目录

简介

先决条件

要求

使用的组件

规则

问：我看到show interface命令输出中的packets dropped计数器在增加。如何排除导致此计数器递增的故障？

相关信息

简介

本文档介绍如何对show interface命令输出中的丢弃计数器进行故障排除。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档不限于特定的软件和硬件版本。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

问：我看到 show interface 命令输出中的packets dropped计数器增加。如何排除导致此计数器递增的故障？

A.自适应安全设备(ASA)的 show interface 命令输出中的packets dropped计数器表示接口上所有丢弃的数据包。此计数器包括所有与安全相关的丢包。预计此计数器在生产ASA上总是递增。同样，数据包丢弃计数器的计数定期增加也是正常的。

ciscoasa(config)# show interface ethernet 0/0 Interface Ethernet0/0 "outside", is up, line protocol is up   Hardware is i82546GB rev03, BW 100 Mbps, DLY 100 usec     Auto-Duplex(Full-duplex), Auto-Speed(100 Mbps)     Input flow control is unsupported, output flow control is off     MAC address 001b.d454.c092, MTU 1500     IP address 10.36.109.93, subnet mask 255.255.0.0     23990802 packets input, 1619288894 bytes, 0 no buffer     Received 22034675 broadcasts, 0 runts, 0 giants     0 input errors, 0 CRC, 0 frame, 0 overrun, 0 ignored, 0 abort     0 pause input, 0 resume input     58006 L2 decode drops     912400 packets output, 58393600 bytes, 0 underruns     0 pause output, 0 resume output     0 output errors, 0 collisions, 25 interface resets     0 late collisions, 0 deferred     40 input reset drops, 0 output reset drops, 0 tx hangs     input queue (blocks free curr/low): hardware (255/241)     output queue (blocks free curr/low): hardware (255/253)   Traffic Statistics for "outside":     23932752 packets input, 1184782039 bytes     912408 packets output, 25547424 bytes     1785822 packets dropped       1 minute input rate 8 pkts/sec,  429 bytes/sec       1 minute output rate 0 pkts/sec,  7 bytes/sec       1 minute drop rate, 0 pkts/sec       5 minute input rate 8 pkts/sec,  395 bytes/sec       5 minute output rate 0 pkts/sec,  7 bytes/sec       5 minute drop rate, 0 pkts/sec ciscoasa(config)#

您可以使用 show asp drop 命令来查看这些数据包丢弃的更详细原因。不要混淆packets dropped计数器和接口错误计数器。

此计数器仅对命名接口显示，因为它不代表物理错误计数器，而是ASA策略丢弃计数器。如果使用 nameif x 命令将TenGig接口设置为命名接口，则在 show interface 命令输出中会显示该接口的丢弃计数器，但如果该接口仅是port-channel的成员，则不会显示。

要通过SNMP获取每个接口的此计数器值，请使用以下OID： .1.3.6.1.2.1.2.2.1.13。

注意：请参阅《ASA命令参考》中的 show asp drop 。

相关信息

- 思科安全防火墙ASA系列命令参考，S命令

- 思科技术支持和下载