_FAILED: CL: [chars] DG: [chars] CD: [chars] VID: [chars] PID: [chars] DID: [chars] ISAPI_PhyCopyEncrypt() failed isapi status: [dec] copy status: [hex] scsi status: [hex] data preparation failed

Explanation  ISAPI_PhyCopyEncrypt() failed causing data preparation to fail

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_VPD_CHANGED: VID, PID and DID changed on ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx previous VID: [chars] PID : [chars] DID: [chars] current VID: [chars] PID: [chars] DID: [chars]

Explanation  The VPD of the disk seems to have changed

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_DISK_VPD_MISMATCH: ITL Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:0x%Lx failed authentication DISK VPD(VID id: [chars] PID: [chars] DID: [chars]) ITL(VID: [chars] PID: [chars] DID: [chars])

Explanation  The configured path does not belong to this disk

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_ITL_CPP_ERR: Module:[dec] Host-Target [chars] LunID:[chars]

Explanation  ITL failure seen on CPP, please check status

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_IT_NEXUS_UNSUPPORTED: IT nexus [chars] has both disks and tapes which is an unsupported configuration

Explanation  IT nexus has an unsupported mix of tape and disk devices

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_LUN_DISCOVERY_FAIL: [chars] - REPORT_LUNS didn't include configured lun, INQUIRY of LUN:%llx FAILED with ScsiSts=[hex] SenseKey=[hex] ASC=[hex] ASCQ=[hex]

Explanation  Discovery of CONFIGURED LUN Failed

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_NON_DISK_MISCONFIG: A non-disk device misconfigured under disk config - Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:%Lx

Explanation  A non disk device misconfigured under disk config

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-LOG_ERR_SME_NON_TAPE_MISCONFIG: A non-tape device misconfigured under tape config - Device Name:[chars] Host PWWN:[chars] Tgt PWWN:[chars] LUN Id:%Ld

Explanation  A disk misconfigured under tape config

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-READ_CAPACITY_FAILED: [chars] Lun [chars] isapi [hex] scsi [hex] sense/asc/ascq [hex]/[hex]/[hex]

Explanation  ITL read capacity failure, please check status

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-3-READ_IO_TEST_FAILED: [chars] Lun [chars] isapi [hex] scsi [hex] sense/asc/ascq [hex]/[hex]/[hex]

Explanation  ITL read io test failure, please check status

Recommended Action  No action is required.

SME_CPP-SLOT#-4

Error Message  SME_CPP-SLOT#-4-LOG_WARN_SME_MAX_BLOCK_LEN: Maximum block length [dec] of tape drive is 256K or less - [chars] LunID:[chars] VendorID:[chars] ProdID:[chars] Serial Num:[chars] Cluster:[chars] Tape Device:[chars]

Explanation  This tape drive may not operate correctly with SME

Recommended Action  No action is required.

SME_CPP-SLOT#-5

Error Message  SME_CPP-SLOT#-5-DISK_WRITE_SIGNATURE_SUCCESS: [chars] Lun [chars] SigLBA 0x%Lx Key Guid [chars]

Explanation  ITL write signature IO succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-5-READ_CAPACITY_SUCCESS: [chars] Lun [chars] Max LBA 0x%Lx Block Length [hex]

Explanation  ITL read capacity IO succeeded

Recommended Action  No action is required.

Error Message  SME_CPP-SLOT#-5-READ_IO_TEST_SUCCESS: [chars] Lun [chars] Key Guid [chars]

Explanation  ITL read signature IO succeeded

Recommended Action  No action is required.

SNMPD Messages

This section contains the SNMPD messages.

SNMPD-1

Error Message  SNMPD-1-ALERT: SNMP log alert : [chars]

Explanation  SNMP log alert message.

Recommended Action  No action is required.

SNMPD-2

Error Message  SNMPD-2-CRITICAL: SNMP log critical : [chars]

Explanation  SNMP log critical message.

Recommended Action  No action is required.

SNMPD-3

Error Message  SNMPD-3-ERROR: SNMP log error : [chars]

Explanation  SNMP log error message.

Recommended Action  No action is required.

SNMPD-4

Error Message  SNMPD-4-WARNING: SNMP log warning : [chars]

Explanation  SNMP log warning message.

Recommended Action  No action is required.

SNMPD-5

Error Message  SNMPD-5-NOTIFICATION: SNMP log notification : [chars]

Explanation  SNMP log notification message.

Recommended Action  No action is required.

SNMPD-6

Error Message  SNMPD-6-INFO: SNMP log informational : [chars]

Explanation  SNMP log info message.

Recommended Action  No action is required.

SNMPD-7

Error Message  SNMPD-7-DEBUG: SNMP log debugging : [chars]

Explanation  SNMP log debug message.

Recommended Action  No action is required.

SPAN Messages

This section contains the SPAN messages.

SPAN-2

Error Message  SPAN-2-MEM_FULL: Memory allocation failed

Explanation  Memory allocation failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

SPAN-3

Error Message  SPAN-3-IPC_FAIL: IPC Error

Explanation  Internal IPC error

Recommended Action  No action is required.

Error Message  SPAN-3-SYSINFO_TIMEOUT: Span timed out waiting for response from port manager for sys info

Explanation  Span request for critical system information from port manager timed out. So, span on the new active is exiting and system manager will restart Span.

Recommended Action  No action is required.

SPAN-5

Error Message  SPAN-5-ATL_VSAN_DEFAULT_ALL: Default to all VSANs for SPAN egress session

Explanation  Generation 2 fabric switches support only one VSAN filter for egress SPAN session. If no or more than one VSANs are specified, SPAN will default to use all VSANs for the egress SPAN session

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_CFG_REJECT_SRC_VSAN_FILTER_NOT_SUPPORTED: Source interface [[chars]] in dir [[chars]] removed from session [[dec]].

Explanation  Interface level VSAN filters is not supported

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_CFG_REJECT_VSAN_SRC_PRESENT: Source VSAN [[dec]] removed from session [[dec]].

Explanation  Source VSANs are removed from the session as mixing of interface and VSANs is not supported.

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_PSS_CORRUPTION: Span is starting stateless due to PSS corruption

Explanation  Due to unrecoverable PSS corruption error, SPAN starts stateless without any configuration

Recommended Action  No action is required.

Error Message  SPAN-5-SPAN_PVLAN_SRC: Private vlan source is not supported in monitor session.

Explanation  Private vlan source not supported in span/erspan sessions.

Recommended Action  No action is required.

Error Message  SPAN-5-STATELESS_RESTART_ON_ACTIVE: Span is restarting as Span on active sup was restarted stateless.

Explanation  Due to unrecoverable error, Span on active supervisor was restarted stateless. So, the standby Span restarts to get in sync with the stateless Span on active.

Recommended Action  No action is required.

Error Message  SPAN-5-STATELESS_RESTART: Span is restarting stateless.

Explanation  Due to unrecoverable error, Span is starting stateless. The currently active sessions will not be preserved. The user will have to reenter all the configuration.

Recommended Action  No action is required.

SPAN-6

Error Message  SPAN-6-SESSION_DOWN: Session [dec] is inactive ([chars])

Explanation  Session [dec] is inactive now. Traffic for this session is no longer spanned

Recommended Action  Check the reason for session inactive using command 'show span session' and take corresponding action.

Error Message  SPAN-6-SESSION_UP: Session [dec] is active, destination SD port [chars]

Explanation  Session [dec] is active now. You can monitor Spanned traffic at the destination SD port

Recommended Action  No action is required.

Error Message  SPAN-6-STATELESS_SWITCHOVER: Span is starting stateless after switchover.

Explanation  Active sessions are not preserved across switchover. Span is starting stateless and the configuration will be reapplied to get back the active configuration.

Recommended Action  No action is required.

STATSCLIENT Messages

This section contains the STATSCLIENT messages.

STATSCLIENT-2

Error Message  STATSCLIENT-2-STATSCL_CRIT: [chars]

Explanation  StatsClient Critical Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STATSCLIENT-3

Error Message  STATSCLIENT-3-STATSCL_ERR2: [chars] [dec] [dec]

Explanation  StatsClient Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STATSCLIENT-3-STATSCL_ERR: [chars] [dec]

Explanation  StatsClient Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STATSCLIENT-6

Error Message  STATSCLIENT-6-STATSCL_INFO: [chars]

Explanation  StatsClient Flow Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STATSINFRA Messages

This section contains the STATSINFRA messages.

STATSINFRA-3

Error Message  STATSINFRA-3-STATS_INFRA_CRIT: [chars]

Explanation  StatsInfra Critical Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STATSINFRA-3-STATS_INFRA_ERR: [chars]

Explanation  StatsInfra Error

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STATSINFRA-3-STATS_INFRA_INFO: [chars]

Explanation  StatsInfra Flow Message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

STP Messages

This section contains the STP messages.

STP-2

Error Message  STP-2-BLOCK_BPDUGUARD: Received BPDU on port [chars] with BPDU Guard enabled. Disabling port.

Explanation  A BPDU was received in the interface specified in the error message that has the spanning tree BPDU Guard feature enabled. As a result, the interface was administratively shut down.

Recommended Action  Either remove the device sending BPDUs or disable the BPDU Guard feature. The BPDU Guard feature can be locally configured on the interface or globally configured on all ports that have portfast enabled. After the conflict has been resolved, re-enable the interface by entering the no shutdown command in interface configuration mode.

Error Message  STP-2-BLOCK_DETECTED_PVST_PEER: Blocking port [chars] [PVST peer detected].

Explanation  The listed interface received SSTP BPDU indicating that peer is running PVST and will be held in spanning tree blocking state until the interface stops receiving SSTP BPDUs

Recommended Action  Either enable PVST simulation configuration for the interface or make sure the port peer is not PVST switch

Error Message  STP-2-BLOCK_PVID_LOCAL: Blocking [chars] on [chars]. Inconsistent local vlan.

Explanation  The spanning tree port associate with the listed spanning tree instance and interface will be held in spanning tree blocking state until the Port VLAN ID (PVID) inconsistency is resolved. The listed spanning tree instance is that of the native VLAN id of the listed interface.

Recommended Action  Verify that the configuration of the native VLAN id is consistent on the interfaces on each end of the 802.1Q trunk connection. Once corrected, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-2-BLOCK_PVID_PEER: Blocking [chars] on [chars]. Inconsistent peer vlan.

Explanation  The spanning tree port associate with the listed spanning tree instance and interface will be held in spanning tree blocking state until the port VLAN Id (PVID) inconsistency is resolved. The listed spanning tree instance is that of the native VLAN id of interface on the peer switch to which the listed interface is connected.

Recommended Action  Verify that the configuration of the native VLAN id is consistent on the interfaces on each end of the 802.1Q trunk connection. Once corrected, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-2-BRIDGE_ASSURANCE_BLOCK: Bridge Assurance blocking port [chars] [chars].

Explanation  BPDUs were not received from a neighboring switch on the interface that has spanning tree Bridge Assurance configured. As a result, the interface was moved to the spanning tree Blocking state

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-BRIDGE_ASSURANCE_UNBLOCK: Bridge Assurance unblocking port [chars] [chars].

Explanation  The interface listed in the message has been restored to normal spanning tree state after receiving BPDUs from the neighboring L2 switch/bridge

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-DISPUTE_CLEARED: Dispute resolved for port [chars] on [chars].

Explanation  The listed interface has stopped receiving Inferior BPDUs with designated role and state as learning and/or forwarding. The Dispute has been resolved and if the port is still designated, it will be taken out of the blocking state as and when appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-DISPUTE_DETECTED: Dispute detected on port [chars] on [chars].

Explanation  The spanning tree has detected a Dispute on this interface. The BPDU received from the peer is Inferior with designated role and state as learning and/or forwarding. Since this condition could be caused by an unidirectional link failure, the interface is put into blocking state and marked as disputed in order to prevent possible loops from being created

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with Dispute. Dispute is caused if the peer in not receiving the Superior BPDUs sent by this interface. That is why the peer continues to send its own Inferior BPDUs. Determine why devices connected to the listed ports are not receiving BPDUs. One reason could be a failure in the cable: if the link has a failure that makes it unidirectional (you can not transmit but you can receive) it should be replaced with a proper cable.

Error Message  STP-2-IPC_PROCESSING_ERR: Error in processing IPC message : Opcode = [dec], Error code = [hex]

Explanation  STP encountered an error in processing an MTS message. The error and message are specified in the error message

Recommended Action  No action is required.

Error Message  STP-2-L2GW_BACKBONE_BLOCK: L2 Gateway Backbone port inconsistency blocking port [chars] on [chars].

Explanation  A BPDU was received on the listed interface which advertises a superior spanning tree root bridge to that currently in use. The interface is put into blocking state and marked as L2 Gateway Backbone port inconsistent in order to prevent a suboptimal spanning tree topology to form.

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with L2 Gateway Backbone port inconsistencies. Determine why devices connected to the listed ports are sending BPDUs with a superior root bridge and take action to prevent further occurances. Once the bogus BPDUs have been stopped, the interfaces will automatically recover and resume normal operation.

Error Message  STP-2-L2GW_BACKBONE_UNBLOCK: L2 Gateway Backbone port inconsistency cleared unblocking port [chars] on [chars].

Explanation  The listed interface is no longer receiving BPDUs advertizing a superior root bridge. The L2 Gateway Backbone port inconsistency is cleared for the interface and then it is taken out of the blocking state if appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-LOOPGUARD_BLOCK: Loop guard blocking port [chars] on [chars].

Explanation  The spanning tree message age timer has expired because and no BPDUs were received from the designated bridge. Since this condition could be caused by an unidirectional link failure, the interface is put into blocking state and marked as loop guard inconsistent in order to prevent possible loops from being created

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with loop guard inconsistencies. Determine why devices connected to the listed ports are not sending BPDUs. One reason could be that they do not run the spanning tree protocol; in this case you should disable loopguard in the inconsistent interface/s or start the spanning tree protocol on the other side of the link/s.depending on the context. Another reason could be a failure in the cable: if the link has a failure that makes it unidirectional (you can transmit but you can not receive) it should be replaced with a proper cable.

Error Message  STP-2-LOOPGUARD_CONFIG_CHANGE: Loop guard [chars] on port [chars].

Explanation  The spanning tree loopguard configuration for the listed interface has been changed. If enabled, the interface will be put into blocking state and marked as loopguard inconsistent when the message age timer expires because no BPDU were received from the designated bridge. This feature is mainly used to detect unidirectional links

Recommended Action  Verify that this is the desired configuration for the listed interface. Correct it if this is not the desired configuration otherwise no further action is required.

Error Message  STP-2-LOOPGUARD_UNBLOCK: Loop guard unblocking port [chars] on [chars].

Explanation  The listed interface has received a BPDU and therefore if the inconsistency was due to an unidirectional link failure, now the problem is not there anymore. The loop guard inconsistency is cleared for the interface which is taken out of the blocking state if appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-PEER_IN_UPGRADE: Peer is going through Upgrade. Can't bring up NON Edge port [hex] in STP

Explanation  Peer is going through Upgrade. Can't bring up NON Edge port in STP

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-PVSTSIM_FAIL: Blocking [chars] port [chars]: Inconsistent [chars] PVST BPDU received on VLAN [dec], claiming root [chars]

Explanation  When a MST switch is connected to a PVST+ switch, the CIST (MST00) information on the port of the MST switch must be consistently better than all the PVST+ messages if the port is designated or consistently worse than all the PVST+ messages if the port is root. If this constraint is not respected, the port on the MST switch is blocked in order to prevent a potential bridging loop

Recommended Action  When STP is converging after a new switch, or switch port is added to the topology, this condition may happen transiently. The port unblocks automatically in such cases. If the port remains blocked, identify the root bridge as reported in the message, and configure a worse or better priority for the VLAN spanning tree consistent with the CIST role on the port of the MST switch. There could be more inconsistencies than the message indicates, and the port will not recover until all such inconsistencies are cleared. If you cannot determine which other VLANs have inconsistencies, disable and reenable the port. This message will appear again and specify another VLAN with inconsistencies to be fixed. Repeat this process until all inconsistencies on all VLANs are cleared.

Error Message  STP-2-PVSTSIM_OK: PVST Simulation inconsistency cleared on port [chars].

Explanation  The listed interface is no longer receiving PVST BPDUs advertising an information inconsistent with the CIST port information. The PVST Simulation Inconsistency is cleared and the interface returns to normal operation

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

Error Message  STP-2-RECV_BAD_TLV: Received SSTP BPDU with bad TLV on [chars] [chars].

Explanation  The list interface received a SSTP BPDU that was missing the VLAN id tag. The BPDU is discarded.

Recommended Action  No action is required.

Error Message  STP-2-RECV_PVID_ERR: Received BPDU with inconsistent peer vlan id [dec] on [chars] [chars].

Explanation  The listed interface received a SSTP BPDU that is tagged with a VLAN id that does not match the VLAN id on which the BPDU was received. This occurs when the native VLAN is not consistently configured on both ends of a 802.1Q trunk.

Recommended Action  Verify that the configuration of the native VLAN id is consistent on the interfaces on each end of the 802.1Q trunk connection. Once corrected, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-2-ROOTGUARD_BLOCK: Root guard blocking port [chars] on [chars].

Explanation  A BPDU was received on the listed interface which advertizes a superior spanning tree root bridge to that currently in use. The interface is put into blocking state and marked as root guard inconsistent in order to prevent a suboptimal spanning tree topology to form.

Recommended Action  Issue the show spanning-tree inconsistentports command to review the list of interfaces with root guard inconsistencies. Determine why devices connected to the listed ports are sending BPDUs with a superior root bridge and take action to prevent further occurances. Once the bogus BPDUs have been stopped, the interfaces will automatically recover and resume normal operation. Make sure that it is appropriate to have root guard enabled on the interface.

Error Message  STP-2-ROOTGUARD_CONFIG_CHANGE: Root guard [chars] on port [chars].

Explanation  The spanning tree root guard configuration for the listed interface has been changed. If enabled, any BPDU received on ths interface which advertizes a superior spanning tree root bridge to that already in use will cause the interface to be put into blocking state and marked as root guard inconsistent.

Recommended Action  Verify that this is the desired configuration for the listed interface. Correct it if this is not the desired configuration otherwise no further action is required.

Error Message  STP-2-ROOTGUARD_UNBLOCK: Root guard unblocking port [chars] on [chars].

Explanation  The listed interface is no longer receiving BPDUs advertizing a superior root bridge. The root guard inconsistency is cleared for the interface and then it is taken out of the blocking state if appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-SET_PORT_STATE_FAIL: Port state change req to PIXM failed, status = [hex] [[chars]] vdc [dec], tree id [dec], num ports [dec], ports [chars] state [chars], opcode [chars], msg id ([dec]), rr_token [hex]

Explanation  The port set port state has failed. check port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-SET_PORT_STATE_TIMEOUT: Port state change req to PIXM timedout after [dec] sec. vdc [dec], tree id [dec], num ports [dec], ports [chars] state [chars], opcode [chars], msg id ([dec]), rr_token [hex]

Explanation  The port set port state has timedout. check port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-STP_INIT: STP initialization of [chars] [chars]

Explanation  STP initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STP-2-STP_ISSU_LC_RESET: STP resetting LC[dec] to prevent Loops during ISSU caused by a topology change in the network. Peer on [chars] [chars] could not be Disputed

Explanation  This can happen as a result of a topology change in the network while the Linecard was undergoing ISSU. Since STP cannot change the port state to blocking on the Linecard undergoing ISSU, it will first try to prevent the Loop by causing a Dispute on the peer ports forcing them into blocking state. But if the peer does not support Dispute mechanism, and STP detects a potential Loop, it will reset the Linecard to prevent the Loop

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-STP_MODE_CHANGE_FAIL: STP Mode Change to [chars] failed

Explanation  STP mode change failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STP-2-STP_MODE_CONFIG_FAIL: STP Mode config failed,PVRST mode is not supported when there are more than [dec] user VLANs configured

Explanation  STP mode config failed

Recommended Action  Please remove extra VLANs if you need to change to PVRST mode!

Error Message  STP-2-STP_MST_INSTANCE_CONFIG_FAIL: STP MST instance config change failed for [dec]

Explanation  STP MST instance config change failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  STP-2-STP_VPC_PEER_ISSU_DISRUPTIVE: Possible traffic disruption due to ISSU on VPC peer. [chars]

Explanation  This is due to some non VPC ports in Desg FWD state on the device or BA timers enabled. It can be prevented by changing the root for those non vPC port vlans, disabling Bridge Assurance timers on non vPC ports

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-UNBLOCK_CONSIST_PORT: Unblocking port [chars] on [chars]. Port consistency restored.

Explanation  The Port VLAN ID and/or Port Type inconsistencies have been resolved and spanning tree will now unblock the listed interface of the listed spanning tree instance as appropriate.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-UNBLOCK_DETECTED_PVST_PEER: Unblocking port [chars] [PVST peer detected].

Explanation  The listed interface has stopped receiving SSTP BPDUs and so will be restored to normal spanning tree state

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-VLAN_PORT_LIMIT_EXCEEDED: The number of vlan-port instances exceeded [[chars] mode] recommended limit of [dec]

Explanation  The total number of individual VLAN ports, in the spanning tree mode specified in the error message, has exceeded the limit specified in the error message. VLANs can be counted more than once; if VLAN 1 is carried on 10 interfaces, it will count as 10 VLAN ports. Note that bundling is ignored for purposes of this count; if 8 interfaces on the same module are in one bundle, and the port channel is carrying VLAN 1, it will count as 1 VLAN ports.

Recommended Action  Reduce the number of trunks and VLANs configured in the switch. Keep the VLAN port count below the recommended limit specified in the configuration documentation. Enter the show interface trunk command to see the total number of trunks and VLANs.

Error Message  STP-2-VPC_HITLESS_FAILURE: VPC Hitless Role Change Failure. Reason: [chars].

Explanation  VPC Hitless Role Change has failed.

Recommended Action  Flap of VPC Peer-link.

Error Message  STP-2-VPC_PEERSWITCH_CONFIG_DISABLED: vPC peer-switch configuration is disabled. Please make sure to change spanning tree "bridge" priority as per the recommended guidelines.

Explanation  The vPC peer-switch configuration has been changed. If enabled, please make sure to configure spanning tree \bridge\ priority as per the recommended guidelines. If disabled, please make sure to change spanning tree bridge priority as per the recommended guidelines.

Recommended Action  Verify that this is the desired configuration and follow the vPC peer-switch recommended guidelines.

Error Message  STP-2-VPC_PEERSWITCH_CONFIG_ENABLED: vPC peer-switch configuration is enabled. Please make sure to configure spanning tree "bridge" priority as per recommended guidelines to make vPC peer-switch operational.

Explanation  The vPC peer-switch configuration has been changed. If enabled, please make sure to configure spanning tree \bridge\ priority as per the recommended guidelines. If disabled, please make sure to change spanning tree bridge priority as per the recommended guidelines.

Recommended Action  Verify that this is the desired configuration and follow the vPC peer-switch recommended guidelines.

Error Message  STP-2-VPC_PEER_LINK_INCONSIST_BLOCK: vPC peer-link detected [chars] blocking [chars] [chars].

Explanation  VPC Peer-link detected the STP inconsistency mentioned in the message. This will impact the STP topology for vPCs and can cause frame duplications. As a result, the interface was moved to the spanning tree Blocking state

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-2-VPC_PEER_LINK_INCONSIST_ERRDISABLE: vPC Peer-link detected [chars]. Disabling [chars].

Explanation  VPC Peer-link detected the STP inconsistency mentioned in the message. This will impact the STP topology for vPCs and can cause frame duplications. As a result, the vPC Peer-link was administatively shut down.

Recommended Action  Please resolve the inconsistency reported in this message on the vPC Peer link. After the conflict has been resolved, re-enable the interface by entering the no shutdown command in interface configuration mode.

Error Message  STP-2-VPC_PEER_LINK_INCONSIST_UNBLOCK: vPC peer-link inconsistency cleared unblocking [chars] [chars].

Explanation  VPC Peer-link inconsistency is cleared and the vPC interface listed in the message has been restored to normal spanning tree state.

Recommended Action  LOG_STD_NO_ACTION

STP-3

Error Message  STP-3-BLOCK_PORT_TYPE: Blocking [chars] on [chars]. Inconsistent port type.

Explanation  The listed interface is being held in spanning tree blocking state until the port type inconsistency is resolved.

Recommended Action  Verify that the configuration and operational state of the listed interface and that of the interface to which it is connected have the same mode (access vs trunk). If mode is trunk, verify the same encapsulation (ISL, 802.1Q). Once these parameters are consistent, spanning tree will automatically unblock the interfaces as appropriate.

Error Message  STP-3-PORT_SELF_LOOPED: Received BPDU src mac same as that of port. Port self loopback detected. Port [chars] being disabled

Explanation  The source MAC address contained in a BPDU received on the listed interface matches the MAC address assigned to that interface This indicates the possibility that a port is looped back to itself, possibly due to a diagnostic cable being plugged in. The interface will be administratively shutdown.

Recommended Action  Check the interface configuration and any cable plugged into the interface. Once problem resolved, re-enable interface by doing a no shutdown in the interface configuration. Copy the error message as it is printed and also copy the output of a show interface for the interace listed in the error message.

Error Message  STP-3-RECV_1Q_NON_TRUNK: Received 802.1Q BPDU on non trunk [chars] [chars].

Explanation  A SSTP BPDU was received on the listed interface that was not operationally a trunk.

Recommended Action  Verify that the configuration and operational state of the listed interface and that of the interface to which it is connected have the same mode (access vs trunk). If mode is trunk, verify the same encapsulation (none, ISL, 802.1Q). Once these parameters are consistent, spanning tree will automatically unblock the interfaces as appropriate.

STP-4

Error Message  STP-4-FORWARDTIME_CONFIG_CHANGE: Forward Delay time change to [dec] seconds for instance [chars] is not recommended as it can cause STP data loops during High Availability Dual-Supervisor Switchover and In-Service Software Upgrade

Explanation  It is stongly recommended to avoid changing forward delay time value to less than the default value of 15 seconds since it can cause STP data loops during High Availability Dual-Supervisor Switchover and also during In-Service Software Upgrade. Please read the release notes.

Recommended Action  Please change the forward delay time to be greater than or equal to the default value of 15 seconds

Error Message  STP-4-HELLOTIME_CONFIG_CHANGE: Hello time change to [dec] seconds for instance [chars] is not recommended as it can trigger STP Topology Changes during High Availability Dual-Supervisor Switchover and In-Service Software Upgrade

Explanation  It is stongly recommended to avoid changing Hello time value to less than the default value of 2 seconds since it can trigger STP Topology change during High Availability Dual-Supervisor Switchover and also during In-Service Software Upgrade. Please read the release notes.

Recommended Action  Please change the hello time to be greater than or equal to the default value of 2 seconds.

Error Message  STP-4-MAC_ADDR_FLUSH_REQ_TIMEOUT: MAC Address Flush req to L2FM timedout after [dec] sec. vdc [dec], tree id [dec], num ports [dec], ports [chars], opcode [chars], msg id ([dec]), rr_token [hex]

Explanation  The MAC Address Flush Request to L2FM has timedout. check port

Recommended Action  LOG_STD_NO_ACTION

STP-6

Error Message  STP-6-FIRST_BPDU_TX: First BPDU transmitted

Explanation  First BPDU transmitted.

Recommended Action  No action is required.

Error Message  STP-6-MST_DIGEST: MST digest changed to [chars], pre-std digest changed to [chars]

Explanation  MST Region configuration has changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-MST_PORT_BOUNDARY: Port [chars] [chars] as MST Boundary port

Explanation  MST Boundary port status of the specified port is changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-MST_PORT_PRE_STANDARD: Port [chars] [chars] as MST Pre-standard port.

Explanation  MST pre-standard status of the specified port is changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_ADDED: Interface [chars], added to [chars] with role [chars], state [chars], cost [dec], priority [dec], link-type [chars]

Explanation  This spanning tree port has been added

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_COST: Port [chars] instance [chars] cost changed to [dec]

Explanation  The spanning tree port cost has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_DELETED: Interface [chars], removed from [chars]

Explanation  This spanning tree port has been deleted

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_LINK_TYPE: Port [chars] instance [chars] link changed to [chars]

Explanation  The spanning tree port link type has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_PRIORITY: Port [chars] instance [chars] priority changed to [dec]

Explanation  The spanning tree port priority has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_ADDED: Interface [chars] added to [chars] with cost [dec], priority [dec], link-type [chars]

Explanation  This spanning tree port has been added

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_DELETED: Interface [chars] removed from [chars]

Explanation  This range spanning tree logical ports has been deleted

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_ROLE: new_role=[chars] interface=[chars] [chars]

Explanation  The role of the range of spanning tree logical ports has changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_RANGE_STATE: new_state=[chars] interface=[chars] [chars]

Explanation  The range of Spanning-Tree logical ports have changed state.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_ROLE: Port [chars] instance [chars] role changed to [chars]

Explanation  The spanning tree port role has changed for the specified port

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PORT_STATE: Port [chars] instance [chars] moving from [chars] to [chars]

Explanation  The Spanning-Tree port has changed state.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-PRESTD_NEIGH: This switch has received a pre-standard MST BPDU on port [chars]: Invoking pre-standard MST BPDU transmission on this port.

Explanation  The switch has received a pre-standard MST BPDU on a port. The switch will automatically adjust its mode of operation on this port and will start sending pre-standard BPDUs.

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-ROOT: Root bridge for [chars] changed to [chars]

Explanation  The spanning tree root bridge has changed

Recommended Action  LOG_STD_NO_ACTION

Error Message  STP-6-SERVICE_UP: Initialized [chars]

Explanation  STP line 2.

Recommended Action  No action is required.

Error Message  STP-6-STATE_CREATED: Internal state created [chars]

Explanation  STP has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

STRIPCL Messages

This section contains the STRIPCL messages.

STRIPCL-4

Error Message  STRIPCL-4-LABEL_FAILED: Label [dec] cannot be added as HW programming failed:[dec]([chars])

Explanation  HW API Fail, so new label cannot be added

Recommended Action  Correct the error and retry

Error Message  STRIPCL-4-LABEL_THRESHOLD: MPLS label count([dec]) has gone [chars] the [dec]% threshold. Last [dec]

Explanation  The number of labels in system has crossed a threshold

Recommended Action  Adjust the label age or delete entries to prevent hitting the limit

STRIPCL-5

Error Message  STRIPCL-5-LABEL_LIMIT: More labels cannot be added as [dec] are already in use. Last [dec]

Explanation  HW limit has reached, so new labels cannot be added

Recommended Action  Delete the extra labels or wait for aging

SYSMGR Messages

This section contains the SYSMGR messages.

SYSMGR-0

Error Message  SYSMGR-0-ACTIVE_SUP_LESS_MEMORY: Active Sup and Standby Sup are different model. Replace Sup in slot [dec] with same memory config for continued redundancy post switchover

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  SYSMGR-0-STANDBY_SUP_LESS_MEMORY: Active Sup and Standby Sup are different model. Replace Sup in slot [dec] with same memory config for continued redundancy post switchover

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

SYSMGR-2

Error Message  SYSMGR-2-ACTIVE_LOWER_MEM_THAN_STANDBY: Active supervisor in slot [dec] is running with less memory than standby supervisor in slot [dec].

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  SYSMGR-2-BOOTSCOPE_HANDSHAKE: Service "[chars]" is in the boot scope, but tried a regular handshake. Discarding request.

Explanation  A service is trying to take actions that belong to a different class of services.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CFGCTRL_SBY_SAVE_FAILED: The cfgctrl process has failed to save the config on the standby supervisor. reason: [chars]

Explanation  Configuration control has failed to save the configuration on the standy supervisor.

Recommended Action  Please see the reason string

Error Message  SYSMGR-2-CFGERASE_ABORTED: Write erase aborted.

Explanation  Write erase has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGSNAPSHOT_ABORTED_DIR: Unable to open the configuration directory. Aborting configuration snapshot.

Explanation  The destination location for the snapshot-config could not be found.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGSNAPSHOT_ABORTED_INIT: Unable to initialize the configuration directory (error-id [hex]). Aborting configuration snapshot.

Explanation  An attempt to copy the startup-config to snapshot-config has failed because the old data could not be removed.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGSNAPSHOT_ABORTED: Configuration snapshot aborted.

Explanation  An attempt to save a snapshot of the startup-config has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGSYNC_FAILURE: Syncing of the configuration to the standby failed.

Explanation  Syncing of the configuration to the standby failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_CONFELEMENT_RETRIES: Copy R S failed as config-failure retries are ongoing. Type "show nxapi retries" for checking the ongoing retries.

Explanation  Copy R S failed as config-failure retries are ongoing.

Recommended Action  Please verify the syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_DIR: Unable to open the configuration directory. Aborting configuration copy.

Explanation  The destination location for the startup-config could not be found.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_INIT: Unable to initialize the configuration directory (error-id [hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because the old data could not be removed.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_LABEL: Unable to label the new configuration (error-id [hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because the new startup-config could not be stamped.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_LOCK: Unable to lock the configuration (error-id [hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because the system could not lock the required configuration items.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CFGWRITE_ABORTED_LOG: Unable to open a log file for the new configuration: [chars] (error-id [hex]). Aborting configuration copy.

Explanation  An attempt to copy the running-config to startup-config has failed because a log file could not be created.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CFGWRITE_ABORTED: Configuration copy aborted.

Explanation  A configuration copy has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again.

Error Message  SYSMGR-2-CFGWRITE_TIMEOUT_ABORT: Configuration copy aborted by timeout.

Explanation  A service failed to store its configuration in the timeout period. The operation has been aborted.

Recommended Action  No action is required.

Error Message  SYSMGR-2-CFGWRITE_USER_ABORT: Configuration copy aborted by the user.

Explanation  The user typed CTRL+C while the configuration was being saved, and the operation has been aborted.

Recommended Action  No action is required.

Error Message  SYSMGR-2-CONVERT_FUNC_FAILED: Conversion function failed for service "[chars]" (error-id [hex]).

Explanation  This message indicates that the conversion function failed for this service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CONVERT_FUNC_NOTFOUND: Conversion function not found for service "[chars]".

Explanation  This message indicates that the system could not find appropriate conversion function for this service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CONVERT_LIB_NOTFOUND: Conversion library not found for service "[chars]".

Explanation  This message indicates that the system could not find conversion library for this service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CONVERT_STARTUP_ABORTED: Conversion of startup-config failed.

Explanation  This message indicates that the conversion of startup configuration was aborted.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-CONVERT_ZIPPING_FAILED: Failed to zip the converted startup configuration.

Explanation  This message indicates that conversion of the startup configuration failed when system was trying to zip the converted configuration.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-CORE_SAVE_FAILED: [chars]: PID [dec] with message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-CREATE_DONEFILE_FAILED: Creating /var/run/sysmgr.initdone failed with return value: ([dec]).

Explanation  The initialization of the system could not complete.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-DELETE_BINARY_STARTUP_FAILED: Deletion of binary startup config failed during boot (error-id [hex]).

Explanation  This message indicates that the deletion of the binary startup configuration failed during boot.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-FEATURE_SET_NOT_DISABLED_SRVS: vdc [dec]: feature-set 0x%llx: Following services did not cleanup: [chars]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-FEATURE_SET_SRVTIMEOUT: vdc [dec]: feature-set 0x%llx [chars]: Following services did not respond in time: [chars]

Explanation  The services did not handshake with sysmgr in time

Recommended Action  No action is required.

Error Message  SYSMGR-2-FEATURE_SET_UNGRACEFUL_DISABLE_FAILED_SRVS: vdc [dec]: feature-set 0x%llx: Following services did not exit even after SIGKILL: [chars]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-FORMAT_FAILURE_SUP_RESET: Failure to format a partition successfully causing sup to reset.

Explanation  The partition used to store non-volatile pss files could not be formatted successfully. The supervisor will be reset.

Recommended Action  If the problem persists, please contact customer support.

Error Message  SYSMGR-2-GSYNC_ABORT: Global sync aborted by signal.

Explanation  The initial synchronization of the services has been aborted. The synchronization will be attempted again later.

Recommended Action  Use the command 'reload module ' to reset the standby supervisor if you want to try again.

Error Message  SYSMGR-2-GSYNC_GET_TIMEOUT: Request for global sync for UUID [hex] not completed in specified time.

Explanation  Service failed to complete global sync in specified time. The standby will no longer act as a HA standby.

Recommended Action  If the problem persists, please contact customer support.

Error Message  SYSMGR-2-GSYNC_READY_SRVFAILED: Service "[chars]" on standby supervisor failed to restore its snapshot (error-id [hex]).

Explanation  The initial synchronization of service [chars] has failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-GSYNC_SNAPSHOT_SRVFAILED: Service "[chars]" on active supervisor failed to store its snapshot (error-id [hex]).

Explanation  The initial synchronization of service [chars] has failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-HANDSHAKE_FAILED: Handshake with service "[chars]" in vdc [dec] failed since send failed: [chars] (error-id [hex]).

Explanation  Handshake with a service failed since system manager could not send handshake response to it.

Recommended Action  No action is required.

Error Message  SYSMGR-2-HAP_FAILURE_SUP_RESET: Service "[chars]" in vdc [dec] has had a hap failure

Explanation  One of the services failed HA policy. This module would reset if hap-reset is enabled. Service will not restart if module is not reset

Recommended Action  No action is required.

Error Message  SYSMGR-2-HASWITCHOVER_PRE_START: This supervisor is becoming active (pre-start phase).

Explanation  A cold switchover has started (pre-start phase).

Recommended Action  When the other supervisor is back online, use the command 'show system reset-reason' to know what caused the switchover.

Error Message  SYSMGR-2-HASWITCHOVER_START: Supervisor [dec] is becoming active.

Explanation  A cold switchover has started.

Recommended Action  When the other supervisor is back online, use the command 'show system reset-reason' to know what caused the switchover.

Error Message  SYSMGR-2-HEARTBEAT_FAILED: Sysmgr heartbeat failed at %lu. [chars]. [chars] ([dec])

Explanation  System manager had failure while trying to heartbeat with KLM

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INBAND_START_FAILED: Failure while bringing up inband after ISSU reboot, errno: [dec].

Explanation  Sysmgr tried to bring up inband after ISSU reboot, but the call returned error.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INVALID_HANDSHAKE: Invalid secret ([dec]) received from service "[chars]". Expected [dec].

Explanation  A service can't be started.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INVALID_SYSMGRCONF: [chars]: invalid configuration file "[chars]": [chars] (error-id [hex]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-INVALID_VERSIONMSG: The remote System Manager ([chars]) declares itself in the same state as this System Manager ([chars]).

Explanation  The redundancy state negotiation between the two supervisors failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-ISSU_FAILED: The ISSU has failed: [chars] (error-id [hex])

Explanation  The ISSU has failed and the switch need to be rebooted.

Recommended Action  No action is required.

Error Message  SYSMGR-2-LAST_CORE_BASIC_TRACE: [chars]: PID [dec] with message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-MSG_SEND_FAILURE_STANDBY_RESET: Failure in sending message to standby causing standby to reset.

Explanation  We will be resetting the standby since mts on the active is unable to send a message to standby.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-MTS_FLUSH_SYNC_QUEUE_FAILURE: flush mts sync queue failed with [chars] (errno [dec])

Explanation  Calling mts_flush_sync_queue to guarante no outstanding messages. the failure might affect HA

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-NON_VOLATILE_DB_FULL: System non-volatile storage usage is unexpectedly high at [dec]%.

Explanation  System non-volatile storage space is almost full.

Recommended Action  Please run the command 'clear processes log pid ' to delete log file for specific instance that show up via the command 'show processes log all'. To clear out all log files, use the command 'clear processes log all'

Error Message  SYSMGR-2-NON_VOLATILE_DB_INODE_FULL: System non-volatile inode storage usage is unexpectedly high at [dec]%.

Explanation  System non-volatile inode storage space is almost full.

Recommended Action  Please run the command 'clear processes log pid ' to delete log file for specific instance that show up via the command 'show processes log all'. To clear out all log files, use the command 'clear processes log all'

Error Message  SYSMGR-2-ONBOARD_FAILURE_LOGGING_FULL: Onboard failure logging usage is unexpectedly high at [dec]%.

Explanation  Onboard failure logging space is almost full.

Recommended Action  Please run the command 'clear logging onboard'. If this message continues to persist, please contact TAC.

Error Message  SYSMGR-2-PARSEERR_DEPENDCYCLE: Dependency cycle found among [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDCONFIG: [chars]: duplicated definition for service config. Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDDEPEND: [chars]: duplicated dependency from "[chars]" for service "[chars]". Previous use in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDNAME: [chars]: short name "[chars]" used by service "[chars]" is also used by service "[chars]" in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDOPTION: [chars]: duplicated definition for option [chars]->[chars] (service "[chars]"). Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDSERVICE: [chars]: duplicated definition for service "[chars]". Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUPLICATEDVERDB: [chars]: duplicated definition for service version_db. Previous definition in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_DUP_UGRPENTRY: [chars]: service "[chars]" duplicated in the current upgrade group. Previous use in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_FT_SET_ID_PARSEERR: [chars]: ft_set_id ([dec]) out of bound for "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INCONSISTENTOPT: [chars]: option "[chars]=[chars]" not consistent with "[chars]=[chars]" for service "[chars]"

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDCOMPCONDDEPEND: [chars] (in dependency list of compulsory conditional service "[chars]"): optional conditional service "[chars]" not allowed.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDCONDDEPEND: [chars] (in dependency list of ASAP service "[chars]"): conditional service "[chars]" not allowed.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDDEPEND: [chars] (in dependency list of service "[chars]"): service "[chars]" not defined for scope "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDEXEC: [chars]: invalid executable "[chars]" for service "[chars]": [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDHANDSHAKEDEPEND: [chars] (in handshake dependency list of service "[chars]"): service "[chars]" is MTS unaware or not defined for scope "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDIDENT: [chars]: [chars] "[chars]" not found for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDOPTION: [chars]: option [chars]->[chars] cannot be set to "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDSTDBYDEPEND: [chars]: service "[chars]" cannot be dependent on service "[chars]" due to the standby mode wait for that service.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALIDVDCDEPEND: [chars] (in dependency list of service "[chars]"): service "[chars]" is a [chars] service.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_CLEANUP_ARGUMENTS: [chars]: cleanup_arguments = "[chars]": only conditional services that are scripts can specify cleanup arguments

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_COND_SRV_MODE: [chars]: service "[chars]" not defined for scope "control" or not mts aware.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_DIR: [chars]: "[chars]" is not a valid [chars]: [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_GLOBAL_SYNC: [chars]: mts unaware service may not request for a global sync.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_HB: [chars]: "[dec]" is not a valid heartbeat timeout.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_MAX_INSTANCE: [chars]: [dec] is not a valid max_instance.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_SHELLTREE: [chars]: invalid shell parser tree "[chars]" for service "[chars]": [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_STANDBY_MODE_GLOBAL_SYNC: [chars]: service with standby mode wait cannot request for a global sync.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_STANDBY_MODE: [chars]: standby_mode should be run.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_STARTUP_MODE_DEPENDENCY: [chars]: Invalid dependency. Service "[chars]"'s startup mode ('[chars]') does not match dependent service "[chars]"'s startup mode ('[chars]').

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  No action is required.

Error Message  SYSMGR-2-PARSEERR_INVALID_TRANSL: [chars]: invalid translator "[chars]" for service "[chars]": [chars] ([dec]).

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_INVALID_UGRPENTRY: [chars]: service "[chars]" is not defined.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_MISSINGOPTION: [chars]: option [chars]->[chars] missing from service definition for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_MTSUNAWARE_HANDSHAKEDEPEND: [chars]: service "[chars]" is MTS unaware and cannot have handshake dependencies.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_NORESTART: [chars]: option [chars]->[chars] cannot be set without setting option [chars]->[chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_NOTCONFIG: [chars]: [chars] implemented only for service config.

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_ADD_SRV: Service "[chars]" cannot be added

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_DELETE_SRV: Service "[chars]" cannot be removed

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_MODIFY_PARAM: Cannot modify parameter [chars] for the service "[chars]", old value = [chars], new value = [chars]

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REPARSE_CANNOT_MODIFY_SRV: Configuration for service "[chars]" cannot be modified, param modified = [chars], old_value = [chars], new_value = [chars]

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_REP_UGRPENTRY: [chars]: service "[chars]" is used in more than one upgrade group. First use in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_TOOMANYDEPENDS_MULTIPLE_INST: [chars]: too many multiple instance dependencies ([dec]) for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_TOOMANYDEPENDS: [chars]: too many dependencies ([dec]) for service "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_UGRPDUPLICATEDNAME: [chars]: upgrade group name "[chars]" already used in [chars].

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARSEERR_UGRPNAMEREDEFINED: [chars]: the upgrade group is already called "[chars]".

Explanation  The system image contains an inconsistent list of services. The initialization of the system can't proceed further.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PARTIAL_CFGWRITE_ABORTED: Partial configuration copy aborted.

Explanation  A partial configuration copy has failed.

Recommended Action  Please verify the other syslog messages printed correct the problem, and try again. If problem persists, please run the command 'copy running-config startup-config' and try again.

Error Message  SYSMGR-2-PATCH_REPO_STORE_FAILED: Not enough space to store patch repo in standby bootflash

Explanation  Failed to store patch repo in standby bootflash

Recommended Action  Please free up few 100s mb in standby bootflash to store patch repo OIR bootflash and insert bootflash with needed space and then reload standby from active

Error Message  SYSMGR-2-PATCH_REPO_STORE_SYNC_FAILED: Feature RPMs out of sync, reloading standby

Explanation  Failed to sync rpm repo during HA

Recommended Action  Feature Rpm causing rpmstore inconsistency Cleanup .rpmstore from active if standby continously reloads

Error Message  SYSMGR-2-PLUGIN_BOOTUP_FAILURE: The bootup of the supervisor has failed due to plugin load: [chars] (error-id [hex])

Explanation  The bootup of the supervisor has failed due to plugin load.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PSS2FILE_CONVERT_FAILED: Conversion of file [chars] failed.

Explanation  Conversion of internal data format failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-PSS2_VOLATILE_DB_FULL: Volatile database usage in kernel is unexpectedly high at [dec]%.

Explanation  System volatile database in kernel space is almost full.

Recommended Action  Please run the command 'system system internal pss kernel memstats'. If this message continues to persist, please contact TAC.

Error Message  SYSMGR-2-REDSTATE_GETFAILED: Failed to request redundancy state: [chars] (error-id [hex]).

Explanation  The local supervisor is unable to get the redundancy state.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-REDSTATE_SETFAILED: Failed to set redundancy state: ret_val ([dec]).

Explanation  The local supervisor is unable to get the redundancy state.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-REDUNDANCY_CHANNEL_FAILURE: Remote sup will be rebooted since its coming up as active when local sup is still active.

Explanation  Remote sup is becoming active although local sup is still active. As a result, local sup will cause the remote sup to reset itself.

Recommended Action  If the problem persists, please contact customer support.

Error Message  SYSMGR-2-REDUNDANCY_HEARTBEAT_FAILURE: Heartbeat between active and standby on the redundancy channel not working for last [dec] minutes.

Explanation  This supervisor is not receiving heartbeat on the redundancy channel from the other supervisor. This can result in problems during switchover and switchover may even fail.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-REMOTE_VER_FAIL: Remote version extraction failed.

Explanation  Remote version extraction failed. Standby may not be in ha standby state.

Recommended Action  Reload Standby with image in bootflash.

Error Message  SYSMGR-2-RESTART_SYSTEM_LOG: We will be restarting system soon for vdc [dec].

Explanation  We will be restarting system since we were trying to do a hot switchover before all the state could have been transferred to this supervisor. So we will be doing a cold switchover now.

Recommended Action  No action is required.

Error Message  SYSMGR-2-RESTORE_RUNTIME_DB_FAILED: Restoring of runtime database for fabric switch upgrade failed during boot (error-id [hex]).

Explanation  This message indicates that the runtime database could not be restored during boot for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SAVE_RUNTIME_DB_FAILED: Saving of runtime database for fabric switch upgrade failed (error-id [hex]).

Explanation  This message indicates that the runtime database could not be saved for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SBY_RELOAD_CFGCTRL: The cfgctrl process on sby has failed [dec] times, reloading sby sup to recover

Explanation  Configuration control has failed multipe times, the standby supervisor will be automatically reloaded so that it can be recovered.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SERVICE_CRASHED: Service "[chars]" (PID [dec]) hasn't caught signal [dec][chars]

Explanation  A service has terminated its execution abnormally. The service might be restarted, depending on the HA policies implemented for the service.

Recommended Action  Please use the command 'show process' to verify that the service has been restarted.

Error Message  SYSMGR-2-SHUTDOWN_FAILURE: Unable to set signal handler for graceful shutdown: [chars] (error-id [hex]).

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-2-SHUTDOWN_REJECT: The System Manager is busy saving the configuration. Please try again later.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-2-SHUTDOWN_SYSTEM_LOG: vdc [dec] will shut down soon.

Explanation  We are shutting down system the vdc

Recommended Action  No action is required.

Error Message  SYSMGR-2-SIGKILL_FAILURE: Service "[chars]" failure to respond to SIGKILL causing supervisor to reset. Last heartbeat %.2f secs ago.

Explanation  We will be resetting the supervisor since service failed to respond to SIGKILL sent to it by System Manager.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SOCKET_ERROR: Failed to open socket connection, errno: [dec].

Explanation  Call to open socket connection failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SRV_CLEAR_MEMORY_ALERT: service "[chars]" clear memory alert ([dec]%)

Explanation  Clean Memory Alert Event received

Recommended Action  No action is required.

Error Message  SYSMGR-2-SRV_MAJOR_MEMORY_ALERT: service "[chars]" major memory alert ([dec]%)

Explanation  Major Memory Alert Event received

Recommended Action  No action is required.

Error Message  SYSMGR-2-SRV_MINOR_MEMORY_ALERT: service "[chars]" minor memory alert ([dec]%)

Explanation  Minor Memory Alert Event received

Recommended Action  No action is required.

Error Message  SYSMGR-2-SRV_SPAWN_FAILED: Spawning of service "[chars]" in vdc [dec] failed : [chars] (error-id [hex]).

Explanation  Failed to spawn a service

Recommended Action  No action is required.

Error Message  SYSMGR-2-STANDBY_BOOT_FAILED: Standby supervisor failed to boot up.

Explanation  This message is printed if the standby supervisor doesn't complete its boot procedure (i.e. it doesn't reach the login prompt on the local console) 3 to 6 minutes after the loader has been loaded by the BIOS. This message is usually caused by boot variables not properly set for the standby supervisor. This message can also be caused by a user intentionally interrupting the boot procedure at the loader prompt (by means of pressing ESC).

Recommended Action  Connect to the local console of the standby supervisor. If the supervisor is at the loader prompt, try to use the 'boot' command to continue the boot procedure. Otherwise, issue a 'reload' command for the standby supervisor from a vsh session on the active supervisor, specifying the 'force-dnld' option. Once the standby is online, fix the problem by setting the boot variables appropriately.

Error Message  SYSMGR-2-STARTUP_CONVERSION_FAILED: Startup config conversion failed during boot (error-id [hex]).

Explanation  This message indicates that the conversion of startup configuration failed during boot.

Recommended Action  If the problem persists, please use the vshboot command 'init system' to initialize the configuration partition.

Error Message  SYSMGR-2-START_SCRIPT_FAILED: Start script (/isan/etc/rc.sysmgr start) failed with return value: ([dec]).

Explanation  The initialization of the system could not complete.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SUBPROC_SPAWN_FAILED: Spawning of sub-process "[chars]" in vdc [dec] failed : [chars] (error-id [hex]).

Explanation  Failed to spawn a sub-process

Recommended Action  No action is required.

Error Message  SYSMGR-2-SUP_POWERDOWN: Supervisor in slot [dec] is running with less memory than active supervisor in slot [dec]

Explanation  Supervisor memory mismatch

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_OVER: Switchover completed.

Explanation  The switchover is completed.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_SRVCRASHED: Service "[chars]" (PID [dec]) crashed during switchover - hasn't caught signal [dec] . Core will not be collected.

Explanation  The switchover failed because a service crashed during switchover.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_SRVFAILED: Service "[chars]" failed in performing its switchover actions (error-id [hex]).

Explanation  The switchover failed because a service could not transition to the active state.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_SRVTERMINATED: Service "[chars]" (PID [dec]) terminated during switchover with error code [dec] .

Explanation  The switchover failed because a service terminated during switchover.

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_THRESHOLD_EXCEEDED: Switchover threshold exceeded ([dec] switchovers happened within [dec] seconds). Powering down all linecards.

Explanation  Switchover threshold exceeded

Recommended Action  No action is required.

Error Message  SYSMGR-2-SWITCHOVER_TIMEOUT: Service "[chars]" (vdc [dec]) did not respond to switchover message in [dec] seconds

Explanation  The switchover timeout because a service failed to response

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SYNC_FAILURE_MSG_PAYLOAD: vdc [dec]: [chars]

Explanation  Dump out the msg to know what causes sync failure

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SYNC_FAILURE_STANDBY_RESET: Failure in syncing messages to standby for vdc [dec] causing standby to reset.

Explanation  We will be resetting the standby since mts on the active is unable to sync messages to standby.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-SYSMGR_AUTOCOLLECT_TECH_SUPPORT_LOG: This supervisor will temporarily remain online in order to collect show tech-support. This behavior is configurable via 'system [no] auto-collect tech-support'. Collected information in /bootflash/hap_reset_show_tech.gz.

Explanation  Supervisor is automatically collecting logs

Recommended Action  No action is required.

Error Message  SYSMGR-2-SYSMGR_MALLOC_FAIL: [chars]: malloc ([dec] bytes) for [chars] failed [chars]([dec])

Explanation  Malloc failed

Recommended Action  No action is required.

Error Message  SYSMGR-2-TMP_DIR_FULL: System temporary directory usage is unexpectedly high at [dec]%.

Explanation  System /tmp space is almost full.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-VDC_CREATE_DELETE_SRVCRASHED: Global vdc-aware service "[chars]" (PID [dec]) crashed during vdc create/delete on standby - hasn't caught signal [dec] .

Explanation  The creation/deletion of vdc on standby failed because a global vdc-aware service crashed on standby.

Recommended Action  No action is required.

Error Message  SYSMGR-2-VDC_CREATE_DELETE_SRVTERMINATED: Global vdc-aware service "[chars]" (PID [dec]) terminated during vdc create/delete on standby with error code [dec] .

Explanation  The creation/deletion of vdc on standby failed because a global vdc-aware service terminated on standby.

Recommended Action  No action is required.

Error Message  SYSMGR-2-VDC_DELETE_FAILURE: The vdc delete has failed: [chars] (error-id [hex])

Explanation  The vdc delete has failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-2-VDC_NOT_CLEANEDUP_SRVS: vdc [dec]: [chars]

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-2-VOLATILE_DB_FULL: System volatile database usage is unexpectedly high at [dec]%.

Explanation  System volatile database space is almost full.

Recommended Action  Please run the command 'system pss shrink'. If this message continues to persist, please contact TAC.

Error Message  SYSMGR-2-WARMSWITCHOVER_START: This supervisor is becoming active.

Explanation  A cold switchover has started.

Recommended Action  When the other supervisor is back online, use the command 'show system reset-reason' to know what caused the switchover.

Error Message  SYSMGR-2-WDT_KGDB: System watchdog kgdb has been [chars] for slot [dec].

Explanation  System watchdog kgdb has been [chars]. If the command has been enabled, the system will go into kgdb if there is a watchdog timeout.

Recommended Action  No action is required.

SYSMGR-3

Error Message  SYSMGR-3-BASIC_TRACE: [chars]: PID [dec] with message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-3-CAPABILITY_REDUN_CHANGE: Redundancy mode changed to [chars] due to configuration change.

Explanation  Some configuration changes have occurred causing administrative redundancy mode to change.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGCTRL_ABORT: signal to abort cfgctrl as super changes to the unstable state

Explanation  When super state changes to unstable, cfgctrl should be terminated

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGERASE_FAILED: Configuration erase failed (error-id [hex]).

Explanation  The requested configuration erase has failed. [dec] is the error-ID representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGSNAPSHOT_FAILED: Configuration snapshot failed (error-id [hex]).

Explanation  The requested configuration snapshot has failed. [dec] is the error-id representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGWRITE_FAILED: Configuration copy failed (error-id [hex]).

Explanation  The requested configuration copy has failed. [dec] is the error-id representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CFGWRITE_REJECT: Discarding request for configuration [chars]: configuration action already in progress.

Explanation  Another instance of the command 'copy running-config startup-config' is in progress.

Recommended Action  Please wait for the other instance to complete.

Error Message  SYSMGR-3-CFGWRITE_SRVCRASHED: Service "[chars]" crashed with signal ([dec]) while configuration was being saved

Explanation  A required service has crashed while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_SRVFAILED: Service "[chars]" failed to store its configuration (error-id [hex]).

Explanation  A required service has failed to store its own configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Use the 'show process' command to verify that the system is running properly and the service [chars] is behaving correctly. Then try again.

Error Message  SYSMGR-3-CFGWRITE_SRVTERMINATED: Service "[chars]" terminated with error code ([dec]) while configuration was being saved

Explanation  A required service has terminated while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_SRVTIMEOUT: Service "[chars]" failed to store its configuration in the timeout period

Explanation  A required service has failed to send a response after receving a request to store its configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVCRASHED: Service "[chars]" in vdc [dec] crashed with signal ([dec]) while configuration was being saved

Explanation  A required service has crashed while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVFAILED: Service "[chars]" in vdc [dec] failed to store its configuration (error-id [hex]).

Explanation  A required service has failed to store its own configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Use the 'show process' command to verify that the system is running properly and the service [chars] is behaving correctly. Then try again.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVTERMINATED: Service "[chars]" in vdc [dec] terminated with error code ([dec]) while configuration was being saved

Explanation  A required service has terminated while configuration was being saved. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-CFGWRITE_VDCSRVTIMEOUT: Service "[chars]" in vdc [dec] failed to store its configuration in the timeout period

Explanation  A required service has failed to send a response after receving a request to store its configuration into the startup-config. The overall configuration copy is considered failed.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-COPY_CORES_FAILED: Copying cores failed ([dec]).

Explanation  Copying cores to the destination failed because of an error specified in the log.

Recommended Action  No action is required.

Error Message  SYSMGR-3-COREDUMP_TIMEOUT: Failed to store the core in the specified time. Resetting ....

Explanation  Failed to store the core in the specified time. Resetting ...

Recommended Action  No action is required.

Error Message  SYSMGR-3-CORE_CLIENT_INIT_FAILED: Core client will not be started due to some internal error.

Explanation  Core client will not be started due to some internal error.

Recommended Action  No action is required.

Error Message  SYSMGR-3-CORE_OP_FAILED: Core operation failed: [chars]

Explanation  Mainly use to display failure on core operation in general

Recommended Action  No action is required.

Error Message  SYSMGR-3-CORE_SERVER_INIT_FAILED: Core server will not be started due to some internal error.

Explanation  Core server will not be started due to some internal error.

Recommended Action  No action is required.

Error Message  SYSMGR-3-DAEMONIZE_FAILED: Unable to daemonize service "[chars]": [chars] ([dec]).

Explanation  A service could not be spawned.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-DISCARD_BINCFG_CONVERT_FAILURE: Binary configuration is being discarded for the reasons: < [chars] >

Explanation  Binary configuration is being discarded due to conversion failure

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-3-DISCARD_BINCFG_VERCMP_FAILURE: Binary configuration is being discarded due to version compare failure

Explanation  Binary configuration is being dicarded since the version compare failed to decode the versions

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-3-FAILED_PFM_HANDSHAKE: PFM-handshake from service "[chars]" failed (error-id [hex]).

Explanation  The Platform Manager handshake has failed. The system can't proceed with the initialization.

Recommended Action  No action is required.

Error Message  SYSMGR-3-GSYNC_TIMEOUT_FAILED: Failed to set timeout for global sync for an application ([dec]).

Explanation  Failed to set timeout for global sync for an application. This can result in global sync to be stuck forever if application never complete global sync.

Recommended Action  No action is required.

Error Message  SYSMGR-3-HEARTBEAT_FAILURE: Service "[chars]" sent SIGABRT for not setting heartbeat for last [dec] periods. Last heartbeat %.2f secs ago.

Explanation  A service is not setting proper heartbeats to System Manager So it will kill this service and if this service has restartability set to TRUE, the service will restart.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_BOOT_HANDSHAKE: Boot-scope-handshake received from service "[chars]", that is in scope [dec] (not the boot scope).

Explanation  A service is trying to take actions that belong to a different class of services.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_PFM_HANDSHAKE: PFM-handshake received from service "[chars]", that is in scope [dec] (not the boot scope).

Explanation  A service is trying to take actions that belong to the Platform Manager service.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_TRANSITION: Transition from state [chars] to state [chars] is not allowed.

Explanation  Unexpected transition in the System Manager state machine.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-INVALID_UUID: Service "[chars]" is configured with UUID [hex], but uses UUID [hex].

Explanation  The identity of a service is inconsistent in the image file

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-ISSU_BEGIN_FAILED: ISSU cannot proceed (error-id [hex]).

Explanation  This message indicates that some service has blocked the ISSU.

Recommended Action  No action is required.

Error Message  SYSMGR-3-KILLALLSRVS_FAILURE: Sysmgr rtdb controller timed out while terminating all serivces.

Explanation  One or more services did not terminate during upgrade/downgrade.

Recommended Action  Please collect show tech ha to find the service that did not terminate.

Error Message  SYSMGR-3-LC_IMAGE_UPGRADE_FAILURE: Linecard image upgrade request failed(error-id [hex]).

Explanation  Linecard image upgrade request failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_RESET: Resetting linecard

Explanation  Linecard is being reset

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_SAVE_STATES_FAILURE: Save states request for the linecard failed(error-id [hex]).

Explanation  Save state request for the linecard failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_STOP_ASYNC_FAILURE: Stop async notification request failed(error-id [hex]).

Explanation  Stop async notification request for the linecard failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-LC_UPG_ERROR: LC ERROR: [chars]

Explanation  Linecard upgrade error message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-MISSING_OPTIONAL_CAPABILITY: Incomplete support for the current running-config on standby supervisor.

Explanation  Loose config incompatibilities exist between active and standby sup. Operational redundancy mode is still set to HA.

Recommended Action  No action is required.

Error Message  SYSMGR-3-MODULE_LOCK_FAILED: Failed to lock the local module to avoid reset (error-id [hex]).

Explanation  Locking the local module has failed. Reloading the local module can now result in switchover to fail.

Recommended Action  No action is required.

Error Message  SYSMGR-3-ND_UPGD_RECOVERY_SRVFAILED: Service "[chars]" in vdc [dec] failed in non-disruptive upgrade recovery (error-id [hex]).

Explanation  The non-disruptive upgrade failed because a service could not recover its state.

Recommended Action  No action is required.

Error Message  SYSMGR-3-OPERATIONAL_MODE_WARM: Operational redundancy mode set to warm (error-id [hex]).

Explanation  Operational redundancy mode will be set to warm. [dec] is the error-ID representing the reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-PARTIAL_CFGWRITE_FAILED: Partial configuration copy failed (error-id [hex]).

Explanation  The requested configuration copy has failed. [dec] is the error-ID representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-PARTIAL_CFGWRITE_VER_MISMATCH: Startup-config version not same as current software version.

Explanation  Startup-config version not same as current software version.

Recommended Action  Please do a copy running startup, and try again.

Error Message  SYSMGR-3-RTDBCTRL_BUILD_UPG_TBL_FAILED: Failed to prepare upgrade version table during pre-upgrade

Explanation  A required sequence in the preupgrade sequence has failed. The version table could not be built correctly

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRVFAILURE: Service "[chars]" responded with a failure

Explanation  A service responded with a failure to the request

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRVTIMEOUT: Service "[chars]" failed to respond back to System Manager in the specified timeout period

Explanation  A required service has failed to send a response after receiving a request for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRV_RECV_FAILED: Failed to receive response from Service "[chars]"

Explanation  A required service has failed to send a response after receiving a request for the fabric switch upgrade.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-RTDBCTRL_SRV_SEND_FAILED: Failed to send upgrade request to Service "[chars]"

Explanation  Failed to send upgrade request to a required service

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-SERVICE_BACKTRACE: [chars]

Explanation  Service crashed

Recommended Action  No actions required.

Error Message  SYSMGR-3-SERVICE_TERMINATED: Service "[chars]" (PID [dec]) has finished with error code [chars] ([dec]).

Explanation  A service has terminated its execution normally. Depending on the value of [dec2] and the HA policies implemented for the service, the service might be restarted automatically.

Recommended Action  No action is required.

Error Message  SYSMGR-3-SHUTDOWN_OVER: The System Manager is shutting down now.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-3-SHUTDOWN_START: The System Manager has started the shutdown procedure.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-3-STANDBY_UNSTABLE_FTSET_OPERATION: Restarting standby since it is not in hot standby state while feature-set operation was in progress in vdc [dec].

Explanation  Standby unstable during feature-set operation

Recommended Action  No action is required.

Error Message  SYSMGR-3-STANDBY_VDC_RESTART_FAILURE: vdc [dec] on standby failed to restart. error: [chars] ([hex])

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-3-SYSMGR_CRASHED: Sysmgr (PID [dec]) [chars]

Explanation  Sysmgr has terminated abnormally.

Recommended Action  Please use the command 'show process' to verify that sysmgr has been restarted.

Error Message  SYSMGR-3-TFTP_CORES_FAILED: TFTPing cores failed ([chars]).

Explanation  TFTPing cores to the destination failed because of an error specified in the log.

Recommended Action  No action is required.

Error Message  SYSMGR-3-UNACCEPTABLE_WAIT: Service "[chars]", no response from System Manager after [dec] seconds. Terminating.

Explanation  A spawned service couldn't handshake with the System Manager and it's about to be terminated.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-3-UNLINK_RELINK_CONF_FILES_FAILED: [chars] of conf files failed. plugin_id [dec]

Explanation  Unlink and/or Relink of configuration files failed.

Recommended Action  No action is required.

Error Message  SYSMGR-3-URIFS_APPLY_FAILED: Applying URI filesystem database failed (error-id [hex]).

Explanation  The application of URI filesystem database has failed. [dec] is the error-ID representing the failure reason.

Recommended Action  No action is required.

Error Message  SYSMGR-3-VAR_SYSMGR_FULL: System core file storage usage is unexpectedly high at [dec]%. This may cause corruption of core files

Explanation  System core file storage space is almost full.

Recommended Action  Please copy cores off the supervisor and run 'clear cores' to free some space

SYSMGR-4

Error Message  SYSMGR-4-BASIC_TRACE_WARNING: [chars]: PID [dec] with message [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-4-CFGWRITE_PARTIALFORCED: Some services are missing; partial configuration write forced.

Explanation  The system is not fully operational, but a configuration copy has been forced. The services that are not running won't save their configuration, and the next time they will restart with a default configuration.

Recommended Action  Use the 'show process' command to find out which required services are not running.

Error Message  SYSMGR-4-DISCARD_BINCFG_DOWNGRADE_VERSIONID: Binary configuration is being discarded, because the configuration was generatred previously by an image with higher version identfier

Explanation  Binary configuration is being discarded, because the configuration was generatred previously by an image with higher version identfier

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-4-DISCARD_BINCFG_HIGH_TRAINSTAMP: Binary configuration is being discarded, because the configuration was generatred previously by an image having higher trainstamp

Explanation  Binary configuration is being discarded, because the configuration was generatred previously by an image having higher trainstamp

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-4-DISCARD_BINCFG_SRG_INCOMPATIBLE: Binary configuration is being discarded due to incompatibility with running version

Explanation  Binary configuration is being dicarded due to incompatibility with running version

Recommended Action  No actions required. System will fallback to ASCII configuration

Error Message  SYSMGR-4-INVALID_GSYNC_GET: Service "[chars]" vdc [dec] requesting gsync without setting proper flag in its conf file.

Explanation  Service is requesting global sync without setting proper flag in its conf file.

Recommended Action  No action is required.

Error Message  SYSMGR-4-ON_DEMAND_STOP_UID_KNOWN: On-demand service "[chars]" stopped by uid ([dec]).

Explanation  The service start type is specified as type on-demand in its configuration file and an external request requested to abort it.

Recommended Action  No action is required.

Error Message  SYSMGR-4-ON_DEMAND_STOP: On-demand service "[chars]" stopped.

Explanation  The service start type is specified as type on-demand in its configuration file and an external request requested to abort it.

Recommended Action  No action is required.

Error Message  SYSMGR-4-PARSEWARN_INVALID_CFGFILE: [chars]: unable to find "[chars]": [chars] ([dec]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-4-PARSEWARN_RESTART_CNT_TOO_BIG: Service "[chars]": [chars] restart count of [dec] too big, needs to be set to [dec].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-4-PARSEWARN_VALUE_TOO_SMALL: [chars]: [chars] is too small, replaced with [dec].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-4-READCONF_REJECT: Discarding configuration update request: [chars].

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-4-READCONF_STARTED: Configuration update started (PID [dec]).

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-4-RESTORE_RSRVD_VLAN_TO_DEFAULT: Write erase procedure does not restore the default reserved VLAN range to [dec]-[dec]. Please run 'no system vlan reserve' to restore to defaults

Explanation  Default reserved vlan range

Recommended Action  No action is required.

Error Message  SYSMGR-4-SRVSCOPE_DELAYED: Waiting for redundancy state; termination delayed for scope [chars].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_CORE_TRUNCATED: Core seems to be truncated on generation. [dec] / [dec] KB. PID: [dec]

Explanation  Core likely truncated

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_PATCH_START_SERVICE: vdc [dec]: Service [chars] has restarted with pid [dec] as part of patch operation

Explanation  Service started for patching

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_PATCH_STOP_SERVICE: vdc [dec]: Service [chars] with pid [dec] has exited as part of patch operation

Explanation  Service exited for patching

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_PLUGIN_FAILURE: Received failure response [hex] from Plugin Manager

Explanation  Failure response from plugin mgr

Recommended Action  No action is required.

Error Message  SYSMGR-4-SYSMGR_VDC_CORE_DELETION: Cores in VDC [dec] will be deleted as part of VDC deletion

Explanation  VDC cores deleted

Recommended Action  No action is required.

Error Message  SYSMGR-4-UGRP_ALL_COMPLETED: Upgrade completed for all the groups.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

SYSMGR-5

Error Message  SYSMGR-5-CFGERASE_DONE: Configuration erase successful.

Explanation  The requested configuration erase has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGERASE_STARTED: Configuration erase started (PID [dec]).

Explanation  The requested configuration erase has started. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGINIT_STARTED: Initialization of the startup configuration started (PID [dec]).

Explanation  The requested initialization of the startup configuration has started. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGSNAPSHOT_DONE: Configuration snapshot successful.

Explanation  The requested configuration snapshot has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGSNAPSHOT_STARTED: Configuration snapshot started (PID [dec]).

Explanation  The requested configuration snapshot has started. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGWRITE_DONE: Configuration copy successful.

Explanation  The requested configuration copy has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CFGWRITE_STARTED: Configuration copy started (PID [dec]).

Explanation  On the active supervisor, this message indicates that the system has started to service a 'copy running-config startup-config' requested by the user. On the standby supervisor, this message indicates that the system is synchronizing the startup-config from the active supervisor. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-CONVERT_STARTUP_STARTED: Configuration conversion started (PID [dec]).

Explanation  This message indicates that the system has started conversion of startup configuration. This happens either on system boot or during the course of an upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-DELETE_BINARY_STARTUP_STARTED: Deletion of binary startup configuration started (PID [dec]).

Explanation  This message indicates that the system will be deleting the binary startup configuration, due to an error in the conversion of the startup conversion.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-FSM_STATE_TRANS: System Manager NESTED state transition from [chars] to [chars].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-5-IMPROPER_CLEANUP: Service "[chars]" exited without replying to switchover request.

Explanation  A conditional service exited without replying to switchover request. This message is for logging purposes only and does not affect the functionality of the system

Recommended Action  No action is required.

Error Message  SYSMGR-5-ISSU_ABORT: Notifying services of aborted ISSU (PID [dec]).

Explanation  This message indicates that the ISSU has been aborted and the services have been asked to rollback any changes.

Recommended Action  No action is required.

Error Message  SYSMGR-5-ISSU_BEGIN_STARTED: Notifying services of ISSU (PID [dec]).

Explanation  This message indicates that the system has started notifying services for the ISSU. Services can block the upgrade at this point.

Recommended Action  No action is required.

Error Message  SYSMGR-5-LC_UPGRADE_REBOOT: Rebooting linecard as a part of upgrade

Explanation  Linecard is being rebooted as a part of upgrade

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-LC_UPGRADE_START: Starting linecard upgrade

Explanation  Linecard upgrade is starting

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-MODULE_ONLINE: System Manager has received notification of local module becoming online.

Explanation  System Manager has received notification of local module becoming online.

Recommended Action  No action is required.

Error Message  SYSMGR-5-PARTIAL_CFGWRITE_ASCII_CONFIG: Startup-config version not present.

Explanation  Startup-config version not present.

Recommended Action  Startup-config version is not present. Ascii configuration will be applied.

Error Message  SYSMGR-5-PARTIAL_CFGWRITE_DONE: Partial configuration copy successful.

Explanation  The requested configuration copy has completed successfully.

Recommended Action  No action is required.

Error Message  SYSMGR-5-PARTIAL_CFGWRITE_STARTED: Partial configuration copy started by UUID [hex] (PID [dec]).

Explanation  This message is printed only on active supervisor, and indicates that service with mentioned UUID has requested a partial write mem. [dec] is the Process-ID of the process servicing the request.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RECOVERY_FAILED: Stateful recovery failed, system manager will now start stateless.

Explanation  Stateful recovery failed, system manager will now restart system and start stateless.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RUNTIME_DB_RESTORE_STARTED: Runtime database controller started (PID [dec]).

Explanation  This message indicates that the system has started the restoration of the runtime database. This happens during the non-disruptive fabric switch upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RUNTIME_DB_RESTORE_SUCCESS: Runtime database successfully restored.

Explanation  This message indicates that the runtime database has been successfully restored for the non-disruptive fabric switch upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-RUNTIME_DB_SAVE_STARTED: Runtime database save has started (PID [dec]).

Explanation  This message indicates that the system has started the saving of the runtime database. This happens during the non-disruptive fabric switch upgrade.

Recommended Action  No action is required.

Error Message  SYSMGR-5-SERVICE_DELETED: Service "[chars]" has been removed from the System Manager database.

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

Error Message  SYSMGR-5-STATEFUL_STATE: System Manager is in state [chars] after stateful restart.

Explanation  System Manager has been restarted stateful after an error that resulted in System Manager exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-5-SUBPROC_KILLED: "[chars]" (PID [dec]) hasn't caught signal [dec][chars]

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-5-SUBPROC_TERMINATED: "[chars]" (PID [dec]) has finished with error code [chars] ([dec]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-5-UGRP_COMPLETED: Upgrade completed for group [dec].

Explanation  This is a legacy message that can be ignored from Cisco MDS SAN-OS release 1.3(4a).

Recommended Action  No action is required.

SYSMGR-6

Error Message  SYSMGR-6-ALL_SCOPES_STARTED: System services have completely started at this time.

Explanation  System services have completely started at this time.

Recommended Action  No action is required.

Error Message  SYSMGR-6-HANDSHAKE_DONE: Handshake with service "[chars]" successfully performed.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-HANDSHAKE_VERIFYING_DONE: Handshake verification done from service "[chars]".

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-LC_UPG_DEBUG: LC DEBUG: [chars]

Explanation  Linecard upgrade debug message

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  SYSMGR-6-RLIMIT_INFO: rlimit of service "[chars]"([dec]) = %llu

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRVSCOPE_COMPLETED: Completed execution for scope [chars].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRVSCOPE_STARTED: Started execution for scope [chars].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRVSTATE_CHANGED: State for service "[chars]" changed from [chars] to [chars] in vdc [dec].

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-6-SRV_ENQUEUED_FOR_START: Conditional service "[chars]" started by sap "[dec]" has been enqueued for start.

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-STATE_CHANGED: System Manager state changed from [chars] to [chars] for vdc [dec].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-SUPERSTATE_CHANGED: System Manager super state changed from [chars] to [chars] for vdc [dec].

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-6-UNEXPECTED_GSYNC_RESTART_STANDBY: Sending a message to restart system on standby on vdc [dec].

Explanation  Activity occurred on active supervisor that is incompatible with state of standby. System will be restarted on standby.

Recommended Action  No action is required.

SYSMGR-7

Error Message  SYSMGR-7-CFGWRITE_UNEXPECTEDRSP: Discarding unexpected response from service "[chars]".

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-7-DUPLICATED_PFM_HANDSHAKE: PFM-handshake received from service "[chars]", but information already available.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-LIBCDB_FAILURE: Conversion for service "[chars]" failed in libcdb.

Explanation  This message indicates that either the system could not find conversion tarball or there is no conversion library needed for this service.

Recommended Action  No action is required.

Error Message  SYSMGR-7-LIBVDB_FAILURE: Conversion for service "[chars]" failed in libvdb.

Explanation  This message indicates that the system could not find package information for this service in the version database.

Recommended Action  No action is required.

Error Message  SYSMGR-7-ND_UPGD_RECOVERY_SRVSUCCEEDED: Service "[chars]" recovered its state during non-disruptive upgrade.

Explanation

Recommended Action  No action is required.

Error Message  SYSMGR-7-NO_STARTUP_CONFIG: No startup-config to convert.

Explanation  This message indicates that the system tried to convert startup configuration but it found no configuration to convert.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SERVICE_STARTED: Service "[chars]" in vdc [dec] started with PID([dec]).

Explanation  The System Manager is starting a service. This message is for debugging purposes only.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SERVICE_SUCCESS_EXIT: Service "[chars]" (PID [dec]) has successfully exited with exit code [chars] ([dec]).

Explanation  A service has successfully exited its execution.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SUBPROC_SUCCESS_EXIT: "[chars]" (PID [dec]) has successfully exited with exit code [chars] ([dec]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-SWITCHOVER_SRVSUCCEDED: Service "[chars]" completed its switchover actions.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNEXPECTEDMSG: Opcode [dec] not expected at this time from service "[chars]" ([chars]).

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNADDR: Opcode [dec] received from unknown source [chars]. Discarding.

Explanation  This message is for Cisco TAC debugging. This is not a problem or malfunction.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNMSG: Unknown opcode [dec] received from [chars].

Explanation  The System Manager has received an unrecognized message with the specified opcode. [chars] is the source of the message. This message is for debugging purposes only.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNPID: Opcode [dec] received from [chars] with unknown PID [dec]. Discarding.

Explanation  The System Manager has received a message from an unknown process. [chars] is the source of the message. This message is for debugging purposes only.

Recommended Action  No action is required.

Error Message  SYSMGR-7-UNKNOWNUUID: Opcode [dec] received from [chars] with unknown UUID [dec]. Discarding.

Explanation  The System Manager has received an unrecognized message from the specified UUID. [chars] is the source of the message. This message is for debugging purposes only.

Recommended Action  No action is required.

TACACS Messages

This section contains the TACACS messages.

TACACS-2

Error Message  TACACS-2-TACACS_PROGRAM_EXIT: TACACS+ daemon exiting: [chars]

Explanation  TACACS+ daemon is exiting.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

TACACS-3

Error Message  TACACS-3-TACACS_ERROR_MESSAGE: [chars]

Explanation  TACACS+ Error Message

Recommended Action  No action is required.

TACACS-4

Error Message  TACACS-4-TACACS_WARNING: [chars]

Explanation  TACACS+ warning

Recommended Action  No action is required.

TACACS-5

Error Message  TACACS-5-TACACS_MONITOR_STATUS: [chars] [chars]

Explanation  Notifying Tacacs+ server monitor status change

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_NOTIFICATION: [chars]

Explanation  TACACS+ notification

Recommended Action  No action is required.

Error Message  TACACS-5-TACACS_SERVER_STATUS: [chars] server [chars] with auth-port [dec] and acct-port [dec] status has changed from [chars] to [chars]. Server was in previous-state for [chars], and total dead time of the server is [chars]

Explanation  Notifying Tacacs+ server status change

Recommended Action  No action is required.

TACACS-6

Error Message  TACACS-6-TACACS_ACCOUNTING_MESSAGE: [chars]

Explanation  Accounting Message

Recommended Action  No action is required.

Error Message  TACACS-6-TACACS_MESSAGE: [chars]

Explanation  TACACS+ Message

Recommended Action  No action is required.

TAHUSD Messages

This section contains the TAHUSD messages.

TAHUSD-2

Error Message  TAHUSD-2-TAHUSD_SYSLOG_PFCWD_QUEUE_RESTORED: [chars]

Explanation  NO DROP Queue Restored due to PFC WatchDog timer expiring message

Recommended Action  No action is required.

Error Message  TAHUSD-2-TAHUSD_SYSLOG_PFCWD_QUEUE_SHUTDOWN: [chars]

Explanation  Queue Shutdown due to PFC WatchDog timer expiring as a result of NO DROP Queue stuck message

Recommended Action  No action is required.

TAHUSD-3

Error Message  TAHUSD-3-TAHUSD_SPEED_MSG: [chars]

Explanation  TAHUSD Error: same port speed must be set within a 4-port group

Recommended Action  No action is required.

TAHUSD-6

Error Message  TAHUSD-6-TAHUSD_L2_LEARN_DISABLE_MTM_FLOW_CTRL: [chars]

Explanation  MAC Learning Disabled due to MTM flow control

Recommended Action  No action is required.

Error Message  TAHUSD-6-TAHUSD_SYSLOG_INFO: [chars]

Explanation  Tahoe log message

Recommended Action  No action is required.

TBIRD_CMN_USD Messages

This section contains the TBIRD_CMN_USD messages.

TBIRD_CMN_USD-6

Error Message  TBIRD_CMN_USD-6-TBIRD_CMN_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

TCAP Messages

This section contains the TCAP messages.

TCAP-2

Error Message  TCAP-2-MEM_FULL: Memory allocation failed.

Explanation  TCAP process has failed to allocate memory.

Recommended Action  Please perform a 'show tcap event-history' to collect more information.

Error Message  TCAP-2-PROC_DN: Process is shutting down: [chars]

Explanation  TCAP process is exiting.

Recommended Action  Please perform a 'show tcap event-history' to collect more information.

Error Message  TCAP-2-PROC_INITFAIL: Process initialization failed due to [chars].

Explanation  TCAP process has failed initialization.

Recommended Action  Please perform a 'show tcap event-history' to collect more information.

TELEMETRY Messages

This section contains the TELEMETRY messages.

TELEMETRY-1

Error Message  TELEMETRY-1-ALERT: [chars]

Explanation  Alert message

Recommended Action  ACTION_NONE

TELEMETRY-2

Error Message  TELEMETRY-2-CRITICAL: [chars]

Explanation  Critical message

Recommended Action  ACTION_NONE

TELEMETRY-3

Error Message  TELEMETRY-3-ERROR: [chars]

Explanation  Error message

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-INFRA_SYSERR: Error returned from [chars]: errno=[dec] ([chars])

Explanation  Telemetry invoke an infra API which returned an error

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-INITERR: TM initialized [chars] failed

Explanation  Initialization failures condition

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-MALLOC_FAILED: Memory allocation failed for [chars]

Explanation  Telemetry could not allocate memory

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-MTS_DROP: Error returned from mts_drop(): [chars]

Explanation  An MTS API returned error when Telemetry tried to drop a message

Recommended Action  ACTION_KEEP_RUNNING

Error Message  TELEMETRY-3-MTS_HANDLER_ERR: Unable to handle mts[[dec]] message [chars]: [chars]

Explanation  An MTS API handler returned error when Telemetry tried to process message

Recommended Action  ACTION_KEEP_RUNNING

Error Message  TELEMETRY-3-TM_ERROR: Telemetry Error:[chars]. errno=[dec] ([chars])

Explanation  Telemetry API returned an error

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-TM_SUBSCRIBE_ERR: Event subscription for sensor path [chars] failed. Error: [chars].

Explanation  Telemetry Event subscription failed

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-TM_SUB_UNSUPPORTED: Event subscription is not supported for [chars] sensor-group %l u

Explanation  Telemetry Event subscription not supported

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-3-TRANSPORT_DISABLED: Disabling [chars] transport for [chars] after [dec] consecutive errors.

Explanation  Telemetry transport is disabled due to consecutive errors.

Recommended Action  Make sure receiver is up and running and reconfigure destination group.

Error Message  TELEMETRY-3-TRANSPORT_SEND_ERROR: [chars] send to [chars] failed. ([chars])

Explanation  Telemetry transport send failure.

Recommended Action  Make sure receiver is up and running.

TELEMETRY-4

Error Message  TELEMETRY-4-COLLECTOR_WARNING: [chars]. (While collecting: [chars])

Explanation  Telemetry data collector warning message.

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-4-DISABLE_DONE: [chars]

Explanation  Telemetry is now disabled. You can re-enable the feature if needed.

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-4-DISABLING_FEATURE: [chars]

Explanation  Telemetry is being disabled. Please wait until process terminates.

Recommended Action  Don't re-enable telemetry until the process exits.

Error Message  TELEMETRY-4-DME_GET_ERR: [chars] data retrieval failed for path:[chars]

Explanation  DME Data collection failed for DN path

Recommended Action  ACTION_KEEP_RUNNING

Error Message  TELEMETRY-4-MSG_TOO_BIG: Message size [dec] exceeds allowed size of [dec] bytes for [chars] (DN:[chars]). Please use a different transport protocol.

Explanation  Telemetry message is too big. Consider using a different transport protocol.

Recommended Action  Message is too large. Use a different transport protocol

Error Message  TELEMETRY-4-QUEUE_FULL: [chars] queue is full. Consider scaling down configuration or check if receiver is running.

Explanation  Telemetry is streaming out too much data.

Recommended Action  Consider scaling down Telemetry configuration.

Error Message  TELEMETRY-4-TRANSPORT_RECONFIGURE: [chars]

Explanation  A configuration change requires reconfiguring destination groups to take effect.

Recommended Action  Reconfigure telemetry destination groups.

Error Message  TELEMETRY-4-VRF_UNUSABLE: VRF [chars] is not usable. Telemetry streaming is being skipped.

Explanation  Telemetry does not stream due to unusable VRF/Namespace.

Recommended Action  Make sure to configure the VRF.

Error Message  TELEMETRY-4-WARNING: [chars]

Explanation  Warning message

Recommended Action  ACTION_NONE

TELEMETRY-5

Error Message  TELEMETRY-5-NOTICE: [chars]

Explanation  Normal bug significant condition

Recommended Action  ACTION_NONE

TELEMETRY-6

Error Message  TELEMETRY-6-INFO: [chars]

Explanation  Informational message

Recommended Action  ACTION_NONE

Error Message  TELEMETRY-6-SYSLOG_UNKNOWN: Syslog message id [dec] is not implemented

Explanation  Telemetry syslog message has not been implemented

Recommended Action  ACTION_NONE

TELEMETRY-7

Error Message  TELEMETRY-7-DEBUG: [chars]

Explanation  Debug message

Recommended Action  ACTION_NONE

TEMPLATE_MANAGER Messages

This section contains the TEMPLATE_MANAGER messages.

TEMPLATE_MANAGER-2

Error Message  TEMPLATE_MANAGER-2-MODE_CHANGED: System changed to "[chars]" mode.

Explanation  The system changed to [chars] mode.

Recommended Action  No action is required.

Error Message  TEMPLATE_MANAGER-2-MODE_CHANGE_WARN: System will be moved to "[chars]" mode in [dec] minutes

Explanation  The system will be automatically changed to normal mode.

Recommended Action  No action is required.

Error Message  TEMPLATE_MANAGER-2-MODE_SNAPSHOT_ERROR: Creation of [chars] snapshot failed. Please check bootflash space.

Explanation  Creation of [chars] snapshot failed, check to see if bootflash has enough space to create snapshot.

Recommended Action  No action is required.

TEMPLATE_MANAGER-3

Error Message  TEMPLATE_MANAGER-3-ALLOC_FAILED: Failed in File:[chars] Line:[dec] for type [dec] size [dec]

Explanation  Mmode process could not allocate heap memory in File:[chars], at line:[dec], for memory-type:[dec] of Size:[dec]

Recommended Action  No action is required.

Error Message  TEMPLATE_MANAGER-3-ASSERTION_FAILED: Failed in file:[chars] line:[dec]

Explanation  Mmode process assertion failed in File:[chars], at line:[dec]

Recommended Action  No action is required.

TEMPLATE_MANAGER-4

Error Message  TEMPLATE_MANAGER-4-MISSING_COMMAND_NAME: The command "[chars]" does not have command name and may cause mmode to work incorrectly.

Explanation  The command does not have command name defined in its command definition file.

Recommended Action  If the command is to be configured with mmode, the developer must define its command name.

Error Message  TEMPLATE_MANAGER-4-MODE_SNAPSHOT_DONE: The after_maintenance snapshot is complete and available for comparison

Explanation  The after_maintenance snapshot done after moving to normal mode is complete and available.

Recommended Action  No action is required.

TTYD Messages

This section contains the TTYD messages.

TTYD-2

Error Message  TTYD-2-TTYD_ERROR: TTYD Error [chars]

Explanation  Critical TTY daemon error.

Recommended Action  No action is required.

Error Message  TTYD-2-TTYD_MTS: TTYD Message queue [dec] [chars]

Explanation  TTY daemon message error.

Recommended Action  No action is required.

Error Message  TTYD-2-TTYD_SDWRAP: TTYD Debug Facility error [dec] [chars]

Explanation  TTY daemon Debug Facility failed.

Recommended Action  No action is required.

TTYD-3

Error Message  TTYD-3-TTYD_MISC_ERROR: Error [chars] with error [chars]([hex])

Explanation  TTY daemon errors.

Recommended Action  No action is required.

TTYD-4

Error Message  TTYD-4-TTYD_WARN: TTYD Warning [chars]

Explanation  TTY daemon warning.

Recommended Action  No action is required.

TTYD-6

Error Message  TTYD-6-TTYD_MISC: TTYD [chars]

Explanation  The tty daemon miscellaneous message.

Recommended Action  No action is required.

Error Message  TTYD-6-TTYD_PSS: TTYD Store error:[hex] [chars]

Explanation  Failed to store configuration for TTY service.

Recommended Action  No action is required.

TUNNEL Messages

This section contains the TUNNEL messages.

TUNNEL-2

Error Message  TUNNEL-2-FEATURE_ENABLE_FAILED: failed to enable feature tunnel, reason [chars] ([hex])

Explanation  Failed to enable feature tunnel, reason [char] ([int])

Recommended Action  Check the failure reason and take appropriate action to fix the failure. if unable to fix, please capture "show tech-support tunnel"

Error Message  TUNNEL-2-TM_F2_ONLY_VDC: Tunnel feature is not supported in F2 only VDC

Explanation  Tunnel feature is not supported in F2 only VDC

Recommended Action  Disable the Tunnel feature by the CLI "no feature tunnel"

Error Message  TUNNEL-2-TUNNEL_INTF_STATE_UPDATE: Interface [chars] is down reason ([chars])

Explanation  Interface [char] is down reason [char]

Recommended Action  No action is required.

Error Message  TUNNEL-2-UNSUPPORTED_TUNNEL_TYPE: Failed to create interface [chars] due to unsupported-tunnel type

Explanation  Current tunnel type is not supported in this release

Recommended Action  No action is required.

TUNNEL-3

Error Message  TUNNEL-3-HW_PROGRAMMING_FAILED: for [chars], reason [chars]

Explanation  Hardware programming failed for tunnel [num] interface

Recommended Action  Try 'shutdown' and 'no shutdown' under tunnel interface submode after sometime. if still tunnel interface doesn't come up capture show tech-support tunnel to identify the issue

TUNNEL-4

Error Message  TUNNEL-4-TM_DF_PROGRAMMING_FAILED: [chars] DF(dont fragment) programming failed! status [hex]

Explanation  [chars] DF programming failed! status [int]

Recommended Action  Capture "show tech-support tunnel " to identify why df flag programing failed

Error Message  TUNNEL-4-TM_DF_PROGRAMMING: Programming [chars] DF(dont fragment) df.sel [dec] df.val [dec]

Explanation  Programming [chars] DF df.sel [int] df.val [int]

Recommended Action  No action is required.

Error Message  TUNNEL-4-TM_MTU_PROGRAMMING_FAILED: [chars] mtu [dec] programming failed! status [hex]

Explanation  [chars] mtu [int] programming failed! status [int]

Recommended Action  Capture show "tech-support tunnel" to identify why MTU programming as failed. tunnel interface will used default mtu value

Error Message  TUNNEL-4-TM_MTU_PROGRAMMING: Programming [chars] mtu [dec]...

Explanation  Programming [chars] mtu [int]

Recommended Action  No action is required.

TUNNEL-5

Error Message  TUNNEL-5-IF_CLEAR_COUNTER: Interface [chars] counters is cleared

Explanation  Interface [char] counters is cleared

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_CREATED: Interface [chars] is created

Explanation  Interface [char] is created

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_CREATE_FAILED: Interface [chars] creation failed due to [[hex]] [chars]

Explanation  Interface [char] is creation failed due to [int] [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_DELETED: Interface [chars] is deleted

Explanation  Interface [char] is deleted

Recommended Action  No action is required.

Error Message  TUNNEL-5-IF_STATE_UPDATE: Interface [chars] is [chars] reason [chars]

Explanation  Interface [char] is [char] reason [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-PPF_SESSION_FAILED: session id %llx type [chars] for [chars] failed error [hex] [chars]

Explanation  Session id [int] type [char] for [char] failed error [int] [char]

Recommended Action  No action is required.

Error Message  TUNNEL-5-TM_DISABLED: Tunnel Disabled

Explanation  Tunnel Service Disabled

Recommended Action  No action is required.

Error Message  TUNNEL-5-TM_ENABLED: Tunnel Enabled

Explanation  Tunnel Service Enabled

Recommended Action  No action is required.

TUNNEL-7

Error Message  TUNNEL-7-TM_INFO: [chars]

Explanation  Tunnel Service info

Recommended Action  No action is required.

U2RIB Messages

This section contains the U2RIB messages.

U2RIB-2

Error Message  U2RIB-2-IPC_PROCESSING_ERR: Error in processing IPC message : Opcode = [dec], Error code = [hex]

Explanation  U2RIB encountered an error in processing an MTS message. The error and message are specified in the error message

Recommended Action  No action is required.

Error Message  U2RIB-2-U2RIB_INIT: U2RIB initialization of [chars] [chars]

Explanation  U2RIB initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

U2RIB-3

Error Message  U2RIB-3-U2RIB_LBL_SELECT_ERROR: Error in predicting the load-balance selection, error code = [hex], [chars]

Explanation  Error in processing or communicating with hardware

Recommended Action  No action is required.

Error Message  U2RIB-3-U2RIB_LD_BLNCE_ERROR: Error in config. lb parameters using the DCEFIB Library, error code = [hex], [chars]

Explanation  Error while communicating with the dcefib library

Recommended Action  No action is required.

U2RIB-5

Error Message  U2RIB-5-U2RIB_DISABLED: U2RIB Disabled

Explanation  U2RIB Service Disabled

Recommended Action  No action is required.

Error Message  U2RIB-5-U2RIB_ENABLED: U2RIB Enabled

Explanation  U2RIB Service enabled

Recommended Action  No action is required.

U2RIB-6

Error Message  U2RIB-6-STATE_CREATED: Internal state created [chars]

Explanation  U2RIB has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

UDLD Messages

This section contains the UDLD messages.

UDLD-3

Error Message  UDLD-3-IDB_ERROR: UDLD error handling [chars] interface: [chars]

Explanation  A softare error occurred in UDLD processing associated with a specific interface.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-3-MSG_SEND_FAILURE: failed to send [chars] to sap [dec]: [chars]

Explanation  Failed to send a message

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-3-UDLD_INTERNAL_ERROR: UDLD internal error: [chars]

Explanation  A softare sanity check failed in the course of UDLD processing.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-3-UDLD_INTERNAL_IF_ERROR: UDLD internal error, interface [chars]: [chars]

Explanation  A softare sanity check failed in the course of UDLD processing.

Recommended Action  LOG_STD_SH_TECH_ACTION

UDLD-4

Error Message  UDLD-4-UDLD_GWRAP_COUNT: UDLD gwrap count is %lu, please log a 'show tech udld' for detail info.

Explanation  UDLD gwrap count reached high level, show tech udld is needed to debug it.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_NEIGHBOR_MISMATCH: UDLD neighbor mismatch detected, exp: [chars], rec [chars]. Please collect debug info using: http://wikicentral.cisco.com/confluence/display/KGP/UDLD+debug

Explanation  An interface will be disabled because UDLD protocol detected a nieghbor mismatch condition on the interface indicated. Cause is likely due to bad interface hardware or cable misconfiguration. User should investigate.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_PORT_DISABLED: Interface [chars], link error detected: [chars]. Please collect debug info using: http://wikicentral.cisco.com/confluence/display/KGP/UDLD+debug

Explanation  An interface was disabled because UDLD protocol detected the cause on the interface indicated. Cause is likely due to bad interface hardware or cable misconfiguration. User should investigate.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_PORT_RESET: UDLD reset interface [chars]

Explanation  A port which had been disabled for UDLD has been reset.

Recommended Action  LOG_STD_SH_TECH_ACTION

Error Message  UDLD-4-UDLD_SFP_TYPE_CHANGED: User changed SFP type on [chars] from [chars] to [chars], default udld port configuration was applied, 'copy running-config startup-config' recommended

Explanation  SFP type was changed on this interface, all user modified configuration will be reverted back to the default config.

Recommended Action  No action is required.

UDLD-5

Error Message  UDLD-5-UDLD_AGGRESSIVE: UDLD Aggressive

Explanation  UDLD Service Aggressive

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_DISABLED: UDLD Disabled

Explanation  UDLD Service Disabled

Recommended Action  No action is required.

Error Message  UDLD-5-UDLD_ENABLED: UDLD Enabled

Explanation  UDLD Service Enabled

Recommended Action  No action is required.

UFDM Messages

This section contains the UFDM messages.

UFDM-2

Error Message  UFDM-2-FIB_ROUTE_UPDATE_ERR: Route update error from slot [dec] FIB

Explanation  FIB returned route update error. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

Error Message  UFDM-2-INTERNAL_ERROR: Internal error: [chars], collect output of show tech-support fowarding l3 unicast... command

Explanation  UFDM hit a internal error. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

UFDM-3

Error Message  UFDM-3-FIB_IPv4_ADJ_CONSISTENCY_CHECKER_FAIL: FIB IPv4 adjacency consistency checker FAILED on slot [chars]

Explanation  FIB Ipv4 adjacency consistency checker Failed. Adjacency database is inconsistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_ADJ_CONSISTENCY_CHECKER_PASS: FIB IPv4 adjacency consistency checker PASSED on slot [chars]

Explanation  FIB Ipv4 adjacency consistency checker passed. Adjacency database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_CONSISTENCY_CHECKER_TIMEDOUT: FIB IPv4 consistency checker timedout on slot [chars]

Explanation  FIB Ipv4 route/adjacency consistency checker couldnot complete

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_ROUTE_CONSISTENCY_CHECKER_FAIL: FIB IPv4 consistency checker FAILED on slot [chars]

Explanation  FIB Ipv4 route consistency checker Failed. Route database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv4_ROUTE_CONSISTENCY_CHECKER_PASS: FIB IPv4 route consistency checker PASSED on slot [chars]

Explanation  FIB Ipv4 route consistency checker Passed. Route database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ADJ_CONSISTENCY_CHECKER_FAIL: FIB IPv6 consistency checker FAILED on slot [chars]

Explanation  FIB Ipv6 adjacency consistency checker failed. Adjacency database is inconsistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ADJ_CONSISTENCY_CHECKER_PASS: FIB IPv6 consistency checker PASSED on slot [chars]

Explanation  FIB Ipv6 adjacency consistency checker passed. Adjacency database is consistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_CONSISTENCY_CHECKER_TIMEDOUT: FIB IPv6 consistency checker timed out on slot [chars]

Explanation  FIB Ipv6 route/adjacency consistency checker couldnt complete

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ROUTE_CONSISTENCY_CHECKER_FAIL: FIB IPv6 route consistency checker FAILED on slot [chars]

Explanation  FIB Ipv6 route consistency checker failed. Route database is inconsistent with hardware

Recommended Action  No action is required.

Error Message  UFDM-3-FIB_IPv6_ROUTE_CONSISTENCY_CHECKER_PASS: FIB IPv6 route consistency checker PASSED on slot [chars]

Explanation  FIB Ipv6 route consistency checker didnot detect. Route software database is consistent with hardware

Recommended Action  No action is required.

UFDM-5

Error Message  UFDM-5-DNLD_TIMEDOUT: Download timer expired: [chars]

Explanation  UFDM download timer expired. Collect show tech-support forwarding l3 unicast for futher analysis.

Recommended Action  No action is required.

UFDM-6

Error Message  UFDM-6-FIB_IPv4_CONSISTENCY_CHECKER_START: FIB IPv4 consistency checker started on slot [chars]

Explanation  FIB Ipv4 route/adjacency consistency checker has been started

Recommended Action  No action is required.

Error Message  UFDM-6-FIB_IPv4_CONSISTENCY_CHECKER_STOP: FIB IPv4 consistency checker stopped on slot [chars]

Explanation  FIB Ipv4 route/adjacency consistency checker has been stopped

Recommended Action  No action is required.

Error Message  UFDM-6-FIB_IPv6_CONSISTENCY_CHECKER_START: FIB IPv6 consistency checker started on slot [chars]

Explanation  FIB Ipv6 route/adjacency consistency checker has been started

Recommended Action  No action is required.

Error Message  UFDM-6-FIB_IPv6_CONSISTENCY_CHECKER_STOP: FIB IPv6 consistency checker stopped on slot [chars]

Explanation  FIB Ipv6 route/adjacency consistency checker has been stopped

Recommended Action  No action is required.

USBHSD Messages

This section contains the USBHSD messages.

USBHSD-1

Error Message  USBHSD-1-MANUAL_FORMAT: logflash needs to be formatted

Explanation  Logflash is not accessible; use \format logflash:\ to format it

Recommended Action  No action is required.

USBHSD-2

Error Message  USBHSD-2-AUTO_FORMAT: logflash auto-format [chars]

Explanation  Logflash auto-format event

Recommended Action  No action is required.

Error Message  USBHSD-2-DISK_BUSY_FAILED: Cannot umount [chars],

Explanation  The specified disk interface is in use it can not be un mounted, The user may experience file system correuption

Recommended Action  Make sure slot0 is not being used either by mounting or by any command and re-insert the disk again

Error Message  USBHSD-2-DISK_FSCK_FAIL: file system check returned error on slot [dec]

Explanation  Flash fliesyetm may be corrupted, the flash was taken while it was being accessed

Recommended Action  Reformat the extarnal flash

Error Message  USBHSD-2-DISK_MOUNT_FAIL: disk mount unsuccessful on [chars]

Explanation  Unknown flash filesystem or not cleanly un mounted

Recommended Action  Use vfat flash only and make sure external slot is not being accessed then re-insert flash

Error Message  USBHSD-2-DISK_RESCAN_FAIL: disk rescan unsuccessful on [chars]

Explanation  Flash fliesyetm was not cleanly un mounted

Recommended Action  Make sure external slot is not being accessed and re-inset the flash

Error Message  USBHSD-2-DISK_UMOUNT_FAIL: disk umount unsuccessful for [chars]

Explanation  Flash fliesyetm is busy the system could noy un-mount it

Recommended Action  Make sure external slot is not being accessed and re-inset the flash

Error Message  USBHSD-2-FORK: fork failed ([chars] process)

Explanation  The flash daemon failed to fork

Recommended Action  No action is required.

Error Message  USBHSD-2-INTERNAL_ERROR: Internal Error [dec]

Explanation  The flash daemon interface returns error

Recommended Action  Restart the idehsd deamon

Error Message  USBHSD-2-MOUNT: [chars] online

Explanation  Flash daemon mounting slot

Recommended Action  No action is required.

Error Message  USBHSD-2-UMOUNT: [chars] offline

Explanation  Flash daemon un mounting slot

Recommended Action  No action is required.

Error Message  USBHSD-2-USB_SWAP: USB insertion or removal detected

Explanation  USB swap event

Recommended Action  No action is required.

USBHSD-3

Error Message  USBHSD-3-DEVICEOPEN_FAILED: device open failed. Component [chars]

Explanation  The flash daemon device open failed The failure is due to the sub-component [chars]

Recommended Action  No action is required.

USBHSD-5

Error Message  USBHSD-5-DISK_SWAP: [chars] [chars]

Explanation  Compach flash swap event

Recommended Action  No action is required.

USBHSD-6

Error Message  USBHSD-6-DISK_BUSY: trying to un mount disk [chars]

Explanation  Flash daemon trying to umount busy slot

Recommended Action  No action is required.

Error Message  USBHSD-6-DISK_EVENT: slot [dec] [chars]

Explanation  Flash daemon found a disk hotswap handler event

Recommended Action  No action is required.

Error Message  USBHSD-6-IOCTL: ioctl: [chars] returns [dec]

Explanation  Flash daemon trying to umount busy slot

Recommended Action  No action is required.

Error Message  USBHSD-6-STARTING: deamon started

Explanation  The compact flash swap daemon successfully started

Recommended Action  No action is required.

Error Message  USBHSD-6-USBHSD_INFO: [chars]

Explanation  Flash daemon informational message

Recommended Action  No action is required.

USBHSD-7

Error Message  USBHSD-7-USBHSD_TRACE: [chars]() [chars]:[dec] disk=[dec]

Explanation  Flash daemon debug message to trace code path

Recommended Action  No action is required.

USDBA Messages

This section contains the USDBA messages.

USDBA-6

Error Message  USDBA-6-USDBA_DEBUG_MSG: [chars]

Explanation  Debug log message

Recommended Action  No action is required.

VDC_MGR Messages

This section contains the VDC_MGR messages.

VDC_MGR-2

Error Message  VDC_MGR-2-VDC_CRITICAL: vdc_mgr has hit a critical error: [chars]

Explanation  Vdc_mgr has hit a critical error

Recommended Action  A critical error has been hit within vdc_mgr. Please check show vdc to determine the state of the vdcs

Error Message  VDC_MGR-2-VDC_LIC_WARN_EXP: WARNING License for vdcs is about to expire! VDCs will be deleted if license is allowed to expire

Explanation  VDC license is close to expire

Recommended Action  Please contact your sales representative to obtain a license

Error Message  VDC_MGR-2-VDC_LIC_WARN: Service using grace period will be shutdown in [dec] day(s)

Explanation  The license for vdcs is not installed and currently running in the grace period

Recommended Action  Vdcs will continue to work within the grace period, but obtaining a license is reccomended

Error Message  VDC_MGR-2-VDC_OFFLINE: vdc [dec] is now offline

Explanation  The vdc has been shut down. Either it has been deleted or has just completed ungraceful cleanup

Recommended Action  If the vdc was deleted, no action is necessary. Otherwise vdc_mgr may attempt to recreate it according to the ha-policy that has been set

Error Message  VDC_MGR-2-VDC_ONLINE: vdc [dec] has come online

Explanation  Vdc_mgr has finished creating a vdc and it is ready to use

Recommended Action  No action is required.

Error Message  VDC_MGR-2-VDC_UNALLOCATED: Module [dec] is unsupported by the current vdc and some of its ports have been placed in the unallocated pool.

Explanation  The module is of a type unsupported by the current vdc. You can see port membership by \'show vdc membership\' and check the current vdc\'s configuration via \'show vdc\'

Recommended Action  Allocate interfaces to a vdc that supports this module type or change the current vdc to support this module type via the \'limit-resource module-type\' command

Error Message  VDC_MGR-2-VDC_UNGRACEFUL: vdc_mgr: Ungraceful cleanup request recieved for vdc [dec], restart count for this vdc is [dec] restarts within the last 5 minutes

Explanation  Vdc_mgr has begun ungraceful cleanup for a vdc

Recommended Action  There has been a failure within the vdc and vdc_mgr has begun the cleanup process. Use show vdc to determine its state

VDC_MGR-3

Error Message  VDC_MGR-3-VDC_ERROR: vdc_mgr: [chars]

Explanation  Vdc_mgr has recieved bad data but will try to continue

Recommended Action  Vdc_mgr will attempt to correct the error at hand

VDC_MGR-5

Error Message  VDC_MGR-5-VDC_ADMIN_VDC_CHANGE: vdc_mgr: Admin-vdc mode has been [chars]

Explanation  The admin-vdc mode has been changed

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_DELETED: vdc_mgr: vdc [dec] has been deleted

Explanation  The vdc with id listed no longer exists

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_FCOE_VLAN_ADD: vdc_mgr: vlans [chars] has been shared to this vdc

Explanation  Vlans have been shared to this fcoe vdc

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_FCOE_VLAN_DELETE: vdc_mgr: vlans [chars] has been unshared from this vdc

Explanation  Vlans have been unshared from this fcoe vdc

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_FEATURESET_ALLOW: vdc_mgr: Feature-set [chars] can now be used in this vdc

Explanation  Allowed feature-set config has changed

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_FEATURESET_DISALLOW: vdc_mgr: Feature-set [chars] is now disallowed in this vdc

Explanation  Allowed feature-set config has changed

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_HOSTNAME_CHANGE: vdc [dec] hostname changed to [chars]

Explanation  Host name for a vdc has changed.

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_MEMBERSHIP_ADD: vdc_mgr: Interface [chars] has been added to this vdc

Explanation  A new interface has been added to this vdc

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_MEMBERSHIP_DELETE: vdc_mgr: Interface [chars] has been removed from this vdc

Explanation  A new interface has been removed from this vdc

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_MODULETYPE: vdc_mgr: Module type changed to [chars]

Explanation  This vdc has been changed to support only the the type of modules listed

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_SH_MEMBERSHIP_ADD: vdc_mgr: Interface [chars] has been shared to this vdc

Explanation  A new interface has been shared to this vdc

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_SH_MEMBERSHIP_DELETE: vdc_mgr: Interface [chars] has been unshared from this vdc

Explanation  A new interface has been unshared from this vdc

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_STATE_CHANGE: vdc [dec] state changed to [chars]

Explanation  A vdc state change has happened. This is most likely due to a configuration change.

Recommended Action  No action is required.

Error Message  VDC_MGR-5-VDC_SWMODULETYPE: vdc_mgr: System Module type changed to [chars]

Explanation  This switch has been changed to support only the the type of modules listed

Recommended Action  No action is required.

VLAN_MGR Messages

This section contains the VLAN_MGR messages.

VLAN_MGR-2

Error Message  VLAN_MGR-2-CRITICAL_MSG: [chars]

Explanation  VLAN Manager Critical Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-FABRIC_DYNAMIC_CORE_VLAN_RANGE_REMOVED: Fabric dynamic and core VLAN ranges removed. Please delete VLANs [chars] in the ranges

Explanation  VLAN Manager Core VLAN Range Removal Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-2-VLAN_DELETE_FAILED_RSN_BD_EXIST: VTP request to delete VLAN(s) [chars] could not be processed. Bridge Domains exist for VLANs [chars]

Explanation  VLAN delete failed since Bridge Domains Exist

Recommended Action  No action is required.

VLAN_MGR-3

Error Message  VLAN_MGR-3-ERROR_MSG: [chars]

Explanation  VLAN manager error

Recommended Action  No action is required.

VLAN_MGR-4

Error Message  VLAN_MGR-4-WARN_MSG: [chars]

Explanation  VLAN manager warning

Recommended Action  No action is required.

VLAN_MGR-5

Error Message  VLAN_MGR-5-NOTIF_MSG: [chars]

Explanation  VLAN Manager Notification Message

Recommended Action  No action is required.

Error Message  VLAN_MGR-5-RESERVED_VLAN_RANGE_CHANGED: New Reserved VLAN Range Configured From VLAN [dec] to VLAN [dec]

Explanation  VLAN Manager Reserved VLAN Reconfiguration Message

Recommended Action  No action is required.

VLAN_MGR-6

Error Message  VLAN_MGR-6-INFO_MSG: [chars]

Explanation  VLAN manager info

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_CREATED: VLAN [dec], created

Explanation  VLAN created

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATEFULL_RESTART: VLAN Manager statefull restart

Explanation  VLAN Manager statefull restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_MGR_STATELESS_RESTART: VLAN Manager stateless restart

Explanation  VLAN Manager stateless restart

Recommended Action  No action is required.

Error Message  VLAN_MGR-6-VLAN_OPER_STATUS_CHG: VLAN [dec], status changed to [chars]

Explanation  VLAN operational state change

Recommended Action  No action is required.

VMAN Messages

This section contains the VMAN messages.

VMAN-2

Error Message  VMAN-2-ACTIVATION_STATE: [chars] '[chars]' [chars] [chars]

Explanation  The activation state of the named virtual service has changed as notified by Virt-manager.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. In the successful case, this notification can be ignored.

Error Message  VMAN-2-ALLOC_VIRT_INST_RCS: Virtual Service [chars]

Explanation  A memory allocation request failed to allocate a data structure required to activate the virtual service.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-COMMIT_VIRT_INST_RCS: Virtual Service [chars]

Explanation  The request to commit the resources required by the named virtual service failed.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-CPUSHARES_LIMIT: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting more CPU shares than the system has available for virtual services.

Recommended Action  Deactivate any other virtual services to free up CPU share resources and activate this virtual service. If that does not address the problem, then enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-CPUTUNES_INTERNAL_ERROR: Virtual Service [chars]

Explanation  Virt-manager and its associated infrastructure experienced an internal error.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-CPUTUNES_SHARES_LIMIT: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting more CPU shares than the system has available for virtual services.

Recommended Action  Deactivate any other virtual services to free up CPU share resources and activate this virtual service. If that does not address the problem, then enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-CREATE_VIRT_INST_ENTRY: Virtual Service [chars]

Explanation  The request to create a DB entry for the named virtual service failed.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-DEACT_FOR_ISSU: [chars] Max ([dec]s)

Explanation  An ISSU event is pending. Any active VMs will be automatically deactivated to allow ISSU preprocessing to validate the environment. Any ISSU-deactivated VMs will be automatically restarted if the ISSU is cancelled.

Recommended Action  None. Allow the ISSU to continue and the VMs will restart when the ISSU completes; or cancel the ISSU and vman will automatically restart the VMs.

Error Message  VMAN-2-DEFER_VIRT_INST_PROC: Virtual Service [chars]

Explanation  The final activation processing failed to successfully defer.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-DISK_IMAGE_PATH: Virtual Service [chars]

Explanation  The virtual service machine definition file contains an invalid disk image path for one of the disk devices. This may be a Harddisk, CDROM or USB storage device.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-FIND_VIRT_INST_ENTRY: Failed to find virtual service with id [dec] in the Virt-manager DB

Explanation  The virtual service with the ID named could not be located in the Virt-manager DB.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-GENERAL_FAILURE: Virtual Service [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

Error Message  VMAN-2-GUESTSHELL_AUTHORIZED_KEYS_TRUNCATED_WRITE_FAILURE: The Guestshell authorized_keys file was truncated due to failing to write new public key. Any added public key have been lost.

Explanation  Each time the Guestshell is activated a new public ssh key is generated and replaces the previous public key in the Guestshell's .ssh/authorized_keys file.; action Check if the Guestshell's root file system is full by issuing 'show virtual-service utilization name guestshell+' command. If 100% capacity the root file system can be resized by issuing 'guestshell resize rootfs command'

Recommended Action  The user should follow the guidance provided by the syslog by running the suggested command.

Error Message  VMAN-2-GUESTSHELL_ENABLED_ON_NEXTBOOT: The guest shell has been enabled to install and activate upon next bootup. You may use '[chars] destroy' to remove it.

Explanation  Informs the user that the guest shell virtual service has been enabled to install and activate upon next bootup.

Recommended Action  The user may use or remove the guest shell from installing and activating on next bootup with the command specified.

Error Message  VMAN-2-GUESTSHELL_ENABLED: The guest shell has been enabled. The command '[chars]' may be used to access it, '[chars] destroy' to remove it.

Explanation  Informs the user that the guest shell virtual service has been enabled (which is done by default).

Recommended Action  The user may use or remove the guest shell with the commands specified.

Error Message  VMAN-2-HA_STATE: [chars] [chars] [chars] [chars]

Explanation  VMAN tries to detect the role/slot of various nodes on HA events from the platform. If any of those event callbacks fail, this notification would be raised.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. Check for the HA event error msg and root cause the same.

Error Message  VMAN-2-HA_SWITCHOVER_STATE: [chars] [chars] [chars] [chars]

Explanation  VMAN HA switchover state related messages for a virtual-service whilst it is being recovered on newly active RP after a HA switchover.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. Check for the HA event error msg and root cause the same.

Error Message  VMAN-2-HA_SYNC_ERR: [chars] '[chars]' [chars]

Explanation  The ha-sync persistent storage disk for the virtual service cannot be watched for sync to standby RP.

Recommended Action  Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-HA_SYNC_THREAD_STATE: HA remote sychronize thread has failed and exited.

Explanation  VMAN tries to remote sync the OVA repository to all online nodes using a separate thread. If that thread fails, this notification would be raised.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. Check for the pthread error msg and root cause the same.

Error Message  VMAN-2-INCONSISTENT_CPUTUNES_CONFIG: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting invalid CPU tunes parameter.

Recommended Action  Use a different valid machine definition file for the virtual service. If the problem persists, then enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-INCONSISTENT_MEM_CONFIG: Virtual Service [chars]

Explanation  The virtual service machine definition file is inconsistent in the specification of required memory via the and nodes.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-INSERT_VIRT_INST_ENTRY: Virtual Service [chars]

Explanation  Inserting the named virtual service into the virtual service DB tracked by Virt-manager failed.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-INSTALL_FAILURE: Virtual Service [chars]

Explanation  The installation of the virtual service failed.

Recommended Action  Enable the Virt-manager trace logs and repeat the installation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-INSTALL_LOG: [chars] [chars] [chars] [chars]

Explanation  The installation log of the named virtual service, is to provide more information about long running operation, that could affect the control of CLI

Recommended Action  No action is required

Error Message  VMAN-2-INSTALL_MEDIA_RETRY: VMAN, VM install media still unavailable.[chars]

Explanation  The install media was not detected. Waiting for udev to complete install media(harddisk) detection.

Recommended Action  After VMAN exceeds the maximum retry limit, verify if install media (harddisk) is accessible and retry the installation again.

Error Message  VMAN-2-INSTALL_STATE: [chars] '[chars]'[chars] [chars]

Explanation  The installation state of the named virtual service has changed as notified by Virt-manager.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. In the successful case, this notification can be ignored.

Error Message  VMAN-2-INVALID_ACT_MSG: Virtual Service [chars]

Explanation  The virtual service activate message was received, however, the data it contained could not be interpreted

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-INVALID_DEACT_MSG: Failed to process virtual service deactivate message

Explanation  The virtual service deactivate message was received, however, the data it contained could not be interpreted

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-INVALID_PACKAGE: Virtual Service [chars]

Explanation  The package definition file for the named virtual service has failed to be validated and the virtual service will not run

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause. The most likely cause would be that the package file has been corrupted during file transfer. The suggested action would be to redo the file transfer.

Error Message  VMAN-2-INVALID_UNPROV_MSG: Failed to process virtual service unprovision message

Explanation  The virtual service unprovision message was received, however, the data it contained could not be interpreted

Recommended Action  Enable the Virt-manager trace logs and repeat the activation followed by deactivation and then unprovision of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-MACHINE_TYPE_NOT_SUPPORTED: Virtual Service [chars]

Explanation  The virtual service cannot be activated as the machine type specified is not supported; action Enable the support for the machine type and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-MACH_PARSE_FAILURE: Virtual Service [chars]

Explanation  The named virtual service has an invalid parameter specified in the .xml file inside the .ova package

Recommended Action  Fix the .xml file inside the .ova package to have valid values. Then retry installing and activating it

Error Message  VMAN-2-MEMORY_LIMIT_WARN: Virtual service ([chars])[chars] defines [dec] MB of Memory exceeding the maximum [dec] MB.

Explanation  The virtual service machine definition file is requesting more memory for the specified profile, than the system has available for virtual services.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-MEMORY_LIMIT: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting more memory than the system has available for virtual services.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-MORETHANONE_CPUTUNES_CONFIG: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting more than one CPU tunes parameter.

Recommended Action  Use a different valid machine definition file for the virtual service. If the problem persists, then enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-MOVE_STATE: [chars] '[chars]' [chars] [chars]

Explanation  The move of the core or log file of the named virtual service has as been successful or failed as notified by Virt-manager.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. In the successful case, this notification can be ignored.

Error Message  VMAN-2-NETWORKING_MODEL_DEPRECATED: Virtual service '[chars]' is using the NXOS user-space networking model that is deprecated for containers. When convenient, please [chars]

Explanation  Informs the user that the virtual service is using the NXOS user-space networking model that is deprecated for containers.

Recommended Action  When convenient, the user should destroy the virtual service and install an updated virtual service package that has the newer kernel stack (kstack) networking model.

Error Message  VMAN-2-NETWORK_CONFIG_ERROR: Virtual Service [chars]

Explanation  A network configuration error has been detected for the named virtual service.

Recommended Action  No action is required

Error Message  VMAN-2-PROCESS_PKG_DEF: Virtual Service [chars]

Explanation  The virtual service package for the named virtual service has failed to be validated and the virtual service will not run.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-PROC_INT_LIST: Virtual Service [chars]

Explanation  The interface list embedded in the activate request for the named virtual service could not be processed.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-REMOVE_VIRT_INST_ENTRY: Virtual Service [chars]

Explanation  Removing the named virtual service from the virtual service DB tracked by Virt-manager failed.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-RESET_FORCE: Virtual Services non-recoverable reset command processed

Explanation  A 'virtual service reset force' command has been entered and processed. This action initiates a cleanup of last resort. Occasionally a VM will get into an unrecoverable state that prevents it from activating but also from uninstalling. This is a rare event but when it happens the only resort may be to remove the .conf control file and reboot, which forces a cleanup of all previously installed VM files and artifacts. Note that once this command is used, current VMs are considered to be in an unstable or unpredictable state, and all future install, uninstall, upgrade, and activation commands will be blocked.

Recommended Action  Once the command is entered and accepted, there is no recourse but to restart the system.

Error Message  VMAN-2-RESIZE_OPER_STATE: Virtual service '[chars]' [chars][chars] to '[dec]' [chars]

Explanation  VMAN attempts to resize various VM parameters like rootfs size, CPU share, memory if requested by user. Success/failure status messages for these resize operations are communicated by this syslog.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. Check for the HA event error msg and root cause the same.

Error Message  VMAN-2-RSYNC_STATE: [chars] [chars] [chars] [chars]

Explanation  VMAN tries to remote sync the virtual-instance configuration file and the OVA repository to all online nodes. If rsync fails even after consecutive retries, this notification would be raised.

Recommended Action  In the failed case, check Virt-manager's logs for the cause of the failure. Check for the rsync error code and root cause the same.

Error Message  VMAN-2-SEC_ATTR_LABEL_ERROR: A failure to apply security labels has been detected. You may use '[chars]' to capture the failures.

Explanation  Informs the user a failure has occurred when labeling the network elements root filesystem. This failure will likely result in a non-deterministic behavior.

Recommended Action  The user should follow the guidance provided by the syslog by running the suggested command.

Error Message  VMAN-2-SET_VTX_ROMVAR_SPACE: Failed to set ROM monitor variable ENABLE_VTX: No space in table

Explanation  Failed to set ENABLE_VTX ROM monitor variable due to no space in Monitor Variable Table.

Recommended Action  Verify number of entries in Monitor Variable Table.

Error Message  VMAN-2-SET_VTX_ROMVAR_STRING: Failed to set ROM monitor variable ENABLE_VTX: Invalid string format: [chars]

Explanation  Failed to set ENABLE_VTX rom monitor variable due to invalid string format.

Recommended Action  Verify format of string from error message.

Error Message  VMAN-2-START_FAILED: Virtual Service [chars]

Explanation  The named virtual service failed to start.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-UNINSTALL_ALL_VMS: All Virtual Services are being uninstalled [chars][chars] [chars]

Explanation  All virtual services are being uninstalled by Virt-manager.

Recommended Action  Examine the reason given as to why all virtual services are being uninstalled for more information. If the reason indicated is due to some error condition, check Virt-manager's logs for the cause of the failure.

Error Message  VMAN-2-UPGRADE_LOG: [chars] [chars] [chars] [chars]

Explanation  The upgrade log of the named virtual service, is to provide more information about long running operation, that could affect the control of CLI

Recommended Action  No action is required

Error Message  VMAN-2-VCPU_INVALID: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting invalid VCPU value.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-VCPU_LIMIT: Virtual Service [chars]

Explanation  The virtual service machine definition file is requesting more VCPUs than the system has reserved for virtual services.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-VIRT_DISK_CAPACITY_HIGH_WATERMARK: Virtual service '[chars]', application '[chars]' disk '[chars]' capacity is at '[dec] percent' utilization. [chars]

Explanation  A virtual service filesystem disk device has reached a high watermark in disk utilization.

Recommended Action  Connect to your virtual-service and purge/delete any unneeded files, logs, packages etc.

Error Message  VMAN-2-VIRT_INST_CRIT: VIRTUAL SERVICE [chars] LOG: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

Error Message  VMAN-2-VIRT_INST_DISK: Virtual Service [chars]

Explanation  The virtual service requires Disk Storage in excess of the Free Disk Storage available to virtual services.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-VIRT_INST_GEN_CORE: Virtual service '[chars]', application '[chars]' has generated a core '[chars].gz'.

Explanation  Informs the user that an application within the virtual service has generated a core.

Recommended Action  Guest shell generated cores will be located at /cisco/core directory within the guest shell root filesystem. For all virtual services, the core file can be moved to desired location using the 'virtual-service move name core...' command for further analysis.

Error Message  VMAN-2-VIRT_INST_INTERFACE: Virtual Service [chars]

Explanation  The number of configured virtual port group interfaces must match the number of Ethernet Network Interfaces defined in the machine definition file

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-VIRT_INST_LOG_UNTHROTTLE: Failed to unthrottle the log for virtual service [chars]

Explanation  The named virtual service had sent overwhelming sys log messages and its log had been throttled as a result, but system has failed to unthrottle it for some reason.

Recommended Action  For debugging collect the virt-manager logs and scan them for the cause.

Error Message  VMAN-2-VIRT_INST_MEMORY: Virtual Service [chars]

Explanation  The virtual service requires physical memory in excess of the free memory available to virtual services.

Recommended Action  Enable the Virt-manager trace logs and repeat the activation of the virtual service. Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-2-VIRT_INST_MGMT_INTERFACE: Virtual service [chars] has no management interface defined but it is configured in CLI.

Explanation  A management interface is configured but none is defined.

Recommended Action  Deactivate the virtual service, remove the management interface configuration CLI, and reactivate the virtual-service.

Error Message  VMAN-2-VIRT_INST_STATE: Virtual Service [chars]

Explanation  The named virtual service has failed. It is no longer running either because the guest OS has failed, the guest OS has shut down the machine or the emulator has failed.

Recommended Action  An attempt at restarting the virtual service can be made from the IOS configuration by doing a no activate/activate. For debugging collect the Virt-manager logs and scan them for the cause.

VMAN-3

Error Message  VMAN-3-PSS_ERR: Purpose: [chars], URI: [chars], errcode: [dec]

Explanation  Persistent Storage Service handling error

Recommended Action  Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-3-PSS_SNAPSHOT_ERR: Source URI: [chars], Destination URI: [chars], errcode: [dec]

Explanation  Persistent Storage Service snapshot error

Recommended Action  Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-3-SDWRAP_ERR: Description: [chars], errcode: [dec]

Explanation  Debug infrastructure error

Recommended Action  Collect the Virt-manager logs and scan them for the cause.

Error Message  VMAN-3-VIRT_INST_ERR: VIRTUAL SERVICE [chars] LOG: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

VMAN-4

Error Message  VMAN-4-HA_SYNC_NEEDED: If using the Guest shell, please use 'guestshell sync' to preserve its content on the standby in case of a supervisor switchover

Explanation  Message notifying user that he needs to manually synchronize the Virtual service contents to standby supervisor in order to preserve these contents in case of a supervisor switchover. Currently only applicable to the guest shell

Recommended Action  User can type the 'guestshell sync' command on active supervisor to synchronize it's contents to the standby supervisor if desired.

Error Message  VMAN-4-PACKAGE_SIGNING_LEVEL_CHANGED: Package signing level changed from allow '[chars]' to allow '[chars]'

Explanation  The package certificate signing level global setting has been changed via configuration under the virtual-service global sub-mode.

Recommended Action  Ensure that this setting has been changed as expected by an authorized user.

Error Message  VMAN-4-UPDATE_WARNING: Virtual Service[chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

Error Message  VMAN-4-VIRT_INST_WARN: VIRTUAL SERVICE [chars] LOG: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

Error Message  VMAN-4-VIRT_SERV_LIBVIRTD_WARN: VMAN not able to connect to the libvirt daemon after '[dec]' attempts

Explanation  VMAN has been unable to connect to the libvirt daemon. Virtualization services will not be available until this connection is made.

Recommended Action  Collect the logs produced by 'show virt tech'

Error Message  VMAN-4-WATCHDOG_TIMER: [chars] '[chars]' [chars] [chars]

Explanation  The watchdog timer configured for the named virtual service has expired.

Recommended Action  Check any logs produced by the virtual service to determine the cause.

VMAN-5

Error Message  VMAN-5-AUX: Virtual Service [chars]

Explanation  The AUX login to a virtual service may allow the user access to system functions that may not have been tested or may interact with the system in unintended ways. Use with caution.

Recommended Action  No action is required

Error Message  VMAN-5-PACKAGE_SIGNING_LEVEL_ON_INSTALL: Package '[chars]' for service container '[chars]' is '[chars]', [chars] '[chars]'

Explanation  A service container software package with the certificate signing level described is being installed.

Recommended Action  Take note of the service container and software package. Verify the software package is expected to be (un)signed as described and has the appropriate contents. Uninstall the package if unsure of the package origins.

Error Message  VMAN-5-VIRT_DISK_CAPACITY_LOW_WATERMARK: Virtual service '[chars]', application '[chars]' disk '[chars]' capacity is at '[dec] percent' utilization. No action is necessary.

Explanation  A virtual service filesystem disk device has reached its low watermark.

Recommended Action  No action is necessary.

Error Message  VMAN-5-VIRT_INST_NOTICE: VIRTUAL SERVICE [chars] LOG: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

Error Message  VMAN-5-VIRT_INST: LOG FROM VIRTUAL SERVICE [chars]: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

VMAN-6

Error Message  VMAN-6-VIRT_INST_INFO: VIRTUAL SERVICE [chars] LOG: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

VMAN-7

Error Message  VMAN-7-VIRT_INST_DEBUG: VIRTUAL SERVICE [chars] LOG: [chars]

Explanation  The named virtual service has triggered the log. Please interpret the log in the context of the virtual services.

Recommended Action  No action is required

VMM Messages

This section contains the VMM messages.

VMM-2

Error Message  VMM-2-VMM_DBG_SEQDELAY_LOG: VDC[dec]: Sending [chars] mts([chars]) request to service [dec] for slot [dec].

Explanation  VMM sent request for the sap mentioned

Recommended Action  No action is required.

Error Message  VMM-2-VMM_SERVICE_ERR: VDC[dec]: Service SAP [chars] for slot [chars] returned error [hex] ([chars]) in [chars] sequence

Explanation  Service returned error in the specified sequence

Recommended Action  No action is required.

Error Message  VMM-2-VMM_TIMEOUT: VDC[dec]: Service SAP [chars] for slot [chars] timed out in [chars] sequence

Explanation  Service did not respond in the specified sequence

Recommended Action  No action is required.

VMTRACKER Messages

This section contains the VMTRACKER messages.

VMTRACKER-2

Error Message  VMTRACKER-2-VMTRACKER_CONNECTION_ISSUE: Problem with connection: [chars]

Explanation  Connection problem

Recommended Action  Problem with connection. Try "no connect"; "connect"

Error Message  VMTRACKER-2-VMTRACKER_HMM_REGISTRATION_FAIL: [chars]

Explanation  HMM Registration error

Recommended Action  No action is required.

Error Message  VMTRACKER-2-VMTRACKER_TRUNK_MODE_WARN: Interface [chars] is used by VMTracker. Changing it back to TRUNK mode.

Explanation  Port trunk mode warning message

Recommended Action  Do not change port mode when it is used by VMTracker. To change the mode, disable VMTracker on the interface first.

VMTRACKER-3

Error Message  VMTRACKER-3-VMTRACKER_SOAP_ERR: Soap Err:[chars]

Explanation  Soap Call failure message

Recommended Action  No action is required.

VMTRACKER-4

Error Message  VMTRACKER-4-VMTRACKER_HMM_TRIGGER_FAIL: auto-config trigger failure, vlan [dec] [chars]

Explanation  HMM Request error

Recommended Action  No action is required.

Error Message  VMTRACKER-4-VMTRACKER_SOAP_WARN: Soap Warn:[chars]

Explanation  Soap Call warning message

Recommended Action  No action is required.

VMTRACKER-5

Error Message  VMTRACKER-5-VMTRACKER_CONFIG_VLAN: [chars]

Explanation  Vlan configuration message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_CREATE_VLAN: Vlan Created: [chars]

Explanation  Vlan addition message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_DISABLED: Service Disabled

Explanation  Service Disabled

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_ENABLED: Service Enabled

Explanation  Service enabled

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_MESSAGE: [chars]

Explanation  Generic message

Recommended Action  No action is required.

Error Message  VMTRACKER-5-VMTRACKER_REMOVE_VLAN: Vlan Removed: [chars]

Explanation  Vlan deletion message

Recommended Action  No action is required.

VNI Messages

This section contains the VNI messages.

VNI-2

Error Message  VNI-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

VNI-3

Error Message  VNI-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

VNI-6

Error Message  VNI-6-INTERFACE_EVENT: VSAN interface [chars] [chars]

Explanation  The specified VSAN Interface has been successfully [chars].

Recommended Action  No action is required.

Error Message  VNI-6-STARTING: Virtual Network Interface Manager started

Explanation  The service has successfully started.

Recommended Action  No action is required.

Error Message  VNI-6-VSAN_DELETED: VSAN [dec] has been deleted

Explanation  The specified VSAN has been deleted. The service will delete all the configuration on that VSAN.

Recommended Action  No action is required.

VNSEGMENT_MGR Messages

This section contains the VNSEGMENT_MGR messages.

VNSEGMENT_MGR-2

Error Message  VNSEGMENT_MGR-2-IPC_PROCESSING_ERR: Error in processing IPC message : Opcode = [dec], Error code = [hex]

Explanation  VNSEG encountered an error in processing an MTS message. The error and message are specified in the error message

Recommended Action  No action is required.

Error Message  VNSEGMENT_MGR-2-RANDNUM_FAIL: [chars]

Explanation  There was a critical error during random number generation. [chars] indicates details of the error

Recommended Action  No action is required.

Error Message  VNSEGMENT_MGR-2-VNSEG_INIT: VNSEG initialization of [chars] [chars]

Explanation  VNSEG initialization failed

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  VNSEGMENT_MGR-2-VNSEG_ISSU_LC_RESET: VNSEG resetting LC[dec] to prevent Loops during ISSU caused by a topology change in the network. Peer on [chars] [chars] could not be Disputed

Explanation  This can happen as a result of a topology change in the network while the Linecard was undergoing ISSU. Since VNSEG cannot change the port state to blocking on the Linecard undergoing ISSU, it will first try to prevent the Loop by causing a Dispute on the peer ports forcing them into blocking state. But if the peer does not support Dispute mechanism, and VNSEG detects a potential Loop, it will reset the Linecard to prevent the Loop

Recommended Action  LOG_STD_NO_ACTION

Error Message  VNSEGMENT_MGR-2-VNSEG_PENDING_RESPONSE_TIMEOUT: Waiting for Pending response for req [chars] (msg id:[dec])

Explanation  Responses not received for requests sent out

Recommended Action  LOG_STD_NO_ACTION

Error Message  VNSEGMENT_MGR-2-VNSEG_SET_PORT_STATE_FAIL: Port state change req to PIXM failed, status = [hex] [[chars]] vdc [dec], num ports [dec], ports [chars] state [chars], opcode [chars], msg id ([dec]), rr_token [hex]

Explanation  The port set port state has failed. check port

Recommended Action  LOG_STD_NO_ACTION

Error Message  VNSEGMENT_MGR-2-VNSEG_SET_PORT_STATE_TIMEOUT: Port state change req to PIXM timedout after [dec] sec. vdc [dec], num ports [dec], ports [chars] state [chars], opcode [chars], msg id ([dec]), rr_token [hex]

Explanation  The port set port state has timedout. check port

Recommended Action  LOG_STD_NO_ACTION

VNSEGMENT_MGR-6

Error Message  VNSEGMENT_MGR-6-PORT_ADDED: Interface [chars], added to [chars] with role [chars], state [chars], cost [dec], priority [dec], link-type [chars]

Explanation  This spanning tree port has been added

Recommended Action  LOG_STD_NO_ACTION

Error Message  VNSEGMENT_MGR-6-PORT_DELETED: Interface [chars], removed from [chars]

Explanation  This spanning tree port has been deleted

Recommended Action  LOG_STD_NO_ACTION

Error Message  VNSEGMENT_MGR-6-PORT_RANGE_DELETED: Interface [chars] removed from [chars]

Explanation  This range spanning tree logical ports has been deleted

Recommended Action  LOG_STD_NO_ACTION

Error Message  VNSEGMENT_MGR-6-SERVICE_UP: Initialized [chars]

Explanation  VNSEG line 2.

Recommended Action  No action is required.

Error Message  VNSEGMENT_MGR-6-STATE_CREATED: Internal state created [chars]

Explanation  VNSEG has created its internal state stateless/stateful [chars].

Recommended Action  No action is required.

VNTAGC Messages

This section contains the VNTAGC messages.

VNTAGC-5

Error Message  VNTAGC-5-VNTAGC_GENERIC_SYSLOG: [chars]

Explanation  VNTag Manager Client Generic Syslog

Recommended Action  No action is required.

VNTAG_MGR Messages

This section contains the VNTAG_MGR messages.

VNTAG_MGR-2

Error Message  VNTAG_MGR-2-MCAST_DVIF_ALLOC_FAILURE: DVIF allocation failure during MCAST group creation. TCB RID: [hex]. MCAST LTL: [hex]. Reason: [chars].

Explanation  MCAST DVIF allocation for MCAST group.

Recommended Action  No action is required.

Error Message  VNTAG_MGR-2-VLAN_DVIF_ALLOC_FAILURE: DVIF allocation failure for VLANs [chars]. Reason: [chars].

Explanation  Flood DVIF allocation failure for VLANs.

Recommended Action  No action is required.

Error Message  VNTAG_MGR-2-VNTAG_IFTMC_ERROR: Desired VLAN programming failed !!! Kindly undo the VLAN programming and retry with reduced Allowed-VLAN scale

Explanation  IFTMC Programming Failure due to Table Exhaustion

Recommended Action  No action is required.

Error Message  VNTAG_MGR-2-VNTAG_SEQ_ERROR: [chars]

Explanation  Some step in an event sequence has failed

Recommended Action  No action is required.

Error Message  VNTAG_MGR-2-VNTAG_SEQ_TIMEOUT: [chars]

Explanation  Event sequence timeout

Recommended Action  No action is required.

VNTAG_MGR-5

Error Message  VNTAG_MGR-5-VNTAG_MGR_DISABLED: VNTag Manager Disabled

Explanation  VNTag Manager Service Disabled

Recommended Action  No action is required.

Error Message  VNTAG_MGR-5-VNTAG_MGR_ENABLED: VNTag Manager Enabled

Explanation  VNTag Manager Service Enabled

Recommended Action  No action is required.

Error Message  VNTAG_MGR-5-VNTAG_MGR_GENERIC_SYSLOG: [chars]

Explanation  VNTag Manager Generic Syslog

Recommended Action  No action is required.

VPC Messages

This section contains the VPC messages.

VPC-2

Error Message  VPC-2-L3_VPC_UNEQUAL_WEIGHT: Layer3 peer-router is enabled. Please make sure both vPC peers have the same L3 routing configuration

Explanation  Unequal weight routing is not supported when layer3 peer-router is enabled

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_RECV_FAIL: In domain [dec], VPC peer keep-alive receive has failed

Explanation  Peer keep-alive receive failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_KEEP_ALIVE_SEND_FAIL: In domain [dec], VPC peer keep-alive send has failed

Explanation  Peer keep-alive send failed

Recommended Action  No action is required.

Error Message  VPC-2-PEER_VPC_RESP_TIMEDOUT: Failed to receive response from peer for vPC: [dec]

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-2-TRACK_INTFS_DOWN: In domain [dec], vPC tracked interfaces down, suspending all vPCs and keep-alive

Explanation  VPC tracked object down

Recommended Action  No action is required.

Error Message  VPC-2-VPCCONFIG_ON_FPC: A green start is a must after ISSU for VPC config on FPC([hex]) for AA-FEX bringup. Please ignore if you already reloaded the switch after upgrading to version >= 7.0.3(I5)2

Explanation  Green start (post ISSU) is a must to ensure programming correctness before configuring AA-FEXes

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ADD_L3_BKUP_VLAN_TO_PEER_GW_EXCLUDE_LIST: Exclude L3 backup routing VLAN from vpc peer-gateway config.

Explanation  Triggered when peer-link is F1 and peer-gateway is configured without exclude-vlan list.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_CORE_PORT_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] in Fabric Path Port Mode - vPC+ Fabric Path switch ID not configured

Explanation  VPC+ Failed to bringup peer-link - switch-ID not configured

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_LID_ALLOC: Failed to negotiate common LID between vPC peers.

Explanation  Failed to find common lid.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_FAILED_PEERLINK_DOWN: vPC+ operations failed. Bringing down peer-link.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ES_PEER_LINK_OPERATION_FAILED: Peer-link operation failed due to SAP [dec].

Explanation  Triggered in mcecm_cfg_es_failed when peer-link bringup fails.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_GRACEFUL_SUSP_ALL_VPC: Operational graceful type-1 check state changed, reinitiating all vPCs

Explanation  Graceful state change,reinit vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_END: Peer vPC switch ISSU end, unlocking configuration

Explanation  Peer vPC switch issu end

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ISSU_START: Peer vPC switch ISSU start, locking configuration

Explanation  Peer vPC switch issu start

Recommended Action  No action is required.

Error Message  VPC-2-VPC_LC_FAIL: LC [dec] does not support required hardware for vPC; run 'show vdc membership status' for port status

Explanation  Lc insertion failed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_NON_DEF_LID: vPC+ negotiated non-default local id. Flapping orphan edge ports recommended.

Explanation  Triggered in mcecm_em_es_failed. Bring down peer-link.

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PEER_LINK_FPATH_BUP_FAILED: Failed to bring up vPC+ peer link port [chars] - port [chars] is not configured as a Fabric Path port

Explanation  VPC+ Failed to bringup Peer-link - not in Fabric Path mode

Recommended Action  No action is required.

Error Message  VPC-2-VPC_PSS_ERROR: [chars], 0x([hex]) present in VPC DB but not is IM DB

Explanation  Triggered when vpc DB and IM SDB are inconsistent

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_CLEANUP_FAILURE_NEED_REINIT_MCT: vPC role change cleanup has encountered a failure. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_FAILURE_NEED_REINIT_MCT: vPC role change has encountered a failure, can not clean up. Please reinit peer-link to recover. Error: [chars]

Explanation  VPC RC failure, need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_MCT_CMPT_FAIL: Can't perform role change since there are type-1 check failures on peer-link at peer side.

Explanation  VPC RC failure, due to cmpt failed on peer-link at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_PEER_CMPT_FAIL: Can't perform role change since there are vpc legs with type-1 check failure at peer side.

Explanation  VPC RC failure, due to cmpt failed vpcs at peer side

Recommended Action  No action is required.

Error Message  VPC-2-VPC_RC_INIT_FAILURE_UNFINISHED_RC: Can't perform role change since there is another unfinished role change request on either local or peer side. Please wait until it is finished.

Explanation  VPC RC failure, due to an unfinished RC

Recommended Action  No action is required.

Error Message  VPC-2-VPC_ROLE_CHANGE_NOTIFICATION: VPC role is changed from [chars] to [chars]

Explanation  VPC role is changed

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SHUTDOWN: vPC shutdown status is [chars]

Explanation  VPC shutdown status change

Recommended Action  No action is required.

Error Message  VPC-2-VPC_STATE_CHANGE_ON_PEER_ISSU: VPC [dec] state transition happened during peer ISSU, please shut and no shut the VPC PO on both the Switches

Explanation  VPC state change during peer on ISSU, check the HW programming on both the switches

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SUSP_ALL_VPC: Peer-link going down, suspending all vPCs on secondary. If vfc is bound to vPC, then only ethernet vlans of that VPC shall be down.

Explanation  Peer link down suspend vPCs

Recommended Action  No action is required.

Error Message  VPC-2-VPC_SVI_EXCLUDE: vPC [dec] has up vlans [chars] which are excluded from suspension on dual-active

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

VPC-3

Error Message  VPC-3-FEX_AA_NO_SUPPPORT: FEX AA not supported

Explanation  FEX AA not supported

Recommended Action  No action is required.

Error Message  VPC-3-GLOBAL_CONSISTENCY_FAILED: In domain [dec], global configuration is not consistent ([chars])

Explanation  Global compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-INTF_CONSISTENCY_FAILED: In domain [dec], VPC [dec] configuration is not consistent ([chars])

Explanation  MCEC compat-check failed

Recommended Action  No action is required.

Error Message  VPC-3-PEER_UNREACHABLE: Remote Switch Unreachable

Explanation  Peer unreachable

Recommended Action  No action is required.

Error Message  VPC-3-PEER_VPC_BRINGUP_FAILED: Peer vPC [dec] bringup failed ([chars])

Explanation  Peer vPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_ASSERTION_FAILED: [chars]

Explanation  VPCM has hit an assert condition at file [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INIT_FAIL: vPC Manager Initialization Failed ([chars])

Explanation  VPCM Initialization failed. due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_INTERNAL_ERR: [chars]

Explanation  VPCM encountered an internal error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPCM_MTS_ERR: [chars]

Explanation  VPCM encountered an MTS error due to [chars]

Recommended Action  No action is required.

Error Message  VPC-3-VPC_BRINGUP_FAILED: vPC [dec] bringup failed ([chars])

Explanation  VPC bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_BRINGUP_FAILED: vPC peer-link bringup failed ([chars])

Explanation  VPC Peer-link bringup failed

Recommended Action  No action is required.

Error Message  VPC-3-VPC_PEER_LINK_DOWN: VPC Peer-link is down

Explanation  VPC Peer link is down

Recommended Action  No action is required.

Error Message  VPC-3-VPC_RC_FAILURE_NO_NEED_REINIT_MCT: vPC role change has encountered a failure, will clean up, error: [chars]

Explanation  VPC RC failure, no need to reinit peer-link

Recommended Action  No action is required.

Error Message  VPC-3-VPC_ROLE_CHANGE_FAILURE: vPC role change failed, error: [chars]:[hex]

Explanation  VPC Role Change failure

Recommended Action  No action is required.

VPC-4

Error Message  VPC-4-PEER_VPC_DELETED: Peer vPC [dec] deleted

Explanation  Peer vPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CFGD_EXISTING: vPC [dec] might be used already, please check vpc configuration!

Explanation  VPC configuration duplication

Recommended Action  No action is required.

Error Message  VPC-4-VPC_CONSISTENCY_NEW_VLAN_FAIL: Global Consistency check for vPC failed for new vlans

Explanation  Global Consistency check for vPC failed for new vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DELETED: vPC [dec] is deleted

Explanation  VPC configuration deleted

Recommended Action  No action is required.

Error Message  VPC-4-VPC_DISABLE_IP_REDIRECTS: peer-gateway enabled. Disabling IP redirects on all interface-vlans of this vPC domain for correct operation of this feature.

Explanation  Peer-gateway enabled, hence IP redirects on SVIs are disabled

Recommended Action  No action is required.

Error Message  VPC-4-VPC_LC_UPG_OVER_DELIVERY_FAIL: Failed to deliver LC upgrade to vPC peer

Explanation  Failed to deliver LC upgrade to peer

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_LINK_DELETED: vPC Peer-link deleted. This will bringdown all vPC interfaces

Explanation  VPC Peer-link configuration removed

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PEER_ROLE_CHANGE: In domain [dec], VPC peer role status has changed to [chars]

Explanation  VPC Peer role status changed to (Primary/Secondary

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PER_VLAN_CONSISTENCY_FAILED: Global consistency check for vPC failed for few vlans

Explanation  Global Consistency check for vPC failed for few vlans

Recommended Action  No action is required.

Error Message  VPC-4-VPC_PER_VLAN_NO_SUPPORT: ISSD/ISSU to an image that does not support "per-vlan type-1 check" will not bring down/up any vlan (i.e. nothing will happen) until next compat-check.

Explanation  Triggered when ISSU/ISSD to an image which does not support per-vlan compat-check

Recommended Action  No action is required.

Error Message  VPC-4-VPC_REINITIALIZED: Reinitializing vpcs assuming peer dead

Explanation  Initializing vpcs assuming peer dead

Recommended Action  No action is required.

Error Message  VPC-4-VPC_ROLE_CHANGE: In domain [dec], VPC role status has changed to [chars]

Explanation  VPC role status changed to (Primary/Secondary

Recommended Action  No action is required.

VPC-5

Error Message  VPC-5-GLOBAL_CONSISTENCY_SUCCESS: In domain [dec], global configuration is consistent

Explanation  Global compat-check passed

Recommended Action  No action is required.

Error Message  VPC-5-INTF_CONSISTENCY_SUCCESS: In domain [dec], vPC [dec] configuration is consistent

Explanation  VPC configuration is consistent

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_RESUME: Orphan-port [chars] is removed from suspended

Explanation  Orphan-port is removed from suspended due to peer-link up or VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-ORPHANPORT_SUSPEND: Orphan-port [chars] is suspended

Explanation  Orphan-port is suspended due to peer-link down or no VPC role selection

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_INT_LATEST: In domain [dec], VPC peer-keepalive received on interface [chars]

Explanation  VPC peer-keepalive receive interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_RECV_SUCCESS: In domain [dec], vPC peer keep-alive receive is successful

Explanation  Peer keep-alive receive successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_INT_LATEST: In domain [dec], VPC peer-keepalive sent on interface [chars]

Explanation  VPC peer-keepalive send interface changed

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_SEND_SUCCESS: In domain [dec], vPC peer keep-alive send is successful

Explanation  Peer keep-alive send successful

Recommended Action  No action is required.

Error Message  VPC-5-PEER_KEEP_ALIVE_STATUS: In domain [dec], peer keep-alive status changed to [chars]

Explanation  Peer keep-alive (oob) status is changed to

Recommended Action  Peer-not-alive

Error Message  VPC-5-ROLE_PRIORITY_CFGD: In domain [dec], vPC role priority changed to [dec]

Explanation  Role priority configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_MAC_CFGD: In domain [dec], vPC system-mac changed to [chars]

Explanation  System mac configured

Recommended Action  No action is required.

Error Message  VPC-5-SYSTEM_PRIO_CFGD: In domain [dec], vPC system priority changed to [dec]

Explanation  System priority changed

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_DISABLED: vPC Manager disabled

Explanation  VPCM Service Disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPCM_ENABLED: vPC Manager enabled

Explanation  VPCM Service Enabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_AUTO_RECOVERY_TIMER_EXPIRED: vPC auto-recovery timer expired

Explanation  VPC auto-recovery timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_AUTO_RECOVERY_TIMER_STARTED: vPC auto-recovery timer started

Explanation  VPC auto-recovery timer started

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_EXPIRED: vPC restore, delay interface-vlan bringup timer expired, reinitiating interface-vlans

Explanation  VPC delay interface-vlan restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DELAY_SVI_BUP_TIMER_START: vPC restore, delay interface-vlan bringup timer started

Explanation  VPC delay interface-vlan restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_DOWN: vPC [dec] is down ([chars])

Explanation  VPC is down (reason)

Recommended Action  No action is required.

Error Message  VPC-5-VPC_OPERATIONAL_L3_ROUTING: VPC operational layer 3 peer-router is [chars]

Explanation  VPC operational layer 3 peer-router enabled or disabled

Recommended Action  No action is required.

Error Message  VPC-5-VPC_PEER_LINK_UP: vPC Peer-link is up

Explanation  VPC Peer-link is up

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_EXPIRED: vPC restore timer expired, reinitiating vPCs

Explanation  VPC restore timer expired

Recommended Action  No action is required.

Error Message  VPC-5-VPC_RESTORE_TIMER_START: vPC restore timer started to reinit vPCs

Explanation  VPC restore timer start

Recommended Action  No action is required.

Error Message  VPC-5-VPC_ROLE_PREMPT: In domain [dec], vPC role pre-emption triggered

Explanation  VPC preemption triggered

Recommended Action  No action is required.

Error Message  VPC-5-VPC_SCALE_LIMIT: No port-channel limit configuration is [chars]

Explanation  No port-channel limit configuration is changed

Recommended Action  No action is required.

Error Message  VPC-5-VPC_UP: vPC [dec] is up

Explanation  MCEC is UP

Recommended Action  No action is required.

VPC-6

Error Message  VPC-6-PEER_LOCK_FAILED: Locking failed on peer switch - Aborting upgrade!!

Explanation  Locking failed on peer switch

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD_VLANS_CHANGED: Peer vPC [dec] configured vlans changed

Explanation  Remote MCEC configured vlans Changed

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_CFGD: peer vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_DOWN: Peer vPC [dec] is down ([chars])

Explanation  Peer vPC is down

Recommended Action  No action is required.

Error Message  VPC-6-PEER_VPC_UP: Peer vPC [dec] is up

Explanation  Peer vPC is up

Recommended Action  No action is required.

Error Message  VPC-6-STATS_CLEARED: vPC Statistics Cleared

Explanation  VPC statistics cleared

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_CONFIGURED: In domain [dec], track object configured [dec]

Explanation  VPC track object configured

Recommended Action  No action is required.

Error Message  VPC-6-TRACK_OBJ_DELETED: In domain [dec], track object deleted

Explanation  VPC track object deconfigured

Recommended Action  No action is required.

Error Message  VPC-6-TYPE1_PARAM_CHANGED: TYPE-1 parameters changed: [chars]

Explanation  Type-1 Parameters Changed

Recommended Action  No action is required.

Error Message  VPC-6-VPCM_INTERNAL_INFO: [chars]

Explanation  VPCM got an internal info [chars]

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ALLOWED_VLAN_CHANGED: vPC [dec] operational vlans changed

Explanation  Operational vlans changed on vPC

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CFGD: vPC [dec] is configured

Explanation  VPC is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_CHECK_BYPASS: Bypassing consistency check for vPC: [dec]

Explanation  Bypassing consistency check for vpcs

Recommended Action  No action is required.

Error Message  VPC-6-VPC_CONSISTENCY_NEW_VLAN_PASS: Global Consistency check for vPC passed for new vlans

Explanation  Global Consistency check for vPC passed for new vlans

Recommended Action  No action is required.

Error Message  VPC-6-VPC_DOMAIN_ID_CFGD: vPC domain-id configured to [dec]

Explanation  VPC domain-id configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_EGRESS_DF_STATE_CHANGED: Egress designated forwarder state changed from [chars] to [chars] for vPC [dec].

Explanation  DF state changed for some vPC.

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_CFGD: Fabricpath switch ID [dec] configured

Explanation  Fabricpath switch ID configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_ES_ID_REMOVED: Fabricpath switch ID [dec] removed

Explanation  Fabricpath switch ID removed

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PEER_LINK_CFGD: vPC peer-link is configured

Explanation  VPC Peer-link is configured

Recommended Action  No action is required.

Error Message  VPC-6-VPC_PER_VLAN_CONSISTENCY_PASSED: Global Consistency check for vPC passed for all vlans

Explanation  Global Consistency check for vPC passed for all vlans

Recommended Action  No action is required.

VRRP-CFG Messages

This section contains the VRRP-CFG messages.

VRRP-CFG-2

Error Message  VRRP-CFG-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

Error Message  VRRP-CFG-2-VSH_REGISTER_FAIL: VSH registration failed returning [dec]

Explanation  VRRP's parse tree registration with VSH failed

Recommended Action  No action is required.

VRRP-CFG-3

Error Message  VRRP-CFG-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

Error Message  VRRP-CFG-3-VRRP_FEATURE_MANAGER_ERROR: Error in feature manager operation

Explanation  The feature manager operation did not go through fine

Recommended Action  Please check the reason for error using feature manager and rectify the problem

VRRP-CFG-5

Error Message  VRRP-CFG-5-STARTING: VRRP Manager service started

Explanation  The service successfully started.

Recommended Action  No action is required.

VRRP-ENG Messages

This section contains the VRRP-ENG messages.

VRRP-ENG-2

Error Message  VRRP-ENG-2-ALLOC_MEMORY: Memory allocation failed

Explanation  The service failed to allocate a block of dynamic memory.

Recommended Action  No action is required.

Error Message  VRRP-ENG-2-VR_FAILURE: Error in VR[chars] [dec] interface [chars]. Going to init state

Explanation  The VR [dec] on the interface [chars] is in init state for an internal error.

Recommended Action  Show interface to check the status of the interface, show configuration, status and statistics of the specified virtual router, enable the vrrp debug and shut/ no shut the specified virtual router.

VRRP-ENG-3

Error Message  VRRP-ENG-3-ARP_INIT_ERROR: Failed to init ARP, ret [hex], errno [dec]

Explanation  VRRP-ARP interaction failed.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_IF_SESSION_REMOVAL_ERROR: Failed to remove interface level VRRP-BFD sessions ([hex] [hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_SESSION_ADD_ERROR: Failed to add a few VRRP-BFD sessions([hex] [hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_SESSION_CREATION_ERROR: Failed to create BFD session information([hex] [hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-BFD_SESSION_REMOVAL_ERROR: Failed to remove a few VRRP-BFD sessions([hex] [hex]), Refer logs

Explanation  Plz refer internal error history for more details.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-INIT_FAILED: Initialization failed. Component [chars]

Explanation  The service failed to start. The failure occurred while initializing the component [chars].

Recommended Action  Show processes to check the status of the other processes, debug the specified component.

Error Message  VRRP-ENG-3-IP_INIT_ERROR: Failed to init IP, ret [hex], errno [dec]

Explanation  VRRP-IP interaction failed.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-L3VM_INIT_ERROR: Failed to init L3VM, ret [hex], errno [dec]

Explanation  VRRP-L3VM interaction failed.

Recommended Action  No action is required.

Error Message  VRRP-ENG-3-URIB_INIT_ERROR: Failed to init URIB, ret [hex], errno [dec]

Explanation  VRRP-URIB interaction failed.

Recommended Action  No action is required.

VRRP-ENG-4

Error Message  VRRP-ENG-4-BAD_ADV: VR[chars] ID [dec] on interface [chars] bad advertisement received: reason [chars]

Explanation  The virtual router specified has received an invalid advertisement.

Recommended Action  Check that all VRRP nodes have the same configuration.

VRRP-ENG-5

Error Message  VRRP-ENG-5-INTERFACE_DOWN: Cannot start the VR[chars] [dec] since the interface [chars] is down

Explanation  The specified VR is enabled but can't change state from init. The specified interface is down or doesn't have a primary IP address configured.

Recommended Action  No action is required.

Error Message  VRRP-ENG-5-INTERFACE_STATE_CHANGE: Interface [chars] state changed to [chars]

Explanation  The interface specified has changed state This could have triggered a VRRP status change.

Recommended Action  No action is required.

Error Message  VRRP-ENG-5-INVALID_CONFIG: Cannot start the VR[chars] [dec] on the interface [chars]. Invalid IP configuration. Reason: [chars]

Explanation  The specified VR on interface [chars] is enabled but the IP configuration is not valid because of [chars].

Recommended Action  Show interface to check that the IP address of the interface is configured and it is in the same subnet of the virtual router address.

Error Message  VRRP-ENG-5-STARTING: VRRP Engine service started

Explanation  The service successfully started.

Recommended Action  No action is required.

Error Message  VRRP-ENG-5-VR_STATE_CHANGE: VR[chars] ID [dec] on interface [chars] state changed to [chars], event [chars]

Explanation  The status of the specified virtual router has changed to [chars].

Recommended Action  No action is required.

VRRP-ENG-6

Error Message  VRRP-ENG-6-VSHA_RESULT: VR ID [dec] on interface [chars] state change request result [chars]

Explanation  The result of the request for status change on the virtual router (with VSHA extension) specified is [chars].

Recommended Action  No action is required.

VSAN Messages

This section contains the VSAN messages.

VSAN-2

Error Message  VSAN-2-PROGRAM_EXIT: process exiting with reason: [chars]

Explanation  VSAN manager process is exiting with reason [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

VSAN-3

Error Message  VSAN-3-CFS_OPERATION_FAILED: cfs [chars] operation failed : [chars]

Explanation  Cfs operation [chars1] has failed. [chars2]

Recommended Action  Please check the reason for the failure of the cfs operation and rectify the problem

Error Message  VSAN-3-MEM_ALLOC_FAILED: alloc failed for size:[dec]

Explanation  Memory allocation of size [dec] failed.

Recommended Action  Do "show process memory" command to see memory usage of processes.

Error Message  VSAN-3-MESSAGE_ERROR: could not handle message:[chars] of type [dec] sent by addr [dec]:[dec]

Explanation  Got an IPC message [chars] of type [dec1] sent by a component running on node [dec2] with sap [dec3].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

VSAN-6

Error Message  VSAN-6-ACTIVATED: VSAN:[dec] changing from suspended to active

Explanation  Making VSAN with ID [dec] active from suspended state.

Recommended Action  No action is required.

Error Message  VSAN-6-CFS_MERGE_NOT_SUPPORTED: merging of fctimer configuration data is not supported

Explanation  Merging of fctimer configuration data using cfs is not supported

Recommended Action  No action is required.

Error Message  VSAN-6-CREATED: Created VSAN:[dec] with name:[chars]

Explanation  Created VSAN with ID [dec] and name [chars].

Recommended Action  No action is required.

Error Message  VSAN-6-MEMBERSHIP_UPDATE: Updated membership for interface:[chars] with VSAN:[dec]

Explanation  Updating membership for interface [chars] with VSAN [dec].

Recommended Action  No action is required.

Error Message  VSAN-6-REMOVED: Removed VSAN:[dec]

Explanation  Removed VSAN with ID [dec].

Recommended Action  No action is required.

Error Message  VSAN-6-SUSPENDED: VSAN:[dec] changing from active to suspended

Explanation  Suspending VSAN with ID [dec] from active state.

Recommended Action  No action is required.

Error Message  VSAN-6-TRUNKING_MEMBERSHIP_UPDATE: trunking membership updated for interface:[chars] with VSAN bitmap:[chars]

Explanation  Updated trunking membership for interface [chars1] with allowed VSAN list [chars2].

Recommended Action  No action is required.

VSHD Messages

This section contains the VSHD messages.

VSHD-2

Error Message  VSHD-2-VSHD_INVALID_HA_OPERATOR_OID: Unknown ha operator: [dec]

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_INVALID_ROLE_OPCODE_OID: Invalid role op code [chars]

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_INVALID_ROLE_SYNC_OID: Invalid role sync msg received

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_INVALID_SUBTYPE_RANGE_OID: the name, the lower or the upper value of the subtype are not correct

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-2-VSHD_ROLE_DATABASE_TOO_LARGE: Role database too large. Unable to add RBAC entry

Explanation  There are too many rules and policies configured causing the entire role database too exceed 120KB

Recommended Action  Please delete some rules, policies, or roles and try to better optimize the RBAC database

Error Message  VSHD-2-VSHD_SYSLOG_EOL_ERR: EOL function [chars] from library [chars] exited due to Signal [dec]

Explanation  Error in CLI EOL function

Recommended Action  No action is required.

Error Message  VSHD-2-VSHD_SYSLOG_PSS_SNAPSHOT_ERR: Source URI:[chars] Destination URI:[chars] errcode:[dec]

Explanation  PSS snapshot error

Recommended Action  No action is required.

Error Message  VSHD-2-VSHD_SYSLOG_SDWRAP_ERR: Description:[chars] errcode:[dec]

Explanation  Debug infrastructure error

Recommended Action  No action is required.

VSHD-3

Error Message  VSHD-3-VSHD_ROLE_DISTRIBUTE_FAILURE: Role distribution operation ([chars]) failed with error id [hex]

Explanation  This is probably occurring due to unstable fabric

Recommended Action  Please retry operation when fabric is stable

Error Message  VSHD-3-VSHD_SYSLOG_FILE_ERR: Purpose:[chars] Filename:[chars] errcode:[dec]

Explanation  File handling error

Recommended Action  No action is required.

Error Message  VSHD-3-VSHD_SYSLOG_MTS_ERR: message [chars]

Explanation  MTS message handling error

Recommended Action  No action is required.

Error Message  VSHD-3-VSHD_SYSLOG_PARSE_TREE_ERR: [chars]

Explanation  Error while updating parse tree in shell

Recommended Action  No action is required.

Error Message  VSHD-3-VSHD_SYSLOG_PSS_ERR: Purpose:[chars] URI:[chars] errcode:[dec]

Explanation  PSS handling error

Recommended Action  No action is required.

VSHD-4

Error Message  VSHD-4-VSHD_LICENSE_EXPIRY_WARNING: License [chars] expires on [chars]. Vsan policy will be set to default (deny) for all roles when license expires

Explanation  Vsan policy would be set default (deny) for all roles when license expires

Recommended Action  Please install the license file to continue using the feature.

Error Message  VSHD-4-VSHD_MTS_ERROR_OID: [chars]

Explanation  This is probably occurring due to improper config

Recommended Action  Please collect show tech and debugs

Error Message  VSHD-4-VSHD_PORT_CHANNEL_CREATE: [chars]

Explanation  This is probably occurring when trying to create more port channels than allowed

Recommended Action  Please collect show tech, accounting logs and debugs

Error Message  VSHD-4-VSHD_ROLE_DATABASE_OUT_OF_SYNC: Role configuration database found to be different between the switches during merge

Explanation  Role configuration database is recommended to be identical among all switches in the fabric.

Recommended Action  Edit the configuration on one of the switches to obtain the desired role configuration database and then commit it

Error Message  VSHD-4-VSHD_ROLE_DATABASE_VERSION_NOT_UNDERSTOOD: This switch does not understand the version of role configuration database received during merge

Explanation  This is probably occurring due to different versions of system image on switches in the fabric

Recommended Action  Please make sure all switches are running the same version of the system image

Error Message  VSHD-4-VSHD_ROLE_RULE_ACCESS_SCOPE_EXTRA_OID: Too many oid elements. Please enter up to 32.

Explanation  This is probably occurring due to the value given for snmp oid field is more than 32 elements

Recommended Action  Please make sure the oid element should not exceed 32

Error Message  VSHD-4-VSHD_ROLE_RULE_ACCESS_SCOPE_INVALID_OID: Rule access scope OID value is Invalid

Explanation  This is probably occurring due to the value given for snmp oid field is neither digit nor dot

Recommended Action  Please make sure the oid value should only contains digit and dot

VSHD-5

Error Message  VSHD-5-VSHD_SYSLOG_CMD_EXEC: User:[chars] executed the command:[chars]

Explanation  CLI command was executed

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_CONFIG_CHANGE: VDC="[chars]", VTY="[chars]", user="[chars]", CMD="[chars]"

Explanation  Configuration change notification

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_CONFIG_I: Configured from vty by [chars] on [chars]

Explanation  CLI Configuration mode was exited

Recommended Action  No action is required.

Error Message  VSHD-5-VSHD_SYSLOG_ROLE_CREATED: New cli role [chars] created

Explanation  New cli role created

Recommended Action  No action is required.

VSHD-7

Error Message  VSHD-7-VSHD_SYSLOG_PARSE_TREE_UPDATE: Parse tree [chars]

Explanation  Parse tree updated in shell

Recommended Action  No action is required.

VTP Messages

This section contains the VTP messages.

VTP-0

Error Message  VTP-0-EMERGENCY_MSG: [chars]

Explanation  VTP Emergency Message

Recommended Action  Capture show tech-support vtp

VTP-1

Error Message  VTP-1-ALERT_MSG: [chars]

Explanation  VTP Alert Message

Recommended Action  Capture show tech-support vtp

VTP-2

Error Message  VTP-2-CRITICAL_MSG: [chars]

Explanation  VTP Critical Message

Recommended Action  No action is required.

Error Message  VTP-2-VTP_MODE_OFF_LONG_VLAN_NAME_EXIST: VTP Mode changed to off as long vlan name configuration is enabled

Explanation  By default, VTP feature comes up in Server mode. long vlan name can only be enabled in VTP transparent/off mode As long vlan name is already enabled, VTP mode is changed to off.

Recommended Action  No action is required.

Error Message  VTP-2-VTP_MODE_OFF_PVLAN_EXIST: VTP Mode changed to off as Private VLAN configuration exists

Explanation  By default, VTP feature comes up in Server mode. Private Vlans can only operate in VTP transparent/off mode As Private Vlan configuration already exist, VTP mode is changed to off.

Recommended Action  No action is required.

Error Message  VTP-2-VTP_MODE_OFF_RESERVED_VLAN_EXIST: VTP Mode changed to off as reserved vlan configuration exists

Explanation  By default, VTP feature comes up in Server mode. reserved vlans can only operate in VTP transparent/off mode As Reserved Vlan configuration already exist, VTP mode is changed to off.

Recommended Action  No action is required.

VTP-3

Error Message  VTP-3-ERROR_MSG: [chars]

Explanation  VTP Error Message

Recommended Action  No action is required.

VTP-4

Error Message  VTP-4-BAD_STARTUP_VLAN_CONFIG_FILE: Failed to configure VLAN from startup-config. Fallback to use VLAN configuration file from non-volatile memory

Explanation  VLAN software failed to use VLAN configuration from startup-config file. It will fallback to use the binary VLAN configuration file in non-volatile memory.

Recommended Action  No action is required.

Error Message  VTP-4-VLAN_CREATE_FAIL: Failed to create VLANs [chars]: [chars]

Explanation  The VLANs specified in the error message could not be created. The VLAN manager called an VLAN database routine to create one or more VLANs, but the Vlan Manager failed the VLAN creation requests.

Recommended Action  Collect show tech-support

Error Message  VTP-4-VTP_BAD_VLAN_CONFIGURATION_FILE_VERSION: VLAN configuration file contained unknown file version: [dec]

Explanation  The VLAN configuration file read by the VLAN manager contained an unrecognized file version number. (This may indicate an attempt to regress to an older version of the VLAN manager software.)

Recommended Action  LOG_STD_ACTION

Error Message  VTP-4-VTP_BAD_VLAN_CONFIGURATION_FILE: Vlan configuration file contained incorrect verification word: [hex]

Explanation  The VLAN configuration file read by the VLAN manager did not begin with correct value which would indicate a valid VLAN configuration file. Thus, it has been rejected.

Recommended Action  Collect show tech-support

Error Message  VTP-4-VTP_BAD_VLAN_DOMAIN_NAME_LENGTH: VLAN configuration file contained incorrect domain name length: [dec]

Explanation  The VLAN configuration file read by the VLAN manager did not contain a valid domain name length. Thus, it has been rejected.

Recommended Action  Please provision VTP domain name again

Error Message  VTP-4-VTP_BAD_VLAN_PASSWORD_LENGTH: VLAN configuration file contained incorrect VTP password length: [dec]

Explanation  The VLAN configuration file read by the VLAN manager did not contain a valid VTP password length. Thus, it has been rejected.

Recommended Action  Please provision VTP password again

Error Message  VTP-4-VTP_INVALID_DATABASE_DATA: VTP received bad data

Explanation  Invalid data was received by VTP process

Recommended Action  Collect show tech-support

Error Message  VTP-4-VTP_PROTOCOL_ERROR: VTP protocol code internal error: [chars]

Explanation  VTP protocol code encountered an unexpected error will processing configuration request, packet, or timer expiration.

Recommended Action  Collect show tech-support

Error Message  VTP-4-WARN_MSG: [chars]

Explanation  VTP Warning Message

Recommended Action  No action is required.

VTP-5

Error Message  VTP-5-NOTIF_MSG: [chars]

Explanation  VTP Notification Message

Recommended Action  No action is required.

VTP-6

Error Message  VTP-6-IFS_FAILURE: VLAN manager encountered file operation error: call = [chars] / file = [chars] / code = [dec] ([chars]) / bytes transfered = [dec]

Explanation  VTP received an unexpected error return from a file system call.

Recommended Action  Collect show tech-support

Error Message  VTP-6-INFO_MSG: [chars]

Explanation  VTP Informational Message

Recommended Action  No action is required.

Error Message  VTP-6-VTP_DOMAIN_NAME_CHG: VTP domain name changed to [chars].

Explanation  The VTP domain name was changed through configuration to the name specified in the message. A management domain is the naming scope of a VLAN name. Each VLAN has a name that is unique within the management domain.

Recommended Action  No action is required.

Error Message  VTP-6-VTP_MODE_CHANGE: VLAN manager changing device mode from [chars] to [chars].

Explanation  Some switch devices must automatically change VTP device modes upon receipt of a VLAN configuration database containing more than a set number of VLANs, depending on the device. This message indicates that such a spontaneous conversion has occurred, what the previous mode was, and what the current mode is.

Recommended Action  No action is required.

Error Message  VTP-6-VTP_OLD_CONFIG_FILE_READ: Old version [dec] VLAN configuration file detected and read OK. Version [dec] files will be written in the future.

Explanation  VLAN software detected an old version of the VLAN configuration file format. It was able to interpret the file with no problems but will create files using the new format in the future.

Recommended Action  No action is required.

Error Message  VTP-6-VTP_PRUNING_CHANGE: VTP Operational Pruning [chars].

Explanation  VTP operational pruning changed. This can happen due to admin pruning change, VTP mode changes or VTP config propagation. 'show vtp status' output can be looked up to find the reason for this change.

Recommended Action  Check 'show vtp status' output to find the reason for this change. No action is required.

VTP-7

Error Message  VTP-7-DEBUG_MSG: [chars]

Explanation  Association Manager Debug Message

Recommended Action  No action is required.

WWN Messages

This section contains the WWN messages.

WWN-1

Error Message  WWN-1-TYPE1_ALERT: [dec] (< [dec] %) Remain

Explanation  The WWN Manager has run out of WWNs. No new dynamically allocated WWNs are available. However, statically assigned WWNs such as switch WWN, port WWN, etc. are still available.

Recommended Action  Please add additional WWNs by programming a new Secondary MAC address and its range.

Error Message  WWN-1-TYPES2_5_ALERT: Only [dec] (< [dec] %) Type 2 & 5 WWNs Remain

Explanation  The WWN Manager has run out of WWNs of NAA Types 2 and 5

Recommended Action  Please add additional WWNs by programming a new Secondary MAC address and its range.

WWN-2

Error Message  WWN-2-BKPLN_PROM_CANT_READ: Can not read backplane PROM

Explanation  The WWN Manager has failed to read chassis information. No dynamic WWNs could be allocated.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  WWN-2-EXITING: Exited due to [chars]

Explanation  The WWN Manager process has exited due to [char]. The process has probably been restarted automatically.

Recommended Action  No action is required.

Error Message  WWN-2-GENERAL_ERROR: [chars]

Explanation  The WWN Manager has encountered an critical error. The description of error is [str.].

Recommended Action  No action is required.

Error Message  WWN-2-MALLOC_ERROR: Size [dec] bytes

Explanation  The WWN Manager could not allocate memory.

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

Error Message  WWN-2-PSS_BKP_PSS_MISMATCH: Block [dec]: PSS: Not Free; BKPLN PROM: Free

Explanation  This WWN Manager detected a discrepancy between the information on the chassis and that in its persistent information databases. The persistent information database has been updated with the information on the chassis.

Recommended Action  No action is required.

Error Message  WWN-2-PSS_ERROR: [chars]

Explanation  The WWN Manager encountered error while operating on a persistent storage database.

Recommended Action  No action is required.

Error Message  WWN-2-STDOUT_ROTATE_FAILURE: Failed to rotate stdout file: [chars]

Explanation  The WWN Manager has failed to rotate its current stdout file with filename [str.]. The filesize could grow beyond its maximum limit.

Recommended Action  No action is required.

Error Message  WWN-2-TYPE1_CRIT: [dec] (< [dec] %) Remain

Explanation  The WWN Manager has only [dec] or less than [dec]-percent WWNs remaining.

Recommended Action  Please add additional WWNs by programming a new Secondary MAC address and its range.

Error Message  WWN-2-TYPES2_5_CRIT: [dec] (< [dec] %) Remain

Explanation  The WWN Manager has only [dec] or less than [dec]-percent WWNs of NAA Types 2 and 5 remaining.

Recommended Action  Please add additional WWNs by programming a new Secondary MAC address and its range.

WWN-3

Error Message  WWN-3-PSS_SYNC_TO_STNDBY_FAILED: PSS TYPE=[chars] KEY=[chars]

Explanation  Could not send PSS Sync. notification to Standby Supervisor. PSS Type=[str.] Operation=[.str] Key=[Str.].

Recommended Action  No action is required.

Error Message  WWN-3-RELEASE_ERR_UNKNOWN: Unknown WWN [chars] [chars]

Explanation  WWN Manager received a request to release a WWN [char] that could not have been allocated by this WWN Manager due to [char].

Recommended Action  No action is required.

Error Message  WWN-3-RELEASE_ERR: Cant Rel. WWN [chars]

Explanation  WWN Manager received a request to release a WWN that cannot be released.

Recommended Action  No action is required.

Error Message  WWN-3-STARTUP_COPY_TO_RUNNING_FAILED: [chars]

Explanation  Could not snapshot Startup-Config PSS to Running-Config. The description of error is [str.].

Recommended Action  No action is required.

Error Message  WWN-3-TOOMANY_REQ_REL: WWNs [chars] = [dec] > MAX LIMIT 1024 - Denied

Explanation  The WWN Manager received a request to allocate [dec] WWN, which is more than the maximum number of WWNs that can be allocated/released in a single request.

Recommended Action  No action is required.

Error Message  WWN-3-UNKNOWN_MSG: Received from Node=[dec] SAP=[dec] Opcode=[dec]

Explanation  The WWN Manager has received an unknown message from [dec]].[dec] with opcode [dec]. This information is for debugging only.

Recommended Action  No action is required.

Error Message  WWN-3-WWN_PSS_CORRUPTED: [chars] PSS found corrupted

Explanation  The WWN Manager has detected corruption in one of its persistent information database. The database would be recreated.

Recommended Action  No action is required.

WWN-4

Error Message  WWN-4-PSS_SUP_CNT_MISMATCH: PSS [dec] Bkpln [dec]

Explanation  The WWN Manager has detected that some other supervisor card was plugged in earlier on this chassis. This WWN Manager is making sure that new WWNs allocate do not conflict with WWNs that could have been allocated by the previous supervisor card.

Recommended Action  No action is required.

Error Message  WWN-4-PSS_VERSION_MISMATCH: PSS [dec] Code [dec]

Explanation  There was a version mismatch between the WWN Manager and one of its persistent storage databases. The persistent information has been translated to the new format.

Recommended Action  No action is required.

Error Message  WWN-4-TYPE1_WARN: [dec] (< [dec] %) Remain

Explanation  The WWN Manager has only [dec] or less than [dec]-percent WWNs remaining for allocation.

Recommended Action  No action is required.

Error Message  WWN-4-TYPES2_5_WARN: [dec] (< [dec] %) Remain

Explanation  The WWN Manager has only [dec] or less than [dec]-percent WWNs of NAA Types 2 and 5 remaining.

Recommended Action  Please add additional WWNs by programming a new Secondary MAC address and its range.

WWN-5

Error Message  WWN-5-VSAN_WWN_CHANGE: [chars]

Explanation  VSAN-WWN created or deleted. The description of error is [str.].

Recommended Action  No action is required.

WWN-6

Error Message  WWN-6-ALLOCATED_BLOCK: Block number [dec]

Explanation  The WWN Manager has allocated a new block, block number [dec], of 256 WWNs for internal use.

Recommended Action  No action is required.

Error Message  WWN-6-BECAME_ACTIVE: Became ACTIVE from standby mode

Explanation  The WWN Manager on the standby supervisor became active and it is ready to serve client requests for WWNs.

Recommended Action  No action is required.

Error Message  WWN-6-BECAME_STDBY: Became STANDBY from active mode

Explanation  The WWN Manager became standby from active mode.

Recommended Action  No action is required.

Error Message  WWN-6-EXCESSIVE_DELAY: [chars]

Explanation  Excessive time taken for a processing event. The description of the event is [str.].

Recommended Action  No action is required.

Error Message  WWN-6-FAILED_TO_SEND_HEARTBEAT: Failed to send heartbeat to system manager: Reason=[chars]

Explanation  The WWN Manager was unable to send heartbeat to the system manager.

Recommended Action  No action is required.

Error Message  WWN-6-GENERAL_EVENT: [chars]

Explanation  The WWN Manager has generated an important event. The description of the event is [str.].

Recommended Action  No action is required.

Error Message  WWN-6-PSS_CREATED: [chars] PSS Created

Explanation  One of the persistent information database of the WWN Manager has been recreated.

Recommended Action  No action is required.

Error Message  WWN-6-PSS_DESTROYED: [chars] PSS Destroyed

Explanation  One of the persistent information databases has been intentionally destroyed and would be recreated.

Recommended Action  No action is required.

Error Message  WWN-6-RELEASED_BLOCK: Block number [dec]

Explanation  The WWN Manager has released a block, block number [dec], of 256 WWNs.

Recommended Action  No action is required.

Error Message  WWN-6-SEC_MAC_UPDATED: MAC=[chars] Range=[dec]

Explanation  The WWN Manager had updated the Secondary MAC address with MAC address [char] and range [dec]. This update was initiated from a management entity.

Recommended Action  No action is required.

Error Message  WWN-6-SERVICE_UP: Initialized [chars]

Explanation  The WWN Manager is up and ready to accept client requests for WWNs. The service was initialized in [char] mode.

Recommended Action  No action is required.

Error Message  WWN-6-SWITCHOVER: Switching Over to other Supervisor

Explanation  The WWN Manager has successfully switched over to the standby supervisor card.

Recommended Action  No action is required.

WWN-7

Error Message  WWN-7-RELEASE_ERR_FREE: Already free WWN [chars]

Explanation  A client of WWN Manager attempted to release WWN [char] which is already free. This information is for debugging only.

Recommended Action  No action is required.

XBAR_CLIENT Messages

This section contains the XBAR_CLIENT messages.

XBAR_CLIENT-SLOT#-2

Error Message  XBAR_CLIENT-SLOT#-2-VEGAS2_XBC_MEM_FULL: memory allocation failed in routine [chars]

Explanation  Process xbar_client failed to allocate memory

Recommended Action  Please perform a 'show process xbar-client event-history' to collect more information

Error Message  XBAR_CLIENT-SLOT#-2-VEGAS2_XBC_PROC_DN: terminating due to signal [dec]

Explanation  Process xbar_client is exiting

Recommended Action  Please perform a 'show process xbar-client event-history' to collect more information

Error Message  XBAR_CLIENT-SLOT#-2-VEGAS2_XBC_PROC_INITFAIL: initialization failed: [chars], errno [dec]

Explanation  Process xbar_client failed initialization

Recommended Action  Please perform a 'show process xbar-client event-history' to collect more information

Error Message  XBAR_CLIENT-SLOT#-2-XBC_ALL_INTERNAL_LINKS_DOWN: [chars]

Explanation  All internal links on module are down

Recommended Action  Please perform a 'show system xbar-client event-history' to collect more information

Error Message  XBAR_CLIENT-SLOT#-2-XBC_INTERNAL_LINK_DOWN: [chars], macf link - [dec], hg link - [dec]

Explanation  The internal link on module is down

Recommended Action  Please perform a 'show system xbar-client event-history' to collect more information

XBAR_CLIENT-SLOT#-3

Error Message  XBAR_CLIENT-SLOT#-3-VEGAS2_XBC_IPC_MSGUNKN: unknown IPC message received: opcode [dec]

Explanation  Process xbar_client hass received an unknown IPC message

Recommended Action  Please perform a 'show process xbar-client event-history' to collect more information

Error Message  XBAR_CLIENT-SLOT#-3-VEGAS2_XBC_MOD_INIT_FAIL: [chars], errcode - [hex]

Explanation  The module initialiazation failed

Recommended Action  Please perform a 'show process xbar-client event-history' to collect more information

XBAR_CLIENT-SLOT#-4

Error Message  XBAR_CLIENT-SLOT#-4-XBC_SOME_INTERNAL_LINK_DOWN: Internal HG links from LC unit-[dec] to FM unit-[dec] are down

Explanation  Some internal links on module are down

Recommended Action  Please perform a 'show system xbar-client event-history' to collect more information

XBAR Messages

This section contains the XBAR messages.

XBAR-2

Error Message  XBAR-2-ARB_INIT_FAIL: Arbiter Initialization failed return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-2-INCOMPATIBLE_CONFIG: [chars] [dec] [chars].

Explanation  This module is not compatible with the current fabric mode. It will be powered down.

Recommended Action  No action is required.

Error Message  XBAR-2-XBAR_HGLINK_DOWN: fabric link [dec] on [chars]module [dec] unit [dec] connected to [chars]module [dec] unit [dec] is down

Explanation  Received fabric link down event.

Recommended Action  No action is required.

Error Message  XBAR-2-XBAR_HGLINK_FLAP: fabric link [dec] on [chars]module [dec] unit [dec] connected to [chars]module [dec] unit:[dec] flapped and violated eem policy

Explanation  Fabric link flapped more times than the configured limit of eem policy.

Recommended Action  No action is required.

Error Message  XBAR-2-XBAR_HGLINK_NOT_UP: fabric link [dec] on [chars]module [dec] unit [dec] connected to [chars]module [dec] unit:[dec] is not up during module bring up

Explanation  Fabric link did not come up during module bring up.

Recommended Action  No action is required.

Error Message  XBAR-2-XBAR_INSUFFICIENT_XBAR_BANDWIDTH: Module in slot [dec] has insufficient xbar-bandwidth.

Explanation  To track insufficient xbar-bandwidth.

Recommended Action  No action is required.

Error Message  XBAR-2-XBAR_MIXED_SPINES_POLICY_MATCHED: [chars]

Explanation  Fabric could not be brought online due to policy match:

Recommended Action  No action is required.

Error Message  XBAR-2-XBAR_SUFFICIENT_XBAR_BANDWIDTH: Module in slot [dec] has sufficient xbar-bandwidth.

Explanation  To track recovery from insufficient xbar-bandwidth.

Recommended Action  No action is required.

Error Message  XBAR-2-XBM_EEM_FABRIC_ACTION: Fabric [chars] has been reloaded by xbar-manager because of an eem-policy triggered action [chars] %i

Explanation  Xbar-manager has removed the fabric because an eem policy has been met This means that the fabric has hit the maximum number of recoverable sync-losses with multiple line-cards within a time-window.

Recommended Action  No action is required.

Error Message  XBAR-2-XBM_EEM_MODULE_ACTION: Module [chars] has been reloaded by xbar-manager because of an eem-policy triggered action [chars] %i

Explanation  Xbar-manager has removed the linecard because an eem policy has been met This means that the module has hit the maximum number of recoverable sync-losses with fabric card(s) within a time-window.

Recommended Action  No action is required.

XBAR-3

Error Message  XBAR-3-MEM_FULL: Memory allocation failed. [chars] %i

Explanation

Recommended Action  No action is required.

XBAR-4

Error Message  XBAR-4-XBAR_MIXED_SPINES_IN_CHASSIS: [chars]

Explanation  There are both FAB-1 and FAB-2 type spines in the Chassis. Please replace the FAB-1 spines with FAB-2 Spines.

Recommended Action  No action is required.

XBAR-5

Error Message  XBAR-5-ARBITER_INIT_FAILURE: Re-initializing Arbiter. [chars] [chars] module %i

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_CLEAR_PORT_FAIL: Arbiter reported failure to de-register port [dec] in group [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_INIT_MOD_DIS_INTR_FAIL: Arbiter reported failure to disable interrupt for module [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_INIT_MOD_INSERT_CHECK_FAIL: Arbiter reported failure to recognize module [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_INIT_MOD_INSERT_FAIL: Arbiter reported failure to init module [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_INIT_MOD_INTR_FAIL: Arbiter reported failure to enable interrupt for module [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_INIT_MOD_REMOVE_FAIL: Arbiter reported failure to remove module [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-ARB_INIT_PORT_FAIL: Arbiter reported failure to register port [dec] in group [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an arbiter setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-MOD_CONNECTION_REATTEMPT: Re-attempting XBAR connection with module [dec]

Explanation  The module has experienced a setup failure on connecting the module to the fabric.

Recommended Action  Collect more informations about XBAR component Use command 'show xbar internal event-history module '. Power cycling the module may recover.

Error Message  XBAR-5-SYNC_THRESHOLD_FAILURE: Module resync threshold exceeded [chars] [chars] module %i

Explanation  This module has exceeded the number of resync attempts in a day. Module will be reloaded

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_ENABLE_FPOE_DB_FAILURE: XBAR [chars] enabling FPOE-DB mode failed

Explanation  The supervisor failed to enable FPOE-DB mode in fabric. The supervisor is going to reboot. In case of dual supervisor, a switchover will occur.

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_INIT_FAILURE: XBAR [chars] initialization failed [chars] %i

Explanation  The supervisor has experienced a fabric initialization failure. The supervisor is going to reboot. In case of dual supervisor, a switchover will occur.

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_INIT_FAIL: Xbar [[dec].[dec]] reported failure durinig intialization return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_MOD_INSERT_SEQ_FAILURE: [chars] for module [dec]

Explanation  The xbar manager received failure response and is failing the insert sequence

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_MOD_LC_INSERT_SEQ_FAILURE: Module in slot [dec] has failed insert sequence

Explanation  The xbar manager is failing the insert sequence

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_CHECK_SYNC_FAIL: Xbar [[dec].[dec]] reported failure to check sync on port [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_CONTINUE_SYNC_FAIL: Xbar [[dec].[dec]] reported failure to continue sync on port [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_DISABLE_FAIL: Xbar [[dec].[dec]] reported failure to disable port [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_ENABLE_FAIL: Xbar [[dec].[dec]] reported failure to enable port [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_FORCE_POE_DISABLE_FAIL: Xbar [[dec].[dec]] reported failure to disable force poe mode on [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_FORCE_POE_ENABLE_FAIL: Xbar [[dec].[dec]] reported failure to enable force poe mode on [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_LPBACK_DISABLE_FAIL: Xbar [[dec].[dec]] reported failure to disable port loopback on [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_LPBACK_ENABLE_FAIL: Xbar [[dec].[dec]] reported failure to enable port loopback on [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_PORT_START_SYNC_FAIL: Xbar [[dec].[dec]] reported failure to start sync on port [dec] return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_RELEASE_ACCESS_FAIL: Slot [dec] reported failure releasing [chars] xbar access return_code [hex] ([chars])

Explanation  The supervisor has experienced an xbar access failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_SET_ACCESS_FAIL: Slot [dec] reported failure acquiring [chars] xbar access return_code [hex] ([chars])

Explanation  The supervisor has experienced an xbar access failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_STANDBY_SUP_ARB_FAIL: [chars] return_code [hex] ([chars])

Explanation  The supervisor has experienced an arbiter access failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_STATUS_REPORT: Module [dec] reported status for component [dec] code [hex].

Explanation  An error status has been reported. If error is on supervisor, the supervisor is going to reboot. In case of dual supervisors, a switchover will occur. If error is on module, the module will be power cycled.

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_SW_INIT_FAIL: Xbar [[dec].[dec]] reported failure durinig sw intialization return_code [hex] ([chars]).

Explanation  The supervisor has experienced an xbar setup failure .

Recommended Action  No action is required.

Error Message  XBAR-5-XBAR_VERSION_CHECK_FAILURE: XBAR [chars] SCZ version check failed [chars] %i

Explanation  This SUP has an older Santacruz version, and so will not be allowed to power-up, Please upgrade to the latest supervisor version.

Recommended Action  No action is required.

XMLMA Messages

This section contains the XMLMA messages.

XMLMA-2

Error Message  XMLMA-2-HEARTBEAT_FAIL: XML master agent failed to send heart beat: [chars]

Explanation  XML master agent has failed sending heartbeat.

Recommended Action  No action is required.

Error Message  XMLMA-2-INITFAIL: XML master agent initialization fails: [chars]

Explanation  XML master agent has failed initialization.

Recommended Action  No action is required.

Error Message  XMLMA-2-MTSERROR: XML master agent mts operation failed: [chars]

Explanation  XML master agent mts operation failed.

Recommended Action  No action is required.

Error Message  XMLMA-2-PSSFAILURE: XML master agent pss operation failed: [chars]

Explanation  XML master agent pss operation failed.

Recommended Action  No action is required.

Error Message  XMLMA-2-XMLMACRIT: XML master agent: [chars]

Explanation  XML master agent critical log.

Recommended Action  No action is required.

XMLMA-3

Error Message  XMLMA-3-XMLMAERR: XML master agent: [chars]

Explanation  XML master agent error log.

Recommended Action  No action is required.

XMLMA-5

Error Message  XMLMA-5-STARTING: XML master agent started [chars]

Explanation  XML master agent has been started.

Recommended Action  No action is required.

XMLMA-6

Error Message  XMLMA-6-XMLMAEXIT: XML master agent exiting...: [chars]

Explanation  XML master agent is exiting.

Recommended Action  No action is required.

Error Message  XMLMA-6-XMLMALOG: XML master agent operation log: [chars]

Explanation  XML master agent operation log.

Recommended Action  No action is required.

XMLSA Messages

This section contains the XMLSA messages.

XMLSA-2

Error Message  XMLSA-2-CANDIDATE_WRITE_FAIL: Netconf session id:[dec],candidate config has no space left

Explanation  No space left in candidate configuration of the netconf session.

Recommended Action  Please send the commit or discard request for the outstanding config.

Error Message  XMLSA-2-HEARTBEAT_FAIL: XML sub agent failed sending heart beat: [chars]

Explanation  XML sub agent failed sending heartbeat.

Recommended Action  No action is required.

Error Message  XMLSA-2-INITFAIL: XML sub agent initialization fails: [chars]

Explanation  XML agent has failed initialization.

Recommended Action  No action is required.

Error Message  XMLSA-2-USER_INACTIVE: XML sub agent timeed out: [chars]

Explanation  XML sub agent timedout due to inactivity.

Recommended Action  No action is required.

Error Message  XMLSA-2-VSH_ERR: XML sub agent vsh cmd error...: [chars]

Explanation  XML sub agent vsh cmd error.

Recommended Action  No action is required.

XMLSA-5

Error Message  XMLSA-5-RPC_ERROR: Netconf session id:[dec], operation:[chars], status:FAILED, reason:[chars]

Explanation  Netconf operation has failed.

Recommended Action  No action is required.

Error Message  XMLSA-5-RPC_OK: Netconf session id:[dec], operation:[chars], status:SUCCESS

Explanation  Netconf operation is successful.

Recommended Action  No action is required.

Error Message  XMLSA-5-STARTING: XML sub agent started: [chars]

Explanation  XML sub agent has been started.

Recommended Action  No action is required.

XMLSA-6

Error Message  XMLSA-6-XMLSAEXIT: XML sub agent exiting...: [chars]

Explanation  XML sub agent is exiting.

Recommended Action  No action is required.

Error Message  XMLSA-6-XMLSALOG: XML sub agent log: [chars]

Explanation  XML sub agent log.

Recommended Action  No action is required.

ZONE Messages

This section contains the ZONE messages.

ZONE-2

Error Message  ZONE-2-ZS_ALIAS_LIMIT_EXCEEDED: The limit for maximum number of aliases exceeded

Explanation  The number of aliases configured has exceeded the maximum number of aliases allowed per vsan Due to this, distribution or merge operation may fail.

Recommended Action  Make sure the number of aliases is less than the maximum allowed in a vsan.

Error Message  ZONE-2-ZS_ATTR_GROUP_LIMIT_EXCEEDED: The limit for maximum number of attribute groups exceeded

Explanation  The number of attribute groups configured has exceeded the maximum number of attribute groups allowed in a vsan Due to this, distribution or merge operation may fail.

Recommended Action  Make sure the number of attribute groups is less than the maximum allowed in a vsan.

Error Message  ZONE-2-ZS_BLOCKED_ATTR_PRESENT: Module [dec] failed to come online due to [chars] in VSAN [dec] to bring up the module.

Explanation  Module [dec] failed to come up due to [chars].

Recommended Action  Verify if RO/LUN/Broadcast attributes are configured, in the VSAN, disable if configured

Error Message  ZONE-2-ZS_CHANGE_ACA_FAILED: ACA failed : [chars]

Explanation  Zone Server cannot acquire change authorization : [chars].

Recommended Action  Verify the interoperability mode on all the switches OR retry later.

Error Message  ZONE-2-ZS_CHANGE_ACQUIRE_AUTH_FAILED: Acquire authorization failed on VSAN [dec]

Explanation  Zone Server cannot acquire authorization on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_ACTIVATION_FAILED_RESN_DOM: Activation failed : reason [chars] domain [dec]

Explanation  Zone Server cannot activate due to reason [chars] on domain [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_ACTIVATION_FAILED_RESN: Activation failed : reason [chars]

Explanation  Zone Server cannot activate due to reason [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_ACTIVATION_FAILED: Activation failed

Explanation  Zone Server cannot activate the zoneset.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_APPLY_FAILED: Apply changed failed on VSAN [dec]

Explanation  Zone Server cannot apply changes on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_DEACTIVATION_FAILED_RESN_DOM: Deactivation failed : reason [chars] domain [dec]

Explanation  Zone Server cannot deactivate due to reason [chars] on domain [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_DEACTIVATION_FAILED_RESN: Deactivation failed : reason [chars]

Explanation  Zone Server cannot deactivate due to reason [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_DEACTIVATION_FAILED: Deactivation failed

Explanation  Zone Server cannot deactivate the zoneset.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_RELEASE_AUTH_FAILED: Release authorization failed on VSAN [dec]

Explanation  Zone Server cannot release authorization on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_RRCA_REJECTED: RRCA received from remote domain [dec] is rejected: [chars]

Explanation  Received invalid RRCA from domain [dec]. : [chars]

Recommended Action  Verify the interoperability mode on the switch.

Error Message  ZONE-2-ZS_CHANGE_RUFC_REJECTED: RUFC received from remote domain [dec] is rejected: [chars]

Explanation  Received invalid RUFC from domain [dec]. : [chars]

Recommended Action  Verify the interoperability mode on the switch.

Error Message  ZONE-2-ZS_CHANGE_SFC_FAILED: SFC failed : [chars]

Explanation  Zone Server cannot stage zone configuration : [chars].

Recommended Action  Verify the interoperability mode on all the switches.

Error Message  ZONE-2-ZS_CHANGE_SFC_REJECTED: SFC received from remote domain [dec] is rejected: [chars]

Explanation  Received invalid SFC from domain [dec]. : [chars]

Recommended Action  Verify the interoperability mode on the switch.

Error Message  ZONE-2-ZS_CHANGE_SMART_ZONING_POLICY_CHANGE_FAILED: Smart Zoning Policy Change Failed

Explanation  Zone Server cannot distribute smart zoning policy change.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_ACTIVATE_ZSSET_BY_NAME_FAILED: Stage activate zoneset by name failed on VSAN [dec]

Explanation  Zone Server cannot stage activate zoneset by name on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_ACTIVATE_ZSSET_ENH_FAILED: Stage activate zone set enhanced failed on VSAN [dec]

Explanation  Zone Server cannot stage activate zone set enhanced on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_DEACTIVATE_ZSSET_ENH_FAILED: Stage deactivate zoneset enhanced failed on VSAN [dec]

Explanation  Zone Server cannot stage deactivate zoneset enhanced on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_DISTRIBUTE_DFLT_ZONE_FAILED: Stage distribute default zone failed on VSAN [dec]

Explanation  Zone Server cannot stage distribute default zone on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_DISTRIBUTE_ZS_DB_FAILED: Stage distribute zoneset database failed on VSAN [dec]

Explanation  Zone Server cannot stage distribute zoneset database on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_SET_ZONING_MODE_FAILED: Stage set zoning mode failed on VSAN [dec]

Explanation  Zone Server cannot stage set zoning mode on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_CHANGE_STAGE_SET_ZONING_POLICIES_FAILED: Stage set zoning policies failed on VSAN [dec]

Explanation  Zone Server cannot stage set zoning policies on VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_DB_OPERATION_FAILED: Database operation error: [chars]

Explanation  Database operation is failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_DDAS_TABLE_CLEANUP_DUPLICATE_ENTRIES: Zone Device-alias table cleanup failed. Please try again. Do not initiate any Zone configuration commands until this command is successful.

Explanation  Zone device-alias table cleanup failed due to error: [chars]

Recommended Action  Please try again. Do not initiate any zone configuration command until this command is successful.

Error Message  ZONE-2-ZS_EXPORT_IMPORT_FAILED: [chars] operation failed

Explanation  [chars] (Export/Import) operation failed.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_FC2_DB_SIZE_LIMIT_EXCEEDED: [chars] Zone database size [dec] bytes exceeded maximum limit of [dec] bytes

Explanation  Zone database size exceeded : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_FIPS_COMPLIANCE_FAILURE: FIPS compliance error: consecutively same random numbers

Explanation  FIPS compliance error: consecutively same random numbers

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_INIT_FAILED: [chars]

Explanation  Zone Server initialization failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_LICENSE_UNAVAIL: License:[chars] unavailable, removing LUN members, read-only attribute and re-activating active zonesets on all affected VSANs

Explanation  License:[char] unavailable, removing LUN members, read-only attribute and re-activating active zonesets on all affected VSANs.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_LIC_FAILURE: License [chars] operation failed for license [chars]

Explanation  License [char] operation failed for license [char].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_LUN_DISABLING_FAILED: license expiry handling failed for VSAN [dec]

Explanation  License expiry handling failed for VSAN [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_LUN_MEMBER_LIMIT_EXCEEDED: The limit for maximum number of lun members exceeded

Explanation  The number of lun members configured has exceeded the maximum number of lun members allowed across all vsans Due to this, distribution or merge operation may fail.

Recommended Action  Make sure the number of lun members is less than the maximum allowed across all vsans.

Error Message  ZONE-2-ZS_MALLOC_FAILURE: Memory allocation failed for size [dec]

Explanation  Memory allocation is failed for size [dec] bytes.

Recommended Action  Restart the process.

Error Message  ZONE-2-ZS_MEMBER_HARD_LIMIT_EXCEEDED: Maximum configurable unique zone member limit of [dec] reached. Creation of any more zone members is not supported

Explanation  The number of members configured has exceeded the maximum number of members: [dec] allowed across all vsans Due to this, distribution or merge operation may fail.

Recommended Action  Make sure the number of members is less than the maximum allowed across all vsans.

Error Message  ZONE-2-ZS_MEMBER_SOFT_LIMIT_REACHED: Zone member count has reached the maximum validated limit of [dec]. Creation of any more members could potentially destabilize the fabric.

Explanation  The number of zone members configured has exceeded the validated number of members: [dec] allowed across all vsans Creation of any more zones could potentially destabilize the fabric.

Recommended Action  Make sure the number of zone members is less than the validated limit allowed across all vsans.

Error Message  ZONE-2-ZS_MERGE_ADJ_NO_RESPONSE: Adjacent switch not responding, isolating interface [chars]

Explanation  Interface [chars] isolated due to adjacent switch not responding to Zone Server requests.

Recommended Action  Flap the interface.

Error Message  ZONE-2-ZS_MERGE_FAILED: Zone merge failure, isolating interface [chars] [chars]

Explanation  Interface [chars] isolated due to zone merge failure. error [chars]

Recommended Action  Compare active zoneset with the adjacent switch OR use "zone merge interface [interface] {import/export} VSAN [VSAN-num]" command.

Error Message  ZONE-2-ZS_MERGE_FULL_DATABASE_MISMATCH: Zone merge full database mismatch on interface [chars]

Explanation  Full zoning databases are inconsistent between two switches connected by interface [chars]. Databases are not merged.

Recommended Action  Compare full zoning database with the adjacent switch, correct the difference and flap the link.

Error Message  ZONE-2-ZS_MERGE_UNKNOWN_FORMAT: Unknown format, isolating interface [chars]

Explanation  Interface [chars] isolated due to unknown format in merge request.

Recommended Action  Set the interoperability mode to same value on both switches.

Error Message  ZONE-2-ZS_MTS_OPER_FAILED: MTS [chars] operation failed : [chars]

Explanation  Zone Server MTS [chars] operation failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_NO_RSCN_ON_SW_CARD: Devices on Module [dec] will not be receiving RSCN as [chars]

Explanation  Devices on Module [dec] will not be receiving RSCN as [chars].

Recommended Action  Enable Zone Based RSCN

Error Message  ZONE-2-ZS_PORT_SWAP_FAILURE: Port swap operation failed

Explanation  Port swap operation failed.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_PSS_VER_MISMATCH: PSS version mismatch URL: [chars] (expected [chars], got [chars])

Explanation  Configuration version mismatch. PSS URL [chars]. Expected version [chars], stored version [chars].

Recommended Action  Upgrade/Downgrade to expected version.

Error Message  ZONE-2-ZS_SHARED_DB_INIT_FAILED: [chars]

Explanation  Zone Server shared DB initialization failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_TCAM_BROADCAST_ZONE_DISABLED: Broadcast zoning disabled : Reason: Hard zoning disabled

Explanation  Broadcast zoning disabled : Reason: Hard zoning disabled due to TCAM programming failure.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_TCAM_LUN_ZONING_DISABLED: LUN zoning disabled : Reason: Hard zoning disabled

Explanation  LUN zoning disabled : Reason: Hard zoning disabled due to TCAM programming failure.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_TCAM_PROGRAMMING_FAILED: TCAM operation failed : [chars], Reason: [chars]

Explanation  TCAM Programming failure has occurred : [chars]. [chars] is the reason for failure.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_TCAM_READ_ONLY_ZONE_DISABLED: Read-only zoning disabled : Reason: Hard zoning disabled

Explanation  Read-only zoning disabled : Reason: Hard zoning disabled due to TCAM programming failure.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_TCAM_SWITCHED_TO_SOFT_ZONING_MODE: Switched to soft zoning : Reason: Hard zoning disabled

Explanation  Switched to soft zoning : Reason: Hard zoning disabled due to TCAM programming failure.

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_VIRTUAL_DOMAIN_INCONSISTENT: IVR reporting virtual domain different from rib and domain manager in vsan [dec]

Explanation  IVR reporting virtual domain different from rib and domain manager in vsan [dec].

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_ZONE_BASED_RSCN_DISABLED: Zone based RSCN Generation has been Disabled. Devices on non ISOLA line cards will not be receiving RSCN

Explanation  Devices on one or more line cards will not be receiving RSCN as RSCN generation by zone has been disabled on this switch

Recommended Action  No action is required.

Error Message  ZONE-2-ZS_ZONE_HARD_LIMIT_EXCEEDED: Maximum configurable zone limit of [dec] reached. Creation of any more zones is not supported

Explanation  The number of zones configured has exceeded the maximum number of zones: [dec] allowed across all vsans Due to this, distribution or merge operation may fail.

Recommended Action  Make sure the number of zones is less than the maximum allowed across all vsans.

Error Message  ZONE-2-ZS_ZONE_SET_LIMIT_EXCEEDED: The limit for maximum number of zonesets exceeded

Explanation  The number of zonesets configured has exceeded the maximum number of zonesets allowed across all vsans Due to this, distribution or merge operation may fail.

Recommended Action  Make sure the number of zonesets is less than the maximum allowed across all vsans.

Error Message  ZONE-2-ZS_ZONE_SOFT_LIMIT_REACHED: Zone count has reached the maximum validated limit of [dec]. Creation of any more zones could potentially destabilize the fabric.

Explanation  The number of zones configured has exceeded the validated number of zones: [dec] allowed across all vsans Creation of any more zones could potentially destabilize the fabric.

Recommended Action  Make sure the number of zones is less than the validated limit allowed across all vsans.

ZONE-3

Error Message  ZONE-3-ZS_ACTIVATION_FAILED_DUE_TO_QOS_DISABLED: Activation failed due to qos not enabled

Explanation  Activation of zoneset failed due to qos not enabled

Recommended Action  Make sure qos is enabled and reactivate the zoneset in vsan.

Error Message  ZONE-3-ZS_MGMT_SEC_SDB_ERR: [chars] : [chars]

Explanation  FC CT Mgmt Security shared db operation : [chars] : [chars].

Recommended Action  Please contact the Cisco reseller through which you procured the product for support. If you have purchased a Cisco support contract please call Cisco TAC for support.

ZONE-4

Error Message  ZONE-4-ZS_BROADCAST_LUN_WARNING: LUN member(s) and Broadcast attribute are present in zone [chars] in vsan [dec]. Broadcast violations can occur for LUN members.

Explanation  Broadcast violations can happen in zone [chars] in vsan [dec] since it has LUN zone members.

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_CHANGE_LC_UPGRADE_IN_PROGRESS: Change protocol request is received from domain [dec] when linecard upgrade is in progress

Explanation  A change request has been received from domain [dec] when a linecard upgrade is in progress. The change request is rejected.

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_DB_WARNING: [chars]

Explanation  Database operation warning: [chars].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_DOMAIN_MGR_WARNING: Unable to retrieve domain info from domain mgr error: [chars] in vsan [dec]

Explanation  Unable to retrieve info of domain from domain manager, error: [chars] in vsan [dec].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_FC2_OPER_FAILED: FC2 [chars] operation failed : [chars]

Explanation  Zone Server FC2 [chars] operation failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_IF_PORT_MODE_CONFLICT: Port mode conflict for if [chars]

Explanation  Port mode conflict for if [chars]

Recommended Action  Shutdown/no shutdown the interface

Error Message  ZONE-4-ZS_INVALID_FPORT_WWN_MEMBER: Virtual device fwwn: [chars] is not a valid zone/alias member virtual name: [chars] pwwn: [chars]

Explanation  Virtual device fwwn: [chars] is not a valid zone/alias member, virtual name: [chars] pwwn: [chars].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_LC_UPGRADE_CHANGE_IN_PROGRESS: Linecard upgrade request is received when change protocol is in progress

Explanation  A request for linecard upgrade has been received when change protocol is in progress. The linecard upgrade will occur after the completion of the change protocol.

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_LICENSE_EXPIRY_WARNING: Feature [chars] evaluation license [chars] expiry in [dec] days

Explanation  Feature [chars1] will exceed it's evaluation time period in [dec] days and will be shut down unless a permanent license [chars2] is installed.

Recommended Action  Please install the license file to continue using the feature.

Error Message  ZONE-4-ZS_MEMBER_CONVERSION_FAILED: Zone Member conversion failed for [chars]. Error: [chars]

Explanation  Zone Member conversion has failed in : [chars] due to error: [chars]

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_MGMT_SEC_RJT: FC CT Management Server query Rejected: [chars]. from FCID [hex]

Explanation  Mgmt-security has rejected FC CT Management Server query: [chars]. from FCID [hex].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_NON_INTEROPERABLE_ZONE_SET: Non interoperable active zoneset present on VSAN [dec] in interoperability mode

Explanation  Active zoneset has non interoperable members (FCID, FWWN, ..) when interoperability mode is turned on the VSAN [dec].

Recommended Action  Turn off interoperability mode OR make sure that active zoneset has only interoperable members (PWWN).

Error Message  ZONE-4-ZS_QOS_LUN_WARNING: LUN member(s) and QoS attribute are present in zone [chars] in vsan [dec]. QoS will not be applicable for LUN members.

Explanation  QoS will not be applicable to LUN zone members in zone [chars] in vsan [dec].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_SDV_VIRT_REAL_CONFLICT_WARNING: Virtual and Real devices are zoned together or zoned with same device. virtual name: [chars] pwwn: [chars]

Explanation  Virtual and Real devices are zoned together or zoned with same device, virtual name: [chars] pwwn: [chars].

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_SMART_ZONING_AUTO_CONVERSION_FAILED: Smart Zoning auto conversion failed for [chars]. Error: [chars]

Explanation  Smart Zoning auto conversion has failed in : [chars] due to error: [chars]

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_SMART_ZONING_CLEAR_SMART_ZONING_CONFIG_FAILED: Clearing Smart Zoning config failed for [chars]. Error: [chars]

Explanation  Clearing Smart Zoning config has failed in : [chars] due to error: [chars]

Recommended Action  No action is required.

Error Message  ZONE-4-ZS_TOO_MANY_ALIAS_IN_CURRENT_INTEROP_MODE: Too many aliases in current interoperability mode

Explanation  Too many aliases configured in current interoperability mode on the VSAN. Due to this, the next zoneset activation, distribution or merge operation may fail.

Recommended Action  Set the interoperability mode to appropriate value OR make sure the number of aliases is less than the maximum allowed in the current interoperability mode.

Error Message  ZONE-4-ZS_UNSUPPORTED_MEMBER_IN_CURRENT_INTEROP_MODE: Unsupported member present in active or full zoneset in current interoperability mode

Explanation  Active or full zoneset has members that are not supported in the current interoperability mode set on the VSAN.

Recommended Action  Set the interoperability mode to appropriate value OR make sure that active or full zoneset has only supported members in the current interoperability mode.

ZONE-5

Error Message  ZONE-5-ZS_EXPORT_IMPORT_COMPLETE: [chars] operation completed

Explanation  [chars] (Export/Import) operation completed.

Recommended Action  No action is required.

Error Message  ZONE-5-ZS_POLICY_CHANGE: Default zoning policy changed to [chars]

Explanation  Default zoning policy changed to (permit/deny).

Recommended Action  No action is required.

Error Message  ZONE-5-ZS_ZONE_SET_ACTIVATED: Zoneset [chars] activated

Explanation  Zoneset [chars] activated.

Recommended Action  No action is required.

Error Message  ZONE-5-ZS_ZONE_SET_DEACTIVATED: Zoneset deactivated

Explanation  Zoneset deactivated.

Recommended Action  No action is required.

ZONE-6

Error Message  ZONE-6-ZS_CHANGE_ACA_REJECTED: ACA received from remote domain [dec] is rejected

Explanation  Received invalid ACA from domain [dec]. Either the domain list do not match OR authorization has already been acquired by another switch.

Recommended Action  Verify the interoperability mode on the switch.

Error Message  ZONE-6-ZS_FC2_OPER_INFO: FC2 [chars] operation failed : [chars]

Explanation  Zone Server FC2 [chars] operation failed : [chars].

Recommended Action  No action is required.

Error Message  ZONE-6-ZS_INIT_PROCESS: Zone Server process started [chars] at [chars]

Explanation  Zone Server process started in [chars] (stateless/stateful) mode at time [chars].

Recommended Action  No action is required.

Error Message  ZONE-6-ZS_INIT_WARNING: [chars]

Explanation  Warning during Zone Server Initialization: [chars].

Recommended Action  No action is required.

Error Message  ZONE-6-ZS_INVALID_MEMBER: Invalid member [dec] [chars]

Explanation  Invalid member type [dec] [chars] recieved from the API call.

Recommended Action

Error Message  ZONE-6-ZS_MGMT_SERVER_REQ: ZS received FC CT Mgmt Server [chars] Command code [hex], from FCID [hex].

Explanation  FC CT request has been received from Managment Server. It is [chars]. Command code [hex], from FCId [hex]

Recommended Action  No action is required.

Error Message  ZONE-6-ZS_UNKNOWN_LIC_FEATURE: [chars]

Explanation  Zone Server received an event for an known licensing feature: [chars].

Recommended Action  No action is required.