Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Compatibilità hardware e software

Compatibilità JRE

Compatibilità tra le versioni del software Common-Control Card

Compatibilità Cross-Connect con Common-Control Card

Compatibilità tra le versioni del software della scheda elettrica

Compatibilità tra schede elettriche con connessione incrociata

Compatibilità delle versioni software della scheda ottica

Compatibilità Cross-Connect con schede ottiche

Compatibilità software scheda Ethernet

Compatibilità Ethernet Card Cross-Connect

Compatibilità scheda SAN

Compatibilità CTC/CTM

Informazioni correlate

Introduzione

Questo documento fornisce una matrice di compatibilità hardware e software per Cisco ONS 15454 SONET Multiservice Provisioning Platform (MSPP).

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Cisco Transport Manager (CTM)

- Cisco Transport Controller (CTC)

- Sun Java Runtime Environment (JRE)

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- CTC versione da 2.20.0x a 6.0

- CTM versione da 2.1.x a 4.7

- JRE versione 1.2.2, 1.3.1_01 e 1.4.2

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Compatibilità hardware e software

Compatibilità JRE

Nella tabella viene mostrata la compatibilità JRE con una data versione software per ONS 15454 SONET MSPP:

Software ONS release

Compatibile con JRE 1.2.2

Compatibile con JRE 1.3

Compatibile con JRE 1.4

ONS 15454 release 2.2.1 e precedenti

Sì

No

No

ONS 15454 release 2.2.2

Sì

Sì

No

ONS 15454 release 3.0

Sì

Sì

No

ONS 15454 release 3.1

Sì

Sì

No

ONS 15454 release 3.2

Sì

Sì

No

ONS 15454 release 3.3

Sì

Sì

No

ONS 15454 release 3.4

No

Sì

No

ONS 15454 release 4.0 [1]

No

Sì

No

ONS 15454 release 4.1

No

Sì

No

ONS 15454 release 4.5

No

Sì

No

ONS 15454 release 4.6

No

Sì

Sì

ONS 15454 release 5.0

No

No

Sì

ONS 15454 release 6.0

No

No

Sì

1 Il software versione 4.0 e successive avvisa l'utente se la workstation PC o UNIX esegue una versione precedente di JRE.

Compatibilità tra le versioni del software Common-Control Card

In questa tabella viene mostrata la compatibilità delle versioni del software Cisco Transport Controller (CTC) per ciascuna scheda di controllo comune:

Scheda

R2.2.1

R2.2.2

R3.0.1

R3.1

R3.2

R3.3

R3.4

R4.0

R4.1

R4.5

R4.6

R4.7

R5.0

R6.0

TCC+

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

-

-

-

-

TCC2

-

-

-

-

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

Sì

TCC2P

-

-

-

-

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

Sì

XC

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

-

-

XCVT

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

XC10G

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

XC-VXC-10G

-

-

-

-

-

-

-

-

-

-

-

-

-

Sì

AIC

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

AIC-I

-

-

-

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

AEP

-

-

-

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Compatibilità Cross-Connect con Common-Control Card

Nella tabella seguente viene elencata la compatibilità delle schede di connessione incrociata per ciascuna scheda di controllo comune:

Scheda

Scheda XCVT

XC10G Card [1]

Scheda XC-VXC-10G^1

TCC+ [2]

Sì

Sì

-

TCC2

Sì

Sì

Sì

TCC2P

Sì

Sì

Sì

XC

-3

-3

-3

XCVT

Sì

-3

-3

XC10G

-3

Sì

-3

XC-VXC-10G

-3

-3

Sì

AIC-I

Sì

Sì

Sì

AEP

Sì

Sì

Sì

[1] Richiede l'assemblaggio dello scaffale SA-ANSI o SA-HD.

[2] TCC+ non è compatibile con il software R4.5 o versioni successive.

[3] Queste schede cross-connect sono compatibili solo durante un aggiornamento.

Compatibilità tra le versioni del software della scheda elettrica

Nella tabella seguente viene indicata la compatibilità del software CTC per ciascuna scheda elettrica:

Scheda elettrica

R2.2.2

R3.0.1

R3.1

R3.2

R3.3

R3.4

R4.0

R4.1

R4.5

R4.6

R4.7

R5.0

R6.0

EC1-12

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS1-14

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS1N-14

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS1/E1-56

-

-

-

-

-

-

-

-

-

-

-

-

Sì

DS3-12

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS3N-12

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS3-12E

Sì 1

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS3N-12E

Sì 1

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS3XM-6 (Trasmux)

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS3XM-12 (Trasmux)

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

DS3/EC1-48

-

-

-

-

-

-

-

-

-

-

-

Sì

Sì

DS3i-N-12

-

-

-

-

-

-

-

Sì (4.1.2)

-

Sì

-

Sì

Sì

Utilizzare il software R3.0 o versioni successive per abilitare tutte le funzioni di monitoraggio delle prestazioni avanzate sulle schede DS-3E. Con il software R2.2.2, le schede DS-3E funzionano come le vecchie schede DS-3 senza un monitoraggio avanzato delle prestazioni.

Compatibilità tra schede elettriche con connessione incrociata

Nella tabella seguente viene indicata la compatibilità delle schede di connessione incrociata per ciascuna scheda elettrica:

Scheda elettrica

Scheda XCVT

XC10G Card [1]

Scheda XC-VXC-10G^1

EC1-12

Sì

Sì

Sì

DS1-14

Sì

Sì

Sì

DS1N-14

Sì

Sì

Sì

DS3-12

Sì

Sì

Sì

DS3N-12

Sì

Sì

Sì

DS3-12E

Sì

Sì

Sì

DS3N-12E

Sì

Sì

Sì

DS3/EC1-48

-

Sì

Sì

DS3XM-6 (Trasmux)

Sì

Sì

Sì

DS3XM-12 (Trasmux)

Sì

Sì

Sì

DS3i-N-12

Sì

Sì

Sì

DS1/E1-56

Sì

Sì

Sì

[1] Richiede un gruppo scaffale 15454-SA-ANSI o 15454-SA-HD.

Compatibilità delle versioni software della scheda ottica

Nella tabella seguente viene indicata la compatibilità del software CTC per ciascuna scheda ottica:

Scheda ottica

R2.2.1

R2.2.2

R3.0.1

R3.1

R3.2

R3.3

R3.4

R4.0

R4.1

R4.5.[1]

R4.6

R4.7^1

R5.0

R6.0

OC3 IR 4 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC3 IR 4/STM1 SH 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC3 IR /STM1 SSH 1310-8

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

OC12 IR/STM4 SSH 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC12 IR 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC12 LR 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC12 LR 1550

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC12 LR/STM4 LH 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC12 LR/STM4 LH 1550

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC12 IR/STM4 SSH 1310-4

-

-

-

-

-

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC48 IR 1310

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC48 LR 1550

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC48 IR/STM16 SH AS 1310 [2]

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC48 LR/STM16 LH AS 1550 [3]

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC48 ELR/STM16 EH 100 GHz

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC48 ELR 200 GHz

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC192 SR/STM64 IO 1310

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

OC192 IR/STM64 SH 1550

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

OC192 LR/STM64 LH 1550 (15454-OC192LR1550)

-

-

-

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

OC192 LR/STM64 LH 1550 (15454-OC192-LR2)

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

OC192 LR/STM64 LH ITU 15xx.xx

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

15454_MRC-12

-

-

-

-

-

-

-

-

-

-

-

-

-

Sì

OC192SR1/STM64IO Short Reach e OC192/STM64 Any Reach [4]

-

-

-

-

-

-

-

-

-

-

-

-

-

Sì

[1] Versione solo DWDM.

[2] Per abilitare il funzionamento delle schede AnySlot OC-192 e OC-48, usare la scheda XC10G o XC-VXC-10G, la scheda TCC+/TCC2/TCC2P, il software R3.1 o successivo e l'assembly della scheda 15454-SA-ANSI o 15454-SA-HD. La scheda TCC+ non è compatibile con il software 4.5 o versioni successive.

[3] Per abilitare il funzionamento delle schede AnySlot OC-192 e OC-48, usare la scheda XC10G o XC-VXC-10G, la scheda TCC+/TCC2/TCC2P, il software R3.1 o successivo e l'assembly della scheda 15454-SA-ANSI o 15454-SA-HD.

Nota: la scheda TCC+ non è compatibile con il software 4.5 o versioni successive.

[4] Queste schede sono indicate come OC192-XFP in CTC.

Compatibilità Cross-Connect con schede ottiche

Nella tabella seguente viene mostrata la compatibilità delle schede di connessione incrociata per ciascuna scheda ottica:

Scheda ottica

Scheda XCVT

XC10G Card [1]

XC-VXC-10GCarda^1

OC3 IR 4 1310

Sì

Sì

Sì

OC3 IR 4/STM1 SH 1310

Sì

Sì

Sì

OC3 IR /STM1 SSH 1310-8

-

Sì

Sì

OC12 IR 1310

Sì

Sì

Sì

OC12 LR 1310

Sì

Sì

Sì

OC12 LR 1550

Sì

Sì

Sì

OC12 IR/STM4 SSH 1310

Sì

Sì

Sì

OC12 LR/STM4 LH 1310

Sì

Sì

Sì

OC12 LR/STM4 LH 1550

Sì

Sì

Sì

OC12 IR/STM4 SSH 1310-4

-

Sì

Sì

OC48 IR 1310

Sì

Sì

Sì

OC48 LR 1550

Sì

Sì

Sì

OC48 IR/STM16 SH AS 1310

Sì [2]

Sì

Sì

OC48 LR/STM16 LH AS 1550

Sì 2

Sì

Sì

OC48 ELR/STM16 EH 100 GHz

Sì

Sì

Sì

OC48 ELR 200 GHz

Sì

Sì

Sì

OC192 SR/STM64 IO 1310

-

Sì

Sì

OC192 IR/STM64 SH 1550

-

Sì

Sì

OC192 LR/STM64 LH 1550

-

Sì

Sì

OC192 LR/STM64 LH ITU 15xx.xx

-

Sì

Sì

OC192SR1/STM64 IO Short Reach e OC192/STM64 Any Reach (schede OC192-XFP)

-

Sì

Sì

15454_MRC-12

Sì

Sì

Sì

[1] Richiede un gruppo scaffale 15454-SA-ANSI o 15454-SA-HD.

[2] Richiede la versione software 3.2 e successive negli slot 5, 6, 12 e 13.

Compatibilità software scheda Ethernet

Nella tabella seguente viene mostrata la compatibilità del software CTC per ciascuna scheda Ethernet:

Scheda

R2.2.1

R2.2.2

R3.0.1

R3.1

R3.2

R3.3

R3.4

R4.0

R4.1

R4.5

R4.6

R4.7

R5.0

R6.0

E100T-12

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

E1000-2

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

E100T-G

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

E1000-2-G

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

G1000-4

-

-

-

-

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

G1K-4

-

-

-

-

Sì

Sì

Sì

Sì

Sì

-

Sì

-

Sì

Sì

ML100T-12

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

ML100X-8

-

-

-

-

-

-

-

-

-

-

-

-

-

Sì

ML1000-2

-

-

-

-

-

-

-

Sì

Sì

-

Sì

-

Sì

Sì

CE-100T-8

-

-

-

-

-

-

-

-

-

-

-

-

Sì

Sì

Compatibilità Ethernet Card Cross-Connect

Nella tabella seguente viene mostrata la compatibilità delle schede di connessione incrociata con ciascuna scheda Ethernet:

Scheda

Scheda XCVT

XC10G Card [1]

Scheda XC-VXC-10G^1

E100T-12

Sì

-

-

E1000-2

Sì

-

-

E100T-G

Sì

Sì

Sì

E1000-2-G

Sì

Sì

Sì

G1K-4

Sì, negli slot 5, 6, 12, 13

Sì

Sì

ML100T-12

Sì, negli slot 5, 6, 12, 13

Sì

Sì

ML1000-2

Sì, negli slot 5, 6, 12, 13

Sì

Sì

ML100X-8

Sì, negli slot 5, 6, 12, 13

Sì

Sì

CE 100T-8

Sì

Sì

Sì

[1] Richiede un gruppo scaffale 15454-SA-ANSI o 15454-SA-HD.

Compatibilità scheda SAN

Nella tabella seguente viene illustrata la compatibilità tra le connessioni per ogni scheda SAN:

Schede SAN

Scheda XCVT

XC10G Card [1]

Scheda XC-VXC-10G^1

FC_MR-4

Sì

Sì

Sì

[1] Richiede l'assemblaggio dello scaffale SA-ANSI o SA-HD.

Compatibilità CTC/CTM

Nella tabella viene mostrata la compatibilità CTM per ciascuna versione del software ONS15454 SONET.

Versione CTC (SONET)

Versione CTM

R2.20.0x (2.2.0)

CTM R2.1.x (con CTC R2.1.3 - R2.2.2)

R3.00.0x (3.0)

CTM R3,0,3,2,4,0,4,1,4,6

R3.10.0x (3.1)

CTM R3.1, 3.2

R3.20.0x (3.2)

CTM R3.1, 3.2, 4.0, 4.1, 4.6, 4.7

R3.30.0x (3.3)

CTM R3.1, 3.2, 4.0, 4.1, 4.6, R4.7

R3.40.0x (3.4)

CTM R3,2,4,0,4,1,4,6,4,7

R4.0.0x(4.0)

CTM R4.0, 4.1, 4.6, 4.7

4.1.0x(4.1)

CTM R4.1, 4.6, 4.7

R4.6.0x (4.6)

CTM R4.6, 4.7

R 5,0x

CTM R5.0, 6.0

R6

CTM R6.0

Informazioni correlate

- ONS 15454 SDH MSPP - Matrice di compatibilità hardware e software

- Documentazione e supporto tecnico – Cisco Systems