Contents

Introduction

Prerequisites

Requirements

Components Used

Conventions

Configure

Network Diagram

配置

配置传感器

添加传感器到导向器

配置PIX的避开

Verify

在您发起攻击前

发起攻击和规避

Troubleshoot

Related Information

Introduction

本文描述如何在Cisco IDS Unix Director (以前叫作Netranger导向器)和传感器帮助下配置在PIX的避开。本文假设，传感器和导向器是可操作的，并且传感器的探测接口设置跨过到PIX外部接口。

Prerequisites

Requirements

本文档没有任何特定的前提条件。

Components Used

本文档中的信息基于以下软件和硬件版本。

- Cisco IDS Unix Director 2.2.3

- Cisco IDS UNIX传感器3.0.5

- 与6.1.1的Cisco Secure PIX

Note: 如果使用6.2.x版本，您能使用安全套接协议(SSH)不是管理，但是Telnet。欲知详情参考Cisco Bug ID CSCdx55215 (仅限注册用户)。

The information in this document was created from the devices in a specific lab environment.All of the devices used in this document started with a cleared (default) configuration.If your network is live, make sure that you understand the potential impact of any command.

Conventions

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

Configure

本部分提供用于配置本文档所述功能的信息。

Cisco IDS Unix Director和传感器用于为了管理避开的Cisco Secure PIX。当您考虑此配置时，请切记这些概念：

- 安装传感器并且适当地确定传感器工作。

- 保证探测接口间距对PIX的外部接口。

Note: 为了找到关于用于本文的命令的其他信息，请参见命令查找工具(仅限注册用户)。

Network Diagram

本文档使用此网络设置。

配置

本文档使用以下配置。

- 路由器灯

- PIX Tiger

路由器灯

Current configuration : 906 bytes

!

version 12.2

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname light

!

enable password cisco

!

username cisco password 0 cisco

ip subnet-zero

!

!

!

ip ssh time-out 120

ip ssh authentication-retries 3

!

call rsvp-sync

!

!

!

fax interface-type modem

mta receive maximum-recipients 0

!

controller E1 2/0

!

!

!

interface FastEthernet0/0

ip address 100.100.100.2 255.255.255.0

duplex auto

speed auto

!

interface FastEthernet0/1

ip address 1.1.1.1 255.255.255.0

duplex auto

speed auto

!

interface BRI4/0

no ip address

shutdown

!

interface BRI4/1

no ip address

shutdown

!

interface BRI4/2

no ip address

shutdown

!

interface BRI4/3

no ip address

shutdown

!

ip classless

ip route 0.0.0.0 0.0.0.0 100.100.100.1

ip http server

ip pim bidir-enable

!

!

dial-peer cor custom

!

!

line con 0

line 97 108

line aux 0

line vty 0 4

login

!

end

PIX Tiger

PIX Version 6.1(1)

nameif gb-ethernet0 intf2 security10

nameif gb-ethernet1 intf3 security15

nameif ethernet0 outside security0

nameif ethernet1 inside security100

enable password 2KFQnbNIdI.2KYOU encrypted

passwd 9jNfZuG3TC5tCVH0 encrypted

hostname Tiger

fixup protocol ftp 21

fixup protocol http 80

fixup protocol h323 1720

fixup protocol rsh 514

fixup protocol rtsp 554

fixup protocol smtp 25

fixup protocol sqlnet 1521

fixup protocol sip 5060

fixup protocol skinny 2000

names

!--- Allows ICMP traffic and HTTP to pass through the PIX !--- to the Web Server.

access-list 101 permit icmp any host 100.100.100.100

access-list 101 permit tcp any host 100.100.100.100 eq www

pager lines 24

logging on

logging buffered debugging

interface gb-ethernet0 1000auto shutdown

interface gb-ethernet1 1000auto shutdown

interface ethernet0 auto

interface ethernet1 auto

mtu intf2 1500

mtu intf3 1500

mtu outside 1500

mtu inside 1500

ip address intf2 127.0.0.1 255.255.255.255

ip address intf3 127.0.0.1 255.255.255.255

ip address outside 100.100.100.1 255.255.255.0

ip address inside 10.66.79.203 255.255.255.224

ip audit info action alarm

ip audit attack action alarm

no failover

failover timeout 0:00:00

failover poll 15

failover ip address intf2 0.0.0.0

failover ip address intf3 0.0.0.0

failover ip address outside 0.0.0.0

failover ip address inside 0.0.0.0

pdm history enable

arp timeout 14400

global (outside) 1 interface

nat (inside) 1 0.0.0.0 0.0.0.0 0 0

!--- Static NAT for the Web Server.

static (inside,outside) 100.100.100.100 10.66.79.204

netmask 255.255.255.255 0 0

access-group 101 in interface outside

route outside 0.0.0.0 0.0.0.0 100.100.100.2 1

route inside 10.66.0.0 255.255.0.0 10.66.79.193 1

timeout xlate 3:00:00

timeout conn 1:00:00 half-closed 0:10:00 udp 0:02:00 rpc 0:10:00

h323 0:05:00 s0

timeout uauth 0:05:00 absolute

aaa-server TACACS+ protocol tacacs+

aaa-server RADIUS protocol radius

aaa-server LOCAL protocol tacacs+

no snmp-server location

no snmp-server contact

snmp-server community public

no snmp-server enable traps

floodguard enable

no sysopt route dnat

!--- Allows Sensor Telnet to the PIX from the inside interface.

telnet 10.66.79.199 255.255.255.255 inside

telnet timeout 5

ssh timeout 5

terminal width 80

Cryptochecksum:b4c820ba31fbb3996ca8891503ebacbc

: end

配置传感器

这些步骤描述如何配置传感器。

1. 远程登录到与用户名根和密码攻击的10.66.79.199。

2. 输入sysconfig-sensor。

3. 输入此信息：

1. IP地址：10.66.79.199

2. IP网络掩码：255.255.255.224

3. IP主机名字：sensor-2

4. 默认路由：10.66.79.193

5. 网络访问控制

10.

6. 通信基础架构

传感器主机标识符：49

传感器组织ID ：900

传感器主机名：sensor-2

传感器组织名字：cisco

传感器IP地址：10.66.79.199

IDS管理器主机标识符：50

IDS管理器组织ID ：900

IDS管理器主机名：dir3

IDS管理器组织名字：cisco

IDS管理器IP地址：10.66.79.201

4. 保存配置。传感器然后重新启动。

添加传感器到导向器

完成这些步骤为了添加传感器到导向器。

1. 远程登录到与用户名netrangr和密码攻击的10.66.79.201。

2. 输入ovw&为了启动HP OpenView。

3. 在主菜单，请选择Security > Configure。

4. 在Netranger配置菜单，请选择File > Add Host，并且其次点击。

5. 输入此信息，并且其次点击。

6. 留下默认设置并且其次点击。

7. 如果值是可接受的，请更改日志并且避开分钟或留下他们作为默认值。更改网络接口名称到您的探测接口的名字。在本例中，它是"iprb0"。它可以是根据传感器类型或别的"spwr0"，并且您如何连接传感器。

8. 其次请点击，直到有点击完成的选项。

传感器成功地当前添加到导向器。如此示例所显示，从主菜单， sensor-2显示。

配置PIX的避开

完成这些步骤为了配置PIX的避开。

1. 在主菜单，请选择Security > Configure。

2. 在Netranger配置菜单，请突出显示sensor-2并且双击它。

3. 打开设备管理。

4. 如此示例所显示，点击Devices > Add并且输入信息。单击 OK 以继续。Telnet和特权密码是都“Cisco”。

5. 点击Shunning > Add。请勿添加主机100.100.100.100在“地址下避开”。单击 OK 以继续。

6. 点击Shunning > Add并且选择sensor-2.cisco作为避开服务器。配置的这部分完成。关上Device Management窗口。

7. 打开Intrusion Detection Window并且点击受保护的网络。添加10.66.79.1到10.66.79.254到受保护的网络。

8. 点击配置文件并且选择手工的Configuration>修改签名。选择大ICMP数据流和ID ：2151，点击修改，并且从无避开和记录更改动作。单击 OK 以继续。

9. 选择ICMP溢出和ID ：2152，点击修改，并且从无避开和记录更改动作。单击 OK 以继续。

10. 配置的这部分完成。点击OK键为了关上Intrusion Detection Window。

11. 打开系统文件文件夹并且打开Daemons窗口。保证您启用了这些守护程序：

12. 点击OK键为了继续和选择您修改的版本。点击“Save” >适用。等待系统告诉您传感器完成，重新启动服务，并且关上Netranger配置的所有窗口。

Verify

此部分提供帮助您适当地确认您的配置工作的信息。

在您发起攻击前

Tiger(config)# show telnet

10.66.79.199 255.255.255.255 inside

Tiger(config)# who

0: 10.66.79.199

Tiger(config)# show xlate

1 in use, 1 most used

Global 100.100.100.100 Local 10.66.79.204 static

Light#ping 100.100.100.100

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 100.100.100.100, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 112/195/217 ms

Light#telnet 100.100.100.100 80

Trying 100.100.100.100, 80 ... Open

发起攻击和规避

Light#ping

Protocol [ip]:

Target IP address: 100.100.100.100

Repeat count [5]: 100000

Datagram size [100]: 18000

Timeout in seconds [2]:

Extended commands [n]:

Sweep range of sizes [n]:

Type escape sequence to abort.

Sending 100000, 18000-byte ICMP Echos to 100.100.100.100, timeout is 2 seconds:

!....................

Success rate is 4 percent (1/21), round-trip min/avg/max = 281/281/281 ms

Light#telnet 100.100.100.100 80

Trying 100.100.100.100, 80 ...

% Connection timed out; remote host not responding

Tiger(config)# show shun

Shun 100.100.100.2 0.0.0

Tiger(config)# show shun stat

intf2=OFF, cnt=0

intf3=OFF, cnt=0

outside=ON, cnt=2604

inside=OFF, cnt=0

intf4=OFF, cnt=0

intf5=OFF, cnt=0

intf6=OFF, cnt=0

intf7=OFF, cnt=0

intf8=OFF, cnt=0

intf9=OFF, cnt=0

Shun 100.100.100.2 cnt=403, time=(0:01:00).0 0 0

因为避开设置为十五分钟，十五分钟后，它回到正常。

Tiger(config)# show shun

Tiger(config)# show shun stat

intf2=OFF, cnt=0

intf3=OFF, cnt=0

outside=OFF, cnt=4437

inside=OFF, cnt=0

intf4=OFF, cnt=0

intf5=OFF, cnt=0

intf6=OFF, cnt=0

intf7=OFF, cnt=0

intf8=OFF, cnt=0

intf9=OFF, cnt=0

Light#ping 100.100.100.100

Type escape sequence to abort.

Sending 5, 100-byte ICMP Echos to 100.100.100.100, timeout is 2 seconds:

!!!!!

Success rate is 100 percent (5/5), round-trip min/avg/max = 1/3/4 ms

Light#telnet 100.100.100.100 80

Trying 100.100.100.100, 80 ... Open

Troubleshoot

目前没有针对此配置的故障排除信息。

Related Information

- Cisco IDS Director的END销售

- End-of - Cisco IDS传感器软件版本3.x的生活

- 思科入侵防御系统产品技术支持

- 思科PIX防火墙软件产品技术支持

- Cisco Secure PIX防火墙命令参考

- Technical Support & Documentation - Cisco Systems