목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

구성

네트워크 다이어그램

구성

다음을 확인합니다.

문제 해결

관련 정보

소개

이 샘플 컨피그레이션을 사용하면 Cisco 677 ADSL(Asymmetric Digital Subscriber Line) 라우터에 연결된 PC를 Cisco 6130 ADSLAM(Advanced Digital Subscriber Line Access Multiplexer)을 통해 단일 또는 여러 Cisco UAC(Universal Access Concentrator)에 연결할 수 있습니다. 이 컨피그레이션에서 사용하는 특정 장비는 필요하지 않습니다. 예를 들어, Cisco 677을 Cisco 678로 교체할 수 있습니다.

이 샘플 컨피그레이션에는 ADSL 롤아웃에 공통적으로 사용되는 Cisco 677에서 활성화된 몇 가지 기능이 있습니다. 이러한 기능은 NAT(Network Address Translation), PAT(Port Address Translation) 및 DHCP(Dynamic Host Configuration Protocol)입니다. 이러한 기능을 사용하면 쿠키 커터 롤아웃을 수행할 수 있습니다. 모든 장비에 동일한 구성이 적용되므로 배포 및 문서에 대한 비용이 크게 절감됩니다.

Cisco IOS® 기반 NRP(Node Route Processor) 및 NSP(Node Switch Processor)의 코드를 컨피그레이션에 복사하여 붙여넣을 수 있습니다. 그러나 Cisco 677은 Cisco CBOS(Broadband Operating System)를 사용하며 이 코드를 복사하여 붙여넣을 수 없습니다. Cisco 677을 구성하는 데 사용하는 명령도 이 샘플 컨피그레이션에 포함되어 있습니다.

사전 요구 사항

요구 사항

이 문서에 대한 특정 요건이 없습니다.

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

하드웨어

- PC 또는 워크스테이션

- Cisco 677 ADSL CPE(customer premises equipment)

- 로컬 Telco의 ADSL 서비스

- Cisco 6130 ADSLAM with NI-2, DMT-II ATU-C

- Cisco 6400 UAC - NRP 1개 및 NSP 1개

소프트웨어

- Cisco 6400 UAC NRP용 Cisco IOS Software 릴리스 12.0.7-DC

- Cisco IOS Software 릴리스 12.0.7-DB for Cisco 6400 UAC NSP

- Cisco 677 ADSL Router용 CBOS 릴리스 2.3.0.012

- Cisco IOS Software 릴리스 12.0.8-DA1 for Cisco 6130 ADLAM

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참조하십시오.

구성

이 섹션에서는 이 문서에 설명된 기능을 구성하는 데 사용할 수 있는 정보를 제공합니다.

참고: 이 문서에 사용된 명령에 대한 추가 정보를 찾으려면 명령 조회 도구(등록된 고객만 해당)를 참조하십시오.

네트워크 다이어그램

이 문서에서는 다음 네트워크 설정을 사용합니다.

구성

구성 메모

테스트 가입자가 연결할 수 있도록 Cisco 6130에서 영구 가상 연결(PVC)을 구성해야 합니다. NSP에서 PVP를 구성하고 NRP에서 PPP 세션을 종료할 때 Cisco 6400에 VPI/VCI(virtual path identifier/virtual channel identifier) 컨피그레이션을 기록해야 합니다.

이 샘플 컨피그레이션은 NSP의 가상 경로를 보여줍니다. 이 경로를 통해 Cisco 6400은 ADSLAM에서 종료 라우터 또는 다른 ATM 스위치로 셀을 통과할 수 있습니다. 여기서는 PVP를 설정하여 중앙 사무실에 있는 Cisco 6400에서 PPP 세션을 종료하지 않고도 ATM 셀을 기업 네트워크 또는 ISP로 전환할 수 있습니다.

이 샘플 컨피그레이션을 사용하면 원격 사용자가 회사 네트워크에 투명하게 액세스하여 전자 메일을 공유하고 파일/인쇄, 회사 인트라넷을 공유하며 웹 브라우징을 위해 인터넷에 액세스할 수 있습니다. 기업 인터넷 연결을 사용할 수 없습니다.

Cisco 677에 여러 PVC가 구성된 경우 각 PVC를 통해 트래픽을 라우팅할 수 있습니다. ADSLAM 및 UAC-NSP의 컨피그레이션은 이러한 PVC를 올바른 목적지, ISP/ASP 또는 회사로 라우팅/전환합니다. 여기서 PPP는 종료할 수 있습니다. 이 컨피그레이션은 트래픽을 감소시켜 기업 네트워크에서 사용 가능한 대역폭을 늘리고 웹 트래픽을 전달하기 위해 현재 ISP 계정을 사용합니다.

이 문서에서는 다음 구성을 사용합니다.

- PC 구성

- Cisco 67x CPE

- Cisco 67x CPE에 실행할 명령

- 61xx 추가 슬램

- 6400 NSP

- 6400 NRP(슬롯 1)

- 6400 NRP(슬롯 2)

PC 구성

IP 주소가 자동으로 수신되도록 IP 주소 지정을 설정합니다. WINS 확인에 DHCP를 사용하도록 WINS를 설정합니다. 기본 게이트웨이가 설정되지 않았는지 확인합니다. DHCP가 이 정보를 전달할 수 없으므로 도메인 이름을 설정해야 합니다.

Cisco 67x CPE(show run)

[[ IP Routing = Section Start ]]

IP NAT = enabled

IP Port Address = 00, 172.22.10.254

IP Default Route for Unnumbered Links = 002, 01, 0

IP Static Route Table Entries for Unnumbered Links = 172.22.32.0, 001, 255.255.2

55.0, 1, 0;

[[ CBOS = Section Start ]]

NSOS Maximum Number of VCs = 2

NSOS Root Password = <

root password

>

NSOS Enable Password = <

enable password

>

[[ PPP Device Driver = Section Start ]]

PPP Port User Name = 00, <

username for wan0-0

>

PPP Port User Password = 00, <

password for wan0-0

>

PPP Port User Name = 01, <

username for wan0-1

>

PPP Port User Password = 01, <

password for wan0-1

>

PPP Port Option = 01, IPCP,IP Address,3,Auto,Negotiation Not Required,Negotiable

,IP,0.0.0.0

[[ DHCP = Section Start ]]

DHCP Server = enabled

DHCP Server Pool IP = 00, 172.22.10.0

DHCP Server Pool Gateway = 00, 172.22.10.254

[[ ATM WAN Device Driver = Section Start ]]

ATM WAN Virtual Connection Parms = 00, 1, 32, 0

ATM WAN Virtual Connection Parms = 01, 2, 63, 0

Cisco 67x CPE에 실행할 명령

cbos#set nat enabled

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos#set int wan0 maxvcs 2

You must use "write" and reboot for changes to take effect.

cbos#write

NVRAM written.

cbos#reboot

Hello! Expanding CBOS image...

CBOS v2.3.5.012 - Release Software

User Access Verification

Password:<

root password

>

cbos>en

Password:<

enable password

>

cbos#set ppp wan0-0 login

User name for wan0-0 has been set to router.

cbos#set ppp wan0-0 password

Password for wan0-0 has been set to <password for wan0-0>

cbos#set ppp wan0-1 login

Password for wan0-1 has been set to <username for wan0-1>

cbos#set ppp wan0-1 password

Password for wan0-1 has been set to <password for wan0-1>

cbos#set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos#set ppp wan0-1 ipcp 0.0.0.0

PPP wan0-1 IPCP Address set to 0.0.0.0

cbos#set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos#set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

You must use "write" then reboot for changes to take effect

cbos#set dhcp server enable

DHCP Server enabled

cbos#set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos#set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

Size of pool 0 is automatically changed to max size 252

cbos#set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos#set password exec

Exec Password Change Successful!

cbos#set password enable

Enable Password Change Successful!

cbos#set route default wan0-1

Default Route set

cbos#set route add ip 172.22.32.0 mask 255.255.255.0 gw wan0-0

Route added

cbos#set int wan0-0 close

Closing connection wan0-0

cbos#set int wan0-1 close

Closing connection wan0-1

cbos#set int wan0-0 vpi 1

Change completed.

cbos#set int wan0-0 vc1 32

Change completed.

cbos#set int wan0-1 vpi 2

Change completed.

cbos#set int wan0-1 vci 63

Change completed.

cbos#set int wan0-0 open

Opening connection wan0-0

cbos#set int wan0-1 open

Opening connection wan0-1

cbos#write

NVRAM written

cbos#reboot

61xx 추가 슬램

interface ATM 1/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

pvc 1 32 int atm 0/1 40 40

pvc 2 63 int atm 0/1 50 51

6400 NSP(슬롯 8)

interface ATM 8/0/1

no ip address

no ip directed-broadcast

no atm ilmi-keepalive

atm pvp 40 interface ATM 1/0/0 40

atm pvp 50 interface ATM 2/0/0 50

6400 NRP(슬롯 1)

aaa new-model

aaa authentication ppp default local

!

!

username <username for wan0-0> password <password for wan0-0>

!

!

interface ATM 0/0/0.200 multipoint

no ip directed-broadcast

pvc 40/40

encapsulation aal5ciscoppp Virtual-Template 2

!

!

interface FastEthernet 0/0/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 2

ip unnumbered FastEthernet 0/0/0

no ip directed-broadcast

peer default ip address pool <pool name A>

ppp authentication pap

!

!

ip local pool <pool name A> 172.22.40.25 172.22.40.50

6400 NRP(슬롯 2)

aaa new-model

aaa authentication ppp default local

!

!

username <username for wan0-1> password <password for wan0-1>

!

!

interface ATM 0/0/0.300 multipoint

no ip directed-broadcast

pvc 50/51

encapsulation aal5ciscoppp Virtual-Template 21

!

!

interface FastEthernet 0/0/0

ip address 172.16.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 21

ip unnumbered FastEthernet 0/0/0

no ip directed-broadcast

peer default ip address pool <pool name B>

ppp authentication pap

!

!

ip local pool <pool name B> 172.16.100.10 172.16.100.25

다음을 확인합니다.

이 섹션에서는 컨피그레이션이 제대로 작동하는지 확인하는 데 사용할 수 있는 정보를 제공합니다.

일부 show 명령은 출력 인터프리터 툴 에서 지원되는데(등록된 고객만), 이 툴을 사용하면 show 명령 출력의 분석 결과를 볼 수 있습니다.

Cisco 675 CPE에서 다음 명령을 사용합니다.

- show interface wan0 - ADSL 링크에 대해 교육을 받은 속도를 표시합니다.

- show interface wan0-0 - wan0-0의 PPP 세션 정보를 표시합니다.

- show interface wan0-1 - wan0-1에 대한 PPP 세션 정보를 표시합니다.

- show dhcp server pool 0 - 클라이언트 사이트에서 DHCP 정보를 표시합니다.

Cisco 6400 UAC에서 다음 명령을 사용합니다.

- show atm pvc - 올바른 PVC가 설정되었는지 여부를 표시합니다.

문제 해결

이 섹션에서는 컨피그레이션 문제를 해결하는 데 사용할 수 있는 정보를 제공합니다.

Cisco 6400 UAC에서 다음 명령을 사용합니다.

- debug ppp negotiation - PPP 협상 디버그 메시지를 표시합니다.

- debug ppp authentication - 클라이언트가 인증을 통과하는지 표시합니다.

- debug ppp error—PPP 연결 협상 및 작업과 관련된 프로토콜 오류 및 오류 통계를 표시합니다.

debug 명령을 시도하기 전에 디버그 명령에 대한 중요 정보를 참조하십시오.

관련 정보

- Cisco DSL 기술 지원 정보

- 제품 지원 정보

- Technical Support - Cisco Systems