Contenido

Introducción

prerrequisitos

Requisitos

Componentes Utilizados

Configurar

Diagrama de la red

Flujo de tráfico

Configuraciones

Switch 3850-1

Switch 3850-2

ISE

Verificación

Referencias

Discusiones relacionadas de la comunidad del soporte de Cisco

Introducción

Este documento describe cómo configurar y resolver problemas la característica que la versión 2.0 del Cisco Identity Services Engine (ISE) soporta el Exchange Protocol de TrustSec SGT (SXP) en un modo del Lister y del Presidente.

Prerequisites

Requisitos

Cisco recomienda que tenga conocimiento sobre estos temas:

- Configuración del switch del Cisco Catalyst

- Servicios del Identity Services Engine (ISE) y de TrustSec

Componentes Utilizados

La información que contiene este documento se basa en estas versiones de software:

- Cisco Catalyst 3850 Switch con el software IOS-XE 3.7.2 y posterior

- Cisco ISE, libera 2.0 y posterior

Configurar

Diagrama de la red

Flujo de tráfico

- 3850-2 es el authenticator del 802.1x para 10.0.0.100 - Etiqueta de vuelta del grupo de seguridad ISE (SGT) 16 (las TIC) para la autenticación satisfactoria

- El 3850-2 Switch aprende el IP Address del supplicant (dispositivo del IP que sigue) y envía la información de mapeo (IP-SGT) al ISE usando el protocolo SXP

- 3850-1 es el authenticator del 802.1x para 10.0.0.1 - ISE que vuelve la etiqueta 9 (márketing) SGT para la autenticación satisfactoria

- 3850-1 recibe la información de mapeo SXP del ISE (10.0.0.100 es SGT 16), descarga la directiva del ISE

- El tráfico enviado de 10.0.0.100 a 10.0.0.1 es remitido por 3850-2 (ningunas directivas específicas descargadas) a 3850-1 que sea guardián que golpea la directiva las TIC (16) - > el márketing (9)

Observe por favor el link entre el Switches no es cts conectan - así que todas las asignaciones remotas en el Switches están instaladas vía el protocolo SXP.

Note: No todo el Switches tiene el hardware permitiendo ser programado vía la directiva recibida del ISE basado en las asignaciones recibidas SXP. Para la verificación refiera por favor siempre a la última matriz de compatibilidad o contacto Cisco Systems de TrustSec.

Configuraciones

Para los detalles con respecto a la configuración básica de TrustSec, refiera a los artículos en la sección de referencias.

Conmute 3850-1

El Switch termina la sesión del 802.1x con la asignación SGT y también como altavoz SXP hacia el ISE.

aaa authentication dot1x default group ISE_mgarcarz

aaa authorization network default group ISE_mgarcarz

aaa authorization network ISE_mgarcarz group ISE_mgarcarz

aaa accounting dot1x default start-stop group ISE_mgarcarz

aaa accounting update newinfo

radius server ISE_mgarcarz

address ipv4 10.48.17.235 auth-port 1645 acct-port 1646

pac key cisco

aaa group server radius ISE_mgarcarz

server name ISE_mgarcarz

interface GigabitEthernet1/0/3

switchport mode trunk

interface GigabitEthernet1/0/5

description mgarcarz

switchport access vlan 100

switchport mode access

ip flow monitor F_MON input

ip flow monitor F_MON output

authentication order dot1x mab

authentication priority dot1x mab

authentication port-control auto

mab

dot1x pae authenticator

cts authorization list ISE_mgarcarz

cts role-based enforcement

cts role-based enforcement vlan-list 1-4094

cts sxp enable

cts sxp default password cisco

cts sxp connection peer 10.48.17.235 password default mode local listener hold-time 0

Switch 3850-2

El Switch termina la sesión del 802.1x con la asignación SGT y también como módulo de escucha SXP que consigue la asignación del ISE.

aaa authentication dot1x default group ISE_mgarcarz

aaa authorization network default group ISE_mgarcarz

aaa authorization network ISE_mgarcarz group ISE_mgarcarz

aaa accounting dot1x default start-stop group ISE_mgarcarz

aaa accounting update newinfo

radius server ISE_mgarcarz

address ipv4 10.48.17.235 auth-port 1645 acct-port 1646

pac key cisco

aaa group server radius ISE_mgarcarz

server name ISE_mgarcarz

interface GigabitEthernet1/0/3

switchport mode trunk

interface GigabitEthernet1/0/5

description mgarcarz

switchport access vlan 100

switchport mode access

authentication order dot1x mab

authentication priority dot1x mab

authentication port-control auto

mab

dot1x pae authenticator

cts authorization list ISE_mgarcarz

cts role-based enforcement

cts role-based enforcement vlan-list 1-4094

cts sxp enable

cts sxp default password cisco

cts sxp connection peer 10.48.17.235 password default mode local speaker hold-time 0

ISE

Paso 1. Dispositivos de acceso a la red

Navegue a los centros de trabajo > Device Administration (Administración del dispositivo) > los recursos de red, agregue ambo Switches con el secreto compartido Cisco y la contraseña Krakow123 de TrustSec.

Paso 2. Grupos de seguridad

Para agregar SGT para el TIC y el márketing, navegue los grupos al > Security (Seguridad) de los centros de trabajo > de TrustSec > de los componentes.

Paso 3. Grupos de seguridad ACL

Para agregar el grupo de seguridad ACL, navegue el grupo ACL al > Security (Seguridad) de los centros de trabajo > de TrustSec > de los componentes.

Permita solamente el tráfico ICMP.

Paso 4. Directiva de TrustSec

Para agregar la directiva que controla el tráfico del TIC a la comercialización, navegue a los centros de trabajo > a TrustSec > a los componentes > a la política de egress > a la matriz.

Fije la captura de la entrada predeterminada toda la regla para negar todo el tráfico.

Paso 5. Dispositivos SXP

Para configurar el módulo de escucha y al locutor SXP para el Switches correspondiente, navegue a los centros de trabajo > a TrustSec > a los dispositivos SXP.

Utilice la palabra clave Cisco (o cualquier otra configurada para el sxp en el Switch).

Paso 6. Directiva de la autorización

Asegúrese de que directiva de la autorización vuelve las etiquetas correctas SGT para cada usuario, navegue a la directiva > a la autorización.

Verificación

Paso 1. Switch que se une al ISE para los cts

De cada Switch proporcione las credenciales de TrustSec (configuradas en ISE/Step1) para conseguir el PAC.

KSEC-3850-2#cts credentials id KSEC-3850-2 password Krakow123

CTS device ID and password have been inserted in the local keystore. Please make sure that the same ID and password are configured in the server database.

Asegúrese de que el PAC esté descargado.

KSEC-3850-2#show cts pacs

AID: 65D55BAF222BBC73362A7810A04A005B

PAC-Info:

PAC-type = Cisco Trustsec

AID: 65D55BAF222BBC73362A7810A04A005B

I-ID: KSEC-3850-2

A-ID-Info: Identity Services Engine

Credential Lifetime: 20:42:37 UTC Nov 13 2015

PAC-Opaque: 000200B8000300010004001065D55BAF222BBC73362A7810A04A005B0006009C00030100B26D8DDC125B6595067D64F917DA624C0000001355CB2E1C00093A800E567155E0DE76419D2F3B97D890F34F109C4C42F586B29050CEC7B441E0CA60FC6684D4F6E8263FA2623A6E450927815A140CD3B9D68988E95D8C1E65544E222E187C647B9F7F3F230F6DB4F80F3C201ACD623B309077E27688EDF7704740A1CD3F18CE8485788054C19909083ED303BB49A6975AC0395D41E1227B

Refresh timer is set for 12w4d

Y se restaura la política ambiental.

KSEC-3850-2#show cts environment-data

CTS Environment Data

====================

Current state = COMPLETE

Last status = Successful

Local Device SGT:

SGT tag = 0-00:Unknown

Server List Info:

Installed list: CTSServerList1-0001, 1 server(s):

*Server: 10.48.17.235, port 1812, A-ID 65D55BAF222BBC73362A7810A04A005B

Status = ALIVE

auto-test = FALSE, keywrap-enable = FALSE, idle-time = 60 mins, deadtime = 20 secs

Multicast Group SGT Table:

Security Group Name Table:

0-00:Unknown

6-00:SGT_Guest

9-00:SGT_Marketing

15-00:SGT_BYOD

16-00:SGT_IT

255-00:SGT_Quarantine

Environment Data Lifetime = 86400 secs

Last update time = 20:47:04 UTC Sat Aug 15 2015

Env-data expires in   0:08:09:13 (dd:hr:mm:sec)

Env-data refreshes in 0:08:09:13 (dd:hr:mm:sec)

Cache data applied           = NONE

State Machine is running

Relance el mismo proceso para 3850-1

Sesiones del 802.1x del paso 2.

Después de que autentiquen al usuario TIC, se asigna la etiqueta correcta.

KSEC-3850-2#show authentication sessions interface g1/0/5 details

Interface:  GigabitEthernet1/0/5

IIF-ID:  0x107E700000000C4

MAC Address:  0050.b611.ed31

IPv6 Address:  Unknown

IPv4 Address:  10.0.0.100

User-Name:  cisco

Status:  Authorized

Domain:  DATA

Oper host mode:  single-host

Oper control dir:  both

Session timeout:  N/A

Common Session ID:  0A3E946D00000FF214D18E36

Acct Session ID:  0x00000FDC

Handle:  0xA4000020

Current Policy:  POLICY_Gi1/0/5

Local Policies:

Service Template: DEFAULT_LINKSEC_POLICY_SHOULD_SECURE (priority 150)

Security Policy:  Should Secure

Security Status:  Link Unsecure

Server Policies:

SGT Value:  16

Method status list:

Method           State

dot1x            Authc Success

La asignación está instalada en la tabla local SGT-IP.

KSEC-3850-2#show cts role-based sgt-map all

Active IPv4-SGT Bindings Information

IP Address              SGT     Source

============================================

10.0.0.100              16      LOCAL

Paso 3. Altavoz SXP

3850-2 envía la asignación al ISE, los debugs del Switch para el sxp de los cts.

KSEC-3850-2(config)#do show debug

CTS:

CTS SXP message debugging is on

*Aug 16 12:48:30.173: CTS-SXP-MSG:trp_send_msg <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.173: CTS-SXP-MSG:trp_socket_write fd<1>, cdbp->ph_sock_pending<1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_process_read_sock socket_recv result:-1 errno:11; <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_process_read_sock socket_conn is accepted; <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_socket_write fd<1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.226: CTS-SXP-MSG:trp_socket_write freeing tx_msgq_entry, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:after socket_send, wlen=28, slen=0, tot_len=28, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:trp_socket_write freeing tx_buf, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.227: CTS-SXP-MSG:trp_socket_read readlen = -1; errno = 11, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.278: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.278: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.278: CTS-SXP-MSG:RCVD peer 10.48.17.235 readlen:32, datalen:0 remain:4096 bufp =

*Aug 16 12:48:30.278: CTS-SXP-MSG:sxp_handle_rx_msg_v2 <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:imu_sxp_conn_cr <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:wrt_sxp_opcode_info_v4 cdbp 0x3D541160

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_send_msg <1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_socket_write fd<1>, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_socket_write freeing tx_msgq_entry, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:after socket_send, wlen=28, slen=0, tot_len=28, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.279: CTS-SXP-MSG:trp_socket_write freeing tx_buf, <10.48.17.235, 10.62.148.109>

*Aug 16 12:48:30.280: CTS-SXP-MSG:trp_socket_read readlen = 32; errno = 11, <10.48.17.235, 10.62.148.109>

El ISE señala (sxp_appserver/sxp.log)

2015-08-16 14:44:07,029 INFO  [nioEventLoopGroup-2-3] opendaylight.sxp.core.behavior.Strategy:473 - [ISE:10.48.17.235][10.48.17.235:21121/10.62.148.109:64999][O|Lv4/Sv4 192.168.77.2] PURGEALL processing

2015-08-16 14:44:07,029 WARN  [nioEventLoopGroup-2-3] opendaylight.sxp.core.handler.MessageDecoder:173 - [ISE:10.48.17.235][10.48.17.235:21121/10.62.148.109:64999] Channel inactivation

2015-08-16 14:44:07,029 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:721 - SXP_PERF:BINDINGS_PER_SXP_UPDATE_MESSAGE(CHUNK)=1, onlyChanged=true

2015-08-16 14:44:07,030 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:725 - SXP_PERF:NUM_OF_CHUNKS=1, onlyChanged=true

2015-08-16 14:44:07,030 INFO  [pool-3-thread-9] opendaylight.sxp.core.service.UpdateExportTask:93 - SXP_PERF:SEND_UPDATE_BUFFER_SIZE=16

2015-08-16 14:44:07,030 INFO  [pool-3-thread-9] opendaylight.sxp.core.service.UpdateExportTask:119 - SENT_UPDATE to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]

2015-08-16 14:44:07,030 INFO  [pool-3-thread-9] opendaylight.sxp.core.service.UpdateExportTask:140 - SENT_UPDATE SUCCESSFUL to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]:false

2015-08-16 14:44:07,030 INFO  [pool-3-thread-1] opendaylight.sxp.core.service.BindingDispatcher:198 - SXP_PERF:MDB_PARTITON_AND_SXP_DISPATCH:DURATION=1 milliseconds, NUM_CONNECTIONS=1

2015-08-16 14:44:07,031 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:725 - SXP_PERF:NUM_OF_CHUNKS=0, onlyChanged=true

2015-08-16 14:44:12,534 INFO  [nioEventLoopGroup-2-4] opendaylight.sxp.core.behavior.Strategy:232 - [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][X|Lv4/Sv4 192.168.77.2] received Message  Open

2015-08-16 14:44:12,535 INFO  [nioEventLoopGroup-2-4] opendaylight.sxp.core.behavior.Strategy:358 - [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2] Sent RESP 0 0 0 32 0 0 0 2 | 0 0 0 4 0 0 0 2 80 6 6 3 0 2 0 1 0 80 7 4 0 120 0 180

2015-08-16 14:44:12,585 INFO  [nioEventLoopGroup-2-4] opendaylight.sxp.core.behavior.Strategy:451 - [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2] received Message  Update

2015-08-16 14:44:12,586 INFO  [pool-3-thread-2] opendaylight.sxp.core.service.SimpleBindingHandler:663 - PERF_SXP_PROCESS_UPDATE from [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2]

2015-08-16 14:44:12,586 INFO  [pool-3-thread-2] opendaylight.sxp.core.service.SimpleBindingHandler:666 - PERF_SXP_PROCESS_UPDATE_DONE from [ISE:10.48.17.235][10.48.17.235:64999/10.62.148.109:1035][O|Lv4/Sv4 192.168.77.2]

2015-08-16 14:44:12,586 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:721 - SXP_PERF:BINDINGS_PER_SXP_UPDATE_MESSAGE(CHUNK)=1, onlyChanged=true

2015-08-16 14:44:12,587 INFO  [pool-3-thread-1] sxp.util.database.spi.MasterDatabaseProvider:725 - SXP_PERF:NUM_OF_CHUNKS=1, onlyChanged=true

2015-08-16 14:44:12,587 INFO  [pool-3-thread-11] opendaylight.sxp.core.service.UpdateExportTask:93 - SXP_PERF:SEND_UPDATE_BUFFER_SIZE=32

2015-08-16 14:44:12,587 INFO  [pool-3-thread-11] opendaylight.sxp.core.service.UpdateExportTask:119 - SENT_UPDATE to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]

2015-08-16 14:44:12,587 INFO  [pool-3-thread-11] opendaylight.sxp.core.service.UpdateExportTask:140 - SENT_UPDATE SUCCESSFUL to [ISE:10.48.17.235][10.48.17.235:57719/10.62.148.108:64999][O|Sv4]:false

2015-08-16 14:44:12,587 INFO  [pool-3-thread-1] opendaylight.sxp.core.service.BindingDispatcher:198 - SXP_PERF:MDB_PARTITON_AND_SXP_DISPATCH:DURATION=1 milliseconds, NUM_CONNECTIONS=1

Y presente todas las asignaciones vía el GUI (asignación incluyendo para 10.0.0.100 recibió a partir de la 3850-2), tal y como se muestra en de esta imagen.

192.168.77.2 es el identificador de la conexión SXP en 3850-2 (el IP Address más alto definido).

KSEC-3850-2#show ip interface brief

Interface              IP-Address      OK? Method Status                Protocol

GigabitEthernet0/0     unassigned      YES unset  down                  down

Vlan1                  unassigned      YES NVRAM  administratively down down

Vlan100                10.0.0.2        YES manual up                    up

Vlan480                10.62.148.109   YES NVRAM  up                    up

Vlan613                unassigned      YES NVRAM  administratively down down

Vlan666                192.168.66.2    YES NVRAM  down                  down

Vlan777                192.168.77.2    YES NVRAM  down                  down

Paso 4. Módulo de escucha SXP

Entonces el ISE vuelve a enviar esa asignación a 3850-1, los debugs del Switch.

*Aug 16 05:42:54.199: CTS-SXP-MSG:trp_send_msg <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.199: CTS-SXP-MSG:trp_socket_write fd<1>, cdbp->ph_sock_pending<1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_process_read_sock socket_recv result:-1 errno:11; <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_process_read_sock socket_conn is accepted; <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_socket_write fd<1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_socket_write freeing tx_msgq_entry, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:after socket_send, wlen=32, slen=0, tot_len=32, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.248: CTS-SXP-MSG:trp_socket_write freeing tx_buf, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.249: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.249: CTS-SXP-MSG:trp_socket_read readlen = -1; errno = 11, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.300: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.300: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.300: CTS-SXP-MSG:RCVD peer 10.48.17.235 readlen:28, datalen:0 remain:4096 bufp =

*Aug 16 05:42:54.301: CTS-SXP-MSG:sxp_handle_rx_msg_v2 <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.301: CTS-SXP-MSG:imu_sxp_conn_cr ci<1> cdbp->ph_conn_state<2>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.301: CTS-SXP-MSG:trp_socket_read readlen = 28; errno = 11, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.301: CTS-SXP-MSG:trp_process_read_sock <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:trp_socket_read <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:RCVD peer 10.48.17.235 readlen:52, datalen:0 remain:4096 bufp =

*Aug 16 05:42:54.302: CTS-SXP-MSG:sxp_handle_rx_msg_v2 <1>, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:sxp_recv_update_v4 <1> peer ip: 10.48.17.235

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:44, opc_ptr:0x3DFC7308, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:37, opc_ptr:0x3DFC730F, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:32, opc_ptr:0x3DFC7314, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:24, opc_ptr:0x3DFC731C, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:13, opc_ptr:0x3DFC7327, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.302: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:8, opc_ptr:0x3DFC732C, <10.48.17.235, 10.62.148.108>

*Aug 16 05:42:54.303: CTS-SXP-MSG:1. msg type:3, total len:52,  payl len:0, opc_ptr:0x3DFC7334, <10.48.17.235, 10.62.148.108>

La captura de paquetes tomada del ISE para el tráfico hacia 3850-1 confirma las asignaciones SXP se está enviando.

Wireshark utiliza el decodificador estándar SMPP. Para marcar el payload:

10 (SGT = 16) para los Cb "c0 a8 01” (192.168.1.203)

10 (SGT = 16) para "0a 00 00 64" (10.0.0.100)

3850-1 instala todas las asignaciones recibidas del ISE.

KSEC-3850-1# show cts sxp sgt-map

SXP Node ID(generated):0xC0A84D01(192.168.77.1)

IP-SGT Mappings as follows:

IPv4,SGT: <10.0.0.100 , 16:SGT_IT>

source  : SXP;

Peer IP : 10.48.17.235;

Ins Num : 2;

Status  : Active;

Seq Num : 439

Peer Seq: 0A3011EB,C0A84D02,

IPv4,SGT: <192.168.1.203 , 16:SGT_IT>

source  : SXP;

Peer IP : 10.48.17.235;

Ins Num : 6;

Status  : Active;

Seq Num : 21

Peer Seq: 0A3011EB,

Total number of IP-SGT Mappings: 2

KSEC-3850-1# show cts role-based sgt-map all

Active IPv4-SGT Bindings Information

IP Address              SGT     Source

============================================

10.0.0.100              16      SXP

192.168.1.203           16      SXP

IP-SGT Active Bindings Summary

============================================

Total number of CLI      bindings = 1

Total number of SXP      bindings = 2

Total number of active   bindings = 3

Paso 5. Descarga y aplicación de la directiva

Descargue la directiva correcta del ISE. (Fila de la matriz con SGT 16)

KSEC-3850-1#show cts role-based permissions

IPv4 Role-based permissions default:

Permit IP-00

IPv4 Role-based permissions from group 16:SGT_IT to group 9:SGT_Marketing:

ICMP-10

Deny IP-00

RBACL Monitor All for Dynamic Policies : FALSE

RBACL Monitor All for Configured Policies : FALSE

El tráfico ICMP de 10.0.0.100 (SGT LAS TIC) a 10.0.0.1 (márketing SGT) se permite, aumento de los contadores.

KSEC-3850-1#show cts role-based counters from 16

Role-based IPv4 counters

#Hardware counters are not available for specific SGT/DGT

#Use this command without arguments to see hardware counters

From    To      SW-Denied       SW-Permitted

16      9       0               0               11              0

Cuando el intentar utilizar la conexión Telnet falla, los contadores de caídas aumenta.

KSEC-3850-1#show cts role-based counters from 16

Role-based IPv4 counters

#Hardware counters are not available for specific SGT/DGT

#Use this command without arguments to see hardware counters

From    To      SW-Denied       SW-Permitted

16      9       3               0               11              0

Observe por favor allí no es ninguna directiva específica en 3850-2, todo el tráfico se permite.

KSEC-3850-2#show cts role-based permissions

IPv4 Role-based permissions default:

Permit IP-00

RBACL Monitor All for Dynamic Policies : FALSE

RBACL Monitor All for Configured Policies : FALSE

Después de modificar SG ACL en el ISE, agregar el permiso tcp, y cts restaura la directiva en 3850-1 - entonces el tráfico telnet se valida.

Su posible también utilizar la NetFlow Flexible (a partir de IOS-XE 3.7.2 es SGT enterado) caché local para confirmar el comportamiento.

flow record cts-v4

match ipv4 protocol

match ipv4 source address

match ipv4 destination address

match transport source-port

match transport destination-port

match flow direction

match flow cts source group-tag

match flow cts destination group-tag

collect counter packets long

flow monitor F_MON

record cts-v4

interface GigabitEthernet1/0/3

ip flow monitor F_MON input

ip flow monitor F_MON output

El tráfico de las demostraciones de los resultados recibido a partir de la 3850-2. La fuente SGT es 0 porque el tráfico recibido no tiene ningún SGT (ningún link de los cts), pero la etiqueta del grupo de destino automáticamente se substituye basada en la tabla de correspondencia local.

KSEC-3850-1#show flow monitor F_MON cache

Cache type:                               Normal (Platform cache)

Cache size:                              Unknown

Current entries:                               6

Flows added:                                1978

Flows aged:                                 1972

- Active timeout      (  1800 secs)         30

- Inactive timeout    (    15 secs)       1942

IPV4 SRC ADDR    IPV4 DST ADDR    TRNS SRC PORT  TRNS DST PORT  FLOW DIRN  FLOW CTS SRC GROUP TAG  FLOW CTS DST GROUP TAG  IP PROT             pkts long

===============  ===============  =============  =============  =========  ======================  ======================  =======  ====================

150.1.7.1        224.0.0.10                   0              0  Output                          0                       0       88                    57

10.62.148.1      224.0.0.13                   0           8192  Output                          0                       0      103                     0

7.7.4.1          224.0.0.10                   0              0  Output                          0                       0       88                    56

10.0.0.1         10.0.0.100                   0              0  Output                          0                       0        1                  1388

150.1.7.105      224.0.0.5                    0              0  Output                          0                       0       89                    24

150.1.7.1        224.0.0.5                    0              0  Output                          0                       0       89                    24

10.0.0.100       10.0.0.1                     0           2048  Input                           0                       9        1                  1388

El Netflow caché local se puede utilizar para confirmar el tráfico recibido. Si se valida o se cae ese tráfico, eso es confirmada por los contadores de los cts presentados antes.

El ISE también permite generar los informes del atascamiento y de la conexión SXP, tal y como se muestra en de esta imagen.

Referencias

- Postura de la Versión de ASA 9.2.1 VPN con el ejemplo de configuración ISE

- ASA y ejemplo de configuración de TrustSec del Catalyst 3750X Series Switch y guía del Troubleshooting

- Guía de configuración del switch de Cisco TrustSec: Comprensión de Cisco TrustSec

- Despliegue y mapa de ruta de Cisco TrustSec

- Guía de configuración de TrustSec del Cisco Catalyst 3850

- Matriz de compatibilidad de Cisco TrustSec

- Soporte Técnico y Documentación - Cisco Systems