目录

简介

先决条件

要求

使用的组件

规则

背景信息

恢复程序

相关信息

简介

本文档介绍Cisco Catalyst第2层和Cisco Catalyst第3层固定配置交换机的密码恢复过程。

先决条件

要求

本文档没有任何特定的要求。

使用的组件

本文档基于交换机2900XL/3500XL、2940、2950/2955、2960、2970、3550、3560和3750系列。

本文档中的信息都是基于特定实验室环境中的设备编写的。本文档中使用的所有设备最初均采用原始（默认）配置。如果您的网络处于活动状态，请确保您了解所有命令的潜在影响。

规则

有关文档规则的详细信息，请参阅 Cisco 技术提示规则。

背景信息

本文档介绍了 Cisco Catalyst 第 2 层固定配置交换机 2900XL/3500XL、2940、2950/2955、2960 和 2970 系列以及 Cisco Catalyst 第 3 层固定配置交换机 3550、3560 和 3750 系列的口令恢复过程。

恢复程序

要恢复密码，请执行以下操作：

1. 将终端或带终端仿真的 PC（例如超级终端）与交换机的控制台端口连接。

使用以下终端设置：

- 每秒位数（波特）：9600

- 数据位：8

- 奇偶校验：无

- 停止位：1

- 流量控制：Xon/Xoff

注意：有关将终端布线和连接到控制台端口的其他信息，请参阅将终端连接到Catalyst交换机的控制台端口。

2. 拔下电源线。

3. 为交换机通电并将其带到switch：提示符：

对于 2900XL、3500XL、2940、2950、2960、2970、3550、3560 和 3750 系列交换机，执行以下操作：

将电源线重新连接到交换机时，请按住位于前面板左侧的模式按钮。

Catalyst 交换机系列

LED 行为和模式按钮释放操作

2900XL、3500XL 和 3550

当overPort1的LED熄灭时，松开模式按钮。

2940 、2950

在大约 5 秒之后当状态 (STAT) LED 熄灭时，释放模式按钮。松开Mode按钮时，SYSTLED会闪烁，呈琥珀色。

2960 、2970

当SYSTLED闪烁琥珀色，然后变为稳定绿色时，释放Mode按钮。松开Mode按钮时，SYSTLED闪烁绿色。

3560 和 3750

在大约 15 秒之后当 SYST LED 转为稳定的绿色时，释放模式按钮。释放模式按钮之后，SYST LED 闪烁绿色。

注：LED指示灯的位置可能会因型号而稍有变化。

Catalyst 3524XL

Catalyst 3524XL

Catalyst 2950-24

Catalyst 2950-24

只适用于 2955 系列交换机：

Catalyst 2955 系列交换机不使用外部模式按钮进行口令恢复。相反，交换机引导加载器使用中断键检测来停止自动引导序列，以便恢复密码。中断序列由使用的终端应用程序和操作系统决定。在Windows 2000上运行的超术语使用Ctrl + Break。在运行UNIX的工作站上,Ctrl-C是break键。有关详细信息，请参阅口令恢复过程中的标准break key序列组合。

下一个示例使用Hyperterm在2955上进入switch：模式。

C2955 Boot Loader (C2955-HBOOT-M) Version 12.1(0.0.514), CISCO DEVELOPMENT TEST

VERSION

Compiled Fri 13-Dec-02 17:38 by madison

WS-C2955T-12 starting...

Base ethernet MAC Address: 00:0b:be:b6:ee:00

Xmodem file system is available.

Initializing Flash...

flashfs[0]: 19 files, 2 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 7741440

flashfs[0]: Bytes used: 4510720

flashfs[0]: Bytes available: 3230720

flashfs[0]: flashfs fsck took 7 seconds.

...done initializing flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

*** The system will autoboot in 15 seconds ***

Send break character to prevent autobooting.

!--- Wait until you see this message before !--- you issue the break sequence.

!--- Ctrl+Break is entered using Hyperterm.

The system has been interrupted prior to initializing the flash file system to finish

loading the operating system software:

flash_init

load_helper

boot

switch:

4.发出flash_init命令。

switch: flash_init

Initializing Flash...

flashfs[0]: 143 files, 4 directories

flashfs[0]: 0 orphaned files, 0 orphaned directories

flashfs[0]: Total bytes: 3612672

flashfs[0]: Bytes used: 2729472

flashfs[0]: Bytes available: 883200

flashfs[0]: flashfs fsck took 86 seconds

....done Initializing Flash.

Boot Sector Filesystem (bs:) installed, fsid: 3

Parameter Block Filesystem (pb:) installed, fsid: 4

switch:

!--- This output is from a 2900XL switch. Output from

!--- other switches will vary slightly.

5.发出load_helper命令。

switch: load_helper

switch:

6.发出dir flash: 命令。

注：确保在dir flash后面键入冒号(:)。

此时将显示交换机文件系统：

switch: dir flash:

Directory of flash:/

2    -rwx  1803357   <date>               c3500xl-c3h2s-mz.120-5.WC7.bin

!--- This is the current version of software.

4    -rwx  1131      <date>               config.text

!--- This is the configuration file.

5    -rwx  109       <date>               info

6    -rwx  389       <date>               env_vars

7    drwx  640       <date>               html

18   -rwx  109       <date>               info.ver

403968 bytes available (3208704 bytes used)

switch:

!--- This output is from a 3500XL switch. Output from

!--- other switches will vary slightly.

1. 键入rename flash:config.text flash:config.old重命名配置文件。

switch: rename flash:config.text flash:config.old

switch:

!--- The config.text file contains the password

!--- definition.

2. 发出boot命令以引导系统。

switch: boot

Loading "flash:c3500xl-c3h2s-mz.120-5.WC7.bin"...###############################

################################################################################

######################################################################

File "flash:c3500xl-c3h2s-mz.120-5.WC7.bin" uncompressed and installed, entry po

int: 0x3000

executing...

!--- Output suppressed.

!--- This output is from a 3500XL switch. Output from other switches

!--- will vary slightly.

3. 在提示符处输入“n”以中止初始配置对话。

--- System Configuration Dialog ---

At any point you can enter a question mark '?' for help.

Use ctrl-c to abort configuration dialog at any prompt.

Default settings are in square brackets '[]'.

Continue with configuration dialog? [yes/no]: n

!--- Type "n" for no.

Press RETURN to get started.

!--- Press Return or Enter.

Switch>

!--- The Switch> prompt is displayed.

4. 在 switch 提示符处，键入 en 以进入启用模式。

Switch>en

Switch#

5. 键入rename flash:config.old flash:config.text将配置文件重命名为其原始名称。

Switch#rename flash:config.old flash:config.text

Destination filename [config.text]

!--- Press Return or Enter.

Switch#

6. 将配置文件复制到内存中。

Switch#copy flash:config.text system:running-config

Destination filename [running-config]?

!--- Press Return or Enter.

1131 bytes copied in 0.760 secs

Sw1#

此时会重新加载配置文件。

7. 覆盖您不知道的当前口令。选择一个至少具有一个大写字母、一个数字和一个特殊字符的强口令。

注：覆盖所需的密码。不需要覆盖所有提及的口令。

Sw1#configure terminal

!--- To overwrite existing secret password

Sw1(config)#enable secret

!--- To overwrite existing enable password

Sw1(config)#enable password

!--- To overwrite existing vty password

Sw1(config)#line vty 0 15

Sw1(config-line)#password

Sw1(config-line)#login

!--- To overwrite existing console password

Sw1(config-line)#line con 0

Sw1(config-line)#password

8. 使用 write memory 命令将运行配置写入配置文件。

Sw1#write memory

Building configuration...

[OK]

Sw1#

相关信息

- 思科技术支持和下载