目录

简介

先决条件

要求

使用的组件

规则

配置

PPPoA会话终止：xDSL到7200

RFC 1483桥接：xDSL到7200

RBE:xDSL到7200

PPPoE:xDSL到7200

L2TP:通过L2TP将xDSL连接到7200

验证

故障排除

相关信息

简介

本文档提供数字用户线路(DSL)组件的一般说明，以及这些组件如何在基本DSL实施中配合使用。本文档中的示例配置显示当前使用的最常见DSL网络。您可以将这些配置用作设计宽带聚合实施的一般参考。但是，请勿将这些配置视为一个千篇一律的解决方案。每个客户和每个需求都不同，有多种方法可以实现相同的设计目标。

尽管本文档中的配置尽可能完整，但文档仅提供基本行。本文档假设用户对思科设备配置有基本的了解，并省略了许多基本命令行。仅将这些配置用作设计您自己的实施的起点。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

配置

本部分提供有关如何配置本文档所述功能的信息。

注意：使用命令查找工具(仅限注册客户)可查找有关本文档中使用的命令的详细信息。

PPPoA会话终止：xDSL到7200

网络图

本部分使用以下网络设置：

配置

本示例介绍如何通过PPP over ATM(PPPoA)将Cisco 677或其他DSL用户端设备(CPE)连接到Cisco 7200。 该配置包括Cisco Lightstream 1010(LS1010)ATM交换机，这是可选组件。如果直接将DSL接入乘数(DSLAM)连接到Cisco 7200，结果相同。

在本例中，您在Cisco 677上建立PPP会话并在Cisco 7200上终止。会话终止后，传统IP会将流量传递给网络服务提供商(NSP)或Internet。

CPE具有执行网络地址转换(NAT)/端口地址转换(PAT)的配置。 CPE还实施DHCP服务器，为以太网站分配IP地址。

本部分使用以下配置：

- PPPoA的PC配置

- PPPoA的Cisco CPE配置

- PPPoA的Cisco DSLAM配置

- PPPoA的Cisco LS1010配置

- PPPoA的Cisco 7200配置

PPPoA的PC配置

1. 设置IP编址以自动获取IP地址。

2. 设置WINS为WINS resolution使用DHCP。

3. 保证没有设置默认网关。

注意：如果DHCP无法传递此信息，则需要设置域名。

PPPoA的Cisco CPE配置

cbos> enable

Password:

cbos# set nat enable

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos# set ppp wan0-0 login

User name for wan0-0 has been set to testcpe.

cbos# set ppp wan0-0 password

Password for wan0-0 has been set to cisco.

cbos# set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos# set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

cbos# set dhcp server enable

DHCP Server enabled

cbos# set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos# set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

cbos# set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos# set password exec

Exec Password Change Successful!

cbos# set password enable

Enable Password Change Successful!

cbos# write

NVRAM written.

PPPoA的Cisco DSLAM配置

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

atm pvc 1 32 interface atm0/1 1 35

PPPoA的Cisco LS1010配置

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

PPPoA的Cisco 7200配置

aaa new-model

AAA authentication ppp default local

!

!

username password

!

!

interface ATM 2/0.1 multipoint

no ip directed-broadcast

PVC 1/35

encapsulation aal5mux ppp Virtual-Template 2

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 2

ip unnumbered FastEthernet 4/0

no ip directed-broadcast

peer default ip address pool <pool name>

ppp authentication pap

!

!

ip local pool <pool name> 172.22.40.10 172.22.40.25

RFC 1483桥接：xDSL到7200

网络图

本部分使用以下网络设置：

配置

本示例介绍如何通过RFC 1483桥接封装将Cisco 677或其他DSL CPE连接到Cisco 7200。此配置包括Cisco LS1010 ATM交换机，这是可选组件。如果直接将DSLAM连接到Cisco 7200，结果相同。

在本例中，您在Cisco 677上建立桥接会话并在Cisco 7200上终止。会话桥接到Cisco 7200后，传统IP会将流量传递到NSP或Internet。配置在7200中的DHCP服务器为客户端工作站分配IP地址。

此配置使用集成路由和桥接(IRB)。 要减轻IRB的可扩展性和安全问题，请考虑路由桥接封装(RBE)。

本部分使用以下配置：

- RFC 1483的PC配置

- RFC 1483的Cisco 677 CPE配置

- RFC 1483的Cisco DSLAM配置

- RFC 1483的Cisco LS1010配置

- RFC 1483的Cisco 7200配置

RFC 1483的PC配置

1. 设置IP编址以自动获取IP地址。

2. 设置WINS为WINS resolution使用DHCP。

3. 保证没有设置默认网关。

注意：如果DHCP无法传递此信息，则需要设置域名。

RFC 1483的Cisco 677 CPE配置

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

RFC 1483的Cisco DSLAM配置

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

RFC 1483的Cisco LS1010配置

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

RFC 1483的Cisco 7200配置

ip dhcp excluded-address 172.22.40.1 172.22.40.25

!

!

ip dhcp pool 0

network 172.22.40.0 255.255.255.0

default-router 172.22.40.9

dns-server

netbios-name-server

!

!

bridge irb

!

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5snap

bridge-group 1

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5snap

bridge-group 1!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface BVI 1

ip address 172.22.40.9 255.255.255.0

no ip directed-broadcast

!

!

bridge 1 protocol ieee

bridge 1 route ip

RBE:xDSL到7200

网络图

本部分使用以下网络设置：

配置

RBE目前是大多数新DSL安装的首选配置。RBE解决宽带用户环境中桥接的安全和可扩展性问题。

配置在7200中的DHCP服务器为客户端工作站分配IP地址。

重要信息：除了使用Cisco IOS®软件版本12.1(2)T或更高版本时，DHCP无法在未编号ATM的路由器上运行。

本部分使用以下配置：

- RBE的PC配置

- RBE的Cisco CPE配置

- RBE的Cisco DSLAM配置

- 用于RBE的思科LS1010配置

- Cisco 7200 RBE配置

RBE的PC配置

1. 设置IP编址以自动获取IP地址。

2. 设置WINS为WINS resolution使用DHCP。

3. 保证没有设置默认网关。

注意：如果DHCP无法传递此信息，则需要设置域名。

RBE的Cisco CPE配置

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

RBE的Cisco DSLAM配置

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

用于RBE的思科LS1010配置

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

Cisco 7200 RBE配置

ip dhcp excluded-address 172.22.40.1 172.22.40.25

!

!

ip dhcp pool 0

network 172.22.40.0 255.255.255.0

default-router 172.22.40.9

dns-server

netbios-name-server

!

!

interface Loopback0

ip address 172.22.40.9 255.255.255.0

!

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

ip unnumbered Loopback0

no ip directed-broadcast

ATM route-bridged ip

PVC 1/35

encapsulation aal5snap

!

!

interface ATM 2/0.2 point-to-point

ip unnumbered Loopback0

no ip directed-broadcast

ATM route-bridged ip

PVC 1/36

encapsulation aal5snap

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

PPPoE:xDSL到7200

网络图

本部分使用以下网络设置：

配置

以太网PPP(PPPoE)将PPP会话从路由器扩展到终端客户端。PPP和身份验证软件通常在客户端上运行，在操作系统内或在独立应用中运行。CPE在桥接模式下工作，以通过DSL连接桥接PPP会话。但CPE在此场景中不能充当DHCP服务器。

CPE、DSLAM和ATM交换机的配置与RFC 1483桥接的配置相同。您可以配置Cisco 7200聚合路由器进行本地身份验证，如本例所示。或者，您可以配置7200的身份验证、授权和记帐(AAA)RADIUS身份验证。

本部分使用以下配置：

- PPPoE的PC配置

- 用于PPPoE的Cisco 677 CPE配置

- PPPoE的Cisco DSLAM配置

- PPPoE的Cisco LS1010配置

- Cisco 7200 PPPoE配置

PPPoE的PC配置

1. 设置IP编址以自动获取IP地址。

2. 设置WINS为WINS resolution使用DHCP。

3. 保证没有设置默认网关。

注意：如果DHCP无法传递此信息，则需要设置域名。

注意：终端站必须能够建立到路由器的PPP连接。可能需要用于身份验证和访问的特殊客户端软件。

用于PPPoE的Cisco 677 CPE配置

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

PPPoE的Cisco DSLAM配置

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

PPPoE的Cisco LS1010配置

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

Cisco 7200 PPPoE配置

!

username <username> password <password>

!

vpdn enable

!

vpdn-group 1

accept-dialin

protocol pppoe

virtual-template 1

pppoe limit per-mac 100

pppoe limit per-vc 100

!

ip cef

!

interface atm2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5snap

protocol pppoe

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5snap

protocol pppoe

!

interface Virtual-Template1

ip unnumbered FastEthernet 4/0

no ip directed-broadcast

peer default ip address pool <pool name>

ppp authentication pap

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

ip local pool <pool name> 172.22.32.20 172.22.32.100

L2TP:通过L2TP将xDSL连接到7200

网络图

本部分使用以下网络设置：

配置

第2层隧道协议(L2TP)提供一种方法，用于终止最终用户在一个位置的PPP连接，并将第2层数据包传输到另一个位置。L2TP从聚合设备卸载大部分IP功能，并允许更集中的网络设计。RADIUS服务器提供AAA。

除Cisco 7200外的所有设备的配置与RFC 1483示例的配置相同。

本部分使用以下配置：

- L2TP的PC配置

- 用于L2TP的Cisco 677 CPE配置

- L2TP的Cisco DSLAM配置

- L2TP的Cisco LS1010配置

- Cisco 7200 L2TP接入集中器(LAC)L2TP配置

- Cisco 7200 L2TP网络服务器(LNS)L2TP配置

L2TP的PC配置

1. 设置IP编址以自动获取IP地址。

2. 设置WINS为WINS resolution使用DHCP。

3. 保证没有设置默认网关。

注意：如果DHCP无法传递此信息，则需要设置域名。

用于L2TP的Cisco 677 CPE配置

cbos> enable

Password:

cbos# set nat enable

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos# set ppp wan0-0 login

User name for wan0-0 has been set to testcpe.

cbos# set ppp wan0-0 password

Password for wan0-0 has been set to cisco.

cbos# set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos# set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

cbos# set dhcp server enable

DHCP Server enabled

cbos# set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos# set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

cbos# set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos# set password exec

Exec Password Change Successful!

cbos# set password enable

Enable Password Change Successful!

cbos# write

NVRAM written.

L2TP的Cisco DSLAM配置

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

L2TP的Cisco LS1010配置

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

用于L2TP的Cisco 7200 LAC配置

!

AAA new-model

AAA authentication login default none

AAA authentication ppp default local group radius

AAA authorization network default local group radius none

AAA accounting network default wait-start group radius

!

vpdn-group 4

request-dialin

protocol l2tp

domain cisco.com

initiate-to ip 172.22.32.27 priority 1

local name cisco-tunnel

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5mux ppp Virtual-Template1

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template1

ip unnumbered FastEthernet4/0

no ip directed-broadcast

ppp authentication pap

!

!

radius-server host 172.22.32.20 auth-port 1645 acct-port 1646

radius-server key cisco

用于L2TP的Cisco 7200 LNS配置

!

AAA new-model

AAA authentication login default none

AAA authentication ppp default local group radius

AAA authorization network default local group radius none

AAA accounting network default wait-start group radius

!

vpdn-group 1

accept-dialin

protocol any

virtual-template 1

terminate-from hostname cisco-tunnel

local name tunnel-gate

!

radius-server host 172.22.32.20 auth-port 1645 acct-port 1646

radius-server key cisco

验证

当前没有可用于此配置的验证过程。

故障排除

目前没有针对此配置的故障排除信息。

相关信息

- 非对称数字用户线(ADSL)技术支持

- 技术支持和文档