Contenu

Introduction

Conditions préalables

Components Used

Conventions

Résolution

Supprimer le processus TEOP

Supprimer le rapport TEOR

Informations connexes

Introduction

Ce document fournit des informations sur la manière de supprimer les bases de données TEOProcess et TEOReporting si elles sont basées sur Oracle.

Conditions préalables

Components Used

Les informations contenues dans ce document sont basées sur les versions de matériel et de logiciel suivantes :

- Tidal Enterprise Orchestrator (TEO) 2.2 ou ultérieur

- Base de données Oracle

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Conventions

Pour plus d'informations sur les conventions utilisées dans ce document, reportez-vous à Conventions relatives aux conseils techniques Cisco.

Résolution

Cette section explique comment supprimer les bases de données TEOProcess et TEOReporting. Cela suppose que l'utilisateur final a nommé son processus/base de données de configuration « TEOProcess ».

Supprimer le processus TEOP

Exécutez ces commandes dans Oracle :

1. DÉPOSER TABLESPACE TEOProcess_DATA Y COMPRIS LE CONTENU ET LES FICHIERS DE DONNÉES ;

2. DÉPOSER TABLESPACE TEOProcess_TEMP Y COMPRIS LES CONTENUS ET LES FICHIERS DE DONNÉES ;

3. DROP user TEOProcess CASCADE ;

Supprimer le rapport TEOR

Exécutez ces commandes dans Oracle :

1. DÉPOSEZ TABLESPACE TIAReport_DATA Y COMPRIS LE CONTENU ET LES FICHIERS DE DONNÉES ;

2. DÉPOSEZ TABLESPACE TIAReport_INDEX Y COMPRIS LE CONTENU ET LES FICHIERS DE DONNÉES ;

3. DÉPOSEZ TABLESPACE TIAReport_TEMP Y COMPRIS LES CONTENUS ET LES FICHIERS DE DONNÉES ;

4. DROP user TIAReport CASCADE ;

Remarque : Soyez prudent lorsque vous supprimez la base de données TEOReporting, car de nombreux serveurs d'applications TEO peuvent y accéder. Supprimez uniquement la base de données TEOReporting si vous n'en avez plus besoin pour un serveur d'applications TEO.

Informations connexes

- Support et documentation techniques - Cisco Systems