Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Problema

Solução

Introduction

Este documento descreve um erro recebido ao implantar um 4.8.0. imagem do trabalhador para a VMware com a Application Centric Infrastructure (ACI).

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas no Cloud Center versão 4.8.0.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Problema

Quando você implanta um 4.8.0. imagem do trabalhador no VMware com ACI, você vê uma das duas mensagens de erro:

ERROR policy.AciSecurityPolicyUtil [threadPoolExecutor-1]  -

External network parameter ECS:L3out:L3Out-EPG is of the wrong format!

or

ERROR policy.AciSecurityPolicyUtil [threadPoolExecutor-1]  -

External network parameter is of the wrong format

Solução

Este é um problema conhecido na 4.8.0. imagem do trabalhador. Ele não consegue entender L3 Out com 3 valores, consulte CORE-15315 (Status: Corrigido na versão 4.8.1.) para obter mais informações.

Esse problema foi resolvido em 4.8.0.1, atualize a imagem do trabalhador para 4.8.0.1 para resolver.