目錄

簡介

必要條件

需求

採用元件

慣例

程式

相關資訊

簡介

不同的供應商擴展了標準屬性值對（AV對）以滿足特定需求。思科引入的AV對統稱為供應商特定屬性，其中一個稱為Cisco AV對。

本檔案將說明如何將多個Cisco AV配對或任何多值屬性新增到使用者設定檔中。

必要條件

需求

本文件沒有特定需求。

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- Solaris 8

- 存取註冊器3.0R8

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

程式

不能一次新增Cisco AV對或多值屬性。如果一次新增一個，則僅保留最後一個AV對或屬性，因為它會覆蓋其他屬性。

使用的正確語法為：

set Cisco-Avpair "vpdn:l2tp-tunnel-password=XYZ" "vpdn:tunnel-type=l2tp"

"vpdn:tunnel-id=tunnel23" "vpdn:ip-addresses=10.10.10.1"

注意：除非值中有空格，否則絕對不需要雙引號。在這種情況下，不需要雙引號。整個命令必須在一行上輸入。由於空間原因，已將其包裝到本文檔的第二行。

以下範例顯示如何執行aregcmd中的步驟：

--> cd /Radius/Profiles/default-PPP-users/Attributes/

[ //localhost/Radius/Profiles/default-PPP-users/Attributes ]

Ascend-Idle-Limit = 1800

Framed-Compression = "VJ TCP/IP header compression"

Framed-MTU = 1500

Framed-Protocol = PPP

Framed-Routing = None

Service-Type = Framed

!--- This command is brought down to a second line !--- for spatial reasons. Keep this command on one line when you !--- enter it.

--> set Cisco-Avpair "vpdn:l2tp-tunnel-password=XYZ" "vpdn:tunnel-type=l2tp"

"vpdn:tunnel-id=tunnel23" "vpdn:ip-addresses=10.10.10.1"

!--- This command is brought down to a second line !--- for spatial reasons. Keep this command on one line when you !--- enter it.

Set Cisco-Avpair vpdn:l2tp-tunnel-password=XYZ vpdn:tunnel-type=l2tp

vpdn:tunnel-id=tunnel23 vpdn:ip-addresses=10.10.10.1

--> ls

[ //localhost/Radius/Profiles/default-PPP-users/Attributes ]

Ascend-Idle-Limit = 1800

Cisco-Avpair = vpdn:l2tp-tunnel-password=XYZ

Cisco-Avpair = vpdn:tunnel-type=l2tp

Cisco-Avpair = vpdn:tunnel-id=tunnel23

Cisco-Avpair = vpdn:ip-addresses=10.10.10.1

!--- All av-pairs are successfully added.

Framed-Compression = "VJ TCP/IP header compression"

Framed-MTU = 1500

Framed-Protocol = PPP

Framed-Routing = None

Service-Type = Framed

相關資訊

- Cisco Access Registrar支援頁面

- TACACS+屬性 — 值對

- RADIUS屬性 — 值對

- 技術支援與文件 - Cisco Systems