Sommario

Introduzione

Prerequisiti

Requisiti

Componenti usati

Convenzioni

Topologia

Aggiungi un altro nodo

Configurazione finale

ML 1

ML 2

ML 3

Informazioni correlate

Introduzione

Questo documento descrive la procedura per aggiungere uno o più nodi all'RPR (Resilient Packet Ring) sulle schede ML per Cisco ONS 15454.

Prerequisiti

Requisiti

Cisco raccomanda la conoscenza dei seguenti argomenti:

- Cisco ONS 15454

- Cisco ONS 15454 serie ML Ethernet Card

- Software Cisco IOS®

- Bridging e routing IP

Componenti usati

Le informazioni fornite in questo documento si basano sulle seguenti versioni software e hardware:

- Cisco ONS 15454 con ONS release 4.1.3.

- ML (fornito in bundle con ONS 4.1.3 release) con software Cisco IOS versione 12.1(19) EO1.

Nota: le configurazioni di questo documento si basano su una soluzione Bridging over RPR.

Le informazioni discusse in questo documento fanno riferimento a dispositivi usati in uno specifico ambiente di emulazione. Su tutti i dispositivi menzionati nel documento la configurazione è stata ripristinata ai valori predefiniti. Se la rete è operativa, valutare attentamente eventuali conseguenze derivanti dall'uso dei comandi.

Convenzioni

Per ulteriori informazioni sulle convenzioni usate, consultare il documento Cisco sulle convenzioni nei suggerimenti tecnici.

Topologia

Resilient Packet Ring (RPR) è un'architettura di layer 2 basata su standard, ottimizzata per un traffico di dati bursty. L'RPR consente di realizzare un'architettura basata su anelli senza ricorrere allo Spanning Tree Ethernet o allo schema di protezione SONET/SDH, garantendo comunque un tempo di convergenza inferiore a 50 ms per i servizi Ethernet e IP. RPR fornisce il tipo di protezione SONET senza la necessità di riservare la larghezza di banda. RPR può funzionare con o senza protezione SONET. RPR sulle schede ML introduce un altro punto tra le interfacce POS (Packet Over SONET) e le interfacce Ethernet. Un'interfaccia SPR (Shared Packet Ring) è un'interfaccia virtuale che fornisce questo collegamento. Per RPR, entrambe le porte POS agiscono come membri dell'interfaccia SPR. L'interfaccia SPR esegue automaticamente il wrapping della protezione.

La Figura 1 indica due circuiti tra le porte POS sui nodi ONS 15454 su SONET. Una singola interfaccia SPR1 su ciascuna scheda ML gestisce la funzione RPR.

Figura 1 - Anello pacchetti resiliente a due nodi

Con l'aggiunta di un terzo nodo, vi sono tre circuiti tra le porte POS sui nodi 15454 su SONET (vedere la Figura 2).

Figura 2 - Anello pacchetti resiliente a tre nodi

Aggiungi un altro nodo

Completare questi passaggi per aggiungere un altro nodo all'RPR:

1. Chiudere la porta POS su ML1 che si trova di fronte all'estensione in cui si desidera aggiungere il nuovo nodo. La porta è POS 1 qui:

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#shutdown

ML1(config-if)#^Z

2. Chiudere la porta POS su ML2 che si trova di fronte all'estensione in cui si desidera aggiungere il nuovo nodo. La porta è POS 0 in questo caso:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#shutdown

ML2(config-if)#^Z

3. Eliminare il percorso STS (Synchronous Transport Signal) tra i nodi adiacenti per RPR (vedere la Figura 3).

Figura 3 - Eliminazione del percorso STS

4. Verificare se la connettività Ethernet esiste ancora in RPR (con set di test e tabelle di routing del cliente).

5. Aggiungere il nuovo nodo (si supponga che al nodo sia già stato assegnato il provisioning per l'identificatore di destinazione (TID), l'indirizzo IP, le porte SONET IS, il canale SDCC (Data Communications Channel) SONET abilitato e così via).

6. Caricare la configurazione XML nel nuovo nodo (ML 3). Vedere la configurazione ML 3 nella sezione Configurazione finale.

7. Costruire due nuovi circuiti (e assicurarsi di selezionare IS come stato del circuito) dal POS 0 di ML2 al POS 1 di ML3 e dal POS 0 di ML3 al POS 1 di ML1 (cfr. Figura 4). Controllare il registro di controllo per verificare se il circuito passa in ADMIN_IS o ADMIN_OS.

Figura 4 - Aggiunta di due nuovi circuiti

8. Non eseguire alcun arresto sulla porta POS 1 in ML 1 rivolta al nuovo nodo:

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#no shutdown

ML1(config-if)#^Z

9. Non eseguire shutdown sulla porta POS 0 di ML 2 rivolta al nuovo nodo:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#no shutdown

ML2(config-if)#^Z

10. Verificare se la connettività Ethernet esiste ancora in RPR (con set di test e tabelle di routing del cliente)

11. Monitorare il traffico Ethernet per almeno un'ora dopo l'inserimento del nodo.

Configurazione finale

Questa sezione fornisce la configurazione finale per i punti ML 1, ML 2 e ML3.

ML 1

ML1#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML1

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 1

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password ww

line vty 0 4

exec-timeout 50 0

password ww

login

!

end

ML 2

ML2#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML2

!

enable password CISCO15

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 2

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

ML 3

ML3#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML3

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 3

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

Informazioni correlate

- Configurazione dell'anello pacchetti resiliente

- Documentazione e supporto tecnico – Cisco Systems