Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Informações de Apoio

Verificar

Discussões relacionadas da comunidade de suporte da Cisco

Introduction

O teste de pacote de ping é geralmente usado para solucionar problemas de conectividade.  Este documento ilustrará uma abordagem sistemática para usar o teste de ping para verificar o pacote de encaminhamento lento do Network Convergence System 6000 (NCS6K).

Prerequisites

Requirements

Os leitores deste documento devem estar cientes destes tópicos:

- Roteamento IP básico.

- Sistema operacional XR.

Componentes Utilizados

Este documento é criado para a plataforma NCS6K.

The information in this document was created from the devices in a specific lab environment. All of the devices used in this document started with a cleared (default) configuration. If your network is live, make sure that you understand the potential impact of any command.

Informações de Apoio

Há uma diferença importante entre o NCS6K e a plataforma tradicional IOS-XR: O NCS6K utiliza a tecnologia de virtualização para construir o sistema. Cada nó, RP (Routing Processor) ou LC (Line Card, placa de linha), pode executar várias máquinas virtuais (VM), como VM (System Admin, VM) do sistema, VM1 do IOS-XR, VM2 do IOS-XR, etc., que juntos criam um nó XR totalmente funcional. A figura a seguir mostra um exemplo em que RP e LC executam uma VM IOS-XR:

Figure 1

Há uma rede Ethernet de controle para conectar RPs e LCs. O tráfego do plano de controle entre RPs e LCs passará por essa rede Ethernet de controle. Como esse é um ambiente de virtualização, perguntas como como como esses pacotes são entregues a uma VM específica e como a NIC (Nicantic) no RP ou LC sabe que um pacote é destinado a eles?

Em resumo, as VLANs são usadas para diferenciar o tráfego de VMs diferentes e esse processo é feito pela NIC. A Figura 2 mostra como a NIC fornecerá o tráfego da VLAN 3074 para a VM do IOS-XR e o tráfego da VLAN 3073 para a VM do administrador.

Figure 2

Colocando esses componentes de encaminhamento juntos, você obtém um caminho de encaminhamento simplificado para o cenário de teste de ping como mostrado na figura 3.

Ao fazer um teste de ping do RP, os pacotes seguem o seguinte caminho de encaminhamento dentro da caixa:

RP_PING <—> RP_NETIO <—> RP_SPP <—> RP_Linux_Kernel_Socket <—> Switch <—> LC_FIA <—> LC_NPU (Incluir PSE, PLIM_ASIC) <—> Linha

Figure 3

Verificar

Para o restante do documento, um cenário em que um ping seria iniciado a partir do RP será tomado como exemplo. O ping seria iniciado em um host diretamente conectado em Te0/0/0/2/0. As etapas a seguir mostrarão uma abordagem passo a passo para verificar o caminho deste pacote de ping.

RP/0/RP0/CPU0:NCS6k-Deploy#show ip interface brief

Interface                      IP-Address      Status                Protocol

Bundle-Ether671                10.67.2.2       Up                    Up

Bundle-Ether672                10.67.3.2       Down                  Down

Loopback0                      10.17.17.17    Up                    Up

MgmtEth0/RP0/CPU0/0            10.7.54.11      Up                    Up

TenGigE0/0/0/2/0               10.67.1.2       Up                    Up

TenGigE0/0/0/2/1               unassigned      Up                    Up

TenGigE0/0/0/2/2               unassigned      Up                    Up

TenGigE0/0/0/2/3               unassigned      Up                    Up

TenGigE0/0/0/2/4               unassigned      Up                    Up

TenGigE0/0/0/2/5               unassigned      Down                  Down

[snip]

RP/0/RP0/CPU0:NCS6k-Deploy#show run interface Ten 0/0/0/2/0

interface TenGigE0/0/0/2/0

ipv4 address 10.67.1.2 255.255.255.252

load-interval 30

RP/0/RP0/CPU0:NCS6k-Deploy#ping 10.67.1.1

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 5/6/7 ms

1. O contador "show IPv4 traffic" no nó RP mostrará quantos ecos do Internet Control Message Protocol (ICMP) foram enviados e quantas respostas ICMP foram devolvidas.

RP/0/RP0/CPU0:NCS6k-Deploy#show ipv4 traffic

IP statistics:

Rcvd:  1495334 total, 80112 local destination

0 format errors, 0 bad hop count

23 unknown protocol, 0 not a gateway

0 security failures, 0 bad source, 0 bad header

133207 with options, 0 bad, 0 unknown

Opts:  0 end, 0 nop, 0 basic security, 0 extended security

0 strict source rt, 0 loose source rt, 0 record rt

0 stream ID, 0 timestamp, 133207 alert, 0 cipso

Frags: 0 reassembled, 0 timeouts, 0 couldn't reassemble, 0 fragments received

0 fragmented, 0 fragment count, 0 fragment max drop

Bcast: 0 sent, 0 received

Mcast: 1361652 sent, 1376283 received

Drop: 0 encapsulation failed, 237 no route, 0 too big

Sent: 1437435 total

ICMP statistics:

Sent: 0 admin unreachable, 63 network unreachable

8 host unreachable, 0 protocol unreachable

16 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

24 echo request, 30024 echo reply

0 mask request, 0 mask reply

0 parameter error, 0 redirects

30131 total

Rcvd: 0 admin unreachable, 21 network unreachable

0 host unreachable, 0 protocol unreachable

0 port unreachable, 0 fragment unreachable

0 time to live exceeded, 0 reassembly ttl exceeded

30024 echo request, 15 echo reply

0 mask request, 0 mask reply

0 redirect, 0 parameter error

0 source quench, 0 timestamp, 0 timestamp reply

0 router advertisement, 0 router solicitation

30063 total, 0 checksum errors, 0 unknown

2. Verifique o componente Network Input Output (NETIO).

A próxima etapa é verificar o contador de cadeia RP FINT NETIO. Você precisa ver o contador "OUT" do nó IPv4 na cadeia de netio. Se incrementa, significa que os pacotes chegaram ao componente NETIO e estão sendo enviados do componente NETIO.

Check initial NETIO counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh netio chains FINT loc 0/rp0/cpu0 | in Stats

<Protocol number> (name)  Stats

<6> (fint_n2n)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<10> (clns)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<12> (ipv4)   Stats IN: 2788 pkts, 115373 bytes; OUT: 2816 pkts, 117933 bytes

<13> (mpls)   Stats IN: 16482 pkts, 2467508 bytes; OUT: 0 pkts, 0 bytes

<18> (lpts)   Stats IN: 47234 pkts, 10381065 bytes; OUT: 0 pkts, 0 bytes

<19> (ipv6)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<30> (ipv4_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<32> (ipv6_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<34> (fint_proto_tp)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<36> (l2transport)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

Initiate 10 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 coun 10

Type escape sequence to abort.

Sending 10, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!

Success rate is 100 percent (10/10), round-trip min/avg/max = 4/7/8 ms

Check NETIO counter again. You would see increment of 10 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh netio chains FINT  loc 0/rp0/cpu0 | in Stats

<Protocol number> (name)  Stats

<6> (fint_n2n)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<10> (clns)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<12> (ipv4)   Stats IN: 2788 pkts, 115373 bytes; OUT: 2826 pkts, 118933 bytes

<13> (mpls)   Stats IN: 16482 pkts, 2467508 bytes; OUT: 0 pkts, 0 bytes

<18> (lpts)   Stats IN: 47234 pkts, 10381065 bytes; OUT: 0 pkts, 0 bytes

<19> (ipv6)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<30> (ipv4_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<32> (ipv6_preroute)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<34> (fint_proto_tp)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

<36> (l2transport)   Stats IN: 0 pkts, 0 bytes; OUT: 0 pkts, 0 bytes

Você também pode usar o comando KornShell (ksh) "show_netio_fwder_stats -g" para verificar se o contador de injeção/punt incrementa ou não.

Note: No ambiente de produção, pode haver outro tráfego de segundo plano que dificulta a verificação se os pacotes de ping chegaram a esse componente ou não. Como solução alternativa, você pode usar um grande número de pacotes com timeout 0 : "ping x.x.x.x count 10000 time 0" e verifique se o contador incrementa repentinamente ou tem um pico.

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#run show_netio_fwder_stats -g

RECEIVE STATISTICS SUMMARY:

rx_pkts: 2224455

punt_pkts: 2224447

ingress_total_drops: 8

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 2077319

tx_pkts: 2058041

egress_total_drops: 2

RECEIVE STATISTICS DETAILS:

Rx Pkt type stats:

lpts_pkts: 2220753

Rx Listener tag stats:

ipv4: 1116092

ipv6: 658627

clns: 112549

ipv4_l: 286252

raw4: 23

raw6: 43984

ospf_mc4: 45

ospf_mc6: 2

udp4: 7

tcp4: 405

isis: 2767

Rx Punt reason stats:

IFIB: 2220753

Rx Drop stats:

null_fint_ifh_drops: 8

ingress_total_drops: 8

TRANSMIT STATISTICS DETAILS:

Tx Pkt type stats:

ipv4: 2852

mpls: 42647

osi: 78760

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Protocol Id stats:

clns: 78760

ipv4: 2852

mpls: 42647

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Drop stats:

invalid_queue_drops: 2

hdr_init_drops: 2

egress_total_drops: 2

Initiate 10 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 coun 10

Type escape sequence to abort.

Sending 10, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!

Success rate is 100 percent (10/10), round-trip min/avg/max = 3/4/7 ms

Check counter again to check to se increment of 10 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#run show_netio_fwder_stats -g

RECEIVE STATISTICS SUMMARY:

rx_pkts: 2224465

punt_pkts: 2224457

ingress_total_drops: 8

TRANSMIT STATISTICS SUMMARY:

inject_pkts: 2077332

tx_pkts: 2058051

egress_total_drops: 2

RECEIVE STATISTICS DETAILS:

Rx Pkt type stats:

lpts_pkts: 2220763

Rx Listener tag stats:

ipv4: 1116102

ipv6: 658627

clns: 112549

ipv4_l: 286252

raw4: 23

raw6: 43984

ospf_mc4: 45

ospf_mc6: 2

udp4: 7

tcp4: 405

isis: 2767

Rx Punt reason stats:

IFIB: 2220763

Rx Drop stats:

null_fint_ifh_drops: 8

ingress_total_drops: 8

TRANSMIT STATISTICS DETAILS:

Tx Pkt type stats:

ipv4: 2865

mpls: 42647

osi: 78760

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Protocol Id stats:

clns: 78760

ipv4: 2865

mpls: 42647

ipv4_preroute: 1339401

ipv6_preroute: 613659

Tx Drop stats:

invalid_queue_drops: 2

hdr_init_drops: 2

egress_total_drops: 2

RP/0/RP0/CPU0:NCS6k-Deploy#

3. Verifique o componente SPP.

Use o SPP CLI para ver se o pacote atingiu o SPP ou não.

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh spp node-counters

0/0/CPU0:

pdma/rx

slice1 high pkts:              10

-------------------------------

pdma/tx

slice1 low pkts:              10

-------------------------------

panini/classify

forwarded to spp clients:              10

-------------------------------

client/inject

pkts injected into spp:              10

-------------------------------

client/punt

punted to client:              10

-------------------------------

0/RP0/CPU0:

panini/classify

forwarded to spp clients:           22070

-------------------------------

client/inject

pkts injected into spp: 4640

-------------------------------

socket/rx

ce low pkts:              45

mgmt interface pkts:           22025

-------------------------------

socket/tx

ce pkts:              45

mgmt interface pkts:            4595

-------------------------------

client/punt

punted to client: 22070

-------------------------------

Initiate 100 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 100

Type escape sequence to abort.

Sending 100, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (100/100), round-trip min/avg/max = 3/3/8 ms

Check counter again to see increment of 100 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh spp node-counters

0/0/CPU0:

pdma/rx

slice1 high pkts:              10

-------------------------------

pdma/tx

slice1 low pkts:              10

-------------------------------

panini/classify

forwarded to spp clients:              10

-------------------------------

client/inject

pkts injected into spp:              10

-------------------------------

client/punt

punted to client:              10

-------------------------------

0/RP0/CPU0:

panini/classify

forwarded to spp clients:           22172

-------------------------------

client/inject

pkts injected into spp: 4740

-------------------------------

socket/rx

ce low pkts:             145

mgmt interface pkts:           22027

-------------------------------

socket/tx

ce pkts:             145

mgmt interface pkts:            4595

-------------------------------

client/punt

punted to client:    22172

-------------------------------

4. Use as ferramentas tcpdump para despejar o pacote do componente kernel do Linux.

Na saída abaixo, em NCS6K XR VM ksh, você pode ver várias subinterfaces:

RP/0/RP0/CPU0:NCS6008-SJ#

RP/0/RP0/CPU0:NCS6008-SJ#run

Tue Jun 24 10:51:51.972 UTC

[xr-vm_node0_RP0_CPU0:/]$

[xr-vm_node0_RP0_CPU0:/]$ ifconfig -a

eth-vf1   Link encap:Ethernet  HWaddr 46:91:EE:A5:48:A8

inet6 addr: fe80::4491:eeff:fea5:48a8/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:518403076C3 errors:0 dropped:0 overruns:0 frame:0

TX packets:969599306 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:1000

RX bytes:138405352234 (128.9 GiB)  TX bytes:242828863250 (226.1 GiB)

eth-vf1.514 Link encap:Ethernet  HWaddr 4C:4E:35:B6:63:68

inet6 addr: fe80::4e4e:35ff:feb6:6368/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:13547000 errors:0 dropped:0 overruns:0 frame:0

TX packets:116957 errors:0 dropped:10 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:623478135C3 (594.5 MiB)  TX bytes:26876899 (25.6 MiB)

eth-vf1.3073 Link encap:Ethernet  HWaddr 4C:4E:35:B6:63:69

inet addr:192.0.0.4  Bcast:192.255.255.255  Mask:255.0.0.0

inet6 addr: fe80::4e4e:35ff:feb6:6369/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:102364757 errors:0 dropped:0 overruns:0 frame:0

TX packets:100689507 errors:0 dropped:3 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:29925046692 (27.8 GiB)  TX bytes:7562528012 (7.0 GiB)

eth-vf1.3074 Link encap:Ethernet  HWaddr 4E:41:50:00:10:01

inet addr:172.0.16.1  Bcast:172.255.255.255  Mask:255.0.0.0

inet6 addr: fe80::4c41:50ff:fe00:1001/64 Scope:Link

UP BROADCAST RUNNING MULTICAST  MTU:9700  Metric:1

RX packets:402491385 errors:0 dropped:0 overruns:0 frame:0

TX packets:350389778 errors:0 dropped:6 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:100599198478 (93.6 GiB)  TX bytes:96834116492 (90.1 GiB)

lo        Link encap:Local Loopback

inet addr:127.0.0.1  Mask:255.0.0.0

inet6 addr: ::1/128 Scope:Host

UP LOOPBACK RUNNING  MTU:16436  Metric:1

RX packets:1029861486 errors:0 dropped:0 overruns:0 frame:0

TX packets:1029861486 errors:0 dropped:0 overruns:0 carrier:0

collisions:0 txqueuelen:0

RX bytes:201624257033 (187.7 GiB)  TX bytes:201624257033 (187.7 GiB)

eth-vf1.514 é usado para comunicação com a interface do gerente, mas você não pode ver o endereço IPv4. A interface de gerenciamento na VM XR depende da pilha IP do IOS-XR em vez da pilha IP no Linux.

ether-vf1.3073 é usado para comunicação com a VM do administrador.

eher-vf1.3074 é usado para tráfego de plano de controle relacionado a XR VM. O pacote de teste de ping passará por essa subinterface (usando a pilha de protocolo de rede do Linux).

O Tcpdump associado ao Linux tem muitas opções sobre como despejar tráfego interessante. Além disso, você pode usar ferramentas tcpdump para detectar o tráfego do plano de controle do Secure Domain Router (SDR) (vlan 3074) ou detectar outro tráfego como comunicação entre processos (IPC) na vlan 3073.

xr-vm_node0_RP0_CPU0:/]$ tcpdump -i eth-vf1.3074 -XX -vv

tcpdump: listening on eth-vf1.3074, link-type EN10MB (Ethernet), capture size 65535 bytes

01:49:21.798386 IP (tos 0x6,ECT(0), ttl 1, id 0, offset 0, flags [DF], proto UDP (17), length 340)

172.0.16.1.10150 > 239.255.0.4.10150: [bad udp cksum ab2a!] UDP, length 312

0x0000:  0100 5e7f 0004 4e41 5000 1001 0800 4506  ..^...NAP.....E.

0x0010:  0154 0000 4000 0111 cc8e ac00 1001 efff  .T..@...........

0x0020:  0004 27a6 27a6 0140 ad56 abcd abcd 0000  ..'.'..@.V......

0x0030:  0000 0280 f502 0000 0000 0000 0000 0000  ................

0x0040:  0000 0000 0000 7856 3412 0128 0204 0000  ......xV4..(....

0x0050:  0000 5508 0100 0100 0000 3c25 2600 0000  ..U.......<%&...

0x0060:  0000 d007 0000 0000 0000 ffff 0000 0000  ................

0x0070:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0080:  0000 0000 0000 4800 0000 0200 0000 0000  ......H.........

0x0090:  0000 8800 0000 0000 0000 0000 0000 0000  ................

0x00a0:  0000 0100 0000 0000 0000 0000 0000 0000  ................

0x00b0:  0000 0000 0000 c2ca 0031 0000 0000 0000  .........1......

0x00c0:  0000 0000 0000 0000 0000 5508 0000 6510  ..........U...e.

0x00d0:  0000 ed53 4c00 0000 0000 0000 0000 0000  ...SL...........

0x00e0:  0000 0000 0000 0000 0000 0000 0000 6264  ..............bd

0x00f0:  7863 0000 0000 0000 0000 0000 0000 0000  xc..............

0x0100:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0110:  0000 0100 0000 0000 0000 0000 0000 30ff  ..............0.

0x0120:  0002 0000 0000 0000 0000 0000 0000 0000  ................

0x0130:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0140:  0000 0000 0000 0000 0000 0c00 0000 0000  ................

0x0150:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0160:  0000                                     ..

01:49:21.799167 IP (tos 0x6,ECT(0), ttl 64, id 0, offset 0, flags [DF], proto UDP (17), length 380)

172.0.0.1.8197 > 172.0.16.1.8197: [udp sum ok] UDP, length 352

0x0000:  4e41 5000 1001 4e41 5000 0001 0800 4506  NAP...NAP.....E.

0x0010:  017c 0000 4000 4011 d168 ac00 0001 ac00  .|..@.

0x0040:  0000 0000 0000 7856 3412 0128 0204 0000  ......xV4..(....

0x0050:  0000 5508 0100 0100 0000 3d25 2600 0000  ..U.......=%&...

0x0060:  0000 d007 0000 0000 0000 ffff 0000 0000  ................

0x0070:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0080:  0000 0000 0000 4800 0000 0200 0000 0000  ......H.........

0x0090:  0000 8800 0000 0000 0000 0000 0000 0000  ................

0x00a0:  0000 0100 0000 0000 0000 0000 0000 0000  ................

0x00b0:  0000 0000 0000 c2ca 0031 0000 0000 0000  .........1......

0x00c0:  0000 0000 0000 0000 0000 5508 0000 6510  ..........U...e.

0x00d0:  0000 ee53 4c00 0000 0000 0000 0000 0000  ...SL...........

0x00e0:  0000 0000 0000 0000 0000 0000 0000 6264  ..............bd

0x00f0:  7863 0000 0000 0000 0000 0000 0000 0000  xc..............

0x0100:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0110:  0000 0100 0000 0000 0000 0000 0000 30ff  ..............0.

0x0120:  0002 0000 0000 0000 0000 0000 0000 0000  ................

0x0130:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0140:  0000 0000 0000 0000 0000 0c04 0000 0000  ................

0x0150:  0000 0000 0000 0000 0000 0000 0000 0000  ................

0x0160:  0000                                     ..

01:49:21.802982 IP (tos 0x6,ECT(0), ttl 64, id 0, offset 0, flags [DF], proto UDP (17), length 380)

172.0.0.1.8197 > 172.0.16.1.8197: [udp sum ok] UDP, length 352

0x0000:  4e41 5000 1001 4e41 5000 0001 0800 4506  NAP...NAP.....E.

0x0010:  017c 0000 4000 4011 d168 ac00 0001 ac00  .|..@.@..h......

0x0020:  1001 2005 2005 0168 672f abcd abcd 0000  .......hg/......

0x0030:  0000 3c80 f502 0000 0000 0000 0000 0000  ..<.............

0x0040:  0000 0000 0000 7856 3412 0411 0008 0000  ......xV4.......

0x0050:  0000 5508 0000 0100 0000 3d25 2600 0000  ..U.......=%&...

0x0060:  0000 d007 0100 0000 0000 ffff 0000 0000

[snip]

Note: Como é o cenário VM, o tráfego enviado para VM pode ser encapsulado com o endereço da interface VM no cabeçalho externo para que esse tráfego possa alcançar a interface VM.
O despejo de pacote acima é, na verdade, encapsulado com cabeçalho de pacote UDP com origem/destino 172.0.16.1, que é o endereço ip eth-vf1.3074 na VM IOS-XR.
Note: As capturas realizadas são para demonstrar a abordagem e não têm tráfego ICMP (Internet Control Message Protocol).

5. Verificando o componente FIA na placa de linha.

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers fia statistics instance 1 loc 0/0/cpu0

FIA Statistics Rack: 0, Slot: 0, Asic instance: 1

FIA Rx (To Fabric) Statistics.

------------------------------------------------------------------------

Input Pkt counters                                 Pkts             Bytes

Rx pkts from pse                 :              250             53000

Rx pkts from switch              :           993528         349564509

bcast pkts from switch       :                0

mcast pkts from switch       :           993278

ucast pkts from switch       :              250

Rx pkts enqueued(IQM)            :              500             86500

Rx pkts dequeued(IQM)            :              500             86500

Rx pkts sent to fabric           :              500

Cell counters:

Data cells sent to fabric        :              500             86500

Control cells sent to fabric     :     183039783411

Drop counters:

Rx burst error drops(NBI)        :                0

Rx error drops(Switch)           :                0

Rx error drops(pse)              :                0

Rx pkt discard drops(IQM)        :           993277         334570329

Pkt crc error drops(FDT)         :                0

Unreachable dest cell drops      :                0

Internal Error Count             :         41984110

Internal Drop Count              :                0

FIA Tx (From Fabric) Statistics

------------------------------------------------------------------------

Cell counters:                                     Pkts             Bytes

Data cells                       :              500

Control cells                    :     179368087015

Reassembled packet counters:

Pkts received from fabric        :              500

Tx Ucast pkts                    :              500             86500

Tx Mcast pkts                    :                0                 0

Tx pkts (EPNI)                   :              500             81000

Tx pkts sent to switch           :              250             53000

Bcast pkts sent to switch    :                0

Mcast pkts sent to switch    :                0

Ucast pkts sent to switch    :              250

Tx segments sent to pse          :              250             29000

Tx pkts sent to pse (NBI)        :              500             49000

Drop counters:

Tx pkts dropped EPNI             :                0

Tx Ucast pkts dropped            :                0

Tx Mcast pkts dropped            :                0

Tx pkts dropped in EGQ(RQP + EHP):                0

Control cell Drops               :                0

Data cell Drops                  :                0

Tx pkts dropped switch           :                0

Tx pkts dropped pse              :                0

Internal Error Count             :                0

Internal Drop Count              :                0

Initiate ping of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 2/3/8 ms

Check counters again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers fia statistics instance 1 loc 0/0/cpu0

FIA Statistics Rack: 0, Slot: 0, Asic instance: 1

FIA Rx (To Fabric) Statistics.

------------------------------------------------------------------------

Input Pkt counters                                 Pkts             Bytes

Rx pkts from pse                 :             1250            265000

Rx pkts from switch              :           994927         349849612

bcast pkts from switch       :                0

mcast pkts from switch       :           993677

ucast pkts from switch : 1250

Rx pkts enqueued(IQM)            :             2500            432500

Rx pkts dequeued(IQM)            :             2500            432500

Rx pkts sent to fabric           :             2500

Cell counters:

Data cells sent to fabric        :             2500            432500

Control cells sent to fabric     :     183111332632

Drop counters:

Rx burst error drops(NBI)        :                0

Rx error drops(Switch)           :                0

Rx error drops(pse)              :                0

Rx pkt discard drops(IQM)        :           993676         334707420

Pkt crc error drops(FDT)         :                0

Unreachable dest cell drops      :                0

Internal Error Count             :         42004879

Internal Drop Count              :                0

FIA Tx (From Fabric) Statistics

------------------------------------------------------------------------

Cell counters:                                     Pkts             Bytes

Data cells                       :             2500

Control cells                    :     179438200981

Reassembled packet counters:

Pkts received from fabric        :             2500

Tx Ucast pkts                    :             2500            432500

Tx Mcast pkts                    :                0                 0

Tx pkts (EPNI)                   :             2500            405000

Tx pkts sent to switch           :             1250            265000

Bcast pkts sent to switch    :                0

Mcast pkts sent to switch    :                0

Ucast pkts sent to switch    :             1250

Tx segments sent to pse : 1250 145000

Tx pkts sent to pse (NBI)        :             2500            245000

Drop counters:

Tx pkts dropped EPNI             :                0

Tx Ucast pkts dropped            :                0

Tx Mcast pkts dropped            :                0

Tx pkts dropped in EGQ(RQP + EHP):                0

Control cell Drops               :                0

Data cell Drops                  :                0

Tx pkts dropped switch           :                0

Tx pkts dropped pse              :                0

Internal Error Count             :                0

Internal Drop Count              :                0

6. Verifique os contadores do Mecanismo de Comutação de Pacotes (PSE - Packet Switching Engine).

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh control pse statistics summ instance 1 loc 0/0/cpu0

STATISTICS SUMMARY:

INGRESS

-------

From L2 [LSIM]:

Packets: 1261

Bytes:   163336

To Fabric:

Packets: 1250

Bytes:   265000

EGRESS

------

From Fabric:

Packets: 1250

Bytes:   145000

To TM:

Packets: 1272

To L2 [LSIM]:

Packets: 1261

Bytes:   142962

TO/FROM CPU

-----------

To CPU:

Packets: 11

From CPU:

Packets: 11

Generate 1000 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 3/4/9 ms

Check counter again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh control pse statistics summ instance 1 loc 0/0/cpu0

STATISTICS SUMMARY:

INGRESS

-------

From L2 [LSIM]:

Packets: 2261

Bytes:   293336

To Fabric:

Packets: 2250

Bytes:   477000

EGRESS

------

From Fabric:

Packets: 2250

Bytes:   261000

To TM:

Packets: 2272

To L2 [LSIM]:

Packets: 2261

Bytes:   256962

TO/FROM CPU

-----------

To CPU:

Packets: 11

From CPU:

Packets: 11

7. Verificando os contadores ASIC do Módulo de Interface de Camada Física (PLIM - Physical Layer Interface Module).

Check initial counter value.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers  plim  asic statistics interface  Te0/0/0/2/0

Node: 0/0/CPU0

-------------------------------------------------------------------------------

TenGigE0/0/0/2/0 Tx Statistics

----------------------------------------------

Total Packets            : 2256              Total Bytes              : 265884

Total Good Packets       : 2256              Total Good Bytes         : 265884

Unicast Packets          : 2256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 2250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Drained Packets          : 0                 Abort                    : 0

Length Error             : 0                 Giant                    : 0

Tail Drop: HP Queue      : 0                 Tail Drop: LP Queue      : 0

TenGigE0/0/0/2/0 Rx Statistics

----------------------------------------------

Total Packets            : 2256              Total Bytes              : 265884

Total Good Packets       : 2256              Total Good Bytes         : 265884

Unicast Packets          : 2256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 2250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Runts                    : 0                 Fragments                : 0

Jumbo                    : 0                 Jabber                   : 0

CRC                      : 0                 Code Error               : 0

Code Violation           : 0                 Bad Preamble             : 0

IPG Violation            : 0

Packet HPQ QoS Ctl Drop  : 0                 Bytes HPQ QoS Ctl Drop   : 0

Packet HPQ QoS HP Drop   : 0                 Bytes HPQ QoS HP Drop    : 0

Packet HPQ Ctl Tail Drop : 0                 Bytes HPQ Ctl Tail Drop  : 0

Packet HPQ HP Tail Drop  : 0                 Bytes HPQ HP Tail Drop   : 0

Packet LPQ LP1 Tail Drop : 0                 Bytes LPQ LP1 Tail Drop  : 0

Packet LPQ LP2 Tail Drop : 0                 Bytes LPQ LP2 Tail Drop  : 0

Packet TCAM Miss         : 0                 Bytes TCAM Miss          : 0

Packet EOP Abort Drop    : 0                 Bytes EOP Abort Drop     : 0

Packet Policy Deny       : 0                 Bytes Policy Deny        : 0

Rx Packet Drop Details

======================

Unknown Dest MAC Pkts    : 0

Unknown E-Type Pkts      : 0

Unknown Encap Pkts       : 0                 Unknown Encap Bytes      : 0

Unknown VLAN Pkts        : 0                 Unknown VLAN Bytes       : 0

L2 Subif VLAN Deny Pkts  : 0                 L2 Subif VLAN Deny Bytes : 0

Rx Accepted Packet Details

============================

Packet HPQ CTL Sent      : 6                 Bytes HPQ CTL Sent       : 384

Packet HPQ HP  Sent      : 0                 Bytes HPQ HP  Sent       : 0

Packet LPQ LP1 Sent      : 0                 Bytes LPQ LP1 Sent       : 0

Packet LPQ LP2 Sent      : 0                 Bytes LPQ LP2 Sent       : 0

Initiate 1000 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 count 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 3/5/9 ms

Check counter again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#sh controllers  plim  asic statistics interface  Ten0/0/0/2/0

Node: 0/0/CPU0

-------------------------------------------------------------------------------

TenGigE0/0/0/2/0 Tx Statistics

----------------------------------------------

Total Packets            : 3256              Total Bytes              : 383884

Total Good Packets       : 3256              Total Good Bytes         : 383884

Unicast Packets          : 3256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 3250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Drained Packets          : 0                 Abort                    : 0

Length Error             : 0                 Giant                    : 0

Tail Drop: HP Queue      : 0                 Tail Drop: LP Queue      : 0

TenGigE0/0/0/2/0 Rx Statistics

----------------------------------------------

Total Packets            : 3256              Total Bytes              : 383884

Total Good Packets       : 3256              Total Good Bytes         : 383884

Unicast Packets          : 3256              Multicast Packets        : 0

Broadcast Packets        : 0                 64 Byte Packets          : 6

65to127  Byte Packets    : 3250              128to255 Byte Packets    : 0

256to511 Byte Packets    : 0                 512to1023 Byte Packets   : 0

1024to1518 Byte Packets  : 0                 1519to1522 Byte Packets  : 0

1523to1548 Byte Packets  : 0                 1549to2000 Byte Packets  : 0

2001to_MRU Byte Packets  : 0                 Non Pause BPDU Packets   : 0

Classic Pause Packets    : 0

Class Based Pause Pkts 0 : 0                 Class Based Pause Pkts 1 : 0

Class Based Pause Pkts 2 : 0                 Class Based Pause Pkts 3 : 0

Class Based Pause Pkts 4 : 0                 Class Based Pause Pkts 5 : 0

Class Based Pause Pkts 6 : 0                 Class Based Pause Pkts 7 : 0

Dropped Packets

===============

Runts                    : 0                 Fragments                : 0

Jumbo                    : 0                 Jabber                   : 0

CRC                      : 0                 Code Error               : 0

Code Violation           : 0                 Bad Preamble             : 0

IPG Violation            : 0

Packet HPQ QoS Ctl Drop  : 0                 Bytes HPQ QoS Ctl Drop   : 0

Packet HPQ QoS HP Drop   : 0                 Bytes HPQ QoS HP Drop    : 0

Packet HPQ Ctl Tail Drop : 0                 Bytes HPQ Ctl Tail Drop  : 0

Packet HPQ HP Tail Drop  : 0                 Bytes HPQ HP Tail Drop   : 0

Packet LPQ LP1 Tail Drop : 0                 Bytes LPQ LP1 Tail Drop  : 0

Packet LPQ LP2 Tail Drop : 0                 Bytes LPQ LP2 Tail Drop  : 0

Packet TCAM Miss         : 0                 Bytes TCAM Miss          : 0

Packet EOP Abort Drop    : 0                 Bytes EOP Abort Drop     : 0

Packet Policy Deny       : 0                 Bytes Policy Deny        : 0

Rx Packet Drop Details

======================

Unknown Dest MAC Pkts    : 0

Unknown E-Type Pkts      : 0

Unknown Encap Pkts       : 0                 Unknown Encap Bytes      : 0

Unknown VLAN Pkts        : 0                 Unknown VLAN Bytes       : 0

L2 Subif VLAN Deny Pkts  : 0                 L2 Subif VLAN Deny Bytes : 0

Rx Accepted Packet Details

============================

Packet HPQ CTL Sent      : 6                 Bytes HPQ CTL Sent       : 384

Packet HPQ HP  Sent      : 0                 Bytes HPQ HP  Sent       : 0

Packet LPQ LP1 Sent      : 0                 Bytes LPQ LP1 Sent       : 0

Packet LPQ LP2 Sent      : 0                 Bytes LPQ LP2 Sent       : 0

8. Verifique os contadores "show interface".

É recomendável verificar isso na primeira etapa, mas na sequência de fluxo de pacote, isso será o último. Ele ajuda a identificar se o pacote foi enviado para a linha e se o pacote foi devolvido da linha. Isso pode ajudar a restringir se o problema está dentro ou fora da caixa.

Check initial counter values.

RP/0/RP0/CPU0:NCS6k-Deploy#show inter ten 0/0/0/2/0

TenGigE0/0/0/2/0 is up, line protocol is up

Interface state transitions: 1

Hardware is TenGigE, address is e051.2a0f.8c29 (bia e051.2a0f.8c29)

Description: Connected to 0/7/0/1 - CRS-F

Internet address is 10.67.1.2/30

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 0/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, SR, link type is force-up

output flow control is off, input flow control is off

loopback not set,

ARP type ARPA, ARP timeout 04:00:00

Last input 00:14:22, output 00:14:22

Last clearing of "show interface" counters 22:08:42

30 second input rate 0 bits/sec, 0 packets/sec

30 second output rate 0 bits/sec, 0 packets/sec

3256 packets input, 370860 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 0 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

3256 packets output, 370860 bytes, 0 total output drops

Output 0 broadcast packets, 0 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions

Initiate 1000 ping packets.

RP/0/RP0/CPU0:NCS6k-Deploy#ping  10.67.1.1 cou 1000

Type escape sequence to abort.

Sending 1000, 100-byte ICMP Echos to 10.67.1.1, timeout is 2 seconds:

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!!

!!!!!!!!!!!!!!!!!!!!

Success rate is 100 percent (1000/1000), round-trip min/avg/max = 3/4/8 ms

Check counter again to see increment of 1000 packets.

RP/0/RP0/CPU0:NCS6k-Deploy#show inter ten 0/0/0/2/0

TenGigE0/0/0/2/0 is up, line protocol is up

Interface state transitions: 1

Hardware is TenGigE, address is e051.2a0f.8c29 (bia e051.2a0f.8c29)

Description: Connected to 0/7/0/1 - CRS-F

Internet address is 10.67.1.2/30

MTU 1514 bytes, BW 10000000 Kbit (Max: 10000000 Kbit)

reliability 255/255, txload 0/255, rxload 0/255

Encapsulation ARPA,

Full-duplex, 10000Mb/s, SR, link type is force-up

output flow control is off, input flow control is off

loopback not set,

ARP type ARPA, ARP timeout 04:00:00

Last input 00:00:00, output 00:00:00

Last clearing of "show interface" counters 22:09:38

30 second input rate 1000 bits/sec, 2 packets/sec

30 second output rate 1000 bits/sec, 2 packets/sec

4256 packets input, 484860 bytes, 0 total input drops

0 drops for unrecognized upper-level protocol

Received 0 broadcast packets, 0 multicast packets

0 runts, 0 giants, 0 throttles, 0 parity

0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort

4256 packets output, 484860 bytes, 0 total output drops

Output 0 broadcast packets, 0 multicast packets

0 output errors, 0 underruns, 0 applique, 0 resets

0 output buffer failures, 0 output buffers swapped out

0 carrier transitions