목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

표기 규칙

토폴로지

하나 이상의 노드 추가

최종 구성

메가리터 1

메가리터 2

메가리터 3

관련 정보

소개

이 문서에서는 Cisco ONS 15454용 ML 카드의 RPR(Resilient Packet Ring)에 하나 이상의 노드를 추가하는 절차에 대해 설명합니다.

사전 요구 사항

요구 사항

다음 주제에 대한 지식을 보유하고 있으면 유용합니다.

- Cisco ONS 15454

- Cisco ONS 15454 ML-Series Ethernet Card

- Cisco IOS® 소프트웨어

- 브리징 및 IP 라우팅

사용되는 구성 요소

이 문서의 정보는 다음 소프트웨어 및 하드웨어 버전을 기반으로 합니다.

- ONS 릴리스 4.1.3을 실행하는 Cisco ONS 15454.

- Cisco IOS Software 릴리스 12.1(19) EO1을 실행하는 ML(ONS 4.1.3 릴리스의 일부로 번들됨)

참고: 이 문서의 구성은 Bridging over RPR 솔루션을 기반으로 합니다.

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우, 모든 명령어의 잠재적인 영향을 미리 숙지하시기 바랍니다.

표기 규칙

문서 규칙에 대한 자세한 내용은 Cisco 기술 팁 표기 규칙을 참고하십시오.

토폴로지

RPR(Resilient Packet Ring)은 까다로운 데이터 트래픽에 최적화된 표준 기반 레이어 2 아키텍처입니다. RPR은 이더넷 스패닝 트리나 SONET/SDH 보호 체계 없이 링 기반 아키텍처를 지원하며 이더넷 및 IP 서비스에 대해 50ms 미만의 링 컨버전스 시간을 제공합니다. RPR은 대역폭을 예약할 필요 없이 SONET 유형의 보호를 제공합니다. RPR은 SONET 보호를 사용하거나 사용하지 않고 작동할 수 있습니다. ML 카드의 RPR에는 POS(Packet Over SONET) 인터페이스와 이더넷 인터페이스 사이에 또 다른 점이 있습니다. SPR(Shared Packet Ring) 인터페이스는 이 링크를 제공하는 가상 인터페이스입니다. RPR의 경우 두 POS 포트가 모두 SPR 인터페이스의 멤버로 작동합니다. SPR 인터페이스는 보호 배치를 자동으로 수행합니다.

그림 1은 SONET를 통한 ONS 15454 노드의 POS 포트 간 2개의 회로를 나타냅니다. 각 ML 카드의 단일 SPR1 인터페이스가 RPR 기능을 처리합니다.

그림 1 - 2노드 복원형 패킷 링

세 번째 노드가 추가되면서 SONET를 통해 15454 노드의 POS 포트 중 세 개의 회로가 있습니다(그림 2 참조).

그림 2 - 3노드 복원형 패킷 링

하나 이상의 노드 추가

RPR에 노드를 하나 더 추가하려면 다음 단계를 완료하십시오.

1. 새 노드를 추가하려는 스팬 쪽에 있는 ML1에서 POS 포트를 종료합니다. 포트는 여기에서 POS 1입니다.

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#shutdown

ML1(config-if)#^Z

2. 새 노드를 추가하려는 스팬 쪽에 있는 ML2에서 POS 포트를 종료합니다. 포트가 POS 0인 경우:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#shutdown

ML2(config-if)#^Z

3. RPR을 위해 인접한 노드 간의 STS(Synchronous Transport Signal) 경로를 삭제합니다(그림 3 참조).

그림 3 - STS 경로 삭제

4. 이더넷 연결이 RPR에 존재하는지(테스트 세트 및 고객의 라우팅 테이블 포함) 확인합니다.

5. 새 노드를 추가합니다(노드가 이미 TID(Target Identifier), IP 주소, SONET 포트 IS, SONET SDCC(Data Communications Channel)가 활성화된 경우 등).

6. 새 노드(ML 3)에 ML 컨피그레이션을 업로드합니다. Final Configuration(최종 컨피그레이션) 섹션의 ML 3 컨피그레이션을 참조하십시오.

7. POS 0 ML2에서 POS1(ML3), POS 0(ML3)에서 POS 1(POS1)까지의 두 개의 새 회로를 구축합니다(그림 4 참조). 회로가 ADMIN_IS 또는 ADMIN_OOS에 들어가는지 확인하려면 감사 로그를 확인합니다.

그림 4 - 새 회로 2개 추가

8. 새 노드를 접하는 ML 1의 POS 1 포트에서 종료를 수행하지 않습니다.

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#no shutdown

ML1(config-if)#^Z

9. 새 노드를 접하는 ML 2의 POS 0 포트에서 종료를 수행하지 않습니다.

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#no shutdown

ML2(config-if)#^Z

10. 이더넷 연결이 RPR에 존재하는지 확인(고객의 테스트 세트 및 라우팅 테이블 포함)

11. 노드 삽입 후 최소 1시간 동안 이더넷 트래픽을 모니터링합니다.

최종 구성

이 섹션에서는 ML 1, ML 2 및 ML3의 최종 컨피그레이션을 제공합니다.

메가리터 1

ML1#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML1

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 1

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password ww

line vty 0 4

exec-timeout 50 0

password ww

login

!

end

메가리터 2

ML2#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML2

!

enable password CISCO15

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 2

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

메가리터 3

ML3#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML3

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 3

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

관련 정보

- 복원형 패킷 링 구성

- 기술 지원 및 문서 − Cisco Systems