内容

概要

前提条件

要件

使用するコンポーネント

表記法

設定

PPPoA セッションの終了：Cisco 7200へのxDSL

RFC 1483 ブリッジング：Cisco 7200へのxDSL

RBE：Cisco 7200へのxDSL

PPPOE:Cisco 7200へのxDSL

L2TP：L2TP による xDSL から 7200 への接続

確認

トラブルシュート

関連情報

概要

このドキュメントには、Digital Subscriber Line（DSL; デジタル加入者線）のコンポーネントに関する一般的な説明、および DSL コンポーネントを基本的な DSL の実装に構成する方法についての説明があります。このドキュメントの設定例では、現在使用されている最も一般的な DSL ネットワークが示されています。これらの設定は、ブロードバンド集約の実装を設計する際の一般的なリファレンスとして使用できます。ただし、この設定を定型のソリューションとして捉えないでください。お客様ごとに要求事項も異なるため、同じ設計目標を実現するにも数多くの方法があります。

このドキュメントに示した設定はできるだけ完全な状態になっていますが、表示されているのは必須の行だけです。このドキュメントでは、Cisco デバイスの設定に関してユーザが基本的な知識を持っていることを前提としています。そのため、基本的なコマンドラインはほとんど省略されています。下記の設定は、単に実装設計の出発点として使用してください。

前提条件

要件

このドキュメントに特有の要件はありません。

使用するコンポーネント

このドキュメントの内容は、特定のソフトウェアやハードウェアのバージョンに限定されるものではありません。

表記法

ドキュメント表記の詳細は、『シスコ テクニカル ティップスの表記法』を参照してください。

設定

このセクションでは、このドキュメントで説明する機能を設定するために必要な情報を提供しています。

注： このドキュメントで使用されているコマンドの詳細を調べるには、Command Lookup Tool（登録ユーザ専用）を使用してください。

PPPoA セッションの終了：Cisco 7200へのxDSL

ネットワーク図

このセクションでは、次のネットワーク設定を使用します。

設定

この例では、PPP over ATM（PPPoA）によって、Cisco 677 またはその他の DSL Customer Premises Equipment（CPE; 顧客宅内機器）を Cisco 7200 に接続する方法を説明します。 設定には、Cisco Lightstream 1010（LS1010）ATM スイッチが含まれていますが、このコンポーネントはオプションです。DSL Access Multiplier（DSLAM）が直接 Cisco 7200 に接続されていても、結果は同じになります。

この例では、Cisco 677でPPPセッションを確立し、Cisco 7200で終了します。セッションの終了後、従来のIPはトラフィックをネットワークサービスプロバイダー(NSP)またはインターネットに渡します。

CPE は、Network Address Translation（NAT; ネットワーク アドレス変換）や Port Address Translation（PAT; ポート アドレス変換）を行うように設定されています。 CPE には DHCP サーバも実装されており、イーサネット ステーションに IP アドレスを割り当てています。

このセクションでは、次の設定例を使用しています。

- PPPoA に対する PC の設定

- PPPoA に対する Cisco CPE の設定

- PPPoA に対する Cisco DSLAM の設定

- PPPoA に対する Cisco LS1010 の設定

- PPPoA に対する Cisco 7200 の設定

PPPoA に対する PC の設定

1. 自動的に IP アドレスを取得するように、IP アドレッシングを設定します。

2. WINS を設定して、WINS の解決に DHCP を使用します。

3. デフォルトのゲートウェイが設定されていないことを確認します。

注：DHCPがこの情報を渡せない場合は、ドメイン名を設定する必要があります。

PPPoA に対する Cisco CPE の設定

cbos> enable

Password:

cbos# set nat enable

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos# set ppp wan0-0 login

User name for wan0-0 has been set to testcpe.

cbos# set ppp wan0-0 password

Password for wan0-0 has been set to cisco.

cbos# set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos# set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

cbos# set dhcp server enable

DHCP Server enabled

cbos# set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos# set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

cbos# set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos# set password exec

Exec Password Change Successful!

cbos# set password enable

Enable Password Change Successful!

cbos# write

NVRAM written.

PPPoA に対する Cisco DSLAM の設定

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

atm pvc 1 32 interface atm0/1 1 35

PPPoA に対する Cisco LS1010 の設定

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

PPPoA に対する Cisco 7200 の設定

aaa new-model

AAA authentication ppp default local

!

!

username password

!

!

interface ATM 2/0.1 multipoint

no ip directed-broadcast

PVC 1/35

encapsulation aal5mux ppp Virtual-Template 2

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 2

ip unnumbered FastEthernet 4/0

no ip directed-broadcast

peer default ip address pool <pool name>

ppp authentication pap

!

!

ip local pool <pool name> 172.22.40.10 172.22.40.25

RFC 1483 ブリッジング：Cisco 7200へのxDSL

ネットワーク図

このセクションでは、次のネットワーク設定を使用します。

設定

この例では、RFC1483 Bridged Encapsulation によって、Cisco 677 またはその他の DSL CPE を Cisco 7200 に接続する方法を説明します。設定には、Cisco LS1010 ATM スイッチが含まれていますが、このコンポーネントはオプションです。DSLAM が直接、Cisco 7200 に接続されていても、結果は同じになります。

この例では、Cisco 677でブリッジドセッションを確立し、Cisco 7200で終了します。セッションがCisco 7200にブリッジされた後、従来のIPはトラフィックをNSPまたはインターネットに渡します。Cisco 7200 で設定された DHCP サーバによって、IP アドレスがクライアント ワークステーションに割り当てられます。

この設定では、Integrated Routing and Bridging（IRB; 統合ルーティングおよびブリッジング）を使用しています。 IRB に関するスケーラビリティとセキュリティの問題を緩和するには、Routed Bridged Encapsulation（RBE）を考慮する必要があります。

このセクションでは、次の設定例を使用しています。

- RFC 1483 に対する PC の設定

- RFC 1483 に対する Cisco 677 CPE の設定

- RFC 1483 に対する Cisco DSLAM の設定

- RFC 1483 に対する Cisco LS1010 の設定

- RFC 1483 に対する Cisco 7200 の設定

RFC 1483 に対する PC の設定

1. 自動的に IP アドレスを取得するように、IP アドレッシングを設定します。

2. WINS を設定して、WINS の解決に DHCP を使用します。

3. デフォルトのゲートウェイが設定されていないことを確認します。

注：DHCPがこの情報を渡せない場合は、ドメイン名を設定する必要があります。

RFC 1483 に対する Cisco 677 CPE の設定

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

RFC 1483 に対する Cisco DSLAM の設定

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

RFC 1483 に対する Cisco LS1010 の設定

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

RFC 1483 に対する Cisco 7200 の設定

ip dhcp excluded-address 172.22.40.1 172.22.40.25

!

!

ip dhcp pool 0

network 172.22.40.0 255.255.255.0

default-router 172.22.40.9

dns-server

netbios-name-server

!

!

bridge irb

!

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5snap

bridge-group 1

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5snap

bridge-group 1!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface BVI 1

ip address 172.22.40.9 255.255.255.0

no ip directed-broadcast

!

!

bridge 1 protocol ieee

bridge 1 route ip

RBE：Cisco 7200へのxDSL

ネットワーク図

このセクションでは、次のネットワーク設定を使用します。

設定

新しい DSL を設置する場合、現在では通常、RBE が設定の対象として選択されます。RBE が、ブロードバンドの加入者環境において、ブリッジングのセキュリティやスケーラビリティの問題に対応しているためです。

Cisco 7200 で設定された DHCP サーバによって、IP アドレスがクライアント ワークステーションに割り当てられます。

重要：Cisco IOS(R) ソフトウェア リリース 12.1(2)T 以降が使用されている場合以外、非番号 ATM では、ルータで DHCP は動作できません。

このセクションでは、次の設定例を使用しています。

- RBE に対する PC の設定

- RBE に対する Cisco CPE の設定

- RBE に対する Cisco DSLAM の設定

- RBE に対する Cisco LS1010 の設定

- RBE に対する Cisco 7200 の設定

RBE に対する PC の設定

1. 自動的に IP アドレスを取得するように、IP アドレッシングを設定します。

2. WINS を設定して、WINS の解決に DHCP を使用します。

3. デフォルトのゲートウェイが設定されていないことを確認します。

注：DHCPがこの情報を渡せない場合は、ドメイン名を設定する必要があります。

RBE に対する Cisco CPE の設定

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

RBE に対する Cisco DSLAM の設定

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

RBE に対する Cisco LS1010 の設定

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

RBE に対する Cisco 7200 の設定

ip dhcp excluded-address 172.22.40.1 172.22.40.25

!

!

ip dhcp pool 0

network 172.22.40.0 255.255.255.0

default-router 172.22.40.9

dns-server

netbios-name-server

!

!

interface Loopback0

ip address 172.22.40.9 255.255.255.0

!

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

ip unnumbered Loopback0

no ip directed-broadcast

ATM route-bridged ip

PVC 1/35

encapsulation aal5snap

!

!

interface ATM 2/0.2 point-to-point

ip unnumbered Loopback0

no ip directed-broadcast

ATM route-bridged ip

PVC 1/36

encapsulation aal5snap

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

PPPOE:Cisco 7200へのxDSL

ネットワーク図

このセクションでは、次のネットワーク設定を使用します。

設定

PPP over Ethernet（PPPoE）によって、PPP セッションはルータからエンド クライアントまで延長されます。PPP と認証ソフトウェアは、通常、クライアントのオペレーティング システムまたはスタンドアロン アプリケーションで動作します。CPEはブリッジモードで動作し、DSL接続を介してPPPセッションをブリッジします。ただし、このシナリオでは、CPEはDHCPサーバとして機能できません。

CPE、DSLAM、および ATM スイッチの設定は、RFC1483 ブリッジングの設定と同じです。この例で示すとおり、Cisco 7200 集約ルータはローカル認証用に設定できます。または、Cisco 7200 を Authentication, Authorization, and Accounting（AAA; 認証、認可、アカウンティング）RADIUS 認証用に設定することも可能です。

このセクションでは、次の設定例を使用しています。

- PPPoE に対する PC の設定

- PPPoE に対する Cisco 677 CPE の設定

- PPPoE に対する Cisco DSLAM の設定

- PPPoE に対する Cisco LS1010 の設定

- PPPoE に対する Cisco 7200 の設定

PPPoE に対する PC の設定

1. 自動的に IP アドレスを取得するように、IP アドレッシングを設定します。

2. WINS を設定して、WINS の解決に DHCP を使用します。

3. デフォルトのゲートウェイが設定されていないことを確認します。

注：DHCPがこの情報を渡せない場合は、ドメイン名を設定する必要があります。

注：エンドステーションは、ルータへのPPP接続を確立できる必要があります。そのためには、認証およびアクセス用に特別のクライアント ソフトウェアが必要になる場合があります。

PPPoE に対する Cisco 677 CPE の設定

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

PPPoE に対する Cisco DSLAM の設定

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

PPPoE に対する Cisco LS1010 の設定

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

PPPoE に対する Cisco 7200 の設定

!

username <username> password <password>

!

vpdn enable

!

vpdn-group 1

accept-dialin

protocol pppoe

virtual-template 1

pppoe limit per-mac 100

pppoe limit per-vc 100

!

ip cef

!

interface atm2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5snap

protocol pppoe

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5snap

protocol pppoe

!

interface Virtual-Template1

ip unnumbered FastEthernet 4/0

no ip directed-broadcast

peer default ip address pool <pool name>

ppp authentication pap

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

ip local pool <pool name> 172.22.32.20 172.22.32.100

L2TP：L2TP による xDSL から 7200 への接続

ネットワーク図

このセクションでは、次のネットワーク設定を使用します。

設定

Layer Two Tunneling Protocol（L2TP）を使用すると、ある場所でエンド ユーザからの PPP 接続を終端し、L2 のデータ パケットを別の場所に転送できます。L2TP によって集約デバイスの IP 機能が大幅に軽減され、より中央集中型のネットワーク設計が可能になります。RADIUS サーバは AAA を提供します。

Cisco 7200 以外のすべてのデバイスの設定は、RFC1483 の例での設定と同じです。

このセクションでは、次の設定例を使用しています。

- L2TP に対する PC の設定

- L2TP に対する Cisco 677 CPE の設定

- L2TP に対する Cisco DSLAM の設定

- L2TP に対する Cisco LS1010 の設定

- L2TP に対する Cisco 7200 L2TP Access Concentrator（LAC; L2TP アクセス コンセントレータ）の設定

- L2TP に対する Cisco 7200 L2TP Network Server（LNS; L2TP ネットワーク サーバ）の設定

L2TP に対する PC の設定

1. 自動的に IP アドレスを取得するように、IP アドレッシングを設定します。

2. WINS を設定して、WINS の解決に DHCP を使用します。

3. デフォルトのゲートウェイが設定されていないことを確認します。

注：DHCPがこの情報を渡せない場合は、ドメイン名を設定する必要があります。

L2TP に対する Cisco 677 CPE の設定

cbos> enable

Password:

cbos# set nat enable

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos# set ppp wan0-0 login

User name for wan0-0 has been set to testcpe.

cbos# set ppp wan0-0 password

Password for wan0-0 has been set to cisco.

cbos# set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos# set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

cbos# set dhcp server enable

DHCP Server enabled

cbos# set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos# set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

cbos# set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos# set password exec

Exec Password Change Successful!

cbos# set password enable

Enable Password Change Successful!

cbos# write

NVRAM written.

L2TP に対する Cisco DSLAM の設定

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

L2TP に対する Cisco LS1010 の設定

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

L2TP に対する Cisco 7200 LAC の設定

!

AAA new-model

AAA authentication login default none

AAA authentication ppp default local group radius

AAA authorization network default local group radius none

AAA accounting network default wait-start group radius

!

vpdn-group 4

request-dialin

protocol l2tp

domain cisco.com

initiate-to ip 172.22.32.27 priority 1

local name cisco-tunnel

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5mux ppp Virtual-Template1

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template1

ip unnumbered FastEthernet4/0

no ip directed-broadcast

ppp authentication pap

!

!

radius-server host 172.22.32.20 auth-port 1645 acct-port 1646

radius-server key cisco

L2TP に対する Cisco 7200 LNS の設定

!

AAA new-model

AAA authentication login default none

AAA authentication ppp default local group radius

AAA authorization network default local group radius none

AAA accounting network default wait-start group radius

!

vpdn-group 1

accept-dialin

protocol any

virtual-template 1

terminate-from hostname cisco-tunnel

local name tunnel-gate

!

radius-server host 172.22.32.20 auth-port 1645 acct-port 1646

radius-server key cisco

確認

現在、この設定に使用できる確認手順はありません。

トラブルシュート

現在、この設定に関する特定のトラブルシューティング情報はありません。

関連情報

- Asymmetric Digital Subscriber Line（ADSL; 非対称デジタル加入者線）テクノロジーに関するサポート

- テクニカル サポートとドキュメント