Inhoud

Inleiding

Gebruikte SSL-ciphers

Gerelateerde informatie

Gerelateerde Cisco Support Community-discussies

Inleiding

Dit document beschrijft welke SSL-telefoons in gebruik zijn bij de Cisco Registered Service (CRES) met betrekking tot de Cisco Email Security Appliance (ESA).

Gebruikte SSL-ciphers

Cipher Suites (SSL 3+-series in door de server geprefereerde volgorde; afgekeurde en SSL 2-series aan het eind):

TLS_RSA_MET_AES_128_GCM_SHA256 (0x9c) 128

TLS_RSA_MET_RC4_128_SHA (0x5) WEAK 128

TLS_RSA_MET_AES_256_GCM_SHA384 (0x9d) 256

TLS_RSA_MET_AES_256_CBC_SHA256 (0x3d) 256

TLS_RSA_MET_AES_256_CBC_SHA (0x35) 256

TLS_RSA_MET_CAMELLIA_256_CBC_SHA (0x84) 256

TLS_RSA_MET_AES_128_CBC_SHA256 (0x3c) 128

TLS_RSA_MET_AES_128_CBC_SHA (0x2f) 128

TLS_RSA_MET_CAMELLIA_128_CBC_SHA (0x41) 128

TLS_RSA_MET_3DES_EDE_CBC_SHA (0xa) 112

Volledige informatie kan op elk moment worden verkregen bij SSL Labs: SSL Report:  res.cisco.com (184.94.241.74)

Gerelateerde informatie

- Cisco e-mail security applicatie - eindgebruikershandleidingen

- Technische ondersteuning en documentatie – Cisco Systems