Chapter 1. Compatibility Matrix for Cisco DCNM, Release 10.1(1)

The below table shows the Cisco DCNM Compatibility Matrix for Release 10.1(1).

Cisco MDS 9100

7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1), 5.2(8h), 5.2(8c), 5.2(8d), 5.2(8e), 5.2(8f), 5.2(8g)

Cisco MDS 9200

7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(17), , 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1), 5.2(8h), 5.2(8c), 5.2(8d), 5.2(8e), 5.2(8f), 5, 2(8g)

Cisco MDS 9300

7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 5.2(8h)

Cisco MDS 9500

7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), , 6.2(11), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1), 5.2(8h), 5.2(8c), 5.2(8d), 5.2(8e), 5.2(8f), 5.2(8g)

Cisco MDS 9700

7.3(1)D1(1), 7.3(0)DY(1), 7.3(0)D1(1), 6.2(17), 6.2(15), 6.2(13b), 6.2(13a), 6.2(13), 6.2(11c), 6.2(11b), 6.2(11), 6.2(9b), 6.2(9a), 6.2(9), 6.2(7), 6.2(5a), 6.2(5), 6.2(3), 6.2(1),5.2(8h)

Cisco Nexus 9000 Series

7.0(3)I5(1), 7.0(3)I4(4), 7.0(3)I4(3), 7.0(3)I4(2), 7.0(3)I4(1), 7.0(3)I3(2), 7.0(3)I3(1), 7.0(3)I2.3, 7.0.3.I2.2c, 7.0(3)l2.2a, 7.0(3)l2.1, 7.0(3)l1.3, 7.0(3)I1.2, 6.2(9), 6.1(2)I3.4, 6.1(2)I3.2, 6.1(2)I3(1), 6.1(2)I2(1), 6.1(2)I1(2), 6.1(2)I1(1)

Cisco Nexus 7000 Series

7.3(1)D1(1), 7.3(0)DX(1), 7.3(0)D1(1), 7.2(2)D1(2), 7.2(2)D1(1), 7.2(1)D1(1), 7.2(0)D1(2), 7.2(0)D1(1) , 6.2(16), 6.2(14), 6.2(12), 6.2(10), 6.2(8), 6.2(6a), 6.2(6), 6.2(2a), 6.2(2), 6.1, 6.0, 5.2, 5.1, 5.0, 4.2, 4.1, 4.0

Cisco Nexus 7700 Series

7.3(1)D1(1), 7.3(0)DX(1), 7.3(0)D1(1), 7.2(2)D1(2), 7.2(2)D1(1), 7.2(1)D1(1), 7.2(0)D1(2), 7.2(0)D1(1) , 6.2(16), 6.2(14), 6.2(10), 6.2(8), 6.2(6a), 6.2(6), 6.2(2a), 6.2.2

Cisco Nexus 6000/5600 Series

7.3(1)N1(1), 7.3(0)N1(1), 7.2(1)N1(1), 7.2(0)N1(1), 7.1(4)N1(1), 7.1(3)N1(1), 7.1(3)N1(1), 7.1(2)N1(1), 7.1(1)N1(1), 7.1(0)N1(1), 7.0(8)N1(1), 7.0(7)N1(1), 7.0(6)N1(1), 7.0(5)N1(1), 7.0(4)N1(1), 7.0(3)N1(1), 7.0(2)N1(1), 7.0(1)N1(1), 6.0(2)N2(7), 6.0(2)N2(2), 6.0(2)N2(1), 6.0(2)N1(2)

Cisco Nexus 5000 Series

7.3(1)N1(1), , 7.3(0)N1(1), 7.2(1)N1(1), 7.2(0)N1(1), 7.1(4)N1(1), 7.1(3)N1(1), 7.1(3)N1(1), 7.1(2)N1(1), 7.1(1)N1(1), 7.1(0)N1(1), 7.0(8)N1(1), 7.0(7)N1(1), 7.0(6)N1(1), 7.0(5)N1(1), 7.0(4)N1(1), 7.0(3)N1(1), 7.0(2)N1(1), 7.0(1)N1(1), 6.0(2)N2(7), 6.0(2), 5.2(1)N1(9a), 5.2(1)N1(9), 5.2(1), 5.1(3), 5.0(3), 5.0(2), 4.2(1), 4.1(3)

Cisco Nexus 4000 Series

4.1(2)

Cisco Nexus 3500 Series

7.0(3)I5(1), 7.0(3)I4(4), 7.0(3)I4(3), 7.0(3)I4(2), 7.0(3)I4(1), 7.0(3)i3(2), 7.0(3)I3(1), 7.0(3)I2.3, 7.0(3)l2.2a,7.0(3)l2.1, 6.0(2)U3(2), 6.0(2)A3(1), 6.0(2)A1(1d), 5.0(3)A1(2a)

Cisco Nexus 3100 Series

7.0(3)I5(1), 7.0(3)I4(4), 7.0(3)I4(3), 7.0(3)I4(2), 7.0(3)I4(1), 7.0(3)I3(1), 7.0(3)I2.3, 7.0(3)l2.2a, 7.0(3)l2.1, 6.0(2)U3(2), 6.0(2)U3(1), 6.0(2)U2(1), 6.0(2)U2(1)

Cisco Nexus 3000 Series

7.0(3)I5(1), 7.0(3)I4(4), 7.0(3)I4(3), 7.0(3)I4(2), 7.0(3)I3(2), 7.0(3)I3(1), 7.0(3)I2.3, 7.0(3)l2.2a, 7.0(3)l2.1, 6.0(2)U3(2), 6.0(2)U3(1), 6.0(2)U2(3), 6.0(2)U2(1), 6.0(2)U1(3), 6.0(2)A1(1b), 6.0(2)A1(1a), 6.0(2)A1(1), 6.0(2)U1(2), 6.0(2)U1(1), 5.0(3)U5(1i), 5.0(3)U4(1), 5.0(3)A1(2a), 5.0(3)U5(1e), 5.0(3)U4, 5.0(3)U3, 5.0(3)U2, 5.0(3)U1,

Cisco Nexus 1010 Series

4.2(1)SP1(6.1), 4.2(1)SP1(5.1a) , 4.2(1)SP1(4a)

Cisco Nexus 1000v Series

5.2(1)SV3(1.4) , 4.2(1)SV2(2.3), 4.2(1)SV2(2.2), 4.2(1)SV2(2.1), 4.2(1)SV2(1.1), 4.2(1)SV1(4), 5.2(1)SM1(5.1)

UCS FI

3.0.2d, 2.2.5a

Unified Computing System

1.4, 2.0

Third party platforms and software versions for DCNM storage automation

Vendor

System

SMI-S Provider Version

Soft Version

EMC

VNX 5300

4.6.2.9

05.32.000.5.216 - 7.32.29 (1.52)

EMC

VNX 5500

4.6.2.9

05.32.000.5.219 - 7.32.30 (3.18)

EMC

VNXe 3200

Native

3.1.5.7213336

EMC

Unity 300F

Native

4.0.1.8404134

EMC

VMAX1

8.2.0.0

enginuity 5876.268.174

HDS

G1000

Native

80-04-02-00/00

HDS

VSP

HDS 6.0.0

70-06-04-00/00

Netapp

FAS8040

Ontap 5.2

8.3.2

Notices