目錄

簡介

必要條件

需求

採用元件

慣例

設定

PPPoA作業階段終止：xDSL到7200

RFC 1483橋接：xDSL到7200

RBE:xDSL到7200

PPPoE:xDSL到7200

L2TP:通過L2TP到7200的xDSL

驗證

疑難排解

相關資訊

簡介

本文提供數字使用者線路(DSL)元件的一般說明，以及這些元件在基本DSL實現中的配合方式。本文檔中的配置示例顯示了當前使用的最常見DSL網路。您可以使用這些配置作為設計寬頻聚合實施的一般參考。但是，請勿將這些配置視為cookie-cutter解決方案。每個客戶和每個需求都各不相同，有多種方法可以實現相同的設計目標。

雖然本文檔中的配置儘可能完整，但文檔只提供基本的行。本檔案假設使用者對思科裝置組態有基本瞭解，且省略了許多基本命令列。僅將這些配置用作設計您自己的實施的起點。

必要條件

需求

本文件沒有特定需求。

採用元件

本文件所述內容不限於特定軟體和硬體版本。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

設定

本節提供用於設定本文件中所述功能的資訊。

註：使用Command Lookup Tool(僅限註冊客戶)查詢有關本文檔中使用的命令的更多資訊。

PPPoA作業階段終止：xDSL到7200

網路圖表

本節使用以下網路設定：

組態

此範例說明如何透過ATM(PPPoA)將Cisco 677或其他DSL使用者端裝置(CPE)連線到Cisco 7200。 該配置包括可選元件Cisco Lightstream 1010(LS1010)ATM交換機。如果您直接將DSL存取倍增器(DSLAM)連線到Cisco 7200，結果相同。

在本示例中，您在Cisco 677上建立PPP會話並在Cisco 7200上終止。會話終止後，傳統IP會將流量傳遞到網路服務提供商(NSP)或網際網路。

CPE具有執行網路地址轉換(NAT)/埠地址轉換(PAT)的配置。 CPE還實施DHCP伺服器以將IP地址分配給乙太網站。

本節使用以下配置：

- PPPoA的PC配置

- 適用於PPPoA的Cisco CPE組態

- 適用於PPPoA的Cisco DSLAM組態

- 適用於PPPoA的Cisco LS1010組態

- 適用於PPPoA的Cisco 7200組態

PPPoA的PC配置

1. 設定IP編址以自動獲取IP地址。

2. 將WINS設定為使用DHCP進行WINS解析。

3. 確保未設定預設網關。

注意：如果DHCP無法傳遞此資訊，則需要設定域名。

適用於PPPoA的Cisco CPE組態

cbos> enable

Password:

cbos# set nat enable

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos# set ppp wan0-0 login

User name for wan0-0 has been set to testcpe.

cbos# set ppp wan0-0 password

Password for wan0-0 has been set to cisco.

cbos# set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos# set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

cbos# set dhcp server enable

DHCP Server enabled

cbos# set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos# set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

cbos# set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos# set password exec

Exec Password Change Successful!

cbos# set password enable

Enable Password Change Successful!

cbos# write

NVRAM written.

適用於PPPoA的Cisco DSLAM組態

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

atm pvc 1 32 interface atm0/1 1 35

適用於PPPoA的Cisco LS1010組態

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

適用於PPPoA的Cisco 7200組態

aaa new-model

AAA authentication ppp default local

!

!

username password

!

!

interface ATM 2/0.1 multipoint

no ip directed-broadcast

PVC 1/35

encapsulation aal5mux ppp Virtual-Template 2

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template 2

ip unnumbered FastEthernet 4/0

no ip directed-broadcast

peer default ip address pool <pool name>

ppp authentication pap

!

!

ip local pool <pool name> 172.22.40.10 172.22.40.25

RFC 1483橋接：xDSL到7200

網路圖表

本節使用以下網路設定：

組態

此範例介紹如何透過RFC 1483橋接封裝將Cisco 677或其他DSL CPE連線到Cisco 7200。此配置包括可選元件Cisco LS1010 ATM交換機。如果將DSLAM直接連線到Cisco 7200，結果相同。

在本示例中，您在Cisco 677上建立橋接會話，並在Cisco 7200上終止。會話橋接到Cisco 7200後，傳統IP會將流量傳遞到NSP或網際網路。在7200中配置了的DHCP伺服器為客戶端工作站分配IP地址。

此組態使用整合路由和橋接(IRB)。 要降低IRB的可擴充性和安全性問題，請考慮路由橋接封裝(RBE)。

本節使用以下配置：

- RFC 1483的PC配置

- Cisco 677 CPE配置，適用於RFC 1483

- 適用於RFC 1483的Cisco DSLAM組態

- 適用於RFC 1483的Cisco LS1010組態

- 適用於RFC 1483的Cisco 7200組態

RFC 1483的PC配置

1. 設定IP編址以自動獲取IP地址。

2. 將WINS設定為使用DHCP進行WINS解析。

3. 確保未設定預設網關。

注意：如果DHCP無法傳遞此資訊，則需要設定域名。

Cisco 677 CPE配置，適用於RFC 1483

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

適用於RFC 1483的Cisco DSLAM組態

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

適用於RFC 1483的Cisco LS1010組態

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

適用於RFC 1483的Cisco 7200組態

ip dhcp excluded-address 172.22.40.1 172.22.40.25

!

!

ip dhcp pool 0

network 172.22.40.0 255.255.255.0

default-router 172.22.40.9

dns-server

netbios-name-server

!

!

bridge irb

!

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5snap

bridge-group 1

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5snap

bridge-group 1!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface BVI 1

ip address 172.22.40.9 255.255.255.0

no ip directed-broadcast

!

!

bridge 1 protocol ieee

bridge 1 route ip

RBE:xDSL到7200

網路圖表

本節使用以下網路設定：

組態

目前，RBE是大多數新DSL安裝的首選配置。RBE解決了寬頻使用者環境中橋接的安全和可擴充性問題。

在7200中配置了的DHCP伺服器為客戶端工作站分配IP地址。

重要事項：除非使用Cisco IOS®軟體版本12.1(2)T或更新版本，否則DHCP無法在具有未編號ATM的路由器上執行。

本節使用以下配置：

- RBE的PC配置

- 適用於RBE的Cisco CPE組態

- 適用於RBE的Cisco DSLAM組態

- 適用於RBE的Cisco LS1010組態

- 適用於RBE的Cisco 7200組態

RBE的PC配置

1. 設定IP編址以自動獲取IP地址。

2. 將WINS設定為使用DHCP進行WINS解析。

3. 確保未設定預設網關。

注意：如果DHCP無法傳遞此資訊，則需要設定域名。

適用於RBE的Cisco CPE組態

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

適用於RBE的Cisco DSLAM組態

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

適用於RBE的Cisco LS1010組態

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

適用於RBE的Cisco 7200組態

ip dhcp excluded-address 172.22.40.1 172.22.40.25

!

!

ip dhcp pool 0

network 172.22.40.0 255.255.255.0

default-router 172.22.40.9

dns-server

netbios-name-server

!

!

interface Loopback0

ip address 172.22.40.9 255.255.255.0

!

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

ip unnumbered Loopback0

no ip directed-broadcast

ATM route-bridged ip

PVC 1/35

encapsulation aal5snap

!

!

interface ATM 2/0.2 point-to-point

ip unnumbered Loopback0

no ip directed-broadcast

ATM route-bridged ip

PVC 1/36

encapsulation aal5snap

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

PPPoE:xDSL到7200

網路圖表

本節使用以下網路設定：

組態

乙太網路PPP(PPPoE)將PPP作業階段從路由器延伸至終端使用者端。PPP和身份驗證軟體通常在作業系統或獨立應用程式中的客戶端上運行。CPE以橋接模式工作，以便通過DSL連線橋接PPP會話。但是，在此場景中，CPE不能充當DHCP伺服器。

CPE、DSLAM和ATM交換機的配置與RFC 1483橋接的配置相同。您可以配置Cisco 7200聚合路由器以進行本地身份驗證，如以下示例所示。或者，您可以將7200設定為驗證、授權和計量(AAA)RADIUS驗證。

本節使用以下配置：

- PPPoE的PC配置

- 適用於PPPoE的Cisco 677 CPE配置

- 適用於PPPoE的Cisco DSLAM組態

- 適用於PPPoE的Cisco LS1010組態

- 適用於PPPoE的Cisco 7200組態

PPPoE的PC配置

1. 設定IP編址以自動獲取IP地址。

2. 將WINS設定為使用DHCP進行WINS解析。

3. 確保未設定預設網關。

注意：如果DHCP無法傳遞此資訊，則需要設定域名。

註：終端站必須能夠與路由器建立PPP連線。可能需要用於身份驗證和訪問的特殊客戶端軟體。

適用於PPPoE的Cisco 677 CPE配置

cbos# set bridging rfc1483 enabled

!--- Use write, then reboot for the changes to take effect.

cbos# set bridging management enable

cbos# set int eth0 address 172.22.40.25

!--- You use this IP address for management purposes only.

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# write

NVRAM written.

cbos# reboot

適用於PPPoE的Cisco DSLAM組態

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

適用於PPPoE的Cisco LS1010組態

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

適用於PPPoE的Cisco 7200組態

!

username <username> password <password>

!

vpdn enable

!

vpdn-group 1

accept-dialin

protocol pppoe

virtual-template 1

pppoe limit per-mac 100

pppoe limit per-vc 100

!

ip cef

!

interface atm2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5snap

protocol pppoe

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5snap

protocol pppoe

!

interface Virtual-Template1

ip unnumbered FastEthernet 4/0

no ip directed-broadcast

peer default ip address pool <pool name>

ppp authentication pap

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

ip local pool <pool name> 172.22.32.20 172.22.32.100

L2TP:通過L2TP到7200的xDSL

網路圖表

本節使用以下網路設定：

組態

第二層通道通訊協定(L2TP)提供了一種方法，可在一個位置終止來自終端使用者的PPP連線，並將第二層封包傳輸至另一個位置。L2TP從匯聚裝置解除安裝大部分IP功能，並允許進行更集中的網路設計。RADIUS伺服器提供AAA。

除Cisco 7200以外的所有裝置的配置與RFC 1483示例的配置相同。

本節使用以下配置：

- L2TP的PC配置

- 適用於L2TP的Cisco 677 CPE配置

- 適用於L2TP的Cisco DSLAM組態

- 適用於L2TP的Cisco LS1010組態

- 適用於L2TP的Cisco 7200 L2TP存取集中器(LAC)組態

- 適用於L2TP的Cisco 7200 L2TP網路伺服器(LNS)組態

L2TP的PC配置

1. 設定IP編址以自動獲取IP地址。

2. 將WINS設定為使用DHCP進行WINS解析。

3. 確保未設定預設網關。

注意：如果DHCP無法傳遞此資訊，則需要設定域名。

適用於L2TP的Cisco 677 CPE配置

cbos> enable

Password:

cbos# set nat enable

NAT is now enabled

You must use "write" then reboot for changes to take effect.

cbos# set ppp wan0-0 login

User name for wan0-0 has been set to testcpe.

cbos# set ppp wan0-0 password

Password for wan0-0 has been set to cisco.

cbos# set ppp wan0-0 ipcp 0.0.0.0

PPP wan0-0 IPCP Address set to 0.0.0.0

cbos# set int wan0-0 close

cbos# set int wan0-0 vpi 1

cbos# set int wan0-0 vci 32

cbos# set int wan0-0 open

cbos# set int eth0 address 172.22.10.254

eth0 ip address changed from 10.0.0.1 to 172.22.10.254

cbos# set int eth0 netmask 255.255.255.0

eth0 netmask changed from 255.255.255.0 to 255.255.255.0

cbos# set dhcp server enable

DHCP Server enabled

cbos# set dhcp server pool 0 ip 172.22.10.0

Pool 0 IP parameter is now 172.22.10.0

cbos# set dhcp server pool 0 netmask 255.255.255.0

Pool 0 netmask parameter is now 255.255.255.0

cbos# set dhcp server pool 0 gateway 172.22.10.254

Pool 0 gateway parameter is now 172.22.10.254

cbos# set password exec

Exec Password Change Successful!

cbos# set password enable

Enable Password Change Successful!

cbos# write

NVRAM written.

適用於L2TP的Cisco DSLAM組態

hostname 6260

! Subtending Port - Will set as shutdown

interface atm0/2

shutdown

slot 1 atuc-1-4dmt

!

dsl-profile fast

dmt codeword-size downstream 16 upstream 16

dmt bitrate maximum interleaved downstream 8032 upstream 832

!

interface atm1/1

dsl profile fast

ATM PVC 1 32 interface atm0/1 1 35

適用於L2TP的Cisco LS1010組態

interface ATM 0/1/2

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

ATM pvp 1 interface ATM 0/0/2 1

適用於L2TP的Cisco 7200 LAC組態

!

AAA new-model

AAA authentication login default none

AAA authentication ppp default local group radius

AAA authorization network default local group radius none

AAA accounting network default wait-start group radius

!

vpdn-group 4

request-dialin

protocol l2tp

domain cisco.com

initiate-to ip 172.22.32.27 priority 1

local name cisco-tunnel

!

interface ATM 2/0

no ip address

no ip directed-broadcast

no ATM ilmi-keepalive

!

!

interface ATM 2/0.1 point-to-point

no ip directed-broadcast

PVC 1/35

encapsulation aal5mux ppp Virtual-Template1

!

!

interface ATM 2/0.2 point-to-point

no ip directed-broadcast

PVC 1/36

encapsulation aal5mux ppp Virtual-Template1

!

!

interface FastEthernet 4/0

ip address 172.22.32.1 255.255.255.0

no ip directed-broadcast

!

!

interface Virtual-Template1

ip unnumbered FastEthernet4/0

no ip directed-broadcast

ppp authentication pap

!

!

radius-server host 172.22.32.20 auth-port 1645 acct-port 1646

radius-server key cisco

適用於L2TP的Cisco 7200 LNS組態

!

AAA new-model

AAA authentication login default none

AAA authentication ppp default local group radius

AAA authorization network default local group radius none

AAA accounting network default wait-start group radius

!

vpdn-group 1

accept-dialin

protocol any

virtual-template 1

terminate-from hostname cisco-tunnel

local name tunnel-gate

!

radius-server host 172.22.32.20 auth-port 1645 acct-port 1646

radius-server key cisco

驗證

目前沒有適用於此組態的驗證程序。

疑難排解

目前尚無適用於此組態的具體疑難排解資訊。

相關資訊

- 非對稱式數位使用者線路(ADSL)技術支援

- 技術支援與檔案