Índice

Introdução

Pré-requisitos

Requisitos

Componentes Utilizados

Convenções

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshooting

Comandos para Troubleshooting

Informações Relacionadas

Introdução

Este documento explica como suportar um Protocolo Ponto a Ponto pelo Cliente Ethernet (PPPoE) em roteadores com Cisco IOS® conectados por uma interface Ethernet a um modem DSL ou ao equipamento das premissas (CPE) DSL de outro fornecedor.

Os ISP fornecem frequentemente seus clientes um modem DSL que tenha uma interface Ethernet a conectar ao segmento de Ethernet do cliente, e uma outra relação para a conectividade de linha DSL. Em tal caso, o modem DSL atua somente como uma ponte se o CPE não é configurável para nenhuns conectividade IP ou recursos aprimorado sobre o DSL. Isto limita sua conectividade para apenas um PC Cliente de PPPoE. Com a adição de um roteador do Cisco IOS conectado aos Ethernet do modem DSL, você pode executar a característica do PPPoE Client IO no roteador Cisco. Isto pode conectar PC múltiplos no segmento de Ethernet conectado ao roteador do Cisco IOS. Com o uso do Cisco IOS roteador, você pode aumentar suas conectividades de DSL e todas as características IO, tais como a Segurança, o Network Address Translation (NAT) e o protocolo de configuração dinâmica host (DHCP) aos host internos.

O recurso PPPoE permite que você inicialize uma sessão PPP em um cliente de Bridging Ethernet simples conectado. As sessões são transportadas pelo enlace ATM por meio de molduras transpostas de Ethernet encapsuladas. Você pode terminar a sessão em um escritório central da portadora de intercâmbio local ou em um Point of Presence ISP.

Pré-requisitos

Requisitos

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- IOS Software release 12.1(1)XB do Cisco 827-4V CPE

- Cisco 2611 Router que executa uma imagem do Cisco IOS Software Release 12.2(2)T1

- Concentrador de acesso universal (UAC) do Cisco 6400 que executa uma imagem do Cisco IOS Software Release 12.1(5)DC1

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos utilizados neste documento foram iniciados com uma configuração (padrão) inicial. Se a sua rede estiver ativa, certifique-se de que entende o impacto potencial de qualquer comando.

Convenções

For more information on document conventions, refer to the Cisco Technical Tips Conventions.

Configurar

Nesta seção, você é presentado com a informação usada a fim configurar as características descritas neste original.

Nota: Para encontrar informações adicionais sobre os comandos usados neste documento, use a Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a configuração de rede mostrada neste diagrama.

Nota: Neste original, a conexão do PPPoE Client é iniciada do roteador Cisco. Esse é o Cisco 2611 Router nessa configuração. O roteador Cisco 827 no diagrama representa o CPE de DSL sem Cisco.

Configurações

Este documento utiliza estas configurações.

- 2611 Router

- Cisco DSL 827 Router

- Cisco 6400 Router

2611 Router

!

hostname pooh

ip host rund 172.17.247.195

!

ip subnet-zero

no ip domain-lookup

!

vpdn enable

no vpdn logging

!

vpdn-group 1

request-dialin

protocol pppoe

!

!

!

!

interface Ethernet0/0

ip address 10.200.56.22 255.255.255.0

ip nat inside

no ip mroute-cache

!

!

!

!

interface Ethernet0/1

no ip address

pppoe enable

pppoe-client dial-pool-number 1

!

interface Dialer1

ip address negotiated

ip nat outside

ip mtu 1492

encapsulation ppp

no ip mroute-cache

dialer pool 1

dialer-group 1

ppp authentication pap

ppp pap sent-username cisco password cisco1

!

ip classless

no ip http server

!

dialer-list 1 protocol ip permit

ip nat inside source list 1 interface Dialer1 overload

ip route 0.0.0.0 0.0.0.0 dialer1

access-list 1 permit 10.200.56.0 0.0.0.255

!

line con 0

exec-timeout 0 0

transport input none

line vty 0 4

login

password ww

!

end

Cisco DSL 827 Router

Building configuration...

Current configuration : 821 bytes

!

version 12.2

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname Chansey

!

!

ip subnet-zero

no ip domain-lookup

!

!

!

interface Ethernet0

no ip address

bridge-group 1

!

interface ATM0

no ip address

no atm ilmi-keepalive

bundle-enable

bridge-group 1

dsl operating-mode auto

!

interface ATM0.1 point-to-point

pvc 53/53

!--- vpi/vci given by the ISP

!

!

ip classless

ip http server

!

bridge 1 protocol ieee

!

line con 0

exec-timeout 0 0

stopbits 1

line vty 0 4

exec-timeout 0 0

password ww

login local

!

scheduler max-task-time 5000

end

Cisco 6400 Router

Current configuration : 3231 bytes

!

version 12.1

no service single-slot-reload-enable

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname alyssa_nrp1

!

logging rate-limit console 10 except errors

aaa new-model

aaa authentication ppp default local

enable password ww

!

username cisco password  cisco1

redundancy

main-cpu

auto-sync standard

no secondary console enable

ip subnet-zero

ip cef

vpdn enable

no vpdn logging

!

vpdn-group cisco

accept-dialin

protocol pppoe

virtual-template 2

!

!

!

!

!

!

!

interface Loopback5

ip address 212.93.195.100 255.255.255.0

!

!

interface ATM0/0/0

no ip address

no ip mroute-cache

load-interval 30

atm pvc 16 0 16 ilmi

no atm ilmi-keepalive

pvc 10/100

!

hold-queue 1000 in

!

interface ATM0/0/0.60 multipoint

pvc 6/60

encapsulation aal5snap

protocol pppoe

!

!

interface Ethernet0/0/1

no ip address

!

interface Ethernet0/0/0

ip address 10.200.56.8 255.255.255.0

!

interface FastEthernet0/0/0

no ip address

full-duplex

!

!

interface Virtual-Template2

ip unnumbered Loopback5

ip mtu 1492

no ip route-cache cef

peer default ip address pool nrp1

ppp authentication pap

!

ip local pool nrp1 212.93.198.1

ip classless

!

!

line con 0

exec-timeout 0 0

password ww

transport input none

line aux 0

line vty 0 4

exec-timeout 0 0

password ww

!

!

end

Verificar

Esta seção fornece informações que você pode usar para confirmar se a sua configuração funciona corretamente.

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

- mostre a sessão toda do vpdn — Informação de sessão de VPDN dos indicadores. Esta informação inclui a relação, o túnel, o username, os pacotes, o estado, e as estatísticas do indicador.

- mostre os Ethernet de interface 0/1 — Indica a informação sobre a interface Ethernet no roteador.

- show interfaces dialer 1 — Indica a informação sobre o discador no roteador.

- show ip local pool nrp1 - Exibe informações sobre o loop local de IP.

- mostre a rota IP — Indica a informação sobre a rota IP no roteador.

Este é o comando show vpdn session all output no Cisco 2611.

pooh#show vpdn session all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

!--- Local MAC address.

local MAC address: 0030.9424.af21,

remote MAC address: 0050.736f.4c37

virtual access interface: Vi1, outgoing interface: Et0/1

599 packets sent, 599 received

9202 bytes sent, 8154 received

!--- Verify that the outgoing interface for the PPPoE session !--- is Ethernet0/1 and the local MAC address that displays is the !--- MAC address of Ethernet0/1. The remote MAC address that displays !--- is the MAC address of the Aggregator device (6400). !--- You can see it on the 6400 as the local MAC address in the !--- show vpdn session on the 6400.

Este é o comando show interface ethernet 0/1 output no Cisco 2611.

pooh#show interface ethernet 0/1

Ethernet0/1 is up, line protocol is up

Hardware is AmdP2, address is 0030.9424.af21 (bia 0030.9424.af21

MTU 1500 bytes, BW 10000 Kbit, DLY 1000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation ARPA, loopback not set

Keepalive set (10 sec)

ARP type: ARPA, ARP Timeout 04:00:00

Last input 00:00:40, output 00:00:01, output hang never

Last clearing of "show interface" counters never

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

739 packets input, 64127 bytes, 0 no buffer

Received 57 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored

0 input packets with dribble condition detected

1153 packets output, 89766 bytes, 0 underruns(1/0/0)

0 output errors, 1 collisions, 1 interface resets

0 babbles, 0 late collision, 2 deferred

0 lost carrier, 0 no carrier

0 output buffer failures, 0 output buffers swapped out

Este é o comando show interfaces dialer 1 output no Cisco 2611.

pooh#show interfaces dialer 1

Dialer1 is up, line protocol is up (spoofing)

Hardware is Unknown

Internet address is 212.93.198.1/32

MTU 1500 bytes, BW 56 Kbit, DLY 20000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

DTR is pulsed for 1 seconds on reset

Interface is bound to Vi1

Last input never, output never, output hang never

Last clearing of "show interface" counters 01:38:43

Input queue: 0/75/0/0 (size/max/drops/flushes); Total output drops: 0

Queueing strategy: weighted fair

Output queue: 0/1000/64/0 (size/max total/threshold/drops)

Conversations  0/0/16 (active/max active/max total)

Reserved Conversations 0/0 (allocated/max allocated)

Available Bandwidth 42 kilobits/sec

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

403 packets input, 6082 bytes

403 packets output, 6978 bytes

Bound to:

Virtual-Access1 is up, line protocol is up

Hardware is Virtual Access interface

MTU 1500 bytes, BW 100000 Kbit, DLY 100000 usec,

reliability 255/255, txload 1/255, rxload 1/255

Encapsulation PPP, loopback not set

Keepalive set (10 sec)

Interface is bound to Di1 (Encapsulation PPP)

LCP Open

Listen: CDPCP

Open: IPCP

Last input 00:00:09, output never, output hang never

Last clearing of "show interface" counters 00:35:16

Queueing strategy: fifo

Output queue 0/40, 0 drops; input queue 0/75, 0 drops

5 minute input rate 0 bits/sec, 0 packets/sec

5 minute output rate 0 bits/sec, 0 packets/sec

430 packets input, 6453 bytes, 0 no buffer

Received 0 broadcasts, 0 runts, 0 giants, 0 throttles

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

430 packets output, 7400 bytes, 0 underruns

0 output errors, 0 collisions, 0 interface resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Este é o comando show vpdn session all output no Cisco 6400.

alyssa_nrp1#show vpdn session  all

%No active L2TP tunnels

%No active L2F tunnels

%No active PPTP tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

local MAC address: 0050.736f.4c37, remote MAC address: 0030.9424.af21

virtual access interface: Vi3, outgoing interface: AT0/0/0, vc: 6/60

495 packets sent, 494 received

7369 bytes sent, 7346 received

Este é o comando show ip local pool nrp1 output no Cisco 6400.

alyssa_nrp1#show ip local pool nrp1

Pool                     Begin           End             Free  In use

nrp1                    212.93.198.1    212.93.198.1       0       1

Available addresses:

None

Inuse addresses:

212.93.198.1       Vi3                         nrp1

Este é o comando show ip route output no Cisco 6400.

alyssa_nrp1#show ip route

Codes: C - connected, S - static, I - IGRP, R - RIP, M - mobile, B - BGP

D - EIGRP, EX - EIGRP external, O - OSPF, IA - OSPF inter area

N1 - OSPF NSSA external type 1, N2 - OSPF NSSA external type 2

E1 - OSPF external type 1, E2 - OSPF external type 2, E - EGP

i - IS-IS, L1 - IS-IS level-1, L2 - IS-IS level-2, ia - IS-IS inter area

* - candidate default, U - per-user static route, o - ODR

P - periodic downloaded static route

Gateway of last resort is 0.0.0.0 to network 0.0.0.0

212.93.198.0/32 is subnetted, 1 subnets

C       212.93.198.1 is directly connected, Virtual-Access3

!--- You have to see the installed route for the remote PPPoE session.

C    212.93.195.0/24 is directly connected, Loopback5

10.0.0.0/8 is variably subnetted, 3 subnets, 2 masks

C       10.200.56.0/24 is directly connected, Ethernet0/0/0

Troubleshooting

Esta seção fornece informações que podem ser usadas para o troubleshooting da sua configuração.

Comandos para Troubleshooting

A Output Interpreter Tool (somente clientes registrados) oferece suporte a determinados comandos show, o que permite exibir uma análise da saída do comando show.

Nota: Antes de emitir comandos de depuração, consulte Informações Importantes sobre Comandos de Depuração.

- eliminação de erros da mostra — Indica a informação sobre debugging no roteador.

Este é o comando show debugging output no Cisco 2611.

pooh#show debugging

PPP:

PPP protocol negotiation debugging is on

VPN:

PPPoE protocol events debugging is on

PPPoE control packets debugging is on

01:54:21:  Sending PADI: Interface = Ethernet0/1

01:54:21: pppoe_send_padi:

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

01:54:21: PPPoE 0: I PADO L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23:  PPPOE: we've got our pado and the pado timer went off

01:54:23: OUT PADR from PPPoE tunnel

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: PPPoE 1: I PADS L:0030.9424.af21 R:0050.736f.4c37 Et0/1

00 30 94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65

00 01 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

01:54:23: IN PADS from PPPoE tunnel

01:54:23: Vi1 Debug: Condition 1, interface Di1 triggered, count 1

01:54:23: %DIALER-6-BIND: Interface Vi1 bound to profile Di1

01:54:23: PPPoE: Virtual Access interface obtained.

01:54:23: %LINK-3-UPDOWN: Interface Virtual-Access1, changed state to up

01:54:23: Vi1 PPP: Treating connection as a callout

01:54:23: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 0 load]

01:54:23: Vi1 PPP: No remote authentication for call-out

01:54:23: Vi1 LCP: O CONFREQ [Closed] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:23: Vi1 LCP: I CONFACK [REQsent] id 1 len 10

01:54:23: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [ACKrcvd] id 2 len 18

01:54:25: Vi1 LCP:    MRU 1492 (0x010405D4)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFNAK [ACKrcvd] id 2 len 8

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP: TIMEout: State ACKrcvd

01:54:25: Vi1 LCP: O CONFREQ [ACKrcvd] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: I CONFREQ [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: O CONFACK [REQsent] id 3 len 18

01:54:25: Vi1 LCP:    MRU 1500 (0x010405DC)

01:54:25: Vi1 LCP:    AuthProto PAP (0x0304C023)

01:54:25: Vi1 LCP:    MagicNumber 0x5C799D85 (0x05065C799D85)

01:54:25: Vi1 LCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 LCP:    MagicNumber 0x30FCDE42 (0x050630FCDE42)

01:54:25: Vi1 LCP: State is Open

01:54:25: Vi1 PPP: Phase is AUTHENTICATING, by the peer [0 sess, 0 load]

01:54:25: Vi1 PAP: O AUTH-REQ id 4 len 18 from "cisco"

01:54:25: Vi1 PAP: I AUTH-ACK id 4 len 5

01:54:25: Vi1 PPP: Phase is UP [0 sess, 0 load]

01:54:25: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

01:54:25: Vi1 IPCP:    Address 0.0.0.0 (0x030600000000)

01:54:25: Vi1 CDPCP: O CONFREQ [Closed] id 1 len 4

01:54:25: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: O CONFACK [REQsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

01:54:25: Vi1 IPCP: I CONFNAK [ACKsent] id 1 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: O CONFREQ [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 LCP: I PROTREJ [Open] id 4 len 10 protocol CDPCP

(0x820701010004)

01:54:25: Vi1 CDPCP: State is Closed

01:54:25: Vi1 IPCP: I CONFACK [ACKsent] id 2 len 10

01:54:25: Vi1 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

01:54:25: Vi1 IPCP: State is Open

01:54:25: Di1 IPCP: Install negotiated IP interface address 212.93.198.1

01:54:25: Di1 IPCP: Install route to 212.93.195.100

01:54:26: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

Este é o comando show debugging output no Cisco 6400.

*Aug 16 15:58:51.346: PPPoE: IN PADI discovery packet

*Aug 16 15:58:51.346:   PPPoE: LMAC:ffff.ffff.ffff RMAC:0030.9424.af21 6/60

AT0/0/0.60

FF FF FF FF FF FF 00 30 94 24 AF 21 88 63 11 09

00 00 00 0C 01 01 00 00 01 03 00 04 82 2E 39 F0

00 00 00 00 00 00 00 00 00 00 00 00 00 00 00 ...

*Aug 16 15:58:51.346: PPPoE: PADO OUT from PPPoE tunnel

*Aug 16 15:58:51.346:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 07 00 00

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

*Aug 16 15:58:53.390: PPPoE: IN PADR discovery packet

*Aug 16 15:58:53.390:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 50 73 6F 4C 37 00 30 94 24 AF 21 88 63 11 19

00 00 00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0

01 02 00 0B 61 6C 79 73 73 61 5F 6E 72 70 31 ...

*Aug 16 15:58:53.394: Vi3 PPP: Phase is DOWN, Setup [0 sess, 0 load]

*Aug 16 15:58:53.418: PPPoE: Create session: 1

*Aug 16 15:58:53.418: PPPoE:  1: Created

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

*Aug 16 15:58:53.418: PPPoE: PADS OUT from PPPoE tunnel

*Aug 16 15:58:53.418:   PPPoE: LMAC:0050.736f.4c37 RMAC:0030.9424.af21 6/60

AT0/0/0.60

00 05 09 00 AA AA 03 00 80 C2 00 07 00 00 00 30

94 24 AF 21 00 50 73 6F 4C 37 88 63 11 65 00 01

00 2F 01 01 00 00 01 03 00 04 82 2E 39 F0 01 ...

2d08h: %LINK-3-UPDOWN: Interface Virtual-Access3, changed state to up

*Aug 16 15:58:53.426: Vi3 PPP: Treating connection as a dedicated line

*Aug 16 15:58:53.426: Vi3 PPP: Phase is ESTABLISHING, Active Open [0 sess,

0 load]

*Aug 16 15:58:53.426: Vi3 LCP: O CONFREQ [Closed] id 1 len 18

*Aug 16 15:58:53.426: Vi3 LCP:    MRU 1492 (0x010405D4)

*Aug 16 15:58:53.426: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.426: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.466: Vi3 LCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.466: Vi3 LCP: O CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.466: Vi3 LCP:    MagicNumber 0x31017223 (0x050631017223)

*Aug 16 15:58:53.470: Vi3 LCP: I CONFNAK [ACKsent] id 1 len 8

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP: O CONFREQ [ACKsent] id 2 len 18

*Aug 16 15:58:53.470: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.470: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.470: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: I CONFACK [ACKsent] id 2 len 18

*Aug 16 15:58:53.510: Vi3 LCP:    MRU 1500 (0x010405DC)

*Aug 16 15:58:53.510: Vi3 LCP:    AuthProto PAP (0x0304C023)

*Aug 16 15:58:53.510: Vi3 LCP:    MagicNumber 0x5C7E3144 (0x05065C7E3144)

*Aug 16 15:58:53.510: Vi3 LCP: State is Open

*Aug 16 15:58:53.510: Vi3 PPP: Phase is AUTHENTICATING, by this end [0

sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: I AUTH-REQ id 5 len 18 from "cisco"

*Aug 16 15:58:53.514: Vi3 PPP: Phase is FORWARDING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PPP: Phase is AUTHENTICATING [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 PAP: Authenticating peer cisco

*Aug 16 15:58:53.514: Vi3 PAP: O AUTH-ACK id 5 len 5

*Aug 16 15:58:53.514: Vi3 PPP: Phase is UP [0 sess, 0 load]

*Aug 16 15:58:53.514: Vi3 IPCP: O CONFREQ [Closed] id 1 len 10

*Aug 16 15:58:53.514: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFREQ [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 0.0.0.0 (0x030600000000)

*Aug 16 15:58:53.574: Vi3 IPCP: Pool returned 212.93.198.1

*Aug 16 15:58:53.574: Vi3 IPCP: O CONFNAK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.574: Vi3 CDPCP: I CONFREQ [Not negotiated] id 1 len 4

*Aug 16 15:58:53.574: Vi3 LCP: O PROTREJ [Open] id 3 len 10 protocol CDPCP

(0x820701010004)

*Aug 16 15:58:53.574: Vi3 IPCP: I CONFACK [REQsent] id 1 len 10

*Aug 16 15:58:53.574: Vi3 IPCP:    Address 212.93.195.100 (0x0306D45DC364)

*Aug 16 15:58:53.618: Vi3 IPCP: I CONFREQ [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: O CONFACK [ACKrcvd] id 2 len 10

*Aug 16 15:58:53.618: Vi3 IPCP:    Address 212.93.198.1 (0x0306D45DC601)

*Aug 16 15:58:53.618: Vi3 IPCP: State is Open

*Aug 16 15:58:53.622: Vi3 IPCP: Install route to 212.93.198.1

2d08h: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access3,

changed state to up

Informações Relacionadas

- Configurando o Cisco 827 Router

- Informação de suporte de tecnologia Cisco DSL

- Suporte Técnico - Cisco Systems