Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

AS5200

Modem interni

AS5300

Modem interni

AS5350

Modem interni

AS5400

Modem interni

AS5800

Modem interni

AS5850

Modem interni

Informazioni correlate

Introduzione

Lo scopo di questo documento è fornire un rapido riferimento all'identificazione dei diversi tipi di controller e modem interni per questi server di accesso:

- AS5200

- AS5300

- AS5350

- AS5400

- AS5800

- AS5850

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

Il documento può essere consultato per tutte le versioni software o hardware.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

AS5200

Per identificare il modem e la scheda di supporto in uso, è necessario controllare il pannello posteriore di AS5200.

Figura 1 - Pannello posteriore di Cisco AS5200

Figura 2 - Doppia scheda T1/PRI Doppia scheda CT1/PRI (AS52-2CT1)

Figura 3 - Doppia scheda E1/PRI (AS52-2CE1-B)

Figura 4 - Scheda portante Microcom (MCOM)

Modem interni

Il server di accesso AS5200 supporta i seguenti moduli modem interni:

Figura 5 - Modulo MCOM V.34 a 12 porte (AS52-12-M-V34)

Figura 6 - Modulo MCOM 56K a 12 porte (AS52-12-M-56K, AS52-24B-M-56K, AS52-12-M-56K-UPG)

Figura 7 - Modulo MCOM V.110 a 12 porte (AS52-12-TA-V110)

Determinare il tipo di modem MCOM interno (V.90 o V.34)

Eseguire il comando show modem version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. È inoltre possibile determinare se l'hardware dei modem MCOM supporta i modem V.90 o V.34. Nell'output del comando show modem version, cercare la sezione Modem board HW version info:. L'output vendor_banner= indica se i modem MCOM sono V.90 o V.34. Se si dispone di modem V.34, AS5200 non supporta velocità superiori a 33,6 kbps (V.34).

Output di esempio: V.34 (V.34 12-Port Module)

5200#show modem version

Modem module     Firmware   Boot          DSP

Mdm           Number           Rev        Rev           Rev

1/0               0            1.0(23)    1.0(5)

1/1               0            1.0(23)    1.0(5)

1/2               0            1.0(23)    1.0(5)

1/3               0            1.0(23)    1.0(5)

!--- Output suppressed.

2/22             1             1.0(23)    1.0(5)

2/23             1             1.0(23)    1.0(5)

Modem board HW version info:

Slot 1:

Carrier card:

hw version= 8, number_of_ports= 24, max_modules= 2, max_oob_ports= 2

Modem Module 0:

number_of_modems= 12, option_bits= 1,

rev_num= 03.00, vendor_model_number= 01,

vendor_banner= Microcom MNP10 V34 Modem

!--- This indicates that the MCOM modems are only V.34 capable.

Output di esempio: V.90 (modulo 56K a 12 porte)

5200#show modem version

Modem module      Firmware        Boot          DSP

Mdm           Number            Rev             Rev           Rev

1/0               0             5.0(40)         3.0(4)        22.0/47.0

1/1               0             5.0(40)         3.0(4)        22.0/47.0

!--- Output suppressed.

1/22              1             5.0(40)         3.0(4)       22.0/47.0

1/23              1             5.0(40)         3.0(4)       22.0/47.0

Modem board HW version info:

Slot 1:

Carrier card:

hw version= 8, pld= 0, number_of_ports= 24,

max_modules= 2, max_oob_ports= 2

Modem Module 0:

number_of_modems= 12, option_bits= 1,

rev_num= 03.00, vendor_model_number= 02,

vendor_banner= Microcom MNP10 K56 Modem

!--- This indicates that the MCOM modems are V.90 (56K) capable.

Visualizza versioni codice modem

Eseguire il comando show modem mapping per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS.

5200#show modem mapping

Slot 1 has Microcom Carrier card.

!--- Slot 1 on this router is an MCOM modem card.

Module  Firmware     Firmware

Mdm   Number  Rev          Filename

1/0      0    5.3(30)      IOS-Default

!--- Modems 1/0 through 1/23 have MCOM Portware 5.3(30) loaded on them. !--- This firmware is bundled with Cisco IOS Software.

1/1      0    5.3(30)      IOS-Default

1/2      0    5.3(30)      IOS-Default

1/3      0    5.3(30)      IOS-Default

1/4      0    5.3(30)      IOS-Default

!--- Output suppressed.

1/21     1    5.3(30)      IOS-Default

1/22     1    5.3(30)      IOS-Default

1/23     1    5.3(30)      IOS-Default

Firmware-file                                     Version  Firmware-Type

=============                                     =======  =============

system:/ucode/mica_board_firmware                 2.0.2.0  Mica Boardware

system:/ucode/mica_port_firmware                  2.7.3.0  Mica Portware

system:/ucode/microcom_firmware                   5.3.30   Microcom F/W and DSP

bootflash:mcom-modem-code.5.3.30.bin              5.3.30   Microcom F/W and DSP

!--- The various modem codes available to the AS5200. Cisco IOS Software has both !--- Modem ISDN Channel Aggregation (MICA) and MCOM firmware bundled, even though !--- only MCOM hardware is used in this example. Issue the firmware location command !--- to use a different firmware.

Figura 8 - MICA Carrier Card (AS52-CC-DM) con moduli MICA a sei porte (AS52-6DM)

Figura 9 - MICA Carrier Card (AS52-CC-DM) con moduli MICA a sei porte (AS52-6DM)

Figura 10 - Moduli MICA a sei porte (AS52-6DM)

I modem MICA si trovano sulla scheda vettore. Sono disponibili sei modem per 6 DM.

- MICA carrier card con 24 porte: AS52-24DM-CC=

- MICA carrier card con 30 porte: AS52-30DM-CC=

- Moduli MICA a sei porte: 6DM=

Identificazione della scheda vettore MICA interna tramite il software Cisco IOS

Eseguire il comando show modem version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. È inoltre possibile determinare quale scheda vettore è presente nelle informazioni sulla versione hardware della scheda modem: della sezione show modem version restituita dall'output del comando show modem version verificando le informazioni sulla scheda vettore, che contiene le informazioni sulle schede vettore.

MICA Modems V.90

Utilizzare il comando show modem version per determinare la capacità delle vetture vettore. A differenza dei modem MCOM, il comando show modem version sui modem MICA non visualizza le informazioni vendor_banner=.

5200#show modem version

Codes:

d - DSP software download is required for achieving K56flex connections

Modem module     Firmware    Boot          DSP

Mdm           Number            Rev        Rev           Rev

1/0               0            2.7.2.1

1/1               0            2.7.2.1

!--- Output suppressed.

1/22              3            2.7.2.1

1/23              3            2.7.2.1

Modem board HW version info:

Slot 1:

Carrier card:

number_of_ports= 30, max_modules= 5

!--- The maximum number of ports will be either 24 or 30.

Manufacture Cookie is not programmed.

Modem Module 0

Manufacture Cookie Info:

EEPROM Type 0x0101, EEPROM Version 0x01, Board ID 0x06,

Board Hardware Version 1.0, Item Number 73-2522-3,

Board Revision A48, Serial Number 08559417,

PLD/ISP Version 255.255, Manufacture Date 21-Oct-1998.

!--- Output suppressed.

Visualizza versioni codice modem

Eseguire il comando show modem mapping per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando permette anche di determinare i modem interni di cui si dispone tramite il software Cisco IOS.

5200#show modem mapping

Slot 1 has Mica Carrier card.

!--- Slot 1 on this router is a MICA modem card.

Modem      Firmware   Firmware

Module  Numbers    Rev        Filename

0   1/0  - 1/5     2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

!--- Modems 1/0 through 1/47 have MICA portware 2.7.3.0 loaded on to them. !--- This firmware is bundled with Cisco IOS Software.

1   1/6  - 1/11   2.7.3.0   flash:mica-modem-pw.2.7.3.0.bin

2   1/12 - 1/17  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

3   1/18 - 1/23  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

4   1/24 - 1/29  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

5   1/30 - 1/35  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

6   1/36 - 1/41  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

7   1/42 - 1/47  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

Firmware-file                                     Version  Firmware-Type

=============                                     =======  =============

system:/ucode/mica_board_firmware                 2.0.2.0  Mica Boardware

system:/ucode/mica_port_firmware                  2.7.3.0  Mica Portware

system:/ucode/microcom_firmware                   5.3.30   Microcom F/W and DSP

flash:mica-modem-pw.2.7.3.0.bin                   2.7.3.0  Mica Portware

!--- The various modem codes available to the AS5200. Cisco IOS Software has both MICA and MCOM !--- firmware bundled, even though only MICA hardware is used. !--- Issue the firmware location command to use a different firmware.

AS5300

Per identificare T1/E1, il modem e le schede portanti, è necessario controllare il pannello posteriore di AS5300.

Figura 11 - Pannello posteriore di Cisco AS5300

Figura 12 - Scheda Quad T1/PRI senza interfacce seriali (AS53-4CT1)

La scheda Quad T1/PRI senza interfacce seriali include quattro porte RJ-45 (per la connessione T1).

Figura 13 - Scheda Quad E1/PRI senza interfacce seriali (AS53-4CE1)

La scheda WAN Quad E1/PRI senza interfacce seriali include quattro porte RJ-45 per terminare linee bilanciate da 120 ohm o linee non bilanciate da 75 ohm.

Figura 14 - Scheda Quad T1/PRI o E1/PRI con interfacce seriali (AS53-4CT1+ /AS53-4CE1+)

Schede Quad T1/PRI e Quad E1/PRI con interfacce seriali. La scheda fornisce quattro porte RJ-45 T1 o E1 PRI e quattro interfacce seriali per il supporto backhaul WAN.

Nota: queste schede non supportano modem MCOM.

Figura 15 - Schede Octal T1/PRI e E1/PRI (AS53-8CT1+ /AS53-8CE1+)

Le schede Octal T1/PRI e E1/PRI forniscono otto porte RJ-45 T1 o E1 PRI e quattro interfacce seriali per il supporto di WAN backhaul.

Nota: queste schede non supportano modem MCOM.

Modem interni

Il server di accesso AS5300 supporta sia i modem MICA che MCOM.

Figura 16 - Scheda vettore MCOM (AS53-MCC)

Figura 17 - MCOM V.34 12-Port Modem Module

Figura 18 - Modulo modem MCOM 56K a 12 porte (AS53-12-M-56K)

I moduli a 12 porte si trovano nella scheda vettore MCOM. I moduli a 12 porte non possono essere utilizzati come schede autonome e non possono essere installati nelle schede portanti MICA.

Determinazione del tipo di modem MCOM interno (V.90 o V.34)

Eseguire il comando show modem version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. È inoltre possibile determinare quale scheda vettore è presente nelle informazioni sulla versione hardware della scheda modem: della sezione show modem version restituita dall'output del comando show modem version verificando le informazioni sulla scheda vettore, che contiene le informazioni sulle schede vettore.

Output di esempio: V.34 (V.34 12-Port Module)

5300#show modem version

Modem module     Firmware   Boot          DSP

Mdm           Number           Rev        Rev           Rev

1/0               0            1.0(23)       1.0(5)

1/1               0            1.0(23)       1.0(5)

1/2               0            1.0(23)       1.0(5)

1/3               0            1.0(23)       1.0(5)

!--- Output suppressed.

2/22             1             1.0(23)       1.0(5)

2/23             1             1.0(23)       1.0(5)

Modem board HW version info:

Slot 1:

Carrier card:

hw version= 8, number_of_ports= 24, max_modules= 2, max_oob_ports= 2

Modem Module 0:

number_of_modems= 12, option_bits= 1,

rev_num= 03.00, vendor_model_number= 01,

vendor_banner= Microcom MNP10 V34 Modem

!--- This indicates that the MCOM modems are V.34 capable.

Output di esempio: V.90 (modulo 56K a 12 porte)

5300#show modem version

Modem module     Firmware   Boot          DSP

Mdm           Number           Rev        Rev           Rev

1/0               0           5.0(40)     3.0(4)        22.0/47.0

1/1               0           5.0(40)     3.0(4)        22.0/47.0

!--- Output suppressed.

1/22              1           5.0(40)     3.0(4)        22.0/47.0

1/23              1           5.0(40)     3.0(4)        22.0/47.0

Modem board HW version info:

Slot 1:

Carrier card:

hw version= 8, pld= 0, number_of_ports= 24,

max_modules= 2, max_oob_ports= 2

Modem Module 0:

number_of_modems= 12, option_bits= 1,

rev_num= 03.00, vendor_model_number= 02,

vendor_banner= Microcom MNP10 K56 Modem

!--- This indicates that the MCOM modems are V.90 (56K) capable.

Visualizza versioni codice modem

Eseguire il comando show modem mapping per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando consente anche di determinare i modem interni disponibili tramite il software Cisco IOS.

5300#show modem mapping

Slot 1 has Microcom Carrier card.

Module  Firmware     Firmware

Mdm   Number  Rev          Filename

1/0      0    5.3(30)      IOS-Default

!--- Modem 1/0 has MCOM portware 5.3(30) loaded on it.

1/1      0    5.3(30)      IOS-Default

1/2      0    5.3(30)      IOS-Default

1/3      0    5.3(30)      IOS-Default

!--- Output suppressed.

1/21     1    5.3(30)      IOS-Default

1/22     1    5.3(30)      IOS-Default

1/23     1    5.3(30)      IOS-Default

Firmware-file                                     Version  Firmware-Type

=============                                     =======  =============

system:/ucode/mica_board_firmware                 2.0.2.0  Mica Boardware

system:/ucode/mica_port_firmware                  2.7.3.0  Mica Portware

system:/ucode/microcom_firmware                   5.3.30   Microcom F/W and DSP

bootflash:mcom-modem-code.5.3.30.bin              5.3.30   Microcom F/W and DSP

!--- These are the various modem codes available to the AS5300. Cisco IOS Software has both MICA and MCOM !--- firmware bundled, even though only MICA hardware is used. !--- Issue the firmware location command to use a different firmware.

MICA Carrier Card

La scheda vettore MICA comprende 10 slot nei quali è possibile installare moduli modem a 6 o 12 porte. Pertanto, in una scheda vettore completamente popolata è possibile avere 60 modem (se si utilizzano i moduli a sei porte) o 120 modem (se si utilizzano i moduli a 12 porte).

Nota: poiché sono disponibili due slot per schede vettore, uno chassis completamente popolato può avere 120 (se si utilizzano moduli a sei porte) o 240 (se si utilizzano moduli a 12 porte) modem per chassis.

Figura 19 - Scheda vettore MICA (AS53-MCC=)

Nota: CC supporta solo modem MICA a densità singola (6DM).

Figura 20 - Scheda portante MICA (AS53-CC2-DM=)

Nota: CC2 supporta sia modem a doppia densità che a densità singola (12DM e 6DM).

Identificazione della scheda vettore MICA interna tramite il software Cisco IOS

Eseguire il comando show modem version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. È inoltre possibile determinare quale scheda vettore è presente nelle informazioni sulla versione hardware della scheda modem: della sezione show modem version restituita dall'output del comando show modem version verificando le informazioni sulla scheda vettore, che contiene le informazioni sulle schede vettore.

output del comando show modem version per una scheda CC:

5300#show modem version

Codes:

d - DSP software download is required for achieving K56flex connections

Modem module     Firmware   Boot          DSP

Mdm           Number           Rev        Rev           Rev

1/0               0            2.7.2.1

1/1               0            2.7.2.1

!--- Output suppressed.

1/22              3            2.7.2.1

1/23              3            2.7.2.1

Modem board HW version info:

Carrier card:

number_of_ports= 48, max_modules= 10

Manufacture Cookie Info:

EEPROM Type 0x0001, EEPROM Version 0x01, Board ID 0x47,

!--- Board ID 0x47 indicates the carrier card is CC. !--- This carrier card can accept only !--- Hex Modem Modules (HMMs) (six-port modules).

Board Hardware Version 1.0, Item Number 73-2393-3,

Board Revision A0, Serial Number 06466432,

PLD/ISP Version 5.9, Manufacture Date 3-Nov-1997

output del comando show modem version per una CC2:

5300#show modem version

Codes:

d - DSP software download is required for achieving K56flex connections

Modem module     Firmware   Boot          DSP

Mdm     Number                  Rev            Rev           Rev

1/0               0             2.7.2.1

1/1               0             2.7.2.1

!--- Output suppressed.

1/22              3            2.7.2.1

1/23              3            2.7.2.1

Modem board HW version info:

Slot 1:

Carrier card:

number_of_ports= 60, max_modules= 10

Manufacture Cookie Info:

EEPROM Type 0x0001, EEPROM Version 0x01, Board ID 0x4C,

!--- Board ID 0x4C indicates the carrier card is CC2. !--- This carrier card can accept both HMMs and !--- Double-Density Modem Modules (DMMs).

Board Hardware Version 1.0, Item Number 800-3680-1,

Board Revision A0, Serial Number 20234639,

PLD/ISP Version 2.2, Manufacture Date 10-May-2000.

MICA Carrier Card (AS53-MCC=) con moduli modem a 6 porte (6DM)

Figura 21

Figura 22

Ogni modulo a sei porte include sei modem. I modem 6DM sono anche noti come HMM. In una scheda MICA completamente popolata, è possibile avere fino a 60 modem. In uno chassis per server di accesso completamente popolato, è possibile avere fino a 120 modem. Dieci di questi moduli modem possono essere configurati su ciascuna delle due schede per un totale di 60 porte per scheda o un totale di 120 porte per chassis.

MICA Carrier Card (AS53-CC2-DM=) con moduli modem a 12 porte (12DMM)

Figura 23

Figura 24

Ogni modulo a 12 porte include 12 modem. Il modulo MICA a 12 porte è anche noto come DMM. In una scheda MICA completamente popolata, è possibile avere fino a 120 porte. In uno chassis di server ad accesso completamente popolato, è possibile avere fino a 240 modem. Dieci di questi moduli modem possono essere configurati su ciascuna delle due schede per un totale di 120 porte per scheda o un totale di 240 porte per chassis.

Visualizza versioni codice modem

Eseguire il comando show modem mapping per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando permette anche di determinare i modem interni di cui si dispone tramite il software Cisco IOS.

5300#show modem mapping

Slot 1 has Mica Carrier card.

Modem      Firmware   Firmware

Module  Numbers    Rev        Filename

0   1/0  - 1/5   2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

!--- Modems 1/0 through 1/5 have MICA portware 2.7.3.0 loaded on them.

1   1/6  - 1/11  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

2   1/12 - 1/17  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

3   1/18 - 1/23  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

4   1/24 - 1/29  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

5   1/30 - 1/35  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

6   1/36 - 1/41  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

7   1/42 - 1/47  2.7.3.0    flash:mica-modem-pw.2.7.3.0.bin

Firmware-file                                     Version  Firmware-Type

=============                                     =======  =============

system:/ucode/mica_board_firmware                 2.0.2.0  Mica Boardware

system:/ucode/mica_port_firmware                  2.7.3.0  Mica Portware

system:/ucode/microcom_firmware                   5.3.30   Microcom F/W and DSP

flash:mica-modem-pw.2.7.3.0.bin                   2.7.3.0  Mica Portware

!--- These are the various modem codes available to the AS5300. Cisco IOS Software has both !--- MICA and MCOM firmware bundled, even though only MICA hardware is used. !--- Issue the firmware location command to use a different firmware.

Suggerimento: AS5300 supporta il comando show diag (ID bug Cisco CSCdw18728 (solo utenti registrati)) nel software Cisco IOS versione 12.2(10)DA, 12.2(9)PI05, 12.2(9)T, 12.2(9)S, 12.2(9) e successive.

AS5350

Per identificare il modem e la scheda di supporto in uso, è necessario controllare il pannello posteriore di AS5350.

Figura 25 - Vista posteriore dello chassis Cisco AS5350

Figura 26 - Scheda portante con due schede CT1-PRI (AS535-DFC-CC)

Figura 27 - DFC (Dial Feature Card) a due porte T1 o E1 (AS535-DFC-2CT1/AS535-DFC-2CE1)

Figura 28 - DFC A 4 porte T1 o E1 (AS535-DFC-4CT1 / AS535-DFC-4CE1)

Figura 29 - DFC A 8 porte T1 o E1 (AS535-DFC-8CT1 / AS535-DFC-8CE1)

Le DFC T1 o E1 possono essere utilizzate in qualsiasi slot DFC dello chassis del gateway universale.

Figura 30 - T3 DFC (AS535-DFC-CT3)

La DFC T3 fornisce la terminazione fisica della linea per una linea in ingresso T3 canalizzata.

Determinare il tipo di DFC installato in uno slot

Per determinare il tipo di DFC installato in uno slot, usare il comando show chassis in modalità di esecuzione privilegiata, come mostrato nell'esempio:

5350#show chassis slot detail

Slot 1:

DFC type is AS5350 NP108 DFC

OIR events:

Number of insertions = 0, Number of removals = 0

DFC State is DFC_S_OPERATIONAL

Error events (Bus errors, PCI errors):

Number of errors recovered = 0

!--- Output suppressed.

Slot 2:

DFC type is AS5350 Empty DFC

DFC is not powered

OIR events:

Number of insertions = 0, Number of removals = 0

Error events (Bus errors, PCI errors):

Number of errors recovered = 0

Carrier Card Cookie Info:

Manufacture Cookie Info:

EEPROM Type 0x0001, EEPROM Version 0x01, Board ID 0x4D,

Board Hardware Version 3.1, Item Number 73-3997-03,

!--- Output suppressed.

Tulum PLD Rev 0x001A

Slot 3:

DFC type is AS5350 Empty DFC

DFC is not powered

OIR events:

Number of insertions = 0, Number of removals = 0

Error events (Bus errors, PCI errors):

Number of errors recovered = 0

Carrier Card Cookie Info:

Manufacture Cookie Info:

EEPROM Type 0x0001, EEPROM Version 0x01, Board ID 0x4D,

Board Hardware Version 3.1, Item Number 73-3997-03,

!--- Output suppressed.

Figura 31 - DFC a porta universale (AS535-DFC-108NP/AS535-DFC-60NP)

La porta universale DFC fornisce sessioni a più porte. Il numero di sessioni dipende dalla densità delle porte della scheda. DFC può essere installato in qualsiasi slot DFC dello chassis del gateway universale.

Modem interni

Il server di accesso AS5350 supporta solo modem NextPort.

Visualizza versioni codice modem

Eseguire il comando show spe version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando show spe version visualizza anche la versione del firmware in esecuzione su un particolare SPE (Service Processing Element).

5350#show spe version

IOS-Bundled Default Firmware-Filename      Version        Firmware-Type

=====================================      ============   =============

system:/ucode/np_spe_firmware1             0.6.108.0      SPE firmware

!--- The SPE version bundled with Cisco IOS Software is 6.108.

On-Flash Firmware-Filename                 Version        Firmware-Type

=====================================      ============   =============

bootflash:np.7.15.spe                      0.7.15.0       SPE firmware

!--- Another SPE file (version 7.15) has been loaded in bootflash:.

SPE-#   Type   Port-Range         Version     UPG Firmware-Filename

1/00  CSMV6    0000-0005         0.7.15.0    N/A bootflash:np.7.15.spe

!--- SPE 1/00 uses the SPE code in bootflash (version 7.15).

1/01  CSMV6    0006-0011         0.6.108.0   N/A ios-bundled default

!--- All the other SPEs use the SPE code (version 6.108) bundled with Cisco IOS Software.

1/02  CSMV6    0012-0017         0.6.108.0   N/A ios-bundled default

1/03  CSMV6    0018-0023         0.6.108.0   N/A ios-bundled default

1/04  CSMV6    0024-0029         0.6.108.0   N/A ios-bundled default

!--- Output suppressed.

Per ulteriori informazioni, fare riferimento a Informazioni sulle versioni di SPE delle porte successive e alla tabella di riferimento delle versioni di SPE e software IOS delle porte successive.

AS5400

Per identificare il modem e la scheda di supporto in uso, è necessario osservare il pannello posteriore dell'AS5400.

Figura 32 - Panoramica dello chassis Cisco AS5400

Figura 33 - Scheda vettore con due schede CT1 PRI (AS54-DFC-CC)

Figura 34 - DFC A Due Porte T1 o E1 (AS535-DFC-2CT1 / AS535-DFC-2CE1)

Figura 35 - DFC A 4 porte T1 o E1 (AS535-DFC-4CT1 / AS535-DFC-4CE1)

Figura 36 - DFC A 8 porte T1 o E1 (AS54-DFC-8CT1 / AS54-DFC-8CE1)

Le DFC T1 o E1 possono essere utilizzate in qualsiasi slot DFC dello chassis del gateway universale.

Determinare il tipo di DFC installato in uno slot

Per determinare il tipo di DFC installato in uno slot dello chassis, usare il comando show chassis in modalità di esecuzione privilegiata, come mostrato nell'esempio:

Nota: questo esempio viene preso da un AS5350. Tuttavia, l'output di un AS5400 è simile.

5400#show chassis slot detail

Slot 1:

DFC type is AS5350 NP108 DFC

OIR events:

Number of insertions = 0, Number of removals = 0

DFC State is DFC_S_OPERATIONAL

Error events (Bus errors, PCI errors):

Number of errors recovered = 0

!--- Output suppressed.

Slot 2:

DFC type is AS5350 Empty DFC

DFC is not powered

OIR events:

Number of insertions = 0, Number of removals = 0

Error events (Bus errors, PCI errors):

Number of errors recovered = 0

Carrier Card Cookie Info:

Manufacture Cookie Info:

EEPROM Type 0x0001, EEPROM Version 0x01, Board ID 0x4D,

Board Hardware Version 3.1, Item Number 73-3997-03,

!--- Output suppressed.

Tulum PLD Rev 0x001A

Slot 3:

DFC type is AS5350 Empty DFC

DFC is not powered

OIR events:

Number of insertions = 0, Number of removals = 0

Error events (Bus errors, PCI errors):

Number of errors recovered = 0

Carrier Card Cookie Info:

Manufacture Cookie Info:

EEPROM Type 0x0001, EEPROM Version 0x01, Board ID 0x4D,

Board Hardware Version 3.1, Item Number 73-3997-03,

!--- Output suppressed.

Figura 37 - DFC a porta universale (AS54-DFC-108NP /AS54-DFC-60NP)

La porta universale DFC fornisce sessioni a più porte. Il numero di sessioni dipende dalla densità delle porte della scheda. DFC può essere installato in qualsiasi slot DFC dello chassis del gateway universale. La DFC-108NP supporta 108 connessioni modem, mentre la DFC-60NP ne supporta 60.

Modem interni

Il server di accesso AS5400 supporta solo modem NextPort.

Visualizza versioni codice modem

Eseguire il comando show spe version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando show spe version visualizza anche la versione del firmware in esecuzione su una particolare SPE.

5400#show spe version

IOS-Bundled Default Firmware-Filename      Version        Firmware-Type

=====================================      ============   =============

system:/ucode/np_spe_firmware1             0.6.108.0       SPE firmware

!--- The SPE version bundled with Cisco IOS Software is 6.108.

On-Flash Firmware-Filename                 Version        Firmware-Type

=====================================      ============   =============

bootflash:np.7.15.spe                      0.7.15.0       SPE firmware

!--- Another SPE file (version 7.15) has been loaded in bootflash:.

SPE-#   Type   Port-Range            Version   UPG Firmware-Filename

1/00  CSMV6    0000-0005            0.7.15.0  N/A bootflash:np.7.15.spe

!--- SPE 1/00 uses the SPE code in bootflash: (version 7.15).

1/01  CSMV6    0006-0011            0.6.108.0  N/A ios-bundled default

!--- All the other SPEs use the SPE code (6.108) bundled with Cisco IOS Software.

1/02  CSMV6    0012-0017            0.6.108.0   N/A ios-bundled default

1/03  CSMV6    0018-0023            0.6.108.0   N/A ios-bundled default

1/04  CSMV6    0024-0029            0.6.108.0   N/A ios-bundled default

!--- Output suppressed.

6/15  CSMV6    0090-0095            0.6.108.0   N/A ios-bundled default

6/16  CSMV6    0096-0101            0.6.108.0   N/A ios-bundled default

6/17  CSMV6    0102-0107            0.6.108.0   N/A ios-bundled default

Per ulteriori informazioni, fare riferimento a Informazioni sulle versioni di SPE delle porte successive e alla tabella di riferimento delle versioni di SPE e software IOS delle porte successive.

AS5800

Per identificare il modem e la scheda di supporto in uso, è necessario osservare il pannello anteriore dell'AS5800.

Figura 38 - Cisco AS5800 - Vista anteriore

Il server di accesso include uno scaffale comandi Cisco 5814 e uno scaffale router Cisco 7206.

Figura 39 - Cisco 5814 Dial Shelf

Figura 40 - Scheda Dial Shelf Controller (DS58-DSC)

Figura 41 - Cisco 7206 Router Shelf Rearview

Figura 42 - Adattatore porta interconnessione Dial Shelf

Cisco AS5800 ha un adattatore di porta interconnessione dial shelf che connette Cisco 5814 dial shelf a Cisco 7206 router shelf. L'adattatore della porta di interconnessione viene installato in uno slot per adattatore della porta scaffale del router 7206 e si connette direttamente alla scheda dial shelf controller sullo scaffale di connessione tramite un unico cavo full-duplex.

Figura 43 - Channelized T1 o E1 Trunk Card (DS58-12CT1 / DS58-12CE1)

Il server Cisco AS5800 ad accesso universale supporta interfacce channelized T1 (CT1) e channelized E1 (CE1). Le schede trunk CT1 e CE1 vengono installate nello scaffale dei comandi Cisco 5814 del modello AS5800.

Figura 44 - CT3 Trunk Card (DS58-1CT3)

Il server Cisco AS5800 ad accesso universale supporta un channelized T3 (CT3). La scheda trunk CT3 viene installata nello chassis Cisco 5814 dial shelf negli slot da 0 a 5.

Modem interni

Il server di accesso AS5800 supporta questo modem interno:

Figura 45 - Scheda DMM (DS58-144CM-CC)

Cisco AS5800 supporta un massimo di 10 schede DMM. Ogni scheda DMM contiene 12 DMM SIMMS. Ogni SIMM DMM contiene 12 modem digitali. Poiché su ciascuna scheda modem DMM sono presenti 12 DMM, ogni scheda può supportare un massimo di 144 modem. Le schede DMM si trovano negli slot numerati da 0 a 11 sul backplane dello scaffale di composizione.

Visualizza versioni codice modem

Eseguire il comando show spe version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando show spe version permette di visualizzare anche la versione del firmware in esecuzione su un modulo specifico.

5800#show modem version

Modem Range             Module   Firmware Rev

1/6/00 1/6/05          0      2.7.4.0

!--- MICA modems 1/6/00 through 1/6/05 have MICA portware 2.7.4.0 loaded on them.

1/6/06 1/6/11          1      2.7.4.0

1/6/12 1/6/17          2      2.7.4.0

1/6/18 1/6/23          3      2.7.4.0

1/6/24 1/6/29          4      2.7.4.0

1/6/30 1/6/35          5      2.7.4.0

1/6/36 1/6/41          6      2.7.4.0

1/6/42 1/6/47          7      2.7.4.0

1/6/48 1/6/53          8      2.7.4.0

1/6/54 1/6/59          9      2.7.4.0

1/6/60 1/6/65         10      2.7.4.0

1/6/66 1/6/71         11      2.7.4.0

Modem board HW version info:

Modem Range:    1/6/00 1/6/05         Modem Module:  0

Manufacture Cookie Info:

EEPROM Type 0x0101, EEPROM Version 0x01, Board ID 0x06,

Board Hardware Version 1.0, Item Number 73-2522-2,

Board Revision 051, Serial Number 06298557,

PLD/ISP Version 255.255, Manufacture Date 17-Jul-1997.

!--- Output suppressed.

Modem Range:    1/6/66 1/6/71         Modem Module: 11

Manufacture Cookie Info:

EEPROM Type 0x0101, EEPROM Version 0x01, Board ID 0x06,

Board Hardware Version 1.0, Item Number 73-2522-2,

Board Revision 051, Serial Number 06298008,

PLD/ISP Version 255.255, Manufacture Date 17-Jul-1997.

Figura 46 - Panoramica della scheda della porta universale (UPC) 324

Il sistema 324 UPC utilizza l'hardware e il firmware NextPort per fornire porte universali per Cisco AS5800 (l'UPC è talvolta indicato come modulo NextPort). Queste porte sono raggruppate in SPE, ognuna delle quali supporta sei porte universali. Ciascun UPC dispone di 54 SPE per un totale di 324 porte.

Visualizza versioni codice modem

Eseguire il comando show spe version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando show spe version visualizza anche la versione del firmware in esecuzione su una particolare SPE.

AS5800#show spe version

IOS-Bundled Default Firmware-Filename             Version  Firmware-Type

=====================================             =======  =============

system:/ucode/np_spe_firmware1                    0.6.6.9  SPE firmware

!--- The SPE version bundled with Cisco IOS Software is 0.6.6.9.

On-Flash Firmware-Filename                        Version  Firmware-Type

==========================                        =======  =============

slot0:np.spe_36                                   0.6.6.5  SPE firmware

!--- Another SPE file (version 0.6.6.5) has been loaded in slot0:.

SPE-# SPE-Type   SPE-Port-Range     Version    UPG Firmware-Filename

1/04/00    CSMV6        0000-0005     0.6.6.9    N/A ios-bundled default

!--- SPE 1/04/00 uses the SPE code (version 0.6.6.9) that is bundled with Cisco IOS Software.

1/04/01    CSMV6        0006-0011     0.6.6.9    N/A ios-bundled default

1/04/02    CSMV6        0012-0017     0.6.6.9    N/A ios-bundled default

1/04/03    CSMV6        0018-0023     0.6.6.9    N/A ios-bundled default

1/04/04    CSMV6        0024-0029     0.6.6.9    N/A ios-bundled default

1/04/05    CSMV6        0030-0035     0.6.6.9    N/A ios-bundled default

1/04/06    CSMV6        0036-0041     0.6.6.9    N/A ios-bundled default

1/04/07    CSMV6        0042-0047     0.6.6.9    N/A ios-bundled default

1/04/08    CSMV6        0048-0053     0.6.6.9    N/A ios-bundled default

!--- Output suppressed.

1/04/50    CSMV6        0300-0305     0.6.6.9    N/A ios-bundled default

1/04/51    CSMV6        0306-0311     0.6.6.9    N/A ios-bundled default

1/04/52    CSMV6        0312-0317     0.6.6.9    N/A ios-bundled default

1/04/53    CSMV6        0318-0323     0.6.6.9    N/A ios-bundled default

Per ulteriori informazioni, fare riferimento a Informazioni sulle versioni di SPE delle porte successive e alla tabella di riferimento delle versioni di SPE e software IOS delle porte successive.

AS5850

Per identificare il modem e la scheda di supporto in uso, è necessario controllare il pannello anteriore del sistema AS5850.

Figura 47 - Cisco AS5850 - Vista anteriore

Figura 48 - 24 CT1/CE1 Trunk Card (AS58-24CT1 /AS58-24CE1)

La scheda trunk CT1/E1 da 24 porte consente la terminazione fisica di 24 linee T1/E1 e il collegamento a un dispositivo di terminazione di rete esterno (NT1).

Figura 49 - Channelized T3/216 Universal Port Card (AS58-1CT3/216U)

Il gateway universale Cisco AS5850 supporta una scheda di interfaccia CT3 in entrata.

Figura 50 - Scheda porta universale 324 (AS58-324UPC-CC)

Una porta universale può trasportare l'equivalente di un DS0 di traffico di rete. I componenti hardware principali sono gli SPE, ciascuno dei quali supporta sei porte universali. Ciascun UPC dispone di 54 SPE per un totale di 324 porte.

Modem interni

Il server di accesso AS5850 supporta solo modem NextPort.

Visualizza versioni codice modem

Eseguire il comando show spe version per elencare tutti i file di codice del modem nella memoria flash di avvio e nella memoria flash di sistema, nonché i file di codice del modem forniti con il software Cisco IOS. Il comando show spe version visualizza anche la versione del firmware in esecuzione su una particolare SPE.

AS5850#show spe version

IOS-Bundled Default Firmware-Filename             Version  Firmware-Type

=====================================             =======  =============

system:/ucode/np_spe_firmware1                    0.6.6.9  SPE firmware

!--- The SPE version bundled with Cisco IOS Software is 0.6.6.9.

On-Flash Firmware-Filename                        Version  Firmware-Type

==========================                        =======  =============

slot0:np.spe_36                                   0.6.6.5  SPE firmware

!--- Another SPE file (version 0.6.6.5) has been loaded in slot0:.

SPE-# SPE-Type   SPE-Port-Range     Version    UPG Firmware-Filename

1/04/00    CSMV6        0000-0005     0.6.6.9    N/A ios-bundled default

!--- SPE 1/04/00 uses the SPE code (version 0.6.6.9) that is bundled with Cisco IOS Software.

1/04/01    CSMV6        0006-0011     0.6.6.9    N/A ios-bundled default

1/04/02    CSMV6        0012-0017     0.6.6.9    N/A ios-bundled default

1/04/03    CSMV6        0018-0023     0.6.6.9    N/A ios-bundled default

1/04/04    CSMV6        0024-0029     0.6.6.9    N/A ios-bundled default

1/04/05    CSMV6        0030-0035     0.6.6.9    N/A ios-bundled default

!--- Output suppressed.

1/04/49    CSMV6        0294-0299     0.6.6.9    N/A ios-bundled default

1/04/50    CSMV6        0300-0305     0.6.6.9    N/A ios-bundled default

1/04/51    CSMV6        0306-0311     0.6.6.9    N/A ios-bundled default

1/04/52    CSMV6        0312-0317     0.6.6.9    N/A ios-bundled default

1/04/53    CSMV6        0318-0323     0.6.6.9    N/A ios-bundled default

Per ulteriori informazioni, fare riferimento a Informazioni sulle versioni di SPE delle porte successive e alla tabella di riferimento delle versioni di SPE e software IOS delle porte successive.

Informazioni correlate

- Matrice di compatibilità hardware/software Cisco IOS Cisco AS5200

- Guida all'installazione della scheda Universal Gateway Cisco AS5350 e Cisco AS5400

- Accesso alle pagine di supporto della tecnologia

- Strumenti e utilità - Cisco Systems (solo utenti registrati)

- Supporto tecnico – Cisco Systems