目錄

簡介

必要條件

需求

採用元件

慣例

拓撲

新增一個節點

最終配置

ML 1

ML 2

ML 3

相關資訊

簡介

本檔案介紹將一個或多個節點新增至適用於Cisco ONS 15454的ML卡上的彈性封包環(RPR)的程式。

必要條件

需求

思科建議您瞭解以下主題：

- Cisco ONS 15454

- 思科ONS 15454 ML系列乙太網卡

- Cisco IOS®軟體

- 橋接和IP路由

採用元件

本文中的資訊係根據以下軟體和硬體版本：

- 運行ONS 4.1.3版的Cisco ONS 15454。

- 執行Cisco IOS軟體版本12.1(19)EO1的ML（作為ONS 4.1.3版本的一部分捆綁）。

注意：本文檔中的配置基於RPR橋接解決方案。

本文中的資訊是根據特定實驗室環境內的裝置所建立。文中使用到的所有裝置皆從已清除（預設）的組態來啟動。如果您的網路正在作用，請確保您已瞭解任何指令可能造成的影響。

慣例

如需文件慣例的詳細資訊，請參閱思科技術提示慣例。

拓撲

彈性封包環(RPR)是一種標準型第2層架構，針對突發資料流量進行最佳化。RPR啟用基於環路的架構，而無需乙太網生成樹或SONET/SDH保護方案，並且仍然為乙太網和IP服務提供不到50毫秒的環收斂時間。RPR提供SONET型別的保護，無需預留頻寬。RPR可以與SONET保護配合使用，也可以不配合使用。ML卡上的RPR在Packet Over SONET(POS)介面和乙太網介面之間引入了另一個點。共用封包環(SPR)介面是提供此連結的虛擬介面。對於RPR，兩個POS埠都充當SPR介面的成員。SPR介面自動執行保護包裝。

圖1表示通過SONET的ONS 15454節點上的POS埠之間的兩條電路。每個ML卡上的單個SPR1介面處理RPR功能。

圖1 — 雙節點彈性資料包環

新增第三個節點後，SONET上節點的POS埠中15454有三條電路(請參見圖2)。

圖2 — 三節點彈性分組環

新增一個節點

完成以下步驟，以便向RPR新增一個節點：

1. 關閉ML1上要向其中新增新節點的span的POS埠。此處的埠為POS 1埠：

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#shutdown

ML1(config-if)#^Z

2. 關閉ML2上要向其中新增新節點的SPAN的POS埠。在此案例中，連線埠為POS 0:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#shutdown

ML2(config-if)#^Z

3. 刪除RPR的相鄰節點之間的同步傳輸訊號(STS)路徑(請參見圖3)。

圖3 — 刪除STS路徑

4. 驗證RPR上是否仍存在乙太網連線（具有客戶的測試集和路由表）。

5. 新增新的節點(假設節點已設定為目標識別符號(TID)、IP地址、SONET埠IS、啟用SONET資料通訊通道(SDCC)等)。

6. 將ML配置上載到新節點(ML 3)。 請參閱最終配置一節中的ML 3配置。

7. 構建兩個新的電路（並確保選擇IS作為電路狀態），從ML2的POS 0到ML3的POS 1，以及從ML3的POS 0到ML1的POS 1(請參見圖4)。 檢查稽核日誌以檢視電路是否進入ADMIN_IS或ADMIN_OOS。

圖4 — 新增兩個新電路

8. 對ML 1中面向新節點的POS 1埠執行no shutdown:

ML1#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML1(config)#interface POS 1

ML1(config-if)#no shutdown

ML1(config-if)#^Z

9. 在ML 2中面向新節點的POS 0埠上執行no shutdown:

ML2#configuration terminal

Enter configuration commands, one per line.  End with CNTL/Z.

ML2(config)#interface POS 0

ML2(config-if)#no shutdown

ML2(config-if)#^Z

10. 驗證RPR上是否仍存在乙太網連線（使用客戶的測試集和路由表）

11. 插入節點後，監控乙太網流量至少持續一小時。

最終配置

本節提供ML 1、ML 2和ML3的最終配置。

ML 1

ML1#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML1

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 1

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password ww

line vty 0 4

exec-timeout 50 0

password ww

login

!

end

ML 2

ML2#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML2

!

enable password CISCO15

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 2

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

ML 3

ML3#show run

Building configuration...

Current configuration : 1238 bytes

!

version 12.1

no service pad

service timestamps debug uptime

service timestamps log uptime

no service password-encryption

!

hostname ML3

!

enable password cisco

!

ip subnet-zero

!

!

bridge irb

!

!

interface SPR1

no ip address

no keepalive

spr station-id 3

bridge-group 1

bridge-group 1 spanning-disabled

hold-queue 150 in

!

interface FastEthernet0

no ip address

bridge-group 1

bridge-group 1 spanning-disabled

!

interface FastEthernet1

no ip address

shutdown

!

interface FastEthernet2

no ip address

shutdown

!

interface FastEthernet3

no ip address

shutdown

!

interface FastEthernet4

no ip address

shutdown

!

interface FastEthernet5

no ip address

shutdown

!

interface FastEthernet6

no ip address

shutdown

!

interface FastEthernet7

no ip address

shutdown

!

interface FastEthernet8

no ip address

shutdown

!

interface FastEthernet9

no ip address

shutdown

!

interface FastEthernet10

no ip address

shutdown

!

interface FastEthernet11

no ip address

shutdown

!

interface POS0

no ip address

spr-intf-id 1

crc 32

!

interface POS1

no ip address

spr-intf-id 1

crc 32

!

ip classless

no ip http server

!

!

!

!

line con 0

exec-timeout 5 5

password cisco

line vty 0 4

exec-timeout 50 0

password cisco

login

!

end

相關資訊

- 配置彈性資料包環

- 技術支援與文件 - Cisco Systems