目錄

簡介

必要條件

需求

採用元件

慣例

背景資訊

設定

網路圖表

組態

驗證

疑難排解

疑難排解指令

相關資訊

簡介

本文檔提供了一個配置示例，用於使用撥號程式配置檔案在每個站點使用一個B通道通過ISDN橋接兩個不同的站點。

必要條件

需求

在嘗試此配置之前，您需要從ISDN服務提供商處收集此資訊：

- ISDN交換器型別

- ISDN服務配置檔案識別符號(SPID)和本地目錄號碼(LDN)（如果適用）。在北美，除5ESS自定義點對點外，所有ISDN交換機型別都需要SPID。LDN是路由器的本地七位ISDN電話號碼（無區號）。DMS-100需要LDN。

您還需要收集以下網路資訊：

- 點對點協定(PPP)主機名 — 您必須為兩台裝置分配PPP客戶端名稱。

- 首選使用PPP身份驗證型別 — 質詢握手身份驗證協定(CHAP)身份驗證，在本示例中使用。

- PPP口令 — 您必須為所有位置分配PPP口令。

- IP地址資訊 — 必須建立IP網路設計。

- 電話號碼 — 兩個位置的ISDN電話號碼。

- 使用者名稱和密碼。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

背景資訊

撥號程式設定檔允許將實體介面的組態與呼叫所需的邏輯組態分開。使用撥號程式設定檔時，邏輯和實體組態會根據每個呼叫動態繫結。

注意：您無法在一個B通道上橋接，而在另一個通道上路由。

設定

本節提供用於設定本檔案中所述功能的資訊。

注意：要查詢有關本文檔中使用的命令的其他資訊，請使用命令查詢工具(僅限註冊客戶)。

網路圖表

本檔案會使用以下網路設定：

組態

路由器1

Current configuration:

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

hostname Router1

no ip routing

!

enable password foo

!

username Router2 password bar

username Router3 password bar

isdn switch-type basic-5ess

!

interface Ethernet0

ip address 10.1.1.1 255.255.255.0

media-type 10BaseT

bridge-group 1

!

interface BRI0

no ip address

no ip mroute-cache

encapsulation ppp

no ip route-cache

dialer pool-member 1

ppp authentication chap

!

interface Dialer0

no ip address

no ip mroute-cache

encapsulation ppp

no ip route-cache

dialer remote-name Router2

dialer string 5552323

dialer pool 1

dialer-group 2

no fair-queue

no cdp enable

ppp authentication chap

bridge-group 1

!

interface Dialer1

no ip address

no ip mroute-cache

encapsulation ppp

no ip route-cache

dialer remote-name Router3

dialer string 5553434

dialer pool 1

dialer-group 2

no cdp enable

ppp authentication chap

bridge-group 1

!

dialer-list 2 protocol bridge permit

bridge 1 protocol ieee

end

路由器2

Current configuration:

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

hostname Router2

no ip routing

!

enable password foo

!

username Router1 password bar

isdn switch-type basic-5ess

!

interface Ethernet0

ip address 10.1.1.2 255.255.255.0

no ip route-cache

bridge-group 1

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

dialer pool-member 1

!

interface Dialer0

no ip address

encapsulation ppp

no ip route-cache

dialer remote-name Router1

dialer string 5551212

dialer pool 1

dialer-group 2

no fair-queue

no cdp enable

ppp authentication chap

bridge-group 1

!

dialer-list 2 protocol bridge permit

bridge 1 protocol ieee

!

end

路由器3

Current configuration:

!

version 11.2

service udp-small-servers

service tcp-small-servers

!

hostname Router3

no ip routing

!

username Router1 password bar

isdn switch-type basic-5ess

!

interface Ethernet0

ip address 10.1.1.3 255.255.255.0

no ip route-cache

bridge-group 1

!

interface BRI0

no ip address

encapsulation ppp

no ip route-cache

dialer pool-member 1

ppp authentication chap

!

interface Dialer0

no ip address

encapsulation ppp

no ip route-cache

dialer remote-name Router1

dialer string 5551212

dialer pool 1

dialer-group 2

no cdp enable

ppp authentication chap

bridge-group 1

!

dialer-list 2 protocol bridge permit

bridge 1 protocol ieee

!

end

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

本節提供的資訊可用於對組態進行疑難排解。

疑難排解指令

輸出直譯器工具(僅供註冊客戶使用)支援某些show命令，此工具可讓您檢視show命令輸出的分析。

注意：發出debug命令之前，請參閱有關Debug命令的重要資訊。

- debug ppp authentication — 檢視客戶端是否通過身份驗證。如果您使用Cisco IOS®軟體版本11.2之前的版本，請改用debug ppp chap命令。

- debug ppp negotiation — 檢視使用者端是否通過點對點通訊協定(PPP)協商；這是當您檢查地址協商時。

- debug ppp error — 顯示與PPP連線協商和操作相關的協定錯誤和錯誤統計資訊。

- debug isdn q931 — 在使用者撥入時檢查ISDN連線，以檢視ISDN呼叫的情況（例如，如果連線被丟棄）。

- show isdn status — 狀態應為：

layer 1 = active

layer 2 = MULTIPLE_FRAMES_ESTABLISHED

如果第1層處於非活動狀態，則佈線介面卡或埠可能損壞或未插入。如果第2層處於TEI_Assign狀態，則路由器不會與交換機通訊。

- show bridge — 檢視網橋轉發資料庫中條目的類。

- show span — 顯示路由器已知的生成樹拓撲。

相關資訊

- 撥號技術支援頁面

- 技術支援 - Cisco Systems