Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Configurazione

Determinazione della versione corrente del firmware sul router

Aggiornamento del firmware VDSL

Verifica

Risoluzione dei problemi

Introduzione

Questo documento descrive come aggiornare il firmware VDSL (Very High-Bit-Rate Digital Subscriber Line) sui router Cisco serie 800.

Prerequisiti

Requisiti

Cisco consiglia di controllare le Note sulla versione del firmware prima di completare la procedura di aggiornamento.

Componenti usati

Per la stesura del documento, è stato usato un router Cisco 897VAB. Il documento può essere consultato per tutte le versioni software o hardware.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Configurazione

Nota: per ulteriori informazioni sui comandi menzionati in questa sezione, usare lo strumento di ricerca dei comandi (solo utenti registrati).

Determinazione della versione corrente del firmware sul router

Immettere il comando show controller vdsl per determinare la versione del firmware attualmente sul router Cisco serie 800. Cercare le voci di output mostrate in grassetto in questo output di esempio:

Router# show controller vdsl 0

Controller VDSL 0 is UP

Daemon Status: Up

XTU-R (DS) XTU-C (US)

Chip Vendor ID: 'BDCM' 'BDCM'

Chip Vendor Specific: 0x0000 0xA31E

Chip Vendor Country: 0xB500 0xB500

Modem Vendor ID: 'CSCO' ' '

Modem Vendor Specific: 0x4602 0x0000

Modem Vendor Country: 0xB500 0x0000

Serial Number Near: FHK144672GQ 886VA-K 15.2(4)M

Serial Number Far:

Modem Version Near: 15.2(4)M

Modem Version Far: 0xa31e

Modem Status: TC Sync (Showtime!)

DSL Config Mode: AUTO

Trained Mode: G.992.5 (ADSL2+) Annex J

TC Mode: ATM

Selftest Result: 0x00

DELT configuration: disabled

DELT state: not running

Trellis: ON ON

SRA: disabled disabled

SRA count: 0 0

Bit swap: enabled enabled

Bit swap count: 0 1

Line Attenuation: 0.0 dB 4.9 dB

Signal Attenuation: 3.3 dB 4.4 dB

Noise Margin: 9.8 dB 6.3 dB

Attainable Rate: 26332 kbits/s 2952 kbits/s

Actual Power: 7.1 dBm 11.9 dBm

Total FECC: 0 0

Total ES: 9721 42

Total SES: 9714 4

Total LOSS: 1086 0

Total UAS: 2670101 2670101

Total LPRS: 0 0

Total LOFS: 8342 0

Total LOLS: 0 0

Full inits: 2511

Failed full inits: 815

Short inits: 174

Failed short inits: 1353

Firmware Source File Name (version)

-------- --------- ------------------

VDSL user config flash:VA_A_39h_B_38h3_24h_j.bin (10)

Modem FW Version: 140305_1531-4.02L.03.B2pvC038h3_J.d24h

Modem PHY Version: B2pvC038h3_J.d24h

Vendor Version: Bpv38h3.24h 68

DS Channel1 DS Channel0 US Channel1 US Channel0

Speed (kbps): 0 25346 0 2832

SRA Previous Speed: 0 0 0 0

Previous Speed: 0 25866 0 1264

Total Cells: 0 35481077 0 3942410

User Cells: 0 0 0 0

Reed-Solomon EC: 0 0 0 0

CRC Errors: 0 220155 0 0

Header Errors: 0 0 0 0

Interleave (ms): 0.00 0.08 0.00 11.11

Actual INP: 0.00 0.00 0.00 0.69

Training Log: Stopped

Training Log Filename: flash:vdsllog.bin

Nota: Il firmware predefinito è inserito in flash:/firmware/<nomefile>. Se non viene specificato alcun percorso del firmware nel controller VDSL e il controller VDSL viene reimpostato (chiuso/non chiuso) o il router viene ricaricato; il controller VDSL utilizza questo firmware predefinito. Non eliminare il firmware di base da flash:/firmware/<nomefile>.

Aggiornamento del firmware VDSL

1. Scaricare il nuovo firmware VDSL2 dal Cisco.com Software Center.

2. Scegliere Router > Router per filiali > Cisco serie 800 Router > Cisco 887V Integrated Services Router > Firmware VDSL (Very High Bitrate DSL).

3. Copiare il firmware in una posizione designata. Ad esempio, router flash o un server TFTP.
Nell'esempio viene mostrato come copiare il firmware VDSL2 da un server TFTP alla versione 10.76.76.160 alla memoria flash del router:

Router#copy tftp flash:

Address or name of remote host []? 10.76.76.160 [Addres of the TFTP Server]

Source filename []? vdsl_bond.bin_39p1 [Name of the downloaded VDSL Firmware]

Destination filename [vdsl_bond.bin_39p1]? [Name of the VDSL firmware on the router flash]

In alternativa, è possibile immettere il comando copy ftp://usernamepassword@TFTP-Server-IPAddress flash:VDSL-Firmware-Name. Questo output offre un esempio:

Router#copy ftp://test:test@10.76.76.160 flash:vdsl_bond.bin_39p1

Source filename []? vdsl_bond.bin_39p1

Destination filename [vdsl_bond.bin_39p1]?

Accessing ftp://test:test@10.76.76.160/vdsl_bond.bin_39p1...

Loading vdsl_bond.bin_39p1 !!!!!!!!!!!

[OK - 2660422/4096 bytes]

4. Configurare il router in modo che carichi il nuovo firmware VDSL2 da una posizione designata.
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#firmware filename ?

archive: Download fw file name

cns: Download fw file name

flash: Download fw file name

ftp: Download fw file name

http: Download fw file name

https: Download fw file name

null: Download fw file name

nvram: Download fw file name

rcp: Download fw file name

scp: Download fw file name

system: Download fw file name

tar: Download fw file name

tftp: Download fw file name

tmpsys: Download fw file name

xmodem: Download fw file name

ymodem: Download fw file name

Router(config-controller)#firmware filename flash:vdsl_bond.bin_39p1

5. Riavviare l'interfaccia del controller per rendere effettivo il nuovo firmware:
Router#conf t

Enter configuration commands, one per line. End with CNTL/Z.

Router(config)#controller vdsl 0

Router(config-controller)#shut

Router(config-controller)#no shut

Router(config-controller)#end

Verifica

Per verificare che la configurazione funzioni correttamente, consultare questa sezione.

Lo strumento Output Interpreter (solo utenti registrati) supporta alcuni comandi show. Usare lo strumento Output Interpreter per visualizzare un'analisi dell'output del comando show.

Router#show controller vdsl 0

Controller VDSL 0 is DOWN

Daemon Status:           Establishing Link

XTU-R (DS)              XTU-C (US)

Chip Vendor ID:         'BDCM'                   'BDCM'

Chip Vendor Specific:   0x0000                   0xA39A

Chip Vendor Country:    0xB500                   0xB500

Modem Vendor ID:        'CSCO'                   'BDCM'

Modem Vendor Specific:  0x4602                   0xA39A

Modem Vendor Country:   0xB500                   0xB500

Serial Number Near:    FGL18212393 C897VAB- 15.4(201503

Serial Number Far:

Modem Version Near:    15.4(20150325:160033) [ragvasud

Modem Version Far:     0xa39a

Modem Status:          Unknown

DSL Config Mode:         ADSL2+

Trained Mode:

TC Mode:                 UNKNOWN

Selftest Result:         0x00

DELT configuration:      disabled

DELT state:              not running

Bonded Status:           PTM Bonded<

Number of Ports:         2

Port ID:                 0               1

Link Status:             DOWN            DOWN

Aggr US Rate(kbps):      0

Aggr DS Rate(kbps):      0

Full inits:             3

Failed full inits:      14

Short inits:            2

Failed short inits:     2

Firmware        Source          File Name

--------        ------          ----------

VDSL            user config     flash:vdsl_bond.bin_39p1

Modem FW  Version:      4.14L.04

Modem PHY Version:      A2pv6F039p1.d24m

Line:

XTU-R (DS)              XTU-C (US)

Trellis:                 OFF                      OFF

SRA:                     disabled                disabled

SRA count:              0                       0

Bit swap:                enabled                 enabled

Training Log :  Stopped

Training Log Filename : flash:vdsllog.bin

Risoluzione dei problemi

Al momento non sono disponibili informazioni specifiche per la risoluzione dei problemi di questa configurazione.