Inhoud

Inleiding

Voorwaarden

Vereisten

Gebruikte componenten

Conventies

Achtergrondinformatie

Invorderingsprocedure

Gerelateerde informatie

Inleiding

Dit document beschrijft de wachtwoordherstelprocedure voor Cisco Catalyst Layer 2 en Cisco Catalyst Layer 3 vaste configuratie-switches.

Voorwaarden

Vereisten

Er zijn geen specifieke vereisten van toepassing op dit document.

Gebruikte componenten

Dit document is gebaseerd op de switches 2900XL/3500XL, 2940, 2950/2955, 2960, 2970, 3550, 3560 en 3750.

De informatie in dit document is gebaseerd op de apparaten in een specifieke laboratoriumomgeving. Alle apparaten die in dit document worden beschreven, hadden een opgeschoonde (standaard)configuratie. Als uw netwerk live is, moet u zorgen dat u de potentiële impact van elke opdracht begrijpt.

Conventies

Raadpleeg Cisco Technical Tips Conventions (Conventies voor technische tips van Cisco) voor meer informatie over documentconventies.

Achtergrondinformatie

In dit document wordt de procedure voor wachtwoordherstel bij Cisco Catalyst 2900XL/3500XL, 2940, 2950/2955, 2960 en 2970 Series Layer 2-switches met een vaste configuratie en bij Cisco Catalyst 3550, 3560 en 3750 Series Layer 3-switches met een vaste configuratie beschreven.

Invorderingsprocedure

U herstelt het wachtwoord als volgt:

1. Sluit een terminal of een computer met terminalemulatie (bijvoorbeeld Hyper Terminal) aan op de consolepoort van de switch.

Gebruik deze terminalinstellingen:

- Bits per seconde (baud): 9600

- Gegevensbits: 8

- Pariteit: geen

- Stop bits: 1

- Flow Control: Xon/Xoff

Opmerking: raadpleeg voor meer informatie over bekabeling en aansluiting van een terminal op de consolepoort een terminal op de consolepoort op Catalyst-Switches aansluiten.

2. Koppel de voedingskabel los.

3. Macht de switch en breng het aan de switch: prompt:

Ga bij 2900XL, 3500XL, 2940, 2950, 2960, 2970, 3550, 3560 en 3750 Series switches als volgt te werk:

Houd de knop Mode links op het voorpaneel ingedrukt terwijl u de voedingskabel opnieuw op de switch aansluit.

Catalyst Series switch

LED-gedrag en actie bij loslaten knop Mode

2900XL, 3500XL, 3550

Laat de knop Mode los wanneer de LED overPort1xuitgaat.

2940, 2950

Laat de knop Mode na ongeveer 5 seconden los wanneer de status-LED (STAT) uit gaat. Wanneer u de knop Modus loslaat, knippert de SYSTLED amber.

2960, 2970

Laat de knop Mode los wanneer de SYSTLED in amber knippert en wordt vervolgens effen groen gedraaid. Wanneer u de knop Modus loslaat, knippert de SYSTLED groen.

3560, 3750

Laat de knop Mode na ongeveer 15 seconden los wanneer het systeem-LED SYST continu groen blijft branden. Wanneer u de knop Mode los laat, gaat het systeem-LED SYST groen knipperen.

Opmerking: de LED-positie kan enigszins variëren op basis van het model.

Catalyst 3524XL

Catalyst 3524XL

Catalyst 2950-24

Catalyst 2950-24

Alleen voor 2955 Series switches:

De Catalyst 2955 Series switches gebruiken geen externe knop Mode voor wachtwoordherstel. In plaats daarvan gebruikt de switch-bootloader de break-key-detectie om de automatische bootsequentie te stoppen voor de wachtwoordhersteldoeleinden. De toetscombinatie voor een break hangt af van de gebruikte terminaltoepassing en het gebruikte besturingssysteem. Hyperterm die op Windows 2000 draait, gebruikt Ctrl + Break . Op een werkstation waarop UNIX wordt uitgevoerd, is Ctrl-C de break-toets. Raadpleeg Standaardtoetscombinaties voor een break bij wachtwoordherstel voor meer informatie.

Het volgende voorbeeld gebruikt Hyperterm om in switch te breken: mode op een 2955.

C2955 Boot Loader (C2955-HBOOT-M) Version 12.1(0.0.514), CISCO DEVELOPMENT TEST

VERSION

Compiled Fri 13-Dec-02 17:38 by madison

WS-C2955T-12 starting...

Base ethernet MAC Address: 00:0b:be:b6:ee:00

Xmodem file system is available.

Initializing Flash...

flashfs[0]: 19 files, 2 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 7741440

flashfs[0]: Bytes used: 4510720

flashfs[0]: Bytes available: 3230720

flashfs[0]: flashfs fsck took 7 seconds.

...done initializing flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

*** The system will autoboot in 15 seconds ***

Send break character to prevent autobooting.

!--- Wait until you see this message before !--- you issue the break sequence.

!--- Ctrl+Break is entered using Hyperterm.

The system has been interrupted prior to initializing the flash file system to finish

loading the operating system software:

flash_init

load_helper

boot

switch:

4. Geef de opdracht flash_init uit.

switch: flash_init

Initializing Flash...

flashfs[0]: 143 files, 4 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 3612672

flashfs[0]: Bytes used: 2729472

flashfs[0]: Bytes available: 883200

flashfs[0]: flashfs fsck took 86 seconds

....done Initializing Flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

switch:

!--- This output is from a 2900XL switch. Output from

!--- other switches will vary slightly.

5. Geef de opdracht load_helper uit.

switch: load_helper

switch:

6. Geef de dir flitser uit: opdracht.

Opmerking: Typ een dubbele punt (:) na het branden.

Het bestandssysteem van de switch wordt getoond:

switch: dir flash:

Directory of flash:/

2    -rwx  1803357   <date>               c3500xl-c3h2s-mz.120-5.WC7.bin

!--- This is the current version of software.

4    -rwx  1131      <date>               config.text

!--- This is the configuration file.

5    -rwx  109       <date>               info

6    -rwx  389       <date>               env_vars

7    drwx  640       <date>               html

18   -rwx  109       <date>               info.ver

403968 bytes available (3208704 bytes used)

switch:

!--- This output is from a 3500XL switch. Output from

!--- other switches will vary slightly.

1. Typ rename flash:config.text flash:config.old om de naam van het configuratiebestand te wijzigen.

switch: rename flash:config.text flash:config.old

switch:

!--- The config.text file contains the password

!--- definition.

2. Geef de opstartopdracht uit om het systeem op te starten.

switch: boot

Loading "flash:c3500xl-c3h2s-mz.120-5.WC7.bin"...###############################

################################################################################

######################################################################

File "flash:c3500xl-c3h2s-mz.120-5.WC7.bin" uncompressed and installed, entry po

int: 0x3000

executing...

!--- Output suppressed.

!--- This output is from a 3500XL switch. Output from other switches

!--- will vary slightly.

3. Voer bij de prompt ‘n’ in om het eerste configuratiedialoogvenster te sluiten.

--- System Configuration Dialog ---

At any point you can enter a question mark '?' for help.

Use ctrl-c to abort configuration dialog at any prompt.

Default settings are in square brackets '[]'.

Continue with configuration dialog? [yes/no]: n

!--- Type "n" for no.

Press RETURN to get started.

!--- Press Return or Enter.

Switch>

!--- The Switch> prompt is displayed.

4. Typ en bij de prompt om de enable-modus te activeren.

Switch>en

Switch#

5. Typ rename flash:config.old flash:config.text om de naam van het configuratiebestand te wijzigen naar de oorspronkelijke naam.

Switch#rename flash:config.old flash:config.text

Destination filename [config.text]

!--- Press Return or Enter.

Switch#

6. Kopieer het configuratiebestand naar het geheugen.

Switch#copy flash:config.text system:running-config

Destination filename [running-config]?

!--- Press Return or Enter.

1131 bytes copied in 0.760 secs

Sw1#

Het configuratiebestand is nu opnieuw geladen.

7. Overschrijf de huidige wachtwoorden die u niet kent. Kies een sterk wachtwoord met ten minste één hoofdletter, één cijfer en één speciaal teken.

Opmerking: Overschrijf de wachtwoorden die niet nodig zijn. U hoeft niet alle genoemde wachtwoorden te overschrijven.

Sw1#configure terminal

!--- To overwrite existing secret password

Sw1(config)#enable secret

!--- To overwrite existing enable password

Sw1(config)#enable password

!--- To overwrite existing vty password

Sw1(config)#line vty 0 15

Sw1(config-line)#password

Sw1(config-line)#login

!--- To overwrite existing console password

Sw1(config-line)#line con 0

Sw1(config-line)#password

8. Voer de opdracht write memory uit om de actieve configuratie naar het configuratiebestand te schrijven.

Sw1#write memory

Building configuration...

[OK]

Sw1#

Gerelateerde informatie

- Cisco technische ondersteuning en downloads