Contents

Introduction

Prerequisites

Requirements

Components Used

背景信息

问题

解决方法

Introduction

本文描述如何禁用URL查询的高速缓冲存储器在Customer Voice Portal (CVP)语音扩展标记语言(VXML)服务器和VXML网关。

Prerequisites

Requirements

Cisco建议您有这些产品知识：

- Customer Voice Portal (CVP)

- CVP VoiceXML服务器

- Cisco IOS VXML网关

Components Used

本文的信息根据CVP 9.0(1)。

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.如果您的网络实际，请保证您了解所有命令的潜在影响。

背景信息

有问号的查询是URL (？)跟随由一个或更多name=value属性对在它。CVP VoiceXML服务器做广泛使用URL查询生成被回报给呼叫人的动态VoiceXML页。

由于每次呼叫是唯一，从URL查询检索的数据表示多余的使用缓存存储器和安全风险，因为能包括信息例如客户端帐户编号或管脚。

问题

当您运行show http client cache on命令vxml网关时，显示被交换在网关和服务器之间的http消息;在VXML网关对callserver和vxmlserver获得的http消息缓存的。

输出示例: ：

"Ref   FreshTime   Age          Size        context

---   ---------   ---          ----        -------

0     864000      249679     # 785         2BA3C46C

url: http://10.208.125.42:7000/CVP/Server?_dnis=**************&application=*******&callid=********************************&_ani=****

0     864000      245002     # 785         2BD888E0"

其他URL ：

url: http://10.168.125.42:7000/CVP/Server?_dnis=**************&application=*******&callid=********************************&_ani=****

url: http://10.168.125.43:8000/cvp/VBServlet?MSG_TYPE=********&CALL_DNIS=**************&CALL_UUI=&CALL_ANI=***************************&REC

解决方法

步骤1. URL的默认情况下高速缓冲存储器在Cisco IOS被禁用。要保证URL cahe是失效的，请运行show run命令在Cisco IOS并且保证此命令没出现：

http client cache query

Step 2.如果看起来，请勿运行http客户端高速缓存查询commad禁用http查询的高速缓冲存储器。