Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Configurazioni

Configurazione mainframe - File OMPROUTE

Configurazione mainframe - Stack TCP/IP

Configurazione mainframe - Definizioni VTAM e avvio di TCP/IP

Configurazione router

Display sul router

Display su mainframe

Display VTAM su console di sistema

Informazioni di routing visualizzate nel TSO dal comando netstat

Informazioni correlate

Introduzione

In questo documento vengono descritte alcune configurazioni di host e router di esempio per eseguire la procedura OMPROUTE sul mainframe e scambiare gli aggiornamenti del routing con il resto della rete TCP/IP. OMPROUTE viene spesso utilizzato, come in questo esempio, insieme a un indirizzo IP virtuale (VIPA), che consente all'indirizzo IP del mainframe configurato nei client di essere indipendente da qualsiasi interfaccia a un canale. Ciò fornisce ridondanza per il canale. In origine, l'implementazione TCP/IP mainframe di IBM supportava solo il protocollo RIP (Routing Information Protocol) come protocollo di routing, con l'uso della procedura OROUTED. La versione più recente di OMPROUTE supporta RIP V1 o V2 e Open Shortest Path First (OSPF). IBM consiglia di utilizzare OMPROUTE invece di OROUTED e alla fine IBM rimuoverà il supporto per OROUTED.

Prerequisiti

Requisiti

Nessun requisito specifico previsto per questo documento.

Componenti usati

La versione software Cisco IOS® utilizzata per questa configurazione è la 12.1(3a)T2 con microcodice xCPA 27-9, la più recente al momento del test. Se si utilizza CLAW, tuttavia, questa procedura dovrebbe essere compatibile con qualsiasi versione del software Cisco IOS. L'uso di CMPC+ richiede almeno la versione 12.1T del software Cisco IOS.

Il router era un Cisco 7206 con un adattatore di porta xCPA. In alternativa, è possibile usare un router Cisco 7500 con una scheda CIP con modifiche minori alla configurazione, come indicato più avanti in questo documento.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Configurazioni

Configurazione mainframe - File OMPROUTE

La configurazione di OMPROUTE sul mainframe è molto simile a quella di OROUTED. OMPROUTE utilizza anche almeno due file di configurazione. È necessario puntare alla posizione di questi file di configurazione, nello spazio degli indirizzi di OMVS, con queste due variabili di ambiente:

- export resolver_conf=/etc/resolv.conf

- export moproute_file=/etc/omproute.conf

Questo è un esempio del contenuto di resolver_conf:

TCPJobName TCPIP

DomainOrigin cisco.com

domain cisco.com

Datasetprefix TCPIP

HostName P390

Messagecase mixed

Il valore di omproute_file dipenderà dal fatto che RIP o OSPF sia in uso. Questa è una configurazione di esempio per RIP:

;

Originate_RIP_Default Condition=Always Cost=1

;

RIP_Interface IP_Address=10.64.3.34

Name=LDIPTG

Subnet_Mask=255.255.255.240

Receive_Dynamic_Nets=YES

Receive_Dynamic_Subnets=YES

MTU=1470

Destination_Addr=10.64.3.33

;

RIP_Interface IP_Address=10.64.3.17

Name=VIPALINK

Subnet_Mask=255.255.255.240

MTU=1470

;

Per OSPF sono disponibili più opzioni di configurazione, tra cui la possibilità di fare in modo che il mainframe agisca come un'area di stub. In questo modo è possibile ridurre in modo significativo gli aggiornamenti del routing di carico che vengono inseriti nel canale quando molte partizioni logiche (LPAR) si connettono sullo stesso canale. Questo è un esempio:

Area Area_Number=0.0.0.0 Authentication_Type=None Stub_Area=NO

;

Comparison=Type2

;

AS_Boundary_Routing Import_Subnet_Routes=YES

Import_Direct_Routes=YES

;

OSPF_Interface IP_Address=10.64.3.34

Name=LDIPTG

Subnet_Mask=255.255.255.240

Attaches_To_Area=0.0.0.0

MTU=1470

Destination_Addr=10.64.3.33

Hello_Interval=30

Dead_Router_Interval=120

;

OSPF_Interface IP_Address=10.64.3.17

Name=VIPALINK

Subnet_Mask=255.255.255.240

Configurazione mainframe - Stack TCP/IP

Il set di dati del profilo TCP/IP non richiede alcuna configurazione speciale per OMPROUTE, a parte il fatto che è necessario impostare come commento tutta la configurazione della route statica e predefinita e la sezione BSDROUTINGPARMS (utilizzata solo da ROUTED). In questo estratto vengono mostrati solo gli elementi che devono essere commentati e i parametri a cui fanno riferimento i file di configurazione OMPROUTE:

TCPIP Profile dataset

---------------------

-----------------------------------------------------------------------

; Hardware definitions:

-----------------------------------------------------------------------

; NOTE: To use these device and link statements, update the statements

; to reflect your installation configuration and remove the semicolon

;

DEVICE DIPTG MPCPTP

LINK LDIPTG MPCPTP DIPTG

DEVICE VIPADEV VIRTUAL 0

LINK VIPALINK VIRTUAL 0 VIPADEV

;

;

; -----------------------------------------------------------------------

;

; HOME Internet (IP) addresses of each link in the host.

;

; NOTE: To use this home statement, update the ipaddress and linknames

; to reflect your installation configuration and remove the semicolon

;

HOME

10.64.3.17    VIPALINK

10.64.3.34    LDIPTG

; -----------------------------------------------------------------------

;

; IP routing information for the host. All static IP routes should

; be added here.

;

; NOTE: To use this GATEWAY statement, update the addresses and links

; to reflect your installation configuration and remove the semicolon

;

; GATEWAY

;

; Direct Routes - Routes that are directly connected to my interfaces.

;

; Network  First Hop  Link Name Packet Size  Subnet Mask  Subnet Value

; 10           =       CIS1      1500       0.255.255.0    0.101.1

; 10           =       LDIPTG    1500       0.255.255.240  0.64.3.32

; 9            =       LIS1      1500       0.255.255.0    0.117.56.0

; 130.50       =       TR1       2000       0.0.255.0      0.0.10.0

; 193.5.2      =       ETH1      1500       0

; 9            =       FDDI1     4000       0.255.255.0    0.67.43.0

; 193.7.2.2    =       SNA1      2000       HOST

;

; Indirect Routes - Routes that are reachable through routers on my

;     network.

;

; Network     First Hop   Link Name Packet Size  Subnet Mask  Subnet Value

; DEFAULTNET  10.64.3.33  LDIPTG    DEFAULTSIZE  0

; 193.12.2    130.50.10.1 TR1       2000         0

; 10.5.6.4    193.5.2.10  ETH1      1500         HOST

;

; Default Route - All packets to an unknown destination are routed

;   through this route.

;

; Network     First Hop   Link Name Packet Size  Subnet Mask  Subnet Value

; DEFAULTNET  9.67.43.1   FDDI1     DEFAULTSIZE  0

;

; -----------------------------------------------------------------------

;

; orouted Routing Information

;

; if you are using orouted, comment out the GATEWAY statement and

; update the BSDROUTINGPARMS statement to reflect your installation

; configuration and remove the semicolon

;

;    Link     Maxmtu   Metric   Subnet Mask     Dest Addr

; BSDROUTINGPARMS false

; LDIPTG       1500       0     255.255.255.240 10.64.3.33

; VIPALINK     1500       0     255.255.255.240 0

;    TR1       2000       0     255.255.255.0   0

;    ETH1      1500       0     255.255.255.0   0

;    FDDI1  DEFAULTSIZE   0     255.255.255.0   0

; ENDBSDROUTINGPARMS

!--- Note that all of the last two sections have been commented out.

Configurazione mainframe - Definizioni VTAM e avvio di TCP/IP

Gli aggiornamenti del routing possono essere scambiati tramite connessioni CLAW o CMPC+. Se si utilizza CLAW, non è necessaria alcuna configurazione aggiuntiva sul mainframe. In questo esempio viene utilizzato CMPC, che richiede una voce TRL (Transport Resource List) VTAM. Membro VTAM:

DIPTGTRL VBUILD TYPE=TRL

*

*

DIPTG  TRLE  LNCTL=MPC,MAXBFRU=16,READ=(E24),WRITE=(E25)

*

È necessario attivare TRL prima di avviare l'attività TCPIP. Ad esempio:

V NET,ACT,ID=DIPTRL1,UPDATE=ALL

IST097I VARY ACCEPTED

ISTTRL ACTIVE

Quindi, attivare l'operazione TCP/IP avviata con il comando S TCPIP MVS console. Una volta avviata l'operazione TCP/IP, è possibile avviare la procedura OMPROUTE utilizzando il linguaggio JCL (Job Control Language) come operazione avviata o dallo spazio degli indirizzi di OMVS. Per iniziare all'interno di OMVS, utilizzare i seguenti comandi:

cd /usr/lpp/tcpip/sbin

omproute &

Per verificare che OMPROUTE sia in esecuzione, usare questo comando della console, dove p390 è l'ID utente con cui è stato avviato il demo OMPROUTE:

d omvs,u=p390

Configurazione router

Sia CLAW che CMPC devono essere configurati in modo specifico per l'invio di trasmissioni sul canale, con la parola chiave broadcast. Ad esempio, per CLAW:

claw 0100 20 10.101.1.10 P390D C7000D TCPIP TCPIP broadcast

Nell'esempio, il protocollo CMPC+ è in uso, quindi queste sono le parti rilevanti della configurazione del router:

!

interface Channel2/0

ip address 10.64.3.33 255.255.255.240

ip ospf network point-to-multipoint

no keepalive

cmpc 0100 24 DIPTG READ

cmpc 0100 25 DIPTG WRITE

tg DIPTG    ip 10.64.3.34 10.64.3.33 broadcast

router ospf 1

network 10.0.0.0 0.255.255.255 area 0

!

Se questo fosse stato un router Cisco 7500 con una scheda CIP anziché un router 7200 con una scheda di porta xCPA, l'istruzione tg sarebbe stata configurata nell'interfaccia virtuale /2. Notare il comando ip ospf network point-to-multipoint, necessario per il corretto funzionamento di OSPF. L'interfaccia del canale è considerata un'interfaccia multipunto come Frame Relay. Se non si desidera eseguire OSPF in tutta la rete, è possibile eseguirlo solo sull'interfaccia del canale e utilizzare la ridistribuzione tra altri protocolli di routing. Ad esempio:

!

router eigrp 1

redistribute ospf 1

passive-interface Channel2/0

network 10.0.0.0

no eigrp log-neighbor-changes

!

router ospf 1

log-adjacency-changes

redistribute eigrp 1

network 10.64.3.33 0.0.0.0 area 0

!

Display sul router

diplodocus# show extended channel 2/0 status

Path: 0100  -- ESTABLISHED

Command    Selective   System     Device    CU

Dev    Connects    Retries    Cancels    Reset    Reset    Errors    Busy

24        30         21          1         0        0        0        0

25        29         0           1         0        0        0        0

Blocks         Bytes         Dropped Blk         Memd

Dev-Lnk    Read    Write    Read    Write    Read    Write    wait    Con

24-00       29       6      3484     789      0        0       0       Y

25-00        9      29       801    3920      0        0       0       Y

Path 0100

Total:      38      35      4285    4709      0        0       0

Last statistics 0 seconds old, next in 10 seconds

diplodocus# show extended channel 2/0 cmpc

Path    Dv    TGName    Dir    Bfrs     Status

CMPC   0100     24     DIPTG  READ  16  Active+

CMPC   0100     25     DIPTG  WRITE 16  Active+

diplodocus# show ip ospf i

Channel2/0 is up, line protocol is up

Internet Address 10.64.3.33/28, Area 0

Process ID 1, Router ID 200.100.100.9, Network Type POINT_TO_MULTIPOINT,

Cost: 4

Transmit Delay is 1 sec, State POINT_TO_MULTIPOINT,

Timer intervals configured, Hello 30, Dead 120, Wait 120, Retransmit 5

Hello due in 00:00:10

Index 1/1, flood queue length 0

Next 0x0(0)/0x0(0)

Last flood scan length is 1, maximum is 1

Last flood scan time is 0 msec, maximum is 0 msec

Neighbor Count is 1, Adjacent neighbor count is 1

Adjacent with neighbor 10.64.3.17

Suppress hello for 0 neighbor(s)

diplodocus# show ip ospf neighbor

Neighbor ID     Pri   State           Dead Time   Address       Interface

10.64.3.17       1    FULL/  -        00:01:35

Neighbor is up for 00:04:01           10.64.3.34  Channel2/0

diplodocus# show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 10.64.3.1 to network 0.0.0.0

1.0.0.0/27 is subnetted, 1 subnets

C 1.1.1.0 is directly connected, Loopback1

200.100.100.0/29 is subnetted, 1 subnets

C 200.100.100.8 is directly connected, Loopback0

10.0.0.0/8 is variably subnetted, 9 subnets, 3 masks

D 10.0.0.0/8 is a summary, 00:06:40, Null0

C 10.64.3.0/28 is directly connected, Ethernet6/0

O E2 10.64.3.17/32 [110/1] via 10.64.3.34, 00:03:57, Channel2/0

O 10.64.3.16/28 [110/5] via 10.64.3.34, 00:03:57, Channel2/0

C 10.64.3.32/28 is directly connected, Channel2/0

S 10.64.3.34/32 [1/0] via 10.64.3.34, Channel2/0

S 10.64.3.37/32 [1/0] via 10.64.3.37, Channel2/0

C 10.64.3.48/28 is directly connected, Serial1/3.1

C 10.64.3.128/28 is directly connected, Serial1/3.2

S*   0.0.0.0/0 [1/0] via 10.64.3.1

Display su mainframe

Display VTAM su console di sistema

D NET,TRL

IST097I DISPLAY ACCEPTED

ST350I DISPLAY TYPE = TRL 042

IST1314I TRLE = DIPTG   STATUS = ACTIV       CONTROL = MPC

IST1454I 1 TRLE(S) DISPLAYED

IST314I END

D NET,TRL,TRLE=DIPTG

IST097I DISPLAY ACCEPTED

IST075I NAME = DIPTG, TYPE = TRLE 045

IST486I STATUS= ACTIV, DESIRED STATE= ACTIV

IST087I TYPE = LEASED   , CONTROL = MPC , HPDT = YES

IST1715I MPCLEVEL = HPDT       MPCUSAGE = SHARE

IST1577I HEADER SIZE = 4092 DATA SIZE = 60 STORAGE = ***NA***

IST1221I WRITE DEV = 0E25 STATUS = ACTIVE     STATE = ONLINE

IST1577I HEADER SIZE = 4092 DATA SIZE = 60 STORAGE = DATASPACE

IST1221I READ  DEV = 0E24 STATUS = ACTIVE     STATE = ONLINE

IST314I END

Informazioni di routing visualizzate nel TSO dal comando netstat

netstat route visualizza la tabella di routing. Ad esempio:

===> netstat route

EZZ2350I MVS TCP/IP NETSTAT CS V2R7       TCPIP NAME: TCPIP       15:56:33

EZZ2755I Destination       Gateway       Flags  Refcnt  Interface

EZZ2756I -----------       -------       -----  ------  ---------

EZZ2757I 10.0.0.0          10.64.3.33    UG     000000  LDIPTG

EZZ2757I 10.64.3.32        0.0.0.0       U      000000  LDIPTG

EZZ2757I 10.64.3.33        0.0.0.0       UH     000000  LDIPTG

dispositivo netstat visualizza lo stato e così via di tutti i dispositivi o collegamenti collegati. Ad esempio:

===> netstat device

EZZ2350I MVS TCP/IP NETSTAT CS V2R7   TCPIP NAME: TCPIP    15:58:04

EZZ2760I DevName: LOOPBACK     DevType: LOOPBACK  DevNum: 0000

EZZ2761I   LnkName: LOOPBACK       LnkType: LOOPBACK    Status: Ready

EZZ2762I     NetNum: 0  QueSize: 0   ByteIn: 0000004278   ByteOut: 0000004278

EZZ2768I   BSD Routing Parameters:

EZZ2769I     MTU Size: 00000  Metric: 00

EZZ2770I     DestAddr: 0.0.0.0  SubnetMask: 0.0.0.0

EZZ2810I   Multicast Specific:

EZZ2811I     Multicast Capability: No

EZZ2760I DevName: DIPTG      DevType: MPC       DevNum: 0000

EZZ2761I   LnkName: LDIPTG       LnkType: MPC    Status: Ready

EZZ2762I     NetNum: 0  QueSize: 0   ByteIn: 0000001848   ByteOut: 0000001936

EZZ2768I   BSD Routing Parameters:

EZZ2769I     MTU Size: 01470  Metric: 01

EZZ2770I     DestAddr: 0.0.0.0  SubnetMask: 255.255.255.240

EZZ2810I   Multicast Specific:

EZZ2811I     Multicast Capability: Yes

EZZ2812I     Group            RefCnt

EZZ2813I     -----            ------

EZZ2814I     224.0.0.5        0000000001

EZZ2814I     224.0.0.1        0000000001

EZZ2760I DevName: VIPADEV     DevType: VIPA      DevNum: 0000

EZZ2761I   LnkName: VIPALINK       LnkType: VIPA    Status: Ready

EZZ2762I     NetNum: 0  QueSize: 0   ByteIn: 0000000000   ByteOut: 0000000000

EZZ2768I   BSD Routing Parameters:

EZZ2769I     MTU Size: 01470  Metric: 01

EZZ2770I     DestAddr: 0.0.0.0  SubnetMask: 255.255.255.240

EZZ2810I   Multicast Specific:

EZZ2811I     Multicast Capability: No

netstat offre molte altre opzioni. Puoi usare il netstat? per visualizzarli tutti.

Informazioni correlate

- Supporto tecnologico IBM

- Documentazione e supporto tecnico – Cisco Systems