Inhoud

Inleiding

Achtergrondinformatie

overzichtstabel SMU

FPD upgrade-MOP

Gebruik case. Systeem met Cisco IOS-XR release 7.1.2 en indien nodig SMUS geactiveerd

XR VM

sysadmin

Controleer FPD versies op de RP’s

Controleer TAM Area op beide RP’s (evalueer de verwijdering van de sectie)

RP

RP1

Voorbeeld van gecorrumpeerd TAM-geheugen

Voer IOFPGA-upgrade uit op beide RP’s

Verifiëren

Herladen van de RP en Standby RPs voor IOFPGA-upgrade om te voltooien

Controleer de ADM-versie

Andere FPD-upgrade uitvoeren op beide RP’s

1. ADM

2. Start

3. SATA

Controleer de upgrades

Power Cycle Procedure voor andere FPD-upgrade

Controleer de FPD-versies

Controleer de ADM-versie

Extra PDF-bestanden op andere locaties upgraden (indien aanwezig)

Inleiding

Dit document beschrijft hoe u situaties kunt voorkomen waarin Cisco NCS 560 routeprocessor (RP) na een herlading of een stroomcyclus niet meer reageert.

Achtergrondinformatie

In de meeste gevallen zijn de NCS 560-implementaties op afgelegen locaties, in grote aantallen, en waar menselijke interventie tot een minimum moet worden beperkt.

Bij deze implementaties is het ook belangrijk te voldoen aan de verplichte installatie-eisen van de SMU op basis van de geïnstalleerde release.

Opmerking: Vanaf Cisco IOS XR release 7.2.2 en verder hoeft u geen SMU's meer afzonderlijk te installeren.

overzichtstabel SMU

IOS XR versie

SMU

Koppelen

Opmerkingen

6.6.3

CSCv69762 (sysadmin)

CSCv26907 (sysadmin)

CSCv8955 (sysadmin)

CSCvw 42910 (XR)

CSCvw 5238 (XR)

verbinding

7.0.1

CSCvw 42910 (XR)

CSCvw 5238 (XR)

CSCv69762 (sysadmin)

verbinding

Het is verplicht over te stappen op de uitgebreide onderhoudsrelease (EMR) van dezelfde kleine release. Bijvoorbeeld, IOS XR 7.0.2.

In deze release is geen oplossing voor het TAM-gebied corruptie beschikbaar.

7.0.2

CSCv69762 (sysadmin)

CSCv26907 (sysadmin)

CSCv480-56 (sysadmin)

CSCvw 42910 (XR)

CSCvw 5238 (XR)

verbinding

7.1.1

CSCv41516 (sysadmin)

CSCv69762 (sysadmin)

CSCv26907 (sysadmin)

CSCvw 42910 (XR)

CSCvw 5238 (XR)

verbinding

Het is raadzaam naar het EMR te verhuizen en dezelfde lichte release vrij te geven. Bijvoorbeeld IOS XR 7.1.2.

7.1.2

CSCv41516 (sysadmin)

CSCv69762 (sysadmin)

CSCv26907 (sysadmin)

CSCvw 42910 (XR)

CSCvw 5238 (XR)

verbinding

7.2.1

CSCv41516 (sysadmin)

CSCv69762 (sysadmin)

CSCv26907 (sysadmin)

CSCvw 42910 (XR)

CSCvw 5238 (XR)

verbinding

FPD upgrade-MOP

FPD's moeten worden bijgewerkt om er zeker van te zijn dat FPD's altijd bij een versie staan die gelijk is aan of hoger is dan de minimale vereiste versie voor die Cisco IOS® XR-release.

ADM

1.06

IOFPGA

0.64

Begin

0.16

In dit document wordt ervan uitgegaan dat:

- RP0 is actieve RP

- RP1 is de Standby RP

de herinnering voor verschillende plaatsen zodat alle opdrachten om door de verschillende plaatsen te navigeren worden weggelaten.

1. XR - RP0

RP/0/RP0/CPU0:ios#

2. XR - RP1

RP/0/RP1/CPU0:ios#

3. sysadmin - RP0

sysadmin-vm:0_RP0#

4. sysadmin - RP1

sysadmin-vm:0_RP1#

5. sysadmin - RP0 shell

[sysadmin-vm:0_RP0:~]$

6. sysadmin - RP1 shell

[sysadmin-vm:0_RP1:~]$

Gebruik case. Systeem met Cisco IOS-XR release 7.1.2 en indien nodig SMUS geactiveerd

Deze kleine en middelgrote ondernemingen moeten actief zijn en zich inzetten voor het systeem voordat dit proces op gang komt.

XR VM

RP/0/RP0/CPU0:ios#show install active summary

Active Packages: 10

ncs560-xr-7.1.2 version=7.1.2 [Boot image]

ncs560-mcast-2.0.0.0-r712

ncs560-mgbl-2.0.0.0-r712

ncs560-mpls-1.0.0.0-r712

ncs560-mpls-te-rsvp-2.0.0.0-r712

ncs560-ospf-2.0.0.0-r712

ncs560-k9sec-2.1.0.0-r712

ncs560-iosxr-fwding-2.1.0.1-r712.CSCvp67225

ncs560-os-support-2.1.0.1-r712.CSCvv41516

cisco-klm-rsp4-0.1.p1-r0.0.r712.CSCvt26907  .xr

sysadmin

sysadmin-vm:0_RP0# show install active summary

Active Packages: 4

ncs560-sysadmin-7.1.2 version=7.1.2 [Boot image]

ncs560-sysadmin-ncs560-7.1.2.1-r712.CSCvv41516

cisco-klm-rsp4-0.1.p1-r0.0.r712.CSCvt26907  .admin

cisco-klm-rsp4-0.1.p1-r0.0.r712.CSCvt26907  .host

Controleer FPD versies op de RP’s

RP/0/RP0/CPU0:ios#show hw-module fpd

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP0      N560-RSP4-E           0.0   IOFPGA               NEED UPGD  0.53    0.53

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP0      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/RP1      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP1      N560-RSP4-E           0.0   IOFPGA               NEED UPGD  0.53    0.53

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP1      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Controleer TAM Area op beide RP’s (evalueer de verwijdering van de sectie)

Het is belangrijk ervoor te zorgen dat het TAM-gebied niet wordt gecorrumpeerd; anders zouden een IOFPGA-, FPD-upgrade en daaropvolgende herladingen kunnen leiden tot een RMA. Met deze MOP, aangezien FPD versie 0.64 of hoger in gebruik is, leidt dit IOFPGA FPD-upgradeproces en RP-herlading tot herstel van de TAM-corruptie.

RP

sysadmin-vm:0_RP0# show control-driver info location 0/RP0

...

Card view from local RP:

TAM Memory is not corrupted

Can proceed with IOFPGA upgrade if required

...

RP1

sysadmin-vm:0_RP0# show control-driver info location 0/RP1

...

Card view from local RP:

TAM Memory is not corrupted

Can proceed with IOFPGA upgrade if required

...

Opmerking: Als het TAM-geheugen beschadigd is, is dit geen probleem als de beoogde IOFPGA-versie 0,64 of hoger is.

Voorbeeld van gecorrumpeerd TAM-geheugen

sysadmin-vm:0_RP1# show control-driver info location 0/RP0

<snip>

Card view from local RP:

TAM Memory is corrupted

Do not proceed with IOFPGA upgrade

<snip>

Opmerking: Als aan alle voorwaarden in dit document is voldaan, kunt u de upgrade uitvoeren. De "Ga niet verder met de IOFPGA-upgrade" verwijst naar de IOFPGA-versie eerder dan 0,64.

Voer IOFPGA-upgrade uit op beide RP’s

RP/0/RP0/CPU0:ios#upgrade hw-module location all fpd IOFPGA

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP0/CPU0:RONALDO-RF2a#0/RP0/ADMIN0:Oct 16 15:19:26.609 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              IOFPGA               FALSE

0/RP0/ADMIN0:Oct 16 15:19:26.610 CEST: fpdserv[4356]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              IOFPGA               FALSE

Verifiëren

RP/0/RP0/CPU0:ios#show hw-module fpd

Fri Oct 16 15:22:11.256 CEST

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP0      N560-RSP4-E           0.0   IOFPGA               RLOAD REQ  0.53    0.64

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP0      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/RP1      N560-RSP4-E           0.0   ADM                  NEED UPGD  1.04    1.04

0/RP1      N560-RSP4-E           0.0   IOFPGA               RLOAD REQ  0.53    0.64

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         NEED UPGD  0.15    0.15

0/RP1      N560-RSP4-E           0.0   SATA                 NEED UPGD  1.30    1.30

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Herladen van de RP en Standby RPs voor IOFPGA-upgrade om te voltooien

Eerst moet u de stand-by RP opnieuw laden:

sysadmin-vm:0_RP0# hw-module location 0/RP1 reload

Reload hardware module ? [no,yes] yes

Nadat de redundantie wordt hersteld, herload de actieve RP (RP0) (het veroorzaakt een failover):

sysadmin-vm:0_RP0# hw-module location 0/RP0 reload

Reload hardware module ? [no,yes] yes

Controleer de ADM-versie

Op de nieuwe actieve RP (RP1):

[sysadmin-vm:0_RP1:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.2

Bootloader Version : 0.0.9

Config Version : 1.4

Op de nieuwe stand-by RP (RP0):

[sysadmin-vm:0_RP0:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.2

Bootloader Version : 0.0.9

Config Version : 1.4

Andere FPD-upgrade uitvoeren op beide RP’s

1. ADM

RP/0/RP1/CPU0:ios#upgrade hw-module location all FPd ADM

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP1/CPU0:RONALDO-RF2a#0/RP1/ADMIN0:Oct 16 15:57:14.332 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              ADM                  FALSE

0/RP1/ADMIN0:Oct 16 15:57:14.333 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              ADM                  FALSE

2. Start

RP/0/RP1/CPU0:ios#upgrade hw-module location all FPD PRIMARY-BIOS

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP1/CPU0:RONALDO-RF2a#0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              PRIMARY-BIOS         FALSE

0/RP1/ADMIN0:Oct 16 16:00:29.257 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              PRIMARY-BIOS         FALSE

3. SATA

RP/0/RP1/CPU0:ios#upgrade hw-module location all FPD SATA

upgrade command issued (use "show hw-module fpd" to check upgrade status)

RP/0/RP1/CPU0:RONALDO-RF2a#0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Upgrade for the following FPDs has been committed:

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : Location           FPD name             Force

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : ==================================================

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP1              SATA                 FALSE

0/RP1/ADMIN0:Oct 16 16:02:06.472 CEST: fpdserv[4503]: %INFRA-FPD_Manager-1-UPGRADE_ALERT : 0/RP0              SATA                 FALSE

Controleer de upgrades

RP/0/RP1/CPU0:ios#show hw-module fpd

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  RLOAD REQ  1.04    1.04

0/RP0      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         RLOAD REQ  0.15    0.16

0/RP0      N560-RSP4-E           0.0   SATA                 RLOAD REQ  1.30    2.10

0/RP1      N560-RSP4-E           0.0   ADM                  RLOAD REQ  1.04    1.04

0/RP1      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         RLOAD REQ  0.15    0.16

0/RP1      N560-RSP4-E           0.0   SATA                 RLOAD REQ  1.30    2.10

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Power Cycle Procedure voor andere FPD-upgrade

Opmerking: Als de ADM firmware versie 1.14.2 is, moet u alle bestanden synchroniseren op alle VMs/host voordat u het herloadscript gebruikt.

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.0.1 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.0.4 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.4.4 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.4.1 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.4.1 chvrf 0 ssh 10.0.2.2 sync

[sysadmin-vm:0_RP1:~]$chvrf 0 ssh 192.0.0.1 chvrf 0 ssh 10.0.2.2 sync

Opmerking: Er is geen uitvoer voor deze opdrachten.

Zo laadt u het chassis opnieuw op:

[sysadmin-vm:0_RP1:~]$/opt/cisco/calvados/sbin/reboot_system.sh

Initiating power-cycle of 0/RP0

Initiating power-cycle of 0/RP1

Opmerking: Als de ADM firmware versie 1.14.3 is, moeten FPD's op RP opnieuw worden geladen.

Eerst moet u de stand-by RP (RP0) opnieuw laden:

sysadmin-vm:0_RP1# hw-module location 0/RP0 reload

Reload hardware module ? [no,yes] yes

Nadat overtolligheid wordt hersteld, herload de actieve RP (RP1) (het veroorzaakt een failover):

sysadmin-vm:0_RP1# hw-module location 0/RP1 reload

Reload hardware module ? [no,yes] yes

Controleer de FPD-versies

RP/0/RP0/CPU0:ios#show hw-module fpd

Fri Oct 16 16:24:18.849 CEST

FPD Versions

=================

Location   Card type             HWver FPD device       ATR Status   Running Programd

-----------------------------------------------------------------------------------

0/5        A900-IMA8Z            0.0   IMFPGA               NEED UPGD 17.02   17.02

0/14       A900-IMA8CS1Z-M       0.0   IMFPGA               CURRENT    1.95    1.95

0/RP0      N560-RSP4-E           0.0   ADM                  CURRENT    1.06    1.06

0/RP0      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP0      N560-RSP4-E           0.0   PRIMARY-BIOS         CURRENT    0.16    0.16

0/RP0      N560-RSP4-E           0.0   SATA                 CURRENT    2.10    2.10

0/RP1      N560-RSP4-E           0.0   ADM                  CURRENT    1.06    1.06

0/RP1      N560-RSP4-E           0.0   IOFPGA               CURRENT    0.64    0.64

0/RP1      N560-RSP4-E           0.0   PRIMARY-BIOS         CURRENT    0.16    0.16

0/RP1      N560-RSP4-E           0.0   SATA                 CURRENT    2.10    2.10

0/FT0      A907-FAN-E            1.0   PSOC                 CURRENT    1.65    1.65

Controleer de ADM-versie

[sysadmin-vm:0_RP0:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.3

Bootloader Version : 0.0.9

Config Version : 1.6

[sysadmin-vm:0_RP1:~]$/opt/cisco/calvados/sbin/show_adm_version.sh

ADM 1266 Version info

Firmware Version : 1.14.3

Bootloader Version : 0.0.9

Config Version : 1.6

Extra PDF-bestanden op andere locaties upgraden (indien aanwezig)

RP/0/RP0/CPU0:ios#upgrade hw-module location 0/5 FPD IMFPGA

Fri Oct 16 16:28:15.006 CEST

upgrade command issued (use "show hw-module fpd" to check upgrade status)