目錄

簡介

說明

簡介

本文檔擴展了另一文檔瞭解OSPF中轉發地址的選擇中介紹的概念，並說明了使用NX-OS（Cisco Nexus系列乙太網交換機的網路作業系統）時的區別。

說明

根據上述文檔，使用以下規則在自治系統邊界路由器(ASBR)上選擇轉發地址：

1.如果區域中配置了環回介面，則選擇環回介面的IP地址作為轉發地址(FA)。

2.如果不符合第一個條件，則選擇開放最短路徑優先(OSPF)介面清單上第一個介面的IP地址作為轉發地址。您可以使用show ip ospf interface brief命令檢視OSPF介面清單。頂部介面是連線到OSPF的最後一個介面。

但是，第二個規則不適用於NX-OS。

在NX-OS中，如果沒有環回介面，OSPF介面ID將確定轉發地址。

具有最高ID的介面的IP地址被選為FA，無論該介面是否被動。

請注意，介面ID是動態的，在系統重新載入後可能會更改。

如果某個介面從OSPF中刪除並新增回來，則如果在刪除和新增操作之間將另一個新介面新增到OSPF中，其OSPF介面清單中的ID可能會發生變化。

原因是OSPF介面ID資源被循環使用。

從OSPF介面清單中刪除某個介面後，分配的介面ID將循環使用，即在將另一個介面新增到OSPF介面時，該ID將分配給該介面。

僅當所有回收的ID耗盡時，才會為下一個OSPF介面分配新的介面ID。

範例如下：

show ip ospf interface brief vrf A

OSPF Process ID 10 VRF A

Total number of interface: 4

Interface               ID     Area            Cost   State    Neighbors Status

Vlan101                452    0.0.0.7         5      BDR      2         up

Vlan201                678    0.0.0.7         100    DR       0         up <—————— highest ID = FA

Vlan301                160    0.0.0.7         100    DR       0         up

Po11                247    0.0.0.7         1000   P2P      1         up

- 從OSPF中刪除VLAN201時，釋放ID 678。

- 然後，當vlan 202新增到OSPF時，ID 678將分配給vlan 202。

- 然後將VLAN 201新增回來，為VLAN 201分配一個更大的新ID。

show ip ospf interface brief vrf B

OSPF Process ID 10 VRF B

Total number of interface: 4

Interface               ID     Area            Cost   State    Neighbors Status

Vlan102                490    0.0.0.7         5      BDR      2         up    <——————  highest ID = FA

Vlan202                51     0.0.0.7         100    DR       0         up

Vlan302                102    0.0.0.7         100    DR       0         up

Po12                275    0.0.0.7         1000   P2P      1         up

interface Vlan101

vrf member A

ip address 192.168.1.1/24 <-----FA

interface Vlan102

vrf member B

ip address 10.1.1.1/24 <---------FA

N7K#show ospf data nssa-external172.16.1.140 det vrf A

OSPF Router with ID () (Process ID 21)

Type-7 AS External Link States (Area 7)

LS age: 162

Options: (No TOS-capability, Type 7/5 translation, No DC)

LS Type: AS External Link

Link State ID: 172.16.1.140 (External Network Number )

Advertising Router: 100.1.1.1

LS Seq Number:80000012

Checksum: 0x504c

Length: 36

Network Mask:255.255.255.255

Metric Type: 1 (Comparable directly to link state metric)

TOS: 0

Metric: 20

Forward Address: 192.168.1.1 ←--- Vlan101

External Route Tag: 0

N7K# show ip ospf data extroute172.16.1.150 det vrf B

OSPF Router with ID () (Process ID 10 VRF B)

Type-5 AS External Link States

LS age: 323

Options: 0x20 (No TOS-capability, DC)

LS Type: Type-5 AS-External

Link State ID:route172.16.1.150 (Network address)

Advertising Router:100.1.1.2

LS Seq Number: 0x8000008f

Checksum: 0x9691

Length: 36

Network Mask: /32

Metric Type: 1 (Same units as link state path)

TOS: 0

Metric: 20

Forward Address: 10.1.1.1 ←--- Vlan 102

External Route Tag: 0