Dear Cisco Customer,

Cisco engineering has identified the following software issues with the release that you have selected that may affect your use of this software. The software is no longer available for download. Please review the Software Deferral notice here to determine if the issues apply to your environment.

For more comprehensive information about what is included in this software, refer to the Cisco software Release Notes, available from the Product Selector tool. From this page, select the product you are interested in. Release Notes are under "General Information" on the product page.

Affected Software and Replacement Solution for CSCvj50398

Software Type

Software Affected

Software Solution

Cisco UCS Infrastructure and UCS Manager Software

Version:

ucs-manager-k9.3.2.3a.bin

ucs-manager-k9.3.2.3b.bin

Affected Images:

ucs-k9-bundle-infra.3.2.3a.A.bin

ucs-k9-bundle-infra.3.2.3b.A.bin

ucs-6300-k9-bundle-infra.3.2.3a.A.bin

ucs-6300-k9-bundle-infra.3.2.3b.A.bin

ucs-mini-k9-bundle-infra.3.2.3a.A.bin

ucs-mini-k9-bundle-infra.3.2.3b.A.bin

Version:

ucs-manager-k9.3.2.3c.bin

Replacement Images:

ucs-k9-bundle-infra.3.2.3d.A.bin

ucs-6300-k9-bundle-infra.3.2.3d.A.bin

ucs-mini-k9-bundle-infra.3.2.3d.A.bin

Reason for Advisory:

CSCvj50398 – Server reboots without user-acknowledgment after asset tag is modified or after an upgrade from UCS Manager 3.1(2) or earlier.

Affected Platforms:

Cisco UCS B-Series Servers

Cisco UCS C-Series Servers integrated with UCS Manager

Symptom:

Cisco UCS Servers may reboot unexpectedly without user acknowledgement

Conditions:

During UCS Infrastructure upgrades from UCS Manager 3.1(2) or earlier to an affected release, Cisco UCS C-Series Server may reboot without user acknowledgement.

Following an upgrade to an affected UCS Infrastructure release, Cisco UCS B-Series and C-Series servers will reboot without user acknowledgement after modifying the asset tag.

Workaround:

If already running affected firmware, do not modify the asset tag.

Upgrade UCS Infrastructure firmware to the 3.2(3d) Release Bundle or newer.