目录

简介

先决条件

要求

使用的组件

故障排除

检测连接问题

域名服务器(DNS)解析引起的连接问题

简介

本文档介绍与思科安全防火墙集成SecureX（7.1及更早版本）相关的问题。

先决条件

要求

建议掌握下列主题的相关知识：

- Firepower Management Center (FMC)

- 思科安全防火墙

- 映像的可选虚拟化

使用的组件

- 思科安全防火墙- 6.5

- Firepower管理中心(FMC) - 6.5

- 安全服务交换(SSE)

- SecureX

- 智能许可证门户

- 思科威胁响应(CTR)

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

故障排除

检测连接问题

您可以从 action_queue.log 文件检测通用连接问题。如果失败，您可以看到文件中存在此类日志：

ActionQueueScrape pl[19094]: [SF::SSE::Enrollment] canConnect: System (/usr/bin/curl -s --connect-timeout 10 -m 20 -L --max-redirs 5 --max-filesize 104857600 --capath /ngfw/etc/sf/keys/fireamp/thawte_roots -f https://api.eu.sse.itd.cisco.com/providers/sse/api/v1/regions) Failed, curl returned 28 at /ngfw/usr/local/sf/lib/perl/5.10.1/SF/System.pmline 10477.

在本例中，代码28表示操作超时并检查与Internet的连接。

并且还有代码6，它意味着DNS解析出问题

域名服务器(DNS)解析引起的连接问题

步骤1:检查连接是否工作正常。

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* getaddrinfo(3) failed for api-sse.cisco.com:443

* Couldn't resolve host 'api-sse.cisco.com'

* Closing connection 0

curl: (6) Couldn't resolve host 'api-sse.cisco.com'

输出显示设备无法解析URL  。

在这种情况下，请验证是否配置了正确的DNS服务器。可以通过专家级CLI中的 nslookup 进行验证：

root@ftd01:~# nslookup api-sse.cisco.com

;; connection timed out; no servers could be reached

输出显示未到达已配置的DNS。要确认DNS设置，请使用 show network 命令：

> show network

===============[ System Information ]===============

Hostname : ftd01

DNS Servers : x.x.x.10

Management port : 8305

IPv4 Default route

Gateway : x.x.x.1

======================[ eth0 ]======================

State : Enabled

Link : Up

Channels : Management & Events

Mode : Non-Autonegotiation

MDI/MDIX : Auto/MDIX

MTU : 1500

MAC Address : x:x:x:x:9D:A5

----------------------[ IPv4 ]----------------------

Configuration : Manual

Address : x.x.x.27

Netmask : 255.255.255.0

Broadcast : x.x.x.255

----------------------[ IPv6 ]----------------------

Configuration : Disabled

===============[ Proxy Information ]================

State : Disabled

Authentication : Disabled

在本示例中，使用了错误的DNS服务器。使用以下命令更改DNS设置：

> configure network dns x.x.x.11

之后，可以再次测试连接。这次连接成功。

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* Trying x.x.x.66...

* Connected to api-sse.cisco.com (x.x.x.66) port 443 (#0)

* ALPN, offering http/1.1

* Cipher selection: ALL:!EXPORT:!EXPORT40:!EXPORT56:!aNULL:!LOW:!RC4:@STRENGTH

* successfully set certificate verify locations:

* CAfile: none

CApath: /etc/ssl/certs

* TLSv1.2 (OUT), TLS header, Certificate Status (22):

* TLSv1.2 (OUT), TLS handshake, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Server hello (2):

* TLSv1.2 (IN), TLS handshake, Certificate (11):

* TLSv1.2 (IN), TLS handshake, Server key exchange (12):

* TLSv1.2 (IN), TLS handshake, Request CERT (13):

* TLSv1.2 (IN), TLS handshake, Server finished (14):

* TLSv1.2 (OUT), TLS handshake, Certificate (11):

* TLSv1.2 (OUT), TLS handshake, Client key exchange (16):

* TLSv1.2 (OUT), TLS change cipher, Client hello (1):

* TLSv1.2 (OUT), TLS handshake, Finished (20):

* TLSv1.2 (IN), TLS change cipher, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Finished (20):

* SSL connection using TLSv1.2 / ECDHE-RSA-AES128-GCM-SHA256

* ALPN, server accepted to use http/1.1

* Server certificate:

* subject: C=US; ST=California; L=San Jose; O=Cisco Systems, Inc.; CN=api -sse.cisco.com

* start date: 2019-12-03 20:57:56 GMT

* expire date: 2021-12-03 21:07:00 GMT

* issuer: C=US; O=HydrantID (Avalanche Cloud Corporation); CN=HydrantID S SL ICA G2

* SSL certificate verify result: self signed certificate in certificate c hain (19), continuing anyway.

> GET / HTTP/1.1

> Host: api-sse.cisco.com

> User-Agent: curl/7.44.0

> Accept: */*

>

< HTTP/1.1 403 Forbidden

< Date: Wed, 08 Apr 2020 01:27:55 GMT

< Content-Type: text/plain; charset=utf-8

< Content-Length: 9

< Connection: keep-alive

< Keep-Alive: timeout=5

< ETag: "5e17b3f8-9"

< Cache-Control: no-store

< Pragma: no-cache

< Content-Security-Policy: default-src 'self'

< X-Content-Type-Options: nosniff

< X-XSS-Protection: 1; mode=block

< Strict-Transport-Security: max-age=31536000; includeSubdomains;

SSE门户注册问题

FMC和 Cisco Secure Firewall 都需要在其管理界面上连接到SSE URL。

要测试连接，请在具有root访问权限的 Firepower CLI 上输入以下命令：

curl -v https://api-sse.cisco.com/providers/sse/services/registration/api/v2/clients --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://est.sco.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://eventing-ingest.sse.itd.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

curl -v https://mx01.sse.itd.cisco.com --cacert /ngfw/etc/ssl/connectorCA.pem

使用以下命令可绕过证书检查：

root@ftd01:~# curl -v -k https://api-sse.cisco.com

* Rebuilt URL to: https://api-sse.cisco.com/

* Trying x.x.x.66...

* Connected to api-sse.cisco.com (x.x.x.66) port 443 (#0)

* ALPN, offering http/1.1

* Cipher selection: ALL:!EXPORT:!EXPORT40:!EXPORT56:!aNULL:!LOW:!RC4:@STRENGTH

* successfully set certificate verify locations:

* CAfile: none

CApath: /etc/ssl/certs

* TLSv1.2 (OUT), TLS header, Certificate Status (22):

* TLSv1.2 (OUT), TLS handshake, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Server hello (2):

* TLSv1.2 (IN), TLS handshake, Certificate (11):

* TLSv1.2 (IN), TLS handshake, Server key exchange (12):

* TLSv1.2 (IN), TLS handshake, Request CERT (13):

* TLSv1.2 (IN), TLS handshake, Server finished (14):

* TLSv1.2 (OUT), TLS handshake, Certificate (11):

* TLSv1.2 (OUT), TLS handshake, Client key exchange (16):

* TLSv1.2 (OUT), TLS change cipher, Client hello (1):

* TLSv1.2 (OUT), TLS handshake, Finished (20):

* TLSv1.2 (IN), TLS change cipher, Client hello (1):

* TLSv1.2 (IN), TLS handshake, Finished (20):

* SSL connection using TLSv1.2 / ECDHE-RSA-AES128-GCM-SHA256

* ALPN, server accepted to use http/1.1

* Server certificate:

* subject: C=US; ST=California; L=San Jose; O=Cisco Systems, Inc.; CN=api -sse.cisco.com

* start date: 2019-12-03 20:57:56 GMT

* expire date: 2021-12-03 21:07:00 GMT

* issuer: C=US; O=HydrantID (Avalanche Cloud Corporation); CN=HydrantID S SL ICA G2

* SSL certificate verify result: self signed certificate in certificate c hain (19), continuing anyway.

> GET / HTTP/1.1

> Host: api-sse.cisco.com

> User-Agent: curl/7.44.0

> Accept: */*

>

< HTTP/1.1 403 Forbidden

< Date: Wed, 08 Apr 2020 01:27:55 GMT

< Content-Type: text/plain; charset=utf-8

< Content-Length: 9

< Connection: keep-alive

< Keep-Alive: timeout=5

< ETag: "5e17b3f8-9"

< Cache-Control: no-store

< Pragma: no-cache

< Content-Security-Policy: default-src 'self'

< X-Content-Type-Options: nosniff

< X-XSS-Protection: 1; mode=block

< Strict-Transport-Security: max-age=31536000; ,;

注意：消 403 Forbidden 息意味着从测试发送的参数不是SSE期望的值，但是这足以验证连接。

验证SSEConnector状态

验证连接器属性（如图所示）。

# more /ngfw/etc/sf/connector.properties

registration_interval=180

connector_port=8989

connector_fqdn=api-sse.cisco.com

要检查SSEConnector和EventHandler之间的连接，请使用此命令。以下是连接错误的示例：

root@firepower:/etc/sf# netstat -anlp | grep EventHandler_SSEConnector.sock

unix 2 [ ACC ] STREAM LISTENING 3022791165 11204/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.sock

在已建立的连接示例中，验证流状态是否为connected：

root@firepower:/etc/sf# netstat -anlp | grep EventHandler_SSEConnector.sock

unix 2 [ ACC ] STREAM LISTENING 382276 7741/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.sock

unix 3 [ ] STREAM CONNECTED 378537 7741/EventHandler /ngfw/var/sf/run/EventHandler_SSEConnector.soc

验证发送到SSE门户和CTR的数据

要将事件从Cisco安全防火墙设备发送到SSE，需要与https://eventing-ingest.sse.itd.cisco.com建立TCP连接

以下是SSE门户和Cisco安全防火墙之间未建立连接的示例：

root@firepower:/ngfw/var/log/connector# lsof -i | grep conn

connector 60815 www 10u IPv4 3022789647 0t0 TCP localhost:8989 (LISTEN)

connector 60815 www 12u IPv4 110237499 0t0 TCP firepower.cisco.com:53426->ec2-100-25-93-234.compute-1.amazonaws.com:https (SYN_SENT)

在 connector.log 日志中：

time="2020-04-13T14:34:02.88472046-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.246:443: getsockopt: connection timed out"

time="2020-04-13T14:38:18.244707779-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

time="2020-04-13T14:42:42.564695622-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.246:443: getsockopt: connection timed out"

time="2020-04-13T14:47:48.484762429-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

time="2020-04-13T14:52:38.404700083-05:00" level=error msg="[firepower.cisco.com][events.go:90 events:connectWebSocket] dial tcp x.x.x.234:443: getsockopt: connection timed out"

注意：请注意，显示的IP地址x.x.x.246和1x.x.x.246属于https://eventing-ingest.sse.itd.cisco.com可能会发生变化。建议允许基于URL而不是IP地址流向SSE门户的流量。

如果未建立此连接，则不会将事件发送到SSE门户。以下是Ciscp安全防火墙和SSE门户之间已建立连接的示例：

root@firepower:# lsof -i | grep conn

connector 13277   www   10u  IPv4 26077573      0t0  TCP localhost:8989 (LISTEN)

connector 13277   www   19u  IPv4 26077679      0t0  TCP x.x.x.200:56495->ec2-35-172-147-246.compute-1.amazonaws.com:https (ESTABLISHED)