Contents

Introduction

Prerequisites

Requirements

Componentes Utilizados

Conventions

Configurar

Diagrama de Rede

Configurações

Verificar

Troubleshoot

Camada física DSL

Camada ATM

Camada de Ethernet

Camada PPP

Debug

Camada física DSL

Camada ATM

Camada de Ethernet

Camada PPP

Informações Relacionadas

Introduction

No Cisco IOS® Software Release 12.1(3)XG, um recurso de cliente Point-to-Point Protocol over Ethernet (PPPoE) foi introduzido para o Cisco Small Office/Home Office (SOHO) 77. Esse recurso permite que a funcionalidade PPPoE seja movida para o roteador. Vários PCs podem ser instalados atrás do Cisco SOHO77, e antes de seu tráfego ser enviado para a sessão PPPoE, os dados podem ser criptografados e filtrados, e a Tradução de Endereço de Rede (NAT - Network Address Translation) pode ser executada.

Este documento mostra um cliente PPPoE configurado na interface ATM (a interface DSL) do Cisco SOHO77. Essa configuração também pode ser usada em um Cisco 1700 com Placa de Interface WAN (WIC) Asymmetric Digital Subscriber Line (ADSL).

A configuração do NRP (node route processor) do Cisco 6400 também pode ser usada para outro roteador usado como um agregador e com uma interface ATM.

Prerequisites

Requirements

Não existem requisitos específicos para este documento.

Componentes Utilizados

As informações neste documento são baseadas nestas versões de software e hardware:

- Software Cisco SOHO77 Customer Premises Equipment (CPE) IOS versão 12.1(3)XP2

- Software Cisco 6400 UAC-NRP IOS versão 12.1(3)DC1

- Software Cisco 6400 UAC-NSP IOS versão 12.1(3)DB

- Software Cisco 6130 DSLAM-NI2 IOS versão 12.1(5)DA

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. All of the devices used in this document started with a cleared (default) configuration. Se você estiver trabalhando em uma rede ativa, certifique-se de que entende o impacto potencial de qualquer comando antes de utilizá-lo.

Conventions

Para obter mais informações sobre convenções de documento, consulte as Convenções de dicas técnicas Cisco.

Configurar

Nesta seção, você encontrará informações para configurar os recursos descritos neste documento.

Observação: para encontrar informações adicionais sobre os comandos usados neste documento, use a ferramenta Command Lookup Tool (somente clientes registrados).

Diagrama de Rede

Este documento utiliza a seguinte configuração de rede:

Configurações

Este documento utiliza as seguintes configurações:

- Cisco SOHO77

- Cisco 6400

O PPPoE é configurado no Cisco SOHO77 com comandos Virtual Private Dial-up Network (VPND). Certifique-se de configurar esses comandos primeiro.

Cisco SOHO77

!

vpdn enable

no vpdn logging

!--- Default.

!

vpdn-group pppoe

request-dialin

!--- The PPPoE client requests a session with the aggregation unit (6400 NRP).

protocol pppoe

!

!--- Internal Ethernet network.

!

interface Ethernet0

ip address 10.92.1.182 255.255.255.0

ip nat inside

!--- DSL interface.

!

interface ATM0

no ip address

no atm ilmi-keepalive

bundle-enable

dsl operating-mode auto

hold-queue 224 in

!--- all defaults

!--- PPPoE runs on top of AAL5SNAP, but the encap aal5snap command is not used.

!

interface ATM0.1 point-to-point

pvc 1/1

pppoe-client dial-pool-number 1

!--- pvc 1/1 is an example value that you must change to match the value !--- used by the Internet Service Provider (ISP).

!

!--- The PPPoE client code ties into a dialer interface, upon !--- which a virtual-access interface is cloned.

!

interface Dialer1

ip address negotiated

ip mtu 1492

!--- Ethernet MTU is 1500 by default. In other words, 1492 + PPPoE headers = 1500.

ip nat outside

encapsulation ppp

dialer pool 1

!--- Ties to ATM interface.

ppp authentication chap callin

ppp chap hostname <hostname>

ppp chap password <password>

!

!--- The ISP instructs you about the type of authentication to use. !--- To change from PPP CHAP to PPP PAP, replace the following three lines: !--- ppp authentication chap callin !--- ppp chap hostname

!--- ppp chap password

!--- with the following two lines: !--- ppp authentication pap callin !--- ppp pap sent-username

password

!--- For NAT we are going to overload on the Dialer1 interface !--- Then add a default route out since dialer IP address can change.

ip nat inside source list 1 interface Dialer1 overload

ip classless

ip route 0.0.0.0 0.0.0.0 dialer1

no ip http server

!

access-list 1 permit 10.92.1.0 0.0.0.255

!--- For NAT.

!

Cisco 6400

*** local ppp user

!--- You can also use AAA.

username

password

!--- Begin with the VPDN commands. !--- Note the PPPoE binding to a virtual-template instead of on the ATM interface. !--- You cannot (at this time) use more than one virtual-template (or VPDN group) !--- for PPPoE beginning with the VPDN commands.

vpdn enable

no vpdn logging

!

vpdn-group pppoe

accept-dialin

!--- PPPoE server mode.

protocol pppoe

virtual-template 1

!

!

interface ATM0/0/0

no ip address

no atm ilmi-keepalive

hold-queue 500 in

!--- The binding to the virtual-template interface is configured in the VPDN group.

!

interface ATM0/0/0.182 point-to-point

pvc 1/82

encapsulation aal5snap

!--- The command is needed on the server side.

protocol pppoe

!

!

!--- Virtual-template is used instead of dialer interface.

!

interface Virtual-Template1

ip unnumbered Loopback10

ip mtu 1492

peer default ip address pool ippool

ppp authentication chap

!

!

interface Loopback10

ip address 8.8.8.1 255.255.255.0

!

ip local pool ippool 9.9.9.1 9.9.9.5

Verificar

No momento, não há procedimento de verificação disponível para esta configuração.

Troubleshoot

Esta seção fornece informações que podem ser usadas para fazer Troubleshooting e depurar a configuração.

Para depurar o cliente PPPoE no Cisco SOHO77 ou Cisco 6400, você deve considerar a pilha de protocolos. Solução de problemas com início na camada do protocolo inferior.

1. Camada física DSL

2. Camada ATM

3. Camada de Ethernet

4. Camada PPP

Camada física DSL

Verifique se a linha está ativa e treinada.

Insira os comandos show conforme indicado neste exemplo. A saída resultante indica o status da linha.

show int atm0

ATM0 is up, line protocol is up

Hardware is PQUICC_SAR (with Alcatel ADSL Module)

show dsl interface atm0

!--- Look for "Showtime" in the first few lines.

ATU-R (DS)                      ATU-C (US)

Modem Status:   Showtime (DMTDSL_SHOWTIME)

Camada ATM

Se a interface ATM estiver ativa, você poderá usar o comando debug atm packets para ver se algo vem do ISP.

Observação: você não verá pacotes de saída com esse comando devido à maneira como os pacotes são processados.

Insira o comando debug atm packets conforme mostrado neste exemplo.

debug atm packet

03:21:32: ATM0(I):

VCD:0x2 VPI:0x1 VCI:0x1 Type:0x0 SAP:AAAA CTL:03 OUI:0080C2 TYPE:0007

Length:0x30

03:21:32: 0000 0050 7359 35B7 0001 96A4 84AC 8864 1100 0001 000E C021 09AB

000C 0235

03:21:32: 279F 0000 0000

03:21:32:

A saída como mostra acima deve conter os mesmos campos Tipo, SAP, CTL e OUI para indicar que o pacote ATM recebido é AAL5SNAP.

Camada de Ethernet

Os quadros Ethernet completos estão nos pacotes AAL5SNAP. Não há nenhum comando debug ethernet packet, mas você deve executar algumas operações de depuração de VPDN para exibir os quadros PPPoE.

Como referência, um quadro Ethernet que é um quadro PPPoE contém um dos dois ethertipos:

- 0x8863 Ethertype = Pacote de controle PPPoE (maneja a sessão PPPoE).

- 0x8864 Ethertype = pacote de dados PPPoE (contém pacotes PPP).

Uma nota importante é que há duas sessões em PPPoE. A sessão de PPPoE que é uma sessão do tipo VPDN L2TP e a sessão PPP. Assim, para estabelecer PPPoE, temos uma fase de estabelecimento de sessões PPPoE e uma fase de estabelecimento de sessões PPP.

A terminação geralmente envolve uma fase de terminação de PPP e fase de terminação de PPPoE.

A fase de estabelecimento de PPPoE consiste em dois passos:

- Passo 1: Identificar o cliente e o servidor PPPoE (os endereços MAC).

- Passo 2: Atribua uma ID de sessão.

Após a conclusão, o estabelecimento PPP normal ocorre como qualquer outra conexão PPP.

Para depurar, use as depurações VPDN PPPoE para determinar se a fase de conexão do PPPoE foi bem sucedida.

1. Insira um comando debug como mostrado neste exemplo:

#debug vpdn pppoe-events

06:17:58: Sending PADI: vc=1/1

!--- A broadcast Ethernet frame (here, encapsulated in ATM) requests !--- a PPPoE server with the message, "Is there a PPPoE server out there?"

06:18:00:  PPPOE: we have got our pado, and the pado timer went off

!--- This is a unicast reply from a PPPoE server (similar to a DHCP offer).

06:18:00: OUT PADR from PPPoE tunnel

!--- This is a unicast reply to accept the offer.

06:18:00: IN PADS from PPPoE tunnel

!--- This is a confirmation that completes the establishment.

2. Inicie a conexão PPP. O estabelecimento de PPP será iniciado agora como em qualquer outra iniciação de PPP. Depois que a sessão PPPoE é estabelecida, você pode usar os comandos show vpdn para obter o status, como mostrado aqui:

#show vpdn

%No active L2TP tunnels

%No active L2F tunnels

PPPoE Tunnel and Session Information Total tunnels 1 sessions 1

PPPoE Tunnel Information

Session count: 1

PPPoE Session Information

SID        RemMAC          LocMAC       Intf    VASt   OIntf    VC

1       0050.7359.35b7  0001.96a4.84ac  Vi1     UP     AT0     1       1

3. Obtenha informações de contagem de pacotes com o comando show vpdn session all, como mostrado aqui:

show vpdn session all

%No active L2TP tunnels

%No active L2F tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

local MAC address: 0001.96a4.84ac, remote MAC address: 0050.7359.35b7

virtual access interface: Vi1, outgoing interface: AT0, vc: 1/1

1656 packets sent, 1655 received, 24516 bytes sent, 24486 received

Outros comandos de depuração potencialmente úteis incluem debug vpdn pppoe-data, debug pppoe-errors e debug pppoe-packets.

Camada PPP

Depois que a sessão PPPoE é estabelecida, as depurações PPP são as mesmas para qualquer outro estabelecimento PPP. Os mesmos comandos debug ppp negotiation e debug ppp authentication são utilizados.

Observação: no exemplo a seguir, o nome do host é "cliente1" e o nome do Cisco 6400 remoto é "nrp-b".

Ative a negociação PPP ou a autenticação PPP da linha de comando. A saída resultante será semelhante a esta:

06:36:03: Vi1 PPP: Treating connection as a callout

06:36:03: Vi1 PPP: Phase is ESTABLISHING, Active Open [0 sess, 1 load]

06:36:03: Vi1 PPP: No remote authentication for call-out

06:36:03: Vi1 LCP: O CONFREQ [Closed] id 1 len 10

06:36:03: Vi1 LCP:    MagicNumber 0x03013D43 (0x050603013D43)

06:36:03: Vi1 LCP: I CONFACK [REQsent] id 1 len 10

06:36:03: Vi1 LCP:    MagicNumber 0x03013D43 (0x050603013D43)

06:36:05: Vi1 LCP: I CONFREQ [ACKrcvd] id 2 len 15

06:36:05: Vi1 LCP:    AuthProto CHAP (0x0305C22305)

06:36:05: Vi1 LCP:    MagicNumber 0x65E315E5 (0x050665E315E5)

06:36:05: Vi1 LCP: O CONFACK [ACKrcvd] id 2 len 15

06:36:05: Vi1 LCP:    AuthProto CHAP (0x0305C22305)

06:36:05: Vi1 LCP:    MagicNumber 0x65E315E5 (0x050665E315E5)

06:36:05: Vi1 LCP: State is Open

06:36:05: Vi1 PPP: Phase is AUTHENTICATING, by the peer [0 sess, 1 load]

06:36:05: Vi1 CHAP: I CHALLENGE id 9 len 26 from "nrp-b"

06:36:05: Vi1 CHAP: Using alternate hostname client1

06:36:05: Vi1 CHAP: Username nrp-b not found

06:36:05: Vi1 CHAP: Using default password

06:36:05: Vi1 CHAP: O RESPONSE id 9 len 28 from "client1"

06:36:05: Vi1 CHAP: I SUCCESS id 9 len 4

06:36:05: Vi1 PPP: Phase is FORWARDING [0 sess, 1 load]

06:36:05: Vi1 PPP: Phase is AUTHENTICATING [0 sess, 1 load]

06:36:05: Vi1 PPP: Phase is UP [0 sess, 1 load]

06:36:05: Vi1 IPCP: O CONFREQ [Closed] id 1 len 10

06:36:05: Vi1 IPCP:    Address 0.0.0.0 (0x030600000000)

06:36:05: Vi1 CDPCP: O CONFREQ [Closed] id 1 len 4

06:36:05: Vi1 IPCP: I CONFREQ [REQsent] id 1 len 10

06:36:05: Vi1 IPCP:    Address 8.8.8.1 (0x030608080801)

06:36:05: Vi1 IPCP:    Address 8.8.8.1 (0x030608080801)

06:36:05: Vi1 IPCP:    Address 9.9.9.2 (0x030609090902)

06:36:05: Vi1 IPCP: O CONFREQ [ACKsent] id 2 len 10

06:36:05: Vi1 IPCP:    Address 9.9.9.2 (0x030609090902)

06:36:05: Vi1 LCP: I PROTREJ [Open] id 3 len 10 protocol

CDPCP (0x820701010004)

06:36:05: Vi1 CDPCP: State is Closed

06:36:05: Vi1 IPCP: I CONFACK [ACKsent] id 2 len 10

06:36:05: Vi1 IPCP:    Address 9.9.9.2 (0x030609090902)

06:36:05: Vi1 IPCP: State is Open

06:36:05: Di1 IPCP: Install negotiated IP interface address 9.9.9.2

06:36:05: Di1 IPCP: Install route to 8.8.8.1

06:36:06: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access1,

changed state to up

Debug

Para depurar o Cisco 6400 (o servidor PPPoE), você pode usar o mesmo procedimento que parte dos constituintes básicos utilizado pelo Cisco SOHO77 (o cliente). A diferença está na camada física DSL, em que é necessário verificar o DSLAM.

1. Camada física DSL

2. Camada ATM

3. Camada de Ethernet

4. Camada PPP

Camada física DSL

Para verificar a camada física de DSL, você precisa ver as estatísticas do DSL no DSLAM. Para DSLAMs Cisco, use o comando show dsl interface.

Camada ATM

No lado do Cisco 6400, você também pode usar um comando debug atm packet e ativar o Cisco 6400 para um PVC específico.

Digite debug atm packet com parâmetros apropriados da linha de comando, como a seguir:

debug atm packet interface atm 0/0/0.182 vc 1/82

A saída resultante é semelhante a esta:

4d04h: ATM0/0/0.182(I):

VCD:0x3 VPI:0x1 VCI:0x52 Type:0x900 SAP:AAAA CTL:03 OUI:0080C2 TYPE:0007 Length:0x30

4d04h: 0000 0001 96A4 84AC 0050 7359 35B7 8864 1100 0001 000E C021 0A2E 000C 65E3

4d04h: 15E5 0000 0000

Observação: você não verá pacotes de saída com esse comando devido à maneira como os pacotes são processados.

Camada de Ethernet

Os mesmos comandos show de VPDN e depurações usados no Cisco SOHO77 podem ser usados no Cisco 6400 para verificar o estabelecimento do PPPoE.

Os exemplos a seguir mostram os comandos show e debug no contexto, junto com sua saída. Utilize esses comandos conforme necessário.

#debug vpdn pppoe-events

4d04h: IN PADI from PPPoE tunnel

4d04h: OUT PADO from PPPoE tunnel

4d04h: IN PADR from PPPoE tunnel

4d04h: PPPoE: Create session

4d04h: PPPoE: VPN session created.

4d04h: OUT PADS from PPPoE tunnel

#show vpdn

%No active L2TP tunnels

%No active L2F tunnels

PPPoE Tunnel and Session Information Total tunnels 1 sessions 1

PPPoE Tunnel Information

Session count: 1

PPPoE Session Information

SID        RemMAC          LocMAC       Intf    VASt   OIntf    VC

1       0001.96a4.84ac  0050.7359.35b7  Vi4     UP     AT0/0/0 1    82

#show vpdn session all

nrp-b#show vpdn session all

%No active L2TP tunnels

%No active L2F tunnels

PPPoE Session Information Total tunnels 1 sessions 1

session id: 1

local MAC address: 0050.7359.35b7, remote MAC address: 0001.96a4.84ac

virtual access interface: Vi4, outgoing interface: AT0/0/0, vc: 1/82

30 packets sent, 28 received, 422 bytes sent, 395 received

Outros comandos debug incluem debug vpdn pppoe-data, debug pppoe-errors e debug pppoe-packets.

Camada PPP

A seguir está a saída de depuração PPP do Cisco 6400 que corresponde à depuração anterior do Cisco SOHO77.

Insira este comando na interface de linha de comando:

debug ppp negotiation and debug ppp authentication

A saída resultante parece com:

4d04h: Vi2 PPP: Treating connection as a dedicated line

4d04h: Vi2 PPP: Phase is ESTABLISHING, Active Open [0 sess, 1 load]

4d04h: Vi2 LCP: O CONFREQ [Closed] id 1 len 15

4d04h: Vi2 LCP:    AuthProto CHAP (0x0305C22305)

4d04h: Vi2 LCP:    MagicNumber 0x65F62814 (0x050665F62814)

4d04h: Vi2 LCP: I CONFREQ [REQsent] id 1 len 10

4d04h: Vi2 LCP:    MagicNumber 0x03144FF9 (0x050603144FF9)

4d04h: Vi2 LCP: O CONFACK [REQsent] id 1 len 10

4d04h: Vi2 LCP:    MagicNumber 0x03144FF9 (0x050603144FF9)

4d04h: Vi3 LCP: I ECHOREQ [Open] id 60 len 8 magic 0xA60C0000

4d04h: Vi3 LCP: O ECHOREP [Open] id 60 len 8 magic 0x51A0BEF6

4d04h: Vi2 LCP: TIMEout: State ACKsent

4d04h: Vi2 LCP: O CONFREQ [ACKsent] id 2 len 15

4d04h: Vi2 LCP:    AuthProto CHAP (0x0305C22305)

4d04h: Vi2 LCP:    MagicNumber 0x65F62814 (0x050665F62814)

4d04h: Vi2 LCP: I CONFACK [ACKsent] id 2 len 15

4d04h: Vi2 LCP:    AuthProto CHAP (0x0305C22305)

4d04h: Vi2 LCP:    MagicNumber 0x65F62814 (0x050665F62814)

4d04h: Vi2 LCP: State is Open

4d04h: Vi2 PPP: Phase is AUTHENTICATING, by this end [0 sess, 1 load]

4d04h: Vi2 CHAP: O CHALLENGE id 10 len 26 from "nrp-b"

4d04h: Vi2 CHAP: I RESPONSE id 10 len 28 from "client1"

4d04h: Vi2 PPP: Phase is FORWARDING [0 sess, 1 load]

4d04h: Vi2 PPP: Phase is AUTHENTICATING [0 sess, 1 load]

4d04h: Vi2 CHAP: O SUCCESS id 10 len 4

4d04h: Vi2 PPP: Phase is UP [0 sess, 1 load]

4d04h: Vi2 IPCP: O CONFREQ [Closed] id 1 len 10

4d04h: Vi2 IPCP:    Address 8.8.8.1 (0x030608080801)

4d04h: Vi2 IPCP: I CONFREQ [REQsent] id 1 len 10

4d04h: Vi2 IPCP:    Address 0.0.0.0 (0x030600000000)

4d04h: Vi2 IPCP: Pool returned 9.9.9.2

4d04h: Vi2 IPCP: O CONFNAK [REQsent] id 1 len 10

4d04h: Vi2 IPCP:    Address 9.9.9.2 (0x030609090902)

4d04h: Vi2 CDPCP: I CONFREQ [Not negotiated] id 1 len 4

4d04h: Vi2 LCP: O PROTREJ [Open] id 3 len 10 protocol CDPCP (0x820701010004)

4d04h: Vi2 IPCP: I CONFACK [REQsent] id 1 len 10

4d04h: Vi2 IPCP:    Address 8.8.8.1 (0x030608080801)

4d04h: Vi2 IPCP: I CONFREQ [ACKrcvd] id 2 len 10

4d04h: Vi2 IPCP:    Address 9.9.9.2 (0x030609090902)

4d04h: Vi2 IPCP: O CONFACK [ACKrcvd] id 2 len 10

4d04h: Vi2 IPCP:    Address 9.9.9.2 (0x030609090902)

4d04h: Vi2 IPCP: State is Open

4d04h: Vi2 IPCP: Install route to 9.9.9.2

4d04h: %LINEPROTO-5-UPDOWN: Line protocol on Interface Virtual-Access2,

changed state to up

Informações Relacionadas

- Suporte técnico DSL da Cisco

- Suporte Técnico - Cisco Systems