目录

简介

先决条件

要求

使用的组件

规则

配置

网络图

配置

启动传感器配置

将传感器添加到IME

为Cisco IOS路由器配置TCP重置

验证

发起攻击并重置TCP

故障排除

技巧

相关信息

简介

本文档讨论使用IPS Manager Express(IME)配置入侵防御系统(IPS)TCP重置。IME和IPS传感器用于管理思科路由器以执行TCP重置。查看此配置时，请记住以下项：

- 安装传感器并确保传感器工作正常。

- 使嗅探接口跨度到接口外部的路由器。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档中的信息基于以下软件和硬件版本：

- 思科IPS管理器Express 7.0

- 思科IPS传感器7.0(0.88)E3

- 带Cisco IOS软件版本12.4的Cisco IOS®路由器

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您使用的是真实网络，请确保您已经了解所有命令的潜在影响。

规则

有关文件规则的更多信息请参见“ Cisco技术提示规则”。

配置

网络图

本文档使用此图所示的网络设置。

配置

本文档使用此处所示的配置。

- 路由器灯

- 路由器 House

路由器灯

Current configuration : 906 bytes

!

version 12.4

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname light

!

enable password cisco

!

username cisco password 0 cisco

ip subnet-zero

!

!

!

ip ssh time-out 120

ip ssh authentication-retries 3

!

call rsvp-sync

!

!

!

fax interface-type modem

mta receive maximum-recipients 0

!

controller E1 2/0

!

!

!

interface FastEthernet0/0

ip address 10.100.100.2 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet0/1

ip address 1.1.1.1 255.255.255.0

duplex auto

speed auto

!

interface BRI4/0

no ip address

shutdown

!

interface BRI4/1

no ip address

shutdown

!

interface BRI4/2

no ip address

shutdown

!

interface BRI4/3

no ip address

shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 10.100.100.1

ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

!

line con 0

line 97 108

line aux 0

line vty 0 4

login

!

end

路由器 House

Current configuration : 939 bytes

!

version 12.4

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname house

!

logging queue-limit 100

enable password cisco

!

ip subnet-zero

!

!

no ip cef

no ip domain lookup

!

ip audit notify log

ip audit po max-events 100

!

!

no voice hpi capture buffer

no voice hpi capture destination

!

!

!

!

interface FastEthernet0/0

ip address 10.66.79.210 255.255.255.224

duplex auto

speed auto

!

interface FastEthernet0/1

ip address 10.100.100.1 255.255.255.0

duplex auto

speed auto

!

interface ATM1/0

no ip address

shutdown

no atm ilmi-keepalive

!

ip classless

ip route 0.0.0.0 0.0.0.0 10.66.79.193

ip route 1.1.1.0 255.255.255.0 10.100.100.2

no ip http server

no ip http secure-server

!

!

!

!

call rsvp-sync

!

!

mgcp profile default

!

!

line con 0

exec-timeout 0 0

line aux 0

line vty 0 4

exec-timeout 0 0

password cisco

login

line vty 5 15

login

!

!

end

启动传感器配置

完成以下步骤以开始配置传感器。

1. 如果这是您首次登录传感器，则必须输入cisco作为用户名，cisco作为密码。

2. 系统提示时，请更改密码。

注意：Cisco123是字典词，系统中不允许使用。

3. 键入setup并完成系统提示，以便为传感器设置基本参数。

4. 输入此信息：

sensor5#setup

--- System Configuration Dialog ---

!--- At any point you may enter a question mark '?' for help. !--- Use ctrl-c to abort the configuration dialog at any prompt. !--- Default settings are in square brackets '[]'.

Current Configuration:

networkParams

ipAddress 10.66.79.195

netmask 255.255.255.224

defaultGateway 10.66.79.193

hostname Corp-IPS

telnetOption enabled

!--- Permit the IP address of workstation or network with IME

accessList ipAddress 10.66.79.0 netmask 255.255.255.0

exit

timeParams

summerTimeParams

active-selection none

exit

exit

service webServer

general

ports 443

exit

exit

5. 保存配置。

传感器保存配置可能需要几分钟。

[0] Go to the command prompt without saving this config.

[1] Return back to the setup without saving this config.

[2] Save this configuration and exit setup.

Enter your selection[2]: 2

将传感器添加到IME

要将传感器添加到IME中，请完成以下步骤：

1. 转到安装了IPS Manager Express的Windows PC，然后打开IPS Manager Express。

2. 选择“主页”>“添加”。

3. 键入此信息并单击OK以完成配置。

4. 选择Devices > Corp-IPS以验证传感器状态，然后右键单击以选择Device Status。

确保您看到订阅已成功打开。

为Cisco IOS路由器配置TCP重置

要配置Cisco IOS路由器的TCP重置，请完成以下步骤：

1. 从IME PC打开Web浏览器，然后转到https://10.66.79.195。

2. 单击OK以接受从传感器下载的HTTPS证书。

3. 在登录窗口中，输入cisco作为用户名，123cisco123作为密码。

此IME管理界面显示：

4. 在“配置”选项卡中，单击“活动签名”。

5. 然后单击“签名向导”。

6. 在向导中，选择Yes,然后选择String TCP作为签名引擎。单击 Next。

7. 您可以保留此信息，或输入您自己的签名ID、签名名称和用户注释。单击 Next。

8. 选择Event Action,然后选择Produce Alert and Reset TCP Connection。单击OK，然后单击Next以继续。

9. 输入正则表达式，testattack在本示例中使用。输入23作为服务端口，选择To Service作为方向，然后单击Next以继续。

10. 您可以将此信息保留为默认值。单击 Next。

11. 单击Finish以完成向导。

12. 选择Configuration > sig0 > Active Signatures，以便通过Sig ID或Sig Name找到新创建的签名。单击Edit以查看签名。

13. 确认后，单击“OK（确定）” ，然后单击“Apply（应用）”按钮，将签名应用于传感器。

验证

发起攻击并重置TCP

要发起攻击并重置TCP，请完成以下步骤：

1. 在启动攻击之前，请转至IME，选择Event Monitoring > Dropped Attacks View，然后选择右侧的传感器。

2. 从路由器指示灯Telnet至路由器房间并进入testatck。

单击<space>或<enter>以重置Telnet会话。

light#telnet 10.100.100.1

Trying 10.100.100.1 ... Open

User Access Verification

Password:

house>en

Password:

house#testattack

[Connection to 10.100.100.1 closed by foreign host]

!--- Telnet session has been reset due to the !--- signature "String.tcp" triggered.

3. 在IPS事件查看器的控制面板中，一旦攻击启动，就会显示红色警报。

故障排除

本部分提供的信息可用于对配置进行故障排除。

技巧

使用以下故障排除提示：

- Shunning使用命令和控制端口对路由器访问控制列表(ACL)进行重新编程。 TCP重置从传感器的嗅探接口发送。在交换机中设置span时，请使用set span <src_mod/src_port><dest_mod/dest_port>命令，并启用两个传入数据包，如下所示。

banana (enable)set span 2/12 3/6 both inpkts enable

Overwrote Port 3/6 to monitor transmit/receive traffic of Port 2/12

Incoming Packets enabled. Learning enabled. Multicast enabled.

banana (enable)

banana (enable)

banana (enable)show span

Destination     : Port 3/6

!--- connect to sniffing interface of the sensor

Admin Source    : Port 2/12

!--- connect to FastEthernet0/0 of Router House

Oper Source     : Port 2/12

Direction       : transmit/receive

Incoming Packets: enabled

Multicast       : enabled

- 如果TCP重置正在工作，请检查是否触发了操作类型TCP重置的警报。如果出现警报，请检查签名类型是否设置为TCP重置。

使用服务帐户su登录根并发出此命令。此命令假设传感接口设置为eth0。

[root@sensor1 root]#tcpdump -i eth0 -n

注意：将100tcp重置发送到受害者/目标，然后将100tcp重置发送到攻击者/客户端。

以下是输出示例：

03:06:00.598777 64.104.209.205.1409 >

10.66.79.38.telnet: R 107:107(0) ack 72 win 0

03:06:00.598794 64.104.209.205.1409 >

10.66.79.38.telnet: R 108:108(0) ack 72 win 0

03:06:00.599360 10.66.79.38.telnet >

64.104.209.205.1409: R 72:72(0) ack 46 win 0

03:06:00.599377 10.66.79.38.telnet >

64.104.209.205.1409: R 73:73(0) ack 46 win 0

相关信息

- 思科安全入侵防御支持页

- 思科安全入侵防御系统文档

- 技术支持和文档 - Cisco Systems