Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Netwerkdiagram

Conventies

RADIUS-verificatie instellen via de cache Engine-procedure

Verifiëren

Problemen oplossen

Opdrachten voor troubleshooting

Gerelateerde informatie

Inleiding

Dit document bevat instructies hoe u RADIUS-verificatie kunt configureren via de Cache Engine aan Cisco Secure Access Control Server (ACS) voor Microsoft Windows NT. Web Cache Communication Protocol, versie 2 (WCCPv2), moet u deze procedure correct uitvoeren. Raadpleeg de modus Web Cache Communication Protocol, versie 2, op een Cisco Cache Engine en router voor meer informatie over WCCP, versie 2.

Voorwaarden

Vereisten

Zorg er voordat u deze configuratie probeert voor dat u aan deze vereisten voldoet:

- Bekendheid met Cisco Secure ACS voor Windows of UNIX.

- Bekendheid met de configuratie van WCCPv2 op zowel router als cache Engine.

Gebruikte componenten

De informatie in dit document is gebaseerd op de volgende software- en hardware-versies:

- Cisco Cache Engine 505 in een labomgeving met geklaarde configuraties

- Cisco 2600 router

- Cisco Cache Engine-softwarerelease 2.3.1

- Cisco IOS®-softwarerelease 12.1(3)T3

- Cisco Secure ACS voor Microsoft Windows NT/2000-servers

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u de potentiële impact van elke opdracht begrijpen.

Netwerkdiagram

Het netwerk in dit document is als volgt opgebouwd:

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

RADIUS-verificatie instellen via de cache Engine-procedure

Gebruik deze stappen om de Cache Engine voor RADIUS-verificatie te configureren:

1. Configureer de Cache Engine als de netwerktoegangsserver (NAS) in Cisco Secure ACS voor Windows NT.

2. Configureer de gebruikersinformatie in Cisco Secure ACS voor Windows NT.

3. Configureer de cache Engine voor RADIUS en specificeer de host en de belangrijke informatie.

radius-server host 172.18.124.106

radius-server key cisco123

4. Configureer de router voor WCCP.

Uw opdrachtregels voor de Cache Engine moeten hier ongeveer op lijken:

cepro#configure terminal

!--- Enter configuration commands, one per line. !--- End with CNTL/Z.

cepro(config)#radius-server host 172.18.124.106

cepro(config)#radius-server key cisco123

cepro#

Dit is de Cache Engine/NAS-configuratie op Cisco Secure ACS voor Windows NT:

Dit is de pagina Gebruiker Setup op Cisco Secure ACS voor Windows NT:

Verifiëren

Deze sectie verschaft informatie die u kunt gebruiken om te bevestigen dat uw configuratie correct werkt.

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

Cache Engine opdrachten:

- Laat versie zien—Hier wordt de softwareversie weergegeven die op de Cache Engine wordt uitgevoerd.

- Laat hardware zien - Hier wordt zowel de softwareversie als het hardwaretype op de Cache Engine weergegeven.

- Laat in werking stellen-configuratie-Toont de eigenlijke actieve configuratie op de Cache Engine zien.

- toon statistiek van gebruik van statistiek http://displays.

- Straalbegin tonen [alle | primair | secondaire—Beeldverificatiestatistieken voor de primaire en secundaire RADIUS-servers.

Dit is voorbeeldopdrachtoutput van de opdracht show versie:

cepro#show version

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 3 hours, 52 minutes, 33 seconds.

System booted from "flash"

Dit is voorbeeldopdrachtoutput van de opdracht tonen hardware:

cepro#show hardware

Cisco Cache Engine

Copyright (c) 1986-2001 by Cisco Systems, Inc.

Software Release: CE ver 2.31 (Build: FCS  02/16/01)

Compiled: 11:20:14 Feb 22 2001 by bbalagot

Image text-base 0x108000, data_base 0x437534

System restarted by Reload

The system has been up for 3 hours, 52 minutes, 54 seconds.

System booted from "flash"

Cisco Cache Engine CE505 with CPU AMD-K6 (model 8) (rev. 12) AuthenticAMD

2 Ethernet/IEEE 802.3 interfaces

1 Console interface.

134213632 bytes of Physical Memory

131072 bytes of ROM memory.

8388608 bytes of flash memory.

List of disk drives:

/c0t0d0  (scsi bus 0, unit 0, lun 0)

Dit is steekproefuitvoer van het tonen in werking stellen-beslist bevel:

cepro#show running-config

Building configuration...

Current configuration:

!

!

logging recycle 64000

logging trap information

!

user add admin uid 0  password 1 "eeSdy9dcy"  capability admin-access

!

!

!

hostname cepro

!

interface ethernet 0

ip address 10.27.2.2 255.255.255.0

ip broadcast-address 10.27.2.255

exit

!

!

interface ethernet 1

exit

!

ip default-gateway 10.27.2.1

ip name-server 161.44.11.21

ip name-server 161.44.11.206

ip domain-name cisco.com

ip route 0.0.0.0 0.0.0.0 10.27.2.1

cron file /local/etc/crontab

!

bypass timer 1

!--- Specify the router list for use with WCCPv2.

wccp router-list 1 10.27.2.1 172.18.124.211

!--- Instruct the router to run web cache service with WCCPv2.

wccp web-cache router-list-num 1

!--- WCCPv2 enabled.

wccp version 2

!

!--- RADIUS Server host and port is defined.

radius-server host 172.18.124.106 auth-port 1645

radius-server host 172.18.124.103 auth-port 1645

!--- RADIUS key defined.

radius-server key ****

authentication login local enable

authentication configuration local enable

transaction-logs enable

rule no-cache url-regex .*cgi-bin.*

rule no-cache url-regex .*aw-cgi.*

!

!

end

cepro#

Routeropdrachten:

- toon in werking stellen-configuratie-Toont de eigenlijke actieve configuratie op de router.

- ip wcp-displays alle geregistreerde services.

- Toon ip wcp <service-id> detail-displays de WCCP emmer-distributie voor elk cache in het cluster. Bijvoorbeeld, toon ip web-cache detail.

Dit is steekproefuitvoer van het tonen in werking stellen-beslist bevel:

33-ns-gateway#show running-config

Building configuration...

Current configuration:

!

version 12.1

service timestamps debug datetime msec

service timestamps log datetime msec

no service password-encryption

!

hostname 33-Ns-gateway

!

logging buffered 64000 debugging

enable secret 5 $1$IWJr$nI.NcIr/b9DN7jEQQC17R/

!

!

!

!

!

ip subnet-zero

!--- WCCP enabled.

ip wccp web-cache

ip cef

no ip domain-lookup

ip domain-name testdomain.com

ip name-server 161.44.11.21

ip name-server 161.44.11.206

!

!

!

!

interface Ethernet0/0

ip address 10.1.3.50 255.255.255.0

no ip route-cache cef

!

interface Ethernet1/0

description interface to the CE .5

bandwidth 100

ip address 10.27.2.1 255.255.255.0

full-duplex

!

interface Ethernet1/1

description inter to DMZ

ip address 172.18.124.211 255.255.255.0

!--- Configure the interface to enable the router !--- to verify that the appropriate !--- packets are redirected to the cache engine.

ip wccp web-cache redirect out

no ip route-cache cef

no ip route-cache

no ip mroute-cache

!

interface Ethernet1/2

description Preconfigured for recreates 10.27.3.0/24 net

ip address 10.27.3.1 255.255.255.0

no ip route-cache cef

!

interface Ethernet1/3

no ip address

shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 172.18.124.1

no ip http server

!

!

line con 0

exec-timeout 0 0

transport input none

line aux 0

exec-timeout 0 0

line vty 0 4

exec-timeout 0 0

password ww

login

!

end

33-Ns-gateway#

Problemen oplossen

Deze sectie bevat informatie waarmee u problemen met de configuratie kunt oplossen.

Opdrachten voor troubleshooting

Bepaalde opdrachten met show worden ondersteund door de tool Output Interpreter (alleen voor geregistreerde klanten). Hiermee kunt u een analyse van de output van opdrachten met show genereren.

Opmerking: Voordat u debug-opdrachten afgeeft, raadpleegt u Belangrijke informatie over debug-opdrachten.

Cache Engine opdrachten:

- debug van verificatie allemaal — Debugs de authenticatie.

- debug straal alle-displays Web interface RADIUS-module debug.

- type var/log/translog/working.log - verifieert dat URL's gecached zijn en dat de gebruiker tot de pagina's toegang heeft. Alle andere typen berichten moeten worden doorverwezen naar Cisco Technical Support voor meer informatie. Het meest voorkomende type foutmeldingen in dit logbestand is authenticatie mislukt vanwege onbekende gebruiker of de onjuiste servertoets.

Dit is voorbeeldopdracht uitvoer van de debug straal straal all en debug authenticatie alle opdrachten:

RadiusCheck(): Begin

RadiusCheck(): Begin

RadiusCheck(): Begin

RadiusBuildRequest(): Begin

RadiusBuildRequest(): Begin

RadiusBuildRequest(): Begin

[82] User-Name = "chbanks"

[82] User-Name = "chbanks"

[82] User-Name = "chbanks"

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-IP-Address = 10.27.2.2

[82] NAS-Port = 80

[82] NAS-Port = 80

[82] NAS-Port = 80

RadiusAuthenticate(): Begin

RadiusAuthenticate(): Begin

RadiusAuthenticate(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

UpdatePassword(): Begin

UpdatePassword(): Begin

UpdatePassword(): Begin

[82] radsend: Request to 172.18.124.106 id=1, length=171

[82] radsend: Request to 172.18.124.106 id=1, length=171

[82] radsend: Request to 172.18.124.106 id=1, length=171

RadiusReplyValidate(): Begin

RadiusReplyValidate(): Begin

RadiusReplyValidate(): Begin

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): [82] Received 26 byte message back

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

RadiusReplyValidate(): Got a valid response from server 172.18.124.106.

DecodeReply(): Begin

DecodeReply(): Begin

DecodeReply(): Begin

DecodeReply: WEB_YES_BLOCKING default

DecodeReply: WEB_YES_BLOCKING default

DecodeReply: WEB_YES_BLOCKING default

RadiusCheck(): WEB_YES_BLOCKING

RadiusCheck(): WEB_YES_BLOCKING

RadiusCheck(): WEB_YES_BLOCKING

RemoteUserAdd(): Begin

RemoteUserAdd(): Begin

RemoteUserAdd(): Begin

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAdd(): Updated remote user chbanks

RemoteUserAuthenticate(): Begin

RemoteUserAuthenticate(): Begin

RemoteUserAuthenticate(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgGetRadiusInfo(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): Begin

CfgRadiusGetExcludeState(): flag  = 0

CfgRadiusGetExcludeState(): flag  = 0

CfgRadiusGetExcludeState(): flag  = 0

RemoteUserUpdate(): Begin

RemoteUserUpdate(): Begin

RemoteUserUpdate(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): Begin

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptState(): flag  = 1

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): Begin

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

CfgRadiusGetMultipleUserPromptTimeout(): lMultipleUserPromptTimeout = 25

fsgetUsrInfoforIpAddr_radius will be called

fsgetUsrInfoforIpAddr_radius will be called

fsgetUsrInfoforIpAddr_radius will be called

RemoteUserUpdate() returned true

RemoteUserUpdate() returned true

RemoteUserUpdate() returned true

Routeropdracht:

- Toon ip wcp-Toont mondiale WCCP-statistieken.

Gerelateerde informatie

- Verbeteringen in WCCP

- Web Cache Communication Protocol, versie 2

- Technische ondersteuning - Cisco-systemen