목차

소개

사전 요구 사항

요구 사항

사용되는 구성 요소

문제 해결

연결 문제 탐지

DNS(Domain Name Server) 확인으로 인한 연결 문제

SSE 포털에 등록 문제

SSEConnector 상태 확인

SSE 포털 및 CTR으로 전송된 데이터 확인

소개

이 문서에서는 SecureX with Cisco Secure Firewall 통합 관련 문제(버전 7.1 이상)에 대해 설명합니다.

사전 요구 사항

요구 사항

Cisco에서는 다음 항목에 대한 지식을 권장합니다.

- FMC(Firepower Management Center)

- Cisco 보안 방화벽

- 이미지 가상화 옵션

사용되는 구성 요소

- Cisco Secure Firewall - 6.5

- FMC(Firepower Management Center) - 6.5

- SSE(Security Services Exchange)

- SecureX

- 스마트 라이센스 포털

- Cisco CTR(Threat Response)

이 문서의 정보는 특정 랩 환경의 디바이스를 토대로 작성되었습니다. 이 문서에 사용된 모든 디바이스는 초기화된(기본) 컨피그레이션으로 시작되었습니다. 현재 네트워크가 작동 중인 경우 모든 명령의 잠재적인 영향을 미리 숙지하시기 바랍니다.

문제 해결

연결 문제 탐지

에서 일반 연결 문제를 탐지할 수 있습니다. action_queue.log 파일. 오류가 발생할 경우 파일에 다음과 같은 로그가 있습니다.

ActionQueueScrape pl[19094]: [SF::SSE::Enrollment] canConnect: System (/usr/bin/curl -s --connect-timeout 10 -m 20 -L --max-redirs 5 --max-filesize 104857600 --capath /ngfw/etc/sf/keys/fireamp/thawte_roots -f https://api.eu.sse.itd.cisco.com/providers/sse/api/v1/regions) Failed, curl returned 28 at /ngfw/usr/local/sf/lib/perl/5.10.1/SF/System.pmline 10477.

이 경우 코드 28은 작업 시간이 초과되어 인터넷 연결을 확인하는 것을 의미합니다.

또한 DNS 확인에 문제가 있음을 의미하는 코드 6이 있습니다

DNS(Domain Name Server) 확인으로 인한 연결 문제

1단계. 연결이 제대로 작동하는지 확인합니다.

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* getaddrinfo(3) failed for api-sse.cisco.com:443

* Couldn't resolve host 'api-sse.cisco.com'

* Closing connection 0

curl: (6) Couldn't resolve host 'api-sse.cisco.com'

이 출력은 디바이스가 URL을 확인할 수 없음을 보여줍니다.

이 경우 적절한 DNS 서버가 구성되어 있는지 확인합니다. Cisco는 nslookup 전문 CLI에서:

root@ftd01:~# nslookup api-sse.cisco.com

;; connection timed out; no servers could be reached

구성된 DNS에 도달하지 않았음이 출력에 표시됩니다. DNS 설정을 확인하려면 show network 명령을 사용합니다:

> show network

===============[ System Information ]===============

Hostname                  : ftd01

DNS Servers               : x.x.x.10

Management port           : 8305

IPv4 Default route

Gateway                   : x.x.x.1

======================[ eth0 ]======================

State                     : Enabled

Link                      : Up

Channels                  : Management & Events

Mode                      : Non-Autonegotiation

MDI/MDIX                  : Auto/MDIX

MTU                       : 1500

MAC Address               : x:x:x:x:9D:A5

----------------------[ IPv4 ]----------------------

Configuration             : Manual

Address                   : x.x.x.27

Netmask                   : 255.255.255.0

Broadcast                 : x.x.x.255

----------------------[ IPv6 ]----------------------

Configuration             : Disabled

===============[ Proxy Information ]================

State                     : Disabled

Authentication            : Disabled

이 예에서는 잘못된 DNS 서버가 사용되었습니다. 다음 명령을 사용하여 DNS 설정을 변경합니다.

> configure network dns x.x.x.11

이 후에 연결을 다시 테스트할 수 있습니다. 이번에는 연결에 성공했습니다.

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* Trying x.x.x.66...

* Connected to api-sse.cisco.com (x.x.x.66) port 443 (#0)

* ALPN, offering http/1.1

* Cipher selection: ALL:!EXPORT:!EXPORT40:!EXPORT56:!aNULL:!LOW:!RC4:@STRENGTH

* successfully set certificate verify locations:

* CAfile: none

CApath: /etc/ssl/certs

* TLSv1.2 (OUT), TLS header, Certificate Status (22):

* TLSv1.2 (OUT), TLS handshake, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Server hello (2):

* TLSv1.2 (IN), TLS handshake, Certificate (11):

* TLSv1.2 (IN), TLS handshake, Server key exchange (12):

* TLSv1.2 (IN), TLS handshake, Request CERT (13):

* TLSv1.2 (IN), TLS handshake, Server finished (14):

* TLSv1.2 (OUT), TLS handshake, Certificate (11):

* TLSv1.2 (OUT), TLS handshake, Client key exchange (16):

* TLSv1.2 (OUT), TLS change cipher, Client hello (1):

* TLSv1.2 (OUT), TLS handshake, Finished (20):

* TLSv1.2 (IN), TLS change cipher, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Finished (20):

* SSL connection using TLSv1.2 / ECDHE-RSA-AES128-GCM-SHA256

* ALPN, server accepted to use http/1.1

* Server certificate:

* subject: C=US; ST=California; L=San Jose; O=Cisco Systems, Inc.; CN=api -sse.cisco.com

* start date: 2019-12-03 20:57:56 GMT

* expire date: 2021-12-03 21:07:00 GMT

* issuer: C=US; O=HydrantID (Avalanche Cloud Corporation); CN=HydrantID S SL ICA G2

* SSL certificate verify result: self signed certificate in certificate c hain (19), continuing anyway.

> GET / HTTP/1.1

> Host: api-sse.cisco.com

> User-Agent: curl/7.44.0

> Accept: */*

>

< HTTP/1.1 403 Forbidden

< Date: Wed, 08 Apr 2020 01:27:55 GMT

< Content-Type: text/plain; charset=utf-8

< Content-Length: 9

< Connection: keep-alive

< Keep-Alive: timeout=5

< ETag: "5e17b3f8-9"

< Cache-Control: no-store

< Pragma: no-cache

< Content-Security-Policy: default-src 'self'

< X-Content-Type-Options: nosniff

< X-XSS-Protection: 1; mode=block

< Strict-Transport-Security: max-age=31536000; includeSubdomains;

SSE 포털에 등록 문제

FMC 및 Cisco Secure Firewall 관리 인터페이스의 SSE URL에 대한 연결이 필요합니다.

연결을 테스트하려면 Firepower CLI 루트 액세스:

curl -v https://api-sse.cisco.com/providers/sse/services/registration/api/v2/clients --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://est.sco.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://eventing-ingest.sse.itd.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://mx01.sse.itd.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

인증서 검사는 다음 명령으로 우회할 수 있습니다.

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* Trying x.x.x.66...

* Connected to api-sse.cisco.com (x.x.x.66) port 443 (#0)

* ALPN, offering http/1.1

* Cipher selection: ALL:!EXPORT:!EXPORT40:!EXPORT56:!aNULL:!LOW:!RC4:@STRENGTH

* successfully set certificate verify locations:

* CAfile: none

CApath: /etc/ssl/certs

* TLSv1.2 (OUT), TLS header, Certificate Status (22):

* TLSv1.2 (OUT), TLS handshake, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Server hello (2):

* TLSv1.2 (IN), TLS handshake, Certificate (11):

* TLSv1.2 (IN), TLS handshake, Server key exchange (12):

* TLSv1.2 (IN), TLS handshake, Request CERT (13):

* TLSv1.2 (IN), TLS handshake, Server finished (14):

* TLSv1.2 (OUT), TLS handshake, Certificate (11):

* TLSv1.2 (OUT), TLS handshake, Client key exchange (16):

* TLSv1.2 (OUT), TLS change cipher, Client hello (1):

* TLSv1.2 (OUT), TLS handshake, Finished (20):

* TLSv1.2 (IN), TLS change cipher, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Finished (20):

* SSL connection using TLSv1.2 / ECDHE-RSA-AES128-GCM-SHA256

* ALPN, server accepted to use http/1.1

* Server certificate:

* subject: C=US; ST=California; L=San Jose; O=Cisco Systems, Inc.; CN=api -sse.cisco.com

* start date: 2019-12-03 20:57:56 GMT

* expire date: 2021-12-03 21:07:00 GMT

* issuer: C=US; O=HydrantID (Avalanche Cloud Corporation); CN=HydrantID S SL ICA G2

* SSL certificate verify result: self signed certificate in certificate c hain (19), continuing anyway.

> GET / HTTP/1.1

> Host: api-sse.cisco.com

> User-Agent: curl/7.44.0

> Accept: */*

>

< HTTP/1.1 403 Forbidden

< Date: Wed, 08 Apr 2020 01:27:55 GMT

< Content-Type: text/plain; charset=utf-8

< Content-Length: 9

< Connection: keep-alive

< Keep-Alive: timeout=5

< ETag: "5e17b3f8-9"

< Cache-Control: no-store

< Pragma: no-cache

< Content-Security-Policy: default-src 'self'

< X-Content-Type-Options: nosniff

< X-XSS-Protection: 1; mode=block

< Strict-Transport-Security: max-age=31536000; ,;

참고:  403 Forbidden 이 메시지는 테스트에서 전송된 매개 변수가 SSE의 예상과 다르다는 것을 의미하지만, 이는 연결을 검증하기에 충분하다는 것을 입증합니다.

SSEConnector 상태 확인

표시된 대로 커넥터 속성을 확인합니다.

# more /ngfw/etc/sf/connector.properties

registration_interval=180

connector_port=8989

connector_fqdn=api-sse.cisco.com

SSEConnector와 EventHandler 간의 연결을 확인하려면 이 명령을 사용합니다. 다음은 잘못된 연결의 예입니다.

root@firepower:/etc/sf# netstat -anlp | grep EventHandler_SSEConnector.sock

unix 2 [ ACC ] STREAM LISTENING 3022791165 11204/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.sock

설정된 연결의 예에서 스트림 상태가 연결되었는지 확인합니다.

root@firepower:/etc/sf# netstat -anlp | grep EventHandler_SSEConnector.sock

unix 2 [ ACC ] STREAM LISTENING 382276 7741/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.sock

unix 3 [ ] STREAM CONNECTED 378537 7741/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.soc

SSE 포털 및 CTR으로 전송된 데이터 확인

Cisco Secure Firewall 디바이스에서 SSE로 이벤트를 전송하려면 https://eventing-ingest.sse.itd.cisco.com을 사용하여 TCP 연결을 설정해야 합니다.

다음은 SSE 포털과 Cisco Secure Firewall 간에 설정되지 않은 연결의 예입니다.

root@firepower:/ngfw/var/log/connector# lsof -i | grep conn

connector 60815 www 10u IPv4 3022789647 0t0 TCP localhost:8989 (LISTEN)

connector 60815 www 12u IPv4 110237499 0t0 TCP firepower.cisco.com:53426->ec2-100-25-93-234.compute-1.amazonaws.com:https (SYN_SENT)

의 connector.log 로그:

time="2020-04-13T14:34:02.88472046-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.246:443: getsockopt: connection timed out"

time="2020-04-13T14:38:18.244707779-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

time="2020-04-13T14:42:42.564695622-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.246:443: getsockopt: connection timed out"

time="2020-04-13T14:47:48.484762429-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

time="2020-04-13T14:52:38.404700083-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

참고: x.x.x.246 및 1x.x.x.246에 표시된 IP 주소가 https://eventing-ingest.sse.itd.cisco.com에 속할 수 있습니다. IP 주소 대신 URL을 기준으로 SSE 포털에 대한 트래픽을 허용하는 것이 좋습니다.

이 연결이 설정되지 않으면 이벤트가 SSE 포털로 전송되지 않습니다. 다음은 Cisco Secure Firewall과 SSE 포털 간에 설정된 연결의 예입니다.

root@firepower:# lsof -i | grep conn

connector 13277   www   10u  IPv4 26077573      0t0  TCP localhost:8989 (LISTEN)

connector 13277   www   19u  IPv4 26077679      0t0  TCP x.x.x.200:56495->ec2-35-172-147-246.compute-1.amazonaws.com:https (ESTABLISHED)