内容

概要

前提条件

要件

使用するコンポーネント

設定

USBスティックまたはコンパクトフラッシュカードの準備 – Windows

USBスティックまたはコンパクトフラッシュカードの準備 – Mac

リカバリ：8510/8710

リカバリ：4500シリーズ

確認

トラブルシュート

概要

このドキュメントでは、Multipoint Control Unit（MCU；マルチポイントコントロールユニット）/Telepresence Server（MCU/TS；テレプレゼンスサーバ）を高速にする方法について説明します。

MCUまたはTSソフトウェアは、ユニット内のフラッシュメモリに保存されます。これには、オペレーティングシステム(OS)、デジタルシグナルプロセッサ(DSP)、WebインターフェイスのWebページ、MCU/TSアプリケーション、オーディオファイル、ユーザ設定、会議情報、監査ログ、CDRなどが含まれます。

Fatbustingとは、内部メモリ上のOSパーティション全体がフォーマットされ、OSとアプリケーションが最初からインストールされる手順を指します。これは、ストレージ上のファイルがアップグレードファイルの新しいファイルで更新されるだけで、データが失われることのない通常のソフトウェアアップデートとは異なります。

fatbustingは、ユニットがブートを拒否し、通常のアップグレードで修正されていない場合、または何らかの理由で内部メモリが破損している場合に実行されます。これには次のような理由があります。

- フラッシュメモリエラー

- 不正なアップデートによるソフトウェアの破損

- シャットダウンせずにユニットの電源をオフにする

- ユニットがクラッシュした場合のシャットダウン不良

このプロセスは、コンピュータのハードドライブを再フォーマットし、OSとアプリケーションを再インストールする場合とほぼ同じです。

警告：デバイスに保存されているすべてのデータが破棄されます。コンフィギュレーションファイルのバックアップと、必要なライセンスキー、SIP/H323情報などを追加することをお勧めします。また、USBスティックまたはコンパクトフラッシュカードをフォーマットする必要があるため、この状態から保持するデータもバックアップする必要があります。

この手順は、Cisco TACのガイダンスに従う必要があります。

前提条件

要件

次の項目に関する知識があることが推奨されます。

- USBスティック(8710/8510/5300用)

- コンパクトフラッシュカードおよびリーダー（4200/4500用）

- 復元するハードウェアプラットフォームの断層イメージ。イメージについては、Cisco TACにお問い合わせください

- コンソールケーブル、シリアルポート、またはUSBからシリアルアダプタ

- ターミナルエミュレータプログラム（PuTTY、コンソール、HyperTerminal）

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

このドキュメントの情報は、特定のラボ環境にあるデバイスに基づいて作成されました。このドキュメントで使用するすべてのデバイスは、初期（デフォルト）設定の状態から起動しています。対象のネットワークが実稼働中である場合には、どのようなコマンドについても、その潜在的な影響について確実に理解しておく必要があります。

設定

USBスティックまたはコンパクトフラッシュカードの準備 – Windows

1. USBデバイスをコンピュータのUSBポートに挿入するか、コンピュータに接続されているカードリーダーにコンパクトフラッシュカードを挿入します。

2. Windows diskpartアプリケーションをロードします。Startを選択してdiskpartと入力し、diskpart.exeをクリックします。

3. [Yes]をクリックして、Windowsからの警告メッセージを受け入れます。次に、コマンドプロンプトが表示されます。各コマンドが正しく入力されていることを確認し、正しいディスクを選択してください。これは、入力しない形式をフォーマットすることを意味する可能性があるためです。list diskと入力し、システム内のすべてのストレージデバイスを表示します。

4. デバイスのリストを注意深く見てください。ディスク0は、おそらくコンピュータのC:ドライブ、その他のハードドライブ、USBデバイス、カードリーダーなどが表示されます。フォーマットするデバイスに対応するドライブを探します。この場合、16 GB USBドライブが挿入されます。したがって、14GBドライブはシステムの他のオプションであるため、選択してください。ディスクを選択するには、 select disk Xと入力します。Xはリスト内のディスク番号です。この例では、ディスク5:

5. ドライブ上のすべてのパーティションを一覧表示するには、list partitionと入力します。これは、どのパーティションが存在するかを示し、適切なディスクが選択されていることを確認します。

6. ドライブ上のすべてのパーティションを破棄します。これを行うには、cleanと入力します。確認や警告はありません。これにより、ドライブ上のパーティションテーブルが破壊され、データの回復がより困難になります。正しいドライブが選択されていることを確認してください。

7. パーティションテーブルがクリーニングされていることを確認するには、リストパーティションを入力します。

8. ドライブ全体を使用する1つのパーティションを作成するには、create partition primaryと入力します。

9. 新しいパーティションをフォーマットします。MCU/TSがそれを認識できるように、ファイル割り当てテーブル32(FAT32)が重要です。MacまたはNew Technology File System(NTFS)フォーマットのドライブは認識されません。これを行うには、format fs=fat32 quickと入力して、FAT32を使用したクイックフォーマットを行います。

[マイコンピュータ]でディスクを表示できるようになりました。

10. ディスクイメージをディスクにコピーします。このイメージは、回復するハードウェアプラットフォームに固有のものです。通常のソフトウェアアップデートと同様に、8510の断崖は8510のブレードに、5300の断崖は5300のユニットに適用できます。TACからイメージを入手し、USBドライブにコピーしてください。

ファイル名に「fatbast」が含まれることで、fatbastと通常のイメージの違いを知ることができます。ファイルの名前を「kupgrade」に変更する必要があります。ファイル拡張子や他のテキストは名前に含まれません。これを行うには、Windowsの他のファイルと同様にファイル名を変更します（ファイル拡張子の変更に関する警告を受け入れます）。

これで、ストレージデバイスがユニットを復元する準備ができました。

USBスティックまたはコンパクトフラッシュカードの準備 – Mac

1. ストレージデバイスをMacのUSBポート（USBドライブまたはUSBコンパクトフラッシュカードリーダー）に接続します。

2. ディスクユーティリティを起動します。メニューバーのスポットライト検索ボックスにDisk Utilityと入力するか、[アプリケーション] > [ユーティリティ] > [Disk Utility]を選択します。

3. フォーマットするデバイスをクリックします。正しいドライブをフォーマットすることを再確認し、[パーティション(Partition)]タブをクリックしてください。[現在]ドロップダウンボックスから[1パーティション]を選択し、[形式]ドロップダウンボックスから[MS-DOS (FAT)]を選択します。名前は関係ありません。

4. ウィンドウの下にある「オプション」をクリックします。デフォルトでMacがグローバル一意識別子(GUID)パーティションテーブルを使用しようとするように、パーティションスキームとして[Master Boot Record]を選択することが重要です。

5. [Apply] をクリックします。フォーマットが完了したら、正しいフォーマットのデバイスが必要です。Finderのデバイスに移動し、他のファイルと同様にファイルをUSBドライブにコピーします。次に、ファイルをクリックし、Returnキーを押して「kupgrade」に名前を変更します。

ストレージデバイスは使用可能です。

リカバリ：8510/8710

8510と8710は同じハードウェアであるため、手順は同じです。

ユニットを回復するには、次の手順を実行します。

1. 前述したように、USBスティックを準備します。

2. USBスティックをブレード前面の2つのUSBポートの1つに差し込み、コンソール接続付近の上部に差し込みます。コンソールケーブルをコンソールポートに接続し、ターミナルエミュレータをロードします（シリアルポートの設定は38400bps、8データビット、1ストップビット、パリティなし）。

3. ユニットをリブートします。shutdownを入力し、シリアルコンソールを再起動します。
MCU:> shutdown

shutting down

MCU:> reboot

104725.174 SYSTEM : Warning : Product activation key required

reboot: waiting for shutdown to complete

104729.531 SYSTEM : Info : shutdown monitor - shutdown initiated

104729.531 GATEKEEPER : Info : shutdown initiated

104729.531 GATEKEEPER : Info : shutdown complete

104729.531 CONFERENCE : Info : no active participants - shutdown now complete

104730.032 SYSTEM : Info : shutdown process - all priority 100 handlers complete

104730.032 SYSTEM : Info : shutdown process - shutdown complete

Waiting (max 60 seconds) for system process `vnlru' to stop...done

Waiting (max 60 seconds) for system process `fastpath' to stop...done

Waiting (max 60 seconds) for system process `bufdaemon' to stop...done

Waiting (max 60 seconds) for system process `syncer' to stop...

Syncing disks, vnodes remaining...0 0 done

All buffers synced.

Uptime: 29m39s

...

Rebooting...

cpu_reset: Stopping other CPUs

Host requested soft-reboot... Asserting nHOST_RESET

HUB configured.

Hardware Revision = 0x01

SlotID = 0xf2

Asserting MCU_DSP_PWR_EN

Deasserting nHOST_RESET

ユニットがリブートすると、USBデバイスからkupgradeファイルをロードしていることを示すメッセージが表示されます。ユニットがコピーを終了し、起動を開始したら、USBスティックを抜きます。

Checking system timer ... OK

EEPROM digest:

84 b2 ce a9 66 a2 4f 9b e4 b0 6b 66 c1 53 a9 82

FreeUsbd v.0.1.2

USB pre initialised

FIDDLESTICKS

Host stat now 42

USB mass storage manufacturer : General (8644)

USB mass storage product name : USB Flash Disk (8003)

USB mass storage serial number: 0531230000000636

Number of logical drives: 1

USB drive (1) mounted: fsName 'usbfs2a'

kernel_boot(usbfs1a:kupgrade)

kernel_boot(usbfs2a:kupgrade)

....................................................

No fat payload ## unplug here

Image version: 4.0(2.8)

entrypoint 0xc045f2b0

KDB: debugger backends: ddb

KDB: current backend: ddb

Copyright (c) 1992-2013 The FreeBSD Project.

Copyright (c) 1979, 1980, 1983, 1986, 1988, 1989, 1991, 1992, 1993, 1994

The Regents of the University of California. All rights reserved.

FreeBSD is a registered trademark of The FreeBSD Foundation.

FreeBSD 8.4-RELEASE #0: Fri Jan 31 13:08:49 GMT 2014

4. ユニットのブート後、回復プロセスが開始されます。新しいパーティションが作成され、ファイルがコピーされ、ファームウェアは通常のアップデートと同様にアップデートされます。
*********************

* Starting kupgrade *

*********************

Mounting filesystems...

ugen2.2: <General> at usbus2 (disconnected)

umass0: at uhub2, port 2, addr 2 (disconnected)

(da0:umass-sim0:0:0:0): lost device - 0 outstanding, 3 refs

(da0:umass-sim0:0:0:0): got CAM status 0xa

(da0:umass-sim0:0:0:0): fatal error, failed to attach to device

(da0:umass-sim0:0:0:0): removing device entry

kupgrade running in mode: fatbust

ugen1.2: <TANDBERG 09> at usbus1

Erasing ALL filesystems in 5 seconds...

Creating partition table

******* Working on device /dev/ada0 *******

Creating disk label

Creating root fs

/dev/ada0s2a: 384.0MB (786432 sectors) block size 16384, fragment size 2048 using 4

cylinder groups of 96.02MB, 6145 blks, 12352 inodes.

super-block backups (for fsck -b #) at: 160, 196800, 393440, 590080

newfs: Cannot retrieve operator gid, using gid 0.

Creating cfg fs

/dev/ada0s2b: 16.0MB (32768 sectors) block size 16384, fragment size 2048 using 4

cylinder groups of 4.02MB, 257 blks, 576 inodes.

super-block backups (for fsck -b #) at: 160, 8384, 16608, 24832

newfs: Cannot retrieve operator gid, using gid 0.

Creating rdwr fs

/dev/ada0s2d: 64.0MB (131072 sectors) block size 16384, fragment size 2048 using 4

cylinder groups of 16.02MB, 1025 blks, 2112 inodes.

super-block backups (for fsck -b #) at: 160, 32960, 65760, 98560

newfs: Cannot retrieve operator gid, using gid 0.

Creating cdr fs

/dev/ada0s2e: 256.0MB (524288 sectors) block size 16384, fragment size 2048 using 4

cylinder groups of 64.02MB, 4097 blks, 8256 inodes.

super-block backups (for fsck -b #) at: 160, 131264, 262368, 393472

newfs: Cannot retrieve operator gid, using gid 0.

Creating fat fs

/dev/ada0s1: 529040 sectors in 66130 FAT32 clusters (4096 bytes/cluster)

BytesPerSec=512 SecPerClust=8 ResSectors=4 FATs=2 Media=0xf0 SecPerTrack=36

Heads=255 HiddenSecs=0 HugeSectors=530082 FATsecs=518 RootCluster=2 FSInfo=1 Backup=2

All filesystems recreated, mounting...

Verify fat filesystem:

** /dev/ada0s1

** Phase 1 - Read and Compare FATs

** Phase 2 - Check Cluster Chains

** Phase 3 - Checking Directories

** Phase 4 - Checking for Lost Files

1 files, 264516 free (66129 clusters)

default v1

Upgrading system:

Extracting cfg

:    0% 25% 50% 75% 100%

********************************************************************************

Extracting file system:

0% 25% 50% 75% 100%

********************************************************************************

Extracting fat:

0% 25% 50% 75% 100%

********************************************************************************

Upgrading flash systems

Upgrading LOM:

This version is already installed. Skipping.

Upgrading HUB:

This version is already installed. Skipping.

Upgrading L2:

This version is already installed. Skipping.

Upgrading LCD:

This version is already installed. Skipping.

Upgrade complete.

Rebooting...

Waiting (max 60 seconds) for system process `vnlru' to stop...done

Waiting (max 60 seconds) for system process `bufdaemon' to stop...done

Waiting (max 60 seconds) for system process `syncer' to stop...

Syncing disks, vnodes remaining...0 0 done

All buffers synced.

Uptime: 56s

5. ユニットが再びリブートし、正常にMCU/TSアプリケーションにブートし、その時点で正常に再設定できます。この時点でユニットがブートしない場合は、TACに連絡してください。

リカバリ：4500シリーズ

1. 前の手順を使用して、コンパクトフラッシュカードを準備します。フォーマットされたコンパクトフラッシュカードが必要です。カード上の唯一のファイルが「kupgrade」であり、そのファイルにfatburstイメージが含まれていることを確認します。

2. MCUの前面にあるコンパクトフラッシュカードスロットにカードを挿入します。コンソールケーブルをコンソールポートに接続し、ターミナルエミュレータをロードします（シリアルポートの設定は38400bps、8データビット、1ストップビット、パリティなし）

3. MCUプロンプトを表示するには、Enterキーを数回押す必要がある場合があります。コンソールが表示されたら、shutdownを入力してMCUをシャットダウンします。次にrebootと入力し、リブートします。
MCUが起動しない場合は、MCUの電源をオフ/オンするか、カードを挿入してからリブートします。

ブートプロセス中に、MCUが挿入したCFカードを認識していることを確認します。この後、アップグレードファイルをメモリにコピーし、そこからブートを開始します。

rebooting

*** (C) Codian Ltd 2004-2005 ***

Resetting PCI

Calling Mpc107init

Mpc107init done

Testing SDRAM data lines ... ok

Testing SDRAM address lines ... ok

Relocating .text from FFF00000-FFF0B36E to 0E010000

Relocating .data from FFF0B380 to 0E01B380-0E01B7C8

Clearing .bss from 0E01B7C8-0E09EDA4

Initialising timebase regs

Calling main L1 strap : built at Jul 7 2005 - 23:19:46

L2 found : image size 000362e4 version 2005:07:08 11:19

Starting L2

L2 Bootstrap

Relocating .text from FFF10000-FFF450B0 to 0E010000

Relocating .data from FFF450C0 to 0E0450C0-0E0462E4

Clearing .bss from 0E0462E4-0E0CA930

Calling main Hello from l2_main

card detected in internal slot (EXCA_STATUS = 4c)

waiting until status ready ...ok!

mounting dos0

fatsize = 00010000

card detected in external slot (EXCA_STATUS = 6f)

waiting until status ready ...ok!

mounting dos1

fatsize = 0001e600

Product - Unknown (00000054)

MAC address - 00:0d:7c:e2:00:06

Serial number - XX710003

Motherboard serial number - SM00674

Slotmask : 00000028

03 - SD01127

05 - SD01234

Devmode : 00010000

Trying dos1:kupgrade

copying dos1:kupgrade to md0:00000000..................................

...........................0226bbe6 bytes copied # the unit is copying the image

Image version : 4.5(1.45)

fd=7

loadelf fd=7 Elf_Ehdr=0xefffe58 marks=0xe0c632c flags=0000003f

loadelf line 78

loadelf line 86

loadelf line 93

loadelf line 150

loadelf line 165

loadelf line 178

loadelf line 200

loadelf line 200

ok

MARK[0] = 00090000

MARK[1] = 00090000

MARK[2] = 00000001

MARK[3] = 024f7da8

MARK[4] = 02530838

calling ksyms_init (startkernel=0x090000 endkernel=0x253b000 edata=0x0

end=0x7f454c46 startsym=0x24f7da8 endsym=0x2530838

ksyms_init

Loaded initial symtab at 0x24f7da8, strtab at 0x25162dc, # entries 7245

Copyright (c) 1996, 1997, 1998, 1999, 2000, 2001, 2002, 2003

The NetBSD Foundation, Inc. All rights reserved.

Copyright (c) 1982, 1986, 1989, 1991, 1993 The Regents of the

University of California. All rights reserved.

NetBSD 1.6ZG (RAMDISK) #0: Fri Sep 6 20:35:51 UTC 2013

jenkins@bv-freebsd-01:/scratch/jenkins/workspace/netbsd1.6-ramdisk--default/systems/os/netbsd/src/sys/arch/

marvin/compile/obj/RAMDISK

total memory = 240 MB

avail memory = 183 MB

using 3072 buffers containing 12388 KB of memory

sysctl_createv: sysctl_create(cacheinfo) returned 17

mainbus0 (root)mainbus_attach

eumbbus_match: cpu eumbbus

cpu0 at mainbus0: Version 0x8081 (Revision 0x1014), ID 0 (primary)

cpu0: HID0 90c000<DOZE,DPM,ICE,DCE>

config_found cpu done

eumbbus_match: eumbbus eumbbus

eumbbus0 at mainbus0eumbbus_attach

....... .......

wd0 at atabus0 drive 0: <SILICONSYSTEMS INC 256MB>

wd0: drive supports 1-sector PIO transfers, LBA addressing

wd0: 248 MB, 994 cyl, 16 head, 32 sec, 512 bytes/sect x 508928 sectors

howto 2 bootdev 0 boot device: wd0

root on md0a dumps on md0b

about to call domountroothook

about to call vfs_mountroot

rtcinit()

Warm Boot

Time is now 02:11:16.53 07/08/14

root file system type: ffs

Enabling serial port...

Setting up serial terminal...

Starting kupgrade process

*********************

* Starting kupgrade *

********************* # remove CF card here

Checking filesystems...

Mounting filesystems...

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

Mounting flash card...

kupgrade running in mode: fatbust # recovery process begins

Erasing ALL filesystems in 5 seconds...

Wipe MBR

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

32+0 records in

32+0 records out

16384 bytes transferred in 0.675 secs (24272 bytes/sec)

Add MBR

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

wd0: no disk label

fdisk: partition table invalid, no magic in sector 0

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

wd0: no disk label

fdisk: partition table invalid, no magic in sector 0

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

wd0: no disk label

fdisk: partition table invalid, no magic in sector 0

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

wd0: no disk label

fdisk: partition table invalid, no magic in sector 0

add cf disklabel

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

wd0: no disk label

disklabel: Invalid signature in mbr record 0

newfs 0a

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

/dev/rwd0a: 64.0MB (131072 sectors) block size 8192, fragment size 1024

using 4 cylinder groups of 16.00MB, 2048 blks, 3968 inodes.

super-block backups (for fsck -b #) at: 32, 32800, 65568, 98336,

newfs 0d

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

/dev/rwd0d: 8.0MB (16384 sectors) block size 8192, fragment size 1024

using 4 cylinder groups of 2.00MB, 256 blks, 448 inodes.

super-block backups (for fsck -b #) at: 32, 4128, 8224, 12320,

newfs 0b

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

/dev/rwd0b: 130748 sectors in 32687 FAT16 clusters (2048 bytes/cluster)

MBR type: 6

bps=512 spc=4 res=1 nft=2 rde=512 mid=0xf8 spf=128 spt=32 hds=16 hid=32 bsec=131040

card ready

rbus_space_alloc: addr 0, size 1000, mask fff, align 1000

Extracting read-write fs

0% 0 0.00 KB/s --:-- ETA

19% 175 KB 174.38 KB/s 00:04 ETA/

100% 885 KB 439.40 KB/s 00:00 ETA

100% 885 KB 415.22 KB/s 00:00 ETA

/dev/rwd0a: 64.0MB (131072 sectors) block size 8192, fragment size 1024

using 4 cylinder groups of 16.00MB, 2048 blks, 3968 inodes.

super-block backups (for fsck -b #) at: 32, 32800, 65568, 98336,

Extracting root fs 0% 0 0.00 KB/s --:-- ETA 1% 722 KB 701.11 KB/s 01:26

ETA 2% 1554 KB 754.67 KB/s 01:19 ETA 3% 2335 KB 777.73 KB/s 01:15

ETA 4% 3058 KB 763.62 KB/s 01:16 ETA 6% 3826 KB 757.91 KB/s 01:15

ETA ... 99% 61359 KB 748.26 KB/s 00:00 ETA 99% 61375 KB 739.24 KB/s 00:00

ETA 99% 61407 KB 730.89 KB/s 00:00 ETA 100% 61411 KB 722.43 KB/s 00:00

ETA 100% 61411 KB 715.36 KB/s 00:00 ETA

Upgrade complete

umount: /rootfs: Device busy

Rebooting...

Aug 7 02:13:32 reboot: rebooted by root

Aug 7 02:13:32 init: single user shell terminated, restarting

syncing disks... done

rebooting

*** (C) Codian Ltd 2004-2005 ***

Resetting PCI

Calling Mpc107init

Mpc107init done

Testing SDRAM data lines ... ok

Testing SDRAM address lines ... ok

Relocating .text from FFF00000-FFF0B36E to 0E010000

Relocating .data from FFF0B380 to 0E01B380-0E01B7C8

Clearing .bss from 0E01B7C8-0E09EDA4

Initialising timebase regs

Calling main L1 strap : built at Jul 7 2005 - 23:19:46

L2 found : image size 000362e4 version 2005:07:08 11:19

Starting L2

L2 Bootstrap

Relocating .text from FFF10000-FFF450B0 to 0E010000

Relocating .data from FFF450C0 to 0E0450C0-0E0462E4

Clearing .bss from 0E0462E4-0E0CA930

Calling main Hello from l2_main

card detected in internal slot (EXCA_STATUS = 4c)

waiting until status ready ...ok!

mounting dos0

fatsize = 00010000

no card in external slot (EXCA_A[EXCA_STATUS] = 00)

Product - Unknown (00000054)

MAC address - 00:0d:7c:e2:00:06

Serial number - XX710003

Motherboard serial number - SM00674

Slotmask : 00000028

03 - SD01127

05 - SD01234

Devmode : 00010000

Trying dos1:kupgrade

error opening source file dos1:kupgrade

Trying dos0:kupgrade

error opening source file dos0:kupgrade

Trying dos0:netbsd

copying dos0:netbsd to md0:00000000.........................002f09c3 bytes copied

Image version : 4.5(1.45)

fd=6

loadelf fd=6 Elf_Ehdr=0xefffe58 marks=0xe0c632c flags=0000003f

loadelf line 78

loadelf line 86

loadelf line 93

loadelf line 150

loadelf line 165

loadelf line 178

loadelf line 200

loadelf line 200

ok

MARK[0] = 00090000

MARK[1] = 00090000

MARK[2] = 00000001

MARK[3] = 005ff688

MARK[4] = 00648c48

Copyright (c) 1996, 1997, 1998, 1999, 2000, 2001, 2002, 2003, 2004, 2005, 2006,

2007, 2008, 2009, 2010 The NetBSD Foundation, Inc. All rights reserved.

Copyright (c) 1982, 1986, 1989, 1991, 1993 The Regents of the

University of California. All rights reserved.

NetBSD 5.1 (ZAPHODCONF) #0: Tue Apr 1 17:33:24 BST 2014

root@bv-ubuntu-09:/ram-work/systems/os/netbsd5_1/usr/src/sys

/arch/sandpoint/compile/obj/ZAPHODCONF

boot process continues

ユニットが再びリブートし、正常にMCU/TSアプリケーションにブートし、その時点で正常に再設定できます。この時点でユニットがブートしない場合は、Cisco TACにお問い合わせください

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。