Contents

Introdução

Pré-requisitos

Requisitos

Componentes Utilizados

Informações de Apoio

Sequência de inicialização do switch

Prompt do Switch

Procedimento de recuperação

Introdução

Este documento descreve como recuperar um Switch de data center multicamada (MDS) do Boot Loader Prompt e do Boot Mode.

Pré-requisitos

Requisitos

A Cisco recomenda que você tenha conhecimento destes tópicos:

- Comandos de configuração CLI do MDS9000

- Como configurar uma conexão de console para o switch MDS.

- Como configurar ou conectar o switch MDS a uma rede através de sua porta de gerenciamento.

- Familiaridade com TFTP.

Componentes Utilizados

As informações neste documento são baseadas no requisito de software release 6.2(9) e posterior. Este documento está usando um switch MDS9148S, switchname tempest que suporta de 12 a 48 portas Fibre Channel de 16 Gbps de taxa de linha.

As informações neste documento foram criadas a partir de dispositivos em um ambiente de laboratório específico. Todos os dispositivos utilizados neste documento foram iniciados com uma configuração (padrão) inicial. Se a rede estiver ativa, certifique-se de que você entenda o impacto potencial de qualquer comando.

Informações de Apoio

Para funcionarem corretamente, os switches MDS exigem um Kickstart não corrompido válido e uma imagem do sistema para inicializar completamente. Imagens Kickstart inválidas, corrompidas ou ausentes impedem que um switch seja inicializado e para no Prompt do Carregador de Inicialização. Um switch com uma imagem Kickstart válida, mas com uma Imagem do Sistema inválida ou ausente, termina no Modo de Inicialização.

Sequência de inicialização do switch

BIOS > Loader > Kickstart Image > System Image (Carregador > Imagem de Início Rápido > Imagem do Sistema)

1. O sistema básico de entradas e saídas (BIOS) carrega o carregador.

2. O Carregador carrega a Imagem Kickstart na RAM e inicia a Imagem Kickstart.

3. A Imagem Kickstart é carregada e inicia a Imagem do Sistema.

4. A imagem do sistema lê o arquivo de configuração de inicialização.

Prompt do Switch

Fase

Prompt

Descrição

BIOS

Não inicializável

O BIOS inicia o autoteste de inicialização e o teste de memória.

Carregador

carregador>

O carregador de inicialização descompacta o software carregado para inicializar uma imagem kickstart.

Ctrl + C (Control Key e C Key) para entrar no prompt do carregador de inicialização.

Kickstart

switch(boot)#

Quando a fase do carregador de inicialização terminar, pressione Ctrl + ] (tecla Control e tecla de Colchete direito) para entrar no modo de inicialização.

Sistema

login:

A imagem do sistema carrega o arquivo de configuração de inicialização e retorna um switch para o prompt de login.

Procedimento de recuperação

Da sessão do console do switch.

carregador>

Etapa 1. Baixe as imagens Kickstart e System do switch e coloque-as no diretório do servidor TFTP.

Neste exemplo, o endereço IP do servidor TFTP é 10.104.204.100.

Etapa 2. Configure o endereço IP de gerenciamento do switch, a máscara de sub-rede e seu gateway padrão.

Check config options in loader prompt using help option

loader> help

help    - print online help

boot     - Boot image

cmdline - <arguments>

dir     -   List Directory

help    - print online help

network -   Set network communication settings

reload  - Reboot the board.

serial  - Set serial console settings

show    - Show loader configuration

loader> net --ip=10.66.78.80 --nm=255.255.255.128 --gw=10.66.78.4

Neste exemplo:

- O endereço IP da interface mgmt0 do switch é 10.66.78.80 255.255.255.128

- O endereço IP do gateway padrão do switch é 10.66.78.4

OU

A sintaxe de atribuição de IP no prompt do carregador varia um pouco para os modelos de hardware do switch.

Exemplo listado aqui no caso de switches de malha da série T&V.

loader> set ip 10.66.78.80 255.255.255.128

loader> set gw 10.66.78.4

Observação: a configuração da etapa 2 será necessária se você estiver inicializando o switch pela primeira vez (para o switch RMA) ou se o switch tiver sido inicializado com write erase.

Etapa 3. Inicialize a imagem Kickstart, que está localizada no diretório do servidor TFTP, para trazer o switch para o modo de inicialização.

loader> boot tftp://10.104.204.100/m9100-s5ek9-kickstart-mz.8.3.1.bin

eTSEC2: Speed 1000, full duplex

Using eTSEC2 device

TFTP from server 10.104.204.100; our IP address is 10.66.78.80; sending through gateway 10.66.78.4

Filename 'm9100-s5ek9-kickstart-mz.8.3.1.bin'.

Load address: 0x8000000

Loading:         *#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#################################################################

#######

done

Bytes transferred = 26027008 (18d2400 hex)

NBI at 08000000 size 26027008

Booting image at addr 0x00800000 ...

Memory <- <0x0 0x0 0x1 0x0> (4096MB)

ethernet0: local-mac-address <- 10:05:ca:b6:c5:a0

ethernet1: local-mac-address <- 00:e0:0c:00:01:fd

ethernet2: local-mac-address <- 00:e0:0c:00:02:fd

CPU clock-frequency <- 0x3f941f80 (1067MHz)

CPU timebase-frequency <- 0x3f941f8 (67MHz)

CPU bus-frequency <- 0x1fca0fc0 (533MHz)

zImage starting: loaded at 0x00800000 (sp: 0x7fedc620)

Allocating 0x620d88 bytes for kernel ...

gunzipping (0x00000000 <- 0x00817000:0x00de3838)...done 0x5bc060 bytes

Using loader supplied ramdisk at 0x2800000-0x3de8e00

initrd head: 0x1f8b0808

Linux/PowerPC load: rw root=/dev/ram0 rdbase=0x7000000 card_index=9046 maxcpus=2 ip=off ramdisk_size=262144 noquiet obfl_type_ide=1 kgdboc=ttyS0,9600,B console=ttyS0,9600n8nn loader_ver="02.01.17" card_index=9046 quiet bootdev=mgmt0 server_ip=64.104.204.100 ksimg=m9100-s5ek9-kickstart-mz.8.3.1.bin isanimg=  Finalizing device tree... flat tree at 0xdf0140

Ísetup_arch: bootmem

mpc85xx_ds_setup_arch()

arch: exit

[    0.060378] Host controller irq 26

[    0.103390] Assign root port irq 26

[    0.144046] Host controller irq 24

[    0.193691] Assign root port irq 24

[    0.810630] physmap-flash physmap-flash.0: Could not reserve memory region

[    1.084751] Enabling all PCI devices

INIT: Checking all filesystems..r.r.r.retval=[1]

r done

WARNING: Image sync is going to be disabled after a loader netboot.

Loading system software

No system image is specified

/etc/init.d/functions: li

INIT: Sending processes the KILL signal

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

switch(boot)#

Etapa 4. Recupere o switch do modo de inicialização.

1. Verifique a configuração IP no prompt de inicialização do switch.

switch(boot)# sh ip

ip routing is disabled

Management Interface: ip address 10.66.78.80/25

ip default-gateway 10.66.78.4

Se IP Config não for encontrado, configure novamente o endereço IP de gerenciamento da interface e o endereço IP do gateway padrão, conforme mostrado.

switch(boot)# config t

Enter configuration commands, one per line. End with CNTL/Z.

switch(boot)(config)# interface mgmt 0

switch(boot)(config-if)# ip address 10.66.78.80 255.255.255.128

switch(boot)(config-if)# no shut

switch(boot)(config-if)# exit

switch(boot)(config)# ip default-gateway 10.66.78.4

switch(boot)(config)# exit

2. Teste a conectividade IP entre o servidor TFTP e o switch (a resposta do ping não está disponível no prompt do carregador).

Execute um ping do endereço IP de gerenciamento do switch a partir do servidor TFTP.

C:\Users\mpandika> ping 10.66.78.80

Pinging 10.66.78.80 with 32 bytes of data:

Reply from 10.66.78.80: bytes=32 time=2ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Reply from 10.66.78.80: bytes=32 time=3ms TTL=60

Ping statistics for 10.66.78.80:

Packets: Sent = 4, Received = 4, Lost = 0 (0% loss),

Approximate round trip times in milli-seconds:

Minimum = 2ms, Maximum = 3ms, Average = 2ms

C:\Users\mpandika>

3. Baixe as imagens Kickstart e System do servidor TFTP para o bootflash do switch.

switch(boot)# copy tftp://10.104.204.100/m9100-s5ek9-kickstart-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

switch(boot)#copy tftp://10.104.204.100/m9100-s5ek9-mz.8.3.1.bin bootflash:

Trying to connect to tftp server......

Connection to server Established. Copying Started.....

TFTP get operation was successful

Copy complete, now saving to disk (please wait)...

switch(boot)#

4. Verifique se o download das imagens do Kickstart e do Sistema foi feito com êxito no bootflash do switch.

switch(boot)# dir bootflash:

4096   Dec 22 2002 01:38:31  .partner/

297  Nov 09 2017 07:18:54  MDS201711091818530370.lic

297  Nov 09 2017 07:28:42  MDS201711091828418770.lic

4096  Jul 23 2018 14:44:25  lost+found/

26027008  Aug 08 2018 02:55:31  m9100-s5ek9-kickstart-mz.8.3.1.bin

109635731  Aug 08 2018 02:53:38  m9100-s5ek9-mz.8.3.1.bin

3430222  Feb 01 2000 02:31:30  moonlake.1.f.xsvf

23467  Jul 30 2018 12:40:56  mts.log

347607  Jul 28 2017 04:46:31  portchannel

4096  Dec 22 2002 02:38:54  scripts/

31812  Jun 30 2018 05:07:27  snmp.pcap

Usage for bootflash: filesystem

1264746496 bytes used

2106781696 bytes free

3371528192 bytes total

switch(boot)#

5. Carregue a imagem do Sistema.

switch(boot)# load bootflash:m9100-s5ek9-mz.8.3.1.bin

Uncompressing system image: bootflash:/m9100-s5ek9-mz.8.3.1.bin

CCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCCC

Load plugins that defined in image conf: /isan/plugin_img/img.conf

No Patching support on this platform

Loading plugin 0: core_plugin...

No Patching support on this platform

Enter pboot_chk_compatibility

num srgs 1

0: swid-core-s5ek9m, swid-core-s5ek9m

num srgs 1

0: swid-sup-mini-ks, swid-sup-mini-ks

INIT: Switching to runlevel: 3

INIT: Sending processes the TERM signal

switch(boot)#

INIT:

2018 Aug  8 03:13:03  %SYSLOG-2-SYSTEM_MSG : Syslogs wont be logged into logflash until logflash is online

2018 Aug  8 03:13:06  %KERN-0-SYSTEM_MSG: [    1.084751] Enabling all PCI devices - kernel

2018 Aug  8 03:14:13 switch %CARDCLIENT-2-REG: OK

System is coming up ... Please wait ...

System is coming up ... Please wait ...

2018 Aug  8 03:14:22 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Started.

System is coming up ... Please wait ...

User Access Verification

10.66.78.80 login: 2018 Aug  8 03:14:41 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Bootstrap Replay Done.

2018 Aug  8 03:14:44 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Config download success .

2018 Aug  8 03:14:45 switch %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Started.

2018 Aug  8 03:14:45 switch %PMON-SLOT1-2-PMON_CRIT_INFO: Port Monitor Critical Information: Policy (slowdrain) activation is successfull .

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_OK: Power supply 1 ok(Serial number QCS18242L8D)

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FANOK: Fan in Power supply 1 ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-PS_FAIL: Power supply 2 failed or shut down(Serial number QCS18242L0H)

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 03:14:46 switch %PLATFORM-2-FAN_OK: Fan module ok

2018 Aug  8 14:15:35 tempest %ASCII-CFG-2-CONFIG_REPLAY_STATUS: Ascii Replay Done.

User Access Verification

tempest login:

Observação: o switch foi configurado anteriormente com switchname tempest.

6. Faça login no switch.

tempest login: admin

Password:

Last login: Wed Aug  8 14:20:01 on pts/0

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained in this software are

owned by other third parties and used and distributed under

license. Certain components of this software are licensed under

the GNU General Public License (GPL) version 2.0 or the GNU

Lesser General Public License (LGPL) Version 2.1. A copy of each

such license is available at

http://www.opensource.org/licenses/gpl-2.0.php and

http://www.opensource.org/licenses/lgpl-2.1.php

tempest#

7. Verifique as variáveis de inicialização.

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

tempest#

8. Defina as variáveis de inicialização para a imagem correta.

tempest# show version

Cisco Nexus Operating System (NX-OS) Software

TAC support: http://www.cisco.com/tac

Documents: http://www.cisco.com/en/US/products/ps9372/tsd_products_support_series_home.html

Copyright (c) 2002-2018, Cisco Systems, Inc. All rights reserved.

The copyrights to certain works contained herein are owned by

other third parties and are used and distributed under license.

Some parts of this software are covered under the GNU Public

License. A copy of the license is available at

http://www.gnu.org/licenses/gpl.html.

Software

BIOS:      version 2.1.17

loader:    version N/A

kickstart: version 8.3(1)

system:    version 8.3(1)

BIOS compile time:       01/08/14

system image file is:    bootflash:///m9100-s5ek9-mz.8.3.1.bin

system compile time:     7/30/2018 12:00:00 [07/12/2018 19:32:46]

Hardware

cisco MDS 9148S 16G 48 FC (1 Slot) Chassis ("2/4/8/16 Gbps FC/Supervisor")

Motorola, e500v2 with 4088556 kB of memory.

Processor Board ID JAE18250A8C

Device name: tempest

bootflash:    4018896 kB

Kernel uptime is 0 day(s), 0 hour(s), 47 minute(s), 44 second(s)

Last reset at 362296 usecs after Wed Aug  8 13:02:31 2018

Reason: Reset Requested by CLI command reload

System version: 8.1(1)

Service:

plugin

Core Plugin

tempest# config t

Enter configuration commands, one per line.  End with CNTL/Z.

tempest(config)# boot kickstart bootflash:m9100-s5ek9-kickstart-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest(config)# boot system bootflash:m9100-s5ek9-mz.8.3.1.bin

Performing image verification and compatibility check, please wait....

tempest(config)#

9. Verifique o conjunto de Variáveis de Inicialização.

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.1.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.1.1.bin

Boot POAP Disabled

No module boot variable set

10. Salve a configuração atual do switch.

tempest# copy running-config startup-config

[########################################] 100%

Copy complete.

tempest#

11. Verifique as Variáveis de Inicialização set post copy running-config startup-config.

tempest# show boot

Current Boot Variables:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set

Boot Variables on next reload:

kickstart variable = bootflash:/m9100-s5ek9-kickstart-mz.8.3.1.bin

system variable = bootflash:/m9100-s5ek9-mz.8.3.1.bin

Boot POAP Disabled

No module boot variable set